Copyright: Intel® PROSet Help Version 1013
Citation: Copyright © Intel Corporation 2003. All rights reserved.


Kabel testen

Die Schaltfläche "Kabel testen" erscheint auf dem Register "Allgemein", wenn der in der Strukturansicht Netzwerkkomponenten ausgewählte Adapter entweder

•	ein 82550-basierter Intel(R) PRO/100 S Server oder Desktopadapter ohne Verbindung mit dem Netzwerk oder

•	ein Intel(R) PRO/1000 Adapter ist.

So führen Sie den Kabeltest auf Intel PRO/100 Adaptern aus:

Klicken Sie auf dem Register "Allgemein" auf Kabel testen. Der Test kann einige Minuten dauern.

Die Testergebnisse werden im Register "Fehlerbehebung" angezeigt.

So führen Sie den Kabeltest auf Intel PRO/1000 Adaptern aus:

Bevor Sie die Funktion "Kabel testen" verwenden, stellen Sie sicher dass der Adapter bei 1000 Mbit/s betrieben wird. Der Kabeltest kann zwar bei 1000Mbit/s durchgeführt werden, aber einige Informationen sind möglicherweise inakkurat oder nicht verfügbar.

Klicken Sie auf dem Register "Allgemein" auf Kabel testen. Der Test kann einige Minuten dauern.

Die Testergebnisse werden im Dialogfeld "Kabeltestergebnisse" angezeigt. Folgende Informationen werden angezeigt:

Kabellänge: Zeigt die etwaige Länge des Kabels an, das den Adapter mit dem Verbindungspartner verbindet. Wenn die angezeigte Kabellänge von der tatsächlichen Länge des Kabels abweicht, befindet sich womöglich ein Defekt im Kabel. Die Genauigkeit kann bis zu ca. 9 Meter abweichen.

Polarität: Identifiziert die +/--Eigenschaften der verdrillten Übertragungs- und Empfangspaarkabel innerhalb des Ethernet-Kabels. Wenn diese Eigenschaften nicht richtig eingestellt sind, korrigiert der Adapter sie automatisch und der Fehler wird gemeldet.

Lokaler Empfängerstatus: Stellt fest, ob der am Adapter angebrachte Kabelanschluss den Verkehr verarbeiten kann. Wenn der lokale Statustest fehlschlägt, sollten Sie den Anschluss auf Defekte und falsch angeschlossene Leitungen überprüfen.

Fernempfängerstatus: An dem am Verbindungspartner angebrachten Kabelanschluss werden verschiedene Betriebstests durchgeführt. Wenn der Fernstatustest fehlschlägt, sollten Sie den Anschluss auf Defekte und falsch angeschlossene Leitungen überprüfen.

Anzahl der Empfangsfehler: Empfangsfehler treten auf, wenn der Adapter eine nicht erkennbare Übertragung im Kabel feststellt.
Empfangsfehlerzählungen steigen normalerweise an, wenn der Adapter die Kommunikation mit dem Netzwerk aufnimmt (das Kabel mit dem Adapter verbunden oder der Computer neu gestartet wird) oder wenn der Adapter nach automatischer Absprache neu gestartet wird. Wenn die Fehler im Ruhezustand innerhalb von fünf Minuten auf ca. 65.000 ansteigen, liegt ein Problem mit der Verbindungsqualität vor. Lösen Sie Verbindungsqualitätsprobleme, indem Sie das Kabel neu verbinden oder ein anderes Kabel verwenden.

Anzahl der Leerlauf-Fehler: Leerlauf-Fehler nehmen zu, wenn der Adapter eine nicht erkennbare Übertragung im Kabel empfängt. Im Gegensatz zu Empfangsfehlern werden Leerlauf-Fehler gefunden, wenn der Adapter nicht aktiv Pakete empfängt.
Eine Zählung der Leerlauf-Fehler erfolgt normalerweise, wenn der Adapter Kommunikation mit dem Netzwerk aufnimmt (das Kabel mit dem Adapter verbunden oder der Computer neu gestartet wird) oder wenn der Adapter nach automatischer Absprache neu gestartet wird. Wenn die Fehler im Leerlauf innerhalb von einer Minute auf ca. 255 ansteigen, liegt ein Problem mit der Verbindungsqualität vor. Lösen Sie Verbindungsqualitätsprobleme, indem Sie das Kabel neu verbinden oder ein anderes Kabel verwenden.

MDI/MDI-X Status: Stellt fest, ob das verbundene Kabel oder der Adapter eine direkte (MDI) oder eine überkreuzte (MDI-X) Konfiguration aufweist. Verwenden sie MDI, wenn Sie ein System mit einem Switch oder Hub verbinden, und MDI-X, wenn Sie zwei Systeme miteinander verbinden.

HINWEIS: Die Informationen im Dialogfeld "Kabeltestergebnisse" sind je nach Adapter unterschiedlich.


Rechtshinweise

Copyright © 2002, Intel Corporation. Alle Rechte vorbehalten.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR 97124-6497 USA

Intel Corporation übernimmt keine Verantwortung für Fehler und Auslassungen in diesem Dokument. Darüber hinaus verpflichtet sich Intel nicht, die hierin enthaltenen Informationen zu aktualisieren.

* Andere Marken oder Produktnamen sind Eigentum der jeweiligen Inhaber.


Erweiterte Einstellungen für PRO/1000 Serveradapter

Mit Hilfe der im Register aufgeführten Einstellungen können Sie definieren, wie der Adapter QoS Packet-Tagging, Jumbo Frames, Verschiebung und sonstige Funktionen behandelt. Einige der folgenden Funktionen sind möglicherweise nicht verfügbar, je nachdem, welches Betriebssystem Sie verwenden und welche Adapter Sie installiert haben.

Erweiterte Einstellungen

Adaptives IFS (Inter-Frame Spacing)

Schafft Ausgleich für übermäßige Ethernet-Paketkollisionen in Ihrem Netzwerk.  Standardmäßig ist diese Einstellung auf "0" gesetzt, wodurch die Funktion deaktiviert wird.

Die empfohlene Einstellung (1) funktioniert für die meisten Computer und Netzwerke am besten, da mit ihr die Netzwerkverkehrsbedingungen dynamisch angepasst werden. Dieser dynamische Modus ist nur aktiviert, wenn der Wert auf "1" eingestellt ist. In einigen Fällen kann jedoch eine bessere Leistung erzielt werden, wenn der Spacing-Wert manuell eingestellt wird. Durch Einstellung eines Wertes wird eine statische Lücke zwischen Paketen erzwungen.

Wird der Wert erhöht, erhöht sich die Verzögerung zwischen den übertragenen Frames.

Unterstützte Adapter	Alle
Standard	0: deaktiviert
Bereich	0-255

Adaptive Verbindungsreaktion

Beschleunigt den Systemstart, indem Startroutinen, die eine Verbindung mit dem Server erfordern, umgangen werden, wenn das Kabel nicht mit dem Adapter verbunden ist. So wird die zum Starten des Computers erforderliche Zeit wesentlich verkürzt.

Wenn ALR (Adaptive Link Response = Adaptive Verbindungsreaktion) aktiviert ist und kein Netzwerkkabel mit dem RJ-45-Anschluss verbunden ist, wird die Netzwerkverbindung deaktiviert. Ein gelbes Warnsymbol wird neben der Netzwerkverbindung im Gerätemanager angezeigt.

Um die Netzwerkverbindung erneut zu aktivieren, verbinden Sie das Netzwerkkabel mit dem RJ-45-Anschluss und führen Sie einen Neustart des Computers durch.

Unterstützte Adapter	Nicht für jedes Adaptermodell verfügbar.
Standard	Aus
Empfohlen	Ein
Bereich	Ein, Aus
HINWEIS: Adaptiver Link Response (ALR) wird nicht funktionieren, wenn ein drahtloser Adapter aktiv im System ist.

Coalesce Buffers

Optimiert die Übertragungsleistung, indem die Anzahl der Coalesce Buffers benutzerdefiniert wird, so dass der Adapter Datensegmente vor der Paketübertragung zusammenfügen kann.

Die Einstellung "Coalesce Buffers" muss so konfiguriert werden, dass sie zusammen mit der Einstellung "Übertragungsdescriptors" funktioniert. Die Einstellung "Coalesce Buffers" sollte 30 bis 50 % der Übertragungsdescriptors umfassen. Wird die Einstellung "Coalesce Buffers" nicht der Einstellung "Übertragungsdescriptors" angepasst, wird die Übertragungsleistung möglicherweise nicht verbessert.

Die Einstellung Coalesce Buffers erhöht die Übertragungsleistung auf Rechnern mit Windows NT 4.0 bedeutend. Sie verbessert darüber hinaus die Übertragungsleistung auf Rechnern mit Windows 98 und 2000.

Unterstützte Adapter	Alle
Standard	128
Bereich	16-768

PME (Power Management Event) aktivieren

Aktiviert bzw. deaktiviert Remoteaktivierungsfunktionen des Adapters auf Computern mit älteren APM-Implementationen (Advanced Power Management). Remoteaktivierung sorgt dafür, dass der Adapter aus dem Standby- oder ausgeschalteten Modus aktiviert wird, wenn bestimmte Paketarten - z. B. ARP-Pakete (Address Resolution Protocol) - empfangen werden.

•	Wenn diese Funktion deaktiviert wird, werden alle Remoteaktivierungseinstellungen auf Computern mit älteren Energieverwaltungsimplementationen deaktiviert.

•	Wenn diese Funktion aktiviert wird, kann der Adapter auf Remoteaktivierungssignale antworten. Näheres zur Konfiguration des Adapters, so dass er bestimmte Paketarten beantwortet, entnehmen Sie bitte den Remoteaktivierungseinstellungen weiter unten in diesem Hilfeabschnitt.

•	Der Wert "Hardware-Standard" zwingt den Adapter, Remoteaktivierungsfunktionen anhand der Systemhardware zu konfigurieren.

•	Der Wert "Keine Aktion" ermöglicht dem Adapter, den Standardwert des Betriebssystems zu verwenden.

Wenn Sie alle diesbezüglichen Einstellungen deaktivieren möchten, deaktivieren Sie diese Funktion. Stellen Sie anderenfalls diese Funktion auf "Keine Aktion" ein.

Unterstützte Adapter	82559-basierte Adapter. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Schneller Übertragungsabschluss

Stellt Übertragungsbeschreibungen zur Wiederverwendung zur Verfügung, bevor Pakete auf dem Netzwerk übertragen werden.

•	Ist diese Funktion deaktiviert, muss der Adapter warten, bis Pakete gesendet wurden, bevor Übertragungsbeschreibungen wiederverwendet werden können.

•	Ist diese Funktion aktiviert, kann der Adapter Übertragungsbeschreibungen früher wiederverwenden, und der Adapter kann die Übertragungsleistung verbessern.

Unterstützte Adapter	82543 und 82544-basierte Adapter. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Ein
Bereich	Ein, Aus
Flusssteuerung

Ermöglicht dem Adapter, Flusssteuerungs-Frames zu senden und zu empfangen. Der Übertragungspfad wird für die im empfangenen Flusssteuerungs-Frame angegebene Zeitdauer angehalten. Mit diesen Einstellungen wird die Netzwerkleistung optimal eingestellt, und es wird verhindert, dass Pakete nicht berücksichtigt werden.

Unterstützte Adapter	82542-basiert, nur Übertragung. 82540, 82543 und 82544-basierte Adapter, Übertragung und Empfang.  Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Aktiviert
Bereich	Aus, Antworten, Generieren, Generieren & Antworten, Hardwarestandard
Jumbo Frames

NOTE: Jumbo Frames werden nur bei 1000 Mbit/s unterstützt. Der Einsatz von Jumbo Frames bei 10 oder 100 Mbit/s kann in schlechter Leistung oder dem Verlust der Verbindung resultieren.

Aktiviert bzw. deaktiviert Jumbo Frame-Funktionalität. Jumbo Frames können den Durchsatz erhöhen und die CPU-Auslastung vermindern, indem jedem Frame mehr Daten zugewiesen werden und somit weniger Frames versendet werden. Die Standard-Ethernetframe-Größe beträgt 1514 Byte. Jumbo Frames dagegen können 4088, 9014 oder 16128 Byte umfassen.

Aktivieren Sie Jumbo Frames nur, wenn sie von allen Geräten auf dem Netzwerk unterstützt werden und alle diese Geräte so konfiguriert sind, dass dieselbe Frame-Größe verwendet wird. Beachten Sie beim Einrichten von Jumbo Frames auf anderen Netzwerkgeräten, dass Netzwerkgeräte Jumbo Frame-Größen auf unterschiedliche Art berechnen. Einige Geräte (jedoch nicht alle) beziehen die Kopfzeileninformationen in die Frame-Größe mit ein. Intel Adapter beziehen die Kopfzeileninformationen nicht in die Frame-Größe mit ein.

Näheres hierzu entnehmen Sie bitte dem Abschnitt Jumbo Frames .

Unterstützte Adapter	Alle
Standard	Deaktiviert
Bereich	Deaktiviert (1514), 4088, 9014 und 16128 Byte. (Stellen Sie den Switch für CRC 4 Byte höher; plus 4 Byte wenn Sie VLANs verwenden).  HINWEIS: Jeder Wert im Bereich 1514-16128 kann in der Windows-Registrierung über den Parameter MaxFrameSize eingestellt werden.
Lokal verwaltete Adresse

Überschreibt die MAC-Adresse des Adapters. Geben Sie unter Wert eine 12-stellige Hexadezimalzahl ein, um eine neue Netzwerkadresse einzugeben.

Unterstützte Adapter	Alle
Standard	Keine
Bereich	0000 0000 0001 - FFFF FFFF FFFD Ausnahmen: • Verwenden Sie keine Multicastadresse (niederwertigste Ziffer des hohen Byte = 1).  • Verwenden Sie nicht ausschließlich Nullen oder F. Einstellung "Nicht vorhanden": stellt auf Original-Netzwerkadresse des Adapters zurück.
HINWEIS: Intel(R) PROSet II verwendet in einer Gruppe entweder:

•	die LAA (Locally Administered Address) der Gruppe, wenn für die Gruppe eine LAA konfiguriert ist oder

•	die permanente MAC-Adresse des Primäradapters, wenn für die Gruppe keine LAA konfiguriert ist.

Intel PROSet II verwendet nicht die LAA eines Adapters, wenn es sich bei dem Adapter um den Primäradapter einer Gruppe handelt und die Gruppe eine LAA hat.

Anwender von Windows 98SE:

Wenn Sie die Standardadresse verwenden möchten, nachdem Sie eine manuell zugewiesene Adresse verwendet haben, führen Sie eine dieser Optionen durch:

•	Markieren Sie in den Netzwerkeigenschaften im Dialogfeld Erweitert die Option "lokal verwaltete Adresse" und ändern Sie den Wert auf 0. Klicken Sie auf OK,  um die Einstellung zuzuweisen.

•	Klicken Sie in Intel PROSet II auf das Register Erweitert  und anschließend auf Standard wiederherstellen oder löschen Sie alle Eingaben im Wertefeld. Klicken Sie auf OK, um die Einstellung zu speichern.

Verbindungsereignis protokollieren

Diese Einstellung wird verwendet, um die Protokollierung von Veränderungen an Verbindungszuständen zu aktivieren/deaktivieren. Wenn sie aktiviert ist, wird durch ein Verbindungs- oder Verbindungstrennungs-Änderungereignis eine Meldung generiert , die im Systemereignisprotokollsystem angezeigt wird. Administratoren erhalten die Ereignismeldung vom Systemereignisprotokollsystem.

Die folgenden Ereignisse werden protokolliert.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Unterstützte Adapter	Alle
Standard	Aktivieren
Bereich	Aktivieren, Deaktivieren
Empfangs-TCP-Prüfsumme entladen

Ermöglicht es dem Adapter, die TCP- oder UDP-Prüfsumme für eingehende Pakete zu überprüfen.

•	Ist diese Option deaktiviert, überprüft das Betriebssystem die TCP-Prüfsumme.

•	Bei aktivierter Option führt der Adapter die Überprüfung für das Betriebssystem durch.

Diese Funktion verbessert die Empfangsleistung und reduziert die CPU-Auslastung.

Unterstützte Betriebssysteme	• Windows XP* • Windows 2000 • Windows 98 unterstützt die Entladungsoption nicht.
Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	• Windows* XP: Ein • Windows 2000: Aus
Bereich	Ein, Aus
TCP-Segmentierung entladen

Ermöglicht es der Adapterhardware, Daten in gültige Ethernetframes zu segmentieren.

•	Ist TCP-Segmentierung deaktiviert, segmentiert das Betriebssystem die Daten, bevor sie zur Übertragung an den Adapter weitergeleitet werden.

•	Ist TCP-Segmentierung aktiviert, segmentiert der Adapter die Daten in Frames.

Da die Adapterhardware die Datensegmentierung viel schneller als das Betriebssystem abschließen kann, verbessert diese Funktion die Übertragungsleistung in beträchtlichem Maß. Darüber hinaus verbraucht der Adapter weniger CPU-Ressourcen.

Unterstützte Betriebssysteme	Windows XP
Unterstützte Adapter	82544-basiert. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	1
Bereich	0 = diese Funktion nicht aufführen; 1 = diese Funktion aufführen.
Übertragungs-IP-Prüfsumme entladen

Ermöglicht dem Adapter, die IP-Prüfsumme für ausgehende Pakete zu berechnen.

•	Ist diese Option deaktiviert, überprüft das Betriebssystem die IP-Prüfsumme.

•	Bei aktivierter Option führt der Adapter die Überprüfung für das Betriebssystem durch.

Diese Funktion verbessert die IP-Übertragungsleistung und reduziert die CPU-Auslastung.

Unterstützte Betriebssysteme	• Windows XP* • Windows 2000 • Windows 98 unterstützt die Entladungsoption nicht.
Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Ein
Bereich	Ein, Aus
Übertragungs-TCP-Prüfsumme entladen

Ermöglicht es dem Adapter, die TCP- oder UDP-Prüfsumme für ausgehende Pakete zu berechnen.

•	Ist diese Option deaktiviert, überprüft das Betriebssystem die TCP-Prüfsumme.

•	Bei aktivierter Option führt der Adapter die Überprüfung für das Betriebssystem durch.

Diese Funktion verbessert die TCP- und UDP-Übertragungsleistung und reduziert die CPU-Auslastung.

Unterstützte Betriebssysteme	• Windows XP* • Windows 2000 • Windows 98 unterstützt die Entladungsoption nicht.
Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Ein
Bereich	Ein, Aus HINWEIS: Stellen Sie diese Funktion auf "Aus", wenn der Server DOS-gestützte Clients unterstützt.
QoS Packet-Tagging

Ermöglicht dem Adapter, IEEE 802.3ac-gekennzeichnete Frames zu übertragen und zu empfangen, u. a.:

•	802.1pIEEE_802.1p QoS (Quality of Service) Tags, erforderlich für Priority-Packets, und

•	802.1Q Tags, erforderlich für VLANs.

Intel PROSet II aktiviert 802.1p Tagging automatisch, wenn Sie ein VLAN erstellen.

Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Aus
Bereich	Ein, Aus
Empfangsdescriptors

Definiert die Anzahl von Empfangsdescriptors. Empfangsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, dem Speicher eingegangene Pakete zuzuordnen. Jedes eingegangene Paket erfordert einen Empfangsdescriptor. Jede Beschreibung verbraucht 2 KB Speicher.

Sie haben die Option, die Anzahl der Empfangsdescriptors zu erhöhen, falls Sie eine bedeutende Verminderung der Empfangsverkehrsleistung feststellen. Wenn der Empfangsverkehr kein Problem darstellt, verwenden Sie die für den Adapter angemessene Standardeinstellung.

