Copyright: Intel(R) PROSet II Help Version 1013
Citation: Copyright (C) Intel Corporation 2003. All rights reserved.


測試纜線

在網路元件目錄  中選取的介面卡是以下其中之一時，「測試纜線」按鈕就會出現在「一般」標籤上：

•	沒有連結到網路並以 82550 為基礎的 Intel(R) PRO/100 S Server 或 Desktop 介面卡

•	Intel(R) PRO/1000 介面卡

要在 Intel PRO/100 介面卡上執行「纜線」測試

在「一般」標籤中，按一下「測試纜線」。測試可能需要幾分鐘的時間完成。

測試結果會出現在「疑難排解」標籤中。

要在 Intel PRO/1000 介面卡上執行「纜線」測試

使用「纜線測試」功能之前，請確認介面卡以 1000Mbps 執行。雖然當介面卡以 100Mbps 執行時，您還是可以使用「纜線測試」，但是有些資訊可能會不準確或不供使用。

在「一般」標籤中，按一下「測試纜線」。測試可能需要幾分鐘的時間完成。

測試結果會出現在「纜線測試結果」對話方塊中。以下的資訊會顯示出來：

纜線長度：顯示介面卡及其連結協力電腦之間大概的纜線長度。如果報告的纜線長度和實際纜線長度不一樣的話，就可能表示纜線有斷損。準確度最多可有 30 英呎的差異。

極性：識別 Ethernet 纜線中傳送和接收雙絞線的 +/- 內容。如果這些內容的設定不正確，介面卡會自動矯正並報告錯誤。

本機接收器狀態：識別連接到介面卡的纜線接頭是否能夠處理流量。如果本機狀態測試失敗，請檢查接頭是否有破損或配線錯誤。

遠端接收器狀態：連接到連結協力電腦的纜線接頭通過或沒有通過可操作性測試組。如果遠端狀態測試失敗，請檢查接頭是否有破損或配線錯誤。

接收錯誤次數：介面卡在纜線上偵測到無法識別的傳輸時會發生�接收錯誤�。
當介面卡用網路建立通訊、(連接纜線到介面卡或重新啟動電腦)、或者是當介面卡在自動交涉後重新啟動時，"接收錯誤� 次數就會自然地逐漸增加。如果�閒置錯誤�次數在五分鐘內大約達到 65,000 次，就表示有連結品質問題。要解決連結品質問題，請嘗試重新連接纜線或使用不同的纜線。

閒置錯誤次數：介面卡在纜線上接收到無法識別的傳輸時，�閒置錯誤�會增加。和�接收錯誤�不一樣之處是，當介面卡沒有忙碌地接收封包時，會偵測到�閒置錯誤�。
當介面卡用網路建立通訊、(連接纜線到介面卡或重新啟動電腦)、或者是當介面卡在自動交涉後重新啟動時，�閒置錯誤�次數就會自然地發生。如果�閒置錯誤�次數在一分鐘內達到 255 次，就表示有連結品質問題。要解決連結品質問題，請嘗試重新連接纜線或使用不同的纜線。

MDI/MDI-X 狀態：識別連接到介面卡的纜線有直線 (MDI) 或交叉 (MDI-X) 組態。連接系統到切換器或集線器時，使用 MDI ，連接兩個系統時，使用 MDI-X。

注意：「纜線測試結果」對話方塊中的資訊會隨介面卡類型而異。


法律

著作權 (C) 2002，Intel Corporation。保留一切權利。

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

Intel Corporation 對此文件中的任何錯誤或錯失部份不承擔任何責任。Intel 亦不承諾更新包含在其中的資訊。

* 其它名稱和品牌可能是其它公司的聲明財產。


PRO/1000 伺服器介面卡的進階設定

列在 "進階" 標籤中的設定可讓您自訂介面卡處理 QoS 封包標籤、超大型框架、卸載、和其它功能的方法。視您在執行的作業系統和安裝的特定介面卡而定，以下有些功能可能無法使用。

進階設定

介面式框架內間隔

補償您的網路上過量的 Ethernet 封包衝突。依照預設，這個設定是 0，如此可停用此功能。

建議設定 (1) 最適用於大部分的電腦和網路，其是利用動態調整網路流量情況來進行網路連結。當值設為 1 時，動態模式才會作用。但是，在某些情況中，手動設定間隔值獲取的效能可能會比較好。設定值會強迫封包間的靜態間隔。

增加值會增加傳輸框架間的延遲。

支援的介面卡	全部
預設值	0: 停用
範圍	0-255

介面連結回應

纜線與介面卡斷開連接時，利用繞過啟動路徑加速系統啟動需要網路連線性。如此會大幅減少啟動電腦時所需的時間。

Intel Ethernet 控制器的 �介面式連結回應� 啟用，並且網路纜線沒有連接到 RJ-45 連接埠時，網路連線會停用。黃色的小心圖示會出現在「裝置管理員」中的網路連線旁邊。

要重新啟用網路連線，請將網路纜線連接到 RJ-45 連接埠，然後重新啟動電腦。

支援的介面卡	不可供每個介面卡型號使用。
預設值	關閉
建議	開啟
範圍	開啟，關閉
注意：系統中啟用無線介面卡時，�介面式連結回應� (ALR) 就不會作業。

結合緩衝區

自訂 "結合緩衝區" 的數目來最佳化傳輸效能，如此可讓介面卡在封包傳輸之前加入資料區段。

"結合緩衝區" 的設定一定要與 "傳輸描述器" 設定一起作業。"結合緩衝區" 設定應該是 "傳輸描述器" 的 30 - 50%。如果 "結合緩衝區" 設定經過修改以符合 "傳輸描述器" 設定，傳輸效能可能不會提升。

�結合緩衝區�設定會大幅會提升 Windows NT 4.0 電腦上的傳輸效能。它也會提升 Windows 98 和 Windows 2000 電腦上的傳輸效能。

支援的介面卡	全部
預設值	128
範圍	16-768

啟用 PME

在執行舊版 "進階電源管理" (APM) 的電腦上啟用或停用介面卡上的「喚醒」功能。喚醒功能可讓介面卡在接收到特定封包類型時，例如 ARP 封包，從待命或關閉狀態恢復作業。

•	停用這項功能會停用使用舊版電源管理電腦上的所有「喚醒」設定。

•	啟用這項功能可讓介面卡會「喚醒」訊號回應。要設定介面卡對特定的封包類型回應，請參閱本主題中稍後說明的「喚醒」設定資訊。

•	「硬體預設值」強迫介面卡根據系統硬體設定「喚醒」功能。

•	「無動作」值可讓介面卡使用作業系統的預設值。

如果您要停用所有的「喚醒」設定，請設定停用這項功能。否則，請將此功能設為「無動作」。

支援的介面卡	以 82559 為基礎的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	停用
範圍	啟用，停用

快速傳輸完成

將封包傳送到網路上之前，必須先釋出傳輸描述器才能重新使用之。

•	�快速傳輸完成�停用時，介面卡一定要等到封包傳送出去後才能重新使用�傳輸描述器�。

•	�快速傳輸完成�啟用時，介面卡會較快重新使用�傳輸描述器�，讓介面卡能提升傳輸效能。

支援的介面卡	82543 和 82544 為基礎的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	開啟
範圍	開啟，關閉
流程控制

讓介面卡能夠傳送或接收流程控制框架。傳輸路徑會以接收流程控制框架中指定的時間暫停。這些設定藉由預防封包丟失來協助微調網路效能。

支援的介面卡	以 82542 為基礎，僅限傳輸。82540、82543 和 82544 為基礎的介面卡，僅限傳輸。 請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	啟用
範圍	關閉、回應、產生、產生和回應、硬體預設值
超大型框架

注意：另外，"超大型框架" 僅在 1000 Mbps 才受到支援。以 10 或 100 Mbps 使用 "超大型框架" 可能會導致不良的效能或失去連線。

啟用或停用 "超大型框架" 功能。"超大型框架" 可利用在每個框架中放入更多資料來增加輸出量並降低 CPU 用量，因此傳送出較少的框架。標準 Ethernet 框架大小是 1514 位元組，而 "超大型框架" 可包含 4088、9014 或 16128 位元組。

如果網路上的所有的裝置都支援 "超大型框架" 並且設定使用相同的框架大小時才啟用 "超大型框架"。在其它網路裝置設定 "超大型框架" 時，請注意網路裝置會以不同方式計算 "超大型框架" 的大小。有些裝置在框架大小中包括標題資訊，其它則不包括。Intel 介面卡不在框架大小中包括標題資訊。

若須更多資訊，請參閱超大型框架 主題。

支援的介面卡	全部
預設值	停用
範圍	停用 (1514)、4088、9014、和 16128 位元組。(如果使用 VLANs，將 CRC 的切換設定高出 4 個位元組，再次加上 4 個位元組。)  注意：範圍 (1514-16128) 中的任何值都可使用MaxFrameSize 參數在 Windows 登錄中設定。
本機管理位址

覆寫介面卡的 MAC 位址。要輸入新的網路位址，請在這個�值�方塊中鍵入 12 位數的十六進位號碼。

支援的介面卡	全部
預設值	無
範圍	0000 0000 0001 - FFFF FFFF FFFD 例外： • 不要使用多點傳送位址 (高位元組最不醒目的位元 = 1)。  • 不要全部使用零或 F。 不是 "目前" 的設定：返回介面卡原來的網路位址。
注意：在群組中，Intel(R) PROSet II 使用其中一個：

•	如果群組有設定 LAA，就是群組的 LAA，或者

•	如果群組沒有設定 LAA，就是主要介面卡的永久 MAC 位址

如果介面卡是群組中的主要介面卡，並且該群組有 LAA，Intel PROSet II 不會使用介面卡的 LAA。

Windows 98SE 使用者：

手動指派位址後，如果您要使用預設位址，請執行這些程序之一：

•	在「網路內容」對話方塊的「進階」標籤，選取「本機管理位址」，將其值變更為 0。按一下「確定」來套用該設定。

•	在 Intel PROSet II 中，按一下「進階」標籤，然後按一下「復原預設」或從「值」欄位清除所有的字元。按一下「確定」來套用該設定。

登錄連結狀態事件

這個設定是用來啟用/停用連結狀態變更的登入。如果設定在開啟狀態，連結變更事件或離線變更事件會產生顯示在系統事件登錄器中的訊息。管理員可從系統事件登錄器檢視事件訊息。

以下的事件會被登錄。

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

支援的介面卡	全部
預設值	Enable
範圍	啟用，停用
卸載接收 TCP 總值

啟用介面卡驗證傳入封包的 TCP 或 UDP 總值。

•	停用 "卸載" 時，作業系統會驗證 TCP 總值。

•	啟用 "卸載" 時，介面卡會完成作業系統的驗證。

這個功能會提升接收效能並降低 CPU 的用量。

支援的作業系統	• Windows XP* • Windows 2000 • Windows 98 不支援卸載。
支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	• Windows* XP：開啟 • Windows 2000：關閉
範圍	開啟，關閉
卸載 TCP 區段

讓介面卡硬體將資料區段到有效的 Ethernet 框架。

•	停用 "TCP 區段性" 時，作業系統軟體會先區段資料，再將資料送到介面卡進行傳輸。

•	啟用 "TCP 區段性" 時，介面卡會將資料區段到框架中。

因為介面卡硬體能夠比作業系統軟體更快完成資料區段性，所以這個功能可大幅提升傳輸效能。除此之外，介面卡消耗的 CPU 資源也比較少。

支援的作業系統	Windows XP
支援的介面卡	以 82544 為基礎。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	1
範圍	0 = 不要廣告這項功能；1 = 廣告這項功能。
卸載傳輸 IP 總值

啟用介面卡以計算傳出封包的 IP 總值。

•	停用 "卸載" 時，作業系統會驗證 IP 總值。

•	啟用 "卸載" 時，介面卡會完成作業系統的驗證。

這個功能會提升傳輸效能並降低 CPU 的用量。

支援的作業系統	• Windows XP* • Windows 2000 • Windows 98 不支援卸載。
支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	開啟
範圍	開啟，關閉
卸載傳輸 TCP 總值

啟用介面卡以計算傳出封包的 TCP 或 UDP 總值。

•	停用 "卸載" 時，作業系統會驗證 TCP 總值。

•	啟用 "卸載" 時，介面卡會完成作業系統的驗證。

這個功能會提升 TCP 和 UDP 傳輸效能並降低 CPU 的用量。

支援的作業系統	• Windows XP* • Windows 2000 • Windows 98 不支援卸載。
支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	開啟
範圍	開啟，關閉 注意：當伺服器支援 DOS 為基礎的用戶端時，將這個功能設為 "關閉"。
QoS 封包標籤

啟用介面卡以傳送和接收 IEEE 802.3ac 標籤的框架，包括：

•	802.1pIEEE_802.1p QoS (Quality of Service) 標籤需要優先順序標籤的封包，以及

•	802.1Q 標籤需要 VLAN。

當您 設定 VLAN 時，Intel PROSet II 會自動啟用 802.1p 標籤。

支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	關閉
範圍	開啟，關閉
接收描述器

定義 "接收描述器" 數，這些是讓介面卡在系統記憶體中配置接收封包的資料區段。每個接收的封包都需要一個 "接收描述器"，並且每個描述器都使用 2kb 的記憶體。

如果您注意到接收流量效能大幅降低，可能會需要選擇增加 "接收描述器" 的數目。如果接收效能不是問題的話，請使用適用於介面卡的預設設定。

介面卡控制器	預設值	範圍
以 82542 為基礎	160	80 � 768
以 82543 為基礎	160	80 � 256
以 82544 為基礎	160	80 � 2048
請檢視介面卡規格 主題以獲取識別介面卡的協助。

傳輸描述器

定義 "傳輸描述器" 數，這些是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸描述器"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸描述器" 的數目。雖然增加 "傳輸描述器" 的數目可提升傳輸效能，但是 "傳輸描述器" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用預設設定 256。

介面卡控制器	預設值	範圍
以 82542 為基礎	256	80 � 768
以 82543 為基礎	256	80 � 256
以 82544 為基礎	256	80 � 2048
請檢視介面卡規格 主題以獲取識別介面卡的協助。

喚醒連結變更

如果網路連線在電腦處於待命模式時建立連結，喚醒電腦。您可以啟用此功能、停用此功能、或讓作業系統使用其預設設定。

支援的作業系統	Windows 9x、Windows 2000、Windows XP
範圍	停用、強迫、依附 OS
預設值	停用

喚醒設定

這些設定指的是作業系統或 Intel PROSet 啟動的功能。視您的 Windows 版本而定，此功能的作用會不一樣，或完全不受支援。

這些 Windows 版本支援 "喚醒設定"：Windows 2000、Windows XP 64 bit Edition、Windows XP Professional、和 Windows Server 2003。這項功能不受到 64 位元 Itanium(R) 為基礎系統的 Windows Server 2003 支援。

啟用喚醒設定

您可以使用 Intel PROSet 來設定介面卡使用的 Wake On (喚醒) 設定。選取「喚醒設定」前，一定要啟動系統使用「喚醒設定」。_要做到這點，請參閱 instructions。

要啟用「喚醒設定」

1.	在 Intel PROSet，按一下「進階」。

2.	在「設定」清單方塊中，選取「喚醒設定」。

3.	在「值」清單中，選取適當的「喚醒」設定。

4.	按一下「確定」或「套用」。

5.	對這些 "喚醒" 封包類型回應的介面卡，您一定也要啟動作業系統使用「喚醒設定」。要啟用「喚醒設定」，請瀏覽到「裝置管理員」，請用選項「允許此裝置將電腦從待命狀態喚醒」。

可用的設定

這些是 Intel PROSet 中提供的「喚醒」設定：

設定	描述
停用	介面卡不會使用「喚醒」設定。
喚醒神奇封包	讓介面卡在接收到 "神奇封包" 時回應醒來。"神奇封包" 是包含接收介面卡的 Ethernet 位址的 16 個連續副本的封包。設定這項功能時，Intel PROSet 會用這項功能置換作業系統值。
喚醒直接封包	讓介面卡在接收到 "直接封包" 時醒過來，此封包是傳送到介面卡的 MAC 位址的單一傳播封包。  通訊協定一定要在驅動程式中啟用這項喚醒方法。取消選取這項功能等於是告訴驅動程式忽略任何啟用這項喚醒方法的通訊協定要求。
喚醒神奇封包和直接封包	讓介面卡在接收 "神奇封包" 或 "直接封包" 時回應醒來。
受控的作業系統	讓作業系統能夠完全控制「喚醒設定」。

注意：如果一個介面卡有數個設定的 IP 位址，作業系統可能會要求喚醒所有設定位址的 ARP 配置。介面卡僅會在 ARP 封包查詢清單中的第一個 IP 位址時回應喚醒。

注意：「喚醒」設定不包括從關機 (S5) 狀態喚醒電腦的能力。這個狀態由「啟用 PME」設定控制，「進階」標籤有提供此功能。即使「喚醒」設定停用，從 S5 喚醒的能力還是由「啟用 PME」設定決定。

只要介面卡驅動程式有啟用，PME 設定就可以作業。但是，驅動程式一旦停用，裝置就會返回其硬體預設設定，此設定可能允許，也可能不允許電腦從關機狀態喚醒。

還原「預設值」按鈕

這個按鈕會以該設定的預設值重設目前選取的「進階設定」。請參考以上所列的設定值以獲取預設值的資訊。(這個選項不提供每個設定使用。)


驅動程式資訊
網路驅動程式

要檢視有關介面卡驅動程式的詳細資料

•	在網路元件目錄，按一下您要參考詳細資料的介面卡。

•	按一下「驅動程式」標籤。

以下的資訊會顯示出來。

驅動程式資訊：

名稱	介面卡驅動程式目前的檔名沒有載入
版本	驅動程式的版本號碼。從 Intel 支援站台下載新版本時很有用：http://support.intel.com
描述	驅動程式名稱
著作權	法律資訊
驅動程式統計資料：

注意： 以下所列的統計資料會在您載入或更新介面卡驅動程式時重設。

已傳送封包	已傳送的封包數
接收的封包	接收的封包數
傳送錯誤	含錯誤的已傳送封包數
接收錯誤	含錯誤的接收封包數
注意： 要取得最新的驅動程式，請從功能表按一下「說明」>「支援」。在�支援�頁，按一下�取得最新驅動程式�。


診斷
診斷測試

介面卡診斷可讓您分析介面卡的整體狀況。執行診斷時，Intel PROSet II 會檢查 I/O 衝突、記憶體錯誤、EEPROM 可操作性、傳輸和接收功能性、以及連結。

診斷測試的結果會顯示在「診斷」標籤中，但是，也會儲存於系統記錄。

注意：如果您的電腦在執行 Windows 98，可能需要在執行診斷程式之前先停用介面卡 �電源管理� 功能。 若需詳細資料，請參閱停用電源管理程序。

個別測試

測試名稱	描述	疑難排解資訊
控制登錄	檢查 I/O 位址中是否有任何衝突並測試登錄的存取性。這項測試包括所有的「一般登錄」、「接收登錄」、以及「傳輸登錄」。其不會測試 「EEPROM 控制/資料登錄」。	如果「控制登錄」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。
FIFO 登錄	寫入配置到 FIFO 記憶體或從此記憶體讀取配置來測試介面卡上的 FIFO 記憶體。	如果「FIFO 登錄」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。
EEPROM	驗證從 EEPROM 讀取的資料整合性。這項測試會完成自 EEPROM 的寫入和讀取，然後比較結果以檢查其一致性。	如果「EEPROM  登錄」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。
岔斷	使用「岔斷」登錄來確認所有的介面卡岔斷都可以作業。	如果「測試」測試失敗，請嘗試變更 BIOS 中的岔斷設定。如果變更設定無法改正問題，請嘗試將介面卡移動到不同的插槽。
迴路	藉由傳送封包給自己來測試介面卡傳送和接收封包的能力。這項測試會同時使用 MAC 迴路和「收發」迴路模式。（Intel(R) PRO/1000 T 介面卡不供使用。）	如果「迴路」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。
連結	確認介面卡已連結到有效的協力電腦。	如果 "連結" 測試失敗，請確定纜線是否穩固連接到介面卡和連結協力電腦。如果纜線連接穩固，請嘗試將纜線接到連結協力電腦上不同的連接埠或嘗試不同的纜線。
注意：如果診斷程式在執行中，您可以按一下「停止」，診斷程式停止之前會有短暫的延遲。診斷程式停止後，會有「確定」按鈕可供使用。

