Copyright: Intel® PROSet Help Version 6.2.0.3
Citation: Copyright © Intel Corporation 2001. All rights reserved.


Teste kablet

Fanen Test kabel vises p fanen Generelt, når den adapter, der er valgt i netværkskomponenttræet er enten:

•	82550-baseret Intel(R) PRO/100 S Server- eller Desktop-adapter uden et link til netværket

•	Intel(R) PRO/1000-adapter

Sådan kører du kabeltesten for Intel PRO/100-adaptere

Klik på Test kabel under fanen Generelt. Testen kan vare flere minutter at udføre.

Resultaterne af testen vises under fanen Fejlfinding.

Sådan kører du kabeltesten for Intel PRO/1000-adaptere

Inden du bruger kabeltestfunktionen, skal du kontrollere, at adapteren kører ved 1000Mbps. Selv om du kan bruge Kabeltesten, når adapteren kører ved 100Mbps, er visse oplysninger muligvis ikke præcise eller tilgængelige.

Klik på Test kabel under fanen Generelt. Testen kan vare flere minutter at udføre.

Resultaterne af testen vises i dialogboksen Kabeltestresultater. Der vises følgende oplysninger:

Kabellængde: Viser kablets omtrentlige længde mellem adapteren og dens linkpartner. Hvis den rapporterede kabellængde er forskellig fra den aktuelle kabellængde, kan dette angive et brud p kablet. Nøjagtigheden kan variere med op til 10 m.

Polaritet: Identificerer +/- egenskaberne for de parsnoede send- og modtagetråde i et Ethernet-kabel. Hvis disse egenskaber ikke er opsat korrekt, vil adapteren automatisk korrigere og rapportere fejlen.

Lokal modtager-status: Identificerer, hvorvidt kabelkonnektoren, der er forbundet til kablet, er i sttand til at håndtere trafikken. Hvis den lokale statustest mislykkes, skal du kontrollere konnektoren for brud eller forkerte forbindelser.

Fjernmodtager-status: Den kabelkonnektor, der er forbundet til linkpartneren kan passere eller fejle i sættet af funktionstest. Hvis fjernstatustesten mislykkes, skal du kontrollere konnektoren for brud eller forkerte forbindelser.

Modtagelsesfejltæller: Modtagelsesfejl opstår, når adapteren registrerer en uigenkendelig transmission p ledningen.
Modtagelsesfejltælleren tælles op, når adapteren opretter forbindelse til netværket, (når kablet forbindes til adapteren eller computeren genstartes), eller når adapteren genstarter efter autoforhandling. Hvis Tomgangsfejltælleren når ca. 65.000 inden for fem minutter, er der et problem med linkkvaliteten. Prøv at forbinde kablet igen eller bruge et andet kabel for at løse problemer med linkkvaliteten.

Tomgangsfejltæller: Tomgangsfejl optælles, når adapteren modtager en uigenkendelig transmission p ledningen. I modsætning til modtagelsesfejl registreres tomgangsfejl, når adapteren ikke aktivt modtager pakker.
Tomgangsfejltælleren tælles op, når adapteren opretter forbindelse til netværket, (når kablet forbindes til adapteren eller computeren genstartes), eller når adapteren genstarter efter autoforhandling. Hvis Tomgangsfejltælleren når ca. 255 inden for ét minut, er der et problem med linkkvaliteten. Prøv at forbinde kablet igen eller bruge et andet kabel for at løse problemer med linkkvaliteten.

MDI/MDI-X-status: Identificerer, hvorvidt det kabel, derer forbundet til adapteren, har en "straight-through" (MDI) eller "crossover" (MDI-X) konfiguration. Brug MDI ved tilslutning af et system til en omskifter eller hub og MDI-X ved forbindelse mellem to systemer.

BEMÆRK: Oplysningerne i dialogboksen Kabeltestresultater varierer med adaptertypen.


Juridisk

Copyright © 2002, Intel Corporation. Alle rettigheder forbeholdes.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR 97124-6497 USA

Intel Corporation påtager sig intet ansvar for fejl eller mangler i dette dokument. Intel påtager sig heller nogen forpligtelse til at opdatere oplysningerne heri.

* Andre navne og varemærker kan hævdes at tilhøre andre.


Avancerede indstillinger til PRO/1000 Server-adaptere

De indstillinger, der er vist under fanen Avanceret, gør det muligt at tilpasse, den måde som adapteren håndterer QoS pakke-tagging, Jumbo-rammer, aflastning og andre funktioner på. Visse af de nedenstående funktioner er muligvis ikke tilgængelige i det operativsystem, du anvender, og i de specifikke adaptere, der er installeret.

Avancerede indstillinger

Adaptiv inter-rammeafstand

Kompenserer for overdrevent mange Ethernet-pakkekollisioner dit netværket.  Denne indstilling er som standard indstillet til 0, hvilket deaktiverer funktionen.

Den anbefalede indstilling (1) fungerer bedst for de fleste computere og netværk ved dynamisk tilpasning til netværkets trafikforhold. Denne dynamiske funktion er kun aktiv, når værdien er indstillet til 1. I visse sjældne tilfælde kan du muligvis opnå en bedre ydelse ved manuel indstilling af spacing-værdien. Indstilling af en værdi fremtvinger en statisk afstand mellem pakker.

Forøgelse af værdien øger forsinkelsen mellem de rammer, der transmitteres.

Understøttede adaptere	Alle
Standard	0: deaktiveret
Interval	0-255

Adaptivt link-svar

Gør systemstart hurtigere ved at springe de opstartrutiner over, som kræver netværkstilslutning, når kablet er fjernet fra adapteren. Dette reducerer væsentligt den tid, det tager at starte computeren.

Når Adaptivt link-svar er aktiveret for Intel Ethernet-controllere, og der ikke er forbundet et netværkskabel til RJ-45-porten, deaktiveres netværksforbindelsen. Et gult advarselsikon vises ved siden af netværksforbindelsen i Enhedshåndtering.

Hvis du vil aktivere netværksforbindelsen igen, skal du forbinde netværkskablet til RJ-45-porten og derefter genstarte computeren.

Understøttede adaptere	Ikke tilgængelig på alle adaptermodeller.
Standard	Fra
Anbefales	Til
Interval	Til, Fra
BEMÆRK: Adaptive Link Response (ALR) fungerer ikke, når en trådløs adapter er aktiv på systemet.

Sammensmeltningsbuffere

Optimerer transmissionsydelsen ved at tilpasse antallet af samlebuffere, hvilket sætter adapteren i stand til at samle datasegmenter før pakketransmission.

Indstillingen Samlebuffere skal konfigureres til at arbejde med indstillingen Beskrivelser for overførsel. Indstillingen Samlebuffere skal være 30-50% af Beskrivelser for overførsel. Hvis indstillingen Samlebuffere ikke ændres, så den svarer til indstillingen Beskrivelser for overførsel, forbedres transmissionsydelsen muligvis ikke.

Samlebuffere forbedrer transmissionsydelsen væsentligt på Windows NT 4.0-computere. Den forbedrer også transmissionsydelsen på Windows 98- og 2000-computere.

Understøttede adaptere	Alle
Standard	128
Interval	16-768

Aktiver PME

Aktiverer eller deaktiverer vække-funktioner for adapteren i computere, som har ældre implementeringer af APM (Advanced Power Management). Væk på-funktioner sætter adapteren i stand til at forlade standby eller slukket tilstand, når den modtager visse typer pakker, f.eks. ARP-pakker.

•	Deaktivering af denne funktion deaktiverer alle Væk på Indstillinger i computere med ældre implementeringer af strømstyring.

•	Aktivering af denne funktion tillader adapteren at reagere på Væk på-signaler. Hvis du vil konfigurere adapteren til at reagere på bestemte pakketyper, skal du se oplysningerne om Væk på Indstillinger senere i dette emne.

•	Værdien Hardwarestandard tvinger adapteren til at konfigurere Væk på-funktioner baseret på systemhardwaren.

•	Værdien Ingen handling sætter adapteren i stand til at bruge operativsystemets standardværdier.

Hvis du vil deaktivere alle Væk på Indstillinger, skal du deaktivere denne funktion. I modsat fald skal du indstille denne funktion til Ingen handling.

Understøttede adaptere	82559-baserede adaptere. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Hurtig transmissionsafslutning

Frigør Beskrivelser for overførsel til genbrug, før pakkerne sendes ud på netværket.

•	Med Hurtig transmissionsafslutning deaktiveret skal adapteren vente, indtil pakkerne er sendt, inden Beskrivelser for overførsel kan genbruges.

•	Med Hurtig transmissionsafslutning aktiveret, genbruger adapteren Beskrivelser for overførsel hurtigere, så adapteren kan forbedre transmissionsydelsen.

Understøttede adaptere	82543- og 82544-baserede adaptere. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Til
Interval	Til, Fra
Flow-kontrol

Sætter adapteren i stand til at sende eller modtage flow-kontrol-rammer. Transmissionsvejen sættes i venteposition i det tidsrum, som er angivet i den modtagne flow-kontrolramme. Disse indstillinger hjælper med at finjustere netværksydelsen ved at forhindre tab af pakker.

Understøttede adaptere	82542-baseret, kun transmission. 82540, 82543, 82544-based adapters, transmit and receive.  Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Aktiveret
Interval	Off, Respond, Generate, Generate & Respond, Hardware Default
Jumbo-rammer

BEMÆRK: Jumbo-rammer understøttes kun ved 1000 Mbps. Brug af Jumbo-rammer ved 10 eller 100 Mbps kan resultere i dårligere ydelse eller tab af forbindelse.

Aktiverer eller deaktiverer funktionen Jumbo-rammer. Jumbo-rammer kan forøge ydelsen og reducere CPU-belastningen ved at anbringe flere data i hver ramme, hvorved der sendes færre rammer. Standard Ethernet-rammestørrelsen er 1514 byte, mens Jumbo-rammer kan indeholde 4088, 9014 eller 16128 byte.

Aktivér kun Jumbo-rammer, hvis enhederne i netværket understøtter dem og er konfigureret til at bruge den samme rammestørrelse. Ved indstilling af Jumbo-rammer i andre netværksenheder skal du være opmærksom på, at netværksenheder beregner størrelsen af Jumbo-rammer forskelligt. Visse enheder inkluderer header-information i rammestørrelsen, mens andre ikke gør det. Intel-adaptere inkluderer ikke header-information i rammestørrelsen.

Yderligere oplysninger finder du i emnet Jumbo-rammer.

Understøttede adaptere	Alle
Standard	Deaktiveret
Interval	Deaktiveret (1514), 4088, 9014 og 16128 byte. (Indstil omskifteren 4 bytes højere for CRC, plus 4 bytes, hvis der anvendes VLAN'er).  BEMÆRK: Enhver værdi i intervallet 1514-16128 kan indstilles med parameteren i registreringsdatabasen til Windows MaxFrameSize.
Lokalt administreret adresse

Tilsidesætter MAC-adressen i adapteren. Hvis du vil angive en ny netværksadresse, skal du skrive et 12-cifret hexadecimalt tal i boksen Værdi.

Understøttede adaptere	Alle
Standard	Ingen
Interval	0000 0000 0001 - FFFF FFFF FFFD Undtagelser: • Brug ikke en multicast-adresse (mindst betydende bit i den høje byte = 1).  • Brug ikke udelukkende nuller eller F'er. Indstillingen Ikke til stede: vender tilbage til adapterens oprindelige netværksadresse.
BEMÆRK: I et team bruger Intel(R) PROSet II enten:

•	Teamets LAA, hvis teamet har en LAA konfigureret, eller

•	Den primære adapters permanente MAC-adresse, hvis teamet ikke har en LAA konfigureret

Intel PROSet II bruger ikke en adapters LAA, hvis adapteren er den primære adapter i et team, og teamet har en LAA.

Brugere af Windows 98SE:

Hvis du vil bruge standardadressen efter brug af en manuelt tilknyttet adresse, skal du udføre en af disse procedurer:

•	Marker Lokalt administreret adresse under fanen Avanceret i dialogboksen Egenskaber, og ret dens adresse til værdien 0. Klik på OK for at anvende indstillingen.

•	Klik på fanen Avanceret i Intel PROSet II, og klik derefter på Genopret standard, eller slet alle tegn i feltet Værdi. Klik på OK for at anvende indstillingen.

Log Link tilstandshændelse

Denne indstilling bruges til at aktivere/deaktivere logføring af ændringer i link-tilstanden. Hvis den slås til, genererer en link-op eller link-ned hændelse en meddelelse, der vises i loggen med systemhændelser. Administratorerne får vist hændelsesmeddelelsen i loggen med systemhændelser.

De følgende hændelser logføres.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Understøttede adaptere	Alle
Standard	Aktiver
Interval	Aktiver, Deaktiver
Aflast modtagelses-TCP-checksum

Sætter adapteren i stand til at kontrollere TCP- eller UDP-checksummen for indkommende pakker.

•	Med Aflastning deaktiveret kontrollerer operativsystemet TCP-checksummen.

•	Med Aflastning aktiveret foretager adapteren kontrollen for operativsystemet.

Denne funktion forbedrer ydelsen ved modtagelse og reducerer CPU-belastningen.

Understøttede operativsystemer	• Windows XP* • Windows 2000 • Windows 98 does not support offloading.
Understøttede adaptere	82559-baserede adaptere og nyere. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	• Windows* XP: Til • Windows 2000: Fra
Interval	Til, Fra
Aflast TCP-segmentering

Sætter adapterhardwaren i stand til at segmentere data til gyldige Ethernet-rammer.

•	Med TCP-segmentering deaktiveret, segmenterer operativsystemsoftwaren dataene, inden de sendes til adapteren til transmission.

•	Med TCP-segmentering aktiveret, segmenterer adapteren dataene i rammer.

Da adapterhardwaren er i stand til at udføre datasegmenteringen meget hurtigere end operativsystemsoftwaren, øger denne funktion i høj grad transmissionshastigheden. Hertil kommer, at adapteren bruger færre CPU-ressourcer.

Understøttede operativsystemer	Windows XP
Understøttede adaptere	82544-baseret. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	1
Interval	0 = anmeld ikke denne funktion. 1 = anmeld denne funktion.
Aflast transmissions-IP-checksum

Sætter adapteren i stand til at beregne IP-checksummen for udgående pakker.

•	Med Aflastning deaktiveret kontrollerer operativsystemet IP-checksummen.

•	Med Aflastning aktiveret foretager adapteren kontrollen for operativsystemet.

Denne funktion forbedrer ydelsen ved IP-transmission og reducerer CPU-belastningen.

Understøttede operativsystemer	• Windows XP* • Windows 2000 • Windows 98 understøtter ikke aflastning.
Understøttede adaptere	82559-baserede adaptere og nyere. View the Adapter SpecificationsSe emnet  for at få hjælp til at identificere din adapter.
Standard	Til
Interval	Til, Fra
Aflast transmissions-TCP-checksum

Sætter adapteren i stand til at beregne TCP- eller UDP-checksummen for udgående pakker.

•	Med Aflastning deaktiveret kontrollerer operativsystemet TCP-checksummen.

•	Med Aflastning aktiveret foretager adapteren kontrollen for operativsystemet.

Denne funktion forbedrer ydelsen ved TCP- og UDP-transmission og reducerer CPU-belastningen.

Understøttede operativsystemer	• Windows XP* • Windows 2000 • Windows 98 does not support offloading.
Understøttede adaptere	82559-baserede adaptere og nyere. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Til
Interval	Til, Fra BEMÆRK: Indstil denne funktion til Fra, når serveren understøtter DOS-baserede klienter.
QoS-pakkemærkning

Sætter adapteren i stand til at sende og modtage IEEE 802.3ac-taggede rammer, som omfatter:

•	802.1pIEEE_802.1p QoS (Quality of Service)-tag, der er nødvendige til prioritets-taggede pakker, og

•	802.1Q-tags, der er nødvendige til VLAN'er.

Intel PROSet II aktiverer automatisk 802.1p tagging, når du opsætter et VLAN.

Understøttede adaptere	82559-baserede adaptere og nyere. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Fra
Interval	Til, Fra
Beskrivelser for modtagelse

Definerer antallet af Modtag beskrivere, som er datasegmenter, der sætter adapteren i stand til at tildele hukommelse til modtagne pakker. Hver modtaget pakke kræver én Modtag beskriver, og hver beskriver forbruger 2kb hukommelse.

Du kan også vælge at øge antallet af Modtag beskrivere, hvis du bemærker en væsentlig reduktion af ydelsen ved modtagelse. Hvis modtagelsessydelsen ikke er et problem, skal du bruge standardindstillingen til adapteren.

Adaptercontroller	Standard	Interval
82542-baseret	160	80 – 768
82543-baseret	160	80 – 256
82544-baseret	160	80 – 2048
Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.

Beskrivelser for overførsel

Definerer antallet af Beskrivelser for overførsel, som er datasegmenter, der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere Beskrivelser for overførsel.

Du kan vælge at øge antallet af Beskrivelser for overførsel, hvis du opdager, at der er et muligt problem med transmissionshastigheden. Selv om en forøgelse af antallet af Beskrivelser for overførsel kan forbedre transmissionshastigheden, vil Beskrivelser for overførsel bruge systemhukommelse. Hvis transmissionshastigheden ikke er et problem, skal du bruge den anbefalede værdi på 256.

Adaptercontroller	Standard	Interval
82542-baseret	256	80 – 768
82543-baseret	256	80 – 256
82544-baseret	256	80 – 2048
View the Adapter Specifications topic for help identifying your adapter.

Væk på Link Change

Vækker computeren, hvis netværksforbindelsen opretter link, mens computeren er i stand by-tilstand. Du kan aktivere denne funktion, deaktivere den eller lade operativsystemet bruge dens standarder.

Understøttede operativsystemer	Windows 9x, Windows 2000, Windows XP
Interval	Deaktiveret, Tvunget, OS-afhængigt
Standard	Deaktiveret

Væk på-indstillinger

Disse indstillinger henviser til funktioner, der er aktiveret af enten operativsystemet eller Intel PROSet. Disse funktioner opfører sig forskelligt eller understøttes slet ikke, afhængig af din version af Windows.

Disse Windows-versioner understøtter Væk på-indstillinger: Windows 9x, Windows XP 64-bit Edition,, Windows XP Professional og Windows Server 2003. Denne funktion er ikke understøttet på Windows Server 2003 for 64-bit Itanium(R)-baserede systemer.

Aktivere Væk på-indstillinger

Du kan bruge Intel PROSet til at konfigurere Væk på-indstillingen til adapterbrugen. Inden du vælger Væk på indstillinger, skal du aktivere operativsystemet, så det bruger Væk på indstillinger. Se hvordan dette gøres i instructions.

Sådan aktiverer du Væk på-indstillinger

1.	I Intel PROSet klikker du på fanen Avanceret.

2.	I listen Indstillinger markerer du Væk på-indstillinger.

3.	I listen Værdi markerer du den relevante Væk på-indstilling.

4.	Klik på OK eller Anvend.

5.	Hvis adapteren skal reagere på disse typer Væk på-pakker, skal operativsystemet være aktiveret til at bruge Væk på-indstillinger. Hvis du vil aktivere Væk på Indstillinger, skal du gå til Enhedshåndtering og aktivere indstillingen Tillad, at denne enhed sætter computeren ud af standby.

Mulige indstillinger

Disse Væk på-indstillinger findes i Intel PROSet:

Indstilling	Beskrivelse
Deaktiveret	Adapter vil ikke bruge Væk på-indstillinger.
Væk på Magic Packet	Sætter adapteren i stand til at vågne som svar på modtagelse af en Magic Packet. En Magic Packet er en pakke, der indeholder 16 sammenhængende kopier af den modtagende adapters Ethernet-adresse. Når du konfigurerer denne funktion, tilsidesætter Intel PROSet operativsystemets værdi for denne funktion.
Væk på Directed Packet	Sætter adapteren i stand til at vågne, når den modtager en Directed Packet, som er en unicast-pakke, der er sendt til adapterens MAC-adresse.  Protokollen skal aktivere denne Væk på-metode i driveren. Hvis denne funktion ikke vælges, fortæller det driveren, at den skal ignorere alle protokolanmodninger om at aktivere denne Væk på-metode.
Væk på Magic og Directed Packet	Aktiverer adapteren, så den vågner, når den modtager en Magic Packet eller en Directed Packet.
OS-styret	Giver operativsystemet komplet kontrol over Væk på-indstillingerne.

BEMÆRK: Hvis flere IP-adresser konfigureres til én adapter, kan operativsystemet anmode om at blive vækket ved ARP-mønstre på alle de konfigurerede adresser. Adapteren vil kun vågne som svar på ARP-pakker, der forespørger om den første IP-adresse på listen.

BEMÆRK: Væk på-indstillinger omfatter ikke muligheden for at vække en maskine fra lukket tilstand (S5). Denne tilstand kontrolleres af Aktiver PME-indstilling, der også findes under fanen Avanceret. Selv hvis Væk på-indstillingerne er deaktiverede, bestemmes muligheden for at blive vækket fra S5 af Aktiver PME-indstilling.

Så længe adapterdriveren er aktiveret, vil PME-indstillingerne fungere. Når driveren er deaktiveret, vender enheden dog tilbage til dens hardwarestandarder, der måske giver computeren mulighed for at vågne fra lukket tilstand.

Knappen Genopret standard

Denne knap sætter den aktuelt valgte Avancerede indstilling til indstillingens standardværdi.  Se ovenstående indstillinger angående standardværdier.  (Denne funktion er ikke tilgængelig for alle indstillinger).


Driverinformation
Netværksdriver

Sådan får du vist oplysninger om en adapterdriver

1.	Klik på den adapter, du vil have vist oplysninger om, i netværkskoomponenttræet.

2.	Klik på fanen Driver.

Der vises følgende oplysninger.

Driverinformation:

Navn	Filnavnet på den adapterdriver, der i øjeblikket er indlæst
Version	Versionsnummer på driveren. Nyttigt, når du indlæser nye versioner fra Intel's supportwebsted: http://support.intel.com
Beskrivelse	Drivernavn
Copyright	Juridiske oplysninger
Driverstatistik:

BEMÆRK: De nedenfor viste statistikker nulstilles, når du indlæser eller opdaterer adapterdriveren.

Pakker sendt	Antal pakker sendt
Pakker modtaget	Antal pakker modtaget
Afsendelsesfejl	Antal pakker sendt med fejl
Modtagelsesfejl	Antal pakker modtaget med fejl
BEMÆRK: Klik på Hjælp > Support i menuen for at hente de nyeste drivere. Klik på Hent de nyeste drivere på siden Support.


Diagnosticering
Diagnostiktest

Adapterdiagnosticering gør det muligt at analysere adapterens generelle tilstand. Når du foretager diagnostik, kontrollerer PROSet II for I/O-konflikter, hukommelsesfejl, EEPROM-funktion, transmissions- og modtagelsesfunktionalitet samt link.

Resultaterne af diagnostiktest vises under fanen Diagnostik, men de gemmes også i en systemlog.

BEMÆRK:  Hvis du computer kører på Windows 98, skal du muligvis deaktivere adapterens strømstyring, før du kører diagnosticeringen. Detaljer derom findes i Procedure til deaktivering af strømstyring.

Individuelle tests

Testnavn	Beskrivelse	Fejlfindingsoplysninger
Kontrolregistre	Checker for eventuelle konflikter i I/O-adressen og tester adgangen til registrene. Denne test omfatter alle generelle registre, modtageregistre og senderegistre. Den tester ikke EEPROM Control/Data-registret.	Hvis kontrolregistertesten mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.
FIFU-registre	Tester FIFO-hukommelsen på adapteren ved at skrive og læse mønstre til og fra FIFO-hukommelsen.	Hvis testen FIFO-registre mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.
EEPROM	Verificerer integriteten af de data, som læses fra EEPROM'en. Denne test udfører en skrivning til/fra EEPROM'en og sammenligner derefter resultaterne.	Hvis EEPROM-testen mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.
Interrupt	Anvender interruptregistre til at bekræfte, at alle adaptere afbryder arbejdet.	Hvis Interrupttesten mislykkes, kan du prøve at ændre interruptindstillingerne i BIOS'en. Hvis ændring af indstillingerne ikke løser problemet, kan du prøve at flytte adapteren til en anden slot.
Loopback	Tester adapterens evne til at sende og modtage pakker ved at sende pakker til adapteren selv. Denne test anvender både funktionerne MAC-loopback og Transceiver-loopback. (Ikke tilgængelig for Intel(R) PRO/1000 T-adapteren).	Hvis testen Loopback mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.
Link	Bekræfter, at adapteren har forbindelse til en gyldig partner.	Hvis Link-testen mislykkes, skal du kontrollere, at det er sat rigtigt i adapteren og linkpartneren. Hvis kablet sidder rigtigt i, kan du prøve at sætte kablet i en anden port i linkpartneren eller prøve med et andet kabel.
BEMÆRK: Hvis diagnostikken kører, og du klikker på Stop, vil der være en kort forsinkelse, inden diagnostikken stopper. Når diagnostikken stopper, bliver knappen OK tilgængelig.