Adapter-Controller	Standard	Bereich
82542-basiert	160	80 – 768
82543-basiert	160	80 – 256
82544-basiert	160	80 – 2048
Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.

Übertragungsdescriptors

Definiert die Anzahl von Übertragungsdescriptors. Übertragungsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu verfolgen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Übertragungsdescriptors.

Sie können die Anzahl der Übertragungsdescriptors erhöhen, wenn Sie bei der Übertragungsleistung ein mögliches Problem bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Übertragungsdescriptors verbessert werden kann, sollte beachtet werden, dass Übertragungsdescriptors Systemspeicher belegen. Wenn der Übertragungsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung 256.

Adapter-Controller	Standard	Bereich
82542-basiert	256	80 – 768
82543-basiert	256	80 – 256
82544-basiert	256	80 – 2048
Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.

Remoteaktivierung bei Verbindungsänderung

Remoteaktiviert den Computer, wenn die Netzwerkverbindung eine Verknüpfung herstellt, während der Computer im Standbymodus ist. Sie können die Funktion aktivieren oder deaktivieren bzw. die Standardeinstellung des Betriebssystems verwenden.

Unterstützte Betriebssysteme	Windows 9x, Windows 2000, Windows XP
Bereich	Deaktiviert, Erzwungen, Betriebssystemabhängig
Standard	Deaktiviert

Remoteaktivierung über Einstellungen

Diese Einstellungen verweisen auf Funktionen, die entweder vom Betriebssystem oder von Intel PROSet aktiviert werden. Diese Funktionen verhalten sich je nach der Version von Windows unterschiedlich oder werden überhaupt nicht unterstützt.

Die folgenden Versionen von Windows unterstützen die Aktivierung über Einstellungen: Windows 2000, Windows XP 64-Bit-Edition, Windows XP Professional und Windows Server 2003. Diese Funktion wird unter Windows Server 2003 für auf 64-Bit Itanium(R) basierende Systeme nicht unterstützt.

Remoteaktivierung über Einstellungen

Sie können die Remoteaktivierungseinstellung des Adapters mit Intel PROSet konfigurieren. Bevor Sie die Remoteaktivierung über Einstellungen markieren, müssen Sie das Betriebssystem befähigen, Remoteaktivierung über Einstellungen zu verwenden. Lesen Sie dazu die entsprechenden Anweisungen.

So aktivieren Sie die Remoteaktivierungseinstellungen

1.	Klicken Sie in Intel PROSet auf das Register Erweitert.

2.	Klicken Sie in der Auflistung der Einstellungen auf Remoteaktivierung über Einstellungen.

3.	Markieren Sie in der Liste Wert die gewünschte Remoteaktivierungseinstellung.

4.	Klicken Sie auf OK oder Übernehmen.

5.	Damit der Adapter auf diese Arten von Remoteaktivierungspaketen reagieren kann, müssen Sie festlegen, dass das Betriebssystem die Aktivierung über Einstellungen verwendet. Navigieren Sie zum Geräte-Manager, und aktivieren Sie die Option "Gerät kann den Computer aus dem Standbymodus aktivieren", um die Aktivierung über Einstellungen zu aktivieren.

Verfügbare Einstellungen

Diese Remoteaktivierungseinstellungen sind in Intel PROSet verfügbar:

Einstellung	Beschreibung
Deaktiviert	Adapter verwendet keine Remoteaktivierungseinstellungen.
Remoteaktivierung über Magic Paket	Der Adapter wird durch ein eingehendes Magic Packet aktiviert. Ein Magic Packet ist ein Paket mit 16 miteinander verbundenen Kopien der Ethernet-Adresse des Empfangsadapters. Wenn diese Funktion konfiguriert wird, überschreibt Intel PROSet den Wert des Betriebssystems mit dem Wert dieser Funktion.
Remoteaktivierung über adressiertes Paket	Ermöglicht dem Adapter, aktiviert zu werden, wenn ein adressiertes Paket eingeht. Ein adressiertes Paket ist ein Unicast-Paket, das an die MAC-Adresse dieses Adapters geschickt wird.  Das Protokoll muss den Treiber für diese Aktivierungsmethode befähigen. Ist diese Funktion deaktiviert, ignoriert der Treiber alle Protokollanforderungen, diese Aktivierungsmethode zu verwenden.
Wake on Magic- und adressierte Pakete	Aktiviert den Adapter entweder durch ein Magic- oder ein an ihn gerichtetes Paket.
Betriebssystem-gesteuert	Gibt dem Betriebssystem komplette Kontrolle über die Aktivierungseinstellungen.

HINWEIS: Wenn mehrere IP-Adressen für einen Adapter konfiguriert werden, fordert das Betriebssystem möglicherweise die Remoteaktivierung über ARP-Muster von allen konfigurierten Adressen an. Der Adapter wird nur als Antwort auf ARP-Pakete aktiviert, die die erste IP-Adresse in der Liste abfragen.

HINWEIS: Remoteaktivierungseinstellungen haben nicht die Fähigkeit, eine Maschine im heruntergefahrenen Zustand (S5-Zustand) zu aktivieren. Dieser Zustand wird nur durch die Einstellung "PME aktivieren" kontrolliert, die ebenfalls im Register "Erweitert" zur finden ist. Selbst wenn die Remoteaktivierungseinstellungen deaktiviert sind, wird die Fähigkeit zur Aktivierung aus dem S5-Zustand durch die Einstellung "PME aktivieren" reguliert.

Solange der Adaptertreiber aktiviert ist, funktionieren die PME-Einstellungen. Sobald der Treiber deaktiviert ist, geht das Gerät zu seiner Hardwarestandardeinstellung zurück, die dem Computer unter Umständen eine Aktivierung aus dem ausgeschalteten Zustand gestattet.

Schaltfläche "Standard wiederherstellen"

Mit dieser Schaltfläche wird der Standardwert für diese erweiterte Einstellung wiederhergestellt. Die Standardwerte können Sie den oben aufgeführten Einstellungen entnehmen.  (Diese Option ist nicht für jede Einstellung verfügbar.)


Treiberinformationen
Netzwerktreiber

So zeigen Sie Details zu einem Adaptertreiber an:

1.	Klicken Sie in der Strukturansicht Network Component Treeauf den Adapter, zu dem Sie Details sehen möchten.

2.	Klicken Sie auf das Register Treiber.

Folgende Informationen werden angezeigt.

Treiberinformationen:

Name	Dateiname des aktuell geladenen Adaptertreibers
Version	Versionsnummer des Treibers. Nützlich beim Herunterladen neuer Versionen von der Intel Supportwebsite: http://support.intel.com
Beschreibung	Treibername
Copyright	Copyrightinformationen
Treiberstatistik:

HINWEIS: Die unten aufgeführte Statistik wird zurückgesetzt, wenn Sie den Adaptertreiber laden oder aktualisieren.

Übertragene Pakete	Anzahl der übertragenen Pakete
Empfangene Pakete	Anzahl der empfangenen Pakete
Übertragungsfehler	Anzahl der fehlerhaft übertragenen Pakete
Empfangsfehler	Anzahl der fehlerhaft empfangenen Pakete
HINWEIS: Die neuesten Treiber erhalten Sie, indem Sie auf Hilfe > Support im Menü klicken. Klicken Sie auf der Supportwebsite auf Die neuesten Treiber erhalten.


Diagnose
Diagnosetests

Mit Hilfe der Diagnose können Sie den Zustand des Adapters analysieren. Bei der Diagnose überprüft Intel PROSet II den Adapter nach I/O-Konflikten, Arbeitsspeicherfehlern, EEPROM-Operabilität, Übertragungs- und Empfangsfunktionalität und Verbindungen.

Das Ergebnis der Diagnosetests wird im Register "Diagnose" angezeigt und darüber hinaus in einem Systemprotokoll gespeichert.

HINWEIS:  Wenn Ihr Computer Windows 98 hat, müssen Sie möglicherweise den Adapter Stromverwaltung deaktivieren, bevor Sie eine Diagnose durchführen. Für Details, schauen Sie unter Prozedur für die Deaktivierung der Energieverwaltung nach.

Tests

Testname	Beschreibung	Problembehandlung
Steuerungsregister	Überprüft den Adapter auf Konflikte in der I/O-Adresse und testet den Zugriff auf die Register. Dieser Test beinhaltet alle allgemeinen Register sowie Empfangs- und Übertragungsregister. Er beinhaltet nicht das EEPROM Control/Data-Register.	Verläuft der Steuerungsregistertest negativ, sollte der Adapter ausgewechselt und der Test erneut durchgeführt werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.
FIFO-Register	Testet den FIFO-Speicher auf dem Adapter, indem Muster auf den FIFO-Speicher geschrieben und aus ihm gelesen werden.	Verläuft der FIFO-Registertest negativ, sollte der Adapter ausgewechselt und der Test erneut durchgeführt werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.
EEPROM	Überprüft die Integrität der vom EEPROM gelesenen Daten. Dieser Test absolviert einen Schreib- und Lesetest vom EEPROM aus und vergleicht die Ergebnisse in einer Konsistenzprüfung.	Verläuft der EEPROM-Registertest negativ, sollte der Adapter ausgewechselt und der Test erneut durchgeführt werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.
Interrupt	Verwendet die Interrupt-Register, um zu bestätigen, dass alle Adapter-Interrupts arbeiten.	Wenn der Interrupt-Test negativ verläuft, sollten die Interrupt-Einstellungen im BIOS geändert werden. Wird das Problem nicht durch Ändern der Einstellungen gelöst, setzen Sie den Adapter in einen anderen Steckplatz ein.
Loopback	Überprüft ob der Adapter Pakete senden und empfangen kann, indem er sich selbst Pakete sendet. Bei diesem Test werden sowohl die MAC Loopback- als auch die Transceiver Loopback-Modi verwendet. (Nicht verfügbar für Intel(R) PRO/100 T Adapter.)	Verläuft der Loopback-Registertest negativ, sollte der Adapter ausgewechselt und der Test erneut vorgenommen werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.
Verbindung	Bestätigt, dass der Adapter mit einem gültigen Partner verknüpft ist.	Wenn der Verbindungstest negativ verläuft, sollten Sie sicherstellen, dass das Kabel fest an den Adapter und den Verbindungspartner angeschlossen ist. Ist das Kabel richtig angeschlossen, stecken Sie es in einen anderen Anschluss des Verbindungspartners, oder verwenden Sie ein anderes Kabel.
HINWEIS: Wenn Sie während der Diagnose auf Stopp klicken, wird diese nach kurzer Verzögerung angehalten. Wenn die Diagnose angehalten ist, wird die Schaltfläche OK verfügbar.

Andere Einstellungen

Schaltfläche Erweitert: Klicken Sie auf diese Schaltfläche, um einen Sender/Responder-Netzwerktest einzurichten.

Warnung: Der Sender/Responder-Test kann nicht ausgeführt werden, während das System im Standbymodus ist oder wenn das Kabel nicht an den Computer angeschlossen ist.


Gruppenkonfiguration und -status
Gruppenkonfiguration

So werden Details zur Gruppenkonfiguration angezeigt:

Klicken Sie in der Strukturansicht Netzwerkkomponenten auf die Gruppe, die angezeigt werden soll.

Das Register "Gruppenkonfiguration" wird angezeigt.

Im Statusfeld Adapter in der Gruppe wird Folgendes angezeigt:

Adapter

Der Name jedes Adapters der Gruppe.

Priorität

Zeigt den Prioritätsstatus der Adapter in der Gruppe an (sofern Sie eine Priorität festgelegt haben). Ein Adapter kann in der Gruppe den Status Primäradapter oder Sekundäradapter haben.

So bestimmen Sie einen Adapter als Primär- oder Sekundäradapter

In der Spalte Status wird Folgendes angezeigt:

•	Aktiv: Der Adapter verarbeitet Netzwerkverkehr.

•	Im AFT-Modus ist nur ein Adapter aktiv - der bevorzugte Primäradapter.

•	Im Dynamic 802.3ad-Modus haben Adapter, die Teil des aktiven Aggregators sind, den Status "Aktiv".

•	Standby: AFT-, SFT- und Dynamic 802.3ad-Gruppen unterstützen den Standbymodus. Ein Adapter in Standbymodus verfügt über eine Verbindung mit dem Netzwerk, verarbeitet jedoch keinen Verkehr.

•	Deaktiviert: Der Adapter wurde entfernt, deaktiviert, oder der Treiber konnte nicht geladen werden. Darüber hinaus erhält der Adapter den Status "Deaktiviert", wenn das Kabel Fehler aufweist oder die Verbindung unterbrochen ist.

Der Abschnitt Gruppeninformationen enthält Folgendes:

•	Ethernet-Adresse: Führt die primäre MAC-Adresse der Gruppe auf.

•	IP-Adresse: Führt die IP-Adresse der Gruppe auf.

•	Gruppentyp: Führt den Gruppenmodus auf.

Schaltfläche "Switch-Konfiguration testen"

Mit Hilfe des Switch-Konfigurationstests können Sie sicherstellen, dass die Verbindungspartner  den ausgewählten Adaptergruppenmodus unterstützen. Wenn der Adapter beispielsweise Mitglied einer Link Aggregation ist, kann Intel(R) PROSet II überprüfen, ob mit dem Adapter verbundene Verbindungspartner Link Aggregation unterstützen.

Näheres zu den Anforderungen der verschiedenen Gruppenmodi erfahren Sie unter Info zur Gruppenbildung.

Bei der Ausführung dieses Tests wird die Verbindung mit dem Server vorübergehend unterbrochen.

HINWEIS: Dieser Test ermittelt unter folgenden Voraussetzungen keine Fehler:

Adapterkonfiguration	Switch-Konfiguration
Im Link Aggregation-Modus ohne VLANs gruppiert	Der Switch • gehört entweder keinem VLAN an oder • ist mit gekennzeichneten VLANs konfiguriert.
Im Link Aggregation-Modus mit VLANs gruppiert	Der Switch • gehört nicht zum auf dem Adapter konfigurierten VLAN und • Link Aggregation wurde für ihn nicht definiert.
So führen Sie den Switch-Konfigurationstest aus:

1.	Klicken Sie in der Strukturansicht Netzwerkkomponenten auf die Gruppe, die getestet werden soll.
Um den Test auszuführen, müssen mindestens zwei Adapter in der Gruppe vorhanden sein.

2.	Klicken Sie im Register "Gruppenkonfiguration" auf Switch-Konfiguration testen.
Das Dialogfeld "Switch-Konfiguration testen" wird angezeigt.

3.	Um mit dem Test fortzufahren, klicken Sie auf Ja.
Wenn Konfigurationsfehler für die Gruppe oder Verbindungspartner gefunden werden, wird das Register "Fehlerbehebung" angezeigt.

HINWEIS:  Aufgrund der für den STP-Test (Spanning Tree Protocol) erforderlichen Dauer, gibt Intel PROSet II möglicherweise nicht genau an, ob STP (Spanning Tree Protocol) auf dem Netzwerk aktiviert ist. Stellen Sie sicher, dass Switches mit STP konfiguriert sind:

•	Aktiviert für SFT-Gruppen

•	Deaktiviert (Portfast) für alle anderen Gruppenmodi


VLAN
Übersicht über VLANs

Ein VLAN ist eine logische Netzwerkgruppierung über die Sie Netzwerkverkehr isolieren können, damit Mitglieder des VLANs nur Verkehr von anderen Mitgliedern empfangen. Mit VLANs können Sie PCs in logische Arbeitsgruppen einteilen. Dies ist besonders wichtig, wenn Clients mit Servern verbunden werden, die über ein Gebäude, Gelände oder Unternehmensnetzwerk verteilt platziert sind.

Durch den Einsatz von VLANs auf dem Netzwerk können Sie

•	Übertragungsstürme begrenzen

•	das Hinzufügen, Verschieben und Ändern von Netzwerkverbindungen verbessern

•	Sicherheitsprobleme reduzieren

•	Verwaltungsaufgaben erleichtern

VLAN-Arten

Es gibt switch-basierte VLANs - auch implizite VLANs genannt - und Tag-basierte VLANs - auch explizite VLAN	s genannt.

•	Implizite VLANs sind auf Switch-Funktionen wie beispielsweise Anschlussnummer, MAC-Adresse und anderen Funktionen der Ebene 2 basiert. Das Standard-VLAN auf vielen Switches, einschließlich der meisten Cisco*-Produkte, ist ein implizites VLAN. Implizite VLANs werden nur auf dem Switch konfiguriert. Der Switch verändert bzw. kennzeichnet Pakete nicht, um ein implizites VLAN zu erzwingen. Alle Intel Adapter können an impliziten VLANs teilnehmen.

•	Explizite VLANs sind auf einem jedem Paketkopf hinzugefügten Vier-Byte-Tag (802.3ac) basiert. Jedes IEEE VLAN muss überall im Netzwerk eingerichtet werden, einschließlich auf den Adaptern und allen Verbindungspartnern.

Anforderungen

VLANs erfordern

•	Switches auf dem Netzwerk, die 802.1Q VLANs unterstützen können.

•	Adapter, die 802.1Q VLANs unterstützen können, sind u. a.:

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R) PRO/1000

•	VLAN	s werden nicht von Intel(R) PRO/100B Adaptern unterstützt.

Die Intel Networking Website enthält eine Übersicht über Intel VLANs:

  Website jetzt besuchen

Wenn Sie spezifischere Informationen wünschen, lesen Sie das Whitepaper zu VLANs:

  Whitepaper von der Website jetzt lesen

Siehe auch:

VLAN hinzufügen

VLAN-Eigenschaften ändern

VLAN entfernen

Erweiterte Einstellungen für VLANs


Support

Wenn Sie eine Internetverbindung und einen Webbrowser haben, können Sie eine von Intels Supportsites besuchen.

So erhalten Sie Support über das Internet:

1.	Klicken Sie im Menü "Hilfe" auf Support.

2.	Klicken Sie auf einen der Websitelinks.


Fehlerbehebung

Das Register "Fehlerbehebung" wird angezeigt, wenn Intel(R) PROSet II ein Problem an der Adapterkonfiguration, Treiberinstallation oder einen sonstigen Fehler feststellt. Intel PROSet II untersucht das Problem und bietet in den meisten Fällen eine mögliche Problemlösung.

Wenn Sie glauben, dass Ihr Adapter einen Fehler hat, versuchen Sie eine oder mehrere der folgenden Lösungen:

•	Überprüfen Sie die Informationen im Register Allgemein, um festzustellen, ob eine aktive Verbindung mit dem Netzwerk vorliegt.

•	Wenn Sie eine Gruppe konfiguriert haben, überprüfen Sie die Konfiguration der Verbindungspartner, um sicherzustellen, dass sie den Gruppenmodus unterstützen.

•	Diagnose ausführen.

•	Führen Sie den Kabeltest aus, wenn dieser von Ihrem Adapter unterstützt wird.


Sender/Responder-Test

Mit dem Sender/Responder-Test können Sie Ihren Adapter über ein Netzwerk testen.

Bevor Sie diesen Test ausführen, stellen Sie sicher, dass der Adapter über eine Verbindung mit dem Netzwerk verfügt.

Test einrichten

Richten Sie einen Sender- und einen Responder-Computer ein. Der Sender überträgt fortdauernd Pakete an den Responder, der die Pakete an den Sender zurückgibt.

Sender
Sender überträgt fortdauernd Pakete auf das Netzwerk. Wählen Sie Start, um mit dem Senden der Pakete zu beginnen.
Bevor Sie anfangen, Pakete zu übertragen, muss ein Responder auf dem Netzwerk eingerichtet werden. Wählen Sie einen anderen Computer, auf dem ein Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S oder PRO/1000 Adapter installiert ist, und verwenden Sie Intel(R) PROSet, um diesen Adapter als Responder einzurichten. Wenn möglich, verwenden Sie dasselbe Adaptermodell für den Sender und den Responder.