其它設定

進階按鈕： 按一下來設定傳送程式-回應程式網路測試。

警告："傳送程式/回應程式" 測試的設計不可在系統處於 "待命" 模式、"暫停" 模式、或纜線沒有插入電腦時執行。


群組組態和狀態
群組組態

要檢視有關群組組態的詳細資料

在網路元件目錄中，按一下您要檢視的群組。

「群組組態」標籤會出現。

「群組中的介面卡」狀態方塊會列出以下的項目：

介面卡

包括在群組中的每個介面卡名稱。

優先順序

顯示群組中介面卡的優先順序狀態 (如果您有指定優先順序的話）。介面卡在群組中可以有主要或次要優先順序狀態。

如何指定 �主要� 或 �次要� 介面卡

「狀態」欄會列出以下項目：

•	作用中：介面卡傳輸網路流量。

•	在 AFT 模式中，僅有一個介面卡在作用中，即是屬意的主要介面卡。

•	在�動態 802.3ad�模式中，是作用中集合器一部份的介面卡會有「作用中」狀態。

•	待命：AFT、SFT、和動態 802.3ad 群組支援待命模式。待命模式的介面卡和網路有連結，但是沒有傳輸流量。

•	停用：介面卡已經移除、停用、或驅動程式沒有載入。除此之外，如果纜線錯誤或連結失敗，介面卡會有停用的狀態。

「群組資訊」區段會列出以下項目：

•	Ethernet 位址：列出該群組的主要 MAC 位址。

•	IP 位址：列出該群組的主要 IP 位址。

•	群組類型：列出群組模式。

測試切換器組態按鈕

執行�切換器組態測試�就可以確定連結協力電腦是否支援選擇介面卡的成組模式。例如，如果介面卡是 �連結集合� 群組的成員，Intel (R) PROSet 就可以驗證連接到介面卡的連結協力電腦支援�連結集合�。

若須有關每個群組模式的需求特定資訊，請參閱有關成組。

執行這項測試時，群組會暫時失去網路連線性。

注意： 以下其中一種假設情況存在時，這項測試就不會測試錯誤。

介面卡組態	切換器組態
沒有 VLANs 而在�連結集合�模式中成組	切換器處在以下其中一種情況： • 不屬於任何 VLAN • 用標籤的 VLAN 設定的
有 VLAN 並在�連結集合�模式中成組	切換器處在以下其中一種情況： • 不屬於在介面卡中設定的 VLAN，並且 • 沒有定義的�連結集合�
要執行�切換器組態測試�

1	在網路元件目錄中，按一下您要測試的群組。
要執行測試，群組中至少一定要有兩個介面卡。

2	在「群組組態」標籤中，按一下「測試切換組態」。
「測試切換組態」對話方塊會出現。

3	要繼續進行測試，請按一下「是」。
如果偵測到任何群組或連結協力電腦組態錯誤，「疑難排解」標籤就會出現。

注意：因為測試 �生成樹通訊協定�（STP）所需的時間量，所以 Intel PROSet II 可能會無法準確地指示網路上是否有啟用�生成樹通訊協定�（STP）。確定切換器是用 STP 設定的：

•	啟用於  SFT 群組

•	停用於 (portfast) 其它所有的群組模式


VLAN
VLAN 概述

VLAN 是邏輯網路群組，可以讓您隔離網路流量，讓 VLAN 的成員僅接收來自其它成員的流量。使用 VLAN，您可以將 PC 群組成一個邏輯工作群組，連接用戶端到地理上分布在各建築物、校園、或企業網路的伺服器時，這是非常重要的考量。

藉由使用您的網路上的 VLAN，您可以：

•	限制廣播衝擊

•	改善網路連線的新增、移動、和變更

•	降低保全性問題

•	簡單化您的管理工作

VLAN 類型

切換器為基礎的 VLANs，也稱為暗示性 VLANs，標籤為基礎的 VLANs，也稱為明示性 VLANs。

•	暗示性 VLANs 以切換器功能為基礎，例如連接埠號碼、MAC 位址、和其它層次二的功能。許多切換器上的預設 VLAN ，包括大部分的 Cisco* 產品，都是暗示性 VLAN。暗示性 VLANs 僅在切換器上設定。切換器不會改變或標示封包來強迫暗示性 VLAN。所有的 Intel 介面卡都可以參與暗示性 VLANs。

•	明示性 VLANs 以每個封包標題新增的四位元組標籤 (802.3ac) 為基礎。每個 IEEE VLAN 都一定要在整個網路上設定，包括在介面卡和所有的連結協力電腦上。

需求

VLANs 規定：

•	您的網路上的切換器可以支援 802.1Q VLANs

•	介面卡可以支援 802.1Q VLANs，包括：

•	Intel(R) PRO/100+

•	Intel(R) PRO/100 S

•	Intel(R) PRO/1000

•	Intel(R) PRO/100B Adapters 不 支援 VLANs。

若須 Intel VLANs 的概述資訊，請蒞臨 Intel Networking 網站：

  馬上蒞臨網站

若須更多特定的資訊，請閱讀 VLANs 上的白皮書：

  從網站閱讀白皮書

亦請參閱

新增 VLAN

變更 VLAN 內容

移除 VLAN

VLAN 的進階設定


支援

如果您有網際網路連線和網路瀏覽器的話，可以蒞臨其中一個 Intel 的支援站台。

若須透過網際網路的支援：

1.	從「說明」功能表按一下「支援」。

2.	按一下其中一個網站連結。


疑難排解

「疑難排解」標籤僅在 Intel(R) PROSet II 偵測到介面卡組態、驅動程式安裝、和其它錯誤時才會出現。Intel PROSet II 會檢查問題，並且，在大部分的情況中，還會提供問題的可能解決方法。

如果您認為有介面卡的問題，請嘗試以下一個或數個方法：

•	檢查一般標籤上的資訊來檢視網路是否有作用中的連結。

•	如果您有設定群組，請測試連結協力電腦的組態 以確定它們支援群組模式。

•	執行診斷.

•	如果受到您的介面卡支援，請執行纜線測試。


傳送程式回應程式測試

"傳送程式回應程式測試"  可讓您在整個網路上測試介面卡。

執行這項測試之前，請確定介面卡有連結到網路。

設定測試

設定一個 "傳送程式" 和一個 "回應程式" 電腦。"傳送程式" 會連續傳送封包到回送封包給 "傳送程式" 的 "回應程式"。

傳送程式
連續傳送封包到網路。選取「開始」來開始傳送封包。
開始傳送封包之前，您需要在網路其它地方設定回應程式。到另外一個有安裝 Intel(R) PRO/10+、PRO/100B、PRO/100+、PRO/100 S 或 PRO/1000 介面卡的電腦，使用該介面卡的 Intel(R) PROSet II 來將其設定為回應程式。如果可能的話，請在傳送程式和回應程式都使用相同型號的介面卡。

回應程式
回送封包給傳送程式 (傳送封包的程式)。選取「開始」來將這個 PC 當成回應程式使用。

雖然測試的設計用途不是如此，但是，這個測試可用來測試網路區段纜線和網路組態。測試新的 LAN 區段時，請在一端設定回應程式，並在另外一端與傳送程式進行測試。

這項測試會驗證兩個介面卡之間的連線性；目的不是要檢查速度。介面卡在整個網路傳送或接收流量的速度會隨網路拓樸和網路載入而異。利用按一下「一般」標籤可以檢視介面卡的設定速度。

注意： 如果Cisco* 6500 切換器是在 "生成樹" 啟用的情況下設定的，"傳送程式回應程式" 測試就不會提供準確的結果。要用 Cisco 6500 切換器執行 "傳送程式回應程式" 測試，請確定停用 "生成樹"。

警告："傳送程式/回應程式" 測試的設計不可在系統處於 "待命" 模式、"暫停" 模式、或纜線沒有插入電腦時執行。


新 VLAN

VLAN ID：您的網路管理員指派的 VLAN 號碼。介面卡上的 VLAN ID 一定要與切換器上的 VLAN ID 相符。有效範圍：1 - 4094. (注意：0 和 1 這兩個 VLAN 號碼通常是保留的。檢查您的切換器文件以獲取詳細資料。)

VLAN 名稱：VLAN 的名稱。例如，Marketing (行銷) 或 Engineering (工程)。�VLAN 名稱�是選擇性的設定，可讓您更容易地在您的網路上識別 VLAN。介面卡上的 VLAN 名稱不須與切換器上的 VLAN 名稱相符。


識別介面卡

「識別介面卡」功能可讓您從電腦後方識別實體介面卡。

例如，如果您安裝兩個介面卡，可以從網路元件目錄選取一個介面卡，然後按一下「識別介面卡」按鈕。被選取介面卡的框架 LED 會閃爍。

要確認介面卡的位置

•	按一下「識別介面卡」。

•	移動滑桿來選取 LED 應該閃爍的秒數。預設值是 10 秒。

•	按一下「開始」。

選取介面卡的 LED 會在指定期間內閃爍。


介面卡容錯性

"介面卡容錯性" 是由兩個或數個介面卡成組設定，以提供備份網路連線。其目的是當發生集線器或切換器連接埠、纜線、或介面卡失敗時，電腦會維持未岔斷的網路效能。

�介面卡容錯性�群組有主要介面卡和備份、或次要介面卡。在一般作業期間，僅主要介面卡會傳輸流量。如果主要介面卡或主要介面卡的連結失敗，次要介面卡會自動接替操作。

如果您使用�介面卡容錯性�，一定要停用�生成樹�。

"介面卡容錯性" 群組與以下項目相容：

介面卡類型	群組需要有一個成員是 Intel 伺服器介面卡
介面卡速度	可以混合，例如一個介面卡以 100 Mbps 連結，另外一個以 1000 Mbps 執行
網路組態	• 所有的介面卡都必須連接到同一個切換器 • 一定要停用 "生成樹"
通訊協定	全部
亦請參閱：

關於成組

群組類型


介面式載入平衡

"介面式載入平衡" (ALB) 是一種群組類型，設定以增加伺服器的傳輸和接收輸出量。ALB 群組自動載入平衡傳輸流量，但是，接收流量的載入平衡可以啟用，也可以停用。

ALB 群組利用以下方式增加輸出量：

•	介面卡組態。在群組新增成員，您可以增加總輸出量。

•	流量分析。ALB 軟體在每個群組成員持續分析傳輸和接收載入，然後在必要的時候，於介面卡間平衡載入。

傳輸流量

若是 ALB 群組，所有的介面卡載入平衡 IP (IPv4 和 IPv6) 和 NCP IPX 傳輸流量。

接收流量

•	若是停用�接收載入平衡�的 ALB 群組，主要介面卡會接收流量。

•	若是有啟用 "接收載入平衡" 的 ALB 群組：

•	主要介面卡會使用任何通訊協定接收流量

•	以最高速度的作用中介面卡接收 IPv4 流量

例如，如果某個 ALB 群組有三個介面卡，一個千兆位元組介面卡被指派為主要介面卡，外加兩個 Intel(R) PRO/100 介面卡：

•	千兆位元組介面卡接收無法經由路由和 IPv6 流量，因為它是主要介面卡。

•	千兆位元組介面卡可接收 IPv4 流量，因為它是最高速度的介面卡。

•	Intel PRO/100 介面卡不參與接收載入平衡。

若須啟用或停用�接收載入平衡�的資訊，請參閱設定進階設定。

除此之外，ALB 群組還提供容錯性。如果主要介面卡失敗，群組會繼續在剩餘作業群組成員間操作和平衡流量。

ALB 群組與以下項目相容：

介面卡速度	可以混合，例如一個介面卡以 100 Mbps 連結，另外一個以 1000 Mbps 執行。
通訊協定	IP、IPX (NCP) 注意：Microsoft 將其在 Windows* 2000 中的 Ipv6 支援分類為 Technology Preview。因此，Windows 2000 中的 Ipv6 支援不是要用於生產環境中的。若須有關作業系統支援 IPv6 的詳細資料，請參閱系統說明文件。
網路組態	所有的介面卡都必須連接到同一個切換器

Intel(R) PRO/1000 Gigabit Server Adapter 效能注意事項

因為 Intel(R) PRO/1000 介面卡已經支援此種高頻寬，所以使用 ALB 功能可能會造成一些伺服器的效能減低。這是因為目前許多可用的伺服器沒有 CPU 或 "匯流排" 功能可以有效地處理成組的千兆位元組類別介面卡。若須最佳的 ALB 效能，使用支援多重 PCI 匯流排的較新伺服器以及以 400 MHz 或更快速度執行的多重 Pentium II(R) 處理器。在此種伺服器上，於不同的 PCI 匯流排上安裝成組的 Intel PRO/1000 介面卡以獲取最大的 ALB 效能。

亦請參閱：

關於成組

群組類型

設定進階設定


IEEE 802.3ad：動態

802.3ad 是 IEEE 連結集合標準。像靜態 "連結集合" 群組，群組會利用以下方式使用動態 "連結集合" 來增加輸出量：

•	介面卡組態。在群組新增成員，您可以增加輸出量。群組最多可由八個介面卡組成。每個伺服器最多可操作四個群組。

•	流量分析。軟體在每個群組成員持續分析傳輸載入，然後在必要的時候，於介面卡間平衡載入。切換載入平衡接收流量。

除此之外，802.3ad 群組還提供容錯性。在 802.3ad 群組中，伺服器會使用一個 IP/MAC 位址來與網路通訊。相反地，網路裝置和用戶端會將連結集合模式的群組當成一部電腦看待。介面卡在群組中失敗時，網路會將該群組當成容量降低的電腦。

"連結集合" 群組與以下項目相容：

介面卡速度	所有的介面卡都必須以相同速度操作
網路組態	• 確認連接到介面卡的切換器完全支援 IEEE 802.3ad 標準 • 檢查您的切換器文件以獲取連接埠需要的資訊。有些切換器需要成對才能在主要連接埠上啟動。  • 檢查您的速度和雙工設定以確定介面卡和切換器以全雙工模式執行，並且是強迫或設定為自動交涉。介面卡和切換器都一定要有相同的速度和雙工組態。全雙工需求是 IEEE 802.3ad 規格的一部份：http://standards.ieee.org/. 必要時，請先變更您的速度和雙工設定才將介面卡連結到切換器。雖然您可以在群組建立後才變更速度和雙工設定，Intel 建議您在設定生效後才將纜線接上。在某些情況中，如果設定在網路上有作用中的連結時變更，切換器或伺服器可能會無法適當辨識修改過的速度或雙工設定。 • 如果您在設定 VLAN，請參考您的切換器文件以獲取 VLAN 相容性的注意事項。並非所有的切換器都支援同步動態 802.3ad 群組和 VLAN。如果您選擇設定 VLAN，請先在介面卡上設定成組和 VLAN 設定後才將介面卡連結到切換器。在切換器已經建立作用中的集合器後才設定 VLAN 會影響 VLAN 的功能性。 注意：在某些切換器中，銅和纖維介面卡不可屬於 IEEE 802.3ad 組態中的相同集合器。如果系統中有安裝銅和纖維介面卡，切換器可能會將銅式介面卡設定在一個集合器，將纖維式介面卡設定在另外一個集合器。如果您遇到這種行為，要得到最佳效能，您應該在系統中使用銅式或纖維式藉密卡。
通訊協定	全部

亦請參閱：

關於成組

群組類型


介面卡成組資訊
關於成組

群組是一群介面卡，經過設定以提供增加的輸出量和容錯性。成組與 Windows* 2000、Windows NT* 4.0、和 Windows XP 相容。

群組類型是什麼？

Intel(R) PROSet II 可讓您設定以下的群組類型：

•	介面卡容錯性 (AFT)

•	切換容錯 (SFT)

•	介面式載入平衡 (ALB)

•	FEC* /LA/802.3ad：靜態

•	GEC*/LA/802.3ad：Static

•	IEEE 802.3ad：動態

群組可以增加多少介面卡？

除了 SFT 群組之外，群組可以包含二到八個介面卡。SFT 群組一定要剛好包含兩個連接到一個連結協力電腦的介面卡。

可以在群組中使用其它廠商的介面卡嗎？

您可以為任何成組模式建立介面卡的多重廠商群組 (MVT)。要建立多重廠商群組，群組中至少一定要有一個 Intel 的伺服器介面卡。

MVT 相容於：

介面卡類型	查看網路元件目錄以確定系統中哪些介面卡是相容的。
介面卡速度	查看成組模式的需求。
注意：如果群組成員是 VLAN 的一部份，Intel PROSet II 就不會支援多重廠商成組。

電腦中可以設定多少群組？

任何電腦上可設定的群組數要視電腦的硬體和軟體組態而定。

有哪些需求？

您的網路組態以及您在電腦中安裝的介面卡類型都會影響電腦中可以設定的群組類型。請參閱群組類型主題上的資訊以獲取群組需求和功能的概述。

如何移除群組？

移除群組時，請確定使用 Intel PROSet II 公用程式。在您的作業系統上透過「網路控制台」移除或停用群組會影響系統的穩定性和介面卡組態。

若須介面卡成組的概述，請蒞臨 Intel(R) Networking 網站：

  馬上蒞臨網站

若須更多有關不同群組類型之目的的特定資訊，請閱讀 Solving Server Bottlenecks (解決伺服器瓶頸問題) 上的白皮書：

  馬上閱讀白皮書

亦請參閱：

群組類型


介面卡詳細資料

要檢視有關介面卡的詳細資料

1.	在網路元件目錄，按一下您要參考詳細資料的介面卡。

2.	在「一般」標籤中，按一下「詳細資料」。

"詳細資料" 螢幕會顯示出來。

注意：不是所有的內容都可供每個介面卡型號使用。

IP 位址	IP 位址目前使用於此介面卡中。 注意：Intel(R) PROSet II 不顯示 IPv6 位址。
匯流排速度	介面卡目前使用的 PCI 匯流排速度（以百萬赫茲表示）
匯流排寬度	介面卡使用的 PCI 匯流排位元寬度（32 或 64）
控制器	介面卡上的零件號碼或元件型號
媒體類型	接頭類型（纖維或銅製）
永久 Ethernet 位址	以十六進位數字表示的介面卡節點 (MAC) 位址。MAC 位址是由廠商指派給介面卡的。
目前的 Ethernet 位址	這個介面卡目前使用的 MAC 位址。  如果介面卡是群組的成員，或者有本機管理的位址 (LAA) 被指派給這個介面卡，目前的 "Ethernet 位址" 會和介面卡的永久位址不一樣。
PHY 裝置	介面卡的描述
零件號碼	介面卡的 Intel 零件號碼
岔斷	PCI BIOS 或作業系統指派給介面卡的岔斷。
記憶體位址	PCI BIOS 或作業系統指派給介面卡的記憶體位址。
I/O 位址	PCI BIOS 指派給介面卡的 I/O 位址。
匯流排插槽	匯流排號碼和介面卡的插槽 ID
系統插槽	�系統插槽� 是�匯流排插槽�的一部份。例如，如果�匯流排插槽�分成兩個，就會有兩個識別每一個�匯流排插槽�部份的�系統插槽�。
DHCP 伺服器位址	提供 IP 位址給介面卡的伺服器 IP 位址。