Andre indstillinger

Knappen Avanceret:  Klik på denne for at opsætte en afsender/modtager-test.

Advarsel! Afsender/Modtager-testen er ikke designet til at køre, mens systemet er i tilstanden "Standby", "Afbrudt", eller når kablet ikke er sat i computeren.


Teamkonfiguration og status
Teamkonfiguration

Sådan får du vist oplysninger om teamkonfiguration

Klik på det team, du vil have vist, i Netværkskomponenttræet.

Fanen Teamkonfiguration vises.

Statusboksen Adaptere i et team viser følgende:

Adapter

Navnet på hver adapter i teamet.

Prioritet

Viser prioritetstatus for adapterne i et team (hvis du har angivet en prioritet). En adapter kan have en primær eller sekundær prioritetstatus i et team.

Sådan angiver du en adapter som primær eller sekundær

Kolonnen Status viser følgende:

•	Aktiv: Adapteren videresender netværkstrafik.

•	I AFT-tilstand er der kun én aktiv adapter - den foretrukne primære adapter.

•	I Dynamic 802.3ad-tilstand har adaptere, der er en del af den aktive aggregator, en aktiv status.

•	Standby: AFT, SFT og Dynamic 802.3ad-team understøtter standby-tilstand. En adapter på standby-tilstand har forbindelse til netværket, men videresender ikke aktiv trafik.

•	Deaktiveret: Adapteren er blevet fjernet eller deaktiveret, eller driveren har ikke kunnet indlæses. Herudover har adapteren status som deaktiveret, hvis der er fejl i kablet, eller forbindelsen er afbrudt.

Sektionen Teamoplysninger viser følgende:

•	Ethernet-adresse: Viser den primære MAC-adresse for teamet.

•	IP-adresse: Viser IP-adressen for teamet.

•	Teamtype: Viser teamtilstanden.

Knappen Test omskifterkonfiguration

Du kan sikre, at that linkpartnere understøtter den valgte adapterteamfunktion ved at køre omskifterkonfigurationstesten. Hvis adapteren f.eks. er medlem af et Link Aggregation-team, kan Intel(R) PROSet II verificere, at linkpartnere, som er forbundet til adapteren, understøtter Link Aggregation.

Specifikke oplysninger om kravene i hver teamfunktion finder du i Om Teaming.

Når du kører denne test, afbrydes teamets forbindelse til netværket midlertidigt.

BEMÆRK: Denne test registrerer ikke fejl, hvis et af følgende scenarier findes.

Adapterkonfiguration	Omskifterkonfiguration
Team i Link Aggregation-tilstand uden VLAN'er	Omskifteren enten: • Ikke tilhører noget VLAN • Is configured with tagged VLANs
Team i Link Aggregation-tilstand med VLAN'er	Omskifteren: • Ikke tilhører det VLAN, der er konfigureret for adapteren og • Does not have Link Aggregation defined
Sådan kører du omskifterkonfigurationstesten

1.	Klik på det team, du vil teste, i Netværkskomponenttræet.
For at køre testen skal der være mindst to adaptere i teamet.

2.	Klik på Test omskifterkonfiguration under fanen Teamkonfiguration.
Dialogboksen Test omskifterkonfiguration vises.

3.	Fortsæt testen ved at klikke på Ja.
Hvis der detekteres team- eller linkpartner-konfigurationsfejl åbnes fanen Fejlfinding.

BEMÆRK:  På grund af den tid, der kræves ved test af STP (Spanning Tree Protocol), kan Intel PROSet II muligvis ikke præcist angive, om STP er aktiveret i netværket. Sørg for, at omskiftere er konfigureret med STP:

•	Aktiveret for SFT-team

•	Deaktiveret (hurtig port) for alle andre teamfunktioner


VLAN
VLAN-oversigt

Et VLAN er en logisk netværksgruppering, som gør det muligt at isolere netværkstrafikken, så medlemmerne af VLAN'et kun modtager trafik fra andre medlemmer. Med VLAN'er kan du gruppere PC'er til logiske arbejdsgrupper, en afgørende overvejelse ved tilslutning af klienter til servere, som er geografisk spredt i bygninger, universitetsområder eller koncernnetværk.

Ved brug af VLAN'er dit netværk kan du:

•	Begrænse rundsendelsesstorme

•	Forbedre tilføjelse, flytning og ændring af netværksforbindelser

•	Reducere sikkerhedsproblemer

•	Gøre styring nemmere

VLAN-typer

Der findes omskifterbaserede VLAN'er, også kaldet implicitte VLAN'er og tag-baserede VLAN'er, som også kaldes eksplicitte VLAN'er.

•	Implicitte VLAN'er er baseret på omskifterfunktioner, som f.eks. portnummer, MAC-adresse og andre lag to-funktioner. Standard VLAN'en i mange omskiftere, herunder de fleste Cisco*-produkter, er et implicit VLAN. Implicitte VLAN'er konfigureres kun i omskifteren. Omskifteren ændrer eller tagger ikke pakker for at gennemtvinge et implicit VLAN. Alle Intel-adaptere kan deltage i implicitte VLAN'er.

•	Eksplicitte VLAN'er er baseret på tilføjelse af en fire-byte tag (802.3ac) til hver pakke-header. Hvert IEEE VLAN skal opsættes via netværket inkl. adapteren og alle linkpartnere.

Krav

VLAN'er kræver at:

•	Omskiftere dit netværk understøtter 802.1Q VLAN'er

•	Adaptere understøtter 802.1Q VLAN'er, som omfatter:

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R)PRO/1000

•	Intel(R) PRO/100B-adaptere understøtter ikke VLAN'er.

Besøg webstedet til Intel Networking for at få en oversigt over Intel VLAN'er:

  Besøg webstedet nu

Yderligere oplysninger får du ved at læse hvidbogen om VLAN'er:

  Læs hvidbogen fra webstedet

Se også:

Tilføje et VLAN

Skifte VLAN-egenskaber

Fjerne et VLAN

Avancerede indstillinger til VLANs


Support

Du kan besøge et af Intel’s supportsteder, hvis du har en Internet-forbindelse og en webbrowser.

For support via Internettet:

1.	Klik på Support i menuen Hjælp.

2.	Klik på et af webstedslinkene.


Fejlfinding

Fanen Fejlfinding vises kun, når Intel(R) PROSet II registrerer et problem med adapterkonfigurationen, driverinstallationen eller en anden fejl. Intel PROSet II undersøger problemet og tilbyder i de fleste tilfælde en mulig løsning på problemet.

Hvis du har mistanke om, at der er et problem med adapteren, kan du prøve en eller flere af følgende muligheder:

•	Undersøg oplysningerne under fanen Generelt, hvis der er et aktivt link til netværket.

•	Hvis du har konfigureret et team, skal du teste , teste konfigurationen for linkpartnere for at sikre, at de understøtter teamfunktionen.

•	Kør Diagnosticering.

•	Kør kabeltesten , hvis det er understøttet af din adapter.


Afsender/Modtager-test

Afsender/Modtager-test gør det muligt at teste adapteren i et netværk.

Før du kører denne test, skal du sørge for, at adapteren har forbindelse til netværket.

Opsætning af testen

Opsæt en afsender- og en modtagercomputer. Afsenderen transmitterer konstant pakker til modtageren, som returnerer pakkerne til afsenderen.

Afsender
Sender konstant pakker til netværket. Vælg Start for at begynde at sende pakker.
Inden du begynder at sende pakker, skal du opsætte en modtager et sted i netværket. Gå til en anden computer med en Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S eller PRO/1000 adapter installeret, og brug Intel(R) PROSet II for denne adapter til at opsætte den som modtager. Brug om muligt den samme model adapter til afsender og modtager.

Modtager
Returnerer pakker til afsenderen (den som sender pakker). Vælg Start for at få denne PC til at fungere som modtager.

Selv om den ikke er designet til det, kan denne test bruges til at teste kabelføringen til netværkssegmenter og netværkskonfiguration. Ved test af et nyt LAN-segment skal du opsætte en modtager i den ene ende og teste med en afsender i den anden ende.

Denne test verificerer forbindelsen mellem to adaptere. Den er ikke beregnet til at kontrollere hastigheden. Den hastighed, som en adapter sender eller modtager trafik med i netværket, kan variere afhængig af netværkstopologien og netværksbelastningen. Du kan se adapterens konfigurerede hastighed ved at klikke på fanen Generelt.

BEMÆRK:  Hvis en Cisco* 6500-omskifter er konfigureret med Spanning Tree aktiveret, giver Afsender/Modtager-testen ikke præcise resultater. Hvis du vil køre Afsender/Modtager-testen med en Cisco 6500-omskifter, skal du sørge for, at Spanning Tree er deaktiveret.

Advarsel! Afsender/Modtager-testen er ikke designet til at køre, mens systemet er i tilstanden "Standby", "Afbrudt", eller når kablet ikke er sat i computeren.


Nyt VLAN

VLAN-ID: Det VLAN-nummer, som er tildelt af netværksadministratoren. VLAN-ID for adapteren skal skal være den samme VLAN-ID som for omskifteren. Gyldigt interval:  1 - 4094. (BEMÆRK: VLAN-numrene 0 og 1 er ofte reserverede. Se i dokumentationen til omskifteren for at få oplysninger).

VLAN-NAVN: Navnet på VLAN’et, f.eks. Marketing eller Teknik. VLAN-navnet er en ekstra indstilling, som du kan bruge til nemmere at identificere VLAN'er i netværket. VLAN-navnet for adapteren må ikke være det samme som VLAN-navnet for omskifteren.


Identificer adapter

Funktionen Identificer adapter gør det muligt at identificere den fysiske adapter fra computerens bagside.

Hvis du f.eks. har to adaptere installeret, kan du vælge en adapter i netværkskomponenttræet og derefter klikke på knappen Identificer adapter. Den valgte adapters lysdiode på beslaget blinker.

Sådan verificeres adapterpositionen

1.	Klik på Identificer adapter.

2.	Flyt skydekontrollen for at vælge det antal sekunder, som lysdioden skal blinke. Standardværdien er 10 sekunder.

3.	Klik på Start.

 Lysdioden for den valgte adapter blinker med den angivne varighed.


Adapterfejltolerance

Adapterfejltolerance er et team af to eller flere adaptere, der er konfigureret til at give en netværksforbindelse i reserve. Hvis det drejer sig om en hub- eller omskifterport-, kabel- eller adapterfejl, opretholder computeren en uforstyrret netværksydelse.

Adapterfejltolerance-teams har en primær adapter og en reserve-, eller sekundær, adapter. Under normal drift sender kun den primære adapter trafik. Hvis der opstår fejl på den primære adapter eller på forbindelsen til den primære adapter, tager den sekundære adapter automatisk over.

Spanning Tree skal være deaktiveret, hvis du bruger adapterfejltolerance.

Adapterfejltolerance-teams er kompatible med følgende:

Adaptertype	Kræver én Intel-serveradapter for at være medlem af teamet
Adapterhastighed	Kan blandes, så én adapter kører ved 100 Mbps og en anden kører ved 1000 Mbps
Netværkskonfiguration	• Alle adaptere skal være tilsluttet den samme omskifter • Spanning Tree skal være deaktiveret
Protokoller	Alle
Se også:

Om Teaming

Teamtyper


Adaptiv Load Balancing

ALB er en type team, som er konfigureret til at forøge din servers ydelse ved transmission og modtagelse. ALB-team udfører automatisk Load Balancing for transmissionstrafik, men Load Balancing for modtagelsestrafik kan aktiveres eller deaktiveres.

ALB-teams forøger ydelsen ved:

•	Adapterkonfiguration. Ved at føje medlemmer til et team, kan du forøge den totale ydelse.

•	Trafikanalyse. ALB-softwaren analyserer konstant belastningen ved transmission og modtagelse for hvert teammedlem, og derefter afbalanceres belastningen på tværs af adapterne efter behov.

Transmissionstrafik

For ALB-teams udfører alle adaptere Load Balancing af IP- (IPv4 og IPv6) og NCP IPX-transmissionstrafik.

Modtagelsestrafik

•	For ALB-teams med Load Balancing ved modtagelse deaktiveret modtager den primære adapter trafik.

•	For ALB-team med Load Balancing ved modtagelse aktiveret:

•	Modtager den primære adapter trafik ved hjælp af en vilkårlig protokol

•	Aktive adaptere med de højeste hastigheder modtager IPv4-trafik

Hvis der f.eks. er et ALB-team bestående af tre adaptere, en gigabit-adapter udpeget som primær adapter og to Intel(R) PRO/100-adaptere:

•	Gigabit-adapteren modtager trafik, der ikke kan distribueres samt IPv6-trafik, fordi den er den primære adapter.

•	Gigabit-adapteren modtager IPv4-trafik, fordi den er adapteren med den højeste hastighed.

•	Intel PRO/100-adaptere deltager ikke i Load Balancing ved modtagelse.

Oplysninger om aktivering eller deaktivering af Load Balancing ved modtagelse findes under Konfigurere avancerede indstillinger.

Hertil kommer, at ALB-team giver fejltolerance. Hvis der opstår fejl på den primære adapter, fortsætter teamet med at fungere og afbalancere trafikken mellem de resterende, fungerende teammedlemmer.

ALB-teams er kompatible med følgende:

Adapterhastighed	Kan blandes, så én adapter kører ved 100 Mbps og en anden kører ved 1000 Mbps.
Protokoller	IP, IPX (NCP) NOTE: Microsoft categorizes its IPv6 support in Windows* 2000 as a Technology Preview. As such, IPv6 support in Windows 2000 was not intended for a production environment. For details about operating system support for IPv6, see the system documentation.
Netværkskonfiguration	Alle adaptere skal være tilsluttet den samme omskifter

Intel(R) PRO/1000 Gigabit Server Adapter - noter om ydelse

Da Intel(R) PRO/1000-adapteren allerede understøtter en sådan høj båndbredde, kan brug af ALB-funktionen give reduceret ydelse med visse servere. Dette skyldes, at mange af de servere, som fås i dag, ikke har CPU- eller buskapacitet til effektiv håndtering af et team af adaptere i gigabit-klassen. Den bedste ALB-ydelse fås ved at bruge nyere servere, der understøtter flere PCI-busser og flere Pentium II(R)-processorer med en hastighed på 400 MHz eller mere. På en sådan server skal du installere Intel PRO/1000-adaptere i team på separate PCI-busser for at opnå maksimal ydelse.

Se også:

Om Teaming

Teamtyper

Konfigurere avancerede indstillinger


IEEE 802.3ad: Dynamisk

802.3ad er en IEEE Link Aggregation-standard. Ligesom det er tilfældet med statiske Link Aggregation-teams, forøger teams, der anvender dynamisk Link Aggregation, ydelsen ved:

•	Adapterkonfiguration. Ved at føje medlemmer til et team, kan du forøge ydelsen. Teams kan bestå af op til otte adaptere. Hver server kan operere med op til fire teams.

•	Trafikanalyse. Softwaren analyserer konstant belastningen ved transmission for hvert teammedlem, og afbalancerer derefter belastningen på tværs af adapterne efter behov. Omskifteren anvender Load Balancing til modtagelsestrafik.

Hertil kommer, at 802.3ad-team giver fejltolerance. I 802.3ad-team anvender serveren kun én IP/MAC-adresse til at kommunikere med netværket. Til gengæld behandler netværksenheder og klienter et team i Link Aggregation-tilstand som én computer. Hver gang der opstår fejl på en adapter i teamet, ser netværket teamet som en computer med reducerede funktioner.

Link Aggregation-teams er kompatible med følgende:

Adapterhastighed	Alle adaptere skal køre med samme hastighed
Netværkskonfiguration	• Kontrollér, at den omskifter, der er forbundet til adapteren, fuldt ud understøtter IEEE 802.3ad-standarden • Se i dokumentationen til omskifteren angående portafhængigheder. Visse omskiftere skal anvendes parvis for at kunne starte på en primær port.  • Kontrollér hastigheds- og duplexindstillingerne for at sikre, at adapteren og omskifteren kører fuld duplex, enten gennemtvunget eller indstillet til automatisk forhandling. Såvel adapteren som omskifteren skal have den samme hastigheds- og duplexkonfiguration. Kravet om fuld duplex er en del af IEEE 802.3ad-specifikationen: http://standards.ieee.org/.  Om nødvendigt kan du ændre hastigheds- eller duplexindstillingen, inden  du forbinder adapteren til omskifteren. Selv om du kan ændre hastigheds- og duplexindstillingerne, efter at teamet er oprettet, anbefaler Intel, at du fjerner kablerne, indtil indstillingerne har virkning. I visse tilfælde, kan omskiftere eller servere ikke genkende ændrede hastigheds- eller duplexindstillinger korrekt, hvis indstillingerne er blevet ændret, mens der er et aktivt link til netværket.  • Hvis du konfigurerer et VLAN, skal du se i dokumentationen til omskifteren angående noter om VLAN-kompatibilitet. Ikke alle omskiftere understøtter samtidige dynamiske 802.3ad-team og VLAN'er. Hvis du vælger at opsætte VLAN'er, skal du konfigurere team- og VLAN-indstillinger for adapteren, inden du forbinder adapteren til omskifteren. Opsætning af VLAN'er efter, at omskifteren har oprettet en aktiv aggregator, påvirker VLAN-funktionaliteten. BEMÆRK:  I visse omskiftere kan kobber- og fiberadaptere ikke tilhøre den samme aggregator i en IEEE 802.3ad-konfiguration. Hvis der er kobber- og fiberadaptere installere i et system, konfigurerer omskifteren muligvis kobberadaptererne i én aggregator og fiberbaserede adaptere i en anden. Hvis du oplever denne opførsel, skal du anvende enten kobber- eller fiberbaserede adaptere i et system for at opnå den bedste ydelse.
Protokoller	Alle

Se også:

Om Teaming

Teamtyper

Team_Types


Adapterteaming-oplysninger
Om Teaming

Et team er en gruppe adaptere, der er konfigureret til at give øget ydelse og fejltolerance. Teaming er kompatibel med Windows* 2000, Windows NT* 4.0 og Windows XP.

Hvad er teamtyperne?

Intel(R) PROSet II gør det muligt at konfigurere følgende teamtyper:

•	AFT (Adapterfejltolerance)

•	SFT (Omskifterfejltolerance)

•	ALB (Adaptive Load Balancing)

•	FEC* /LA/802.3ad: Statisk

•	GEC* / LA / 802.3ad: Static

•	IEEE 802.3ad: Dynamisk

Hvor mange adaptere kan der føjes til et team?

Med undtagelse af SFT-team, kan team indeholde fra to til otte adaptere. SFT-team skal indeholde præcis to adaptere, som er forbundet til én linkpartner.

Kan adaptere fra andre producenter anvendes i et team?

Du kan oprettet et flerproducentteam (MVT) af adaptere for enhver teamfunktion. Hvis du vil oprette et flerproducent-team, skal der være mindst én Intel-serveradapter i teamet.

MVT er kompatibel med:

Adaptertype	Se i Netværkskomponenttræet for at finde ud af, hvilke adaptere i dit system, der er kompatible.
Adapterhastighed	Check kravene til teaming-funktionen.
BEMÆRK: Hvis teammedlemmer er en del af et VLAN, understøtter Intel PROSet II ikke flerproducentteaming.

Hvor mange team kan der opsættes i en computer?

Det antal teams, der kan konfigureres på enhver computer, varierer, afhængigt af computerens hardware- og softwarekonfiguration.

Hvad er kravene?

Netværkskonfigurationen såvel som typen af adaptere, der er installeret i en computer, har betydning for hvilke typer teams, der kan opsættes i computeren. Se oplysningerne i emnet Teamtyper for at få en oversigt over teamkrav og -funktioner.

Hvordan fjerner du team?

Når du fjerner team, skal du sørge for at bruge hjælpeprogrammet Intel PROSet II. Fjernelse eller deaktivering af teams via Netværkspanel i operativsystemet kan muligvis påvirke systemets stabilitet og adapterkonfigurationen.

Besøg webstedet til Intel(R) Networking for at få en oversigt over adapter-teaming:

  Besøg webstedet nu

Mere specifikke oplysninger om formålet med forskellige teamtyper finder du ved at læse hvidbogen om løsning af serverflaskehalse:

  Læs hvidbogen nu

Se også:

Teamtyper


Adapterdetaljer

Sådan får du vist oplysninger om en adapter

1.	Klik på den adapter, du vil have vist oplysninger om, i netværkskoomponenttræet.

2.	Klik på Detaljer under fanen Generelt.

Skærmbilledet Detaljer vises.

BEMÆRK: Ikke alle egenskaber er tilgængelige på hver adaptermodel.

IP-adresse	Den IP-adresse, som i øjeblikket bruges til denne adapter. BEMÆRK: Intel(R) PROSet II does not display IPv6 addresses.
Bushastighed	Den aktuelle hastighed (i megahertz) på den PCI-bus, som adapteren anvender
Busbredde	Bit-bredden på den PCI-bus (32 eller 64), som adapteren anvender
Controller	Delnummmer eller model for en komponent i adapteren
Medietype	Connectortype (fiber eller kobber)
Permanent Ethernet- adresse	Nodeadresse (MAC) på adapteren i hexadecimal form. MAC-adressen er tildelt adapteren af leverandøren.
Aktuel Ethernet- adresse	Den MAC-adresse, der i øjeblikket bruges af denne adapter.  Hvis adapteren er medlem af et team, eller hvis der er knyttet en lokalt administreret adresse (LAA) til denne adapter, er den aktuelle Ethernet-adresse forskellig fra adapterens permanente adresse.
PHY-enhed	Beskrivelse af adapteren
Artikelnummer	Intel-delnummeret for adapteren
Interrupt	Det interrupt, som PCI BIOS eller operativsystemet har tildelt adapteren
Hukommelsesadresse	Den hukommelsesadresse, som PCI BIOS eller operativsystemet har tildelt adapteren
I/O-adresse	Den I/O-adresse, som PCI BIOS har tildelt adapteren
Busslot	Busnummeret og slot-ID'et for adapteren
Systemslot	Systemslotte er underopdelinger af busslotten. Hvis busslotten f.eks. er opdelt i to, er der to systemslotte, som identificerer hver del af busslotten.
DHCP-serveradresse	IP-adressen på den server, som tildelte en IP-adresse til adapteren.


Konfigurere avancerede teaming-funktioner

Der er forskellige avancerede indstillinger tilgængelige for hver teamtype.

Sådan kan du få vist eller ændre avancerede teamindstillinger

1.	Klik på et team i netværkskomponenttræet.

2.	Klik på fanen Avanceret.

3.	Foretag de ønskede nødvendige ændringer af teamkonfigurationen.

4.	Klik på Genopret standard for at genoprette standarderne.

5.	Klik på OK for at indstille ændringerne.

De avancerede indstillinger samt deres standardindstillinger er beskrevet nedenfor. I de fleste tilfælde er det bedst at bevare standardindstillingerne.

Kontroller tid (sekunder)

Hvor ofte softwaren kontrollerer teammedlemmers status. Hvis kontroltiden f.eks. er ét sekund, kontrollerer softwaren teammedlemmerne hvert sekund for at sikre, at de er i stand til at sende og modtage trafik.