Responder
Gibt Pakete an den Sender zurück. Wählen Sie Start, um diesen PC als Responder einzurichten.

Dieser Test kann auch zum Testen von Netzwerksegmentkabeln und der Netzwerkkonfiguration verwendet werden. Wenn Sie ein neues LAN-Segment testen, richten Sie einen Responder an einem Ende ein und testen Sie mit einem Sender am anderen.

Dieser Test überprüft die Verbindung zwischen zwei Adaptern. Er überprüft nicht die Geschwindigkeit. Die Geschwindigkeit, mit der ein Adapter Verkehr über ein Netzwerk überträgt oder empfängt, kann je nach Netzwerktopologie und Netzwerkauslastung unterschiedlich sein. Die konfigurierte Geschwindigkeit eines Adapters wird auf dem Register Allgemein angezeigt.

HINWEIS:  Wenn ein Cisco* 6500 Switch so konfiguriert ist, dass Spanning Tree aktiviert aktiviert ist, ergibt der Sender/Responder-Test keine genauen Ergebnisse. Vergewissern Sie sich, dass Spanning Tree deaktiviert ist, um den Sender/Responder-Test mit einem Cisco 6500 Switch auszuführen.

Warnung: Der Sender/Responder-Test kann nicht ausgeführt werden, während das System im Standbymodus ist oder wenn das Kabel nicht an den Computer angeschlossen ist.


Neues VLAN

VLAN-ID: Von der Netzwerkverwaltung zugewiesene VLAN-Nummer. Die VLAN-Kennung auf dem Adapter muss mit der VLAN-Kennung auf dem Switch übereinstimmen. Gültige Werte:  1 - 4094. (HINWEIS: Die VLAN-Nummern 0 und 1 sind häufig reserviert. Näheres hierzu erfahren Sie in Ihrer Switch-Dokumentation).

VLAN-Name: Name des VLAN. Beispielsweise "Marketing" oder "Ingenieurwesen". Der VLAN-Name ist eine optionale Einstellung, mit deren Hilfe Sie VLANs auf dem Netzwerk leichter erkennen. Der VLAN-Name auf dem Adapter muss nicht mit dem VLAN-Namen auf dem Switch übereinstimmen.


Adapter identifizieren

Mit Hilfe der Funktion "Adapter identifizieren" können Sie den Hardwareadapter hinten am Computer erkennen.

Wenn Sie beispielsweise zwei Adapter installiert haben, können Sie in der Strukturansicht Netzwerkkomponenten einen Adapter auswählen, und dann auf die Schaltfläche "Adapter identifizieren" drücken. Die Klammer-LED-Anzeige des ausgewählten Adapters blinkt daraufhin.

So überprüfen Sie die Adapterposition:

1.	Klicken Sie auf Adapter identifizieren.

2.	Geben Sie mit Hilfe des Schiebereglers an, wie viele Sekunden die LED-Anzeige blinken soll. Der Standardwert ist 10 Sekunden.

3.	Klicken Sie auf Start.

Die LED-Anzeige des ausgewählten Adapters blinkt so lange wie angegeben.


AFT (Adapter Fehler-Toleranz)

AFT (Adapter Fault Tolerance) ist eine Gruppe von zwei oder mehr Adaptern, die konfiguriert wurden, um eine Backupnetzwerkverbindung zur Verfügung zu stellen. Sollten der Hub, der Switchport, das Kabel oder der Adapter ausfallen, bleibt die Netzwerkleistung des Computers ununterbrochen bestehen.

AFT (Adapter Fault Tolerance) Gruppen verfügen über einen Primäradapter und einen Backup- oder Sekundäradapter. Im Standardbetrieb wird Verkehr lediglich vom Primäradapter übertragen. Falls der Primäradapter oder die Verbindung zum Primäradapter ausfällt, übernimmt der Sekundäradapter automatisch alle Aufgaben.

Wenn Sie AFT (Adapter Fault Tolerance) verwenden, muss Spanning Tree deaktiviert sein.

AFT-Gruppen sind mit folgenden Elementen kompatibel:

Adapterart	Erfordert, dass ein Intel Serveradapter Mitglied der Gruppe ist
Adaptergeschwindigkeit	Kann gemischt sein; ein Adapter kann beispielsweise mit einer Geschwindigkeit von 100 Mbit/s und ein anderer mit 1000 Mbit/s verknüpft sein.
Netzwerkkonfiguration	• Alle Adapter müssen mit demselben Switch verbunden sein. • Spanning Tree muss deaktiviert sein.
Protokolle	Alle
Siehe auch:

Info zu Gruppenbildung

Gruppenarten


ALB (Adaptive Load Balancing)

Adaptiver Lastenausgleich (ALB - Adaptive Load Balancing) ist eine Gruppenart, die dazu konfiguriert ist, den Übertragungs- und Empfangsdurchsatz Ihres Servers zu erhöhen. ALB-Gruppen gleichen die Übertragungsverkehrslast automatisch aus. Der Lastenausgleich für den Empfangsverkehr kann jedoch aktiviert oder deaktiviert werden.

ALB-Gruppen erhöhen den Durchsatz durch:

•	Adapterkonfiguration. Durch das Hinzufügen von Mitgliedern zu Gruppen kann der Gesamtdurchsatz erhöht werden.

•	Verkehrsanalyse. Die ALB-Software analysiert ständig die Übertragungs- und Empfangslasten für jedes Gruppenmitglied und verteilt die Auslastung dann nach Bedarf über die Adapter.

Übertragungsverkehr

Bei ALB-Gruppen gleichen alle Adapter den IP- (IPv4 und IPv6) und NCP-IPX-Übertragungsverkehr aus.

Empfangsverkehr

•	Bei ALB-Gruppen mit deaktiviertem Empfangslastenausgleich empfängt der Primäradapter den Verkehr.

•	Bei ALB-Gruppen mit aktiviertem Empfangslastenausgleich:

•	empfängt der Primäradapter den Verkehr mit Hilfe eines Protokolls;

•	empfangen die aktiven Adapter mit den höchsten Geschwindigkeiten IPv4-Verkehr.

Beispielsweise bei einer ALB-Gruppe mit drei Adaptern - einem Gigabitadapter als Primäradapter und zwei Intel(R) PRO/100 Adaptern -

•	empfängt der Gigabitadapter nicht routbaren und IPv6-Verkehr, da er der Primäradapter ist,

•	empfängt der Gigabitadapter IPv4, da er der Adapter mit der höchsten Geschwindigkeit ist,

•	nehmen die Intel PRO/100 Adapter nicht an dem Empfangslastenausgleich teil.

Näheres zur Aktivierung und Deaktivierung des Empfangslastenausgleichs finden Sie unter Erweiterte Einstellungen konfigurieren.

Darüber hinaus bieten ALB-Gruppen Fehlertoleranz. Fällt der Primäradapter aus, bleibt die Gruppe in Betrieb und gleicht den Verkehr zwischen den verbleibenden, funktionierenden Gruppenmitgliedern aus.

ALB-Gruppen sind kompatibel mit:

Adaptergeschwindigkeit	Kann gemischt sein, z. B. kann ein Adapter mit einer Geschwindigkeit von 100 Mbit/s und ein zweiter mit 1000 Mbit/s arbeiten.
Protokolle	IP, IPX (NCP) HINWEIS: Microsoft kategorisiert seinen Ipv6-Support unter Windows* 2000 als eine Technologie-Vorschau. Als solche war der Ipv6-Support unter Windows 2000 nicht für eine Produktionsumgebung gedacht. Einzelheiten über den Betriebssystemsupport für Ipv6 finden Sie in der Systemdokumentation.
Netzwerkkonfiguration	Alle Adapter müssen mit demselben Switch verbunden sein.

Intel(R) PRO/1000 Gigabit Server-Adapter - Anmerkungen zur Leistung

Da der Intel(R) PRO/1000 Adapter bereits eine so hohe Bandbreite unterstützt, kann der Einsatz der ALB-Funktion auf einigen Servern zu verminderter Leistung führen. Dies liegt daran, dass viele derzeit verfügbare Server nicht über die CPU- oder Buskapazität verfügen, gruppierte Adapter der Gigabitklasse effektiv zu nutzen. Verwenden Sie neuere Server, die mehrere PCI-Busse und mehrere Pentium II(R) Prozessoren mit Geschwindigkeiten von 400 MHz oder mehr unterstützen, um die beste ALB-Leistung zu erzielen. Sie erzielen die höchste ALB-Leistung auf einem solchen Server, wenn Sie die gruppierten Intel PRO/1000 Adapter auf separaten PCI-Bussen installieren.

Siehe auch:

Info zur Gruppenbildung

Gruppenarten

Erweiterte Einstellungen konfigurieren


IEEE 802.3ad: Dynamisch

802.3ad ist ein IEEE Link Aggregation-Standard. Ebenso wie statische Link Aggregation-Gruppen verbessern Gruppen mit dynamischer Link Aggregation den Durchsatz durch:

•	Adapterkonfiguration. Durch das Hinzufügen von Mitgliedern zu Gruppen kann der Durchsatz erhöht werden. Gruppen können aus bis zu acht Adaptern bestehen. Jeder Server kann mit bis zu vier Gruppen operieren.

•	Verkehrsanalyse. Die Software analysiert ständig die Übertragungsauslastung für jedes Gruppenmitglied und verteilt dann die Auslastung wie erforderlich über die Adapter. Die Switch-Auslastung regelt den Empfangsverkehr.

Darüber hinaus bieten 802.3ad-Gruppen Fault Tolerance. In 802.3ad-Gruppen verwendet der Server eine IP/MAC-Adresse zur Kommunikation mit dem Netzwerk. Netzwerkgeräte und -Clients betrachten Gruppen im Link Aggregation-Modus als einen Computer. Wenn ein Adapter in der Gruppe ausfällt, wird die Gruppe vom Netzwerk als Computer mit eingeschränkten Fähigkeiten betrachtet.

Link Aggregation-Gruppen sind kompatibel mit:

Adaptergeschwindigkeit	Alle Adapter müssen mit gleicher Geschwindigkeit betrieben werden.
Netzwerkkonfiguration	• Stellen Sie sicher, dass der mit den Adaptern verbundene Switch den Standard IEEE 802.3ad uneingeschränkt unterstützt. • Näheres hierzu erfahren Sie in Ihrer Switch-Dokumentation für Anschlussabhängigkeiten. Einige Switches müssen gepaart werden, um auf einem Primäranschluss starten zu können.  • Überprüfen Sie Ihre Geschwindigkeits- und Duplexeinstellungen und stellen Sie sicher, dass Adapter und Switch auf Vollduplex eingestellt sind (entweder erzwungen oder auf automatische Absprache). Adapter und Switch müssen dieselbe Geschwindigkeit und Duplexkonfiguration aufweisen. Die Vollduplexanforderung ist Teil der IEEE 802.3ad-Spezifikation: http://standards.ieee.org/.  Falls nötig, ändern Sie die Geschwindigkeits- oder Duplexeinstellung bevor Sie den Adapter mit dem Switch verbinden. Obwohl Sie die Geschwindigkeit und die Duplexeinstellungen ändern können, nachdem die Gruppe erstellt wurde, empfiehlt Intel die Kabel abzuziehen, bis die Einstellungen übernommen sind. Es kann vorkommen, dass Switches oder Server geänderte Geschwindigkeits- oder Duplexeinstellungen nicht richtig erkennen, wenn Einstellungen bei aktiver Verbindung mit dem Netzwerk vorgenommen wurden. • Wenn Sie ein VLAN konfigurieren, überprüfen Sie Ihre Switch-Dokumentation auf VLAN-Kompatibilitätsangaben. Nicht alle Switches unterstützen gleichzeitige dynamische 802.3ad-Gruppen und VLANs. Wenn Sie sich entschließen, VLANs einzurichten, konfigurieren Sie die Gruppenbildungs- und VLAN-Einstellungen auf dem Adapter bevpr Sie ihn mit dem Switch verbinden. Das Einrichten von VLANs nachdem der Switch einen aktiven Aggregator erstellt hat, wirkt sich nachteilig auf die Funktionalität des VLANs aus. HINWEIS:  Bei einigen Switches können Kupfer- und Glasfaseradapter nicht zu demselben Aggregator einer IEEE 802.3ad-Konfiguration gehören. Wenn Kupfer- und Glasfaseradapter in einem System installiert sind, kann der Switch die Kupferadapter in einem und die auf Glasfaser basierenden Adapter in einem anderen Aggregator konfigurieren. Sollten Sie auf eine derartige Situation stoßen, sollten Sie, um die beste Leistung zu erzielen, in einem System entweder Kupfer- oder auf Glasfaser basierende Kabel verwenden.
Protokolle	Alle

Siehe auch:

Info über Gruppenbildung

Gruppenarten


Adapter-Gruppenbildungsinformationen
Info zu Gruppenbildung

Eine Adaptergruppe ist eine Anzahl von Adaptern, die für erhöhten Durchsatz und Fehlertoleranz konfiguriert wurden. Gruppenbildung ist mit Windows* 2000, Windows NT* 4.0 und Windows XP kompatibel.

Welche Gruppenarten sind möglich?

Mit Intel(R) PROSet II können sie folgende Gruppenarten konfigurieren:

•	AFT (Adapter Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	Adaptiver Lastenausgleich (ALB - Adaptive Load Balancing)

•	FEC* /LA/802.3ad: Statisch

•	GEC*/LA/802.3ad: Static

•	IEEE 802.3ad: Dynamisch

Wie viele Adapter können einer Gruppe hinzugefügt werden?

Mit Ausnahme von SFT-Gruppen können Gruppen bis zu acht Adapter haben. SFT-Gruppen müssen genau zwei Adapter haben, die mit einem Verbindungspartner verbunden sind.

Können Adapter von anderen Herstellern in einer Gruppe verwendet werden?

Sie können für alle Gruppenbildungsmodi sogenannte Multi-Vendor Teams (MVT) erstellen - Gruppen von Adaptern verschiedener Hersteller. Eine Gruppe muss mindestens einen Intel Serveradapter besitzen, um eine MVT erstellen zu können.

MVT ist kompatibel mit:

Adapterart	Überprüfen Sie die Strukturansicht "Netzwerkkomponenten" , um zu erfahren, welche Adapter Ihres Systems kompatibel sind.
Adaptergeschwindigkeit	Überprüfen Sie die Anforderungen des Gruppenbildungsmodus.
HINWEIS: Wenn Gruppenmitglieder Teil eines VLANs sind, unterstützt Intel PROSet II MVT nicht.

Wie viele Gruppen können auf einem Computer eingerichtet werden?

Die Anzahl der auf einem beliebigen Computer konfigurierten Gruppen hängt von der Hardware- und Softwarekonfiguration des Systems ab.

Welche Anforderungen müssen erfüllt sein?

Die Netzwerkkonfiguration und die auf dem Computer installierten Adapterarten bestimmen, welche Gruppenarten am besten auf dem Computer eingerichtet werden sollten. Einen Überblick über die Gruppenanforderungen und Fähigkeiten finden Sie unter Gruppenarten.

Wie werden Gruppen entfernt?

Verwenden Sie beim Entfernen von Adaptergruppen unbedingt das Programm Intel(R) PROSet II. Das Entfernen oder Deaktivieren von Gruppen über die Netzwerk-Systemsteuerung auf Ihrem Betriebssystem könnte die Systemstabilität und Adapterkonfiguration beeinträchtigen.

Die Intel(R) Networking Website enthält eine Übersicht über Adaptergruppierung.

  Visit Web site now

Näheres über die Unterschiede der verschiedenen Gruppenarten erfahren Sie im "White paper on Solving Server Bottlenecks":

  Read white paper now

Siehe auch:

Gruppenarten


Adapterdetails

So zeigen Sie Details zu einem Adapter an:

1	Klicken Sie in der Strukturansicht Netzwerkkomponentenauf den Adapter, zu dem Sie Details sehen möchten.

2	Klicken Sie im Register "Allgemein" auf Details.

Der Bildschirm "Adapterdetails" wird angezeigt.

HINWEIS: Nicht alle Eigenschaften sind für jedes Adaptermodell verfügbar.

IP-Adresse	Die derzeit für diesen Adapter verwendete IP-Adresse. HINWEIS: Intel® PROSet II zeigt keine IPv6-Adressen an.
Busgeschwindigkeit	Derzeitige Geschwindigkeit des PCI-Bus (in Megahertz) für diesen Adapter
Busbreite	Bit-Breite des PCI-Bus (32 oder 64) für diesen Adapter
Controller	Teilnummer oder Komponentenmodell für diesen Adapter
Medientyp	Anschlussart (Glasfaser oder Kupfer)
Permanente Ethernet-Adresse	Knoten-(MAC)-Adresse des Adapters in Hexadezimal. Die MAC-Adresse wird dem Adapter vom Hersteller zugewiesen.
Aktuelle Ethernet-Adresse	Derzeitige MAC-Adresse dieses Adapters.  Wenn der Adapter ein Gruppenmitglied ist oder ihm eine LAA-Adresse zugewiesen wurde, unterscheidet sich die derzeitige Ethernet-Adresse von der permanenten Adresse des Adapters.
PHY-Gerät	Beschreibung des Adapters
Teilenummer	Die Intel Teilenummer des Adapters
Interrupt	Der vom PCI BIOS oder dem Betriebssystem dem Adapter zugewiesene Interrupt
Speicheradresse	Die vom PCI BIOS oder dem Betriebssystem dem Adapter zugewiesene Speicheradresse
I/O-Adresse	Die dem Adapter vom PCI BIOS zugewiesene I/O-Adresse
(Bus) Steckplatz	Die Busnummer und Steckplatzkennung des Adapters
Systemsteckplatz	Systemsteckplätze sind Unterteilungen des Bussteckplatzes. Wenn der Bussteckplatz beispielsweise zweigeteilt ist, wird jede Unterteilung des Bussteckplatzes durch jeweils einen der beiden Systemsteckplätze identifiziert.
DHCP-Serveradresse	IP-Adresse des Servers, der dem Adapter eine IP-Adresse zur Verfügung gestellt hat.


Erweiterte Gruppierungsfunktionen konfigurieren

Für jede Gruppenart sind andere erweiterte Einstellungen verfügbar.

So können erweiterte Gruppeneinstellungen angezeigt oder geändert werden:

1.	Klicken Sie in der Strukturansicht "Netzwerkkomponenten" auf eine Gruppe.

2.	Klicken Sie auf das Register Erweitert.

3.	Nehmen Sie die gewünschten Änderungen an der Gruppenkonfiguration vor.

4.	Klicken Sie auf Standard wiederherstellen, um die Standardeinstellungen wiederherzustellen.

5.	Klicken Sie auf OK, um die Änderungen zu übernehmen.

Beschreibungen der erweiterten Einstellungen sowie ihrer Standardeinstellungen werden im Folgenden beschrieben. In den meisten Fällen ist es empfehlenswert, die Standardeinstellungen beizubehalten.

Prüfzeit (Sekunden)

Wie häufig die Software den Gruppenmitgliedsstatus überprüft. Beträgt die Prüfzeit beispielsweise eine Sekunde, überprüft die Software die Gruppenmitglieder ein Mal pro Sekunde, um sicherzustellen, dass sie Verkehr übertragen und empfangen können.