設定成組進階功能

每個群組類型都有不同的進階設定可以使用。

要檢視或變更進階群組設定

1.	在網路元件目錄中，按一下群組。

2.	按一下「進階」標籤。

3.	對群組組態進行喜愛的變更。

4.	要還原預設值，請按一下「還原預設」。

5.	要設定變更，請按一下「確定」。

進階設定的說明以及它們的預設值如下所述。在大部分的情況下，最好是保留預設值。

Check Time (秒)

軟體多常驗證群組成員狀態。例如，如果 Check Time 是一秒，該軟體就會每秒檢查群組成員以確保它們可以傳送和接收流量。

預設值：1 秒

範圍：1 - 3 秒

LinkAggrJoinMethod

這項進階設定可提供 "連結集合" 成組使用。根據 IEEE 802.3ad 標準，連結可以分成數個叫做集合器的連結。但是，僅有其中一個集合器在作用中。LinkAggrJoinMethod 參數指定系統如何選擇作用中的集合器。如果您將 LinkAggrJoinMethod 設定為 "最大頻寬"，系統會選取產生更多流量的集合器。如果您將參數設定為 "最大介面卡數"，系統會選取有更多介面卡的集合器。

預設值：最大頻寬

範圍：最大頻寬，最大介面卡數

載入平衡重新整理頻率

軟體在整個群組成員間重設或重新整理目前的載入前經過的時間數。若須最佳效能，請保持這個設定的預設值或儘量保持低設定。

預設值：每 10 個 Check Time 單位

範圍：1-50 個 Check Time 單位

Check Time 設定中指定的秒數是重新整理速率的測量單位。請參閱 Check Time 設定以獲取更多詳細資料。

本機管理位址 (LAA)

如果您使用 Windows NT Load Balancing Service (WLBS)、NLB、或該類別的其它驅動程式，您就可以自訂群組使用的 MAC 位址。

要自訂 MAC 位址，請在 LAA 欄位中為群組鍵入新的 MAC 位址。確定新位址在此範圍中：0000 0000 0001 - FFFF FFFF FFFD。

例外：

•	不要使用多點傳送位址 (高位元組的 LSB = 1)。例如，在這個 0Y123456789A 位址中，"Y" 不可以是奇數。(Y 必須是 0、2、4、6、8、A、C、或 E。)

•	不要全部使用零或 F。

要還原預設的 MAC 位址，請刪除 "本機管理位址" 欄位中的位址，然後按一下「確定」，或按一下「還原預設」。

注意： Intel(R) PROSet II 使用其中一項：

•	如果群組有設定 LAA，就是群組的 LAA，或者

•	如果群組沒有設定 LAA，就是主要介面卡的永久 MAC 位址

如果群組有設定 LAA，主要介面卡上的任何 LAA 設定都會被群組的 LAA 覆寫。

STP 和 SFT 群組：如果您變更群組的主要 (作用中) 介面卡，該群組會用新主要介面卡的 MAC 位址重新載入。以此類推，變更群組的 "本機管理位址" (LAA) 會造成重新載入，並且群組也會有新的 MAC 位址。如果伺服器在網路上作用時，於 SFT 群組上執行這兩個動作，會造成群組無法通訊，直到所有的網路裝置都利用新主要介面卡的位址資訊重新整體它們的 ARP 表格為止。重新整理 ARP 表所需的時間由 ARP 快取逾時時間設定，一個可供一些路由器和作業系統使用的參數。視 ARP 快取逾時時間而定，群組最多可能會有 10 分鐘的時間無法提供使用。

NumRxPackets

定義 "接收描述器" 數，這些是讓介面卡在系統記憶體中配置接收封包的資料區段。每個接收的封包都需要一個 "接收描述器"，並且每個描述器都使用 2kb 的記憶體。

如果您注意到接收流量效能大幅降低，可能會需要選擇增加 "接收描述器" 的數目。如果接收效能不是問題的話，請使用預設設定。

預設值：預設值。使用預設值時，Intel PROSet II 會根據群組組態和硬體功能自動計算這個設定的最佳值。

建議值： 250

範圍：32 - 512，步進 16

NumTxPackets

定義 "傳輸描述器" 數，這些是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸描述器"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸描述器" 的數目。雖然增加 "傳輸描述器" 的數目可提升傳輸效能，但是 "傳輸描述器" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用預設設定。

預設值：預設值。使用預設值時，Intel PROSet II 會根據群組組態和硬體功能自動計算這個設定的最佳值。

範圍：16 - 512，步進 16

接收載入平衡

依照預設，ALB 群組會載入平衡所有的傳輸流量。除此之外，您也可以用這項設定啟用或停用 "接收載入平衡"。

如果停用 "接收載入平衡"，主要介面卡會接收所有的流量。

如果啟用 "接收載入平衡"：

•	主要介面卡會接收非 IP 流量

•	有最高速度的作用中介面卡接收 IP 流量

例如，如果某個群組有三個介面卡，一個 gigabit 介面卡被指派為主要介面卡，兩個 Intel(R) PRO/100 介面卡：

•	gigabit 介面卡接收非 IP 流量，因為它是主要介面卡。

•	gigabit 介面卡接收 IP 流量，因為它是最高速度的介面卡。

•	Intel(R) PRO/100 介面卡不參與接收載入平衡。

預設值：初步設定後啟用；如果群組最先是用不同的群組模式建立，然後變更為 ALB，就停用

範圍：啟用/停用

重設「預設值」按鈕

這個按鈕會以該設定的預設值重設目前選取的「進階設定」。請參考以上所列的設定值以獲取預設值的資訊。(這個選項不提供每個設定使用。)

注意：在 Intel PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


PRO/100 和 PRO/100+介面卡的診斷
Intel(R) PRO/100、PRO/100+、和 PRO/100 S Adapter 的診斷

注意：如果診斷程式在執行中，您可以按一下「停止」，診斷程式停止之前會有短暫的延遲。診斷程式停止後，會有「確定」按鈕可供使用。

基礎診斷

介面卡診斷為您提供測試一個或數個項目的彈性。

注意：如果您的電腦在執行 Windows 98，可能需要在執行診斷程式之前先停用介面卡 �電源管理� 功能。 若需詳細資料，請參閱停用電源管理程序。

控制登錄

測試軟體用來設定和傳送指令到 8255x 控制器的登錄。

如果「控制登錄」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。

Intel 8255x Controller

在 8255x 控制器上執行內建測試，確認它可以適當操作。

如果「控制器」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。

EEPROM

讀取 EEPROM 內容，並確認總值正確。這個會使用實際上會測試登錄的 EEPROM「控制/資料登錄」。

如果「EEPROM  登錄」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。

迴路

測試介面卡傳送和接收封包的能力。

如果「迴路」測試失敗，請更換介面卡並再執行一次測試。如果更換後測試失敗，可能就表示主機板或匯流排上的另外一個裝置無法適當作業。

連結

藉由在網路上傳送 1000 個專屬封包並擷取那些相同的封包來檢查網路連線和介面卡的傳送和接收功能性。

如果 "連結" 測試失敗，請確定纜線是否穩固連接到介面卡和連結協力電腦。如果纜線連接穩固，請嘗試將纜線接到連結協力電腦上不同的連接埠或嘗試不同的纜線。


PRO/100+ 介面卡的進階設定
Intel(R) PRO/100 Adapter Family 的進階設定

列在 "進階" 標籤中的設定可讓您自訂介面卡處理 服務品質 (QoS) 標籤、卸載、和其它功能的方法。視您在執行的作業系統和安裝的特定介面卡而定，有些進階功能可能會不供使用。

進階設定

介面式框架內間隔

補償您的網路上過量的 Ethernet 封包衝突。依照預設，這個設定是 0，如此可停用此功能。

建議設定 (1) 最適用於大部分的電腦和網路，其是利用動態調整網路流量情況來進行網路連結。當值設為 1 時，動態模式才會作用。但是，在某些情況中，手動設定間隔值獲取的效能可能會比較好。設定值會強迫封包間的靜態間隔。

增加值會增加傳輸框架間的延遲。

支援的介面卡	全部
預設值	0: 停用
範圍	0-255

介面連結回應

纜線與介面卡斷開連接時，利用繞過啟動路徑加速系統啟動需要網路連線性。如此會大幅減少啟動電腦時所需的時間。

Intel Ethernet 控制器的 �介面式連結回應� 啟用，並且網路纜線沒有連接到 RJ-45 連接埠時，網路連線會停用。黃色的小心圖示會出現在「裝置管理員」中的網路連線旁邊。

要重新啟用網路連線，請將網路纜線連接到 RJ-45 連接埠，然後重新啟動電腦。

支援的介面卡	僅限行動式（cardbus）產品。不可供每個介面卡型號使用。
預設值	關閉
建議	開啟
範圍	開啟，關閉
注意：系統中啟用無線介面卡時，�介面式連結回應� (ALR) 就不會作業。

介面效能調整

設定啟動岔斷前，介面卡接收的框架數。在正常的操作下，每次接收到框架時，介面卡都會產生一個岔斷。減少岔斷數會改善 CPU 的用量。

將滑桿移到「最大介面卡頻寬」來為每個框架產生一個岔斷。如此會增加介面卡的頻寬，但是可能會增加 CPU 的用量，降低電腦的速度。產生岔斷前，將滑桿移向「最高 CPU 用量」來增加介面卡接收的框架數。這樣會改善 CPU 的用量，但是可能會降低介面卡的頻寬。此預設設定適用於大部分的電腦。

支援的介面卡	全部

介面科技

啟用或停用介面卡驅動程式中的微小代碼。微小代碼根據作業系統環境最佳化效能。

要確保最佳的可能效能，請將 "介面科技" 保留在啟用狀態。

在疑難排解介面卡的相容性問題時，您可能會需要選擇停用 "介面科技"。停用 "介面科技" 同時也會停用 "傳輸控制區塊" 和 "介面式效能微調"。

支援的介面卡	全部
預設值	開啟
範圍	開啟，關閉
介面式傳送閾值

指定傳送前介面卡儲存在其傳輸緩衝區中的位元組數。例如，如果 "介面式傳輸閾值" 是 100，介面卡在傳送資料前會在它的緩衝區儲存 100 個位元組 (800 位元)。

•	提高 "介面式傳輸閾值" 會降低傳輸效能，但是傳輸不足的情況會比較少。

•	降低 "介面式傳輸閾值" 會提升傳輸效能，但是傳輸不足的情況會比較多。降低該值可讓介面卡執行早期傳輸。

介面卡僅將 "介面式傳輸閾值" 當成起始點使用。如果介面卡使用較低值可以達到較好的傳輸效能，它就會自動使用較低值。

要設定介面卡先傳輸完整的 Ethernet 框架，然後調整最佳效能，請將這個值設為 190。如果使用值 190 時的傳輸效能大幅降低，就將 "閾值" 設為 16，然後逐漸增加。

支援的介面卡	全部
預設值	200
建議	�h 如果電腦有多重匯流排主控卡或較長的等待時間，請將此值設為 200。 �h 如果電腦有單一匯流排主控卡，請將此值設為 12。
範圍	0-200
沒有資源情況下的基本連接

即使系統沒有足夠的資源可以執行所有的進階設定還是維持網路連線性，例如，"IPSec 卸載" 和 "大量傳送卸載"。當您重新啟動電腦時，進階設定會恢復。

要識別資源問題，請檢查系統記錄。因為低系統資源，系統記錄顯示發生的錯誤。

支援的介面卡	全部
預設值	啟用
建議值	啟用
範圍	啟用，停用
結合緩衝區

自訂 "結合緩衝區" 的數目來最佳化傳輸效能，如此可讓介面卡在封包傳輸之前加入資料區段。

"結合緩衝區" 的設定一定要與 "傳輸描述器" 設定一起作業。"結合緩衝區" 設定應該是 "傳輸描述器" 的 30 - 50%。如果 "結合緩衝區" 設定經過修改以符合 "傳輸描述器" 設定，傳輸效能可能不會提升。

�結合緩衝區�設定會大幅會提升 Windows NT 4.0 電腦上的傳輸效能。它也會提升 Windows 98 和 Windows 2000 電腦上的傳輸效能。

支援的介面卡	全部
預設值	8
建議值	8
範圍	1-32

啟用 PME

在執行舊版 "進階電源管理" (APM) 的電腦上啟用或停用介面卡上的「喚醒」功能。喚醒功能可讓介面卡在接收到特定封包類型時，例如 ARP 封包，從待命或關閉狀態恢復作業。

•	停用這項功能會停用使用舊版電源管理電腦上的所有「喚醒」設定。

•	啟用這項功能可讓介面卡會「喚醒」訊號回應。要設定介面卡對特定的封包類型回應，請參閱本主題中稍後說明的「喚醒」設定資訊。

•	「硬體預設值」強迫介面卡根據系統硬體設定「喚醒」功能。

•	「無動作」值可讓介面卡使用作業系統的預設值。

如果您要停用所有的「喚醒」設定，請設定停用這項功能。否則，請將此功能設為「無動作」。

支援的介面卡	以 82559 為基礎的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	停用
範圍	啟用，停用

流程控制

讓介面卡更有效地規律流量。

•	當它們的接收佇列達到預先定義的限制時，介面卡會產生流量控制框架。產生流程控制框架會提示傳輸器減慢傳輸。

•	介面卡會以流程控制框架中指定的時間暫停封包傳輸來回應流程控制框架。

讓介面卡調整封包傳輸速度，流程控制可協助預防封包丟失。

注意：要讓介面卡能夠利用這項功能，協力電腦一定要支援流程控制框架。

支援的介面卡	82540 和 82544 為基礎，傳輸和接收。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	產生和回應流程控制框架
範圍	關閉、回應、產生、產生和回應、硬體預設值

以登入為基礎的連結

啟用 "介面式連結回應" (ALR) 功能。根據參數 LinkBasedLoad 的值，這個功能會檢查 PhyLink 狀態並傳回 "成功" 或 "失敗" 的值。

支援的介面卡	全部
預設值	停用 (0)
範圍	啟用，停用

連結速度與雙工

設定介面卡的通訊設定。

要能夠在設定的設定中操作，連結協力電腦也必須要能夠在設定的設定操作。例如，如果介面卡設定使用 100 Mbps/全雙工，連結協力電腦一定也要能夠以 100 Mbps/全雙工操作。以次類推，如果介面卡設定使用�自動交涉�，連結協力電腦也一定要支援自動交涉。

支援的介面卡	所有的 Intel(R) PRO/100 介面卡
預設值	自動偵測
建議值	自動偵測
範圍	• 自動偵測- 介面卡會和它的連結協力電腦交涉以識別相容的速度與雙工設定。 • 10 Mbps/半雙工 - 介面卡強迫以 10 Mbps 連線，並個別完成傳輸和接收作業。介面卡接收封包時，就無法傳送封包。傳送封包時，就無法接收封包。 • 10 Mbps/全雙工 - 介面卡強迫以 10 Mbps 連線，並同時完成傳輸和接收作業。如此可改善介面卡的效能。如果您有全雙工切換器才選取這個模式。 • 100 Mbps/半雙工 - 介面卡強迫以 100 Mbps 連線，並個別完成傳輸和接收作業。介面卡接收封包時，就無法傳送封包。傳送封包時，就無法接收封包。 • 100 Mbps/全雙工 - 介面卡強迫以 100 Mbps 連線，並同時完成傳輸和接收作業。如此可改善介面卡的效能。如果您有全雙工切換器才選取這個模式。

本機管理位址 (LAA)

覆寫介面卡的 MAC 位址。要輸入新的網路位址，請在這個�值�方塊中鍵入 12 位數的十六進位號碼。

支援的介面卡	全部
預設值	無
範圍	0000 0000 0001 - FFFF FFFF FFFD 例外： • 不要使用多點傳送位址 (高位元組最不醒目的位元 = 1)。  • 不要全部使用零或 F。
注意：在群組中，Intel(R) PROSet II 使用其中一個：

•	如果群組有設定 LAA，就是群組的 LAA，或者

•	如果群組沒有設定 LAA，就是主要介面卡的永久 MAC 位址

如果介面卡是群組中的主要介面卡，並且該群組有 LAA，Intel PROSet II 不會使用介面卡的 LAA。

Windows 98SE 使用者：

手動指派位址後，如果您要使用預設位址，請執行這些程序之一：

•	在「網路內容」對話方塊的「進階」標籤，選取「本機管理位址」，將其值變更為 0。按一下「確定」來套用該設定。

•	在 Intel PROSet II 中，按一下「進階」標籤，然後按一下「復原預設」或從「值」欄位清除所有的字元。按一下「確定」來套用該設定。

登錄連結狀態事件

這個設定是用來啟用/停用連結狀態變更的登入。如果設定在開啟狀態，連結變更事件或離線變更事件會產生顯示在系統事件登錄器中的訊息。管理員可從系統事件登錄器檢視事件訊息。

以下的事件會被登錄。

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

支援的介面卡	全部
預設值	Enable
範圍	啟用，停用
卸載

如果設定與您使用的介面卡類型相符，節省 CPU 週期。

•	如果您使用含 Intel(R) PRO/100 S 介面卡的安全性卸載，就使用「IP 保全性」設定。

•	如果您使用含 Intel(R) PRO/100 S 介面卡的安全性卸載，就使用「檢查值」設定。

•	若是任何其它介面卡類型，請使用「無」設定。

支援的介面卡	全部
支援的作業系統	Windows* 98SE、Windows Me、Windows NT*、Windows 2000、和 Windows XP
預設值	Intel PRO/100 S：IP 保全性 沒有保全性的 Intel PRO/100 S：檢查值
範圍	無、IP 保全性、檢查值（視介面卡類型而定，有些選項可能不供使用）
若須更多有關�IP 保全性�的資訊，請參閱主題，啟用 IPSec。

PCI 匯流排效率

讓介面卡使用封包傳輸的最佳方法或全程強迫封包結合。

•	停用 "PCI 匯流排效率" 時，介面卡會使用提供最佳效能的傳輸方法。如果集合封包提供最佳的傳輸效能，介面卡會自動集合封包。

•	啟用 "PCI 匯流排效率" 時，介面卡會強迫封包集合。

如果封包傳輸效能沒有問題的話，將 "PCI 匯流排效率" 設為停用。如果不足的情況很多，或者是 "PCI 匯流排" 出現效能問題，請將此值設為啟用。

支援的介面卡	全部
預設值	停用
範圍	啟用，停用

優先層級定義

設定 QoS 標籤封包的優先順序等級分割點。

如果電腦有啟用 802.1p/802.1Q 標籤 (QoS)，您可以定義由優先順序佇列伺服的優先階層 (0-7)。Intel 介面卡有兩個優先階層佇列：高和低。依照預設，值是 0-3 的封包會透過 "低優先順序佇列" 傳出，值是 4-7 的封包會透過 "高優先順序佇列" 傳出。

輸入 "優先階層定義" 的數字就是 "高" 和 "低" "優先順序佇列" 的切割點。例如，如果您輸入 6，那麼 0-5 的優先順序封包會透過 "低優先順序佇列" 傳出，值是 6-7 的封包會透過 "高優先順序佇列" 傳出。

支援的介面卡	全部
預設值	4 • 值是 0-3 的封包會傳送到 "低優先順序佇列"。  • 值是 4-7 的封包會傳送到 "高優先順序佇列"。
範圍	0-7

QoS (802.3ac) 封包標籤

為您透過 Windows* 2000、XP、或優先順序封包  設定的優先順序過濾器啟用或停用 IEEE 802.1p/802.1Q 標籤。您一定要將這個選項設為「啟用」，�優先順序封包� 過濾器才能適當作業。

如果您已經使用 802.1p/Q 標籤指派篩選器，但是這個設定是「停用」，相符的封包依舊會使用 Intel 的高優先順序佇列 (HPQ)。

支援的介面卡	82550、82558 和 82559 為基礎的產品。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	停用
範圍	啟用，停用
接收緩衝區

指定複製資料到通訊協定記憶體時，驅動程式使用的緩衝區數目。

在高網路載量情況下，增加接收緩衝區可提高效能。缺點是，這樣會增加驅動程式使用的系統記憶體量。在其它情況下，藉由修改此值，您可能會降低系統的效能。

支援的介面卡	全部
預設值	視選取的功能而定，預設值也會不一樣。
建議值	• Windows NT 中的單一介面卡： 32 • Windows 98、Windows Me、Windows 2000、和 Windows XP 的單一介面卡： 48 • 成組的介面卡： 250 • 使用 IPSec 和/或多重功能： 350
範圍	8-1024

重新傳輸框架內間隔

增加框架重新傳輸之間的延遲。雖然介面卡有一個在衝突後用來重新傳輸框架的內建 Ethernet 運算式，如果網路上有異常大量的衝突，增加延遲可以改善網路效能。

支援的介面卡	選取的介面卡支援這項功能
預設值	6
範圍	6-15

保全性關聯

指定可以卸載到介面卡的輔助處理器的同步 "保全性關聯" 數。保全性關連是與另外一部執行 Intel(R) Packet Protect 或其它 IP Security 軟體電腦的通訊作業階段。

如果電腦可以支援的 "保全性關連" 比預設值指定的還多，請增加此值。請注意，增加 "保全性關連" 的數目也會增加介面卡的記憶體消耗量。

支援的介面卡	Intel(R) PRO/100 S
預設值	用戶端： 64 伺服器： 1000
範圍	1-5000

自動電源關閉

LAN 纜線沒有連接到介面卡時，啟用介面卡來減少電源消耗量。介面卡恢復有效的連結時，介面卡的電源使用會回到正常狀態 (完全電源使用)。

支援的介面卡	82559 為基礎或更新的行動式介面卡。
預設值	啟用
建議值	啟用
範圍	啟用，停用
技術性詳細資料

傳輸控制區塊

定義 "傳輸控制區塊" 數，這些區塊是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸控制區塊"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸控制區塊" 的數目。雖然增加 "傳輸控制區塊" 的數目可提升傳輸效能，但是 "控制區塊" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用預設設定 16。

支援的介面卡	全部
預設值	16 或 32，視介面卡的需求而定
範圍	8-64
喚醒連結變更

如果網路連線在電腦處於待命模式時建立連結，喚醒電腦。您可以啟用此功能、停用此功能、或讓作業系統使用其預設設定。

支援的作業系統	Windows 9x、Windows 2000、Windows XP
範圍	停用、強迫、依附 OS
預設值	停用
喚醒設定

這些設定指的是作業系統或 Intel(R) PROSet II 啟動的功能。視您的 Windows 版本而定，此功能的作用會不一樣，或完全不受支援。

•	這些 Windows 版本支援 "喚醒設定"：Windows 9x、Windows Millennium Edition、Windows 2000、Windows XP 64 bit Edition、和 Windows XP Professional。

•	這些 Windows 版本不支援 "喚醒設定"： Windows 98 retail、和 Windows NT 4.0.