Standard: 1 sekund

Interval: 1-3 sekunder

LinkAggrJoinMethod

Denne avancerede indstilling er tilgængelig for Link Aggregation-teaming. Baseret på IEEE 802.3ad-standarden kan et link opdeles i flere link, som kaldes aggregatorer. Imidlertid er kun én af aggregatorerne aktiv. LinkAggrJoinMethod-parameteren angiver, hvordan systemet vælger den aktive aggregator. Hvis du har indstillet LinkAggrJoinMethod til Maksimal båndbredde, vælger systemet den aggregator, som genererer mere trafik. Hvis du har indstillet parameteren Maksimalt antal adaptere, vælger systemet den aggregator, som har flest adaptere.

Standard: Maksimal båndbredde

Interval: Maksimal båndbredde, Maksimalt antal adaptere

Load Balance-opdateringshastighed

Det tidsrum, der forløber, før softwaren nulstiller eller opdaterer den aktuelle belastning for teammedlemmerne. Bevar denne indstilling som standard eller så lav som muligt for at opnå optimal ydelse.

Standard: Hver 10 kontroltidsenheder

Interval: 1-50 kontroltidsenheder

Det antal sekunder, der er angivet i indstillingen Kontroltid, er målenheden for opdateringshastigheden.  Yderligere oplysninger finder du i indstillingen Kontroltid.

LAA (Lokalt administreret adresse)

Hvis du bruger WLBS (Windows NT Load Balancing Service), NLB eller andre drivere i denne klasse, kan du tilpasse den MAC-adresse, der anvendes af teamet.

Du tilpasser MAC-adressen ved at skrive en ny MAC-adresse for teamet i feltet LAA. Sørg for, at den nye adresse ligger i intervallet:  0000 0000 0001 - FFFF FFFF FFFD.

Undtagelser:

o	Brug ikke en multicast-adresse (mindst betydende bit i den høje byte = 1). I adressen 0Y123456789A kan "Y" f.eks. ikke være et ulige tal. (Y skal være 0, 2, 4, 6, 8, A, C eller E.)

o	Brug ikke udelukkende nuller eller F'er.

Hvis du vil gemme standard-MAC-adressen, skal du slette adressen i feltet Lokalt administreret adresse og derefter klikke på OK, eller klikke på Genopret standard.

BEMÆRK: Intel(R) PROSet II bruger enten:

•	Teamets LAA, hvis teamet har en LAA konfigureret, eller

•	Den primære adapters permanente MAC-adresse, hvis teamet ikke har en LAA konfigureret

Enhver LAA-indstilling i den primære adapter overskrives af teamets LAA, hvis teamet har en LAA konfigureret.

STP- og SFT-teams: Hvis du ændrer, hvilken adapter der er den primære (aktive) adapter i et team, indlæses teamet igen ved hjælp af MAC-adressen på den nye primære adapter. På tilsvarende måde vil ændring af LAA (Locally Administered Address) for teamet bevirke en genindlæsning, og teamet vil få en ny MAC-adresse. Begge disse handlinger bevirker, hvis de udføres for et SFT-team, mens serveren er aktiv i netværket, at teamet bliver ude af stand til at kommunikere, indtil alle netværksenhederne har opdateret deres ARP-tabeller med adresseoplysningerne for den nye primære adapter. Den tid, det varer at opdatere ARP-tabellen, angives af af ARP-cache-timeout-perioden, en parameter, der er tilgængelig i visse routere og operativsystemer. Afhængig af ARP-cache-timeout-perioden kan teamet være utilgængeligt i op til 10 minutter.

NumRxPackets

Definerer antallet af Modtag beskrivere, som er datasegmenter, der sætter adapteren i stand til at tildele hukommelse til modtagne pakker. Hver modtaget pakke kræver én Modtag beskriver, og hver beskriver forbruger 2kb hukommelse.

Du kan også vælge at øge antallet af Modtag beskrivere, hvis du bemærker en væsentlig reduktion af ydelsen ved modtagelse. Hvis modtagelsessydelsen ikke er et problem, skal du bruge standardindstillingen.

Standard: Standard. Når du bruger standardværdien, beregner Intel PROSet II automatisk den bedste værdi for denne indstilling, baseret på teamkonfiguration og hardwarefunktioner.

Anbefales: 250

Interval: 32-512, trin 16

NumTxPackets

Definerer antallet af Beskrivelser for overførsel, som er datasegmenter, der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere Beskrivelser for overførsel.

Du kan vælge at øge antallet af Beskrivelser for overførsel, hvis du opdager, at der er et muligt problem med transmissionshastigheden. Selv om en forøgelse af antallet af Beskrivelser for overførsel kan forbedre transmissionshastigheden, vil Beskrivelser for overførsel bruge systemhukommelse. Hvis transmissionsydelse ikke er et problem, skal du bruge standardindstillingen.

Standard:  Standard. Når du bruger standardværdien, beregner Intel PROSet II automatisk den bedste værdi for denne indstilling, baseret på teamkonfiguration og hardwarefunktioner.

Interval: 16-512, trin 16

Modtagelses-Load Balancing

ALB-team anvender som standard Load Balancing ved al transmissionstrafik. Hertil kommer, at du kan aktivere eller deaktivere Load Balancing ved modtagelse med denne indstilling.

Hvis Load Balancing ved modtagelse er deaktiveret, modtager den primære adapter al trafik.

Hvis Load Balancing ved modtagelse er aktiveret:

•	Den primære adapter modtager ikke-IP-trafik

•	Aktive adaptere med de højeste hastigheder modtager IP-trafik

Hvis der f.eks. er et team bestående af tre adaptere, en gigabit-adapter udpeget som primær adapter og to Intel(R) PRO/100-adaptere:

•	Gigabit-adapteren modtager ikke-IP-trafik, fordi den er den primære adapter.

•	Gigabit-adapteren modtager IP-trafik, fordi den er adapteren med den højeste hastighed.

•	Intel(R) PRO/100-adaptere deltager ikke i Load Balancing ved modtagelse.

Standard: Aktiveret efter startopsætning. Deaktiveret, hvis teamet først oprettes i en anden teamtilstand og derefter ændres til ALB

Interval: Aktiveret/Deaktiveret

Knappen Nulstil standard

Denne knap sætter den aktuelt valgte Avancerede indstilling til indstillingens standardværdi.  Se ovenstående indstillinger angående standardværdier.  (Denne funktion er ikke tilgængelig for alle indstillinger).

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Diagnostik for PRO/100- og PRO/100+ adaptere
Diagnostik for Intel(R) PRO/100-, PRO/100+ og PRO/100 S-adaptere

BEMÆRK: Hvis diagnostikken kører, og du klikker på Stop, vil der være en kort forsinkelse, inden diagnostikken stopper. Når diagnostikken stopper, bliver knappen OK tilgængelig.

Grundlæggende diagnostik

Adapterdiagnosticeringen giver dig mulighed for at teste ét eller flere elementer.

BEMÆRK:  Hvis du computer kører på Windows 98, skal du muligvis deaktivere adapterens strømstyring, før du kører diagnosticeringen. Detaljer derom findes i Procedure til deaktivering af strømstyring.

Kontrolregistre

Tester de registre, som softwaren anvender til at konfigurere og sende kommandoer til 8255x-controlleren.

Hvis kontrolregistertesten mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.

Intel 8255x-controller

Kører indbyggede test i 8255x-controlleren, som bekræfter, at den fungerer korrekt.

Hvis controllertesten mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.

EEPROM

Læser indholdet af EEPROM'en og kontrollerer, at checksummen er korrekt. Herved bruges EEPROM kontrol-/dataregistret, så dette testes.

Hvis EEPROM-testen mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.

Loopback

Tester adapterens evne til at sende og modtage pakker.

Hvis testen Loopback mislykkes, skal du udskifte adapteren og køre testen igen. Hvis testen mislykkes med erstatningsadapteren, kan dette være tegn på, at motherboardet eller en anden enhed på bussen ikke fungerer korrekt.

Link

Kontrollerer netværksforbindelsen og adapterens sende- og modtagefunktioner ved at sende 1000 specielle pakker ud i netværket og hente de samme pakker.

Hvis Link-testen mislykkes, skal du kontrollere, at det er sat rigtigt i adapteren og linkpartneren. Hvis kablet sidder rigtigt i, kan du prøve at sætte kablet i en anden port i linkpartneren eller prøve med et andet kabel.


Avancerede indstillinger til PRO/100+ adaptere
Avancerede indstillinger til Intel(R) PRO/100-adapterfamilien

De indstillinger, der er vist under fanen Avanceret, gør det muligt at tilpasse den måde som adapteren håndterer QoS (Quality of Service) tagging, aflastning og andre funktioner på. Nogle af de avancerede funktioner er muligvis ikke tilgængelige i det operativsystem, du anvender, og de specifikke adaptere, som er installeret.

Avancerede indstillinger

Adaptiv inter-rammeafstand

Kompenserer for overdrevent mange Ethernet-pakkekollisioner dit netværket.  Denne indstilling er som standard indstillet til 0, hvilket deaktiverer funktionen.

Den anbefalede indstilling (1) fungerer bedst for de fleste computere og netværk ved dynamisk tilpasning til netværkets trafikforhold. Denne dynamiske funktion er kun aktiv, når værdien er indstillet til 1. I visse sjældne tilfælde kan du muligvis opnå en bedre ydelse ved manuel indstilling af spacing-værdien. Indstilling af en værdi fremtvinger en statisk afstand mellem pakker.

Forøgelse af værdien øger forsinkelsen mellem de rammer, der transmitteres.

Understøttede adaptere	Alle
Standard	0: deaktiveret
Interval	0-255

Adaptivt link-svar

Gør systemstart hurtigere ved at springe de opstartrutiner over, som kræver netværkstilslutning, når kablet er fjernet fra adapteren. Dette reducerer væsentligt den tid, det tager at starte computeren.

Når Adaptivt link-svar er aktiveret for Intel Ethernet-controllere, og der ikke er forbundet et netværkskabel til RJ-45-porten, deaktiveres netværksforbindelsen. Et gult advarselsikon vises ved siden af netværksforbindelsen i Enhedshåndtering.

Hvis du vil aktivere netværksforbindelsen igen, skal du forbinde netværkskablet til RJ-45-porten og derefter genstarte computeren.

Understøttede adaptere	Kun mobile (cardbus) produkter. Ikke tilgængelig på alle adaptermodeller.
Standard	Fra
Anbefales	Til
Interval	Til, Fra
BEMÆRK: Adaptive Link Response (ALR) fungerer ikke, når en trådløs adapter er aktiv på systemet.

Adaptiv ydelsestuning

Indstiller det antal rammer, som adapteren modtager, inden den udløser et interrupt. Under normal drift genererer adapteren et interrupt, hver gang den modtager en ramme. Reduktion af antallet af interrupts forbedrer CPU-udnyttelsen.

Flyt skydekontrollen til maksimal adapterbåndbredde for at generere ét interrupt pr. ramme. Dette forbedrer adapterbåndbredden, men kan forøge CPU-belastningen, hvorved computeren arbejder langsommere. Flyt skydekontrollen mod maksimal CPU-udnyttelse for at forøge det antal rammer, som adapteren modtager, inden den udløser et interrupt. Dette forbedrer CPU-udnyttelsen, men kan reducere adapterbåndbredden. Standardindstillingen fungerer godt for de fleste computere.

Understøttede adaptere	Alle

Adaptiv teknologi

Aktiverer eller deaktiverer mikrokoden i adapterdriveren. Mikrokoden optimerer ydelsen baseret på operativsystemet.

Lad Adaptiv teknologi være aktiveret for at sikre den bedste ydelse.

Du kan vælge at deaktivere Adaptiv teknologi ved fejlfinding i forbindelse med adapterkompatibilitetsproblemer.  Deaktivering af Adaptiv teknologi deaktiverer også Kontrolblokke for overførsel og Adaptiv performance-justering.

Understøttede adaptere	Alle
Standard	Til
Interval	Til, Fra
Adaptiv transmissionstærskelværdi

Angiver det antal bytes som adapteren gemmer i sin transmissionsbuffer inden den sender. Hvis værdien for Adaptiv overførselstærskel f.eks. er 100, gemmer adapteren 100 bytes (800 bits) i sin buffer, inden den begynder at sende data.

•	En forøgelse af værdien for Adaptiv overførselstærskel reducerer ydelsen ved transmission, men kan give færre underløb.

•	En reduktion af værdien for Adaptiv overførselstærskel forbedrer ydelsen ved transmission, men kan give flere underløb. En reduktion af denne værdi sætter adapteren i stand til at udføre tidlige transmissioner.

Adapteren bruger kun værdien for Adaptiv overførselstærskel som udgangspunkt. Hvis adapteren kan opnå en bedre transmissionsydelse ved hjælp af en lavere værdi, bruger den automatisk en lavere værdi.

Hvis du vil konfigurere adapteren til først at transmittere fulde Ethernet-rammer og derefter justere til den bedste ydelse, skal du indstille denne værdi til 190. Hvis transmissionsydelsen falder væsentligt ved en værdi på 190, skal du indstille grænseværdien til 16 og derefter forøge den trinvis.

Understøttede adaptere	Alle
Standard	200
Anbefales	• Hvis computeren har multiple bus mastering-kort eller høj latenstid, skal denne værdi indstilles til over 200. • Hvis computeren har single bus mastering-kort, skal denne værdi indstilles til 12.
Interval	0-200

Grundlæggende tilslutning til Ingen ressource

Bevarer netværkstilslutningen, selvom systemet ikke har tilstrækkelige ressourcer til at anvende alle de avancerede indstillinger, som f.eks. IPSec- og Stor afsendelse-aflastning. De avancerede funktioner genoptages kun, når du genstarter computeren.

Se i systemloggen for at identificere ressourceproblemer. Systemlogen viser de fejl, der opstår som følge af manglende systemressourcer.

Understøttede adaptere	Alle
Standard	Aktiveret
Anbefalet værdi	Aktiveret
Interval	Aktiveret, Deaktiveret
Sammensmeltningsbuffere

Optimerer transmissionsydelsen ved at tilpasse antallet af samlebuffere, hvilket sætter adapteren i stand til at samle datasegmenter før pakketransmission.

Indstillingen Samlebuffere skal konfigureres til at arbejde med indstillingen Beskrivelser for overførsel. Indstillingen Samlebuffere skal være 30-50% af Beskrivelser for overførsel. Hvis indstillingen Samlebuffere ikke ændres, så den svarer til indstillingen Beskrivelser for overførsel, forbedres transmissionsydelsen muligvis ikke.

Samlebuffere forbedrer transmissionsydelsen væsentligt på Windows NT 4.0-computere. Den forbedrer også transmissionsydelsen på Windows 98- og 2000-computere.

Understøttede adaptere	Alle
Standard	8
Anbefalet værdi	8
Interval	1-32

Aktiver PME

Aktiverer eller deaktiverer vække-funktioner for adapteren i computere, som har ældre implementeringer af APM (Advanced Power Management). Væk på-funktioner sætter adapteren i stand til at forlade standby eller slukket tilstand, når den modtager visse typer pakker, f.eks. ARP-pakker.

•	Deaktivering af denne funktion deaktiverer alle Væk på Indstillinger i computere med ældre implementeringer af strømstyring.

•	Aktivering af denne funktion tillader adapteren at reagere på Væk på-signaler. Hvis du vil konfigurere adapteren til at reagere på bestemte pakketyper, skal du se oplysningerne om Væk på Indstillinger senere i dette emne.

•	Værdien Hardwarestandard tvinger adapteren til at konfigurere Væk på-funktioner baseret på systemhardwaren.

•	Værdien Ingen handling sætter adapteren i stand til at bruge operativsystemets standardværdier.

Hvis du vil deaktivere alle Væk på Indstillinger, skal du deaktivere denne funktion. I modsat fald skal du indstille denne funktion til Ingen handling.

Understøttede adaptere	82559-baserede adaptere. View the Adapter Specifications topic for help identifying your adapter.
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Flow-kontrol

Sætter adaptere i stand til at regulere trafikken mere effektivt.

•	Adaptere generer flow-kontrol-rammer, når deres modtagekøer når en foruddefineret grænseværdi. Generering af flow-kontrol-rammer er et signal til senderen om at sænke transmissionshastigheden.

•	Adaptere reagerer på flow-kontrol-rammer ved at sætte pakketransmissionen i pausetilstand i et tidsrum, som er angivet i flow-kontrol-rammen.

Når adaptere sættes i stand til at justere pakketransmissionshastigheden, hjælper flow-kontrol med at forhindre tab af pakker.

BEMÆRK: Hvis adaptere skal kunne udnytte denne funktion, skal linkpartnerne understøtte flow-kontrol-rammer.

Understøttede adaptere	82540 and 82544-based, transmit and receive. View the Adapter Specifications topic for help identifying your adapter.
Standard	Generere og reagere på flow-kontrol-rammer
Interval	Off, Respond, Generate, Generate & Respond, Hardware Default

Linkbaset login

Aktiverer funktionen Adaptivt link-svar (ALR). På basis af parameteren LinkBasedLoad kontrollerer denne funktion PhyLink-status og returnerer en værdi for succes eller fejl.

Understøttede adaptere	Alle
Standard	Deaktiveret (0)
Interval	Aktiveret, Deaktiveret

Linkhastighed og duplex

Konfigurerer kommunikationsindstillinger for adapteren.

Hvis det skal være muligt at anvende den konfigurerede indstilling, skal linkpartneren også kunne fungere ved den konfigurerede indstilling. Hvis adapteren f.eks. er konfigureret til at anvende 100 Mbps/Fuld duplex, skal linkpartneren også kunne fungere ved 100 Mbps/Fuld duplex. På samme måde skal linkpartneren understøtte autoforhandling, hvis adapteren er konfigureret til at bruge Autogenkend.

Understøttede adaptere	Alle Intel(R) PRO/100-adaptere
Standard	Autogenkend
Anbefalet værdi	Autogenkend
Interval	• Autogenkend - Adapteren forhandler med sin linkpartner for at identificere kompatible indstillinger af hastighed og duplex. • 10 Mbps/Halv duplex - Adapteren gennemtvinger en forbindelse ved 10 Mbps og udfører transmission og modtagelse separat. Når adapteren modtager pakker, kan den ikke sende pakker. Når der sendes pakker, kan der ikke modtages pakker. • 10 Mbps/Fuld duplex - Adapteren gennemtvinger en forbindelse ved 10 Mbps og udfører transmission og modtagelse samtidig. Dette forbedrer adapterens ydelse. Vælg kun denne funktion, hvis du har en fuld duplexomskifter. • 100 Mbps/Halv duplex - Adapteren gennemtvinger en forbindelse ved 100 Mbps og udfører transmission og modtagelse separat. Når adapteren modtager pakker, kan den ikke sende pakker. Når der sendes pakker, kan der ikke modtages pakker. • 100 Mbps/Fuld duplex - Adapteren gennemtvinger en forbindelse ved 100 Mbps og udfører transmission og modtagelse samtidig. Dette forbedrer adapterens ydelse. Vælg kun denne funktion, hvis du har en fuld duplexomskifter.

LAA (Lokalt administreret adresse)

Tilsidesætter MAC-adressen i adapteren. Hvis du vil angive en ny netværksadresse, skal du skrive et 12-cifret hexadecimalt tal i boksen Værdi.

Understøttede adaptere	Alle
Standard	Ingen
Interval	0000 0000 0001 - FFFF FFFF FFFD Undtagelser: • Brug ikke en multicast-adresse (mindst betydende bit i den høje byte = 1).  • Brug ikke udelukkende nuller eller F'er.
BEMÆRK: I et team bruger Intel(R) PROSet II enten:

•	Teamets LAA, hvis teamet har en LAA konfigureret, eller

•	Den primære adapters permanente MAC-adresse, hvis teamet ikke har en LAA konfigureret

Intel PROSet II bruger ikke en adapters LAA, hvis adapteren er den primære adapter i et team, og teamet har en LAA.

Brugere af Windows 98SE:

Hvis du vil bruge standardadressen efter brug af en manuelt tilknyttet adresse, skal du udføre en af disse procedurer:

•	Marker Lokalt administreret adresse under fanen Avanceret i dialogboksen Egenskaber, og ret dens adresse til værdien 0. Klik på OK for at anvende indstillingen.

•	Klik på fanen Avanceret i Intel PROSet II, og klik derefter på Genopret standard, eller slet alle tegn i feltet Værdi. Klik på OK for at anvende indstillingen.

Log Link tilstandshændelse

Denne indstilling bruges til at aktivere/deaktivere logføring af ændringer i link-tilstanden. Hvis den slås til, genererer en link-op eller link-ned hændelse en meddelelse, der vises i loggen med systemhændelser. Administratorerne får vist hændelsesmeddelelsen i loggen med systemhændelser.

De følgende hændelser logføres.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Understøttede adaptere	Alle
Standard	Aktiver
Interval	Aktiver, Deaktiver
Aflastning

Sparer CPU-cyklusser, hvis den indstilles, så den svarer til den type adapter, du bruger.

•	Hvis du anvender sikkerhedsaflastning med en Intel(R) PRO/100 S-adapter, skal du bruge indstillingen IP-sikkerhed.

•	Hvis du ikke anvender sikkerhedsaflastning med en Intel PRO/100 S-adapter, skal du bruge indstillingen Checksum.

•	For alle andre adaptertyper skal du bruge indstillingen Ingen.

Understøttede adaptere	Alle
Understøttede operativsystemer	Windows 98SE, Windows Me, Windows NT, Windows 2000 og Windows XP
Standard	Intel PRO/100 S: IP-sikkerhed: Intel PRO/100 S uden sikkerhed: Checksum
Interval	Ingen, IP-sikkerhed, Checksum (afhængig af adaptertypen er visse funktioner muligvis ikke tilgængelige)
Yderligere oplysninger om Aktiver IPSec finder du i emnet Aktivere IPSec.

PCI-buseffektivitet

Sætter adapteren i stand til enten at bruge den bedste metode til pakketransmission eller konstant gennemtvinge samling af pakker.

•	Når PCI-bussens effektivitet er deaktiveret, bruger adapteren den transmissionsmetode, som giver den bedst mulige ydelse. Hvis samling af pakker giver den bedste transmissionsydelse, samler adapteren automatisk pakker.

•	Når PCI-bussens effektivitet er aktiveret, gennemtvinger adapteren samling af pakker.

Indstil PCI-bussens effektivitet, hvis der ikke er problemer med ydelsen ved pakketransmission. Hvis der er et stort antal underløb, eller hvis PCI-bussen har problemer med ydelsen, skal denne værdi indstilles til aktiveret.

Understøttede adaptere	Alle
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Definition af prioritetsniveau

Konfigurerer prioritetsniveauets afskæringspunkt for QoS-taggede pakker.

Hvis computeren har 802.1p/802.1Q-tagging (QoS) aktiveret, kan du definere de prioritetsniveauer (0-7), som serviceres af prioritetskøer. Intel-adaptere har to prioritetskøer: høj og lav. Pakker med en værdi på 0-3 sendes som standard via Kø med lav prioritet, og pakker med en værdi på 4-7 sendes via Kø med høj prioritet.

Det antal, du angiver for Definition af prioritetsniveau, er afskæringspunktet mellem Kø med høj prioritet og Kø med lav prioritet. Hvis du f.eks. angiver 6, sendes pakker med en værdi på 0-5 via Kø med lav prioritet, og pakker med en værdi på 6-7 sendes via Kø med høj prioritet.

Understøttede adaptere	Alle
Standard	4 • Pakker med værdierne 0-3 sendes til Kø med lav prioritet.  • Pakker med værdierne 4-7 sendes til Kø med høj prioritet.
Interval	0-7

QoS (802.3ac) pakke-tagging

Aktiverer eller deaktiverer IEEE 802.1p/802.1Q-tagging for de prioritetsfiltre, du har opsat via Windows* 2000 eller Prioritetspakke . Du skal indstille denne til Aktiveret, hvis Prioritetspakke-filtre skal fungere korrekt.

Hvis du har tilknyttet filtre ved hjælp af 802.1p/Q-tagging, men denne indstilling er deaktiveret, prioriteres de tilsvarende pakker fortsat ved hjælp af Intel´s Kø med høj prioritet (HPQ)..

