WinCris Help

Crisis Recovery Disk Build

The WinCris.EXE is a application for creating the Phoenix Crisis Recovery Disk (CRD).

This program is capable to create the MINI-DOS CRD running under NT operating

system or Windows 95 and later.  The FULL-DOS CDR can only be created running

under Windows 95 or later operating systems.


Click this to browse through folders to locate the project tip with the BIOS.ROM file.


Click to close and exit application. Do not forget to remove Diskette.


Click to create a new Crisis Recovery Diskette (make sure that you selected the correct Disk Option first). This opens the Format Dialog. You must select Start to format the Diskette and then Close to complete the Crisis Recovery Build process.


Provides a place for you to type the location of the project tip. If you are not sure of the project tip location, click Browse. You can also make a temporary network connection by typing the path to a shared computer in this box.


Displays the progress when creating the Crisis Recovery Disk.


Check to format a new diskette.


Check to create FULL-DOS Crisis Recovery Diskette (the Crisis Recovery disk’s file system is based on your system Operating System).  This requires the Bootblock code to support the FULL-DOS option.


Check to create MINI-DOS Crisis Recovery Diskette (the Crisis Recovery disk’s file system is the Phoenix Technologies Ltd. Minidos). This requires the Bootblock code to support the MINI-DOS option.