注意：僅 Intel(R) PRO/100+ Management and Server 介面卡和 Intel(R) PRO/100 S 介面卡才支援 "喚醒設定"。

在作業系統中啟用喚醒設定

以下的 "喚醒設定" 類型需要作業系統啟用 "喚醒設定"：

•	喚醒 ARP

•	喚醒直接封包

•	喚醒 NBT

對這些 "喚醒" 封包類型回應的介面卡，作業系統一定要能夠使用 "喚醒設定"。要啟用「喚醒設定」，請瀏覽到「裝置管理員」，請用選項「允許此裝置將電腦從待命狀態喚醒」。要尋找這個選項：

1.	按一下「開始」 > 「控制台」。
「控制台」視窗會開啟。

2.	連續按兩下「系統」。
「系統」對話方塊會出現。

3.	按一下「硬體」標籤，然後按一下「裝置管理員」按鈕。
「裝置管理員」視窗會開啟。

4.	連續按兩下您要為�喚醒設定�啟用的介面卡。
「內容」對話方塊會出現。

5.	按一下「電源管理」標籤。

6.	按一下「允許此裝置將電腦從待命狀態喚醒」來啟用介面卡的 "喚醒設定"。

要設定喚醒設定

1.	在 Intel PROSet II，按一下「進階」。

2.	在「設定」清單方塊中，選取「喚醒設定」。

3.	在「值」清單中，選取適當的「喚醒」設定。

4.	按一下「確定」或「套用」。

可用的設定

這些是 Intel PROSet II 中提供的「喚醒」設定：

設定	描述
停用	介面卡不會使用「喚醒」設定。
喚醒神奇封包	讓介面卡在接收到 "神奇封包" 時回應醒來。"神奇封包" 是包含接收介面卡的 Ethernet 位址的 16 個連續副本的封包。設定這項功能時，Intel PROSet II 會用這項功能置換作業系統值。
喚醒直接封包	讓介面卡在接收到 "直接封包" 時醒過來，此封包是傳送到介面卡的 MAC 位址的單一傳播封包。  通訊協定一定要在驅動程式中啟用這個喚醒方法。取消選取這項功能會通知驅動程式忽略任何啟用這個喚醒方法的通訊協定要求。
喚醒神奇封包和直接封包	讓介面卡在接收 "神奇封包" 或 "直接封包" 時回應醒來。
受控的作業系統	讓作業系統能夠完全控制「喚醒設定」。

注意：如果一個介面卡有數個設定的 IP 位址，作業系統可能會要求喚醒所有設定位址的 ARP 配置。介面卡僅會在 ARP 封包查詢清單中的第一個 IP 位址時回應喚醒。

注意：「喚醒」設定不包括從關機 (S5) 狀態喚醒電腦的能力。這個狀態由「啟用 PME」設定控制，「進階」標籤有提供此功能。即使「喚醒」設定停用，從 S5 喚醒的能力還是由「啟用 PME」設定決定。

只要介面卡驅動程式有啟用，PME 設定就可以作業。但是，驅動程式一旦停用，裝置就會返回其硬體預設設定，此設定可能允許，也可能不允許電腦從關機狀態喚醒。

亦請參閱

設定成組進階設定


優先順序封包概述
Intel(R) Priority Packet 概述

Intel(R) Priority Packet 是一種流量優先順序公用程式，可讓您設定過濾器，在一般流量之前，先處理高優先順序的流量。您可以使用 Intel Priority Packet 來設定過濾器，為重要的應用程式提供高優先順序。

Intel Priority Packet 和 Intel(R) PROSet II 不是一樣的公用程式。

需求

支援的作業系統	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 或更高的版本
支援的介面卡	Intel(R) PRO/100 和 PRO/1000 系列介面卡
要安裝 Intel Priotiy Packet

1.	將介面卡的光碟片插入電腦的光碟機中。
自動執行螢幕會顯示出來。

2.	關閉自動執行螢幕。

3.	瀏覽到 Intel CD 光碟片上的 WINDOWS/PRTPKT 資料夾。

4.	要安裝 Intel Priority Packet，請連續按兩下 setup.exe。

5.	遵照螢幕上的說明來完成 Priority Packet 的安裝。

安裝後，您可以利用按一下「開始」>「程式集」> Intel(R) Priority Packet II 來開啟該公用程式。

優先順序化網路流量

Intel Priority Packet 可讓您設定過濾器 從重要的節點或含有顯示優先順序的應用程式傳送資訊。藉由在主機或網路的登錄點優先順序化流量，網路裝置可根據封包中定義的優先順序資訊來做轉送的決定。

Intel Priority Packet 根據您指派要套用於送出 (傳輸) 封包的過濾器 � 參數來優先順序化流量。使用「優先封包過濾器精靈」，您可以根據節點 (MAC) 位址、Ethernet 類型、或各種通訊協定和連接埠內容預先定義或自訂過濾器。Priority Packet 提供兩種優先順序化流量的方法：IEEE 802.1p 標籤和 Intel High Priority Queue。

IEEE 802.1p 標籤

IEEE 802.1p 是一種為了定義優先順序等級的標籤封包 IEEE 標準。封包會多標上四個 (4) 額外的位元組，因此會提高封包大小並顯示較高的優先順序等級。這些標籤的封包傳送到網路時，優先順序較高的封包會先傳送出去。優先順序封包標籤 (亦稱為 �流量類別加速處理�) 可讓介面卡與網路的其它要素一起作業 (切換器、路由器) 來將優先順序封包先傳送出去。802.1p 標籤可讓應用程式從 0 (低) 到 7 (高) 指派特定的優先順序等級。

在 Windows* 2000、XP、或 Intel Priority Packet 中設定過濾器後，您一定要啟動 Intel PROSet II 和啟用「進階設定」標籤上的「QoS 標籤」。

注意：IEEE 802.1p 標籤會提高其加上標籤的封包大小。有些集線器和切換器無法識別較大型的封包，所以會將它們丟棄。查看您的集線器或切換器說明文件，確定它們是否支援 802.1p。如果這些裝置不支援 802.1p，或者您不確定的話，請使用 �高優先順序佇列� 來優先順序化網路流量。

有效使用 IEEE 802.1p 標籤的需求：

•	所有接收和路由 802.1p 標籤封包的電腦一定要支援 802.1p。

•	安裝在處理標籤封包的電腦上的介面卡一定要支援 802.1p 標籤。所有的 Intel(R) PRO/1000、PRO/100+、和 PRO/100 S 介面卡都支援 802.1p。Intel(R) PRO/100B 介面卡不支援。

•	這些介面卡不可以指派到介面卡群組。

•	如果您在相同的介面卡上設定 VLANs 或封包標籤，802.1p/802.1Q Tagging 一定要在 Intel PROSet II 的「進階設定」標籤上「啟用」。

•	VLANs (802.1Q) 和優先順序化 (802.1p) 共用 802.3ac 標籤。在介面卡上設定 VLANs 和/或 QoS 標籤時，Intel 介面卡會使用 802.3ac 標籤。

•	如果介面卡設定使用 VLANs，切換器 VLAN 一定要和介面卡支援同樣類型的標籤 (802.3ac)。

•	如果介面卡設定使用優先順序的話，有些切換器會要求切換器上的非預設 VLAN 讓標籤通過。


過濾器

套用於傳出 (傳輸) 封包以決定該封包應該以IEEE 802.1p 標示或放在高優先順序佇列的參數。


IEEE 802.1p 規格

用不同優先階層的封包標示 IEEE 標準。這些封包傳送到網路時，優先順序較高的封包會先傳送出去。優先順序封包標籤可讓介面卡與其它網路裝置一起作業以提供更好的整體效能。

網路結構 (切換器和其它路由裝置) 支援它時，IEEE 802.1p 標籤才有效。如果您的基礎架構不支援 IEEE 802.1p 標籤或您不確定，可以使用 Intel的高優先順序佇列。


高優先順序佇列

使用 Intel(R) 優先順序封包的傳輸佇列。�高優先順序佇列�（HPQ）處理高優先順序的封包。

有 82558 為基礎和更新版控制器的 Intel(R) PRO/100 介面卡上有提供 HPQ。若須有關控制器的資訊，請參閱介面卡規格表。

若須更多有關 HPQ 的資訊，請參閱 Intel 優先順序封包線上說明。


標籤

在封包新增資訊。如果�優先順序封包�使用 IEEE 802.1p 標籤，就表示新增四個額外位元組的資訊指示封包的優先順序。


偵測到 Cardbus

單一介面卡安裝

如果您在安裝單一 Cardbus 介面卡，請按一下您安裝的型號。

注意：如果您有安裝 Intel(R) PRO/100 Cardbus II  介面卡（僅限 LAN）並且正在安裝 Intel(R) PRO/100 LAN+Modem56 Cardbus II  介面卡，您一定要：

1.	移除僅限 LAN 介面卡的驅動程式。

2.	重新啟動電腦。

3.	重新安裝 LAN+Modem56 介面卡的驅動程式。

兩個介面卡安裝

如果您在安裝兩個 Cardbus 介面卡，並且其中一個或兩個都是 Intel PRO/100 LAN+Modem56 Cardbus II 介面卡，請按一下 Intel(R) PRO/100 LAN+Modem56 Cardbus II。

如果兩個介面卡都是 Intel PRO/100 Cardbus II 介面卡 (僅限 LAN)，請按一下 Intel(R) PRO/100 Cardbus II。

PCI 介面卡

如果您在安裝 PCI 介面卡 (例如，在銜接站)，請按一下 Intel(R) PRO PCI Adapter。


CardBus 資源
定義 Cardbus 資源

為您的 �網路介面卡� 和 �數據機� 選取一組可用的資源。

要確認選取的資源與您的電腦相容

在「控制台」中連續按兩下Intel PROSet II 圖示來啟動 Intel(R) PROSet II。
Intel PROSet II 出現。

•	如果沒有資源衝突，「一般」標籤會顯示介面卡狀態資訊。

•	如果與另外一個裝置有資源衝突，Intel PROSet II 會顯示含說明的「疑難排解」標籤。遵守這些說明以選擇不同的資源。


超大型框架

"超大型框架" 比標準的 Ethernet 框架還大。標準的 Ethernet 框架是 ~1.5k 位元組，�超大型框架� 最多可包含 ~16k 位元組。

如果大部分的流量都是由大型封包組成，並且其它延遲性也可以忍受，"超大型框架" 可減少 CPU 的用量並改善線路效率。

注意：另外，"超大型框架" 僅在 1000 Mbps 才受到支援。以 10 或 100 Mbps 使用 "超大型框架" 可能會導致不良的效能或失去連線。"超大型框架" 僅在 TCP/IP 封包中才有效。

開始進行之前

請確認：

•	您有以 1000 Mbps 執行的 Intel(R) PRO/1000 介面卡。Intel(R) PRO/100 介面卡不支援�超大型框架�。

•	系統在執行 Windows* 2000、XP、或 NT* 4.0。

•	網路裝置支援 "超大型框架"。在其它網路裝置設定 "超大型框架" 時，請注意網路裝置會以不同方式計算 "超大型框架" 的大小。有些裝置在框架大小中包括標題資訊，其它則不包括。

設定超大型框架

•	要設定一般可供使用的封包大小，請使用 Intel(R) PROSet II。

•	要設定任何封包大小，請在登錄中輸入值。

要在 Intel(R) PROSet II 中設定超大型框架

在網路上設定超大型框架需要經過三個步驟的程序。

步驟 1：設定介面卡使其支援超大型框架：

1.	開啟 Intel(R) PROSet II。

2.	在網路元件目錄，按一下您要用超大型框架設定的介面卡。

3.	按一下「進階」標籤。

4.	從「設定」清單，按一下「超大型框架」。

5.	從「值」方塊，按一下封包大小。

現在介面卡便已設定支援超大型框架了。

步驟 2：設定網路切換器使其支援超大型框架。參閱您的切換器文件以獲取詳細資料。

步驟 3：設定伺服器使其支援超大型框架。檢查您的伺服器文件以獲取詳細資料。

要使用登錄來設定超大型框架

在網路上設定超大型框架需要經過三個步驟的程序。

步驟 1：設定介面卡使其支援超大型框架：

1.	開啟「登錄編輯器」。按一下「開始」>「執行」。在「開啟」方塊中，鍵入 regedit。
「登錄編輯器」會開啟。

2.	瀏覽到 MaxFrameSize 登錄鍵。

3.	為框架大小輸入 1415 到 16128 的值。

現在介面卡便已設定支援超大型框架了。

步驟 2：設定網路切換器使其支援超大型框架。參閱您的切換器文件以獲取詳細資料。

步驟 3：設定伺服器使其支援超大型框架。檢查您的伺服器文件以獲取詳細資料。


MiniPCI 介面卡

MiniPCI 介面卡與支援 MiniPCI 型式的特定行動式電腦一起作業。這些介面卡支援的功能組和這個說明檔案中描述的用戶端介面卡支援的功能組一樣。有些 MiniPCI 介面卡也包括在產品中的整合數據機硬體。

如果您的產品有數據機，請參閱隨附於電腦中的說明文件以獲取有關數據機組態的資訊。

亦請參閱：

Intel(R) PRO/100+ Adapters 的進階設定


PRO/10+ 介面卡的進階設定
Intel(R) PRO/10 和 PRO/10+ Adapter 的進階設定

列在 "進階" 標籤中的設定可讓您自訂介面卡處理連結變更、緩衝區、卸載、和其它功能的方法。視您在執行的作業系統和安裝的特定介面卡而定，以下有些功能可能無法使用。

進階設定

介面式框架內間隔

補償您的網路上過量的 Ethernet 封包衝突。依照預設，這個設定是 0，如此可停用此功能。建議設定 (1) 最適用於大部分的電腦，其是利用動態調整網路流量情況來進行網路連結。當值設為 1 時，動態模式才會作用。但是，在某些情況中，手動設定間隔值獲取的效能可能會比較好。設定值會強迫封包間的靜態間隔。

增加值會增加傳輸框架間的延遲。

支援的介面卡	全部
預設值	1
範圍	0-255

介面科技

啟用或停用介面卡驅動程式中的微小代碼。微小代碼根據作業系統環境最佳化效能。

要確保最佳的可能效能，請將 "介面科技" 保留在啟用狀態。

在疑難排解介面卡的相容性問題時，您可能會需要選擇停用 "介面科技"。停用 "介面科技" 同時也會停用 "傳輸控制區塊" 和 "介面式效能微調"。

支援的介面卡	全部
預設值	開啟
範圍	開啟，關閉
介面式傳送閾值

指定傳送前介面卡儲存在其傳輸緩衝區中的位元組數。例如，如果 "介面式傳輸閾值" 是 100，介面卡在傳送資料前會在它的緩衝區儲存 100 個位元組 (800 位元)。

•	提高 "介面式傳輸閾值" 會降低傳輸效能，但是傳輸不足的情況會比較少。

•	降低 "介面式傳輸閾值" 會提升傳輸效能，但是傳輸不足的情況會比較多。降低該值可讓介面卡執行早期傳輸。

介面卡僅將 "介面式傳輸閾值" 當成起始點使用。如果介面卡使用較低值可以達到較好的傳輸效能，它就會自動使用較低值。

要設定介面卡先傳輸完整的 Ethernet 框架，然後調整最佳效能，請將這個值設為 190。如果使用值 190 時的傳輸效能大幅降低，就將 "閾值" 設為 16，然後逐漸增加。

支援的介面卡	全部
預設值	12
建議	• 如果電腦有多重匯流排主控卡或較長的等待時間，請將此值設為 200。 • 如果電腦有單一匯流排主控卡，請將此值設為 12。
範圍	0-200

沒有資源情況下的基本連接

即使系統沒有足夠的資源可以執行所有的進階設定還是要維持網路連線性。類似 "IPSec 卸載" 和 "大量傳送卸載" 之類的功能僅在資源不足時才會恢復。系統記錄中可以找到因為低系統資源造成的錯誤。

支援的介面卡	全部
預設值	關閉
建議值	開啟
範圍	開啟，關閉
結合緩衝區

自訂 "結合緩衝區" 的數目來最佳化傳輸效能，如此可讓介面卡在封包傳輸之前加入資料區段。

"結合緩衝區" 的設定一定要與 "傳輸描述器" 設定一起作業。"結合緩衝區" 設定應該是 "傳輸描述器" 的 30 - 50%。如果 "結合緩衝區" 設定經過修改以符合 "傳輸描述器" 設定，傳輸效能可能不會提升。

�結合緩衝區�設定會大幅會提升 Windows NT 4.0 電腦上的傳輸效能。它也會提升 Windows 98 和 Windows 2000 電腦上的傳輸效能。

支援的介面卡	全部
預設值	8
建議值	8
範圍	1-32
接收流程控制

讓介面卡利用暫停傳輸路徑來接收全雙工處理流程控制框架。傳輸路徑會以接收流程控制框架中指定的時間暫停。這些設定藉由預防封包丟失來協助微調網路效能。

支援的介面卡	這個功能可能不提供每個介面卡類型使用。
預設值	停用
範圍	啟用，停用

以登入為基礎的連結

啟用 "介面式連結回應" (ALR) 功能。根據參數 LinkBasedLoad 的值，這個功能會檢查 PhyLink 狀態並傳回 "成功" 或 "失敗" 的值。