Understøttede adaptere	82550-, 82558 og 82559-baserede adaptere. View the Adapter Specifications topic for help identifying your adapter.
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret
Modtag buffere

Angiver det antal buffere, som driveren bruger ved kopiering af data til hukommelsen.

I situationer med høj netværksbelastning vil et øget antal modtag buffere givet forbedret ydelse. Ulempen er, at dette også øger den mængde systemhukommelse, som driveren bruger. I andre situationer kan ændring af denne værdi forringe systemets ydelse.

Understøttede adaptere	Alle
Standard	Standardfunktionerne afhænger af de valgte funktioner.
Anbefalet værdi	• Enkelt adapter under Windows NT: 32 • Enkelt adapter under Windows 98, Windows Me, Windows 2000 og Windows XP: 48 • Adapter i team: 250 • Brug af IPSec og/eller flere funktioner: 350
Interval	8-1024

Retransmitter inter-rammeafstand

Øger forsinkelsen mellem ramme-genafsendelser. Selv om der findes en indbygget Ethernet-algoritme, som adaptere bruger til ramme-genafsendelse efter kollisioner, kan en øget forsinkelse forbedre netværksydelsen, hvis der er et unormalt stort antal kollisioner i netværket.

Understøttede adaptere	Udvalgte adaptere understøtter denne funktion
Standard	6
Interval	6-15

Sikkerhedstilknytninger

Angiver det antal forskellige sikkerhedstilknytningen, der kan overføres til adapterens co-processor. En sikkerhedstilknytning er en kommunikationssession med en anden computer, der kører Intel(R) Packet Protect eller anden IP-sikkerhedssoftware.

Hvis computeren understøtter flere Sikkerhedstilknytninger, end der er angivet som standard, skal denne værdi øges. Bemærk, at forøgelse af antallet af Sikkerhedstilknytninger forøger adapterens forbrug af hukommelse.

Understøttede adaptere	Intel(R) PRO/100 S
Standard	Klient: 64 Server: 1000
Interval	1-5000

Smart strømnedlukning

Sætter adapteren i stand til at reducere strømforbruget, når LAN-kablet er fjernet fra adapteren. Når adapteren igen har en gyldig forbindelse, vender dens strømforbrug tilbage til normal tilstand (fuldt strømforbrug).

Understøttede adaptere	82559-baserede mobile adaptere og nyere
Standard	Aktiveret
Anbefalet værdi	Aktiveret
Interval	Aktiveret, Deaktiveret
Tekniske detaljer

Kontrolblokke for overførsel

Definerer antallet af Kontrolblokke for overførsel, som er datasegmenter der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere kontrolblokke for overførsel.

Du kan også vælge at øge antallet af Kontrolblokke til overførsel, hvis du opdager, at der er et muligt problem med transmissionsydelsen. Selvom en forøgelse af antallet af Kontrolblokke til overførsel kan forbedre transmissionsydelsen, optager Kontrolblokke til overførsel systemhukommelse. Hvis transmissionshastigheden ikke er et problem, skal du bruge den anbefalede værdi på 16.

Understøttede adaptere	Alle
Standard	16 eller 32, afhængig af adapterens krav
Interval	8-64
Væk på Link Change

Vækker computeren, hvis netværksforbindelsen opretter link, mens computeren er i stand by-tilstand. Du kan aktivere denne funktion, deaktivere den eller lade operativsystemet bruge dens standarder.

Understøttede operativsystemer	Windows 9x, Windows 2000, Windows XP
Interval	Deaktiveret, Tvunget, OS-afhængigt
Standard	Deaktiveret
Væk på-indstillinger

Disse indstillinger henviser til funktioner, der er aktiveret af enten operativsystemet eller Intel(R) PROSet II. Disse funktioner opfører sig forskelligt eller understøttes slet ikke, afhængig af din version af Windows.

•	Disse Windows-versions understøtter Væk på-indstillinger: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP 64 bit Edition og Windows XP Professional.

•	Disse Windows-versioner understøtter ikke Væk på Indstillinger:  Windows 98 retail og Windows NT 4.0.

BEMÆRK: Kun Intel(R) PRO/100+ Management og Server-adaptere og Intel(R) PRO/100 S-adaptere understøtter Væk på-indstillinger.

Aktivere Væk på-indstillinger i operativsystemet

De følgende typer Væk på-indstillinger kræver, at Væk på-indstillingerne i operativsystemet er aktiveret:

•	Væk på ARP

•	Væk på Directed Packet

•	Væk på NBT

Hvis adapteren skal reagere på disse typer Væk på-pakker, skal brug af Væk på-indstillingerne i operativsystemet være aktiveret. Hvis du vil aktivere Væk på Indstillinger, skal du gå til Enhedshåndtering og aktivere indstillingen Tillad, at denne enhed sætter computeren ud af standby. Sådan finder du denne indstilling:

1.	Klik på Start > Kontrolpanel.
Vinduet Kontrolpanel åbnes.

2.	Dobbeltklik på System.
Dialogboksen System vises.

3.	Klik på fanen Hardware og klik derefter på Enhedsstyring.
Vinduet Enhedshåndtering åbnes.

4.	Dobbeltklik på den adapter, du vil aktivere Væk på-indstillinger for.
Dialogboksen Egenskaber vises.

5.	Klik på fanen Strømstyring.

6.	Klik på Tillad, at denne enhed sætter computeren ud af standby for at aktivere Væk på-indstillinger for adapteren.

Sådan konfigurerer du Væk på-indstillinger

1.	I Intel PROSet II klikker du på fanen Avanceret.

2.	I listen Indstillinger markerer du Væk på-indstillinger.

3.	I listen Værdi markerer du den relevante Væk på-indstilling.

4.	Klik på OK eller Anvend.

Mulige indstillinger

Disse Væk på-indstillinger findes i Intel PROSet II:

Indstilling	Beskrivelse
Deaktiveret	Adapter vil ikke bruge Væk på-indstillinger.
Væk på Magic Packet	Sætter adapteren i stand til at vågne som svar på modtagelse af en Magic Packet. En Magic Packet er en pakke, der indeholder 16 sammenhængende kopier af den modtagende adapters Ethernet-adresse. Når du konfigurerer denne funktion, tilsidesætter Intel PROSet II operativsystemets værdi for denne funktion.
Væk på Directed Packet	Sætter adapteren i stand til at vågne, når den modtager en Directed Packet, som er en unicast-pakke, der er sendt til adapterens MAC-adresse.  Denne protokol skal aktivere denne vækningsmetode i driveren. Hvis denne funktion fravælges, ignorerer driveren en vilkårlig protokolanmodning til aktivering af denne vækningsmetode.
Væk på Magic og Directed Packet	Aktiverer adapteren, så den vågner, når den modtager en Magic Packet eller en Directed Packet.
OS-styret	Giver operativsystemet komplet kontrol over Væk på-indstillingerne.

BEMÆRK: Hvis flere IP-adresser konfigureres til én adapter, kan operativsystemet anmode om at blive vækket ved ARP-mønstre på alle de konfigurerede adresser. Adapteren vil kun vågne som svar på ARP-pakker, der forespørger om den første IP-adresse på listen.

BEMÆRK: Væk på-indstillinger omfatter ikke muligheden for at vække en maskine fra lukket tilstand (S5). Denne tilstand kontrolleres af Aktiver PME-indstilling, der også findes under fanen Avanceret. Selv hvis Væk på-indstillingerne er deaktiverede, bestemmes muligheden for at blive vækket fra S5 af Aktiver PME-indstilling.

Så længe adapterdriveren er aktiveret, vil PME-indstillingerne fungere. Når driveren er deaktiveret, vender enheden dog tilbage til dens hardwarestandarder, der måske giver computeren mulighed for at vågne fra lukket tilstand.

Se også:

Konfigurere avancerede teaming-indstillinger


Priority Packet-oversigt
Intel(R) Priority Packet-oversigt

Intel(R) Priority Packet er et hjælpeprogram til trafikprioritering, som gør det mulilgt at opsætte filtre til behandling af trafik med høj prioritet før normal trafik. Du kan bruge Intel Priority Packet til at opsætte filtre, der giver kritiske anvendelser højere prioritet.

Intel Priority Packet er et separat hjælpeprogram til Intel(R) PROSet II.

Krav

Understøttede operativsystemer	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 eller nyere
Understøttede adaptere	Intel(R) PRO/100 og PRO/1000-serien af adaptere
Sådan installeres Intel Priority Packet

1.	Sæt adapter-CD’en i CD-ROM-drevet.
Skærmbilledet til automatisk kørsel vises.

2.	Luk skærmbilledet til automatisk kørsel.

3.	Gå til mappen WINDOWS/PRTPKT på Intel CD’en.

4.	Dobbeltklik på setup.exe for at installere Intel Priority Packet.

5.	Følg vejledningen på skærmen for at udføre installationen af Priority Packet.

Efter installationen kan du åbne hjælpeprogrammet ved at klikke på Start > Programmer > Intel(R) Priority Packet II.

Prioritering af netværkstrafik

Intel Priority Packet gør det muligt opsætte filtre for at sende oplysninger fra kritiske noder eller programmer med en angivet prioritet. Ved prioritering af trafikken på værtssystemet eller ved en indgang til netværket kan netværksenheder basere afgørelser om videresendelser på prioriteter, der er defineret i pakken.

Intel Priority Packet prioriterer trafikken baser på filtre - parametre du angiver til anvendelse på udgående (transmitterede) pakker. Hved hjælp af Priority Packet Filter Wizard kan du opsætte foruddefinerede eller tilpassede filtre baseret på en node-adresse (MAC), Ethernet-type eller forskellige egenskaber ved protokollen og porten. Priority Packet indeholder to forskellige metoder til at prioritere trafikken: IEEE 802.1p- og Intel’s Kø med høj prioritet.

IEEE 802.1p-tagging

IEEE 802.1p er en IEEE-standard for pakke-tagging til defination af prioritetsniveauer. Pakker mærkes med fire (4) ekstra byte, hvilket forøger pakkestørrelsen og angiver et prioritetsniveau. Når disse mærkede pakker sendes ud på netværket, overføres pakkerne med højere prioritet først. Mærkning af prioritetspakker (kaldes også Traffic Class Expediting) gør det muligt for adapteren at arbejde med andre elementer i netværket (switche, routere) for at levere prioritetspakker først. 802.1p-tagging giver programmer mulighed for at tilknytte bestemte prioritetsniveauer fra 0 (lav) til 7 (høj).

Når du opsætter et filter i Windows* 2000, XP, eller i Intel Priority Packet, skal du starte Intel PROSet II og aktivere QoS Tagging under fanen Avancerede indstillinger.

BEMÆRK: IEEE 802.1p-tagging forøger pakkestørrelsen for de pakker, der mærkes. Nogle hub’er og switche kan ikke genkende de større pakker og dropper dem. Se i dokumentationen til din hub eller switch for at finde ud af, om de understøtter 802.1p. Hvis disse enheder ikke understøtter 802.1p, eller hvis du ikke er sikker, skal du bruge Kø med høj prioritet til at prioritere netværkstrafikken.

Krav til effektiv brug af IEEE 802.1p-tagging:

•	Alle computere, der modtager og distribuerer 802.1p-tagged pakker, skal understøtte 802.1p.

•	Adaptere, som er installeret på computere, der behandler mærkede pakker, skal understøtte 802.1p. Alle Intel(R) PRO/1000, PRO/100+ og PRO/100 S adaptere understøtter 802.1p. Intel(R) PRO/100B-adaptere gør det ikke.

•	Adapter(e) kan ikke knyttes til et adapter-team.

•	Hvis du opsætter VLAN’er eller packet tagging på den samme adapter, skal 802.1p/802.1Q Tagging være aktiveret under fanen Intel PROSet II Avancerede indstillinger.

•	VLAN’er (802.1Q) og prioritering (802.1p) deler 802.3ac-tag’en. Intel adaptere bruger 802.3ac tag’en, når VLAN’er og/eller QoS tagging er konfigureret på adapteren.

•	Hvis en adapter er konfigureret til VLAN’er, skal switch'en VLAN understøtte den samme type tagging (802.3ac) som adapteren.

•	Hvis en adapter er konfigureret til prioritering, kræver nogle switche en ikke-standard VLAN på switch’en for at tillade passage af tag’en.


Filter

En parameter, der anvendes til en udgående (transmitteret) pakke for at afgøre, om den skal være tagged med IEEE 802.1p eller anbringes is Kø med høj prioritet.


IEEE 802.1p-specification

En IEEE-standard for taggede pakker med forskellige prioritetsniveauer. Når disse pakker sendes ud på netværket, overføres pakkerne med højere prioritet først. Prioritetspakke-tagging sætter adapteren i stand til at arbejde med andre netværksenheder for bedre at kunne levere den generelle ydelse.

IEEE 802.1p-tagging er kun effektiv, når netværksinfrastrukturen (switche og andre distributionsenheder) understøtter det. Hvis din infrastruktur ikke understøtter IEEE 802.1p tagging, eller hvis du ikke er sikker, kan du prioritere trafik vha. Intel´s Kø med høj priioritet.


Kø med høj prioritet

En transmissionskø, som anvendes med Intel(R) Priority Packet. HPQ (High Priority Queue) behandler pakker med høj prioritet.

HPQ er tilgængelig for Intel(R) PRO/100-adaptere, som har 82558-baserede controllere eller nyere. Oplysninger om controllere finder du i tabellen Adapterspecifikationer.

Yderligere oplysninger om HPQ finder du under Intel Priority Packet i online-hjælpen.


Mærkning

Føje yderligere oplysninger til en pakke. Hvis en prioritetspakke anvender IEEE 802.1p tagging, betyder dette tilføjelse af fire ekstra bytes med oplysninger, som angiver pakkens prioritet.


CardBus registreret

Installation af enkelt adapter

Hvis du installerer en enkelt CardBus-adapter, skal du klikke på den model, du vil installere.

BEMÆRK: Hvis du har en Intel(R) PRO/100 CardBus II-adapter (kun LAN) installeret, og du vil installere en Intel(R) PRO/100 LAN+Modem56 CardBus II-adapter, skal du:

1.	Fjerne driverne til kun-LAN-adapteren.

2.	Genstarte computeren.

3.	Geninstallere driverne til LAN+Modem56-adapteren.

Installation af to adaptere

Hvis du vil installere to CardBus-adaptere, og en eller begge er Intel PRO/100 LAN+Modem56 CardBus II-adaptere, skal du klikke på Intel(R) PRO/100 LAN+Modem56 CardBus II.

Hvis begge adaptere er Intel PRO/100 CardBus II-adaptere (kun LAN), skal du klikke Intel(R) PRO/100 CardBus II.

PCI-adaptere

Hvis du vil installere en PCI-adapter (f.eks. på en docking-station), skal du klikke på Intel(R) PRO PCI Adapter.


CardBus-ressourcer
Definere CardBus-ressourcer

Vælg et sæt tilgængelige ressourcer for netværksadapteren og modemet.

Sådan kontrollerer du, at de valgte ressourcer er kompatible med din computer

Start Intel(R) PROSet II ved at dobbeltklikke på ikonet Intel PROSet II i Kontrolpanel.
Intel PROSet II vises.

•	Hvis der ikke er ressourcekonflikter, viser fanen Generelt oplysninger om adapterstatus.

•	Hvis der er en ressourcekonflikt med en anden enhed, viser Intel PROSet II en fejlfindingsfane med instruktioner. Følg disse instruktioner for at vælge forskellige ressourcer.


Jumbo-rammer

Jumbo-rammer er større end standard Ethernet-rammer. Mens standard Ethernet-rammer er ~ 1,5k byte, kan Jumbo-rammer indeholde op til ~16k byte.

I situationer, hvor store pakker udgør hovedparten af trafikken, og yderligere latenstid kan tolereres, kan Jumbo-rammer reducere CPU-belastningen og forbedre kabeleffektiviteten.

BEMÆRKNINGER: Jumbo-rammer understøttes kun ved 1000 Mbps. Brug af Jumbo-rammer ved 10 eller 100 Mbps kan resultere i dårligere ydelse eller tab af forbindelse. Jumbo-rammer er kun effektive for TCP/IP-pakker.

Før du begynder

Skal du kontrollere at:

•	Du har en Intel(R) PRO/1000-adapter installeret ved 1000 Mbps. Intel(R) PRO/100-adaptere understøtter ikke Jumbo-rammer.

•	Systemet kører Windows* 2000, XP eller NT* 4.0.

•	Netværksenhederne understøtter Jumbo-rammer. Ved indstilling af Jumbo-rammer i andre netværksenheder skal du være opmærksom på, at netværksenheder beregner størrelsen af Jumbo-rammer forskelligt. Visse enheder inkluderer header-information i rammestørrelsen, mens andre ikke gør det.

Opsætning af Jumbo-rammer

•	Brug Intel(R) PROSet II til at konfigurere en almindeligt tilgængelig pakkestørrelse.

•	Hvis du vil konfigurere enhver anden pakkestørrele, skal du angive værdien i registreringsdatabasen.

Sådan konfigurerer du Jumbo-rammer i Intel(R) PROSet II

Opsætning af Jumbo-rammer i et netværk er en tretrins proces.

Trin 1: Konfigurer adapteren til at undestøtte Jumbo-rammer:

1.	Åbn Intel(R) PROSet II.

2.	Klik på den adapter, du vil konfigurere med Jumbo-rammer, i Netværkskomponenttræet.

3.	Klik på fanen Avanceret.

4.	Klik på Jumbo-rammer i listen Indstillinger.

5.	Klik på en pakkestørrelse i boksen Værdi.

Adapteren er nu konfigureret til at understøtte Jumbo-rammer:

Trin 2: Konfigurer netværksomskiftere til at understøtte Jumbo-rammer. Se i dokumentationen til omskifteren for at få oplysninger.

Trin 3: Konfigurer servere til at understøtte Jumbo-rammer. Se i dokumentationen til serveren for at få oplysninger.

Sådan konfigurerer du Jumbo-rammer i registreringsdatabasen

Opsætning af Jumbo-rammer i et netværk er en tretrins proces.

Trin 1: Konfigurer adapteren til at undestøtte Jumbo-rammer:

1.	Åbn Registreringseditor. Klik på Start > Kør. Skriv regedit i dialogboksen Åbn.
Registreringseditor åbnes.

2.	Gå til nøglen MaxFrameSize i registreringsdatabasen.

3.	Angiv en værdi mellem 1415 og 16128 for rammestørrelsen.

Adapteren er nu konfigureret til at understøtte Jumbo-rammer:

Trin 2: Konfigurer netværksomskiftere til at understøtte Jumbo-rammer. Se i dokumentationen til omskifteren for at få oplysninger.

Trin 3: Konfigurer servere til at understøtte Jumbo-rammer. Se i dokumentationen til serveren for at få oplysninger.


MiniPCI-adaptere

MiniPCI-adapterne anvendes i bestemte bærbare computere, som kan anvende MiniPCI-størrelsen. Disse adaptere understøtter det samme sæt funktioner som de klientadaptere, der beskrives i denne hjælpefil. Visse MiniPCI-adaptere har også integreret modemhardware, som en del af produktet.

Hvis dit produkt er forsynet med et modem, skal du se i den dokumentation, som fulgte med din computer, angående oplysninger om modemkonfiguration.

Se også:

Avancerede indstillinger til Intel(R) PRO/100+ adaptere


Avancerede indstillinger til PRO/10+ adaptere
Avancerede indstillinger til Intel(R) PRO/10 og PRO/10+ adaptere

De indstillinger, der er vist under fanen Avanceret, gør det muligt at tilpasse den måde, hvorpå adapteren håndterer linkændringer, buffere, aflastning og andre funktioner. Visse af de nedenstående funktioner er muligvis ikke tilgængelige i det operativsystem, du anvender, og i de specifikke adaptere, der er installeret.

Avancerede indstillinger

Adaptiv inter-rammeafstand

Kompenserer for overdrevent mange Ethernet-pakkekollisioner dit netværket. Denne indstilling er som standard indstillet til 0, hvilket deaktiverer funktionen. Den anbefalede indstilling (1) fungerer bedst for de fleste computere ved dynamisk tilpasning til netværkets trafikforhold. Denne dynamiske funktion er kun aktiv, når værdien er indstillet til 1. I visse sjældne tilfælde kan du muligvis opnå en bedre ydelse ved manuel indstilling af spacing-værdien. Indstilling af en værdi fremtvinger en statisk afstand mellem pakker.

Forøgelse af værdien øger forsinkelsen mellem de rammer, der transmitteres.

Understøttede adaptere	Alle
Standard	1
Interval	0-255

Adaptiv teknologi

Aktiverer eller deaktiverer mikrokoden i adapterdriveren. Mikrokoden optimerer ydelsen baseret på operativsystemet.

Lad Adaptiv teknologi være aktiveret for at sikre den bedste ydelse.

Du kan vælge at deaktivere Adaptiv teknologi ved fejlfinding i forbindelse med adapterkompatibilitetsproblemer.  Deaktivering af Adaptiv teknologi deaktiverer også Kontrolblokke for overførsel og Adaptiv performance-justering.

Understøttede adaptere	Alle
Standard	Til
Interval	Til, Fra
Adaptiv transmissionstærskelværdi

Angiver det antal bytes som adapteren gemmer i sin transmissionsbuffer inden den sender. Hvis værdien for Adaptiv overførselstærskel f.eks. er 100, gemmer adapteren 100 bytes (800 bits) i sin buffer, inden den begynder at sende data.

•	En forøgelse af værdien for Adaptiv overførselstærskel reducerer ydelsen ved transmission, men kan give færre underløb.

•	En reduktion af værdien for Adaptiv overførselstærskel forbedrer ydelsen ved transmission, men kan give flere underløb. En reduktion af denne værdi sætter adapteren i stand til at udføre tidlige transmissioner.

Adapteren bruger kun værdien for Adaptiv overførselstærskel som udgangspunkt. Hvis adapteren kan opnå en bedre transmissionsydelse ved hjælp af en lavere værdi, bruger den automatisk en lavere værdi.

Hvis du vil konfigurere adapteren til først at transmittere fulde Ethernet-rammer og derefter justere til den bedste ydelse, skal du indstille denne værdi til 190. Hvis transmissionsydelsen falder væsentligt ved en værdi på 190, skal du indstille grænseværdien til 16 og derefter forøge den trinvis.

Understøttede adaptere	Alle
Standard	12
Anbefales	• Hvis computeren har multiple bus mastering-kort eller høj latenstid, skal denne værdi indstilles til over 200. • Hvis computeren har single bus mastering-kort, skal denne værdi indstilles til 12.
Interval	0-200

Grundlæggende tilslutning til Ingen ressource

Bevarer netværkstilslutningen selv om systemet ikke har tilstrækkelige ressourcer til at anvende alle de avancerede indstillinger. Funktioner som f.eks. IPSec-aflastning og Aflastning ved stor afsendelse genoptages kun, når der er tilstrækkelig mange ressourcer. Fejl, som opstår på grund af manglende systemressourcer, findes i systemloggen.

Understøttede adaptere	Alle
Standard	Fra
Anbefalet værdi	Til
Interval	Til, Fra
Sammensmeltningsbuffere

Optimerer transmissionsydelsen ved at tilpasse antallet af samlebuffere, hvilket sætter adapteren i stand til at samle datasegmenter før pakketransmission.

Indstillingen Samlebuffere skal konfigureres til at arbejde med indstillingen Beskrivelser for overførsel. Indstillingen Samlebuffere skal være 30-50% af Beskrivelser for overførsel. Hvis indstillingen Samlebuffere ikke ændres, så den svarer til indstillingen Beskrivelser for overførsel, forbedres transmissionsydelsen muligvis ikke.

Samlebuffere forbedrer transmissionsydelsen væsentligt på Windows NT 4.0-computere. Den forbedrer også transmissionsydelsen på Windows 98- og 2000-computere.

Understøttede adaptere	Alle
Standard	8
Anbefalet værdi	8
Interval	1-32
Flow-kontrol ved modtagelse

Sætter adapteren i stand til at modtage fuld duplex flow-kontrol-rammer ved at holde pause på transmissionsvejen. Transmissionsvejen sættes i venteposition i det tidsrum, som er angivet i den modtagne flow-kontrolramme. Disse indstillinger hjælper med at finjustere netværksydelsen ved at forhindre tab af pakker.