Standard: 1 Sekunde

Bereich: 1 - 3 Sekunden

LinkAggrJoinMethod

Diese erweiterte Einstellung ist für die Link Aggregation-Gruppierung verfügbar. Basiert auf dem Standard IEEE 802.3ad; eine Verbindung kann in mehrere Verbindungen - sogenannte Aggregatoren - unterteilt werden. Es ist jedoch lediglich einer der Aggregatoren aktiv. Der Parameter LinkAggrJoinMethod bestimmt, wie das System den aktiven Aggregator auswählt. Wenn Sie LinkAggrJoinMethod auf maximale Bandbreite einstellen, wählt das System den Aggregator, der am meisten Verkehr generiert. Wenn Sie den Parameter auf maximale Adapter einstellen, wählt das System den Aggregator, der am meisten Adapter hat.

Standard: Maximale Bandbreite

Bereich: Maximale Bandbreite, maximale Adapter

Lastenausgleichs-Aktualisierungsrate

Die Zeit, die verstreicht, bevor die Software die aktuelle Auslastung der Gruppenmitglieder wiederherstellt oder aktualisiert. Um die beste Leistung zu erzielen, sollte diese Einstellung auf dem Standardwert oder so niedrig wie möglich belassen werden.

Standard: Alle 10 Prüfzeit-Einheiten

Bereich: 1-50 Prüfzeit-Einheiten

Die in der Einstellung "Prüfzeit" angegebene Sekundenzahl ist die Maßeinheit für die Aktualisierungsrate.  Näheres hierzu entnehmen Sie bitte der Einstellung "Prüfzeit.

LAA (Locally Administered Address)

Wenn Sie Windows NT Load Balancing Service (WLBS), NLB oder andere Treiber dieser Klasse verwenden, können Sie die von der Gruppe verwendete MAC-Adresse anpassen.

Wenn Sie die MAC-Adresse anpassen möchten, geben Sie eine neue MAC-Adresse für die Gruppe in das LAA-Feld ein. Stellen Sie sicher, dass die neue Adresse in folgenden Bereich fällt:  0000 0000 0001 - FFFF FFFF FFFD

Ausnahmen:

o	Verwenden Sie keine Multicastadresse (niederwertigste Ziffer des hohen Byte = 1). In der Adresse 0Y123456789A kann "Y" beispielsweise keine ungerade Zahl sein. (Y muss 0, 2, 4, 6, 8, A, C oder E sein.)

o	Verwenden Sie nicht ausschließlich Nullen oder F.

Wenn Sie die Standard-MAC-Adresse wiederherstellen möchten, löschen Sie die Adresse im Feld LAA ( Locally Administered Address) und klicken Sie anschließend auf OK oder auf Standard wiederherstellen.

HINWEIS: Intel(R) PROSet II verwendet entweder:

•	die LAA (Locally Administered Address) der Gruppe, wenn für die Gruppe eine LAA konfiguriert ist oder

•	die permanente MAC-Adresse des Primäradapters, wenn für die Gruppe keine LAA konfiguriert ist.

LAA-Einstellungen auf dem Primäradapter werden von den Gruppen-LAA-Einstellungen überschrieben, wenn für die Gruppe ein LAA konfiguriert wurde.

STP- und SFT-Gruppen: Wenn Sie den (aktiven) Primäradapter einer Gruppe auswechseln, wird die Gruppe über die MAC-Adresse des neuen Primäradapters neu geladen. Ebenso wird eine Gruppe neu geladen und erhält eine neue MAC-Adresse, wenn die LAA (Locally Administered Address) der Gruppe geändert wird. In beiden Fällen kann die Gruppe nicht kommunizieren, wenn die Änderungen an einer SFT-Gruppe vorgenommen werden und der Server aktiv auf dem Netzwerk ist, bis alle Netzwerkgeräte ihre ARP-Tabellen mit den Adressenangaben des neuen Primäradapters aktualisieren. Die für die Aktualisierung der ARP-Tabelle erforderliche Dauer richtet sich nach der ARP-Cachetimeout-Dauer. Dies ist ein Parameter, der für einige Router und Betriebssysteme verfügbar ist. Je nach der ARP-Cachetimeout-Dauer kann die Gruppe bis zu 10 Minuten nicht verfügbar sein.

NumRxPackets

Definiert die Anzahl von Empfangsdescriptors. Empfangsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, dem Speicher eingegangene Pakete zuzuordnen. Jedes eingegangene Paket erfordert einen Empfangsdescriptor. Jede Beschreibung verbraucht 2 KB Speicher.

Sie haben die Option, die Anzahl der Empfangsdescriptors zu erhöhen, falls Sie eine bedeutende Verminderung der Empfangsverkehrsleistung feststellen. Wenn der Empfangsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung.

Standard: Standard Wenn der Standardwert verwendet wird, berechnet Intel PROSet II automatisch den besten Wert für diese Einstellung anhand der Gruppenkonfiguration und der Hardwarefähigkeiten.

Empfohlen: 250

Bereich: 32 - 512, Schritt 16

NumTxPackets

Definiert die Anzahl von Übertragungsdescriptors. Übertragungsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu verfolgen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Übertragungsdescriptors.

Sie können die Anzahl der Übertragungsdescriptors erhöhen, wenn Sie bei der Übertragungsleistung ein mögliches Problem bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Übertragungsdescriptors verbessert werden kann, sollte beachtet werden, dass Übertragungsdescriptors Systemspeicher belegen. Wenn der Übertragungsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung.

Standard:  Standard Wenn der Standardwert verwendet wird, berechnet Intel PROSet II automatisch den besten Wert für diese Einstellung anhand der Gruppenkonfiguration und der Hardwarefähigkeiten.

Bereich: 16 - 512, Schritt 16

Empfangslastenausgleich

Standardmäßig lasten ALB-Gruppen den gesamten Übertragungsverkehr aus. Darüber hinaus können Sie hier den Empfangslastenausgleich aktivieren oder deaktivieren.

Wenn Empfangslastenausgleich deaktiviert ist, empfängt der Primäradapter den gesamten Verkehr.

Wenn Empfangslastenausgleich aktiviert ist:

•	empfängt der Primäradapter allen Verkehr, außer dem IP-Verkehr

•	empfangen die aktiven Adapter mit den höchsten Geschwindigkeiten IP-Verkehr.

Im Falle beispielsweise einer Gruppe mit drei Adaptern - einem Gigabitadapter als Primäradapter und zwei Intel(R) PRO/100 Adaptern -

•	empfängt der Gigabitadapter beispielsweise den gesamten Verkehr mit Ausnahme von IP-Verkehr, da er der Primäradapter ist;

•	empfängt der Gigabitadapter IP-Verkehr, da er der Adapter mit der höchsten Geschwindigkeit ist;

•	Nehmen die Intel(R) PRO/100 Adapter nicht an der Empfangsauslastungsverteilung teil.

Standard: Aktiviert nach Setup; Deaktiviert wenn die Gruppe zuerst in einem anderen Gruppenmodus erstellt wurde, und dann in eine ALB-Gruppe geändert wurde.

Bereich: Aktiviert/Deaktiviert

Schaltfläche "Standard wiederherstellen"

Über diese Schaltfläche werden die derzeit gewählten Erweiterten Einstellungen auf ihren Standardwert zurückgesetzt. Die Standardwerte können Sie den oben aufgeführten Einstellungen entnehmen.  (Diese Option ist nicht für jede Einstellung verfügbar.)

HINWEIS:  Wenn Sie in Intel(R) PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


Diagnose für PRO/100 und PRO/100+ Adapter
Diagnose für Intel(R) PRO/100, PRO/100+ und PRO/100 S Adapter

HINWEIS: Wenn Sie während der Diagnose auf Stopp klicken, wird diese nach kurzer Verzögerung angehalten. Wenn die Diagnose angehalten ist, wird die Schaltfläche OK verfügbar.

Basisdiagnose

Adapterdiagnose bietet Ihnen die Flexibilität, ein oder mehrere Elemente zu testen.

HINWEIS:  Wenn Ihr Computer Windows 98 hat, müssen Sie möglicherweise den Adapter Energieverwaltung deaktivieren, bevor Sie eine Diagnose durchführen. Für Details, schauen Sie unter der Prozedur für die Deaktivierung der Energieverwaltung nach.

Steuerungsregister

Testet die Register, die die Software verwendet, um Befehle an den 8255x-Controller zu konfigurieren und zu schicken.

Verläuft der Steuerungsregistertest negativ, sollte der Adapter ausgewechselt und der Test erneut durchgeführt werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.

Intel 8255x Controller

Führt eingebaute Tests des 8255x-Controller durch, um zu bestätigen, dass er richtig funktioniert.

Verläuft der Controller-Registertest negativ, sollte der Adapter ausgewechselt und der Test erneut vorgenommen werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.

EEPROM

Liest den EEPROM-Inhalt und bestätigt, dass die Prüfsumme korrekt ist. Hierzu wird das EEPROM Control/Data-Register verwendet, das wiederum das Register testet.

Verläuft der EEPROM-Registertest negativ, sollte der Adapter ausgewechselt und der Test erneut durchgeführt werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.

Loopback

Testet die Fähigkeit des Adapters Pakete zu senden und zu empfangen.

Verläuft der Loopback-Registertest negativ, sollte der Adapter ausgewechselt und der Test erneut vorgenommen werden. Verläuft der Test auch mit dem ausgetauschten Adapter negativ, ist dies ein Hinweis darauf, dass das Motherboard oder ein anderes mit dem Bus verbundenes Gerät nicht ordnungsgemäß funktioniert.

Verbindung

Überprüft die Netzwerkverbindung und die Übermittlungs- und Empfangsfunktionalität der Adapter, indem 1000 Eigenpakete an das Netzwerk übertragen und dieselben Pakete vom Netzwerk empfangen werden.

Wenn der Verbindungstest negativ verläuft, sollten Sie sicherstellen, dass das Kabel fest an den Adapter und den Verbindungspartner angeschlossen ist. Ist das Kabel richtig angeschlossen, stecken Sie es in einen anderen Anschluss des Verbindungspartners, oder verwenden Sie ein anderes Kabel.


Erweiterte Einstellungen für PRO/100+ Adapter
Erweiterte Einstellungen für die Intel(R) PRO/100 Adapterfamilie

Mit Hilfe der im Register aufgeführten Einstellungen können Sie definieren, wie der Adapter QoS-Tagging, Verschiebung und sonstige Funktionen behandelt. Einige der erweiterten Funktionen sind möglicherweise nicht verfügbar, je nachdem, welches Betriebssystem Sie benutzen und welche Adapter Sie installiert haben.

Erweiterte Einstellungen

Adaptives IFS (Inter-Frame Spacing)

Schafft Ausgleich für übermäßige Ethernet-Paketkollisionen in Ihrem Netzwerk.  Standardmäßig ist diese Einstellung auf "0" gesetzt, wodurch die Funktion deaktiviert wird.

Die empfohlene Einstellung (1) funktioniert für die meisten Computer und Netzwerke am besten, da mit ihr die Netzwerkverkehrsbedingungen dynamisch angepasst werden. Dieser dynamische Modus ist nur aktiviert, wenn der Wert auf "1" eingestellt ist. In einigen Fällen kann jedoch eine bessere Leistung erzielt werden, wenn der Spacing-Wert manuell eingestellt wird. Durch Einstellung eines Wertes wird eine statische Lücke zwischen Paketen erzwungen.

Wird der Wert erhöht, erhöht sich die Verzögerung zwischen den übertragenen Frames.

Unterstützte Adapter	Alle
Standard	0: deaktiviert
Bereich	0-255

Adaptive Verbindungsreaktion

Beschleunigt den Systemstart, indem Startroutinen, die eine Verbindung mit dem Server erfordern, umgangen werden, wenn das Kabel nicht mit dem Adapter verbunden ist. So wird die zum Starten des Computers erforderliche Zeit wesentlich verkürzt.

Wenn ALR (Adaptive Link Response = Adaptive Verbindungsreaktion) aktiviert ist und kein Netzwerkkabel mit dem RJ-45-Anschluss verbunden ist, wird die Netzwerkverbindung deaktiviert. Ein gelbes Warnsymbol wird neben der Netzwerkverbindung im Gerätemanager angezeigt.

Um die Netzwerkverbindung erneut zu aktivieren, verbinden Sie das Netzwerkkabel mit dem RJ-45-Anschluss und führen Sie einen Neustart des Computers durch.

Unterstützte Adapter	Nur mobile (CardBus) Produkte. Nicht für jedes Adaptermodell verfügbar.
Standard	Aus
Empfohlen	Ein
Bereich	Ein, Aus
HINWEIS: Adaptiver Link Response (ALR) wird nicht funktionieren, wenn ein drahtloser Adapter aktiv im System ist.

Adaptives Tuning der Leistungskapazität

Bestimmt die Anzahl von Frames, die der Adapter empfängt, bevor ein Interrupt ausgelöst wird. Im Normalbetrieb erzeugt der Adapter jedes Mal einen Interrupt, wenn ein Frame empfangen wird. Die CPU-Auslastung wird durch die Reduzierung der Anzahl der Interrupts verbessert.

Stellen Sie den Schieberegler auf maximale Adapterbandbreite, um einen Interrupt pro Frame zu erzeugen. Dadurch wird die Adapterbandbreite erhöht. Die CPU-Auslastung kann jedoch möglicherweise reduziert werden, wodurch der Computer verlangsamt wird. Stellen Sie den Schieberegler auf "Maximale CPU-Auslastung", um die Anzahl der Frames zu erhöhen, die der Adapter empfängt, bevor ein Interrupt erzeugt wird. Dadurch wird die CPU-Auslastung verbessert. Die Adapterbandbreite wird jedoch unter Umständen reduziert. Für die meisten Computer ist die Standardeinstellung empfehlenswert.

Unterstützte Adapter	Alle

Adaptive Technology (Adaptive Technologie)

Aktiviert oder deaktiviert den Mikrocode im Adaptertreiber. Der Mikrocode optimiert die Leistung in Abhängigkeit von der Betriebssystemumgebung.

Lassen Sie Adaptive Technology aktiviert, um die bestmögliche Leistung zu erzielen.

Die Adaptive Technology kann zur Behebung von Adapterkompabilitätsproblemen deaktiviert werden.  Wenn Adaptive Technology deaktiviert wird, wird Transmit Control Blocks und Adaptives Tuning der Leistungskapazität ebenfalls deaktiviert.

Unterstützte Adapter	Alle
Standard	Ein
Bereich	Ein, Aus
Adaptive Transmit Threshold

Gibt die Anzahl von Bytes an, die der Adapter vor der Übertragung in seinem Übertragungspuffer speichert. Ist beispielsweise Adaptive Transmit Threshold auf 100 eingestellt, speichert der Adapter 100 Byte (800 Bit) in seinem Puffer, bevor die Daten gesendet werden.

•	Durch Erhöhen des Wertes in Adaptive Transmit Threshold wird die Übertragungsleistung reduziert; unter Umständen verringert sich jedoch dadurch die Anzahl der Unterläufe.

•	Durch Verringern des Wertes in Adaptive Transmit Threshold wird die Übertragungsleistung erhöht; unter Umständen erhöht sich jedoch dadurch auch die Anzahl der Unterläufe. Durch Herabsetzen dieses Werts ist es dem Adapter möglich, vorzeitige Übertragungen vorzunehmen.

Der Adapter verwendet den Wert in Adaptive Transmit Threshold lediglich als Ausgangspunkt. Kann der Adapter mit Hilfe eines niedrigeren Wertes eine bessere Übertragungsleistung erzielen, wird dieser niedrigere Wert automatisch verwendet.

Stellen Sie diesen Wert auf 190 ein, um den Adapter so zu konfigurieren, dass zuerst vollständige Ethernetframes übermittelt werden und er dann auf die beste Leistung angepasst wird. Sinkt die Leistung bei einem Wert von 190 beträchtlich, stellen Sie Threshold auf 16 ein, und erhöhen Sie diesen Wert dann schrittweise.

Unterstützte Adapter	Alle
Standard	200
Empfohlen	• Stellen Sie diesen Wert auf über 200 ein, wenn der Computer über mehrere Busmastering-Karten oder hohe Wartezeit verfügt. • Stellen Sie diesen Wert auf 12 ein, wenn der Computer über eine einzige Busmastering-Karte verfügt.
Bereich	0-200

Grundverbindung in Umgebungen ohne Ressourcen

Unterhält die Verbindung mit dem Server, selbst wenn das System nicht über genügend Ressourcen verfügt, um alle erweiterten Einstellungen - z. B. IPSec-Verschiebung und große Sendungsverschiebung - auszuführen. Die erweiterten Einstellungen werden erst beim Neustart des Computers übernommen.

Ressourcenprobleme sind dem Systemprotokoll zu entnehmen. Im Systemprotokoll werden Fehler angezeigt, die als Folge von unzureichenden Systemressourcen auftreten.

Unterstützte Adapter	Alle
Standard	Aktiviert
Empfohlener Wert	Aktiviert
Bereich	Aktiviert, Deaktiviert
Coalesce Buffers

Optimiert die Übertragungsleistung, indem die Anzahl der Coalesce Buffers benutzerdefiniert wird, so dass der Adapter Datensegmente vor der Paketübertragung zusammenfügen kann.

Die Einstellung "Coalesce Buffers" muss so konfiguriert werden, dass sie zusammen mit der Einstellung "Übertragungsdescriptors" funktioniert. Die Einstellung "Coalesce Buffers" sollte 30 bis 50 % der Übertragungsdescriptors umfassen. Wird die Einstellung "Coalesce Buffers" nicht der Einstellung "Übertragungsdescriptors" angepasst, wird die Übertragungsleistung möglicherweise nicht verbessert.

Die Einstellung Coalesce Buffers erhöht die Übertragungsleistung auf Rechnern mit Windows NT 4.0 bedeutend. Sie verbessert darüber hinaus die Übertragungsleistung auf Rechnern mit Windows 98 und 2000.

Unterstützte Adapter	Alle
Standard	8
Empfohlener Wert	8
Bereich	1-32

PME (Power Management Event) aktivieren

Aktiviert bzw. deaktiviert Remoteaktivierungsfunktionen des Adapters auf Computern mit älteren APM-Implementationen (Advanced Power Management). Remoteaktivierung sorgt dafür, dass der Adapter aus dem Standby- oder ausgeschalteten Modus aktiviert wird, wenn bestimmte Paketarten - z. B. ARP-Pakete (Address Resolution Protocol) - empfangen werden.

•	Wenn diese Funktion deaktiviert wird, werden alle Remoteaktivierungseinstellungen auf Computern mit älteren Energieverwaltungsimplementationen deaktiviert.

•	Wenn diese Funktion aktiviert wird, kann der Adapter auf Remoteaktivierungssignale antworten. Näheres zur Konfiguration des Adapters, so dass er bestimmte Paketarten beantwortet, entnehmen Sie bitte den Remoteaktivierungseinstellungen weiter unten in diesem Hilfeabschnitt.

•	Der Wert "Hardware-Standard" zwingt den Adapter, Remoteaktivierungsfunktionen anhand der Systemhardware zu konfigurieren.

•	Der Wert "Keine Aktion" ermöglicht dem Adapter, den Standardwert des Betriebssystems zu verwenden.

Wenn Sie alle diesbezüglichen Einstellungen deaktivieren möchten, deaktivieren Sie diese Funktion. Stellen Sie anderenfalls diese Funktion auf "Keine Aktion" ein.

Unterstützte Adapter	82559-basierte Adapter. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Flusssteuerung

Ermöglicht es Adaptern, den Verkehr effektiver zu regeln.

•	Adapter generieren Flusssteuerungs-Frames, wenn ihre Empfangswarteschlangen einen vordefinierten Grenzwert erreichen. Das Generieren von Flusssteuerungs-Frames signalisiert dem Sender, die Übertragung zu verlangsamen.

•	Adapter reagieren auf Flusssteuerungs-Frames, indem sie die Paketsendung so lange anhalten, wie im Flusssteuerungs-Frame angegeben wurde.