支援的介面卡	全部
預設值	停用
範圍	啟用，停用

連結速度與雙工

用連結組態設定 Intel(R) PRO/10+ 介面卡。

支援的介面卡	全部
預設值	自動偵測
建議值	自動偵測
範圍	• 自動偵測- 介面卡與切換器交涉以決定如何傳送/接收封包 (全雙工或半雙工)。  注意：您一定要有自動交涉切換器，如此才能在「連結速度與雙工」選項設為 "自動交涉" 時得到全雙工支援。 • 10Mbps/半雙工 - 介面卡使用 10 Mbps 的速度，並且一次僅執行一項作業。不是傳送，便是接收。 • 10Mbps/全雙工 - 介面卡使用 10 Mbps 的速度，並且同時接收封包。如此可改善介面卡的效能。如果您有全雙工切換器才選取這個模式。

本機管理位址

覆寫介面卡的 MAC 位址。要輸入新的網路位址，請在這個方塊中鍵入 12 位數的十六進位號碼。

支援的介面卡	全部
預設值	無
範圍	0000 0000 0001 - FFFF FFFF FFFD 例外： • 不要使用多點傳送位址 (高位元組最不醒目的位元 = 1)。  • 不要全部使用零或 F。

PCI 匯流排效率

讓介面卡使用封包傳輸的最佳方法或全程強迫封包結合。

•	停用 "PCI 匯流排效率" 時，介面卡會使用提供最佳效能的傳輸方法。如果集合封包提供最佳的傳輸效能，介面卡會自動集合封包。

•	啟用 "PCI 匯流排效率" 時，介面卡會強迫封包集合。

如果封包傳輸效能沒有問題的話，將 "PCI 匯流排效率" 設為停用。如果不足的情況很多，或者是 "PCI 匯流排" 出現效能問題，請將此值設為啟用。

支援的介面卡	全部
預設值	停用
範圍	啟用，停用

優先層級定義

定義 QoS 標籤封包的優先順序等級分割點。

如果電腦有啟用 802.1p/802.1Q 標籤 (QoS)，您可以定義由優先順序佇列伺服的優先階層 (0-7)。Intel 介面卡有兩個優先階層佇列：高和低。依照預設，值是 0-3 的封包會透過 "低優先順序佇列" 傳出，值是 4-7 的封包會透過 "高優先順序佇列" 傳出。

輸入 "優先階層定義" 的數字就是 "高" 和 "低" "優先順序佇列" 的切割點。例如，如果您輸入 6，那麼 0-5 的優先順序封包會透過 "低優先順序佇列" 傳出，值是 6-7 的封包會透過 "高優先順序佇列" 傳出。

支援的介面卡	全部
預設值	4 • 值是 0-3 的封包會傳送到 "低優先順序佇列"。  • 值是 4-7 的封包會傳送到 "高優先順序佇列"。
範圍	0-7

接收緩衝區

指定複製資料到通訊協定記憶體時，驅動程式使用的緩衝區數目。

在高網路載量情況下，增加接收緩衝區可提高效能。缺點是，這樣會增加驅動程式使用的系統記憶體量。在其它情況下，藉由修改此值，您可能會降低系統的效能。

支援的介面卡	全部
預設值	48
建議值	• Windows 98、Windows Me、Windows 2000、和 Windows XP 的單一介面卡： 48 • Windows NT 中的單一介面卡： 32 • 成組的介面卡： 250
範圍	8-1024

重新傳輸框架內間隔

增加框架重新傳輸之間的延遲。雖然介面卡有一個在衝突後用來重新傳輸框架的內建 Ethernet 運算式，如果網路上有異常大量的衝突，增加延遲可以改善網路效能。

支援的介面卡	全部
預設值	10
範圍	6-15

傳輸控制區塊

定義 "傳輸控制區塊" 數，這些區塊是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸控制區塊"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸控制區塊" 的數目。雖然增加 "傳輸控制區塊" 的數目可提升傳輸效能，但是 "控制區塊" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用建議值 16。

支援的介面卡	全部
預設值	32
建議值	16
範圍	8-64


PRO 1000 連結組態
Intel(R) PRO/1000 連結組態（僅限銅線模式）

注意： 幾乎在大部分的情況下，您都應該將自動交涉保留在啟用狀態。如果您停用自動交涉，請確定連結協力電腦設定與介面卡設定相符。自動交涉停用時，介面卡不會以 1000 Mbps 操作。

要設定速度與雙工

1.	在「連結組態」標籤上，按一下「啟用」 或「停用」來修改自動交涉設定。

•	自動交涉啟用時，介面卡會和它的連結協力電腦交涉速度與雙工。

•	停用自動交涉時，介面卡會被強迫成指定的速度和雙工設定。停用自動交涉時，請確定連結協力電腦可以用指定的速度和雙工操作。如果連結協力電腦無法以介面卡強迫的設定操作，介面卡和連結協力電腦之間就無法建立通訊。

2.	如果啟用自動交涉，請選取交涉期間在連結協力電腦廣告的速度和雙工設定。依照預設，所有的設定都會廣告。可能的設定包括：

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

•	1000 Mbps FULL

注意：根據 IEEE 規格，以 1000 為基礎的 T 操作無法被強迫。但是，您可以利用選取自動交涉，然後在「廣告」設定區段中僅選取�1000 Mbps Full�來設定介面卡，使其僅以 1000 Mbps 操作。

3.	如果停用自動交涉，請按一下以下其中一個設定來強迫介面卡的速度和雙工：

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

要確保通訊，請確定連結協力電腦可支援強迫的設定。

4.	按一下「確定」。

5.	得到提示時，重新啟動電腦。

現在介面卡便已設定速度和雙工設定。


連結協力電腦

介面卡連結的裝置，例如另外一個介面卡、集線器、切換器，等等。


網路元件目錄檢視
網路元件目錄

�網路元件目錄� 會出現在 Intel(R) PROSet  II 的左邊。按一下介面卡、VLANs、或群組來檢視有關該元件的詳細資料。


Boot Agent

這個標籤可讓您檢視控制 Boot Agent 軟體行為的設定。您可能需要在「設定」選擇方塊中變更一些設定。如果您的 IT 管理員已經啟用此功能，您可能可以透過  Boot Agent 軟體影像使用此標籤來更新快閃 ROM 裝置。

若須每個可能組態設定更詳細的說明，請參閱：

•	網路開機通訊協定

•	開機順序

•	安裝程式功能表等候時間

•	顯示安裝程式提示字元

•	舊有的作業系統喚醒支援

若須變更組態設定的說明，請參考《Intel(R) Boot Agent 使用者指南》。

注意：

如果您無法變更組態設定，您的介面卡或系統可能不會啟用該設定。

這個「說明」檔案中提供的資訊僅對 16 位元的 PXE 2.0 版 Boot Agent 有效。此處說明的大部分「組態設定」選項並沒有使用於 EFI 環境中。

更新 Boot Agent 按鈕

使用這個按鈕來安裝或更新 Intel Boot Agent 軟體。

注意：

Boot Agent 更新作業會將新的 Boot Agent 影像寫入快閃 ROM，如此可能會暫時停用 Windows* 網路裝置驅動程式的作業。您可能需要在此作業後重新啟動電腦。

如果需要安裝 DOS，請參閱《Intel(R) Boot Agent 使用者指南》中的 Installing/Updating in DOS Environments (在 DOS 環境中安裝/更新)。

要安裝或更新 Boot Agent 軟體

注意：從 Intel 的網站下載快閃 ROM 影像檔案時，為了此程序的進行，請務必將其儲存在暫時目錄中或放在容易找到的位置。

1.	從「開始」功能表，按一下「設定」，然後按一下「控制台」。
「控制台」視窗會出現。

2.	連續按兩下 Intel(R) PROSet II 圖示。
Intel PROSet II 螢幕會出現。

3.	在�網路元件目錄�，選取包含您要更新之快閃 ROM 的介面卡。

4.	按一下 Boot Agent 標籤。如果標籤沒有出現，請更新網路驅動程式或確定您有 Intel PROSet II 4.0 或更新的版本。

注意：Intel PROSet II 也可以讓您變更 PXE 和 RPL 環境的組態設定。如果您從 Intel PROSet II 螢幕左邊，�網路元件� 下列出的裝置選取在 PXE 或 RPL 環境中操作的介面卡，您可以檢視或變更出現在螢幕右邊的組態設定。若須更多資訊，請參閱《Intel(R) Boot Agent 使用者指南》中的 Configuring the Boot Agent in a Windows Environment (在 Windows 環境中設定 Boot Agent)。有些�快閃 ROM�並不支援所有的組態設定。

5.	要編輯設定，請按 Ctrl+S。按下 Ctrl+S 後，Boot Agent 標籤的外觀會改變成包括變暗的 (停用)「套用設定」按鈕。

6.	按一下「更新 Boot Agent」。
警告對話方塊會出現，說明網路連線性在 Boot 影像更新期間暫時失去。

7.	按一下「是」來繼續進行更新程序。
對話方塊會出現，詢問您是否要為目前的現有�快閃  ROM�建立備份。

8.	如果您要在更新快閃之前建立目前快閃 ROM 影像的備份，請按一下「是」。「儲存現有快閃影像為」對話方塊會出現。進行到步驟 10。

9.	如果您不將目前快閃 ROM 影像的備份儲存到檔案，請按一下「否」。「警告」對話方塊會出現。按一下「是」，然後進行到步驟 11。

10.	如果您要接受預設路徑和檔名，請按一下「儲存」(預設給介面卡的專屬 MAC 位址的檔名)。否則，請修改這些參數，然後按一下「儲存」。

11.	在「開啟檔案」對話方塊中，按一下「開啟」，如果您儲存的喜愛快閃 ROM 影像檔案出現在螢幕的預設路徑和檔名。否則，請修改路徑和檔名，然後按一下「開啟」。
注意：�快閃 ROM�影像可在 Intel 的網站取得。

更新程序可能需要五到十秒鐘的時間，更新作業進行期間，會出現一個進度指標。


網路開機通訊協定

如果您的 Boot Agent 不支援 RPL，這項設定就無法變更。

可能的值：

•	PXE (預先開機 eXecution 環境)

•	RPL (遠端程式載入)

說明：

選取 PXE 以使用於符合 WfM 網路管理的程式，例如 LANDesk* Management Suite、Windows* 2000 RIS、Windows XP RIS、和 Linux*。

選取 RPL 以進行繼承週期遠端開機，以及一些 Novell NetWare* 遠端開機解決方案。


開機順序

可能的值：

•	使用 BIOS 設定開機順序

•	先嘗試網路，然後才試本機磁碟機

•	先嘗試本機磁碟機，然後才試網路

•	僅嘗試網路

•	僅嘗試本機磁碟機

說明：

讓您能選取系統啟動時開機裝置被選取的順序。如果您的電腦有支援�BIOS 開機規格�（BBS）的 BIOS 或在 BIOS 設定程式中啟用開機順序的�隨插即用�（PnP）符合選擇，這個設定就永遠都會�使用 BIOS 設定開機順序� 並且不能變更。在這種情況中，請參考針對您的用戶端電腦的 BIOS 設定手冊來設定開機選項。

如果用戶端電腦沒有符合 BBS 或 PnP 的 BIOS，除了�使用 BIOS 設定開機順序�外，您可以選取上列任何一個值。


顯示安裝提示

可能的值：

•	啟用 � 預設值

•	停用

說明：

如果您選取「停用」，Ctrl+S 安裝提示會在 POST 後出現，如此，您就可以在安裝程式功能表等候時間 設定允許的秒數內按 Ctrl+S 來顯示�組態設定功能表�。

如果您選取「停用」，安裝程式功能表等候時間 設定是零，Ctrl+S 安裝提示不會在開機期間出現。但是，您還是可以在 POST 後立刻重複按下 Ctrl+S 直到功能表顯示為止來顯示�組態安裝程式功能表�。如果�組態安裝程式功能表�在您重複按下 Ctrl+S 後沒有出現，請重新開機，再試一次。


安裝程式功能表等候時間

可能的值：

•	0 秒

•	2 秒

•	3 秒

•	5 秒

說明：

Boot Agent 等候讓您按下 Ctrl+S 以便在系統啟動期間顯示�組態安裝程式功能表�的秒數。

如果您選取零為�安裝程式功能表等候時間�的設定並且/或在顯示安裝程式提示字元設定選取「停用」，Ctrl+S 安裝程式提示就不會在開機程序期間出現。但是，您還是可以在 POST 後立刻重複按下 Ctrl+S 直到功能表顯示為止來顯示�組態安裝程式功能表�。如果�組態安裝程式功能表�在您重複按下 Ctrl+S 後沒有出現，請重新開機，再試一次。


舊有作業系統喚醒支援

用千兆位元介面卡啟動時，這項設定不會出現在「組態安裝程式功能表」中。

參考您的作業系統說明來判斷您的作業系統是否支援遠端喚醒，以及如何使用這項功能。

可能的值：

•	啟用

•	停用

說明：

選取「啟用」來啟用非 Windows* 作業系統 (例如 DOS 或 NetWare*) 來使用 WfM 介面卡的遠端喚醒功能性。

使用 Windows 2000、XP、Me、或 98SE 時，請為這項設定選取「停用」。


VLAN 清單

如果您已設定 VLANs，它們就會出現在網路元件目錄：

當您在 VLAN 按一下滑鼠右鍵時，以下的選項會出現：

•	變更 VLAN 內容  - 可讓您變更 VLAN 組態。

•	移除 � 可讓您移除 VLAN。

亦請參閱

新增 VLAN


群組清單

如果您有設定的介面卡群組，它們就會出現在網路元件目錄：

當您在該群組按一下滑鼠右鍵時，以下的選項會出現：

•	移除群組

•	變更群組模式

•	新增 VLAN

•	啟用 IPSec

•	啟用 GVRP

如果您已經設定一個群組，但是該群組沒有出現在�網路元件目錄�中，您可能會需要關閉 Intel(R) PROSet II 才能套用群組設定。


成組的介面卡清單

當您在「成組的介面卡清單」按一下滑鼠右鍵時，以下的選項會出現：

•	屬意的主要 - 指派選取的介面卡為該群組的主要傳輸介面卡。通常，您在此指定的介面卡是頻寬最高的介面卡。

•	屬意的次要 - 指派選取的介面卡為�屬意的主要�介面卡的備份介面卡。這個選項要等到您指定�屬意的主要�介面卡後才能提供使用。

•	從群組移除 - 從群組移除選取的介面卡。

亦請參閱

•	變更介面卡成組模式

•	在現有的群組新增介面卡

•	建立新群組

•	從群組移除介面卡

•	移除介面卡群組

•	指定主要或次要介面卡


網路元件
網路元件目錄

�網路元件目錄� 會列出系統上作用中的網路元件。網路元件可以包括網路介面卡、群組、和 VLAN。


成員介面卡

「成員介面卡」清單方塊包含組成群組的介面卡。按一下成員介面卡來檢視針對該介面卡的資訊。

亦請參閱

從群組移除介面卡


虛擬 LAN

�網路元件目錄�中的「虛擬 LAN」標籤項目列出設定的 VLAN。

亦請參閱

新增 VLAN

變更 VLAN 內容

VLAN 定義

移除 VLAN

VLAN 的進階設定

設定 GVRP


移除介面卡實例
移除介面卡

從 Intel(R) PROSet II 移除介面卡或從電腦移除介面卡之前，請確定該介面卡不是成員的一部份。如果介面卡是群組的成員，請先從群組移除介面卡然後遵照以下的說明執行。

要從 Intel(R) PROSet II 移除介面卡

1.	在網路元件目錄中，於您要移除的介面卡上按一下滑鼠右鍵。

2.	按一下「移除」。
確認對話方塊會出現，通知您這個介面卡�不是�群組的成員。

3.	按一下「是」。

4.	按一下「確定」來關閉 Intel PROSet II 並套用變更。

5.	得到提示時，請重新啟動您的系統。

Intel PROSet II 便不再管理該介面卡。


建立新群組

群組是一群設定來提升網路功能性的介面卡，例如，錯誤移轉或增加傳輸輸出量。

要建立群組

1.	在網路元件目錄中，用滑鼠右鍵按一下「非成組的介面卡」。

2.	按一下「新增到群組」，然後「建立新群組」。
「成組精靈」會出現。

3.	選取您要建立的群組類型，按一下「下一步」。選擇有：

•	介面卡容錯性

•	切換容錯

•	介面式載入平衡

•	連結集合 (Dynamic_3ad* / GEC / LA / 802.3ad 靜態模式)

4.	如果您在建立�介面卡載入平衡�群組，您可以選擇啟用或停用�接收載入平衡� (RLB)。

•	如果您啟用 RLB，有最高速度的群組成員會接收 IP 流量，主要介面卡則接收非 IP 流量。
注意：啟用 RLB 時，Intel(R) PROSet 會自動選取屬意的主要介面卡。Intel PROSet II 不是以介面卡型號或速度為基礎來選擇屬意主要介面卡的。

•	如果您停用 RLB，僅主要介面卡會接收流量。

5.	此清單顯示目前不是群組一部份的所有介面卡。從此清單，按一下您要納入這個群組中的介面卡，然後按一下「下一步」。

6.	按一下「完成」。

7.	如果您喜歡的話，可以從群組中的介面卡指定一個主要介面卡。要指定主要介面卡，請在您要當成主要介面卡的介面卡上按一下滑鼠右鍵，然後按一下「屬意的主要」。
如果您選擇不要選取主要介面卡，Intel PROSet II 會選取一個屬意的主要介面卡

8.	按一下「關閉」來關閉 Intel PROSet II 並套用變更。

現在群組已被設定。

注意：在 Intel PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


在現有的群組新增介面卡

您可以隨時在現有的群組新增介面卡。

注意：在 Dynamic 802.3ad 群組中，變更組態可能會在切換器重新計算連結集合器時暫時岔斷流量。

要在 Intel(R) PROSet II 中的現有群組新增介面卡

1.	在網路元件目錄 中，用滑鼠右鍵按一下「群組清單」。

2.	按一下「在群組新增介面卡」，然後選取您要新增的介面卡。

現在，介面卡就成為群組的一部份了。

注意：在 Intel(R) PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


新增 VLAN
建立 VLAN

VLAN 是介面卡的邏輯群組，設定以提升網路安全性和減少廣播網域的大小。

要建立 VLAN

1.	在網路元件目錄 中，用滑鼠右鍵按一下「群組清單」或「非群組的介面卡清單」。

2.	按一下「新增 VLAN」。
「新增 VLAN」對話方塊會出現。

3.	在 VLAN ID 欄位中，鍵入指派給介面卡的 VLAN 號碼。VLAN ID 一定要與在切換器上設定的 VLAN ID 相符。
注意：0 和 1 這兩個 VLAN 號碼通常是保留的。檢查您的切換器文件以獲取詳細資料。

4.	在「VLAN 名稱」欄位中，鍵入 VLAN 的標籤。例如，Marketing (行銷) 或 Engineering (工程)。該名稱不需與另外一個網路裝置上的名稱相符；它僅是做為識別目的使用而已。