Understøttede adaptere	Denne funktion er muligvis ikke tilgængelig på hver adaptertype.
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Linkbaset login

Aktiverer funktionen Adaptivt link-svar (ALR). På basis af parameteren LinkBasedLoad kontrollerer denne funktion PhyLink-status og returnerer en værdi for succes eller fejl.

Understøttede adaptere	Alle
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Linkhastighed og duplex

Konfigurerer Intel(R) PRO/10+ adapteren med linkindstillinger.

Understøttede adaptere	Alle
Standard	Autogenkend
Anbefalet værdi	Autogenkend
Interval	• • Autogenkend - Adapteren forhandler med omskifteren om, hvordan pakker skal sendes/modtages (enten fuld eller halv duplex).  BEMÆRK:  Du skal have en omskifter med autoforhandling for at opnå fuld duplexunderstøttelse med indstilingen Link hastighed og duplex indstillet til Autogenkend. • • 10Mbps/Halv duplex - Adapteren bruger 10 Mbps hastighed og udfører en operation ad gangen. Den enten sender eller modtager. • 10Mbps/Fuld duplex - Adapteren bruger 10 Mbps hastighed og sender og modtager pakker samtidig. Dette forbedrer adapterens ydelse. Vælg kun denne funktion, hvis du har en fuld duplexomskifter.

Lokalt administreret adresse

Tilsidesætter MAC-adressen i adapteren. Hvis du vil angive en ny netværksadresse, skal du skrive et 12-cifret hexadecimalt tal i denne boks.

Understøttede adaptere	Alle
Standard	Ingen
Interval	0000 0000 0001 - FFFF FFFF FFFD Undtagelser: • Brug ikke en multicast-adresse (mindst betydende bit i den høje byte = 1).  • Brug ikke udelukkende nuller eller F'er.

PCI-buseffektivitet

Sætter adapteren i stand til enten at bruge den bedste metode til pakketransmission eller konstant gennemtvinge samling af pakker.

•	Når PCI-bussens effektivitet er deaktiveret, bruger adapteren den transmissionsmetode, som giver den bedst mulige ydelse. Hvis samling af pakker giver den bedste transmissionsydelse, samler adapteren automatisk pakker.

•	Når PCI-bussens effektivitet er aktiveret, gennemtvinger adapteren samling af pakker.

Indstil PCI-bussens effektivitet, hvis der ikke er problemer med ydelsen ved pakketransmission. Hvis der er et stort antal underløb, eller hvis PCI-bussen har problemer med ydelsen, skal denne værdi indstilles til aktiveret.

Understøttede adaptere	Alle
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Definition af prioritetsniveau

Definerer prioritetsniveauets afskæringspunkt for QoS-taggede pakker.

Hvis computeren har 802.1p/802.1Q-tagging (QoS) aktiveret, kan du definere de prioritetsniveauer (0-7), som serviceres af prioritetskøer. Intel-adaptere har to prioritetskøer: høj og lav. Pakker med en værdi på 0-3 sendes som standard via Kø med lav prioritet, og pakker med en værdi på 4-7 sendes via Kø med høj prioritet.

Det antal, du angiver for Definition af prioritetsniveau, er afskæringspunktet mellem Kø med høj prioritet og Kø med lav prioritet. Hvis du f.eks. angiver 6, sendes pakker med en værdi på 0-5 via Kø med lav prioritet, og pakker med en værdi på 6-7 sendes via Kø med høj prioritet.

Understøttede adaptere	Alle
Standard	4 • Pakker med værdierne 0-3 sendes til Kø med lav prioritet.  • Pakker med værdierne 4-7 sendes til Kø med høj prioritet.
Interval	0-7

Modtag buffere

Angiver det antal buffere, som driveren bruger ved kopiering af data til protokolhukommelsen.

I situationer med høj netværksbelastning vil et øget antal modtag buffere givet forbedret ydelse. Ulempen er, at dette også øger den mængde systemhukommelse, som driveren bruger. I andre situationer kan ændring af denne værdi forringe systemets ydelse.

Understøttede adaptere	Alle
Standard	48
Anbefalet værdi	• Enkelt adapter under Windows 98, Windows Me, Windows 2000, Windows XP: 48 • Enkelt adapter under Windows NT: 32 • Adapter i team: 250
Interval	8-1024

Retransmitter inter-rammeafstand

Øger forsinkelsen mellem ramme-genafsendelser. Selv om der findes en indbygget Ethernet-algoritme, som adaptere bruger til ramme-genafsendelse efter kollisioner, kan en øget forsinkelse forbedre netværksydelsen, hvis der er et unormalt stort antal kollisioner i netværket.

Understøttede adaptere	Alle
Standard	10
Interval	6-15

Kontrolblokke for overførsel

Definerer antallet af Kontrolblokke for overførsel, som er datasegmenter der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere kontrolblokke for overførsel.

Du kan også vælge at øge antallet af Kontrolblokke til overførsel, hvis du opdager, at der er et muligt problem med transmissionsydelsen. Selvom en forøgelse af antallet af Kontrolblokke til overførsel kan forbedre transmissionsydelsen, optager Kontrolblokke til overførsel systemhukommelse. Hvis transmissionsydelsen ikke er et problem, skal du bruge den anbefalede værdi på 16.

Understøttede adaptere	Alle
Standard	32
Anbefalet værdi	16
Interval	8-64


PRO/1000-linkkonfiguration
Intel(R) PRO/1000-linkkonfiguration (kun for kobbermodeller)

FORSIGTIG:  I næste alle tilfælde skal du lade autoforhandling være aktiveret. Hvis du deaktiverer autoforhandling, skal du sørge for, at linkpartnerindstillingerne passer til adapterindstillingerne. Adapteren fungerer ikke ved 1000 Mbps med autoforhandling deaktiveret.

Sådan indstiller du hastighed og duplex

1.	Klik på Aktiveret eller Deaktiveret for at ændre autoforhandlingsindstillingen.

•	Når autoforhandling er aktiveret, forhandler adapteren hastighed og duplex med sin linkpartner.

•	Når autoforhandling er deaktiveret, tvinges adapteren til at anvende den angivne hastigheds- og duplexindstilling.  Hvis du deaktiverer autoforhandling, skal du sørge for at linkpartneren kan fungere ved den angivne hastighed og duplex. Hvis linkpartneren ikke kan fungere ved den indstilling, som adapteren gennemtvinger, kan der ikke kommunikeres mellem adapteren og linkpartneren.

2.	Hvis autoforhandling er aktiveret, skal du vælge de indstillinger for hastighed og duplex, som er anmeldt til linkpartneren under forhandlingen. Alle indstillinger anmeldes som standard. De mulige indstillinger omfatter:

•	10 Mbps HALV

•	10 Mbps FULD

•	100 Mbps HALV

•	100 Mbps FULD

•	1000 Mbps FULD

BEMÆRK: Ifølge IEEE-specifikationerne kan 1000-baseret T-drift ikke gennemtvinges.  Du kan imidlertid konfigurere adapteren til kun at operere ved 1000 Mbps ved at vælge autoforhandling og derefter kun vælge 1000 Mbps FULD i afsnittet om anmeldte indstillinger.

3.	Hvis autoforhandling er deaktiveret, skal du gennemtvinge hastighed og duplex for adapteren ved at klikke på en af de følgende indstillinger.

•	10 Mbps HALV

•	10 Mbps FULD

•	100 Mbps HALV

•	100 Mbps FULD

Kontrollér, at linkpartneren understøtter den gennemtvungne indstilling for at sikre kommunikationen.

4.	Klik på OK.

5.	Genstart computeren, hvis du bliver anmodet om det.

Adapteren er nu konfigureret med hastigheds- og duplexindstillingen.


Linkpartner

En enhed som en adapter har et link til - f.eks. en anden adapter, en hub, en switch osv.


Visning af netværkskomponenttræ
Netværkskomponenttræ

Netværkskomponenttræet vises i venstre side af Intel(R) PROSet II-vinduet. Klik på adaptere, VLAN’er eller team for at få vist oplysninger om komponenten.


Boot Agent

Denne fane giver dig mulighed for at se de indstillinger, der styrer Boot Agent-softwarens opførsel. Du kan muligvis ændre nogle af indstillingerne i afkrydsningsfeltet Indstilling. Du kan muligvis også bruge denne fane til at opdatere en flash-ROM-enhed med en Boot Agent-softwarefil, hvis IT-administratoren har aktiveret denne funktion.

Mere detaljerede beskrivelser om hver af de mulige konfigurationsindstillinger finder du under:

•	Netværks-bootprotokol

•	Bootrækkefølge

•	Ventetid på opsætningsmenu

•	Vis opsætningsprompt

•	Understøttelse af vækning i ældre operativsystemer

Der findes oplysninger om ændring af konfigurationsindstillinger i Intel® Boot Agent Brugerhåndbog.

BEMÆRKNINGER:

Hvis du ikke kan ændre en konfigurationsindstilling, kan din adapter eller dit system muligvis ikke aktivere den pågældende indstilling.

Oplysningerne i denne Hjælp-fil er kun gyldige for 16-bit PXE 2.0-versionen af Boot Agent. De fleste af de funktioner i Konfigurationsopsætning, som beskrives her, bruges ikke i EFI-miljøet.

Knappen Opdater Boot Agent

Brug denne knap til at installere eller opdatere Intel Boot Agent-softwaren.

BEMÆRKNINGER:

Boot Agent-opdateringen skriver en ny Boot Agent-fil til flash-ROM'en, hvilket midlertidigt kan deaktivere Windows* netværksenhedsdriveren. Du har muligvis ikke behov for at genstarte computeren efter denne operation.

Hvis DOS-installation er nødvendig, skal du se under Installing/Updating in DOS Environments i Intelâ Boot Agent User´s Guide.

Sådan installerer eller opdaterer du Boot Agent-softwaren

BEMÆRK: Når du indlæser en flash-ROM-fil fra Intel´s websted, skal du sørge for at gemme den i en midlertidig mappe eller på et sted, hvor du nemt kan finde den til brug for denne procedure.

1.	Klik på Indstillinger, og klik derefter på Kontrolpanel.
Vinduet Kontrolpanel åbnes.

2.	Dobbeltklik på Intel(R) PROSet II-ikonen.
Intel PROSet II-skærmbilledet vises.

3.	Vælg den adapter, der indeholder den flash-ROM, du vil opdatere, i Netværkskomponenttræet.

4.	Klik på fanen Boot Agent. Hvis fanen ikke vises, skal du opdatere netværksdriveren eller sørge for, at du har Intel PROSet II Version 4.0 eller nyere.

BEMÆRK: Intel PROSet II gør det også muligt at ændre konfigurationsindstillinger for PXE- og RPL-miljøerne. Hvis du vælger en adapter, som fungerer i PXE- eller RPL-miljøer, i enhedslisten under Netværkskomponenter i venstre side af Intel PROSet II-skærmbilledet, kan du muligvis få vist eller ændre de konfigurationsindstillinger, som kan ses i højre side af skærmen. Yderligere oplysninger finder du i Configuring the Boot Agent in a Windows Environment i Intelâ Boot Agent User´s Guide. Visse Flash-ROM'er understøtter ikke alle konfigurationsindstillingerne.

5.	Du kan redigere en indstilling ved at trykke på Ctrl+S. Når du har trykket på Ctrl+S, skifter fanen Boot Agent, så den indeholder en gråtonet (deaktiveret) knap Anvend indstillinger.

6.	Klik på Opdater Boot Agent.
Der åbnes en advarselsdialog med oplysninger om, at netværkskonnektiviteten midlertidigt går tabt, mens Boot-filen opdateres.

7.	Fortsæt opdateringsprocessen ved at klikke på Ja.
Der åbnes en dialogboks, hvori du bliver spurgt, om du vil oprette en sikkerhedskopi af den eksisterende Flash-ROM.

8.	Hvis du vil oprette en sikkerhedskopi af den aktuelle flash-ROM-fil, før opdatering af flash-ROM'en, skal du klikke på Ja. Dialogboksen Gem eksisterende Flash-fil som vises. Fortsæt til trin 10.

9.	Hvis du ikke vil gemme en sikkerhedskopi af den aktuelle flash-ROM-fil, skal du klikke på Nej. Der vises en advarselsdialogboks. Klik på Ja, og fortsæt til trin 11.

10.	Klik på Gem, hvis du vil acceptere standardstien og filnavnet (filnavnet er som standard adapterens entydige MAC-adresse). I modsat fald skal du ændre disse parametre og derefter klikke på Gem.

11.	Klik på Åbn i dialogboksen Åbn fil, hvis den ønskede flash-ROM-fil, du har gemt, vises som standardstien og filnavnet på skærmen. I modsat fald skal du ændre stien og filnavnet og derefter klikke på Åbn.
BEMÆRK: Flash-ROM-filer findes på Intel’s websted.

Opdateringsprocessen kan vare mellem fem og ti sekunder, og procesforløbet vises, mens opdateringen er i gang.


Netværks-bootprotokol

Hvis din Boot Agent ikke understøtter RPL, kan denne indstilling ikke ændres.

Mulige værdier:

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

&Beskrivelse:

Vælg PXE til brug sammen med WfM-kompatible netværksstyresystemer, som f.eks. LANDesk* Management Suite, Windows* 2000 RIS, Windows XP RIS og Linux*.

Vælg RPL til en ældre form for fjernstart, såvel som Novell NetWare* fjernstartløsninger.


Bootrækkefølge

Mulige værdier:

•	Brug bootrækkefølgen i BIOS-opsætningen

•	Prøv først netværk og derefter lokale drev

•	Prøv først lokale drev og derefter netværk

•	Prøv kun netværk

•	Prøv kun lokale drev

&Beskrivelse:

Giver dig mulighed for at angive den rækkefølge, hvori bootenheder vælges ved systemstart. Hvis computeren er forsynet med en BIOS, der understøtter BBS (BIOS Boot Specification) eller giver mulighed for PnP-kompatibelt (Plug and Play) valg af startrækkefølgen i BIOS-opsætningsprogrammet, vil denne indstilling altid være Brug BIOS-opsætningens startrækkefølge, og den kan ikke ændres. I dette tilfælde skal du se i manualen til BIOS-opsætning gældende for din klientcomputer for at opsætte bootindstillingerne.

Hvis klientcomputeren ikke har en BBS- eller PnP-kompatibel BIOS, kan du vælge enhver af de værdier, der er angivet ovenfor, bortset fra Brug BIOS-opsætningens startrækkefølge.


Vis opsætningsspørgsmål

Mulige værdier:

•	Aktiveret - Standardværdi

•	Deaktiveret

&Beskrivelse:

Hvis du vælger Aktiveret, vises Ctrl+S-prompten efter POST, så du kan trykke på Ctrl+S inden for det antal sekunder, som indstillingen Ventetid for opsætningsmenu tillader for visning af menuen Konfigurationsindstillinger.

Hvis du vælger Deaktiveret, er indstillingen Ventetid for opsætningsmenu nul, og Ctrl+S-prompten vises ikke under opstarten. Du kan imidlertid fortsat få vist menuen Konfigurationsindstillinger ved at trykke gentagne gange på Ctrl+S umiddelbart efter POST, indtil menuen vises. Hvis menuen Konfigurationsindstillinger ikke vises efter gentagne tryk på Ctrl+S, skal du genstarte og prøve igen.


Ventetid på opsætningsmenu

Mulige værdier:

•	0 sekunder

•	2 sekunder

•	3 sekunder

•	5 sekunder

&Beskrivelse:

Det antal sekunder, som Boot Agent venter på, at du skal trykke på Ctrl+S for at få vist menuen Konfigurationsindstillinger under systemopstarten.

Hvis du vælger en Setup-menu ventetid på nul og/eller har indstillet Vis opsætningsmeddelelse til Deaktiveret, vises Ctrl+S-opsætningsmeddelelsen ikke under opstarten. Du kan imidlertid fortsat få vist menuen Konfigurationsindstillinger ved at trykke gentagne gange på Ctrl+S umiddelbart efter POST, indtil menuen vises. Hvis menuen Konfigurationsindstillinger ikke vises efter gentagne tryk på Ctrl+S, skal du genstarte og prøve igen.


Understøttelse af vækning i ældre operativsystemer

Denne indstilling vises ikke i menuen Konfigurationsindstillinger ved opstart fra en gigabit-adapter.

Se vejledningen til operativsystemet for at afgøre, om dit operativsystem understøtter fjernvækning, og hvordan du bruger denne funktion.

Mulige værdier:

•	Aktiveret

•	Deaktiveret

&Beskrivelse:

Vælg Aktiveret for at sætte ikke-Windows* operativsystemer (såsom DOS eller NetWare*) i stand til at bruge WfM-adapterens fjernvækningsfunktion.

Vælg Deaktiveret for denne indstilling, når du bruger Windows 2000, XP, Me eller 98SE.


VLAN-liste

Hvis du har konfigureret VLAN’er, vises de i Netværkskomponenttræet:

Når du højreklikker på et VLAN, vises følgende funktioner:

•	Ændre VLAN-egenskaber - Gør det muligt at ændre VLAN-konfiguration.

•	Fjern - Gør det muligt at fjerne VLAN'et.

Se også:

Tilføje et VLAN


Teamvisning

Hvis du har konfigureret adapterteams, vises de i Netværkskomponenttræet:

Når du højreklikker på et team, vises følgende funktioner:

•	Fjern team

•	Skift team-tilstand

•	Tilføj VLAN

•	Aktiver IPSec

•	Aktiver GVRP

Hvis du har konfigureret et team, men det ikke vises i Netværkskomponenttræet, kan det være nødvendigt at lukke Intel(R) PROSet II for at anvende teamopsætningen.


Teamadapterliste

Når du højreklikker på en Teamadapterliste, vises følgende funktioner:

•	Foretrukket primær - Udpeger den valgte adapter som primær transmissionsadapter for teamet. Normalt vil den adapter, du angiver her være adapteren med den højeste båndbredde.

•	Foretrukket sekundær - Udpeger den valgte adapter som reserveadapter for den foretrukne primære adapter.  Denne indstilling er ikke tilgængelig, før du har angivet en foretrukket primær adapter.

•	Fjern fra team - Fjerner den valgte adapter fra teamet.

Se også:

•	Skifte adapterteaming-tilstand

•	Føje en adapter til et eksisterende team

•	Oprette et nyt team

•	Fjerne en adapter fra et team

•	Fjerne et adapterteam

•	Angive en adapter som primær eller sekondæry


Netværkskomponenter
Netværkskomponenttræ

Netværkskomponenttræet viser de netværkskomponenter, der er aktive i dit system. Netværkskomponenterne kan omfatte netværksadaptere, team og VLAN'er.


Medlemsadaptere

Listen Medlemsadaptere indeholder de adaptere, som udgør et team. Klik på en medlemsadapter for at få vist oplysninger om denne adapter.

Se også:

Fjerne en adapter fra et team


Virtuelle LAN'er

Fanen Virtuelle LAN'er i Netværkskomponenttræet viser konfigurerede VLAN'er.

Se også:

Tilføje et VLAN

Skifte VLAN-egenskaber

VLAN-definition

Fjerne et VLAN

Avancerede indstillinger til VLANs

Opsætte GVRP


Fjerne en adapterudgave
Fjerne en adapter

Før du fjerner en adapter fra Intel(R) PROSet II eller fjerner en adapter fra en computer, skal du sørge for, at adapteren ikke er medlem af et team. Hvis adapteren er medlem af et team, skal du først fjerne adapter fra teamet og derefter følge nedenstående retningslinier.

Sådan fjerner du en adapter fra Intel(R) PROSet II

1.	Højreklik på den adapter, du vil fjerne, i Netværkskomponenttræet.

2.	Klik på Fjern.
Der vises en bekræftende dialogboks, som meddeler, at denne adapter IKKE er medlem af et team.

3.	Klik på Ja.

4.	Klik på OK for at lukke Intel PROSet II og anvende ændringerne.

5.	Genstart systemet, hvis du bliver bedt om det.

Intel PROSet II styrer ikke længere adapteren.


Oprette et nyt team

Et team er en gruppe adaptere, der er konfigureret til at forbedre netværksfunktionaliteten, f.eks. failover eller øget transmissionsydelse.

Sådan opretter du et team

1.	Højreklik på en adapter, der ikke indgår i et team i Netværkskomponenttræet.

2.	Klik på Føj til team, og klik derefter på Opret nyt team.
Teaming-guiden vises.

3.	Vælg den type team, du vil oprette, og klik på Næste. Valgmulighederne er:

•	Adapterfejltolerance

•	Fejltolerance for omskifter

•	Adaptiv Load Balancing

•	Link Aggregation (Dynamic_3ad* / GEC / LA / 802.3ad statisk tilstand)

4.	Hvis du opretter et ABL-team, kan du vælge enten at aktivere eller deaktivere RLB (Receive Load Balancing).

•	Hvis du aktiverer RLB, modtager teammedlemmer, der kan udnytte den højeste hastighed, IP-trafik, og den primære adapter modtager ikke-IP-trafik.
BEMÆRK: Med RLB aktiveret vælger Intel(R) PROSet automatisk en foretrukket primær adapter. Intel PROSet II’s valg af en foretrukket primær adapter er ikke baseret på adaptermodellen eller -hastigheden.

•	Hvis du deaktiverer RLB, modtager kun den primære adapter trafik.

5.	Listen indeholder alle de adaptere, som ikke er en del af et team. Klik i listen på de adaptere, du vil medtage i dette team, og klik derefter på Næste.

6.	Klik på Afslut.

7.	Hvis du ønsker det, kan du angive en adapter i teamet som den primære adapter. Du kan angive en primær adapter ved at højreklikke på den adapter, du vil bruge som primær adapter, og derefter klikke på Foretrukket primær.
Hvis du vælger ikke at valge en primær adapter, vælger Intel PROSet II en foretrukket primær adapter.

8.	Klik på Luk for at lukke Intel PROSet II og anvende ændringerne.

Teamet er nu konfigureret.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Føje en adapter til et eksisterende team

Du kan føje en adapter til et eksisterende team når som helst.

BEMÆRK:  I Dynamic 802.3ad-teams kan ændring af konfigurationen midlertidigt afbryde trafikstrømmen, mens omskifteren genberegner linksamlerne.

Sådan føjer du en adapter til et eksisterende team i Intel(R) PROSet II

1.	Højreklik på Teamvisning i Netværkskomponenttræet.

2.	Klik på Tilføj adapter til team, og vælg derefter den adapter, du vil tilføje.

Adapteren er nu en del af teamet.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel(R) PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Tilføje et VLAN
Oprette et VLAN

Et VLAN er en logisk gruppe adaptere, som er konfigureret til at forbedre netværkssikkerheden og reducere størrelsen af udsendelsesdomæner.

Sådan opretter du et VLAN

1.	Højreklik på Teamvisning eller Visning af adaptere, der ikke er i team i Netværkskomponenttræet.

2.	Klik på Tilføj VLAN.
Dialogboksen Tilføj nyt VLAN åbnes.

3.	I feltet VLAN-ID skal du skrive nummeret på det VLAN, der er knyttet til adapteren.  VLAN-ID’et skal være det VLAN-ID, som er konfigureret på omskifteren.
BEMÆRK: VLAN-numrene 0 og 1 er ofte reserverede. Se i dokumentationen til omskifteren for at få oplysninger.

4.	Skriv et navn til VLAN’et i feltet VLAN-navn, f.eks. Marketing eller Teknik. Navnet behøver ikke at være det samme som navnet på andre netværksenheder. Det er kun beregnet til identifikation.

5.	Klik på OK.

Adapteren er nu konfigureret til at være VLAN-medlem. Når du har opsat adapteren til at være et VLAN-medlem, skal du sørge for, at gøre VLAN-konfigureringen færdig ved af opsætte de andre netværksenheder med relevante VLAN-oplysninger.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel(R) PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Fjerne et VLAN

Når du fjerner VLAN'er, skal du bruge Intel(R) PROSet II. Fjernelse eller deaktivering af VLAN'er via Netværkspanel i operativsystemet kan muligvis påvirke systemets stabilitet og adapterkonfiguration.