Wenn Adapter die Paketübertragungsgeschwindigkeit anpassen können, kann mit Hilfe der Flusssteuerung verhindert werden, dass Pakete nicht berücksichtigt werden.

HINWEIS: Verbindungspartner müssen Flusssteuerungs-Frames unterstützen, damit die Adapter diese Funktion nutzen können.

Unterstützte Adapter	82540 und 82544-basiert, Übertragung und Empfang. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Flusssteuerungs-Frames generieren und beantworten
Bereich	Aus, Antworten, Generieren, Generieren & Antworten, Hardwarestandard

Verbindungsbasierte Anmeldung

Aktiviert die Funktion "Adaptive Link Response" (ALR - Adaptive Verbindungsreaktion). Je nach dem Wert des Parameters "LinkBasedLoad" (Verbindungsbasierte Anmeldung), überprüft diese Funktion den PhyLink-Status und gibt einen Wert für Erfolg (Success) bzw. Fehler (Failure) aus.

Unterstützte Adapter	Alle
Standard	Deaktiviert (0)
Bereich	Aktiviert, Deaktiviert

Verbindungsgeschwindigkeit und Duplex

Konfiguriert Kommunikationseinstellungen für den Adapter

Um bei der konfigurierten Einstellung betrieben werden zu können, muss der Verbindungspartner ebenfalls bei der konfigurierten Einstellung betrieben werden können. Beispiel: Wenn der Adapter auf 100 Mbit/s/Vollduplex konfiguriert ist, muss der Verbindungspartner ebenfalls bei 100 Mbit/s/Vollduplex betrieben werden können. Entsprechend muss der Verbindungspartner automatische Absprache unterstützen, wenn der Adapter konfiguriert ist, automatische Absprache zu verwenden.

Unterstützte Adapter	Alle Intel(R) PRO/100 Adapter
Standard	Automatische Erkennung
Empfohlener Wert	Automatische Erkennung
Bereich	• Automatische Erkennung - Der Adapter verhandelt mit den Verbindungspartnern, um kompatible Geschwindigkeits- und Duplexeinstellungen zu erkennen. • 10 Mbit/s/Halbduplex - Der Adapter erzwingt eine Verbindung bei 10 Mbit/s und schließt Übertragungen und Empfänge separat ab. Der Adapter kann während des Empfangs von Paketen keine Pakete übertragen. Dementsprechend kann er während der Übertragung von Paketen keine Pakete empfangen. • 10 Mbit/s/Vollduplex - Der Adapter erzwingt eine Verbindung bei 10 Mbit/s und schließt Übertragungen und Empfänge gleichzeitig ab. So wird die Leistung Ihres Adapters verbessert. Wählen Sie diesen Modus nur, wenn Sie einen Vollduplex-Switch besitzen. • 100 MBit/s/Halbduplex - Der Adapter erzwingt eine Verbindung bei 100 MBbit/s und schließt Übertragungen und Empfänge separat ab. Der Adapter kann während des Empfangs von Paketen keine Pakete übertragen. Dementsprechend kann er während der Übertragung von Paketen keine Pakete empfangen. • 100 Mbit/s/Vollduplex - Der Adapter erzwingt eine Verbindung bei 100 Mbit/s und schließt Übertragungen und Empfänge gleichzeitig ab. So wird die Leistung des Adapters verbessert. Wählen Sie diesen Modus nur, wenn Sie einen Vollduplex-Switch besitzen.

LAA (Locally Administered Address)

Überschreibt die MAC-Adresse des Adapters. Geben Sie unter Wert eine 12-stellige Hexadezimalzahl ein, um eine neue Netzwerkadresse einzugeben.

Unterstützte Adapter	Alle
Standard	Keine
Bereich	0000 0000 0001 - FFFF FFFF FFFD Ausnahmen: • Verwenden Sie keine Multicastadresse (niederwertigste Ziffer des hohen Byte = 1).  • Verwenden Sie nicht ausschließlich Nullen oder F.
HINWEIS: Intel(R) PROSet II verwendet in einer Gruppe entweder:

•	die LAA (Locally Administered Address) der Gruppe, wenn für die Gruppe eine LAA konfiguriert ist oder

•	die permanente MAC-Adresse des Primäradapters, wenn für die Gruppe keine LAA konfiguriert ist.

Intel PROSet II verwendet nicht die LAA eines Adapters, wenn es sich bei dem Adapter um den Primäradapter einer Gruppe handelt und die Gruppe eine LAA hat.

Anwender von Windows 98SE:

Wenn Sie die Standardadresse verwenden möchten, nachdem Sie eine manuell zugewiesene Adresse verwendet haben, führen Sie eine dieser Optionen durch:

•	Markieren Sie in den Netzwerkeigenschaften im Dialogfeld Erweitert die Option "lokal verwaltete Adresse" und ändern Sie den Wert auf 0. Klicken Sie auf OK,  um die Einstellung zuzuweisen.

•	Klicken Sie in Intel PROSet II auf das Register Erweitert  und anschließend auf Standard wiederherstellen oder löschen Sie alle Eingaben im Wertefeld. Klicken Sie auf OK, um die Einstellung zu speichern.

Verbindungsereignis protokollieren

Diese Einstellung wird verwendet, um die Protokollierung von Veränderungen an Verbindungszuständen zu aktivieren/deaktivieren. Wenn sie aktiviert ist, wird durch ein Verbindungs- oder Verbindungstrennungs-Änderungereignis eine Meldung generiert , die im Systemereignisprotokollsystem angezeigt wird. Administratoren erhalten die Ereignismeldung vom Systemereignisprotokollsystem.

Die folgenden Ereignisse werden protokolliert.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Unterstützte Adapter	Alle
Standard	Aktivieren
Bereich	Aktivieren, Deaktivieren
Verschiebung

Spart CPU-Zyklen ein, sofern in Übereinstimmung mit der von Ihnen verwendeten Adapterart eingestellt

•	Verwenden Sie die Einstellung "IP-Sicherheit", wenn Sie Sicherheitsverschiebung mit einem Intel(R) PRO/100 S Adapter verwenden.

•	Verwenden Sie die Einstellung "Prüfsumme", wenn Sie Sicherheitsverschiebung mit einem Intel(R) PRO/100 S Adapter nicht verwenden.

•	Wählen Sie für alle weiteren Adapterarten die Einstellung "Keine".

Unterstützte Adapter	Alle
Unterstützte Betriebssysteme	Windows 98SE, Windows Me, Windows NT, Windows 2000, und Windows XP
Standard	Intel PRO/100 S: IP-Sicherheit Intel PRO/100 S ohne Sicherheit: Prüfsumme
Bereich	Keine, IP-Sicherheit, Prüfsumme (je nach Adapterart stehen einige Optionen möglicherweise nicht zur Verfügung)
Näheres über IP-Sicherheit erfahren Sie im Hilfethema IPSec aktivieren.

PCI Bus-Effizienz

Ermöglicht dem Adapter, entweder die beste Methode zur Paketübertragung zu benutzen oder immer Paketzusammenführung zu erzwingen.

•	Wenn PCI Bus-Effizienz deaktiviert ist, verwendet der Adapter die Übertragungsmethode mit der besten Leistung. Bietet die Zusammenführung von Paketen die beste Übertragungsleistung, führt der Adapter Pakete automatisch zusammen.

•	Wenn PCI Bus-Effizienz aktiviert ist, erzwingt der Adapter Paketzusammenführung.

Deaktivieren Sie PCI Bus-Effizienz, wenn mit der Paketübertragung keine Probleme bestehen. Aktivieren Sie diese Einstellung, wenn es zu einer hohen Anzahl von Unterläufen kommt oder der PCI-Bus Leistungsschwächen aufweist.

Unterstützte Adapter	Alle
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Definition der Prioritätsebene

Konfiguriert den Schwellenwert der Prioritätsebene für Pakete mit QoS-Tagging  (Quality of Service).

Wenn auf dem Computer 802.1p/802.1Q-Tagging (QoS) aktiviert ist, können Sie die Prioritätsebenen (0-7) definieren, die von den Prioritätswarteschlangen bedient werden. Intel Adapter haben zwei Prioritätswarteschlangen: High (HPQ - hoch) und Low (LPQ - niedrig). Standardmäßig werden Pakete mit Werten zwischen 0 und 3 über die Low Priority Queue (LPQ) und Pakete mit Werten zwischen 4 und 7 über die High Priority Queue (HPQ) übertragen.

Die Nummer, die Sie als Definition der Prioritätsebene eingeben, ist der Schwellenwert zwischen den High und Low Priority Queues. Wenn Sie zum Beispiel 6 eingeben, werden Pakete mit einer Priorität zwischen 0 und 5 über die Low Priority Queue (LPQ) und Pakete mit Werten von 6 bis 7 über die High Priority Queue (HPQ) übertragen.

Unterstützte Adapter	Alle
Standard	4 • Pakete mit Werten zwischen 0 und 3 werden über die Low Priority Queue übertragen.  • Pakete mit Werten zwischen 4 und 7 werden über die High Priority Queue übertragen.
Bereich	0-7

QoS (802.3ac) Packet-Tagging

Aktiviert oder deaktiviert IEEE 802.1p/802.1Q Tagging für die Prioritätsfilter, die Sie über Windows* 2000, XP oder Priority Packet  eingerichtet haben. Sie müssen diese Option auf "Aktiviert" setzen, damit Priority Packet-Filter ordnungsgemäß arbeiten können.

Wenn Sie Filter mit 802.1p/Q-Tagging zugewiesen haben, diese Einstellung jedoch deaktiviert ist, wird die Priorität der fraglichen Pakete dennoch über die Intel High Priority Queue (HPQ) festgelegt.

Unterstützte Adapter	82550-, 82558- und 82559-basierte Produkte. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert
Empfangspuffer

Bestimmt die Anzahl der Puffer, die das Laufwerk beim Kopieren von Daten in den Arbeitsspeicher verwendet.

Bei hoher Netzwerkauslastung kann das Erhöhen der Anzahl der Empfangspuffer zu verbesserter Leistung führen. Der Nachteil ist jedoch, dass der Treiber dabei mehr Arbeitsspeicher beansprucht. In anderen Fällen kann die Änderung dieses Werts zu einer Verminderung der Leistung Ihres Systems führen.

Unterstützte Adapter	Alle
Standard	Der Standardwert richtet sich nach den ausgewählten Funktionen.
Empfohlener Wert	• Einzeladapter in Windows NT: 32 • Einzeladapter in Windows 98, Windows Me, Windows 2000 und Windows XP: 48 • Gruppenadapter: 250 • Verwendung der Funktion IPSec oder Verwendung mehrerer Funktionen: 350
Bereich	8-1024

IFS (Inter-Frame Spacing) erneut übertragen

Verlängert die Verzögerung zwischen Frame-Neuübertragungen. Trotz eines eingebauten Ethernet-Algorithmus, den Adapter zur Neuübertragung von Frames nach Konflikten verwenden, kann eine Verlängerung der Verzögerung die Netzwerkleistung verbessern, wenn es auf dem Netzwerk zu einer ungewöhnlich hohen Anzahl von Konflikten kommt.

Unterstützte Adapter	Diese Funktion wird von ausgewählten Adapter unterstützt.
Standard	6
Bereich	6-15

Sicherheitszuordnungen

Bestimmt die Anzahl der gleichzeitigen Sicherheitszuordnungen, die auf den Adapter Co-Prozessor des Adapters verschoben werden können. Sicherheitszuordnungen sind Kommunikationssitzungen mit anderen Computern mit Intel(R) Packet Protect oder anderer IP-Sicherheitssoftware.

Wenn der Computer mehr Sicherheitszuordnungen unterstützen kann, als als Standardwert festgelegt wurde, sollte dieser Wert erhöht werden. Beachten Sie, dass der Arbeitsspeicherbeanspruchung des Adapters mit der Anzahl der Sicherheitszuordnungen erhöht wird.

Unterstützte Adapter	Intel(R) PRO/100 S
Standard	Client: 64 Server: 1000
Bereich	1-5000

SPD (Smart Power Down)

Ermöglicht dem Adapter, den Energieverbrauch zu reduzieren, wenn das LAN-Kabel nicht mit dem Adapter verbunden ist. Wenn der Adapter eine gültige Verbindung wieder aufnimmt, wird wieder die normale Energiemenge verbraucht (voller Energieverbrauch).

Unterstützte Adapter	82559-basierte mobile Adapter und höher
Standard	Aktiviert
Empfohlener Wert	Aktiviert
Bereich	Aktiviert, Deaktiviert
Details zu SPD (Smart Power Down)

Transmit Control Blocks

Definiert die Anzahl von Transmit Control Blocks. Transmit Control Blocks (oder Übertragungs-Steuerungsblöcke) sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu überwachen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Transmit Control Blocks.

Sie können die Anzahl der Transmit Control Blocks erhöhen, wenn Sie ein mögliches Problem bezüglich der Übertragungsleistung bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Transmit Control Blocks verbessert werden kann, sollte beachtet werden, dass Transmit Control Blocks Arbeitsspeicher belegen. Wenn der Übertragungsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung 16.

Unterstützte Adapter	Alle
Standard	16 oder 32, je nach den Adapteranforderungen
Bereich	8-64
Remoteaktivierung bei Verbindungsänderung

Remoteaktiviert den Computer, wenn die Netzwerkverbindung eine Verknüpfung herstellt, während der Computer im Standbymodus ist. Sie können die Funktion aktivieren oder deaktivieren bzw. die Standardeinstellung des Betriebssystems verwenden.

Unterstützte Betriebssysteme	Windows 9x, Windows 2000, Windows XP
Bereich	Deaktiviert, Erzwungen, Betriebssystemabhängig
Standard	Deaktiviert
Remoteaktivierung über Einstellungen

Diese Einstellungen verweisen auf Funktionen, die entweder vom Betriebssystem oder von Intel(R) PROSet II aktiviert werden. Diese Funktionen verhalten sich je nach der Version von Windows unterschiedlich oder werden überhaupt nicht unterstützt.

•	These Windows versions do support Wake On Settings: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP 64 bit Edition und Windows XP Professional.

•	Die folgenden Versionen von Windows unterstützen die Aktivierung über Einstellungen nicht:  Die folgenden Versionen von Windows unterstützen die Aktivierung über Einstellungen nicht:

HINWEIS: Nur die Intel(R) PRO/100+ Management und Server Adapter und Intel(R) PRO/100 Adapter unterstützen Aktivierung über Einstellungen.

Aktivierung über Einstellungen auf dem Betriebssystem aktivieren

Folgende Arten von Remoteaktivierungspaketen erfordern, dass die Aktivierung über Einstellungen auf dem Betriebssystem aktiviert ist:

•	Remoteaktivierung über ARP

•	Remoteaktivierung über adressiertes Paket

•	Remoteaktivierung über NBT

Damit der Adapter diese Arten von Remoteaktivierungspaketen beantworten kann, muss die Aktivierung über Einstellungen auf dem Betriebssystem aktiviert sein. Navigieren Sie zum Geräte-Manager, und aktivieren Sie die Option Gerät kann den Computer aus dem Standbymodus aktivieren, um die Aktivierung über Einstellungen zu aktivieren. So finden Sie diese Option:

1	Klicken Sie auf Start > Systemsteuerung.
Das Systemsteuerungsfenster wird geöffnet.

2	Doppelklicken Sie auf System.
Das Dialogfeld "System" wird angezeigt.

3	Klicken Sie auf das Register Hardware und anschließend auf die Schaltfläche Geräte-Manager.
Das Fenster "Geräte-Manager" wird angezeigt.

4	Doppelklicken Sie auf den Adapter, der für die Aktivierung über Einstellungen aktiviert werden soll.
Das Dialogfeld "Eigenschaften" wird angezeigt.

5	Klicken Sie auf das Register Energieverwaltung.

6	Klicken Sie auf Gerät kann den Computer aus dem Standbymodus aktivieren, um die Aktivierung über Einstellungen für diesen Adapter zu aktivieren.

So konfigurieren Sie die Remoteaktivierungseinstellungen

1	Klicken Sie in Intel PROSet II auf das Register Erweitert.

2	Klicken Sie in der Auflistung der Einstellungen auf Remoteaktivierung über Einstellungen.

3	Markieren Sie in der Liste Wert die gewünschte Remoteaktivierungseinstellung.

4	Klicken Sie auf OK oder Übernehmen.

Verfügbare Einstellungen

Diese Remoteaktivierungseinstellungen sind in Intel PROSet II verfügbar:

Einstellung	Beschreibung
Deaktiviert	Adapter verwendet keine Remoteaktivierungseinstellungen.
Remoteaktivierung über Magic Paket	Der Adapter wird durch ein eingehendes Magic Packet aktiviert. Ein Magic Packet ist ein Paket mit 16 miteinander verbundenen Kopien der Ethernet-Adresse des Empfangsadapters. Wenn diese Funktion konfiguriert wird, überschreibt Intel PROSet II den Wert des Betriebssystems mit dem Wert dieser Funktion.
Remoteaktivierung über adressiertes Paket	Ermöglicht dem Adapter, aktiviert zu werden, wenn ein adressiertes Paket eingeht. Ein adressiertes Paket ist ein Unicast-Paket, das an die MAC-Adresse dieses Adapters geschickt wird.  Das Protokoll muss diese Aktivierungsmethode im Treiber aktivieren. Durch Deaktivieren dieser Funktion wird dem Treiber signalisiert, dass er sämtliche Protokollanfragen ignorieren soll, um diese Aktivierungsmethode zu aktivieren.
Wake on Magic- und adressierte Pakete	Aktiviert den Adapter entweder durch ein Magic- oder ein an ihn gerichtetes Paket.
Betriebssystem-gesteuert	Gibt dem Betriebssystem komplette Kontrolle über die Aktivierungseinstellungen.

HINWEIS: Wenn mehrere IP-Adressen für einen Adapter konfiguriert werden, fordert das Betriebssystem möglicherweise die Remoteaktivierung über ARP-Muster von allen konfigurierten Adressen an. Der Adapter wird nur als Antwort auf ARP-Pakete aktiviert, die die erste IP-Adresse in der Liste abfragen.

HINWEIS: Remoteaktivierungseinstellungen haben nicht die Fähigkeit, eine Maschine im heruntergefahrenen Zustand (S5-Zustand) zu aktivieren. Dieser Zustand wird nur durch die Einstellung "PME aktivieren" kontrolliert, die ebenfalls im Register "Erweitert" zu finden ist. Selbst wenn die Remoteaktivierungseinstellungen deaktiviert sind, wird die Fähigkeit zur Aktivierung aus dem S5-Zustand durch die Einstellung "PME aktivieren" reguliert.

Solange der Adaptertreiber aktiviert ist, funktionieren die PME-Einstellungen. Sobald der Treiber deaktiviert ist, geht das Gerät zu seiner Hardwarestandardeinstellung zurück, die dem Computer unter Umständen eine Aktivierung aus dem ausgeschalteten Zustand gestattet.

Siehe auch:

Gruppenbildung, erweiterte Einstellungen konfigurieren


Überblick Priority Packet
Intel(R) Priority Packet - Übersicht

Intel(R) Priority Packet ist ein Verkehrspriorisierungsprogramm, das Ihnen gestattet, Filter einzurichten, über die Verkehr mit Priorität vor normalem Verkehr abgewickelt wird. Sie können Intel Priority Packet verwenden, um Filter einzurichten, die kritischen Anwendungen Priorität einräumen.

Intel Priority Packet ist ein von Intel(R) PROSet II unabhängiges Dienstprogramm.