5.	按一下「確定」。

現在，介面卡便已設定為 VLAN 成員了。設定介面卡成為 VLAN 成員後，請務必以適當的 VLAN 資訊設定網路裝置來完成 VLAN 資訊。

注意：在 Intel(R) PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


移除 VLAN

移除 VLAN 時，請使用 Intel(R) PROSet II。在您的作業系統上透過「網路控制台」移除或停用 VLANs 會影響系統的穩定性和介面卡組態。

要從群組或介面卡移除 VLAN

1.	在網路元件目錄 中，用滑鼠右鍵按一下「VLAN 清單」。

2.	按一下「移除 VLAN」。

VLAN 便從群組或介面卡被移除。

注意：在 Intel PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


移除介面卡群組

移除群組時，請確定使用 Intel(R) PROSet II 公用程式。在您的作業系統上透過「網路控制台」移除或停用群組會影響系統的穩定性和介面卡組態。

要移除整個介面卡群組

1.	在網路元件目錄 中，用滑鼠右鍵按一下「群組清單」。

2.	按一下「移除」。

3.	確認訊息會出現。按一下「是」。

現在群組已被移除。介面卡會繼續以個別的裝置作用。

注意：如果您已為群組建立 VLAN 或�優先順序封包過濾器�，這些也會隨著群組一起被移除。如果您在介面卡被成組之前已為它建立 VLANs 或�優先順序封包過濾器�，群組被移除時，這些也會一併失去。


變更介面卡成組模式
變更成組模式

要變更群組的成組模式

1.	在網路元件目錄 中，用滑鼠右鍵按一下「群組清單」。

2.	按一下「變更群組模式」，然後按一下以下其中之一：

•	介面卡容錯性

•	切換容錯

•	介面式載入平衡
將群組模式變更為 �介面式載入平衡� 時，依照預設，接收載入平衡會停用。要啟用接收載入平衡，請變更群組模式，然後在「成組進階」標籤啟用接收載入平衡。

•	連結集合 (Dynamic_3ad* / GEC / LA / 802.3ad 靜態模式)

現在群組模式已變更。

注意：在 Intel(R) PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


從群組移除介面卡

您可以隨時從現有的群組移除介面卡。

注意：在 Dynamic 802.3ad 群組中，變更組態可能會在切換器重新計算連結集合器時暫時岔斷流量。

要從群組移除介面卡

1.	在網路元件目錄 中，用滑鼠右鍵按一下「群組」。

2.	按一下「從群組移除」。

3.	按一下「確定」來套用變更。

介面卡就不再是群組的一部份了。

注意：在 Intel(R) PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


變更 VLAN 內容

您可以利用變更 VLAN ID，將介面卡重新設定為不同 VLAN 的成員。變更與介面卡相關的 VLAN ID 會從現有的 VLAN 移除介面卡，切斷現有 VLAN 中與電腦之間的通訊。

例如，如果您將 VLAN ID 從 7 變更為 9，該電腦就不再與 VLAN 7 中的電腦通訊。相反地，它會與 VLAN 9 中的電腦通訊。

要變更 VLAN 組態

1.	在網路元件目錄 中，用滑鼠右鍵按一下「VLAN」。

2.	按一下「變更 VLAN 內容」。

3.	在 VLAN ID 欄位中，鍵入指派給介面卡的 VLAN 號碼。VLAN ID 一定要與在切換器上設定的 VLAN ID 相符。
注意：0 和 1 這兩個 VLAN 號碼通常是保留的。檢查您的切換器文件以獲取詳細資料。

4.	在「VLAN 名稱」欄位中，鍵入 VLAN 的標籤。例如，Marketing (行銷) 或 Engineering (工程)。VLAN 名稱僅做資訊提供使用，不需與另外一個網路裝置上設定的 VLAN 名稱相符。

5.	要關閉 Intel(R) PROSet II，請按一下「確定」。

現在 VLAN 組態已被更新。

注意：在 Intel(R) PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。

亦請參閱

啟用 GVRP

VLAN 的進階設定


指定主要或次要介面卡

在每個群組中，都有一個主要介面卡和一個或數個次要介面卡。

您可以選擇手動選取群組的主要介面卡，或讓 Intel(R) PROSet II 選取主要介面卡。

•	如果您選取主要介面卡，選取的介面卡就會成為�屬意的主要�介面卡。只要該介面卡有作用中的狀態，該�屬意的主要�介面卡就會傳輸和接收流量。如果�屬意的主要�介面卡失敗，但是稍後恢復成作用中狀態，控制會自動傳回�屬意的主要�介面卡。

例如，如果您有一個伺服器的主要介面卡是 Intel(R) PRO/1000 Gigabit 介面卡，並且 Intel(R) PRO/100+ 或 PRO/100 S 介面卡是它的次要介面卡，您就需要將 Intel PRO/1000 Gigabit 介面卡當成�屬意的主要�。在這個假設情況中，如果 Intel PRO/1000 介面卡失敗，Intel PRO/100+ 或 PRO/100 S 就會接替作業。Intel PRO/1000 介面卡被更換時，它會自動恢復在群組中的主要介面卡角色。

如果您以手動方式選取主要介面卡，群組中永遠都會有一個「屬意的主要」介面卡。

•	如果您沒有設定當成主要介面卡的介面卡，Intel PROSet II 會根據介面卡型號和速度選取最佳的介面卡。這就表示，雖然有主要介面卡，但是沒有�屬意的主要�介面卡。如果沒有�屬意的主要�介面卡，Intel PROSet II 可在主要介面卡失敗時選取另外一個主要介面卡。

例如，如果主要介面卡 Intel(R) PRO/1000 Gibabit 介面卡失敗，Intel PROSet II 可在群組中指派不同的介面卡來當成主要介面卡。如果 Intel(R) PRO/1000 介面卡恢復作用中狀態，它會重新加入為群組的成員而不是主要介面卡。

要將某個介面卡設定為主要或次要介面卡

1.	在網路元件目錄中，用滑鼠右鍵按一下「成組的介面卡清單」。

2.	按一下「屬意的主要」或「屬意的次要」。

現在介面卡已經有設定的狀態。

要變更介面卡的優先順序狀態

使用上列的相同程序，您也可以變更介面卡的優先順序。

STP 和 SFT 群組： 如果您變更群組的主要 (作用中) 介面卡，該群組會用新主要介面卡的 MAC 位址重新載入。以此類推，變更群組的 "本機管理位址" (LAA) 會造成重新載入，並且群組也會有新的 MAC 位址。如果伺服器在網路上作用時，於 SFT 群組上執行這兩個動作，會造成群組無法通訊，直到所有的網路裝置都利用新主要介面卡的位址資訊重新整體它們的 ARP 表格為止。重新整理 ARP 表所需的時間由 ARP 快取逾時時間設定，一個可供一些路由器和作業系統使用的參數。視 ARP 快取逾時時間而定，群組最多可能會有 10 分鐘的時間無法提供使用。

注意：「屬意的次要」選項要等到您指定「屬意的主要」後才能提供使用。


PROSet 匣式圖示
Intel(R) PROSet II 匣式圖示

安裝 Intel(R) PROSet II 後，您會在靠近時鐘的工作列中看到 Intel PROSet II 匣式圖示。

當您在該圖示按一下滑鼠右鍵時，以下的選項會出現：

指令	描述
啟動 Intel(R) PROSet II	顯示 Intel PROSet II 公用程式。
顯示狀態	顯示安裝之無線介面卡的名稱。
隱藏匣式圖示	在工作列中隱藏匣式圖示。   使工作列中的圖示重新出現。 在 Intel PROSet II 中的「一般」標籤，按一下「顯示匣式圖示」。
結束	關閉 Intel PROSet II 並從工作列暫時移除匣式圖示。  雖然在工作列中看不到圖示，您可以連續按兩下「控制台」中的 Intel PROSet II 圖示來啟動 Intel PROSet II。 電腦重新啟動時，Intel PROSet II 匣式圖示會出現在工作列中。
結束並且不要在開機時啟動	移除 Intel PROSetII 匣式圖示，並不要讓它在電腦重新啟動時出現。 要在選取這個選項後還原匣式圖示：  1. 按一下「開始」>「執行」。 2. 在「開啟」欄位中，鍵入 PROMON 然後按一下「確定」。   Intel PROSet II 圖示會一直維持在工作列中直到電腦重新啟動為止。 要永久顯示匣式圖示，請參閱以下的�開機時啟動匣式圖示�。
開機時啟動匣式圖示	設定讓 Intel PROSet II 匣式圖示出現在工作列中。這個選項可確保在電腦重新啟動後，可以看到匣式圖示。 注意：如果您有使用「結束並且不要在開機時啟動」選項，這個選項才可提供使用。


自動電源關閉技術性詳細資料
自動電源關閉詳細資料

�自動電源關閉�（SPD）是 Intel 82558、82559、和 82550 為基的介面卡上使用的省電方法，目的是在沒有有效連結時最小化電源消耗。SPD 可讓介面卡進入深度睡眠模式，如此最多可節省 150% 的電源。於以下情況時，SPD 在作用中：

•	介面卡沒有有效連結

•	作業系統處在「暫停」模式

在兩種假設情況中，如果�自動電源關閉�啟用，作業系統會將介面卡放在睡眠模式，減少整體電源消耗量。當介面卡有有效連結或作業系統離開「暫停」模式時，就會恢復正常電源消耗和介面卡活動。


無法解除安裝裝置訊息

如果您嘗試使用「裝置管理員」來移除�介面卡群組清單�或�VLAN 清單�，您會收到以下的訊息：�無法解除安裝此裝置。此裝置可能需要啟動電腦�。

這個訊息表示您不可以使用「裝置管理員」來移除 Intel(R) PROSet II 建立的虛擬介面卡。要從「裝置管理員」移除介面卡，請使用 Intel PROSet II。

亦請參閱

移除介面卡群組

移除 VLAN

啟用 GVRP


VLAN 的進階設定

要自訂進階的 VLAN 設定

1.	在網路元件目錄. 按一下「VLAN 清單」。

2.	按一下「進階」標籤。

3.	從下拉清單，按一下 NumRxPackets 然後鍵入新值。
NumRxPackets 定義 "接收描述器" 數，這些是讓介面卡在系統記憶體中配置接收封包的資料區段。每個接收的封包都需要一個 "接收描述器"，並且每個描述器都使用 2kb 的記憶體。

如果您注意到接收流量效能大幅降低，可能會需要選擇增加 "接收描述器" 的數目。如果接收效能不是問題的話，請使用預設設定。

小心：修改此值可能會降低系統的效能。

4.	從下拉清單，按一下 NumTxPackets 然後鍵入新值。

NumTxPackets 定義�傳輸描述器�數，這些是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸描述器"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸描述器" 的數目。雖然增加 "傳輸描述器" 的數目可提升傳輸效能，但是 "傳輸描述器" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用預設設定。

小心：修改此值可能會降低系統的效能。

5.	按一下「確定」。

6.	現在 VLAN 有自訂的設定值。

現在 VLAN 已被自訂。

注意：在 Intel(R) PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


啟用 IPSec

IP 安全性 (IPSec) 是一組由 �Internet 工程工作小組� (IETF) 研發出來的標準，可利用確認資料封包在傳輸期間沒有變更來保護 IP 通訊。若須有關 �IP 安全性� 的詳細資訊，請蒞臨 Intel 支援站台：http://support.intel.com 或者，如果您有 Intel(R) Packet Protect，請參閱您的《Packet Protect 使用者指南》。

需求

您可以在 Intel(R) PROSet II 中啟用或停用 �IP安全性�，如果：

•	您使用的是以下其中一種作業系統：

•	Windows* 98

•	Windows NT* 4.0、SP5 或更新的版本

•	Windows Me

•	您在使用 Intel(R) PRO/100 介面卡

如果您使用 Windows 2000 或 Windows XP，�IP 安全性� 就可在 Microsoft Management Console 中當成附加工具提供使用。.請參閱 Windows 2000 或 XP 中的作業系統文件以獲取更多有關 IPSec 執行的資訊。

要啟用 IPSec

1.	在網路元件目錄 中，用滑鼠右鍵按一下「群組清單」或「非成組的介面卡清單」，然後選取「啟用 IPSec」。

2.	重新啟動電腦。

3.	安裝 Intel(R) Packet Protect 軟體。
注意：為了要安裝 Packet Protect，安裝 Packet Protect 前，您至少一定要在一個介面卡或介面卡群組選取「啟用 IPSec」選項。

現在，IPSec 就會被啟用。

要停用 IPSec

在網路元件目錄 中，用滑鼠右鍵按一下「群組清單」或「非成組的介面卡清單」，然後清除「啟用 IPSec」。

在 Intel(R) PRO/100 S 介面卡卸載加密

Intel(R) PRO/100 S 系列介面卡可以卸載 �IP 安全性� 傳輸的加密程序。藉由處理加密程序，介面卡會減少 CUP 的使用量。要啟用這個卸載的功能性：

1.	如果電腦在執行 Windows 2000 或 XP，啟動 �IP 安全性� 使用 Intel Packet Protect 或使用 Microsoft Management Console。

2.	在 Intel PROSet II 中，於 �網路元件目錄� 中選取您要用來處理 �IP 安全性� 加密的 Intel PRO/100 S 介面卡。

3.	按一下「進階」標籤。

4.	在「設定」清單中，按一下「卸載」。

5.	在「值」方塊中，選取「IP 安全性」。

6.	按一下「確定」。

現在，介面卡便已被設定從 CPU 卸載加密程序。


GVRP 支援

工作站和切換器使用 GVRP（GARP VLAN 登錄通訊協定）來動態建立、變更和移除 VLAN。啟用 GVRP 的切換器可以識別 VLAN 成員的切換器連接埠和追蹤 VLAN 狀態。

需求

要讓 GVRP 能在整個網路都受到支援，介面卡和切換器都一定要啟用 GVRP。

要在介面卡上啟用 GVRP

1.	在網路元件目錄中，用滑鼠右鍵按一下至少有一個 VLAN 的「成組的介面卡清單」。

2.	按一下「GVRP 支援」。
「GVRP 支援」對話方塊會出現。

3.	按一下「啟用」。

4.	從「GVRP 加入時間」下拉方塊，在切換 GVRP LEAVE 指令和 PROSet GVRP II Join (加入) 指令之間鍵入毫秒的數目。依照預設，Intel(R) PROSet II 會在 Leave (離開) 指令後初始化一個 Join (加入) 指令 200 ms。

5.	按一下「確定」。

現在介面卡已啟用 GVRP。

疑難排解

因為 GVRP 的執行方式不同，在介面卡上啟用 GVRP 不保證網路裝置間的 GVRP 相容性。如果 GVRP 似乎不在作用，請在介面卡上停用 GVRP。

注意：在 Intel PROSet II 中，對群組或 VLAN 進行多項變更時，建議您在每次變更後關閉 Intel PROSet II 以便設定變更。然後，您可以重新開啟 Intel PROSet II 來進行下一個變更。


Windows NT 4.0 Service Packs
Windows NT* 4.0 Service Packs

要使用 Intel(R) PROSet II 和大部分的進階成組功能，您的 Windows NT 4.0 安裝需要更新成 service pack 6a 或較新的版本。

若需 Microsoft service pack 資訊，請蒞臨 http://www.microsoft.com/ntserver/ 來下載 service pack 和說明。


PRO/1000 桌上型介面卡的進階設定

注意：對這些設定進行任何變更之前，請先洽詢您的網路管理員。用與其它網路裝置不相容的方式設定進階設定可能會對介面卡或系統效能產生不良的影響。

介面式框架內間隔

補償您的網路上過量的 Ethernet 封包衝突。

支援的介面卡	全部
預設值	啟用

介面連結回應

纜線與介面卡斷開連接時，利用繞過啟動路徑加速系統啟動需要網路連線性。如此會大幅減少啟動電腦時所需的時間。

Intel Ethernet 控制器的 �介面式連結回應� 啟用，並且網路纜線沒有連接到 RJ-45 連接埠時，網路連線會停用。黃色的小心圖示會出現在「裝置管理員」中的網路連線旁邊。

要重新啟用網路連線，請將網路纜線連接到 RJ-45 連接埠，然後重新啟動電腦。

支援的介面卡	不可供每個介面卡型號使用。
預設值	關閉
建議	開啟
範圍	開啟，關閉
注意：系統中啟用無線介面卡時，�介面式連結回應� (ALR) 就不會作業。

結合緩衝區

自訂 "結合緩衝區" 的數目來最佳化傳輸效能，如此可讓介面卡在封包傳輸之前加入資料區段。

"結合緩衝區" 的設定一定要與 "傳輸描述器" 設定一起作業。"結合緩衝區" 設定應該是 "傳輸描述器" 的 30 - 50%。如果 "結合緩衝區" 設定經過修改以符合 "傳輸描述器" 設定，傳輸效能可能不會提升。

�結合緩衝區�設定會大幅會提升 Windows NT 4.0 電腦上的傳輸效能。它也會提升 Windows 98 和 Windows 2000 電腦上的傳輸效能。

支援的作業系統	Windows NT 4.0、98、2000、XP
支援的介面卡	全部
預設值	128
範圍	16-768
啟用 PME

在執行舊版 "進階電源管理" (APM) 的電腦上啟用或停用介面卡上的「喚醒」功能。喚醒功能可讓介面卡在接收到特定封包類型時，例如 ARP 封包，從待命或關閉狀態恢復作業。

•	停用這項功能會停用使用舊版電源管理電腦上的所有「喚醒」設定。

•	啟用這項功能可讓介面卡會「喚醒」訊號回應。要設定介面卡對特定的封包類型回應，請參閱本主題中稍後說明的「喚醒」設定資訊。

•	「硬體預設值」強迫介面卡根據系統硬體設定「喚醒」功能。

•	「無動作」值可讓介面卡使用作業系統的預設值。

如果您要停用所有的「喚醒」設定，請設定停用這項功能。否則，請將此功能設為「無動作」。

支援的介面卡	以 82559 為基礎的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	停用
範圍	啟用，停用
快速傳輸完成

封包傳送到網路上之前，利用騰出�傳輸描述器�來最佳化傳輸效能。

•	�快速傳輸完成�停用時，介面卡一定要等到封包傳送出去後才能重新使用�傳輸描述器�。

•	�快速傳輸完成�啟用時，介面卡會較快重新使用�傳輸描述器�，讓介面卡能提升傳輸效能。

支援的介面卡	以 82544 為基礎。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	開啟
範圍	開啟，關閉
流程控制

讓介面卡更有效地規律流量。

•	當它們的接收佇列達到預先定義的限制時，介面卡會產生流量控制框架。產生流程控制框架會提示傳輸器減慢傳輸。

•	介面卡會以流程控制框架中指定的時間暫停封包傳輸來回應流程控制框架。

讓介面卡調整封包傳輸，流程控制可協助預防封包丟失。

注意：要讓介面卡能夠利用這項功能，協力電腦一定要支援流程控制框架。

支援的介面卡	82540 和 82544 為基礎，傳輸和接收。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	產生和回應流程控制框架
範圍	�h 關閉、回應、產生、產生和回應、硬體預設值

超大型框架

注意：另外，"超大型框架" 僅在 1000 Mbps 才受到支援。以 10 或 100 Mbps 使用 "超大型框架" 可能會導致不良的效能或失去連線。

啟用或停用 "超大型框架" 功能。"超大型框架" 可利用在每個框架中放入更多資料來增加輸出量並降低 CPU 用量，因此傳送出較少的框架。標準 Ethernet 框架大小是 1514 位元組，而 "超大型框架" 可包含 4088、9014 或 16128 位元組。

如果網路上的所有的裝置都支援 "超大型框架" 並且設定使用相同的框架大小時才啟用 "超大型框架"。在其它網路裝置設定 "超大型框架" 時，請注意網路裝置會以不同方式計算 "超大型框架" 的大小。有些裝置在框架大小中包括標題資訊，其它則不包括。Intel 介面卡不在框架大小中包括標題資訊。

若須更多資訊，請參閱超大型框架 主題。

支援的介面卡	全部
預設值	停用
範圍	停用 (1514)、4088、9014 和 16128。(如果使用 VLAN 或 QoS 封包標籤，請將 CRC 的切換器設定多 4 個位元組，再加上 4 個位元組。)  注意：範圍 (1514-16128) 中的任何值都可在 Windows 登錄鍵 MaxFrameSize 中設定。
本機管理位址