Sådan fjerner du et VLAN fra et team eller en adapter

1.	Højreklik på en VLAN-liste i Netværkskomponenttræet.

2.	Klik på Fjern VLAN.

VLAN'et er fjernet fra teamet eller adapteren.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Fjerne et adapterteam

Når du fjerner team, skal du sørge for at bruge hjælpeprogrammet Intel(R) PROSet II. Fjernelse eller deaktivering af teams via Netværkspanel i operativsystemet kan muligvis påvirke systemets stabilitet og adapterkonfigurationen.

Sådan fjerner du en hel adapter fra et team

1.	Højreklik på Teamvisning i Netværkskomponenttræet.

2.	Klik på Fjern.

3.	Der vises en bekræftende meddelelse.  Klik på Ja.

Teamet er nu fjernet. Adaptere fortsætter med at fungere som separate enheder.

BEMÆRK: Hvis du har oprettet VLAN'er eller prioritetspakkefiltre for teamet, fjernes disse sammen med teamet.  Hvis du har oprettet VLAN'er eller prioritetspakkefiltre for en adapter, før den blev medlem af et team, går disse tabt, når teamet fjernes.


Skifte adapterteaming-tilstand
Skifte teaming-tilstand

Sådan ændrer du teamtilstand for et team

1.	Højreklik på Teamvisning i Netværkskomponenttræet.

2.	Klik på Skift teamtilstand, og klik derefter på én af følgende:

•	Adapterfejltolerance

•	Fejltolerance for omskifter

•	Adaptiv Load Balancing
Når du ændrer teamtilstanden til ALB, deaktiveres Load Balancing ved modtagelse som standard. Hvis du vil aktivere Load Balancing ved modtagelse, skal du ændre teamtilstanden og derefter aktivere load balancing ved modtagelse under fanen Avanceret Teaming.

•	Link Aggregation (Dynamic_3ad* / GEC / LA / 802.3ad statisk tilstand)

Teamtilstanden er nu ændret.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel(R) PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Fjerne en adapter fra et team

Du kan fjerne en adapter fra et eksisterende team når som helst.

BEMÆRK:  I Dynamic 802.3ad-teams kan ændring af konfigurationen midlertidigt afbryde trafikstrømmen, mens omskifteren genberegner linksamlerne.

Sådan fjerner du en adapter fra et team

1.	Højreklik på Team i Netværkskomponenttræet.

2.	Klik på Fjern fra team.

3.	Klik på OK for at anvende ændringen.

Adapteren er nu ikke mere en del af teamet.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel(R) PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Skift VLAN-egenskaber
Skifte VLAN-egenskaber

Du kan omkonfigurere adapteren til at være et medlem af et andet VLAN ved at ændre VLAN-ID’et. Ændring af det VLAN-ID, der er knyttet til adapteren, fjerner adapteren fra det eksisterende VLAN, så den ikke kan kommunikere med det eksisterende VLAN.

Hvis du f.eks. ændrer VLAN-ID'et fra 7 til 9, kommunikerer computeren ikke længere med computerne på VLAN 7. I stedet kommunikerer den med computerne på VLAN 9.

Sådan ændrer du VLAN-konfigurationen

1.	Højreklik på VLAN i Netværkskomponenttræet.

2.	Klik på Skifte VLAN-egenskaber.

3.	I feltet VLAN-ID skal du skrive nummeret på det VLAN, der er knyttet til adapteren.  VLAN-ID’et skal være det VLAN-ID, som er konfigureret på omskifteren.
BEMÆRK: VLAN-numrene 0 og 1 er ofte reserverede. Se i dokumentationen til omskifteren for at få oplysninger.

4.	Skriv et navn til VLAN’et i feltet VLAN-navn, f.eks. Marketing eller Teknik. VLAN-navnet er kun informativt og behøver ikke at være det samme som navnet på det VLAN-navn, der er konfigureret for andre netværksenheder.

5.	Klik på OK for at lukke Intel(R) PROSet II.

VLAN-konfigurationen er nu opdateret.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel(R) PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.

Se også:

Aktiver GVRP

Avancerede indstillinger til VLANs


Angive en adapter som primær eller sekundær

I hvert team er der en primær adapter og en eller flere sekundære adaptere.

Du kan enten vælge manuelt at vælge den primære adapter eller lade Intel(R) PROSet II vælge den primære adapter.

•	Hvis du vælger en primær adapter, bliver den valgte adapter den foretrukne primære adapter. Den foretrukne primære adapter transmitterer og modtager trafik, så længe den har en aktiv status. Hvis der opstår en fejl i den foretrukne primære adapter, men denne senere igen får en aktiv status, overgår kontrollen automatisk til den foretrukne primære adapter igen.

Hvis du f.eks. har en server med en Intel(R) PRO/1000 Gigabit-adapter som primær adapter og en Intel(R) PRO/100+ eller PRO/100 S-adapter som sekundær adapter, vil det være bedst at gøre Intel PRO/1000 Gigabit-adapteren til den foretrukne primære adapter. I dette scenarie tager Intel PRO/100+ eller PRO/100 S over, hvis der opstår fejl på Intel PRO/1000-adapteren. Når Intel PRO/1000-adapter genisættes, genoptager den automatisk rollen som primær adapter i teamet.

Hvis du manuelt vælger en primær adapter, er der altid en Foretrukket primær adapter i teamet.

•	Hvis du ikke har indstillet en adapter som primær, vælger Intel PROSet II den bedste adapter, baseret på adaptermodellen og hastigheden. Dette betyder, at selv om der er en primær adapter, er der ingen foretrukket primær adapter. Når der ikke er en foretrukket primær adapter, kan Intel PROSet II vælge en alternativ primær adapter, hvis der opstår fejl på den primære adapter.

Hvis der f.eks. opstår fejl på den primære adapter, en Intel(R) PRO/1000 Gigabit-adapter, kan Intel PROSet II udpege en anden adapter i teamet til at fungere som primær adapter.  Hvis Intel(R) PRO/1000-adapteren genoptager en aktiv status, deltager den igen i teamet som et medlem og ikke som den primære adapter.

Sådan indstiller du en adapter som primær eller sekundær adapter

1.	Højreklik på Teamadapterliste i Netværkskomponenttræet.

2.	Klik på Foretrukket primær eller Foretrukket sekundær.

Adapteren har nu konfigureret status.

Sådan ændrer du adapterprioritetstatus

Ved hjælp af den samme procedure, som angivet ovenfor, kan du også ændre prioriteten for en adapter.

STP- og SFT-teams:  Hvis du ændrer, hvilken adapter der er den primære (aktive) adapter i et team, indlæses teamet igen ved hjælp af MAC-adressen på den nye primære adapter. På tilsvarende måde vil ændring af LAA (Locally Administered Address) for teamet bevirke en genindlæsning, og teamet vil få en ny MAC-adresse. Begge disse handlinger bevirker, hvis de udføres for et SFT-team, mens serveren er aktiv i netværket, at teamet bliver ude af stand til at kommunikere, indtil alle netværksenhederne har opdateret deres ARP-tabeller med adresseoplysningerne for den nye primære adapter. Den tid, det varer at opdatere ARP-tabellen, angives af af ARP-cache-timeout-perioden, en parameter, der er tilgængelig i visse routere og operativsystemer. Afhængig af ARP-cache-timeout-perioden kan teamet være utilgængeligt i op til 10 minutter.

BEMÆRK: Indstillingen Foretrukket sekundær er ikke tilgængelig, før du har angivet en Foretrukket primær.


PROSet-bakkeikon
Intel(R) PROSet II-bakkeikon

Når du har installeret Intel(R) PROSet II, vises et Intel PROSet-bakkeikon på proceslinjen nær ved uret.

Når du højreklikker på ikonet, vises følgende:

Kommando	Beskrivelse
Start Intel(R) PROSet II	Viser hjælpeprogrammet Intel PROSet II.
Viser status for	Viser navnene på de installerede trådløse adaptere.
Skjul bakkeikonet	Skjuler bakkeikonet på proceslinjen.   Sådan får du vist bakkeikonet på proceslinjen igen: Klik på Vis bakkeikonet under fanen Generelt i Intel PROSet II.
Afslut	Lukker Intel PROSet II og fjerner midlertidigt bakkeikonet fra proceslinjen.  Selvom ikonet ikke er synligt på proceslinjen, kan du starte Intel PROSet II ved at dobbeltklikke på Intel PROSet-ikonet II i kontrolpanelet. Når computeren genstartes, vises Intel PROSet II-bakkeikonet på proceslinjen.
Afslut og Start ikke ved opstart	Fjerner Intel PROSet II-bakkeikonet og forhindrer, at det vises, når computeren genstartes. Sådan genoprettes bakkeikonet efter valg af denne indstilling:  1. Klik på Start > Kør. 2. Skriv PROMON i feltet Åbn, og klik derefter på OK.   Intel PROSet II-bakkeikonet forbliver på proceslinjen, indtil computeren genstartes. Se Start bakkeikonet ved opstart nedenfor, hvis du vil have bakkeikonet vist permanent.
Start bakkeikon ved opstart	Konfigurerer Intel PROSet II-bakkeikonet, så det vises på proceslinjen. Denne indstilling sikrer, at bakkeikonet er synligt, når computeren genstartes. BEMÆRK: Denne indstilling er kun tilgængelig, Hvis du har brugt indstillingen Afslut og Start ikke ved opstart.


Tekniske oplysninger om Smart strømlukning
Oplysninger om Smart strømlukning

Smart strømlukning (SPD) er en metode til strømbesparelse, der anvendes af Intel 82558, 82559 og 82550-baserede adaptere til at minimere strømforbruget, når der ikke er et gyldigt link. SPD sætter adaptere i stand til at gå i dyb hviletilstand, hvilket sparer op til 150% mere strøm. SPD aktiveres når:

•	Adapteren ikke har et gyldigt link

•	Operativsystemet er i tilstanden Pause

I begge scenarier sætter operativsystemet adapteren i hviletilstand, hvis Smart strømstyring er aktiveret, hvorved det generelle strømforbrug reduceres. Normalt strømforbrug og adapteraktivitet genoptages, når adapteren har et gyldigt link, eller når operativsystemet forlader tilstanden Pause.


Meddelelse om at installationen af enheden ikke fjernes

Hvis du prøver at fjerne en Adapterteamliste eller VLAN-liste ved hjælp af Enhedshåndtering, modtager du følgende meddelelse: "Installationen af enheden kunne ikke fjernes. Enheden kan være nødvendig for at starte computeren."

Denne meddelelse betyder, at du ikke kan bruge Enhedshåndtering til at fjerne en virtuel adapter, der er oprettet af Intel(R) PROSet II.  Hvis du vil fjerne adaptere fra Enhedshåndtering, skal du bruge Intel PROSet II.

Se også:

Fjerne et adapterteam

Fjerne et VLAN

Aktiver GVRP


Avancerede indstillinger til VLAN'er

Sådan tilpasser du avancerede VLAN-indstillinger

1.	Klik på en VLAN-liste i Netværkskomponenttræet. .

2.	Klik på fanen Avanceret.

3.	Klik på NumTxPackets i rullelisten, og skriv derefter den nye værdi.
NumRxPackets definerer antallet af Modtag beskrivere, som er datasegmenter, der sætter adapteren i stand til at tildele hukommelse til modtagne pakker. Hver modtaget pakke kræver én Modtag beskriver, og hver beskriver forbruger 2kb hukommelse.

Du kan også vælge at øge antallet af Modtag beskrivere, hvis du bemærker en væsentlig reduktion af ydelsen ved modtagelse. Hvis modtagelsessydelsen ikke er et problem, skal du bruge standardindstillingen.

Forsigtig: Ændring af denne værdi kan forringe systemets ydelse.

4.	Klik på NumTxPackets i rullelisten, og skriv derefter den nye værdi.

NumTxPackets definerer antallet af Beskrivelser for overførsel, som er datasegmenter, der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere Beskrivelser for overførsel.

Du kan vælge at øge antallet af Beskrivelser for overførsel, hvis du opdager, at der er et muligt problem med transmissionshastigheden. Selv om en forøgelse af antallet af Beskrivelser for overførsel kan forbedre transmissionshastigheden, vil Beskrivelser for overførsel bruge systemhukommelse. Hvis transmissionsydelse ikke er et problem, skal du bruge standardindstillingen.

Forsigtig: Ændring af denne værdi kan forringe systemets ydelse.

5.	Klik på OK.

6.	VLAN’et har nu tilpassede indstillinger.

VLAN’et er nu tilpasset.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel(R) PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Aktiver IPSec

IP Security (IPSec) er et sæt standarder, der er udviklet  af Internet Engineering Task Force (IETF), som beskytter IP-kommunikation ved at verificere, at datapakker ikke ændres under overførsel. Yderligere oplysninger om IP-sikkerhed finder du på Intel’s supportwebsted. http://support.intel.com eller, du kan se i Packet Protect User Guide, hvis du har Intel(R) Packet Protect.

Krav

Du kan aktivere eller deaktivere IP-sikkerhed i Intel(R) PROSet II, hvis:

•	Du anvender et af følgende operativsystemer:

•	Windows* 98

•	Windows NT* 4.0, SP5 eller nyere

•	Windows Me

•	Du anvender en Intel® PRO/100 adapter

Hvis du anvender Windows 2000 eller Windows XP, er IP-sikkerhed tilgængelig som et snap-in-modul i Microsoft Management Console. I operativsystemdokumentationen finder du yderligere oplysninger om IPSec-implementering i Windows 2000 eller XP.

Aktivere IPSec

1.	Højreklik på Teamvisning eller Visning af adaptere, der ikke er i team i Netværkskomponenttræet, og vælg derefter Aktiver IPSec.

2.	Genstart computeren.

3.	Installer programmet Intel(R) Packet Protect.
BEMÆRK:  For at kunne installere Packet Protect skal du vælge indstillingen Aktiver IPSec for mindst én adapter eller team af adaptere forud for installationen af Packet Protect.

IPSec er nu aktiveret.

Deaktivere IPSec

Højreklik på Teamvisning eller Visning af adaptere, der ikke er i team i Netværkskomponenttræet, og fjern derefter markeringen af Aktiver IPSec.

Aflastning af kryptering for Intel(R) PRO/100 S adaptere

Intel(R) PRO/100 S serien af adaptere kan aflastes for krypteringen af IP-sikkerhedstransaktioner. Ved håndtering af krypteringen reducerer adapterne CPU-belastningen. Sådan aktiveres aflastningen:

1.	Aktiver IP-sikkerhed ved enten at anvende Intel Packet Protect, hvis computeren kører Windows 2000 eller XP, ved at anvende Microsoft Management Console.

2.	I Intel PROSet II skal du vælge Intel PRO/100 S adapteren i det netværkskomponenttræ, du ønsker skal håndtere IP-sikkerhedskrypteringen.

3.	Klik på fanen Avanceret.

4.	Klik på Aflastning i listen Indstillinger.

5.	Marker IP-sikkerhed i boksen Værdi.

6.	Klik på OK.

Adapteren er nu konfigureret til at at aflaste CPU’er for kryptering.


GVRP-understøttelse

Arbejdsstationer og omskiftere bruger GVRP (GARP VLAN Registration Protocol) til dynamisk at oprette, ændre og fjerne VLAN'er. GVRP-aktiverede omskiftere kan identificere omskifterporten på VLAN-medlemmer og registrere VLAN-status.

Krav

Hvis GVRP skal kunne understøttes i netværket, skal adaptere og omskiftere være GVRP-aktiverede.

Sådan aktiverer du GVRP i en adapter

1.	Højreklik på en Teamadapterliste i Netværkskomponenttræet med mindst ét VLAN.

2.	Klik på GVRP Support.
Dialogboksen GVRP Support åbnes.

3.	Klik på Aktiveret.

4.	I rullelisten GVRP-Join-tid skal du skrive antallet af millisekunder mellem omskifterkommandoen GVRP LEAVE og kommandoen PROSet II GVRP Join. Intel(R) PROSet II starter som stadard en Join-kommando 200 ms efter en Leave-kommando.

5.	Klik på OK.

Adapteren er nu GVRP-aktiveret.

Fejlfinding

Da der er forskellige implementeringer af GVRP, garanterer aktivering af GVRP i adapteren ikke GVRP-kompatibilitet mellem netværksenheder. Hvis GVRP ikke ser ud til at fungere, skal du deaktivere GVRP i adapteren.

BEMÆRK:  Når du foretager flere ændringer af teams eller VLAN'er i Intel PROSet II, anbefales det, at du lukker Intel PROSet II ved afslutningen af hver ændring for at aktivere ændringen.  Derefter kan du genåbne Intel PROSet II og foretage den næste ændring.


Windows NT 4.0 Service Packs
Windows NT* 4.0 Service Packs

Hvis du vil anvende Intel(R) PROSet II og de mest avancerede teamfunktioner, skal du installation af Windows NT 4.0 opdateres til service pack 6a eller nyere.

Oplysninger om Microsoft service pack finder du på http://www.microsoft.com/ntserver/, hvorfra du kan hente en service pack og instruktioner.


Avancerede indstillinger til PRO/1000 Desktop-adaptere

BEMÆRK:  Aftal det med netværksadministratoren, før du foretager ændringer af disse indstillinger. Konfigurering af avancerede indstillinger på en måde, der ikke er kompatibel med andre netværksenheder, kan have en negativ indvirkning på adapteren eller systemydelsen.

Adaptiv inter-rammeafstand

Kompenserer for overdrevent mange Ethernet-pakkekollisioner dit netværket.

Understøttede adaptere	Alle
Standard	aktiveret

Adaptivt link-svar

Gør systemstart hurtigere ved at springe de opstartrutiner over, som kræver netværkstilslutning, når kablet er fjernet fra adapteren. Dette reducerer væsentligt den tid, det tager at starte computeren.

Når Adaptivt link-svar er aktiveret for Intel Ethernet-controllere, og der ikke er forbundet et netværkskabel til RJ-45-porten, deaktiveres netværksforbindelsen. Et gult advarselsikon vises ved siden af netværksforbindelsen i Enhedshåndtering.

Hvis du vil aktivere netværksforbindelsen igen, skal du forbinde netværkskablet til RJ-45-porten og derefter genstarte computeren.

Understøttede adaptere	Ikke tilgængelig på alle adaptermodeller.
Standard	Fra
Anbefales	Til
Interval	Til, Fra
BEMÆRK: Adaptive Link Response (ALR) fungerer ikke, når en trådløs adapter er aktiv på systemet.

Sammensmeltningsbuffere

Optimerer transmissionsydelsen ved at tilpasse antallet af samlebuffere, hvilket sætter adapteren i stand til at samle datasegmenter før pakketransmission.

Indstillingen Samlebuffere skal konfigureres til at arbejde med indstillingen Beskrivelser for overførsel. Indstillingen Samlebuffere skal være 30-50% af Beskrivelser for overførsel. Hvis indstillingen Samlebuffere ikke ændres, så den svarer til indstillingen Beskrivelser for overførsel, forbedres transmissionsydelsen muligvis ikke.

Samlebuffere forbedrer transmissionsydelsen væsentligt på Windows NT 4.0-computere. Den forbedrer også transmissionsydelsen på Windows 98- og 2000-computere.

Understøttede operativsystemer	Windows NT 4.0, 98, 2000, XP
Understøttede adaptere	Alle
Standard	128
Interval	16-768
Aktiver PME

Aktiverer eller deaktiverer vække-funktioner for adapteren i computere, som har ældre implementeringer af APM (Advanced Power Management). Væk på-funktioner sætter adapteren i stand til at forlade standby eller slukket tilstand, når den modtager visse typer pakker, f.eks. ARP-pakker.

•	Deaktivering af denne funktion deaktiverer alle Væk på Indstillinger i computere med ældre implementeringer af strømstyring.

•	Aktivering af denne funktion tillader adapteren at reagere på Væk på-signaler. Hvis du vil konfigurere adapteren til at reagere på bestemte pakketyper, skal du se oplysningerne om Væk på Indstillinger senere i dette emne.

•	Værdien Hardwarestandard tvinger adapteren til at konfigurere Væk på-funktioner baseret på systemhardwaren.

•	Værdien Ingen handling sætter adapteren i stand til at bruge operativsystemets standardværdier.

Hvis du vil deaktivere alle Væk på Indstillinger, skal du deaktivere denne funktion. I modsat fald skal du indstille denne funktion til Ingen handling.

Understøttede adaptere	82559-baserede adaptere. View the Adapter Specifications topic for help identifying your adapter.
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret
Hurtig transmissionsafslutning

Optimerer transmissionsydelsen ved at frigøre Beskrivelser for overførsel til genbrug, før pakkerne sendes ud på netværket.

•	Med Hurtig transmissionsafslutning deaktiveret skal adapteren vente, indtil pakkerne er sendt, inden Beskrivelser for overførsel kan genbruges.

•	Med Hurtig transmissionsafslutning aktiveret, genbruger adapteren Beskrivelser for overførsel hurtigere, så adapteren kan forbedre transmissionsydelsen.

Understøttede adaptere	82544-baseret. View the Adapter Specifications topic for help identifying your adapter.
Standard	Til
Interval	Til, Fra
Flow-kontrol

Sætter adaptere i stand til at regulere trafikken mere effektivt.

•	Adaptere generer flow-kontrol-rammer, når deres modtagekøer når en foruddefineret grænseværdi. Generering af flow-kontrol-rammer er et signal til senderen om at sænke transmissionshastigheden.

•	Adaptere reagerer på flow-kontrol-rammer ved at sætte pakketransmissionen i pausetilstand i et tidsrum, som er angivet i flow-kontrol-rammen.

Når adaptere sættes i stand til at justere pakketransmission, hjælper flow-kontrol med at forhindre tab af pakker.

BEMÆRK: Hvis adaptere skal kunne udnytte denne funktion, skal linkpartnerne understøtte flow-kontrol-rammer.

Understøttede adaptere	82540- og 82544-baserede, transmission og modtagelse. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Generere og reagere på flow-kontrol-rammer
Interval	• Fra, Svar, Generer, Generer og svar, Hardwarestandard

Jumbo-rammer

BEMÆRK: Jumbo-rammer understøttes kun ved 1000 Mbps. Brug af Jumbo-rammer ved 10 eller 100 Mbps kan resultere i dårligere ydelse eller tab af forbindelse.

Aktiverer eller deaktiverer funktionen Jumbo-rammer. Jumbo-rammer kan forøge ydelsen og reducere CPU-belastningen ved at anbringe flere data i hver ramme, hvorved der sendes færre rammer. Standard Ethernet-rammestørrelsen er 1514 byte, mens Jumbo-rammer kan indeholde 4088, 9014 eller 16128 byte.

Aktivér kun Jumbo-rammer, hvis enhederne i netværket understøtter dem og er konfigureret til at bruge den samme rammestørrelse. Ved indstilling af Jumbo-rammer i andre netværksenheder skal du være opmærksom på, at netværksenheder beregner størrelsen af Jumbo-rammer forskelligt. Visse enheder inkluderer header-information i rammestørrelsen, mens andre ikke gør det. Intel-adaptere inkluderer ikke header-information i rammestørrelsen.

Yderligere oplysninger finder du i emnet Jumbo-rammer.

Understøttede adaptere	Alle
Standard	Deaktiveret
Interval	Deaktiveret (1514), 4088, 9014 og 16128. (Indstiller omskifteren 4 bytes højere til CRC, plus 4 bytes, hvis der anvendes VLAN'er eller QoS pakke-tagging).  BEMÆRK: Enhver værdi i intervallet (1514-16128) kan indstilles i Windows registreringsdatabasenøglen MaxFrameSize.
Lokalt administreret adresse

Tilsidesætter MAC-adressen i adapteren. Hvis du vil angive en ny netværksadresse, skal du skrive et 12-cifret hexadecimalt tal i boksen Værdi.

Understøttede adaptere	Alle
Standard	Ingen
Interval	0000 0000 0001 - FFFF FFFF FFFD Undtagelser: • Brug ikke en multicast-adresse (mindst betydende bit i den høje byte = 1).  • Brug ikke udelukkende nuller eller F'er. Indstillingen Ikke til stede: vender tilbage til adapterens oprindelige netværksadresse.
Brugere af Windows 98SE:

Hvis du vil bruge standardadressen efter brug af en manuelt tilknyttet adresse, skal du udføre en af disse procedurer:

•	Marker Lokalt administreret adresse under fanen Avanceret i dialogboksen Egenskaber, og ret dens adresse til værdien 0. Klik på OK for at anvende indstillingen.