Anforderungen

Unterstützte Betriebssysteme	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 oder höher
Unterstützte Adapter	Intel(R) PRO/100 und PRO/1000 Adapterfamilie
So installieren Sie Intel Priority Packet

1.	Legen Sie die Adapter-CD in das CD-ROM-Laufwerk des Computers ein.
Der Bildschirm "Autorun" wird angezeigt.

2.	Schließen Sie den Autorun-Bildschirm.

3.	Navigieren Sie zum Ordner WINDOW/PRTPKT auf der Intel CD.

4.	Um Intel Priority Packet zu installieren, doppelklicken Sie auf setup.exe.

5.	Folgen Sie den Bildschirmanweisungen, um die Priority Packet-Installation durchzuführen.

Nach der Installation können Sie das Programm öffnen, indem Sie auf Start > Programme > Intel(R) Priority Packet II klicken.

Priorisieren des Netzwerkverkehrs

Mit Intel Priority Packet können Sie Filter bestimmen, um Informationen von kritischen Knoten oder Anwendungen mit angegebener Priorität zu senden. Durch die Priorisierung von Verkehr am Host oder Eingangspunkt des Netzwerks, können Netzwerkgeräte Weiterleitungsentscheidungen von den Prioritätsinformationen, die im Paket definiert sind, abhängig machen.

Intel Priority Packet setzt Prioritäten, die auf Filtern basieren - Parameter, die Sie zu übertragenden Paketen zuweisen. Mit dem Priority Packet Filter-Assistenten können Sie vordefinierte oder benutzerdefinierte Filter einrichten, die auf einer Knotenadresse (MAC-Adresse), dem Ethernettyp oder auf verschiedenen Eigenschaften des Protokolls und Anschlusses basieren. Priority Packet bietet zwei verschiedene Methoden zur Priorisierung des Verkehrs an: IEEE 802.1p und Intel High Priority Queue.

IEEE 802.1p Tagging

IEEE 802.1p ist ein IEEE-Standard zum Kennzeichnen von Paketen, der Prioritätsstufen definiert. Pakete werden mit vier (4) zusätzlichen Byte gekennzeichnet, wodurch die Paketgröße erhöht und auf eine Prioritätsstufe hingewiesen wird, Wenn diese gekennzeichneten Pakete über das Netzwerk gesendet werden, werden Pakete mit höherer Priorität zuerst übertragen. Priority Packet-Tagging (auch als Traffic Class Expediting bekannt) ermöglicht dem Adapter mit anderen Elementen des Netzwerkes zu arbeiten (Switches, Routers), um Priority Packets zuerst zu liefern. 802.1p Tagging ermöglicht Anwendungen, spezifische Prioritätsstufen von 0 (niedrig) bis 7 (hoch) zuzuweisen.

Nachdem Sie unter Windows* 2000, XP oder in Intel Priority Packet den Filter gesetzt haben, müssen Sie Intel PROSet II starten und QoS Tagging im Register "Erweiterte Einstellungen" aktivieren.

HINWEIS: IEEE 802.1p Tagging erhöht die Größe des Paketes, das es kennzeichnet. Einige Hubs und Switches erkennen die größeren Pakete nicht und löscht sie. Lesen Sie in Ihrer Hub- oder Switch-Dokumentation nach, ob 802.1p unterstützt wird. Wenn diese Geräte 802.1p nicht unterstützen oder Sie sich nicht sicher sind, verwenden Sie High Priority Queue, um den Netzwerkverkehr zu priorisieren.

Anforderungen, um IEEE 802.1p Tagging effektiv einsetzen zu können:

•	Alle Computer, die mit 802.1p gekennzeichnete Pakete empfangen und weiterleiten müssen 802.1p unterstützen.

•	Auf dem Computer installierte Adapter, die gekennzeichnete Pakete verarbeiten, müssen 802.1p Tagging unterstützen. Alle Intel(R) PRO/1000, PRO/100+ und PRO/100 S-Adapter unterstützen 802.1p. Intel(R) PRO/100B Adapter unterstützen diese Funktion nicht.

•	Der/die Adapter können keiner Adaptergruppe zugewiesen werden.

•	Wenn Sie VLANs oder Packet-Tagging auf demselben Adapter einrichten, muss 802.1p/802.1Q Tagging im Register Intel PROSet II - Erweiterte Einstellungen aktiviert sein.

•	VLANs (802.1Q) und Priorisierung (802.1p) verwenden beide die 802.3ac-Kennzeichnung. Intel Adapter verwenden die 802.3ac-Kennzeichnung, wenn VLANs und/oder QoS-Tagging auf dem Adapter konfiguriert ist.

•	Wenn ein Adapter für VLANs konfiguriert ist, muss der VLAN-Switch denselben Kennzeichnungstyp (802.3ac) wie der Adapter unterstützen.

•	Wenn ein Adapter für Priorisierung konfiguriert ist, erfordern einige Switches ein Nicht-Standard-VLAN auf dem Switch, um die Kennzeichnungsweiterleitung zu aktivieren.


Filter

Ein Parameter, der auf ein ausgehendes (Übertragungs-) Paket angewendet wird, um festzustellen, ob es mit IEEE 802.1p gekennzeichnet oder in die High Priority Queue) gestellt werden soll.


IEEE 802.1p-Spezifikation

Ein IEEE-Standard zum Kennzeichnen von Paketen mit verschiedenen Prioritätsebenen. Bei der Übertragung dieser Pakete auf dem Netzwerk werden die Pakete mit höheren Prioritäten zuerst übertragen. Priority Packet-Tagging ermöglicht dem Adapter, in Zusammenarbeit mit anderen Netzwerkgeräten die Gesamtleistung zu steigern.

IEEE 802.1p-Tagging ist nur dann effektiv, wenn es von der Netzwerkinfrastruktur (Switches und sonstigen Routinggeräten) unterstützt wird. Wenn Ihre Infrastruktur IEEE 802.1p-Tagging nicht unterstützt oder wenn Sie sich dessen nicht sicher sind, können Sie Prioritäten im Netzwerkverkehr mit Hilfe von Intels bestimmen. High Priority Queuebestimmen.


HPQ (High Priority Queue)

Eine Übertragungswarteschlange, die in Verbindung mit dem Intel(R) Priority Packet verwendet wird. Die HPQ (High Priority Queue) verarbeitet die High Priority Pakete.

HPQ ist auf Intel(R) PRO/100 Adaptern verfügbar, die 82558-basierte Controller oder höher verwenden. Näheres zu Controllern erfahren Sie in der Tabelle Adapterspezifikationen.

Näheres zu HPQ erfahren Sie in der Intel Priority Packet Online-Hilfe.


Tagging

Einem Paket zusätzliche Informationen hinzufügen. Im Fall von Priority Packet mit IEEE 802.1p-Tagging bedeutet dies, dass vier Byte mit Angaben zur Priorität des Pakets hinzugefügt werden.


CardBus gefunden

Einzeladapterinstallation

Wenn Sie einen einzelnen CardBus-Adapter installieren, klicken Sie auf das zu installierende Modell.

HINWEIS: Wenn Sie einen Intel(R) PRO/100 CardBus II Adapter (nur LAN) installiert haben und Sie installieren einen Intel(R) PRO/100 LAN+Modem56 CardBus II Adapter, müssen Sie:

1.	die Treiber für den LAN-Adapter (kein Modem) entfernen;

2.	den Computer neu starten;

3.	die Treiber für den LAN+Modem56 Adapter neu installieren.

Installation von zwei Adaptern

Wenn Sie zwei CardBus-Adapter installieren und einer oder beide dieser Adapter sind Intel PRO/100 LAN+Modem56 CardBus II Adapter, klicken Sie auf Intel(R) PRO/100 LAN+Modem56 CardBus II.

Wenn es sich bei beiden Adaptern um Intel PRO/100 CardBus II Adapter (nur LAN) handelt, klicken Sie auf Intel(R) PRO/100 CardBus II.

PCI-Adapter

Wenn Sie einen PCI-Adapter installieren (zum Beispiel auf einer Docking-Station), klicken Sie auf Intel(R) PRO PCI-Adapter.


Cardbus-Ressourcen
CardBus-Ressourcen definieren

Wählen Sie verfügbare Ressourcen für den Netzwerkadapter und das Modem.

So stellen Sie sicher, dass die ausgewählten Ressourcen mit Ihrem Computer kompatibel sind:

Starten Sie Intel(R) PROSet II durch Doppelklicken auf die Schaltfläche Intel PROSet II in der Systemsteuerung. Intel PROSet II wird angezeigt.

•	Wenn keine Ressourcenkonflikte vorliegen, werden im Register "Allgemein" Adapterstatusinformationen angezeigt.

•	Wenn ein Ressourcenkonflikt mit einem anderen Gerät vorliegt, zeigt Intel PROSet II ein Register "Fehlerbehebung" an, das Anweisungen enthält. Folgen Sie diesen Anleitungen, und wählen Sie andere Ressourcen aus.


Jumbo Frames

Jumbo Frames sind größer als Standard-Ethernetframes. Standard-Ethernetframes sind ca. 1,5 KB groß, während Jumbo Frames bis zu 16 KB enthalten können.

Für Netzwerke, auf denen hauptsächlich große Pakete übertragen werden und zusätzliche Wartezeiten in Kauf genommen werden können, können Jumbo Frames die CPU-Auslastung verringern und Übertragungen effizienter machen.

HINWEISE: Jumbo Frames werden nur bei 1000 Mbit/s unterstützt. Der Einsatz von Jumbo Frames bei 10 oder 100 Mbit/s kann in schlechter Leistung oder dem Verlust der Verbindung resultieren. Jumbo Frames sind nur bei TCP/IP-Paketen effektiv.

Bevor Sie beginnen

Stellen Sie sicher, dass:

•	Sie einen Intel(R) PRO/1000 Adapter bei 1000 Mbit/s ausführen. Jumbo Frames werden nicht von Intel(R) PRO/100 Adaptern unterstützt.

•	Das System Windows* 2000, XP oder NT* 4.0 ausführt.

•	Die Netzwerkgeräte Jumbo Frames unterstützen. Beachten Sie beim Einrichten von Jumbo Frames auf anderen Netzwerkgeräten, dass Netzwerkgeräte Jumbo Frame-Größen auf unterschiedliche Art berechnen. Einige Geräte (jedoch nicht alle) beziehen die Kopfzeileninformationen in die Frame-Größe mit ein.

Jumbo Frames einrichten

•	Um eine typische Paketgröße zu konfigurieren, verwenden Sie Intel(R) PROSet II.

•	Geben Sie für andere Paketgrößen den Wert in der Registrierung ein.

So konfigurieren Sie Jumbo Frames in Intel® PROSet II

Das Einrichten von Jumbo Frames auf dem Netzwerk ist ein dreiteiliger Vorgang.

Schritt 1: Konfigurieren Sie den Adapter zur Unterstützung von Jumbo Frames:

1.	Open Intel(R) PROSet II.

2.	Klicken Sie in der Strukturansicht Netzwerkkomponentenauf den Adapter, den Sie mit Jumbo Frames konfigurieren möchten.

3.	Klicken Sie auf das Register Erweitert.

4.	Klicken Sie in der Liste "Einstellungen" auf Jumbo Frames.

5.	Klicken Sie im Dialogfeld "Wert" auf eine Paketgröße.

Der Adapter ist jetzt zur Unterstützung von Jumbo Frames konfiguriert.

Schritt 2: Konfigurieren Sie die Netzwerk-Switches zur Unterstützung von Jumbo Frames: Näheres hierzu erfahren Sie in Ihrer Switch-Dokumentation.

Schritt 3: Konfigurieren Sie Ihre Server zur Unterstützung von Jumbo Frames: Näheres hierzu erfahren Sie in Ihrer Serverdokumentation.

So konfigurieren Sie Jumbo Frames über die Registrierung:

Das Einrichten von Jumbo Frames auf dem Netzwerk ist ein dreiteiliger Vorgang.

Schritt 1: Konfigurieren Sie den Adapter zur Unterstützung von Jumbo Frames:

1.	Starten Sie den Registrierungseditor. Klicken Sie auf Start > Ausführen. Geben Sie in das Feld "Öffnen" regedit ein.
Der Registrierungseditor wird geöffnet.

2.	Navigieren Sie zum Registerschlüssel MaxFrameSize.

3.	Geben Sie einen Wert zwischen 1415 und 16128 als Frame-Größe ein.

Der Adapter ist jetzt zur Unterstützung von Jumbo Frames konfiguriert.

Schritt 2: Konfigurieren Sie die Netzwerk-Switches zur Unterstützung von Jumbo Frames: Näheres hierzu erfahren Sie in Ihrer Switch-Dokumentation.

Schritt 3: Konfigurieren Sie Ihre Server zur Unterstützung von Jumbo Frames: Näheres hierzu erfahren Sie in Ihrer Serverdokumentation.


MiniPCI-Adapter

MiniPCI-Adapter werden in Verbindung mit bestimmten mobilen Computern eingesetzt, die den MiniPCI-Formfaktor unterstützen. Diese Adapter unterstützten dieselbe Funktionalität wie die in dieser Hilfedatei beschriebenen Client-Adapter. Einige MiniPCI-Adapter verfügen auch über integrierte Modemhardware, die im Lieferumfang des Produkts enthalten ist.

Wenn Ihr Produkt ein Modem enthält, beachten Sie bitte die Dokumentation, die im Lieferumfang Ihres Computers enthalten ist, um Näheres über die Modemkonfiguration zu erfahren.

Siehe auch:

Erweiterte Einstellungen für Intel(R) PRO/100+ Adapter


Erweiterte Einstellungen für PRO/10+ Adapter
Erweiterte Einstellungen für Intel(R) PRO/10 und PRO/10+ Adapter

Mit Hilfe der im Register "Erweitert" aufgeführten Einstellungen können Sie definieren, wie der Adapter Verbindungsänderungen, Puffer, Verschiebungen und sonstige Funktionen behandelt. Einige der folgenden Funktionen sind möglicherweise nicht verfügbar, je nachdem, welches Betriebssystem Sie verwenden und welche Adapter Sie installiert haben.

Erweiterte Einstellungen

Adaptives IFS (Inter-Frame Spacing)

Schafft Ausgleich für übermäßige Ethernet-Paketkollisionen in Ihrem Netzwerk. Standardmäßig ist diese Einstellung auf "0" gesetzt, wodurch die Funktion deaktiviert wird. Die empfohlene Einstellung (1) funktioniert für die meisten Computer am besten, da mit ihr die Netzwerkverkehrsbedingungen dynamisch angepasst werden. Dieser dynamische Modus ist nur aktiviert, wenn der Wert auf "1" eingestellt ist. In einigen Fällen kann jedoch eine bessere Leistung erzielt werden, wenn der Spacing-Wert manuell eingestellt wird. Durch Einstellung eines Wertes wird eine statische Lücke zwischen Paketen erzwungen.

Wird der Wert erhöht, erhöht sich die Verzögerung zwischen den übertragenen Frames.

Unterstützte Adapter	Alle
Standard	1
Bereich	0-255

Adaptive Technology (Adaptive Technologie)

Aktiviert oder deaktiviert den Mikrocode im Adaptertreiber. Der Mikrocode optimiert die Leistung in Abhängigkeit von der Betriebssystemumgebung.

Lassen Sie Adaptive Technology aktiviert, um die bestmögliche Leistung zu erzielen.

Die Adaptive Technology kann zur Behebung von Adapterkompabilitätsproblemen deaktiviert werden.  Wenn Adaptive Technology deaktiviert wird, wird Transmit Control Blocks und Adaptives Tuning der Leistungskapazität ebenfalls deaktiviert.

Unterstützte Adapter	Alle
Standard	Ein
Bereich	Ein, Aus
Adaptive Transmit Threshold

Gibt die Anzahl von Bytes an, die der Adapter vor der Übertragung in seinem Übertragungspuffer speichert. Ist beispielsweise Adaptive Transmit Threshold auf 100 eingestellt, speichert der Adapter 100 Byte (800 Bit) in seinem Puffer, bevor die Daten gesendet werden.

•	Durch Erhöhen des Wertes in Adaptive Transmit Threshold wird die Übertragungsleistung reduziert; unter Umständen verringert sich jedoch dadurch die Anzahl der Unterläufe.

•	Durch Verringern des Wertes in Adaptive Transmit Threshold wird die Übertragungsleistung erhöht; unter Umständen erhöht sich jedoch dadurch auch die Anzahl der Unterläufe. Durch Herabsetzen dieses Werts ist es dem Adapter möglich, vorzeitige Übertragungen vorzunehmen.

Der Adapter verwendet den Wert in Adaptive Transmit Threshold lediglich als Ausgangspunkt. Kann der Adapter mit Hilfe eines niedrigeren Wertes eine bessere Übertragungsleistung erzielen, wird dieser niedrigere Wert automatisch verwendet.

Stellen Sie diesen Wert auf 190 ein, um den Adapter so zu konfigurieren, dass zuerst vollständige Ethernetframes übermittelt werden und er dann auf die beste Leistung angepasst wird. Sinkt die Leistung bei einem Wert von 190 beträchtlich, stellen Sie Threshold auf 16 ein, und erhöhen Sie diesen Wert dann schrittweise.

Unterstützte Adapter	Alle
Standard	12
Empfohlen	• Stellen Sie diesen Wert auf über 200 ein, wenn der Computer über mehrere Busmastering-Karten oder hohe Wartezeit verfügt. • Stellen Sie diesen Wert auf 12 ein, wenn der Computer über eine einzige Busmastering-Karte verfügt.
Bereich	0-200

Grundverbindung in Umgebungen ohne Ressourcen

Unterhält die Verbindung mit dem Server, selbst wenn das System nicht über genügend Ressourcen verfügt, um alle erweiterten Einstellungen auszuführen. Funktionen wie IPSec-Verschiebung und Große Sendungsverschiebung werden lediglich wieder aufgenommen, wenn genügend Ressourcen zur Verfügung stehen. Fehler aufgrund nicht ausreichender Systemressourcen sind im Systemprotokoll nachzulesen.

Unterstützte Adapter	Alle
Standard	Aus
Empfohlener Wert	Ein
Bereich	Ein, Aus
Coalesce Buffers

Optimiert die Übertragungsleistung, indem die Anzahl der Coalesce Buffers benutzerdefiniert wird, so dass der Adapter Datensegmente vor der Paketübertragung zusammenfügen kann.

Die Einstellung "Coalesce Buffers" muss so konfiguriert werden, dass sie zusammen mit der Einstellung "Übertragungsdescriptors" funktioniert. Die Einstellung "Coalesce Buffers" sollte 30 bis 50 % der Übertragungsdescriptors umfassen. Wird die Einstellung "Coalesce Buffers" nicht der Einstellung "Übertragungsdescriptors" angepasst, wird die Übertragungsleistung möglicherweise nicht verbessert.

Die Einstellung Coalesce Buffers erhöht die Übertragungsleistung auf Rechnern mit Windows NT 4.0 bedeutend. Sie verbessert darüber hinaus die Übertragungsleistung auf Rechnern mit Windows 98 und 2000.

Unterstützte Adapter	Alle
Standard	8
Empfohlener Wert	8
Bereich	1-32
Flusssteuerungsempfang

Ermöglicht dem Adapter, Vollduplexsteuerungs-Frames zu empfangen, indem der Übertragungspfad angehalten wird. Der Übertragungspfad wird für die im empfangenen Flusssteuerungs-Frame angegebene Zeitdauer angehalten. Mit diesen Einstellungen wird die Netzwerkleistung optimal eingestellt, und es wird verhindert, dass Pakete nicht berücksichtigt werden.

Unterstützte Adapter	Diese Funktion ist möglicherweise nicht für jede Adapterart verfügbar.
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Verbindungsbasierte Anmeldung

Aktiviert die Funktion "Adaptive Link Response" (ALR - Adaptive Verbindungsreaktion). Je nach dem Wert des Parameters "LinkBasedLoad" (Verbindungsbasierte Anmeldung), überprüft diese Funktion den PhyLink-Status und gibt einen Wert für Erfolg (Success) bzw. Fehler (Failure) aus.