覆寫介面卡的 MAC 位址。要輸入新的網路位址，請在這個�值�方塊中鍵入 12 位數的十六進位號碼。

支援的介面卡	全部
預設值	無
範圍	0000 0000 0001 - FFFF FFFF FFFD 例外： • 不要使用多點傳送位址 (高位元組最不醒目的位元 = 1)。  • 不要全部使用零或 F。 不是 "目前" 的設定：返回介面卡原來的網路位址。
Windows 98SE 使用者：

手動指派位址後，如果您要使用預設位址，請執行這些程序之一：

•	在「網路內容」對話方塊的「進階」標籤，選取「本機管理位址」，將其值變更為 0。按一下「確定」來套用該設定。

•	在 Intel PROSet II 中，按一下「進階」標籤，然後按一下「復原預設」或從「值」欄位清除所有的字元。按一下「確定」來套用該設定。

登錄連結狀態事件

這個設定是用來啟用/停用連結狀態變更的登入。如果設定在開啟狀態，連結變更事件或離線變更事件會產生顯示在系統事件登錄器中的訊息。管理員可從系統事件登錄器檢視事件訊息。

以下的事件會被登錄。

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

支援的介面卡	全部
預設值	Enable
範圍	啟用，停用
卸載接收 TCP 總值

啟用介面卡驗證傳入封包的 TCP 或 UDP 總值。

•	停用 "卸載" 時，作業系統會驗證 TCP 總值。

•	啟用 "卸載" 時，介面卡會完成作業系統的驗證。

這個功能會提升接收效能並降低 CPU 的用量。

支援的作業系統	• Windows XP* • Windows 2000 • Windows 98 不支援卸載。
支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	• Windows* XP：開啟 • Windows 2000：關閉
範圍	開啟，關閉
卸載傳輸 IP 總值

啟用介面卡以計算傳出封包的 IP 總值。

•	停用 "卸載" 時，作業系統會驗證 IP 總值。

•	啟用 "卸載" 時，介面卡會完成作業系統的驗證。

這個功能會提升傳輸效能並降低 CPU 的用量。

支援的作業系統	• Windows XP* • Windows 2000 • Windows 98 不支援卸載。
支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	開啟
範圍	開啟，關閉
卸載傳輸 TCP 總值

啟用介面卡以計算傳出封包的 TCP 或 UDP 總值。

•	停用 "卸載" 時，作業系統會驗證 TCP 總值。

•	啟用 "卸載" 時，介面卡會完成作業系統的驗證。

這個功能會提升 TCP 和 UDP 傳輸效能並降低 CPU 的用量。

支援的作業系統	• Windows XP* • Windows 2000 • Windows 98 不支援卸載。
支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	開啟
範圍	開啟，關閉 注意：當伺服器支援 DOS 為基礎的用戶端時，將這個功能設為 "關閉"。
QoS 封包標籤

啟用介面卡以傳送和接收 IEEE 802.3ac 標籤的框架，包括：

•	802.1p QoS (Quality of Service) 標籤需要優先順序標籤的封包，以及

•	802.1Q 標籤需要 VLAN

當您設定 VLAN 時，Intel PROSet II 會自動啟用 802.1p 標籤。

支援的介面卡	以 82559 為基礎或更新的介面卡。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	停用
範圍	啟用，停用
接收描述器

定義 "接收描述器" 數，這些是讓介面卡在系統記憶體中配置接收封包的資料區段。每個接收的封包都需要一個 "接收描述器"，並且每個描述器都使用 2kb 的記憶體。

如果您注意到接收流量效能大幅降低，可能會需要選擇增加 "接收描述器" 的數目。如果接收效能不是問題的話，請使用預設設定 256。

支援的介面卡	全部
預設值	160
範圍	80-2048
TCP 區段性卸載

讓介面卡硬體將資料區段到有效的 Ethernet 框架。

•	停用 "TCP 區段性" 時，作業系統軟體會先區段資料，再將資料送到介面卡進行傳輸。

•	啟用 "TCP 區段性" 時，介面卡會將資料區段到框架中。

因為介面卡硬體能夠比作業系統軟體更快完成資料區段性，所以這個功能可大幅提升傳輸效能。除此之外，介面卡消耗的 CPU 資源也比較少。

支援的作業系統	Windows XP
支援的介面卡	僅以 82544 和 82540 為基礎。請檢視介面卡規格 主題以獲取識別介面卡的協助。
預設值	1
範圍	0 = 不要廣告這項功能；1 = 廣告這項功能。

傳輸描述器

定義 "傳輸描述器" 數，這些是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸描述器"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸描述器" 的數目。雖然增加 "傳輸描述器" 的數目可提升傳輸效能，但是 "傳輸描述器" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用預設設定 256。

支援的介面卡	全部
預設值	256
範圍	80-2048
喚醒連結設定

如果網路連線在電腦處於待命模式時建立連結，喚醒電腦。您可以啟用此功能、停用此功能、或讓作業系統使用其預設設定。

支援的作業系統	Windows 9x、Windows 2000、Windows XP
範圍	停用、強迫、OS 控制
預設值	停用

喚醒設定

這些設定指的是作業系統或 Intel PROSet 啟動的功能。視您的 Windows 版本而定，此功能的作用會不一樣，或完全不受支援。

這些 Windows 版本支援 "喚醒設定"：Windows 2000、Windows XP 64 bit Edition、Windows XP Professional、和 Windows Server 2003。這項功能不受到 64 位元 Itanium(R) 為基礎系統的 Windows Server 2003 支援。

啟用喚醒設定

您可以使用 Intel PROSet 來設定介面卡使用的 Wake On (喚醒) 設定。選取「喚醒設定」前，一定要啟動系統使用「喚醒設定」。_要做到這點，請參閱 instructions。

要啟用「喚醒設定」

6.	在 Intel PROSet，按一下「進階」。

7.	在「設定」清單方塊中，選取「喚醒設定」。

8.	在「值」清單中，選取適當的「喚醒」設定。

9.	按一下「確定」或「套用」。

10.	對這些 "喚醒" 封包類型回應的介面卡，您一定也要啟動作業系統使用「喚醒設定」。要啟用「喚醒設定」，請瀏覽到「裝置管理員」，請用選項「允許此裝置將電腦從待命狀態喚醒」。

可用的設定

這些是 Intel PROSet 中提供的「喚醒」設定：

設定	描述
停用	介面卡不會使用「喚醒」設定。
喚醒神奇封包	讓介面卡在接收到 "神奇封包" 時回應醒來。"神奇封包" 是包含接收介面卡的 Ethernet 位址的 16 個連續副本的封包。設定這項功能時，Intel PROSet 會用這項功能置換作業系統值。
喚醒直接封包	讓介面卡在接收到 "直接封包" 時醒過來，此封包是傳送到介面卡的 MAC 位址的單一傳播封包。  通訊協定一定要在驅動程式中啟用這項喚醒方法。取消選取這項功能等於是告訴驅動程式忽略任何啟用這項喚醒方法的通訊協定要求。
喚醒神奇封包和直接封包	讓介面卡在接收 "神奇封包" 或 "直接封包" 時回應醒來。
受控的作業系統	讓作業系統能夠完全控制「喚醒設定」。

注意：如果一個介面卡有數個設定的 IP 位址，作業系統可能會要求喚醒所有設定位址的 ARP 配置。介面卡僅會在 ARP 封包查詢清單中的第一個 IP 位址時回應喚醒。

注意：「喚醒」設定不包括從關機 (S5) 狀態喚醒電腦的能力。這個狀態由「啟用 PME」設定控制，「進階」標籤有提供此功能。即使「喚醒」設定停用，從 S5 喚醒的能力還是由「啟用 PME」設定決定。

只要介面卡驅動程式有啟用，PME 設定就可以作業。但是，驅動程式一旦停用，裝置就會返回其硬體預設設定，此設定可能允許，也可能不允許電腦從關機狀態喚醒。

還原「預設值」按鈕

這個按鈕會以該設定的預設值重設目前選取的「進階設定」。請參考以上所列的設定值以獲取預設值的資訊。(這個選項不提供每個設定使用。)


儲存或還原組態
從儲存的檔案還原 Intel(R) PROSet II 組態

如果您有將介面卡的進階設定儲存到檔案中，您就可以使用該檔案來還原自訂 VLAN 和成組設定。請注意，還原 Intel PROSet II 組態不會還原特定作業系統的網路設定，例如 IP 位址或通訊協定連結。

開始進行之前

還原設定時，一定要在您建立設定的同一部電腦上還原設定。除此之外，電腦一定安裝儲存原始組態時的相同網路和硬體。例如，如果在儲存組態檔案時電腦是連接到 Intel gigabit 切換器，還原組態時，電腦也一定要連接到相同的切換器。

「儲存/還原」功能與 Windows NT*4.0、2000、98SE、Me、和 XP 相容。

注意：不要編輯該組態檔案。修改該組態檔案會使它變成無法使用。

要從儲存的檔案還原介面卡設定

1.	從「工具」功能表，按一下「儲存/還原有線設定」。
「儲存/還原」對話方塊會出現。

2.	按一下「還原」。
「開啟」對話方塊會出現。

3.	瀏覽到您儲存組態檔的資料夾，並選取該檔案。

4.	按一下「開啟」。
Intel PROSet II 會顯示還原的設定。您必須按一下「確定」才可套用這些設定。

5.	必要的話，請對介面卡組態進行變更。

6.	按一下「確定」來關閉 Intel(R) PROSet II 並套用還原的組態。

亦請參閱：

儲存組態


在群組警告新增介面卡
在群組新增介面卡

建立群組時，請確定每個介面卡都僅是一個群組的成員。這個包括在 Intel(R) PROSet 中建立的群組以及使用另外一個組態工具建立的群組。在多重群組新增相同的介面卡可能會對群組功能性和效能造成負面的影響。

•	如果您使用 Intel PROSet 來建立群組，請查看目錄檢視以識別現有的群組成員。

•	如果您使用其它組態工具來建立群組，請檢視那些工具中的群組和群組成員以確定該介面卡尚未被納入群組中。

亦請參閱

從群組移除介面卡

建立新群組


瀏覽 PROSet II
瀏覽 Intel(R) PROSet II

Intel(R) PROSet II 有三個瀏覽區域：

•	功能表

•	網路元件目錄

•	標籤

從「功能表」，您可以：

•	設定群組或從「動作」啟用「IP 保全性」。

•	從「工具」儲存或還原介面卡 VLAN 和成組組態。

•	使用線上說明系統或存取 Intel 網站以獲取支援。

從�網路元件目錄�，您可以：

•	在介面卡上按一下來檢視介面卡的詳細資料和組態設定。

•	在介面卡上按一下滑鼠右鍵來設定群組和啟用 IPSec。

•	在群組上按一下滑鼠右鍵來變更群組設定或設定 VLANs。

•	在群組成員上按一下滑鼠右鍵來變更群組介面卡設定。

從該「標籤」，您可以執行介面卡監控和組態作業。

匣式圖示

「顯示匣式圖示」核取方塊可讓您在工作列 (靠近時鐘處) 上顯示或隱藏 Intel PROSet II 匣式圖示。要隱藏匣式圖示，請清除核取方塊。

更多有關 Intel(R) PROSet II 匣式圖示的資訊


一般資訊

要檢視有關介面卡的一般資訊，請按一下網路元件目錄 中的介面卡。

「一般」標籤可以讓您：

•	檢視基本介面卡資訊

•	測試纜線功能性
注意：纜線測試僅供選擇的介面卡使用。

•	辨識介面卡插槽的位置

•	檢視其它詳細資料


檢視基本介面卡資訊

「一般」標籤包含以下有關在網路元件目錄選取之介面卡的資訊。

Ethernet 位址	這個介面卡的 12 數字十六進位節點位址，亦稱為 MAC 位址。
零件號碼	這個介面卡的 Intel 零件號碼。
IP 位址	如果使用 IPv4 通訊協定，就是這個介面卡的 TCP/IP 位址。 Intel PROSet II 目前不會顯示 IPv6 位址。
網路驅動程式狀態	顯示 Intel 網路驅動程式是否載入目前選取的介面卡。
網路狀態	顯示選取介面卡的連結、速度、和雙工狀態。「網路狀態」群組方塊中的欄位會隨介面卡而異。  • 連結 LED：On（開啟）表示介面卡纜線連接到有效的集線器或切換器連接埠；Off（關閉）表示沒有連結。 • 速度：此處列出的速度（1000、100、或 10）顯示介面卡的連結速度。 • 活動 LED：閃爍表示介面卡連接到有活動的網路；Off（關閉）表示沒有活動或沒有連接纜線。 • 雙工：�全雙工�表示介面卡自動傳送和接收流量；�半雙工�表示介面卡隨時都在傳送或接收 (不是同時傳送和接收流量)。


設定速度與雙工

依照預設，Intel 介面卡會自動交涉速度和雙工設定。如果介面卡無法使用自動交涉來建立連線，您可能需要在介面卡和連結協力電腦上手動設定速度和雙工設定。例如，如果切換器不支援自動交涉或者是用特定速度和雙工設定的，您一定要手動設定介面卡速度和雙工以符合切換器設定。

注意：如果介面卡速度和雙工組態沒有和連結協力電腦上的設定完全相符的話，網路連線性可能會失去。

停用自動交涉時，�連結速度�和�雙工�的可能設定是：

•	10 Mbps 或 100 Mbps 全雙工（需要將全雙工連結協力電腦設為全雙工）。介面卡可以同時傳送和接收封包。

•	10 Mbps 或 100 Mbps 半雙工（需要將連結協力電腦設為半雙工）。介面卡一次執行一項操作；不是傳送就是接收。

若須設定速度和雙工的資訊，請按一下適當的介面卡系列；

•	Intel(R) PRO/1000 (銅線)
注意：纖維式的 Intel(R) PRO/1000 介面卡以 1000 Mbps，全雙工操作。

•	Intel(R) PRO/10 或 PRO/100


PRO 10/100 連結組態
設定速度與雙工：Intel(R) PRO/10 和 PRO/100 介面卡

在網路元件目錄中，按一下您要設定的 Intel(R) PRO/10 或 PRO/100 介面卡。

1.	按一下「進階」標籤。

2.	在「設定」清單中，按一下「連結速度和雙工」。

3.	在「連結速度和雙工」方塊中，按一下適用於您的介面卡及其連結協力電腦的速度和雙工模式。如需識別連結協力電腦的速度和雙工模式的資訊，請參閱連結協力電腦說明文件。

4.	按一下「確定」。

5.	得到提示時，重新啟動電腦。

現在介面卡便是以指定的速度和雙工設定設定的。

注意：如果介面卡速度和雙工組態沒有與連接裝置上的設定完全相符的話，可能會失去網路連線性或者介面卡效能會受損。


設定介面卡進階功能

要檢視介面卡的進階功能，請選擇一個介面卡類型：

•	Intel(R) PRO/1000 Desktop

•	Intel(R) PRO/1000 Server

•	Intel(R) PRO/100

•	Intel(R) PRO/100 VE 和 VM

•	Intel(R)PRO/10


切換容錯

�切換容錯�（SFT）可讓您連接兩個成組的介面卡到兩個切換器。每個介面卡都連接到個別同的切換器：

�切換容錯�可在失敗發生於以下項目時偵測到：

•	在其中一個成組的介面卡

•	在其中一個連接成組的介面卡到切換器的纜線

•	在連接到介面卡的切換器連接埠

•	在其中一個連接到介面卡的切換器

在 SFT 群組中，一個介面卡是主要介面卡，另外一個是次要介面卡。在一般作業期間，次要介面卡會處在待命狀態。它不會傳輸或接收流量。如果主要介面卡失去連線，次要介面卡會自動接替。

介面卡速度	可以混合，例如一個介面卡以 100 Mbps 連結，另外一個以 1000 Mbps 執行
通訊協定	全部
網路組態	• 每個介面卡都連接到不同的切換器 • 一定要啟用 "生成樹"
亦請參閱：

關於成組

群組類型


將組態儲存到外部檔案
將組態儲存到檔案

您可以將 Intel(R) PROSet II 成組和 VLAN 組態儲存到檔案，以後再還原到 Intel PROSet。請注意，儲存 Intel PROSet II 組態不會儲存特定作業系統的網路設定，例如 IP 位址或連結通訊協定。

「儲存/還原」功能與 Windows NT* 4.0、2000、98SE、Me、和 XP 相容。

注意：一旦用特定的檔名儲存組態後，就不可以再用那個檔名。每次儲存 Intel PROSet II 組態時都一定要使用不同的名稱。

要儲存 Intel(R) PROSet II 組態

1.	從「工具」功能表，按一下「儲存/還原有線設定」。
「儲存/還原」對話方塊會出現。

2.	按一下「儲存」。
「另存新檔」對話方塊會出現。

3.	瀏覽到您想要儲存組態檔的資料夾，然後鍵入檔名。

4.	按一下「儲存」。

5.	按一下「確定」。

Intel PROSet II 組態會被儲存。

儲存組態後，請不要編輯或修改該檔案。修改該組態檔案會使它變成無法使用。

亦請參閱

還原組態


測試切換器組態

執行 �切換器組態測試� 就可以確定連結協力電腦是否支援設定的成組模式。例如，如果介面卡是 Fast EtherChannel*群組的成員，Intel (R) PROSet II 就可以驗證連接到介面卡的連結協力電腦支援�連結集合�。

若須有關每個群組模式的需求特定資訊，請參閱有關成組。

小心：執行這項測試時，群組會暫時失去網路連線性。

注意： 以下其中一種假設情況存在時，這項測試就不會測試錯誤。

介面卡組態	切換器組態
動態 802.3ad	任一
沒有 VLANs 而在�連結集合�模式中成組	切換器處在以下其中一種情況： • 不屬於任何 VLAN • 用標籤的 VLAN 設定的
有 VLAN 並在�連結集合�模式中成組	切換器處在以下其中一種情況： • 不屬於在介面卡中設定的 VLAN，並且 • 沒有定義的�連結集合�
要執行�切換器組態測試�

1.	在網路元件目錄中，按一下您要測試的群組。
要執行測試，群組中至少一定要有兩個介面卡。

2.	在「群組組態」標籤中，按一下「測試切換組態」。
「測試切換組態」對話方塊會出現。

3.	要繼續進行測試，請按一下「是」。
如果偵測到任何群組或連結協力電腦組態錯誤，「疑難排解」標籤就會出現。

注意：因為測試 �生成樹通訊協定� (STP) 所需的時間量，所以 Intel(R) PROSet II 可能會無法準確地指示網路上是否有啟用�生成樹通訊協定� (STP)。確定切換器是用 STP 設定的：

•	啟用於  SFT 群組

•	停用於 (portfast) 其它所有的群組模式


協力廠商免責聲明
* 其它產品和企業名稱可能是其它公司的商標，並僅為了說明目的和所有人 的利用使用，不可意圖加以侵犯。


設定電源管理
設定電源使用

使用「省電」標籤，您可以設定介面卡的電源使用。介面卡在節省電源時，會以 10Mbps 操作。

要支援這項功能，介面卡一定要：

•	設定成自動交涉速度，和

•	連接到可以自動交涉速度的協力電腦

如果介面卡速度強迫以 100Mbps 操作，或者，如果協力電腦無法以 10Mbps 操作，就無法在此介面卡上啟用「省電」。

在某些電腦上，電腦重新啟動後，省電選項不會被儲存起來。如果那些選項沒有儲存下來的話，「省電」標籤上方的選項會顯示文字 Temporary Power Saver (暫時省電)。所有執行 Windows XP 或 Windows Server 2003 的系統，那些設定都不會被儲存。

重新啟動電腦後，如果設定沒有變更的話，上方會顯示文字 Power Saver Settings (省電設定)。

注意：啟用「省電」時，Intel(R) PRO/100 M 介面卡會減慢介面卡處理週期。這個功能可讓 Intel PRO/100 M 介面卡進一步降低電源消耗量。其它 Intel PRO/100 介面卡不會減少處理週期來節省電源。