•	Klik på fanen Avanceret i Intel PROSet II, og klik derefter på Genopret standard, eller slet alle tegn i feltet Værdi. Klik på OK for at anvende indstillingen.

Log Link tilstandshændelse

Denne indstilling bruges til at aktivere/deaktivere logføring af ændringer i link-tilstanden. Hvis den slås til, genererer en link-op eller link-ned hændelse en meddelelse, der vises i loggen med systemhændelser. Administratorerne får vist hændelsesmeddelelsen i loggen med systemhændelser.

De følgende hændelser logføres.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Understøttede adaptere	Alle
Standard	Aktiver
Interval	Aktiver, Deaktiver
Aflast modtagelses-TCP-checksum

Sætter adapteren i stand til at kontrollere TCP- eller UDP-checksummen for indkommende pakker.

•	Med Aflastning deaktiveret kontrollerer operativsystemet TCP-checksummen.

•	Med Aflastning aktiveret foretager adapteren kontrollen for operativsystemet.

Denne funktion forbedrer ydelsen ved modtagelse og reducerer CPU-belastningen.

Understøttede operativsystemer	• Windows XP* • Windows 2000 • Windows 98 understøtter ikke aflastning.
Understøttede adaptere	82559-baserede adaptere og nyere. View the Adapter Specifications topic for help identifying your adapter.
Standard	• Windows* XP: Til • Windows 2000: Fra
Interval	Til, Fra
Aflast transmissions-IP-checksum

Sætter adapteren i stand til at beregne IP-checksummen for udgående pakker.

•	Med Aflastning deaktiveret kontrollerer operativsystemet IP-checksummen.

•	Med Aflastning aktiveret foretager adapteren kontrollen for operativsystemet.

Denne funktion forbedrer ydelsen ved IP-transmission og reducerer CPU-belastningen.

Understøttede operativsystemer	• Windows XP* • Windows 2000 • Windows 98 does not support offloading.
Understøttede adaptere	82559-baserede adaptere og nyere. View the Adapter Specifications topic for help identifying your adapter.
Standard	Til
Interval	Til, Fra
Aflast transmissions-TCP-checksum

Sætter adapteren i stand til at beregne TCP- eller UDP-checksummen for udgående pakker.

•	Med Aflastning deaktiveret kontrollerer operativsystemet TCP-checksummen.

•	Med Aflastning aktiveret foretager adapteren kontrollen for operativsystemet.

Denne funktion forbedrer ydelsen ved TCP- og UDP-transmission og reducerer CPU-belastningen.

Understøttede operativsystemer	• Windows XP* • Windows 2000 • Windows 98 does not support offloading.
Understøttede adaptere	82559-baserede adaptere og nyere. View the Adapter Specifications topic for help identifying your adapter.
Standard	Til
Interval	Til, Fra BEMÆRK: Indstil denne funktion til Fra, når serveren understøtter DOS-baserede klienter.
QoS-pakkemærkning

Sætter adapteren i stand til at sende og modtage IEEE 802.3ac-taggede rammer, som omfatter:

•	802.1p QoS (Quality of Service)-tag, der er nødvendige til prioritets-taggede pakker, og

•	802.1Q-tags, der er nødvendige til VLAN'er

Intel PROSet II aktiverer automatisk 802.1p tagging, når du opsætter et VLAN.

Understøttede adaptere	82559-baserede adaptere og nyere. Se emnet Adapterspecifikationer for at få hjælp til at identificere din adapter.
Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret
Beskrivelser for modtagelse

Definerer antallet af Modtag beskrivere, som er datasegmenter, der sætter adapteren i stand til at tildele hukommelse til modtagne pakker. Hver modtaget pakke kræver én Modtag beskriver, og hver beskriver forbruger 2kb hukommelse.

Du kan også vælge at øge antallet af Modtag beskrivere, hvis du bemærker en væsentlig reduktion af ydelsen ved modtagelse. Hvis modtagelsesydelsen ikke er et problem, skal du bruge den anbefalede værdi på 256.

Understøttede adaptere	Alle
Standard	160
Interval	80-2048
Aflastning ved TCP-segmentering

Sætter adapterhardwaren i stand til at segmentere data til gyldige Ethernet-rammer.

•	Med TCP-segmentering deaktiveret, segmenterer operativsystemsoftwaren dataene, inden de sendes til adapteren til transmission.

•	Med TCP-segmentering aktiveret, segmenterer adapteren dataene i rammer.

Da adapterhardwaren er i stand til at udføre datasegmenteringen meget hurtigere end operativsystemsoftwaren, øger denne funktion i høj grad transmissionshastigheden. Hertil kommer, at adapteren bruger færre CPU-ressourcer.

Understøttede operativsystemer	Windows XP
Understøttede adaptere	Kun 82544- og 82540-baseret. View the Adapter Specifications topic for help identifying your adapter.
Standard	1
Interval	0 = anmeld ikke denne funktion. 1 = anmeld denne funktion.

Beskrivelser for overførsel

Definerer antallet af Beskrivelser for overførsel, som er datasegmenter, der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere Beskrivelser for overførsel.

Du kan vælge at øge antallet af Beskrivelser for overførsel, hvis du opdager, at der er et muligt problem med transmissionshastigheden. Selv om en forøgelse af antallet af Beskrivelser for overførsel kan forbedre transmissionshastigheden, vil Beskrivelser for overførsel bruge systemhukommelse. Hvis transmissionshastigheden ikke er et problem, skal du bruge den anbefalede værdi på 256.

Understøttede adaptere	Alle
Standard	256
Interval	80-2048
Væk ved link-indstillinger

Vækker computeren, hvis netværksforbindelsen opretter link, mens computeren er i stand by-tilstand. Du kan aktivere denne funktion, deaktivere den eller lade operativsystemet bruge dens standarder.

Understøttede operativsystemer	Windows 9x, Windows 2000, Windows XP
Interval	Disabled, Forced, OS controlled
Standard	Deaktiveret

Væk på-indstillinger

Disse indstillinger henviser til funktioner, der er aktiveret af enten operativsystemet eller Intel PROSet. Disse funktioner opfører sig forskelligt eller understøttes slet ikke, afhængig af din version af Windows.

Disse Windows-versioner understøtter Væk på-indstillinger: Windows 9x, Windows XP 64-bit Edition,, Windows XP Professional og Windows Server 2003. Denne funktion er ikke understøttet på Windows Server 2003 for 64-bit Itanium(R)-baserede systemer.

Aktivere Væk på-indstillinger

Du kan bruge Intel PROSet til at konfigurere Væk på-indstillingen til adapterbrugen. Inden du vælger Væk på indstillinger, skal du aktivere operativsystemet, så det bruger Væk på indstillinger. Se hvordan dette gøres i instructions.

Sådan aktiverer du Væk på-indstillinger

6.	I Intel PROSet klikker du på fanen Avanceret.

7.	I listen Indstillinger markerer du Væk på-indstillinger.

8.	I listen Værdi markerer du den relevante Væk på-indstilling.

9.	Klik på OK eller Anvend.

10.	Hvis adapteren skal reagere på disse typer Væk på-pakker, skal operativsystemet være aktiveret til at bruge Væk på-indstillinger. Hvis du vil aktivere Væk på Indstillinger, skal du gå til Enhedshåndtering og aktivere indstillingen Tillad, at denne enhed sætter computeren ud af standby.

Mulige indstillinger

Disse Væk på-indstillinger findes i Intel PROSet:

Indstilling	Beskrivelse
Deaktiveret	Adapter vil ikke bruge Væk på-indstillinger.
Væk på Magic Packet	Sætter adapteren i stand til at vågne som svar på modtagelse af en Magic Packet. En Magic Packet er en pakke, der indeholder 16 sammenhængende kopier af den modtagende adapters Ethernet-adresse. Når du konfigurerer denne funktion, tilsidesætter Intel PROSet operativsystemets værdi for denne funktion.
Væk på Directed Packet	Sætter adapteren i stand til at vågne, når den modtager en Directed Packet, som er en unicast-pakke, der er sendt til adapterens MAC-adresse.  Protokollen skal aktivere denne Væk på-metode i driveren. Hvis denne funktion ikke vælges, fortæller det driveren, at den skal ignorere alle protokolanmodninger om at aktivere denne Væk på-metode.
Væk på Magic og Directed Packet	Aktiverer adapteren, så den vågner, når den modtager en Magic Packet eller en Directed Packet.
OS-styret	Giver operativsystemet komplet kontrol over Væk på-indstillingerne.

BEMÆRK: Hvis flere IP-adresser konfigureres til én adapter, kan operativsystemet anmode om at blive vækket ved ARP-mønstre på alle de konfigurerede adresser. Adapteren vil kun vågne som svar på ARP-pakker, der forespørger om den første IP-adresse på listen.

BEMÆRK: Væk på-indstillinger omfatter ikke muligheden for at vække en maskine fra lukket tilstand (S5). Denne tilstand kontrolleres af Aktiver PME-indstilling, der også findes under fanen Avanceret. Selv hvis Væk på-indstillingerne er deaktiverede, bestemmes muligheden for at blive vækket fra S5 af Aktiver PME-indstilling.

Så længe adapterdriveren er aktiveret, vil PME-indstillingerne fungere. Når driveren er deaktiveret, vender enheden dog tilbage til dens hardwarestandarder, der måske giver computeren mulighed for at vågne fra lukket tilstand.

Knappen Genopret standard

Denne knap sætter den aktuelt valgte Avancerede indstilling til indstillingens standardværdi.  Se ovenstående indstillinger angående standardværdier.  (Denne funktion er ikke tilgængelig for alle indstillinger).


Gemme eller genoprette konfiguration
Genoprette Intel(R) PROSet II-konfigurationen fra en gemt fil

Hvis du har en adapters avancerede indstillinger I en fil, kan du bruge filen til at genoprette tilpassede VLAN- og teamindstillinger. Bemærk, at genoprettelse af Intel PROSet II-konfigurationen ikke gendanner de operativsystemspecifikke netværksindstillinger - f.eks. IP-adressen eller protokolbindinger.

Før du begynder

Når du genopretter indstillingerne, skal de genoprettes på dem samme computer, hvor de blev oprettet. Hertil kommer, at computeren skal have den samme netværk og hardware installeret som dem oprindelig gemte konfiguration. Hvis computeren var tilsluttet til en Intel gigabit switch på det tidspunkt, hvor konfigurationsfilen blev gemt, skal computeren være tilsluttet til den samme switch, når konfigurationen genoprettes.

Funktionen Gem/genopret er kompatibel med Windows NT* 4.0, 2000, 98SE, Me og XP.

FORSIGTIG: Du må ikke redigere konfigurationsfilen. Ændring af konfigurationsfilen gør den ubrugelig.

Sådan genoprettes adapterindstillingerne fra en gemt fil

1.	Vælg Gem/genopret konfiguration i menuen Funktioner.
Dialogboksen Gem/Genopret vises.

2.	Klik på Genopret.
Dialogboksen Åbn vises.

3.	Gennemse for at finde den mappe, du har gemt konfigurationsfilen i, og vælg filen.

4.	Klik på Åbn.
Intel PROSet II viser de genoprettede indstillinger. Disse indstillinger anvendes ikke, før du klikker på OK.

5.	Ret adapterkonfigurationen efter behov.

6.	Klik på OK for at lukke Intel PROSet II og anvende den genoprettede konfiguration.

Se også:

Gem konfiguration


Advarsel om Tilføj adapter til team
Tilføje en adapter til team

Når du opretter et team, skal du kontrollere, at hver adapter er medlem af kun ét team. Dette gælder også teams, der er oprettet i Intel(R) PROSet, og teams, der er oprettet ved hjælp af andre konfigureringsværktøjer. Tilføjelse af den samme adapter til flere teams kan have negativ virkning på teamfunktionaliteten og -ydelsen.

•	Hvis du har brugt Intel PROSet til at oprette teams, skal du identificere eksisterende teammedlemmer i Trævisning.

•	Hvis du har brugt andre konfigureringsværktøjer til at oprette teams, skal du gennemse teams og teammedlemmer i disse værktøjer for at sikre, at adapteren ikke allerede er medlem af et team.

Se også:

Fjerne en adapter fra et team

Oprette et nyt team


Navigere i PROSet II
Navigere i Intel(R) PROSet II

Intel(R) PROSet II har tre navigeringsområder:

•	Menu

•	Netværkskomponenttræ

•	Faner

I menuen kan du:

•	Opsætte teams eller aktivere IP-sikkerhed fra Handling.

•	Gemme eller genoprette VLAN- og teamkonfigurationen i Funktioner.

•	Bruge online-hjælp-systemet eller få adgang til Intel's websted til support.

I Netværkskomponenttræet kan du:

•	Klikke på en adapter for at få vist adapteroplysninger og konfigurationsindstillinger.

•	Højreklikke på en adapter for at opsætte team og aktivere IPSec.

•	Højreklikke på et team for at ændre teamindstillingerne eller opsætte VLAN'er.

•	Højreklikke på et teammedlem for at ændre teamadapterindstillingerne.

Under fanerne kan du udføre adapterovervågning og konfigureringsopgaver.

Bakkeikonet

Afkrydsningsfeltet Vis bakkeikon gør det muligt at få vist eller skjule Intel PROSet II-bakkeikonet på proceslinjen (i nærheden af uret). Fjern markeringen i afkrydsningsfeltet for at skjule bakkeikonet.

Mere om Intel(R) PROSet II-bakkeikonet


Generelle oplysninger:

Klik på adapteren i Netværkskomponenttræet, hvis du vil have vist generelle oplysninger om en adapter.

Fanen Generelt gør det muligt at:

•	Gennemse grundlæggende adapteroplysninger

•	Teste kabelfunktioner
BEMÆRK: Kabeltesten er kun tilgængelig for udvalgte adaptere.

•	Identificere adapterposition

•	Få vist flere oplysninger


Gennemse grundlæggende adapteroplysninger

Fanen Generelt indeholder følgende oplysninger om den adapter, der er valgt i Netværkskomponenttræet.

Ethernet-adresse	Den 12-cifrede hexadecimale nodeadresse på denne adapter, der også kaldes en MAC-adresse.
Artikelnummer	Adapterens Intel-artikelnummer.
IP-adresse	Hvis du bruger IPv4-protokollen, TCP/IP-adressen på denne adapter.  Intel PROSet II does not display IPv6 addresses at this time.
Netværks-driverstatus	Angiver, hvorvidt Intel-netværksdriveren er indlæst i den aktuelt valgte adapter.
Netværksstatus	Angiver link-, hastigheds- og duplexstatus for den valgte adapter. Felterne i gruppeboksen Netværksstatus kan variere efter adapteren.  • Linklysdiode: Til angiver, at adapterkablet er tilsluttet til en gyldig hub- eller switch-port. Fra angiver intet link. • Hastighed: Den hastighed, der angives her (1000, 100 eller 10), angiver den hastighed, som adapteren anvender på forbindelsen. • Aktivitetslysdiode: Blinker, når adapteren er tilsluttet til et netværk med aktivitet. Fra angiver ingen aktivitet eller et frakoblet kabel. • Duplex: Fuld duplex angiver, at adapteren sender og modtager trafik samtidig. Halv duplex angiver, at adapter kun sender eller modtager (trafik sendes og modtages ikke samtidig).


Indstille hastighed og duplex

Intel-adaptere autoforhandler som standard hastigheds- og duplexindstillingerne. Hvis adapteren ikke kan oprette forbindelse ved hjælp af autoforhandling, kan det være nødvendigt at konfigurere hastigheds- og duplexindstillingerne manuelt i adapteren og linkpartneren. Hvis en switch f.eks. ikke understøtter autoforhandling eller er konfigureret med bestemt hastighed og duplex, skal du konfigurere adapterhastighed og duplex manuelt, så de svarer til switch-indstillingerne.

FORSIGTIG: Hvis konfigurationen af adapterhastighed og -duplex ikke svarer præcis til indstillingerne i linkpartneren, kan netværksforbindelsen gå tabt.

Når autoforhandling er deakiveret, er de mulige indstillinger for linkhastighed og duplex:

•	10 Mbps eller 100 Mbps fuld duplex (kræver en fuld duplex linkpartner indstillet til fuld duplex). Adapteren kan sende og modtage pakker samtidig.

•	10 Mbps eller 100 Mbps halv duplex (kræver en linkpartner indstillet til halv duplex). Adapteren udfører én funktion ad gangen. Enten afsendelse eller modtagelse.

Klik på den relevante adapterfamilie for at få oplysninger om konfigurering af hastighed og duplex:

•	Intel(R) PRO/1000 (kobber)
BEMÆRK: Fiber-baserede Intel(R) PRO/1000-adaptere opererer ved  1000 Mbps - fuld duplex.

•	Intel(R) PRO/10 eller PRO/100


PRO 10/100-linkkonfiguration
Konfigurere hastighed og duplex: Intel(R) PRO/10 og PRO/100-adaptere

Klik på den Intel(R) PRO/10- eller PRO/100-adapter, du vil konfigurere, i Netværkskomponenttræet.

1.	Klik på fanen Avanceret.

2.	Klik på Linkhastighed og duplex i listen Indstillinger.

3.	Klik på den hastighed og duplexfunktion, som passer til din adapter og dens linkpartner i boksen Linkhastighed og duplex.  Oplysninger om, hvordan du identificerer hastighed og duplexfunktion for linkpartneren finder du i dokumentationen til linkpartneren.

4.	Klik på OK.

5.	Genstart computeren, hvis du bliver anmodet om det.

Adapteren er nu konfigureret med de bestemte hastigheds- og duplexindstillinger.

FORSIGTIG: Hvis konfigurationen af adapterhastighed og -duplex ikke svarer præcis til indstillingerne i den tilsluttede enhed, kan netværksforbindelsen gå tabt eller adapterens ydelse blive forringet.


Konfigurere avancerede adapterfunktioner

Hvis du vil have vist avancerede funktioner for en adapter, skal du vælge en adaptertype:

•	Intel(R) PRO/1000 Desktop

•	Intel(R) PRO/1000 Server

•	Intel(R) PRO/100

•	Intel(R) PRO/100 VE og VM

•	Intel(R)PRO/10


Omskifterfejltolerance

SFT (Switch Fault Tolerance - Skift fejltolerance) gør det muligt at forbinde to adaptere i team til to omskiftere. Hver adapter er forbundet til en separat omskifter:

SFT kan registrere fejl, når de opstår:

•	I enhver adapter i teamet

•	I hvert kabel, der forbinder adapteren i teamet til dens omskifter

•	I omskifterporte forbundet til adapterne

•	I hver omskifter forbundet til adapterne

I SFT-team er én adapter den primære adapter og én adapter er den sekundære adapter. Under normal drift er den sekundære adapter på standby. Den sender eller modtager ikke trafik. Hvis den primære adapter mister forbindelsen, tager den sekundære adapter automatisk over.

Adapterhastighed	Kan blandes, så én adapter kører ved 100 Mbps og en anden kører ved 1000 Mbps
Protokoller	Alle
Netværkskonfiguration	• Hver adapter er forbundet til en anden omskifter • Spanning Tree skal være aktiveret
Se også:

Om Teaming

Teamtyper


Gemme konfigurationen i en ekstern fil
Gemme konfigurationen i en fil

Du kan gemme Intel(R) PROSet-team og VLAN-konfigurationen i en fil og genoprette den I Intel PROSet i Intel PROSet når som helst. Bemærk, at lagring af Intel PROSet II-konfigurationen ikke gemmer de operativsystemspecifikke netværksindstillinger - f.eks. IP-adressen eller protokolbindinger.

Funktionen Gem/genopret er kompatibel med Windows NT* 4.0, 2000, 98SE, Me og XP.

BEMÆRK: Når du har gemt en konfiguration under et bestemt filnavn, kan du ikke bruge det samme filnavn igen. Du skal  bruge et andet navn, hver gang du gemmer Intel PROSet II-konfigurationen.

Sådan gemmer du Intel(R) PROSet II-konfigurationen.

1.	Vælg Gem/genopret konfiguration i menuen Funktioner.
Dialogboksen Gem/Genopret vises.

2.	Klik på Gem.
Dialogboksen Gem som vises.

3.	Gennemse for at finde den mappe, hvor du vil gemme konfigurationsfilen, og skriv derefter et filnavn.

4.	Klik på Gem.

5.	Klik på OK.

Intel PROSet II-konfigurationer gemmes.

Når du har gem konfigurationen, må du ikke redigere eller ændre filen. Ændring af konfigurationsfilen gør den ubrugelig.

Se også:

Genoprette konfiguration


Test omskifterkonfiguration

Du kan sikre, at linkpartnere understøtter den konfigurerede teaming-funktion ved at køre omskifterkonfigurationstesten. Hvis adapteren f.eks. er medlem af et Fast EtherChannel*-team, kan Intel (R) PROSet II verificere, at linkpartnere, som er forbundet til adapteren, understøtter Link Aggregation.

Specifikke oplysninger om kravene i hver teamfunktion finder du i Om Teaming.

Forsigtig: Når du kører denne test, afbrydes teamets forbindelse til netværket midlertidigt.

BEMÆRK: Denne test registrerer ikke fejl, hvis et af følgende scenarier findes.

Adapterkonfiguration	Omskifterkonfiguration
Dynamisk 802.3ad	Enhver
Team i Link Aggregation-tilstand uden VLAN'er	Omskifteren enten: • Ikke tilhører noget VLAN • Is configured with tagged VLANs
Team i Link Aggregation-tilstand med VLAN'er	Omskifteren: • Ikke tilhører det VLAN, der er konfigureret for adapteren og • Does not have Link Aggregation defined
Sådan kører du omskifterkonfigurationstesten

1.	Klik på det team, du vil teste, i Netværkskomponenttræet.
For at køre testen skal der være mindst to adaptere i teamet.

2.	Klik på Test omskifterkonfiguration under fanen Teamkonfiguration.
Dialogboksen Test omskifterkonfiguration vises.

3.	Fortsæt testen ved at klikke på Ja.
Hvis der detekteres team- eller linkpartner-konfigurationsfejl åbnes fanen Fejlfinding.

BEMÆRK:  På grund af den tid, der kræves ved test af STP (Spanning Tree Protocol), kan Intel(R) PROSet II muligvis ikke præcist angive, om STP er aktiveret i netværket. Sørg for, at omskiftere er konfigureret med STP:

•	Aktiveret for SFT-team

•	Deaktiveret (hurtig port) for alle andre teamfunktioner


Ansvarsfralæggelse for tredjepart
* Andre produkt- og virksomhedsnavne kan være varemærker tilhørende andre virksomheder. Disse anvendes kun som forklaring og til ejerens fordel, uden det er meningen at krænke ophavsrettigheder.


Konfigurere strømstyring
Konfigurere Strømforbrug

Ved hjælp af fanen Strømsparer kan du konfigurere adapterens strømforbrug.  Når adapteren sparer strøm, arbejder den ved 10Mbps.

Hvis denne funktion skal kunne understøttes, skal adapteren:

•	Være konfigureret til automatisk forhandling af hastighed, og

•	Være tilsluttet til en linkpartner, som kan udføre autoforhandling af hastigheden

Hvis adapteren tvinges til at operere ved en hastighed på 100Mbps, eller hvis linkpartneren ikke kan operere ved 10Mbps, kan Strømbesparelse ikke aktiveres for adapteren.

På nogle computere bliver strømsparerindstillingerne ikke gemt efter genstart af computeren. Hvis indstillingerne ikke gemmes, vil den øverste del af fanen Strømsparer indeholde teksten Midlertidig strømbesparelse. På alle systemer, der bruger Windows XP eller Windows Server 2003, gemmes indstillingerne ikke.

Hvis indstillingerne ikke ændres efter genstart af computeren, indeholder den øverste del teksten Strømsparerindstillinger.