Unterstützte Adapter	Alle
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Verbindungsgeschwindigkeit und Duplex

Konfiguriert den Intel(R) PRO/10+ Adapter mit Verbindungseinstellungen.

Unterstützte Adapter	Alle
Standard	Automatische Erkennung
Empfohlener Wert	Automatische Erkennung
Bereich	• Automatische Erkennung - Der Adapter handelt mit dem Switch aus, wie Pakete gesendet bzw. empfangen werden (Voll- oder Halbduplexmodus).  HINWEIS:  Sie müssen über einen Switch mit der Fähigkeit zur automatischen Absprache verfügen, um den Vollduplexbetrieb zu ermöglichen, wenn Sie die Option "Verbindungsgeschwindigkeit und Duplex" auf "Automatische Erkennung" gesetzt haben. • 10Mbit/s/Halbduplex - Der Adapter verwendet 10 Mbit/s und führt jeweils nur eine Operation aus. Entweder sendet oder empfängt er. • 10Mbit/s/Vollduplex - Der Adapter verwendet 10 Mbit/s und sendet und empfängt Pakete gleichzeitig. So wird die Leistung des Adapters verbessert. Wählen Sie diesen Modus nur, wenn Sie einen Vollduplex-Switch besitzen.

Lokal verwaltete Adresse

Überschreibt die MAC-Adresse des Adapters. Geben Sie in dieses Feld eine zwölfstellige Hexadezimalzahl ein, um eine neue Netzwerkadresse festzulegen.

Unterstützte Adapter	Alle
Standard	Keine
Bereich	0000 0000 0001 - FFFF FFFF FFFD Ausnahmen: • Verwenden Sie keine Multicastadresse (niederwertigste Ziffer des hohen Byte = 1).  • Verwenden Sie nicht ausschließlich Nullen oder F.

PCI Bus-Effizienz

Ermöglicht dem Adapter, entweder die beste Methode zur Paketübertragung zu benutzen oder immer Paketzusammenführung zu erzwingen.

•	Wenn PCI Bus-Effizienz deaktiviert ist, verwendet der Adapter die Übertragungsmethode mit der besten Leistung. Bietet die Zusammenführung von Paketen die beste Übertragungsleistung, führt der Adapter Pakete automatisch zusammen.

•	Wenn PCI Bus-Effizienz aktiviert ist, erzwingt der Adapter Paketzusammenführung.

Deaktivieren Sie PCI Bus-Effizienz, wenn mit der Paketübertragung keine Probleme bestehen. Aktivieren Sie diese Einstellung, wenn es zu einer hohen Anzahl von Unterläufen kommt oder der PCI-Bus Leistungsschwächen aufweist.

Unterstützte Adapter	Alle
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Definition der Prioritätsebene

Bestimmt den Schwellenwert der Prioritätsebene für Pakete mit QoS-Tagging (Quality of Service).

Wenn auf dem Computer 802.1p/802.1Q-Tagging (QoS) aktiviert ist, können Sie die Prioritätsebenen (0-7) definieren, die von den Prioritätswarteschlangen bedient werden. Intel Adapter haben zwei Prioritätswarteschlangen: High (HPQ - hoch) und Low (LPQ - niedrig). Standardmäßig werden Pakete mit Werten zwischen 0 und 3 über die Low Priority Queue (LPQ) und Pakete mit Werten zwischen 4 und 7 über die High Priority Queue (HPQ) übertragen.

Die Nummer, die Sie als Definition der Prioritätsebene eingeben, ist der Schwellenwert zwischen den High und Low Priority Queues. Wenn Sie zum Beispiel 6 eingeben, werden Pakete mit einer Priorität zwischen 0 und 5 über die Low Priority Queue (LPQ) und Pakete mit Werten von 6 bis 7 über die High Priority Queue (HPQ) übertragen.

Unterstützte Adapter	Alle
Standard	4 • Pakete mit Werten zwischen 0 und 3 werden über die Low Priority Queue übertragen.  • Pakete mit Werten zwischen 4 und 7 werden über die High Priority Queue übertragen.
Bereich	0-7

Empfangspuffer

Bestimmt die Anzahl der Puffer, die das Laufwerk beim Kopieren von Daten in den Protokollarbeitsspeicher verwendet.

Bei hoher Netzwerkauslastung kann das Erhöhen der Anzahl der Empfangspuffer zu verbesserter Leistung führen. Der Nachteil ist jedoch, dass der Treiber dabei mehr Arbeitsspeicher beansprucht. In anderen Fällen kann die Änderung dieses Werts zu einer Verminderung der Leistung Ihres Systems führen.

Unterstützte Adapter	Alle
Standard	48
Empfohlener Wert	• Einzeladapter in Windows 98, Windows Me, Windows 2000 und Windows XP: 48 • Einzeladapter in Windows NT: 32 • Gruppenadapter: 250
Bereich	8-1024

IFS (Inter-Frame Spacing) erneut übertragen

Verlängert die Verzögerung zwischen Frame-Neuübertragungen. Trotz eines eingebauten Ethernet-Algorithmus, den Adapter zur Neuübertragung von Frames nach Konflikten verwenden, kann eine Verlängerung der Verzögerung die Netzwerkleistung verbessern, wenn es auf dem Netzwerk zu einer ungewöhnlich hohen Anzahl von Konflikten kommt.

Unterstützte Adapter	Alle
Standard	10
Bereich	6-15

Transmit Control Blocks

Definiert die Anzahl von Transmit Control Blocks. Transmit Control Blocks (oder Übertragungs-Steuerungsblöcke) sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu überwachen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Transmit Control Blocks.

Sie können die Anzahl der Transmit Control Blocks erhöhen, wenn Sie ein mögliches Problem bezüglich der Übertragungsleistung bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Transmit Control Blocks verbessert werden kann, sollte beachtet werden, dass Transmit Control Blocks Arbeitsspeicher belegen. Wenn die Übertragungsleistung kein Problem darstellt, verwenden Sie den empfohlenen Wert von 16.

Unterstützte Adapter	Alle
Standard	32
Empfohlener Wert	16
Bereich	8-64


PRO/1000 Verbindungskonfiguration
Intel(R) PRO/1000 Verbindungskonfiguration (nur für Kupfermodelle)

VORSICHT:  In fast allen Fällen sollte "Automatische Absprache" aktiviert bleiben. Wenn Sie "Automatische Absprache" deaktivieren, stellen Sie sicher, dass die Einstellungen des Verbindungspartners mit denen des Adapters übereinstimmen. Der Adapter kann nicht bei 1000 Mbit/s und deaktivierter automatischer Absprache betrieben werden.

So bestimmen Sie Geschwindigkeit und Duplex:

1.	Klicken Sie im Register "Verbindungskonfiguration" auf Aktiviert oder Deaktiviert, um die Einstellung "Automatische Absprache" zu ändern.

•	Wenn "Automatische Absprache" aktiviert ist, handelt der Adapter die Geschwindigkeits- und Duplexeinstellungen mit dem Verbindungspartner aus.

•	Wenn "Automatische Absprache" deaktiviert ist, wird die angegebene Geschwindigkeits- und Duplexeinstellung erzwungen.  Wenn Sie "Automatische Absprache" deaktivieren, stellen Sie sicher, dass der Verbindungspartner bei den angegebenen Geschwindigkeits- und Duplexeinstellungen betrieben werden kann. Wenn dies nicht möglich ist, kann keine Verbindung zwischen dem Adapter und dem Verbindungspartner hergestellt werden.

2.	Wenn "Automatische Absprache" aktiviert ist, wählen Sie die Geschwindigkeits- und Duplexeinstellungen, die dem Verbindungspartner bei der Aushandlung ursprünglich angezeigt wurden. Standardmäßig sind alle Einstellungen angezeigt. Mögliche Einstellungen:

•	10 Mbit/s HALB

•	10 Mbit/s VOLL

•	100 Mbit/s HALB

•	100 Mbit/s VOLL

•	1000 Mbit/s VOLL

HINWEIS: 1000-basierter T-Betrieb kann laut IEEE-Spezifikationen nicht erzwungen werden.  Sie können jedoch den Adapter so konfigurieren, dass er nur bei 1000 Mbit/s betrieben werden kann, indem Sie "Automatische Absprache" und dann nur 1000 Mbit/s VOLL im Abschnitt "Angezeigte Einstellungen" wählen.

3.	Wenn "Automatische Absprache" deaktiviert ist, erzwingen Sie Geschwindigkeits- und Duplexeinstellungen des Adapters, indem Sie auf eine der folgenden Einstellungen klicken:

•	10 Mbit/s HALB

•	10 Mbit/s VOLL

•	100 Mbit/s HALB

•	100 Mbit/s VOLL

Stellen Sie sicher, dass der Verbindungspartner die erzwungene Einstellung unterstützt, um die Kommunikation sicherzustellen.

4.	Klicken Sie auf OK.

5.	Starten Sie Ihren Computer neu, wenn Sie dazu aufgefordert werden.

Die Geschwindigkeits- und Duplexeinstellung ist jetzt für den Adapter konfiguriert.


Verbindungspartner

Ein Gerät, mit dem ein Adapter verbunden ist, z. B. ein anderer Adapter, ein Hub, ein Switch usw.


Strukturansicht Netzwerkkomponenten
Verzeichnisstruktur "Netzwerkkomponenten"

Die Verzeichnisstruktur "Netzwerkkomponenten" erscheint auf der linken Seite von Intel® PROSet II. Klicken Sie auf Adapter, VLANs oder Gruppen, um Einzelheiten über die Komponente anzuzeigen.


Boot Agent

Mit diesem Register können Sie die Einstellungen ansehen, über die die Boot Agent-Software gesteuert wird. Einige dieser Einstellungen können im Feld Auswahlfeld geändert werden. Über dieses Register können Sie möglicherweise auch ein Flash-ROM-Gerät mit einem Boot Agent-Softwarebild aktualisieren, wenn Ihre IT-Systemverwaltung diese Funktion aktiviert hat.

Detailliertere Beschreibungen zu jeder möglichen Konfigurationseinstellung finden Sie unter:

•	Netzwerk-Startprotokoll

•	StartreihenfolgeB

•	Setupmenü-Wartezeit

•	Setup-Prompt anzeigen

•	Fernaktivierung älterer Betriebssysteme

Anleitungen zur Änderung von Konfigurationseinstellungen entnehmen Sie bitte dem Intel® Boot Agent Benutzerhandbuch.

HINWEISE:

Wenn Sie eine Konfigurationseinstellung nicht ändern können, wird diese Einstellung möglicherweise nicht von Ihrem Adapter oder System unterstützt.

Die in dieser Hilfedatei aufgeführten Informationen gelten nur für die 16-Bit PXE 2.0-Version von Boot Agent. Die meisten der hier beschriebenen Konfigurationssetup-Optionen werden in einer EFI-Umgebung nicht verwendet.

Schaltfläche "Boot Agent aktualisieren"

Verwenden Sie diese Schaltfläche, um die Intel Boot Agent-Software zu installieren bzw. zu aktualisieren.

HINWEISE:

Bei der Aktualisierung von Boot Agent wird ein neues Boot Agent-Bild in den Flash-ROM geschrieben. Dies deaktiviert möglicherweise vorübergehend den Betrieb des Windows*-Netzwerkgerättreibers. Im Anschluss hieran muss der Computer möglicherweise neu gestartet werden.

Wenn eine DOS-Installation erforderlich ist, beachten Sie bitte den Abschnitt Installation/Aktualisierung in DOS-Umgebungen im Intel® Boot Agent Benutzerhandbuch.

So installieren oder aktualisieren Sie Boot Agent-Software:

HINWEIS: Wenn Sie ein Flash-ROM-Bild von der Intel Website herunterladen, speichern Sie es in ein Temporärverzeichnis oder in ein Verzeichnis, in dem Sie es leicht wiederfinden.

1.	Klicken Sie im Startmenü auf Einstellungen und dann auf  Systemsteuerung.
Das Systemsteuerungsfenster wird angezeigt.

2.	Doppelklicken Sie auf das Symbol Intel(R) PROSet II.
Der Bildschirm "Intel PROSet II" wird angezeigt.

3.	Wählen Sie in der Strukturansicht "Netzwerkkomponenten" den Adapter, der den Flash-ROM enthält, den Sie aktualisieren möchten.

4.	Klicken Sie auf das Register Boot Agent. Wenn das Register nicht angezeigt wird, aktualisieren Sie Ihren Netzwerktreiber oder stellen Sie sicher, dass Sie über die Intel PROSet II Version 4.0 verfügen.

HINWEIS: Intel PROSet II gestattet Ihnen außerdem, Konfigurationseinstellungen für PXE- und RPL-Umgebungen zu ändern. Wenn Sie in der Auflistung unter Netzwerkkomponenten auf der linken Seite des Intel PROSet Bildschirms einen Adapter auswählen, der in PXE- oder RPL-Umgebungen betrieben wird, können Sie möglicherweise die Konfigurationseinstellungen, die auf der rechten Seite des Bildschirms erscheinen, ansehen oder ändern. Näheres hierzu entnehmen Sie bitte dem Abschnitt "Boot Agent in einer Windows-Umgebung konfigurieren" im Intel® Boot Agent Benutzerhandbuch. Einige Flash-ROMs unterstützen nicht alle Konfigurationseinstellungen.

5.	Um eine Einstellung zu bearbeiten, drücken Sie Strg+S. Sobald diese Tastenkombination gedrückt wird, ändert sich die Ansicht des Registers "Boot Agent" und enthält eine abgedunkelte (deaktivierte) Schaltfläche "Einstellungen zuweisen".

6.	Klicken Sie auf  Boot Agent aktualisieren.
Ein Warndialogfeld erscheint mit dem Hinweis, dass die Netzwerkverbindung vorübergehend unterbrochen wird, während das Bootbild aktualisiert wird.

7.	Klicken Sie auf Ja, um mit der Aktualisierung fortzufahren.
In einem eingeblendeten Dialogfeld werden Sie gefragt, ob Sie eine Backupkopie des derzeit existierenden Flash-ROMS erstellen möchten.

8.	Wenn Sie eine Backupkopie des vorhandenen Flash-ROM-Bilds erstellen möchten, bevor Sie den Flash aktualisieren, klicken Sie auf Ja. Das Dialogfeld "Vorhandenes Flash-Bild speichern unter" erscheint. Fahren Sie mit Schritt 10 fort.

9.	Wenn Sie kein Backup des aktuellen Flash-ROM-Bilds speichern, klicken Sie auf Nein. Ein Warndialogfeld erscheint. Klicken Sie auf "Ja", und fahren Sie mit Schritt 11 fort.

10.	Klicken Sie auf Speichern, wenn Sie den Standardpfad und -dateinamen akzeptieren möchten (der Dateiname ist standardmäßig die eindeutige MAC-Adresse). Ändern Sie anderenfalls diese Parameter, und klicken Sie auf Speichern.

11.	Klicken Sie im Dialogfeld "Datei öffnen" auf Öffnen, wenn das gewünschte von Ihnen gespeicherte Flash-ROM-Bild als Standardpfad und -dateiname erscheint. Ändern Sie anderenfalls den Pfad- und Dateinamen, und klicken Sie auf Öffnen.
HINWEIS: Flash-ROM-Bilder sind auf der Intel Website verfügbar.

Die Aktualisierung dauert zwischen fünf und zehn Sekunden. Während dieses Vorgangs wird eine Verlaufsanzeige angezeigt.


Netzwerk-Startprotokoll

Wenn Ihr Boot Agent RPL nicht unterstützt, kann diese Einstellung nicht geändert werden.

Mögliche Werte:

•	PXE (Preboot Execution Environment)

•	RPL (Remote Program Load)

&Beschreibung:

Wählen Sie PXE zur Verwendung mit WfM-kompatiblen Netzwerkverwaltungsprogrammen wie LANDesk* Management Suite, Windows* 2000 RIS, Windows XP RIS und Linux*.

Wählen Sie RPL für herkömmliches Remotestarten und für einige Novell NetWare* Remotestartlösungen.


Startreihenfolge

Mögliche Werte:

•	Verwendet die BIOS-Setup-Startreihenfolge

•	Zuerst Netzwerk, dann lokale Laufwerke wählen

•	Zuerst lokale Laufwerke, dann Netzwerk wählen

•	Nur Netzwerk wählen

•	Nur lokale Laufwerke wählen

&Beschreibung:

Ermöglicht Ihnen, die Reihenfolge festzulegen, in der beim Systemstart Startgeräte ausgewählt werden. Wenn Ihr Computer ein BIOS hat, das BIOS Boot Specification (BBS) oder Plug&Play-kompatible (PnP) Auswahl der Startreihenfolge im BIOS-Setupprogramm unterstützt, ist diese Einstellung immer BIOS Setup-Startreihenfolge verwenden und kann nicht geändert werden. Sehen Sie  in diesem Fall im BIOS Setup-Benutzerhandbuch für Ihren Clientcomputer nach, um Startoptionen einzurichten.

Wenn Ihr Clientcomputer kein BBS- oder PnP-kompatibles BIOS hat, können Sie mit Ausnahme von BIOS Setup-Startreihenfolge verwenden einen der oben aufgeführten Werte auswählen.


Setup-Aufforderung anzeigen

Mögliche Werte:

•	Aktiviert - Standardwert

•	Deaktiviert

&Beschreibung:

Wenn Sie Aktiviert wählen, wird der Setupprompt Strg+S im Anschluss an POST angezeigt, so dass Sie innerhalb der in Setupmenuwartezeit eingestellten Sekundenanzahl Strg+S drücken können, um das Menü "Konfigurationssetup" anzuzeigen.

Wenn Sie Deaktiviert wählen, wird die Einstellung Setupmenüwartezeit auf null gestellt, und der Setupprompt Strg+S erscheint beim Systemstart nicht. Sie können das Konfigurationssetupmenü dennoch anzeigen, indem Sie sofort nach POST wiederholt auf  Strg+S drücken, bis das Menü erscheint. Falls das Konfigurationssetupmenü nach wiederholtem Drücken von "Strg+S" nicht erscheint, starten Sie das System neu, und versuchen Sie es noch einmal.


Wartezeitzeit beim Setup-Menü

Mögliche Werte:

•	0 Sekunden

•	2 Sekunden

•	3 Sekunden

•	5 Sekunden

&Beschreibung:

Die Anzahl Sekunden, die Boot Agent wartet, bis Sie auf Strg+S drücken, damit das Menü "Konfigurationssetup" während des Systemstarts angezeigt wird.

Wenn Sie die Einstellung "Setupmenüwartezeit" auf null stellen bzw. die Einstellung Setupprompt anzeigen  auf Deaktiviert einstellen, erscheint der Setupprompt nicht während des Systemstarts. Sie können das Konfigurationssetupmenü dennoch anzeigen, indem Sie sofort nach POST wiederholt auf  Strg+S drücken, bis das Menü erscheint. Falls das Konfigurationssetupmenü nach wiederholtem Drücken von "Strg+S" nicht erscheint, starten Sie das System neu, und versuchen Sie es noch einmal.


Fernaktivierungssupport für ältere Betriebssysteme
Remoteaktivierung älterer Betriebssysteme

Diese Einstellung erscheint nicht im Menü "Konfigurationssetup", wenn das System von einem Gigabitadapter gestartet wird.

Beachten Sie die Anweisungen zu Ihrem Betriebssystem, wenn Sie herausfinden möchten, ob Ihr Betriebssystem Remoteaktivierung unterstützt und wie diese Funktion verwendet wird.

Mögliche Werte:

•	Aktiviert

•	Deaktiviert

&Beschreibung:

Wählen Sie Aktiviert, um anderen Betriebssystemen als Windows* (z. B. DOS oder NetWare*) zu ermöglichen, die Fernaktivierungsfunktion des WfM-Adapters zu verwenden.