在「省電」標籤中，您可以自訂：

•	整體的介面卡電源使用。設定整體電源使用時，只要介面卡維持在啟用狀態，就會保留這項設定。如果介面卡停用，這項電源設定不會被儲存。

•	待命模式的電源使用。電腦進入待命狀態時，介面卡會自動節省電源，並交涉成 10 Mbps。Intel PROSet II 會在電腦開機期間保留這項設定。

•	Windows* XP 在電池操作期間的電源使用。電腦使用電池時，介面卡會自動節省電源，並交涉成 10 Mbps。Intel PROSet II 會在電腦開機期間保留這項設定。

支援的介面卡	Intel(R) PRO/100 介面卡
支援的作業系統	• 定義整體電源使用或待命期間電源使用的 Windows* 98、2000、XP、Me、和 NT* • 定義電源使用和電腦何時電池操作時，使用 Windows XP
預設值	依照預設，介面卡會消耗維持速度和雙工設定所需的一般電源量。介面卡節省電源時，介面卡會交涉成 10Mbps，減少介面卡處理的整體流量。
要設定介面卡的電源使用

1.	在網路元件目錄，按一下您要為電源使用設定的介面卡。
如果介面卡支援「電源管理」，「省電」標籤會出現。

2.	要減少整體電源使用，請按一下「使用低電源並交涉成 10Mbps」，然後按一下「套用」。只要介面卡維持在啟用狀態，就會保留這項設定。
要設定介面卡使用其正常的電源量並以預設速度設定操作，請按一下「使用正常電源模式」，然後按一下「套用」。

3.	要在電腦處於待命模式時減少介面卡消耗的電源量，請按一下「待命期間使用低電源」。

4.	如果介面卡在 Windows XP 電腦上執行，您也可定義電腦使用電池時的「省電」設定。要在電腦使用電池時減少介面卡消耗的電源量，請按一下「電池操作期間使用低電源」。

5.	按一下「確定」來套用電源組態。


接收載入平衡

使用�介面卡載入平衡�（ALB）群組時，您可以選擇啟用或停用�接收載入平衡� (RLB)。RLB 選項永遠都可供使用：

•	在�介面式載入平衡�（ALB）群組的「進階設定」標籤中

•	使用「成組精靈」建立 ALB 群組時

如果您停用 RLB，僅主要介面卡會接收流量。所有的介面卡載入平衡送出（Tx）流量。

如果您啟用 RLB，流量配置會依靠群組成員間的速度差異而定。

•	在相同的速度群組中，所有的介面卡都會傳輸和接收 IP 流量。主要介面卡傳出非路由的（階層 2）流量。

•	在混合速度群組中，連線速度最快的群組成員會載入平衡傳入的（Rx）IP 流量。所有的介面卡都會載入平衡送出的（Tx）IP 流量。主要介面卡傳出非路由的（階層 2）流量。
注意：RLB 啟用時，Intel(R) PROSet II 會自動選取「屬意的主要介面卡」. 您可以利用指定某個介面卡為主要或次要 介面卡來置換預設的選擇。

亦請參閱：

關於成組

建立新群組


PRO/100 VE 和 VM 介面卡的進階設定
Intel(R) PRO/100 VE 和 VM 介面卡的進階設定

列在「進階」標籤中的設定可讓您自訂介面卡處理緩衝區、電源管理、和其它功能的方法。視您在執行的作業系統和安裝的特定介面卡而定，以下有些功能可能無法使用。

進階設定

介面式框架內間隔

補償您的網路上過量的 Ethernet 封包衝突。依照預設，這個設定是 0，如此可停用此功能。

建議設定 (1) 最適用於大部分的電腦和網路，其是利用動態調整網路流量情況來進行網路連結。當值設為 1 時，動態模式才會作用。但是，在某些情況中，手動設定間隔值獲取的效能可能會比較好。設定值會強迫封包間的靜態間隔。

增加值會增加傳輸框架間的延遲。

支援的介面卡	全部
預設值	0: 停用
範圍	0-255

介面連結回應

纜線與介面卡斷開連接時，利用繞過啟動路徑加速系統啟動需要網路連線性。如此會大幅減少啟動電腦時所需的時間。

Intel Ethernet 控制器的 �介面式連結回應� 啟用，並且網路纜線沒有連接到 RJ-45 連接埠時，網路連線會停用。黃色的小心圖示會出現在「裝置管理員」中的網路連線旁邊。

要重新啟用網路連線，請將網路纜線連接到 RJ-45 連接埠，然後重新啟動電腦。

支援的介面卡	僅限行動式產品。不可供每個介面卡型號使用。
預設值	關閉
建議	開啟
範圍	開啟，關閉
注意：系統中啟用無線介面卡時，�介面式連結回應� (ALR) 就不會作業。

結合緩衝區

自訂 "結合緩衝區" 的數目來最佳化傳輸效能，如此可讓介面卡在封包傳輸之前加入資料區段。

"結合緩衝區" 的設定一定要與 "傳輸描述器" 設定一起作業。"結合緩衝區" 設定應該是 "傳輸描述器" 的 30 - 50%。如果 "結合緩衝區" 設定經過修改以符合 "傳輸描述器" 設定，傳輸效能可能不會提升。

�結合緩衝區�設定會大幅會提升 Windows NT 4.0 電腦上的傳輸效能。它也會提升 Windows 98 和 Windows 2000 電腦上的傳輸效能。

預設值	8
建議值	8
範圍	1-32
本機管理位址

覆寫介面卡的 MAC 位址。要輸入新的網路位址，請在這個�值�方塊中鍵入 12 位數的十六進位號碼。

預設值	無
範圍	0000 0000 0001 - FFFF FFFF FFFD 例外： • 不要使用多點傳送位址 (高位元組最不醒目的位元 = 1)。  • 不要全部使用零或 F。
Windows 98SE 使用者：

手動指派位址後，如果您要使用預設位址，請執行這些程序之一：

•	在「網路內容」對話方塊的「進階」標籤，選取「本機管理位址」，將其值變更為 0。按一下「確定」來套用該設定。

•	在 Intel PROSet II 中，按一下「進階」標籤，然後按一下「復原預設」或從「值」欄位清除所有的字元。按一下「確定」來套用該設定。

PCI 匯流排效率

讓介面卡使用封包傳輸的最佳方法或全程強迫封包結合。

•	停用 "PCI 匯流排效率" 時，介面卡會使用提供最佳效能的傳輸方法。如果集合封包提供最佳的傳輸效能，介面卡會自動集合封包。

•	啟用 "PCI 匯流排效率" 時，介面卡會強迫封包集合。

如果封包傳輸效能沒有問題的話，將 "PCI 匯流排效率" 設為停用。如果不足的情況很多，或者是 "PCI 匯流排" 出現效能問題，請將此值設為啟用。

預設值	停用
範圍	啟用，停用

接收緩衝區

指定複製資料到通訊協定記憶體時，驅動程式使用的緩衝區數目。

在高網路載量情況下，增加接收緩衝區可提高效能。缺點是，這樣會增加驅動程式使用的系統記憶體量。在其它情況下，藉由修改此值，您可能會降低系統的效能。請自行決定使用方法。

預設值	48
建議值	• Windows 98、Windows Me、Windows2000 和 Windows XP 的單一介面卡： 48 • Windows NT 4.0 中的單一介面卡： 32 • 成組的介面卡： 250
範圍	8-1024
重新傳輸框架內間隔

增加框架重新傳輸之間的延遲。雖然介面卡有一個在衝突後用來重新傳輸框架的內建 Ethernet 運算式，如果網路上有異常大量的衝突，增加延遲可以改善網路效能。

支援的介面卡	全部
預設值	6
範圍	6-15

傳輸控制區塊

定義 "傳輸控制區塊" 數，這些區塊是讓介面卡在系統記憶體中追蹤傳輸封包的資料區段。視封包的大小而定，每個傳輸封包都需要一個或數個 "傳輸控制區塊"。

如果您注意到可能有傳輸效能的問題，可能會需要選擇增加 "傳輸控制區塊" 的數目。雖然增加 "傳輸控制區塊" 的數目可提升傳輸效能，但是 "控制區塊" 會消耗系統記憶體。如果傳輸效能不是問題的話，請使用建議值 32。

預設值	16
建議值	32
範圍	8-64
喚醒連結變更

如果網路連線在電腦處於待命模式時建立連結，喚醒電腦。您可以啟用此功能、停用此功能、或讓作業系統使用其預設設定。

支援的作業系統	Windows 9x、Windows 2000、Windows XP
範圍	停用、強迫、依附 OS
預設值	停用
喚醒設定

這些設定指的是作業系統或 Intel(R) PROSet II 啟動的功能。視您的 Windows 版本而定，此功能的作用會不一樣，或完全不受支援。

•	這些 Windows 版本支援 "喚醒設定"：Windows 98SE'、Windows Me、Windows 2000、Windows XP.

•	這些 Windows 版本不支援 "喚醒設定"： Windows 98 retail、和 Windows NT 4.0.

注意：僅 Intel(R) PRO/100+ Management and Server 介面卡和 Intel(R) PRO/100 S 介面卡才支援 "喚醒設定"。

在作業系統中啟用喚醒設定

以下的 "喚醒設定" 類型需要作業系統啟用 "喚醒設定"：

•	喚醒 ARP

•	喚醒直接封包

•	喚醒 NBT

對這些 "喚醒" 封包類型回應的介面卡，作業系統一定要能夠使用 "喚醒設定"。要啟用「喚醒設定」，請瀏覽到「裝置管理員」，請用選項「允許此裝置將電腦從待命狀態喚醒」。要尋找這個選項：

1.	按一下「開始」 > 「控制台」。
「控制台」視窗會開啟。

2.	連續按兩下「系統」。
「系統」對話方塊會出現。

3.	按一下「硬體」標籤，然後按一下「裝置管理員」按鈕。
「裝置管理員」視窗會開啟。

4.	連續按兩下您要為�喚醒設定�啟用的介面卡。
「內容」對話方塊會出現。

5.	按一下「電源管理」標籤。

6.	按一下「允許此裝置將電腦從待命狀態喚醒」來啟用介面卡的 "喚醒設定"。

可用的設定

這些是 Intel PROSet II 中提供的「喚醒」設定：

設定	描述
停用	介面卡不會使用「喚醒」設定。
喚醒神奇封包	讓介面卡在接收到 "神奇封包" 時回應醒來。"神奇封包" 是包含接收介面卡的 Ethernet 位址的 16 個連續副本的封包。設定這項功能時，Intel PROSet II 會用這項功能置換作業系統值。
喚醒直接封包	讓介面卡在接收到 "直接封包" 時醒過來，此封包是傳送到介面卡的 MAC 位址的單一傳播封包。  通訊協定一定要在驅動程式中啟用這個喚醒方法。取消選取這項功能會通知驅動程式忽略任何啟用這個喚醒方法的通訊協定要求。
喚醒神奇封包和直接封包	讓介面卡在接收 "神奇封包" 或 "直接封包" 時回應醒來。
受控的作業系統	讓作業系統能夠完全控制「喚醒設定」。

注意：如果一個介面卡有數個設定的 IP 位址，作業系統可能會要求喚醒所有設定位址的 ARP 配置。介面卡僅會在 ARP 封包查詢清單中的第一個 IP 位址時回應喚醒。

注意：「喚醒」設定不包括從關機 (S5) 狀態喚醒電腦的能力。這個狀態由「啟用 PME」設定控制，「進階」標籤有提供此功能。即使「喚醒」設定停用，從 S5 喚醒的能力還是由「啟用 PME」設定決定。

只要介面卡驅動程式有啟用，PME 設定就可以作業。但是，驅動程式一旦停用，裝置就會返回其硬體預設設定，此設定可能允許，也可能不允許電腦從關機狀態喚醒。


群組類型

Intel(R) PROSet II 可讓您設定以下的群組；

�h	介面卡容錯性 (AFT)

�h	切換容錯 (SFT)

�h	介面式載入平衡 (ALB)。包括接收載入平衡 (RLB)。

�h	FEC * / LA / 802.3ad：靜態

�h	GEC* / LA / 802.3ad：靜態

�h	IEEE 802.3ad：Dynamic

介面卡容錯性

功能	• 錯誤移轉 為您的介面卡提供自動重複性。如果主要介面卡失敗，次要介面卡會接替。
網路組態	• 所有的介面卡都必須連接到同一個切換器 • 一定要停用 "生成樹" • 所有的切換器類型都受到支援

切換容錯

功能	• 錯誤移轉 當每個介面卡都連接到個別的切換器時，在兩個介面卡之間建立錯誤移轉關係。
網路組態	• 每個介面卡都連接到不同的切換器 • 一定要啟用 "生成樹"

介面式載入平衡  (ALB)

功能	• 錯誤移轉 • 傳輸載入平衡 • IP 流量的接收載入平衡 (RLB) (選擇性)
網路組態	• 所有的介面卡都必須連接到同一個切換器 • 所有的切換器類型都受到支援

FEC/ LA/ 802.3ad：靜態

功能	• 錯誤移轉 • 傳輸載入平衡 • 接收載入平衡
網路組態	• 所有的介面卡都必須以 100MBs 執行。 • 所有的介面卡都必須連接到同一個切換器 • 一定要使用於能夠處理 "連結集合" 的切換器： • 使用 PAgP 通訊協定的 Cisco FEC 功能切換器 • 可 "連結集合" 的 Intel Express(R) 切換器 • 有靜態 802.3ad 功能的其它切換器

GEC/ LA/ 802.3ad：靜態

功能	• 錯誤移轉 • 傳輸載入平衡 • 接收載入平衡
網路組態	• 所有的介面卡都必須以 1000 MBs 執行。 • 所有的介面卡都必須連接到同一個切換器 • 一定要使用於能夠處理 "連結集合" 的切換器： • 使用 PAgP 通訊協定的 Cisco GEC 功能切換器 • 可 "連結集合" 的 Intel Express 切換器 • 有靜態 802.3ad 功能的其它切換器

IEEE 802.3ad：動態

功能	• 錯誤移轉 • 傳輸載入平衡 • 接收載入平衡
網路組態	• 群組成員可以不同速度操作 • 所有的介面卡都必須連接到同一個切換器 • 連接到介面卡的切換器一定要完全支援 IEEE 802.3ad 標準
亦請參閱：

關於成組


診斷記錄
設定診斷記錄

Intel PROSet II 從診斷記錄中的診斷測試 和傳送程式/回應程式測試儲存資訊。

要設定記錄

1	開啟「登錄編輯器」。按一下「開始」>「執行」。在「開啟」方塊中，鍵入 regedit。
「登錄編輯器」會開啟。

2	瀏覽到 HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation登錄鍵。

3	修改登錄參數。

作業	名稱	預設值	可能的值
啟用或停用診斷記錄	Enable	1: Enable	1: Enable 0: 停用
記錄檔位置	FilePath	System32	系統上任何有效的路徑
定義 Intel PROSet II 保留或刪除記錄中現有的資訊	FileAppend	1: Enable	1: 在現有記錄中新增資訊 0: 每次使用者執行診斷程式或 "傳送程式/回應程式" 測試時刪除現有的資訊
以位元組設定記錄的最大檔案大小	MaxFileSize	36 kb	記錄可以包含的資訊位元組數
4	完成對記錄組態進行變更後，關閉「登錄編輯器」。


診斷：概述
診斷概述

Intel(R) PROSet II 提供您三種診斷測試的類型。

•	診斷測試 提供介面卡路徑的基本分析。執行基本診斷測試時，Intel PROSet II 會檢查 I/O 衝突、記憶體錯誤、EEPROM 可操作性、傳輸和接收功能性、以及連結。

•	纜線測試 提供有關纜線長度、極性、和其它纜線內容的資訊。

•	傳送程式回應程式測試 可讓您在整個網路上分析介面卡的功能性。這是比較進階的測試，需要有兩部電腦來執行。

測試結果匯出現在 Intel PROSet II。除此之外，Intel PROSet II 會將�診斷�測試和�傳送程式回應程式�測試的結果儲存到診斷記錄檔。請參閱設定診斷記錄以獲取更多資訊。


介面卡規格

控制器	主機板 ID 號碼	產品名稱 (接頭)	Intel 零件號碼
82545EM	A92165-xxx	PRO/1000 MT Server Adapter	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT Dual Port Server Adapter	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MF Server Adapter	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF Server Adapter (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF Dual Port Server Adapter	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Desktop Adapter	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF Server Adapter	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI Server Adapter	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT Server Adapter	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T Server Adapter	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit Server Adapter	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 Gigabit Server Adapter	PWLA8490
82562	A19716-xxx	PRO/100 VE Desktop Adapter	CNLA6000
82550	A78921-xxx	PRO/100 M Desktop Adapter	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S Server (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port Server 介面卡	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness(TM) 10/100 介面卡	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress(TM) PRO/100B PCI 介面卡(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC Card (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC Card (TP)	MBLA1656
82559	748568-xxx	PRO/100 S Server (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S Server (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management Adapter	PILA8900
82558	701738-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port Server 介面卡	PILA8472
82559	729757-xxx	PRO/100+ Server Adapter (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI Server Adapter (TP)	PILA8470


FEC
FEC* /LA/802.3ad：靜態

Fast EthernetChannel/連結集合群組利用以下方式增加輸出量：

•	介面卡組態。在群組新增成員，您可以增加輸出量。群組最多可由八個介面卡組成。每個伺服器最多可操作四個群組。

•	流量分析。軟體在每個群組成員持續分析傳輸載入，然後在必要的時候，於介面卡間平衡載入。切換載入平衡接收流量。

除此之外，FEC 群組還提供容錯性。群組中某個介面卡失敗時，次要介面卡會接替。

"連結集合" 群組與以下項目相容：

介面卡速度	所有的介面卡都必須以相同速度操作
網路組態	• 所有的介面卡都必須以 100MBs 執行。 • 所有的介面卡都必須連接到同一個切換器 • 一定要使用於能夠處理 "連結集合" 的切換器： • 使用 PAgP 通訊協定的 Cisco FEC 功能切換器 • 可 "連結集合" 的 Intel Express(R) 切換器 • 有靜態 802.3ad 功能的其它切換器
通訊協定	全部

亦請參閱：

關於成組

群組類型


GEC
GEC* /LA/802.3ad：靜態

千兆位元 EthernetChannel/連結集合群組利用以下方式增加輸出量：

•	介面卡組態。在群組新增成員，您可以增加輸出量。群組最多可由八個介面卡組成。每個伺服器最多可操作四個群組。

•	流量分析。軟體在每個群組成員持續分析傳輸載入，然後在必要的時候，於介面卡間平衡載入。切換載入平衡接收流量。

除此之外，GEC 群組還提供容錯性。群組中某個介面卡失敗時，次要介面卡會接替。

"連結集合" 群組與以下項目相容：

介面卡速度	所有的介面卡都必須以相同速度操作
網路組態	• 所有的介面卡都必須以 100MBs 執行。 • 所有的介面卡都必須連接到同一個切換器 • 一定要使用於能夠處理 "連結集合" 的切換器： • 使用 PAgP 通訊協定的 Cisco GEC 功能切換器 • 可 "連結集合" 的 Intel Express(R) 切換器 • 有靜態 802.3ad 功能的其它切換器
通訊協定	全部

亦請參閱：

關於成組

群組類型


Disable Network Adapter Power Management
停用網路介面卡電源管理

1. 在 Windows 桌面上，用滑鼠右鍵按一下「我的電腦」。

2. 按一下「內容」。

3. 按一下「裝置管理員」標籤。

4. 連續按兩下「網路介面卡」圖示。

5. 連續按兩下 Intel 網路介面卡。

6. 如果可以看見「電源管理」標籤的話，請將其按一下，並確定「允許電腦關閉這個裝置以節省電源」核取方塊被取消選取。

7. 按一下「確定」。現在，您就可以執行診斷程式。

執行診斷程式後，您可能需要選取上面步驟 6 中的核取方塊來還原「電源管理」功能。