BEMÆRK: Når Strømbesparelse er aktiveret, vil Intel(R) PRO/100 M-adaptere reducere adaptercyklushastigheden. Denne funktion sætter Intel PRO/100 M-adaptere i stand til at reducere strømforbruget yderligere. Andre Intel PRO/100-adaptere reducerer ikke behandlingshastigheden for at spare strøm.

Under fanen Strømsparer kan du tilpasse følgende:

•	Adapterens generelle strømforbrug. Når du konfigurerer det generelle strømforbrug, bevarer adapteren denne indstilling, så længe den er aktiveret. Hvis adapteren deaktiveres, gemmes strømsparerindstillingen ikke.

•	Strømforbrug ved standby. Når computeren skifter til standby, sparer adapteren automatisk strøm og sætter hastigheden til 10Mbps. Intel PROSet II bevarer denne indstilling ved næste genstart af computeren.

•	Strømforbrug ved batteridrift under Windows* XP. Når computeren anvender batteriet, sparer adapteren automatisk strøm og sætter hastigheden til 10Mbps. Intel PROSet II bevarer denne indstilling ved næste genstart af computeren.

Understøttede adaptere	Intel(R) PRO/100-adaptere
Understøttede operativsystemer	• Windows* 98, 2000, XP, Me og NT* ved definition af generelt strømforbrug eller strømforbrug ved standby • Windows XP ved definition af strømforbrug, når computeren kører på batteri
Standard	Adapterne har som standard det normale strømforbrug, der kræves til at opretholde hastigheds- og duplexindstillingerne.  Når adapteren sparer strøm, sætter den hastigheden til 10Mbps, hvorved den generelle trafikmængde, der håndteres af adapteren, reduceres.
Sådan konfigureres adapterens strømforbrug

1.	Klik på den adapter, du vil konfigurere strømforbruget til, i Netværkskomponenttræet.
Hvis adapteren understøtter Strømstyring, vises fanen Strømsparer.

2.	Hvis du vil reducere det generelle strømforbrug, skal du klikke på Spar strøm, og sæt hastigheden til 10Mbps og derefter klikke på Anvend. Adapteren bevarer denne indstilling, så længe den er aktiveret.
Du kan konfigurere adapteren til at bruge den normale mængde strøm og fungere ved standardhastighed ved at klikke på Brug normal strøm og genoptag normal hastighed og derefter klikke på Anvend.

3.	Hvis du vil reducere adapterens strømforbrug, når computeren er i standby, skal du klikke på Lavt strømforbrug ved standby.

4.	Hvis adapteren kører på en Windows XP-computer, kan du også definere strømstyringsindstillinger, når computeren bruger batteri. Hvis du vil reducere adapterens strømforbrug, når computeren anvender batteri, skal du klikke på Lavt strømforbrug ved batteridrift.

5.	Klik på OK for at anvende strømsparerkonfigurationen.


Modtagelses-Load Balancing

Med et ABL-team (Adaptive Load Balancing), kan du vælge enten at aktivere eller deaktivere RLB (Receive Load Balancing). Indstillingen RLB er altid tilgængelig:

•	Under fanen Avancerede indstillinger for et ALB-team (Adaptive Load Balancing)

•	Ved oprettelse af et ALB-team ved hjælp af Teaming-guide

Hvis du deaktiverer RLB, modtager kun den primære adapter trafik. Alle adaptere anvender Load Balancing til udgående trafik (Tx).

Hvis du aktiverer RLB, er trafikfordelingen afhængig af forskellene i hastigheden mellem teammedlemmerne.

•	I et team med samme hastighed sender og modtager alle adaptere IP-trafik. Den primære adapter videresender ikke-distribueret (lag 2) trafik.

•	I et blandet team, anvender teammedlemmer med den hurtigste forbindelse Load Balancing for indkommende (Rx) IP-trafik. Alle adaptere anvender Load Balancing til udgående IP-trafik (Tx). Den primære adapter videresender ikke-distribueret (lag 2) trafik.
BEMÆRK: Når RLB er aktiveret, vælger Intel(R) PROSet II automatisk en foretrukket primær adapter. Du kan tilsidesætte standardindstillingen ved at Angive en adapter som primær eller sekundær adapter.

Se også:

Om Teaming

Oprette et nyt team


Avancerede indstillinger til PRO/100 VE- og VM-adaptere
Avancerede indstillinger til Intel(R) PRO/100 VE- og VM-adaptere

De indstillinger, der er vist under fanen Avanceret, gør det muligt at tilpasse, den måde som adapteren håndterer buffere, strømstyring og andre funktioner på. Visse af de nedenstående funktioner er muligvis ikke tilgængelige i det operativsystem, du anvender, og i de specifikke adaptere, der er installeret.

Avancerede indstillinger

Adaptiv inter-rammeafstand

Kompenserer for overdrevent mange Ethernet-pakkekollisioner dit netværket.  Denne indstilling er som standard indstillet til 0, hvilket deaktiverer funktionen.

Den anbefalede indstilling (1) fungerer bedst for de fleste computere og netværk ved dynamisk tilpasning til netværkets trafikforhold. Denne dynamiske funktion er kun aktiv, når værdien er indstillet til 1. I visse sjældne tilfælde kan du muligvis opnå en bedre ydelse ved manuel indstilling af spacing-værdien. Indstilling af en værdi fremtvinger en statisk afstand mellem pakker.

Forøgelse af værdien øger forsinkelsen mellem de rammer, der transmitteres.

Understøttede adaptere	Alle
Standard	0: deaktiveret
Interval	0-255

Adaptivt link-svar

Gør systemstart hurtigere ved at springe de opstartrutiner over, som kræver netværkstilslutning, når kablet er fjernet fra adapteren. Dette reducerer væsentligt den tid, det tager at starte computeren.

Når Adaptivt link-svar er aktiveret for Intel Ethernet-controllere, og der ikke er forbundet et netværkskabel til RJ-45-porten, deaktiveres netværksforbindelsen. Et gult advarselsikon vises ved siden af netværksforbindelsen i Enhedshåndtering.

Hvis du vil aktivere netværksforbindelsen igen, skal du forbinde netværkskablet til RJ-45-porten og derefter genstarte computeren.

Understøttede adaptere	Kun mobile produkter. Ikke tilgængelig på alle adaptermodeller.
Standard	Fra
Anbefales	Til
Interval	Til, Fra
BEMÆRK: Adaptive Link Response (ALR) fungerer ikke, når en trådløs adapter er aktiv på systemet.

Sammensmeltningsbuffere

Optimerer transmissionsydelsen ved at tilpasse antallet af samlebuffere, hvilket sætter adapteren i stand til at samle datasegmenter før pakketransmission.

Indstillingen Samlebuffere skal konfigureres til at arbejde med indstillingen Beskrivelser for overførsel. Indstillingen Samlebuffere skal være 30-50% af Beskrivelser for overførsel. Hvis indstillingen Samlebuffere ikke ændres, så den svarer til indstillingen Beskrivelser for overførsel, forbedres transmissionsydelsen muligvis ikke.

Samlebuffere forbedrer transmissionsydelsen væsentligt på Windows NT 4.0-computere. Den forbedrer også transmissionsydelsen på Windows 98- og 2000-computere.

Standard	8
Anbefalet værdi	8
Interval	1-32
Lokalt administreret adresse

Tilsidesætter MAC-adressen i adapteren. Hvis du vil angive en ny netværksadresse, skal du skrive et 12-cifret hexadecimalt tal i boksen Værdi.

Standard	Ingen
Interval	0000 0000 0001 - FFFF FFFF FFFD Undtagelser: • Brug ikke en multicast-adresse (mindst betydende bit i den høje byte = 1).  • Brug ikke udelukkende nuller eller F'er.
Brugere af Windows 98SE:

Hvis du vil bruge standardadressen efter brug af en manuelt tilknyttet adresse, skal du udføre en af disse procedurer:

•	Marker Lokalt administreret adresse under fanen Avanceret i dialogboksen Egenskaber, og ret dens adresse til værdien 0. Klik på OK for at anvende indstillingen.

•	Klik på fanen Avanceret i Intel PROSet II, og klik derefter på Genopret standard, eller slet alle tegn i feltet Værdi. Klik på OK for at anvende indstillingen.

PCI-buseffektivitet

Sætter adapteren i stand til enten at bruge den bedste metode til pakketransmission eller konstant gennemtvinge samling af pakker.

•	Når PCI-bussens effektivitet er deaktiveret, bruger adapteren den transmissionsmetode, som giver den bedst mulige ydelse. Hvis samling af pakker giver den bedste transmissionsydelse, samler adapteren automatisk pakker.

•	Når PCI-bussens effektivitet er aktiveret, gennemtvinger adapteren samling af pakker.

Indstil PCI-bussens effektivitet, hvis der ikke er problemer med ydelsen ved pakketransmission. Hvis der er et stort antal underløb, eller hvis PCI-bussen har problemer med ydelsen, skal denne værdi indstilles til aktiveret.

Standard	Deaktiveret
Interval	Aktiveret, Deaktiveret

Modtag buffere

Angiver det antal buffere, som driveren bruger ved kopiering af data til protokolhukommelsen.

I situationer med høj netværksbelastning vil et øget antal modtag buffere givet forbedret ydelse. Ulempen er, at dette også øger den mængde systemhukommelse, som driveren bruger. I andre situationer kan ændring af denne værdi forringe systemets ydelse.  Brug er på eget ansvar.

Standard	48
Anbefalet værdi	• Enkelt adapter under Windows 98, Windows Me, Windows2000 og Windows XP: 48 • Enkelt adapter under Windows NT 4.0: 32 • Adapter i team: 250
Interval	8-1024
Retransmitter inter-rammeafstand

Øger forsinkelsen mellem ramme-genafsendelser. Selv om der findes en indbygget Ethernet-algoritme, som adaptere bruger til ramme-genafsendelse efter kollisioner, kan en øget forsinkelse forbedre netværksydelsen, hvis der er et unormalt stort antal kollisioner i netværket.

Understøttede adaptere	Alle
Standard	6
Interval	6-15

Kontrolblokke for overførsel

Definerer antallet af Kontrolblokke for overførsel, som er datasegmenter der sætter adapteren i stand til at spore transmissionspakker i systemhukommelsen. Afhængig af pakkens størrelse kræver hver transmissionspakke en eller flere kontrolblokke for overførsel.

Du kan også vælge at øge antallet af Kontrolblokke til overførsel, hvis du opdager, at der er et muligt problem med transmissionsydelsen. Selvom en forøgelse af antallet af Kontrolblokke til overførsel kan forbedre transmissionsydelsen, optager Kontrolblokke til overførsel systemhukommelse. Hvis transmissionsydelsen ikke er et problem, skal du bruge den anbefalede værdi på 32.

Standard	16
Anbefalet værdi	32
Interval	8-64
Væk på Link Change

Vækker computeren, hvis netværksforbindelsen opretter link, mens computeren er i stand by-tilstand. Du kan aktivere denne funktion, deaktivere den eller lade operativsystemet bruge dens standarder.

Understøttede operativsystemer	Windows 9x, Windows 2000, Windows XP
Interval	Deaktiveret, Tvunget, OS-afhængigt
Standard	Deaktiveret
Væk på-indstillinger

Disse indstillinger henviser til funktioner, der er aktiveret af enten operativsystemet eller Intel(R) PROSet II. Disse funktioner opfører sig forskelligt eller understøttes slet ikke, afhængig af din version af Windows.

•	Disse Windows-versions understøtter Væk på-indstillinger: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	Disse Windows-versioner understøtter ikke Væk på Indstillinger:  Windows 98 retail og Windows NT 4.0.

BEMÆRK: Kun Intel(R) PRO/100+ Management og Server-adaptere og Intel(R) PRO/100 S-adaptere understøtter Væk på-indstillinger.

Aktivere Væk på-indstillinger i operativsystemet

De følgende typer Væk på-indstillinger kræver, at Væk på-indstillingerne i operativsystemet er aktiveret:

•	Væk på ARP

•	Væk på Directed Packet

•	Væk på NBT

Hvis adapteren skal reagere på disse typer Væk på-pakker, skal brug af Væk på-indstillingerne i operativsystemet være aktiveret. Hvis du vil aktivere Væk på Indstillinger, skal du gå til Enhedshåndtering og aktivere indstillingen Tillad, at denne enhed sætter computeren ud af standby. Sådan finder du denne indstilling:

1.	Klik på Start > Kontrolpanel.
Vinduet Kontrolpanel åbnes.

2.	Dobbeltklik på System.
Dialogboksen System vises.

3.	Klik på fanen Hardware og klik derefter på Enhedsstyring.
Vinduet Enhedshåndtering åbnes.

4.	Dobbeltklik på den adapter, du vil aktivere Væk på-indstillinger for.
Dialogboksen Egenskaber vises.

5.	Klik på fanen Strømstyring.

6.	Klik på Tillad, at denne enhed sætter computeren ud af standby for at aktivere Væk på-indstillinger for adapteren.

Mulige indstillinger

Disse Væk på-indstillinger findes i Intel PROSet II:

Indstilling	Beskrivelse
Deaktiveret	Adapter vil ikke bruge Væk på-indstillinger.
Væk på Magic Packet	Sætter adapteren i stand til at vågne som svar på modtagelse af en Magic Packet. En Magic Packet er en pakke, der indeholder 16 sammenhængende kopier af den modtagende adapters Ethernet-adresse. Når du konfigurerer denne funktion, tilsidesætter Intel PROSet II operativsystemets værdi for denne funktion.
Væk på Directed Packet	Sætter adapteren i stand til at vågne, når den modtager en Directed Packet, som er en unicast-pakke, der er sendt til adapterens MAC-adresse.  Denne protokol skal aktivere denne vækningsmetode i driveren. Hvis denne funktion fravælges, ignorerer driveren en vilkårlig protokolanmodning til aktivering af denne vækningsmetode.
Væk på Magic og Directed Packet	Aktiverer adapteren, så den vågner, når den modtager en Magic Packet eller en Directed Packet.
OS-styret	Giver operativsystemet komplet kontrol over Væk på-indstillingerne.

BEMÆRK: Hvis flere IP-adresser konfigureres til én adapter, kan operativsystemet anmode om at blive vækket ved ARP-mønstre på alle de konfigurerede adresser. Adapteren vil kun vågne som svar på ARP-pakker, der forespørger om den første IP-adresse på listen.

BEMÆRK: Væk på-indstillinger omfatter ikke muligheden for at vække en maskine fra lukket tilstand (S5). Denne tilstand kontrolleres af Aktiver PME-indstilling, der også findes under fanen Avanceret. Selv hvis Væk på-indstillingerne er deaktiverede, bestemmes muligheden for at blive vækket fra S5 af Aktiver PME-indstilling.

Så længe adapterdriveren er aktiveret, vil PME-indstillingerne fungere. Når driveren er deaktiveret, vender enheden dog tilbage til dens hardwarestandarder, der måske giver computeren mulighed for at vågne fra lukket tilstand.


Teamtyper

Intel(R) PROSet II gør det muligt at konfigurere følgende teams:

•	AFT (Adapterfejltolerance)

•	SFT (Omskifterfejltolerance)

•	ALB (Adaptive Load Balancing). Inkluderer RLB (Receive Load Balancing)

•	FEC* / LA / 802.3ad: Statisk

•	%Third_party_disclaimerGEC* / LA / 802.3ad: Statisk

•	IEEE 802.3ad: Dynamic

Adapterfejltolerance

Funktioner	• FailoverSikrer en automatisk reserve for adapteren. Hvis der opstår fejl på den primære adapter, tager den sekundære adapter over
Netværkskonfiguration	• Alle adaptere skal være tilsluttet den samme omskifter • Spanning Tree skal være deaktiveret • Alle typer omskiftere understøttes

Fejltolerance for omskifter

Funktioner	• Failover Opretter en failover-relation mellem to adaptere, når hver adapter er forbundet til en separat omskifter
Netværkskonfiguration	• Hver adapter er forbundet til en anden omskifter • Spanning Tree skal være aktiveret

Adaptiv Load Balancing  (ALB)

Funktioner	• Failover • Transmission med Load Balancing • Modtagelse med Load Balancing (RLB) af IP-trafik (ekstra)
Netværkskonfiguration	• Alle adaptere skal være tilsluttet den samme omskifter • Alle typer omskiftere understøttes

FEC/LA/802.3ad: Statisk

Funktioner	• Failover • Transmission med Load Balancing • Modtagelses-Load Balancing
Netværkskonfiguration	• Alle adaptere skal køre 100MBs • Alle adaptere skal være tilsluttet den samme omskifter • Skal anvendes med en omskifter, der er i stand til at håndtere Link Aggregation: • Omskiftere, der kan anvende Cisco FEC ved hjælp af PAgP-protokollen • Intel Express(R) omskiftere, der kan anvende Link Aggregation • Andre omskiftere, der kan anvende statisk 802.3ad

GEC/LA/802.3ad: Statisk

Funktioner	• Failover • Transmission med Load Balancing • Modtagelses-Load Balancing
Netværkskonfiguration	• Alle adaptere skal køre 100MBs • Alle adaptere skal være tilsluttet den samme omskifter • Skal anvendes med en omskifter, der er i stand til at håndtere Link Aggregation: • Omskiftere, der kan anvende Cisco GEC ved hjælp af PAgP-protokollen • Intel Express-omskiftere, der kan anvende Link Aggregation • Andre omskiftere, der kan anvende statisk 802.3ad

IEEE 802.3ad: Dynamisk

Funktioner	• Failover • Transmission med Load Balancing • Modtagelses-Load Balancing
Netværkskonfiguration	• Teammedlemmer kan operere ved forskellige hastigheder • Alle adaptere skal være tilsluttet den samme omskifter • Omskifter, der er forbundet til adapterne, skal fuldt ud understøtte IEEE 802.3ad-standarden
Se også:

Om Teaming


Diagnostiklog
Opsætte diagnostikloggen

Intel PROSet gemmer oplysninger fra diagnostiktest og Afsender/Modtager-test i diagnostikloggen.

Sådan konfigureres loggen

1.	Åbn Registreringseditor. Klik på Start > Kør. Skriv regedit i dialogboksen Åbn.
Registreringseditor åbnes.

2.	Find registreringsnøglen HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Ret registreringsdatabaseparametrene.

Opgave	Navn	Standardværd	Mulige værdier
Aktivere eller deaktivere diagnosticeringslogføring	Aktiver	1: Aktiver	1: Aktiver 0: Deaktiver
Logfilplacering	FilePath	System32	Enhver gyldig sti i systemet
Definér, hvorvidt Intel PROSet II skal bevare eller slette eksisterende oplysninger i loggen	FileAppend	1: Aktiver	1: Tilføj oplysninger til den eksisterende log 0: Slet eksisterende oplysninger, hver gang brugeren kører dignosticeringstest eller Afsender/Modtager-test
Indstiller den maksimale filstørrelse af loggen - i byte	MaxFileSize	36 kb	Det antal byte med oplysninger, som loggen kan indeholde.
4.	Luk Registreringseditor, når du er færdig med at foretage ændringerne af logoplysningerne.


Diagnostik: En oversigt
Oversigt over diagnostik

Intel(R) PROSet II indeholder tre typer diagnostiktest.

•	Diagnostiktest giver en grundlæggende analyse af adapterens tilstand.  Når du kører grundlæggende diagnosticeringstests, checker Intel PROSet II for I/O-konflikter, hukommelsesfejl, EEPROM-funktion og afsendelse, modtagelse samt link.

•	Kabeletest giver oplysninger om kabellængde, polaritet og andre kabelegenskaber.

•	Afsender/Modtager-test gør det muligt at analysere adapterfunktionaliteten i et netværk. Dette er en mere avanceret test, som kræver, at der kører to computere.

Testresultaterne vises i Intel PROSet II. Intel PROSet II gemmer også resultaterne fra diagnostiktesten og Afsender/Modtager-testen i diagnostikloggen. Yderligere oplysninger finder du i Opsætning af diagnosticeringsloggen.


Adapterspecifikationer

Controller	Kort-ID-nummer	Produktnavn (Tilslutninger)	Intel delnummer
82545EM	A92165-xxx	PRO/1000 MT Server Adapter	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT Dual Port Server Adapter	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MT Server Adapter	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF Server Adapter (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF Dual Port Server Adapter	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Desktop Adapter	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF Server Adapter	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI Server Adapter	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT Server Adapter	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T Server Adapter	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit Server Adapter	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 Gigabit Server Adapter	PWLA8490
82562	A19716-xxx	PRO/100 VE Desktop Adapter	CNLA6000
82550	A78921-xxx	PRO/100 M Desktop Adapter	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S Server (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port Server adapter	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100-adapter	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI-adapter(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8465B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC Card (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC Card (TP)	MBLA1656
82559	748568-xxx	PRO/100 S Server (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S Server (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management Adapter	PILA8900
82558	701738-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port Server adapter	PILA8472
82559	729757-xxx	PRO/100+ Server Adapter (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI Server Adapter (TP)	PILA8470


FEC
FEC* /LA/802.3ad: Statisk

Fast EtherChannel/Link Aggregation-team forøger ydelsen ved:

•	Adapterkonfiguration. Ved at føje medlemmer til et team, kan du forøge ydelsen. Teams kan bestå af op til otte adaptere. Hver server kan operere med op til fire teams.

•	Trafikanalyse. Softwaren analyserer konstant belastningen ved transmission for hvert teammedlem, og afbalancerer derefter belastningen på tværs af adapterne efter behov. Omskifteren anvender Load Balancing til modtagelsestrafik.

Hertil kommer, at FEC-teams sikrer fejltolerance. Når der opstår fejl på en adapter i teamet, overtager en sekundær adapter.

Link Aggregation-teams er kompatible med følgende:

Adapterhastighed	Alle adaptere skal køre med samme hastighed
Netværkskonfiguration	• Alle adaptere skal køre 100MBs • Alle adaptere skal være tilsluttet den samme omskifter • Skal anvendes med en omskifter, der er i stand til at håndtere Link Aggregation: • Omskiftere, der kan anvende Cisco FEC ved hjælp af PAgP-protokollen • Intel Express(R) omskiftere, der kan anvende Link Aggregation • Andre omskiftere, der kan anvende statisk 802.3ad
Protokoller	Alle

Se også:

Om Teaming

Teamtyper


GEC
GEC* /LA/802.3ad: Statisk

Gigabit EtherChannel/Link Aggregation-team forøger ydelsen ved:

•	Adapterkonfiguration. Ved at føje medlemmer til et team, kan du forøge ydelsen. Teams kan bestå af op til otte adaptere. Hver server kan operere med op til fire teams.

•	Trafikanalyse. Softwaren analyserer konstant belastningen ved transmission for hvert teammedlem, og afbalancerer derefter belastningen på tværs af adapterne efter behov. Omskifteren anvender Load Balancing til modtagelsestrafik.

Hertil kommer, at GEC-team sikrer fejltolerance. Når der opstår fejl på en adapter i teamet, overtager en sekundær adapter.

Link Aggregation-teams er kompatible med følgende:

Adapterhastighed	Alle adaptere skal køre med samme hastighed
Netværkskonfiguration	• Alle adaptere skal køre 100MBs • Alle adaptere skal være tilsluttet den samme omskifter • Skal anvendes med en omskifter, der er i stand til at håndtere Link Aggregation: • Omskiftere, der kan anvende Cisco GEC ved hjælp af PAgP-protokollen • Intel Express(R) omskiftere, der kan anvende Link Aggregation • Andre omskiftere, der kan anvende statisk 802.3ad
Protokoller	Alle

Se også:

Om Teaming

Teamtyper


Deaktiver strømstyring for netværksadapter

1. På skrivebordet højreklikker du på Denne computer

2. Klik på Egenskaber.

3. Klik på fanen Enhedshåndtering.

4. Dobbeltklik på ikonet Netværksadaptere.

5. Dobbeltklik på Intel-adapteren.

6. Hvis fanen til strømstyring er synlig, skal du klikke på den og sørge for, at afkrydsningsfeltet
Tillad computeren at slukke denne enhed for at spare strøm
ikke er markeret.

7. Klik på OK. Nu kan du køre diagnostikken.

Når du har kørt diagnostikken vil du mulighed genoprette strømstyringsfunktionen ved at markere afkrydsningsfeltet i trin 6 ovenfor.