Wählen Sie Deaktiviert für diese Einstellung, wenn Sie Windows 2000, XP, Me oder 98SE verwenden.


VLAN-Auflistung

Wenn Sie VLANs konfiguriert haben, werden diese in der Strukturansicht "Netzwerkkompoinenten": angezeigt

Wenn Sie auf ein VLAN rechtsklicken, werden folgende Optionen angezeigt:

•	VLAN-Eigenschaften ändern  - Gestattet Ihnen, die VLAN-Konfiguration zu ändern.

•	Entfernen - Gestattet Ihnen, das VLAN zu entfernen.

Siehe auch:

VLAN hinzufügen


Gruppenauflistung

Wenn Sie Adaptergruppen konfiguriert haben, erscheinen sie in der Verzeichnisstruktur "Netzwerkkomponenten":

Wenn Sie auf eine Gruppe rechtsklicken, werden folgende Optionen angezeigt:

•	Gruppe entfernen

•	Gruppenmodus ändern

•	VLAN hinzufügen

•	IPSec aktivieren

•	GVRP aktivieren

Wenn Sie eine Gruppe konfiguriert haben, diese aber nicht in der Strukturansicht "Netzwerkkomponenten" erscheint, müssen Sie Intel® PROSet II eventuell schließen, um das Gruppen-Setup zuzuweisen.


Auflistung gruppierter Adapter

Wenn Sie auf eine Adaptergruppe rechtsklicken, werden folgende Optionen angezeigt:

•	Bevorzugter Primäradapter - Bestimmt den ausgewählten Adapter zum primären Übertragungsadapter für die Gruppe. Dies ist für gewöhnlich der Adapter mit der höchsten Bandbreite.

•	Bevorzugter Sekundäradapter - Bestimmt den ausgewählten Adapter zum Backupadapter für den bevorzugten Primäradapter.  Diese Option ist erst verfügbar, wenn ein bevorzugter Primäradapter angegeben wurde.

•	Aus der Gruppe entfernen - Entfernt den ausgewählten Adapter aus der Gruppe.

Siehe auch:

•	Adaptergruppenbildungsmodus ändern

•	Adapter einer bestehenden Gruppe hinzufügen

•	Neue Gruppe erstellen

•	Adapter aus einer Gruppe entfernen

•	Adaptergruppe entfernen

•	Einen Adapter als Primär- oder Sekundäradapter festlegen


Netzwerkkomponenten
Verzeichnisstruktur "Netzwerkkomponenten"

Die Verzeichnisstruktur "Netzwerkkomponenten" listet die Netzwerkkomponenten auf, die auf Ihrem System aktiv sind. Netzwerkkomponenten enthalten u. a. Adapter, Gruppen und VLANs.


Gruppenadapter

Das Listenfeld "Gruppenadapter" enthält die Adapter, die zusammen eine Gruppe bilden. Klicken Sie auf einen Gruppenadapter, um Informationen zu diesem Adapter anzuzeigen.

Siehe auch:

Adapter aus einer Gruppe entfernen


Virtuelle LANs

Im Register "Virtuelle LANs" in der Strukturansicht "Netzwerkkomponenten" werden konfigurierte VLANs aufgelistet.

Siehe auch:

VLAN hinzufügen

VLAN-Eigenschaften ändern

VLAN-Definition

Ein VLAN entfernen

Erweiterte Einstellungen für VLANs

GVRP einrichten


Adapterinstanz entfernen
Adapter entfernen

Bevor Sie einen Adapter aus Intel(R)  PROSet II oder von einem Computer löschen, stellen Sie sicher, dass der Adapter nicht Mitglied einer Gruppe ist. Ist der Adapter Mitglied einer Gruppe entfernen Sie den Adapter aus der Gruppe  und befolgen Sie anschließend die folgenden Anweisungen.

So entfernen Sie einen Adapter aus Intel(R) PROSet II:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponenten auf den Adapter, den Sie entfernen möchten.

2.	Klicken Sie auf Entfernen.
Ein Dialogfeld wird mit der Bestätigung angezeigt, dass der fragliche Adapter NICHT Mitglied eines Teams ist.

3.	Klicken Sie auf Ja.

4.	Klicken Sie auf OK, um Intel PROSet II zu schließen und Änderungen zuzuweisen.

5.	Starten Sie Ihren Computer neu, wenn Sie dazu aufgefordert werden.

Intel PROSet II verwaltet diesen Adapter nun nicht mehr.


Neue Gruppe erstellen

Eine Gruppe von Adaptern ist so konfiguriert, dass die Netzwerkfunktionalität, z. B. Failover oder erhöhter Übertragungsdurchsatz, verbessert wird.

So erstellen Sie eine Gruppe:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf nicht gruppierte Adapter.

2.	Klicken Sie auf Der Gruppe hinzufügen und anschließend auf Neue Gruppe erstellen.
Der Gruppenbildungsassistent wird angezeigt.

3.	Wählen Sie die Gruppenart, die Sie erstellen möchten, und klicken Sie auf Weiter. Verfügbare Optionen:

•	AFT (Adapter Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	Adaptive Load Balancing (ALB)

•	Link Aggregation (Dynamic_3ad* / GEC / LA / 802.3ad static mode)

4.	Wenn Sie eine Gruppe zum adaptiven Lastenausgleich bilden, können Sie "Empfangslastenausgleich" aktivieren oder deaktivieren.

•	Wenn Sie "Empfangslastenausgleich" aktivieren, empfangen die zu höchster Geschwindigkeit fähigen Gruppenmitglieder IP-Verkehr, während der Primäradapter den verbleibenden Verkehr empfängt.
HINWEIS: Wenn "Empfangslastenausgleich" aktiviert ist, wählt Intel(R) PROSet automatisch einen bevorzugten Primäradapter. Der bevorzugte Primäradapter wird nicht aufgrund des Adaptermodells oder seiner Geschwindigkeit ausgewählt.

•	Wenn Sie "Empfangslastenausgleich" deaktivieren, wird der Verkehr lediglich vom Primäradapter empfangen.

5.	In der Liste werden alle Adapter aufgeführt, die derzeit nicht Mitglied einer Gruppe sind. Klicken Sie auf die Adapter in der Liste, die Sie dieser Gruppe zuordnen möchten und klicken Sie auf Weiter.

6.	Klicken Sie anschließend auf Fertig stellen.

7.	Sofern gewünscht, können Sie einen Adapter der Gruppe als Primäradapter bestimmen. Um einen Primäradapter zu bestimmen, klicken Sie mit der rechten Maustaste auf den Adapter, den Sie als Primäradapter verwenden möchten, und klicken Sie anschließend auf Bevorzugter Primäradapter.
Wenn Sie sich entschließen, keinen Primäradapter zu wählen, wählt Intel PROSet II einen aus.

8.	Klicken Sie auf Schließen, um Intel PROSet II zu schließen und Änderungen zuzuweisen.

Die Gruppe ist jetzt konfiguriert.

HINWEIS:  Wenn Sie in Intel(R) PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


Einen Adapter einer bestehenden Gruppe hinzufügen

Sie können einen Adapter jederzeit zu einer bereits vorhandenen Gruppe hinzufügen.

HINWEIS:  In Dynamic 802.3a-Gruppen kann eine Änderung der Konfiguration unter Umständen zu einer kurzzeitigen Unterbrechung des Verkehrsflusses führen, während der Switch die Verbindungs-Aggregatoren neu berechnet.

So fügen Sie mit Intel(R) PROSet II einen Adapter zu einer bereits vorhandenen Gruppe hinzu:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf eine Gruppenauflistung.

2.	Klicken Sie auf Adapter zu Gruppe hinzufügen und wählen Sie den Adapter aus, den Sie hinzufügen möchten.

Der Adapter ist jetzt Teil der Gruppe.

HINWEIS:  Wenn Sie in Intel® PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


VLAN hinzufügen
Ein VLAN erstellen

Ein VLAN ist eine logische Gruppierung von Adaptern, die dazu konfiguriert sind, die Netzwerksicherheit zu erhöhen und die Größe von Übertragungsdomänen zu verringern.

So erstellen Sie ein VLAN:

1.	Rechtsklicken Sie in der Strukturansicht "Netzwerkkomponenten" auf einen in der Gruppenauflistung enthaltenen gruppierten oder  nicht gruppierten Adapter.

2.	Klicken Sie auf VLAN hinzufügen.
Das Dialogfeld "Neues VLAN hinzufügen" wird angezeigt.

3.	Geben Sie im Feld "VLAN-Kennung" die dem Adapter zugeordnete VLAN-Nummer ein.  Die VLAN-Kennung muss mit der auf dem Switch konfigurierten VLAN-Kennung übereinstimmen.
HINWEIS: Die VLAN-Nummern 0 und 1 sind häufig reserviert. Näheres hierzu erfahren Sie in Ihrer Switch-Dokumentation.

4.	Geben Sie im Feld "VLAN-Name" eine Bezeichnung für das VLAN ein. Beispielsweise "Marketing" oder "Ingenieurwesen". Dieser Name muss nicht mit dem Namen in sonstigen Netzwerkgeräten übereinstimmen. Er dient lediglich zu Erkennungszwecken.

5.	Klicken Sie auf OK.

Der Adapter ist jetzt als Mitglied des VLAN konfiguriert. Denken Sie im Anschluss an die Einrichtung des Adapters als VLAN-Mitglied daran, die VLAN-Konfiguration abzuschließen, indem Sie andere Netzwerkgeräte mit entsprechenden Angaben zum betreffenden VLAN versehen.

HINWEIS:  Wenn Sie in Intel® PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


VLAN entfernen

Verwenden Sie Intel(R) PROSet II, um VLANs zu entfernen. Das Entfernen oder Deaktivieren von VLANs über die Netzwerk-Systemsteuerung auf Ihrem Betriebssystem könnte die Systemstabilität und Adapterkonfiguration beeinträchtigen.

So entfernen Sie ein VLAN aus einer Gruppe oder von einem Adapter:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf eine VLAN-Auflistung.

2.	Klicken Sie auf VLAN entfernen.

Das VLAN ist aus der Gruppe bzw. vom Adapter entfernt.

HINWEIS:  Wenn Sie in Intel(R) PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


Adaptergruppe entfernen

Verwenden Sie beim Entfernen von Adaptergruppen unbedingt das Programm Intel(R) PROSet II. Das Entfernen oder Deaktivieren von Gruppen über die Netzwerk-Systemsteuerung auf Ihrem Betriebssystem könnte die Systemstabilität und Adapterkonfiguration beeinträchtigen.

So entfernen Sie eine ganze Adaptergruppe:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf eine Gruppenauflistung.

2.	Klicken Sie auf Entfernen.

3.	Es wird eine Bestätigungsmeldung angezeigt.  Klicken Sie auf Ja.

Die Gruppe wird entfernt. Die Adapter funktionieren weiterhin als separate Geräte.

HINWEIS: Wenn Sie für die Gruppe VLANs oder Priority Packets erstellt haben, werden diese mit der Gruppe entfernt.  Wenn Sie VLANs oder Priority Packet-Filter für einen Adapter erstellt haben, bevor er einer Gruppe zugewiesen wurde, werden diese mit der Gruppe gelöscht.


Adapter-Gruppenmodus ändern
Gruppenmodus ändern

So ändern Sie den Gruppenmodus einer Gruppe:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf eine Gruppenauflistung.

2.	Klicken Sie auf Gruppenmodus ändern und klicken Sie auf eine der folgenden Optionen:

•	Adapter Fault Tolerance

•	SFT (Switch Fault Tolerance)

•	Adaptiver Lastenausgleich
Wenn der Gruppenmodus auf Adapter Lastenausgleich geändert wird, ist Empfangslastenausgleich standardmäßig deaktiviert. Wenn Sie Empfangslastenausgleich aktivieren möchten, ändern Sie den Gruppenmodus und aktivieren Sie anschließend "Empfangslastenausgleich" im Register "Erweiterte Einstellung für die Gruppenbildung".

•	Link Aggregation (Dynamic_3ad* / GEC / LA / 802.3ad static mode)

Der Gruppenmodus ist jetzt geändert.

HINWEIS:  Wenn Sie in Intel® PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


Einen Adapter aus einer Gruppe entfernen

Sie können einen Adapter jederzeit aus einer bereits vorhandenen Gruppe entfernen.

HINWEIS:  In Dynamic 802.3a-Gruppen kann eine Änderung der Konfiguration unter Umständen zu einer kurzzeitigen Unterbrechung des Verkehrsflusses führen, während der Switch die Verbindungs-Aggregatoren neu berechnet.

So entfernen Sie einen Adapter aus einer Gruppe:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf eine Gruppe.

2.	Klicken Sie auf Aus der Gruppe entfernen.

3.	Klicken Sie auf OK, um die Änderung zuzuweisen.

Der Adapter ist nicht mehr Teil der Gruppe.

HINWEIS:  Wenn Sie in Intel® PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


VLAN-Eigenschaften ändern

Sie können den Adapter so konfigurieren, dass er Mitglied eines anderen VLAN ist, indem Sie die VLAN-Kennung ändern. Wenn die dem Adapter zugeordnete VLAN-Kennung geändert wird, wird der Adapter aus dem aktuellen VLAN entfernt und die Verbindung mit den Computern des aktuellen VLAN wird abgebrochen.

Wenn Sie zum Beispiel die VLAN-Kennung von 7 auf 9 ändern, kommuniziert der Computer nicht mehr mit VLAN 7 sondern mit den Computern von VLAN 9.

So ändern Sie die VLAN-Konfiguration:

1.	Rechtsklicken Sie in der Strukturansicht Netzwerkkomponentenauf ein VLAN.

2.	Klicken Sie auf VLAN-Eigenschaften ändern.

3.	Geben Sie im Feld "VLAN-Kennung" die dem Adapter zugeordnete VLAN-Nummer ein.  Die VLAN-Kennung muss mit der auf dem Switch konfigurierten VLAN-Kennung übereinstimmen.
HINWEIS: Die VLAN-Nummern 0 und 1 sind häufig reserviert. Näheres hierzu erfahren Sie in Ihrer Switch-Dokumentation.

4.	Geben Sie im Feld "VLAN-Name" eine Bezeichnung für das VLAN ein. Beispielsweise "Marketing" oder "Ingenieurwesen". Der VLAN-Name dient lediglich zu Informationszwecken und braucht nicht mit dem auf sonstigen Netzwerkgeräten konfigurierten VLAN-Namen übereinzustimmen.

5.	Um Intel® PROSet II zu schließen, klicken Sie auf OK.

Die VLAN-Konfiguration ist jetzt aktualisiert.

HINWEIS:  Wenn Sie in Intel® PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.

Siehe auch:

GVRP aktivieren

Erweiterte Einstellungen für VLANs


Einen Adapter als Primär- oder Sekundäradapter festlegen

Jede Gruppe enthält einen Primäradapter und mindestens einen Sekundäradapter.

Sie können den Primäradapter entweder manuell auswählen oder ihn von Intel(R) PROSet II bestimmen lassen.

•	Wenn Sie einen Adapter auswählen, wird er zum bevorzugten Primäradapter. Der bevorzugte Primäradapter überträgt und empfängt Verkehr, solange sein Status aktiv ist. Wenn der bevorzugte Primäradapter ausfällt und später wieder aktiv wird, übernimmt er automatisch wieder die Funktion des bevorzugten Primäradapters.

Wenn Sie beispielsweise einen Server mit einem Intel(R) PRO/1000 Gigabitadapter als Primäradapter und einen Intel(R) PRO/100+ oder Intel(R) PRO/100 S Adapter als Sekundäradapter haben, ist es empfehlenswert, den Intel(R) PRO/1000 Gigabitadapter als bevorzugten Primäradapter einzusetzen. Wenn in diesem Fall der Intel PRO/1000 Adapter ausfällt, übernimmt der Intel PRO/100+ oder der PRO/100 S. Wenn der Intel PRO/1000 Adapter ersetzt wird, übernimmt er automatisch die Rolle des Primäradapters in der Gruppe.

Wenn Sie einen Primäradapter manuell auswählen, gibt es immer einen bevorzugten Primäradapter in der Gruppe.

•	Wenn Sie keinen Primäradapter einrichten, wählt Intel PROSet II nach Modell und Geschwindigkeit den besten Adapter aus. Das heißt, dass es keinen bevorzugten Primäradapter gibt, obwohl ein Primäradapter vorliegt. Wenn kein bevorzugter Primäradapter vorliegt, kann Intel PROSet II einen alternativen Primäradapter auswählen, falls der Primäradapter ausfällt.

Wenn beispielsweise der Primäradapter - ein Intel(R) PRO/1000 Gigabitadapter ausfällt, kann Intel PROSet II einen anderen Adapter der Gruppe als Ersatzprimäradapter einsetzen.  Wenn der Intel(R) PRO/1000 Adapter wieder aktiv wird, kehrt er zur Gruppe als Gruppenmitglied - nicht als Primäradapter - zurück.

So richten Sie einen Adapter als Primär- oder Sekundäradapter ein:

1.	Rechtsklicken Sie in der Strukturansicht "Netzwerkkomponenten" auf eine Auflistung gruppierter Adapter.

2.	Klicken Sie auf Bevorzugter Primäradapter oder Bevorzugter Sekundäradapter.

Der Adapter ist jetzt konfiguriert.

So ändern Sie die Adapterpriorität:

Sie können auf die gleiche Art wie oben beschrieben die Priorität eines Adapters ändern.

STP- und SFT-Gruppen:  Wenn Sie den (aktiven) Primäradapter einer Gruppe auswechseln, wird die Gruppe über die MAC-Adresse des neuen Primäradapters neu geladen. Ebenso wird eine Gruppe neu geladen und erhält eine neue MAC-Adresse, wenn die LAA (Locally Administered Address) der Gruppe geändert wird. In beiden Fällen kann die Gruppe nicht kommunizieren, wenn die Änderungen an einer SFT-Gruppe vorgenommen werden und der Server aktiv auf dem Netzwerk ist, bis alle Netzwerkgeräte ihre ARP-Tabellen mit den Adressenangaben des neuen Primäradapters aktualisieren. Die für die Aktualisierung der ARP-Tabelle erforderliche Dauer richtet sich nach der ARP-Cachetimeout-Dauer. Dies ist ein Parameter, der für einige Router und Betriebssysteme verfügbar ist. Je nach der ARP-Cachetimeout-Dauer kann die Gruppe bis zu 10 Minuten nicht verfügbar sein.

HINWEIS: Die Option "Bevorzugter Sekundäradapter" ist erst verfügbar, wenn Sie einen "Bevorzugten Primäradapter" festlegen.


PROSet Taskleistensymbol
Intel(R) PROSet II Taskleistensymbol

Wenn Sie Intel(R) PROSet II installieren, erscheint in der Taskleiste bei der Uhr ein Intel(R) PROSet II Taskleistensymbol.

Wenn Sie auf das Symbol rechtsklicken, werden folgende Optionen angezeigt:

Befehl	Beschreibung
Intel(R) PROSet II starten	Zeigt das Programm Intel PROSet II an.
Status anzeigen für	Zeigt die Namen der installierten drahtlosen Adapter an.
Taskleistensymbol ausblenden	Blendet das Taskleistensymbol aus der Taskleiste aus.   Um es wieder anzuzeigen klicken Sie im Register "Allgemein" von Intel PROSet II auf die Option Taskleistensymbol anzeigen.
Beenden	Beendet Intel PROSet II und entfernt das Symbol vorübergehend aus der Taskleiste.  Auch wenn das Symbol in der Taskleiste nicht sichtbar ist, können Sie Intel PROSet duch Doppelklicken auf das Intel PROSet II Symbol in der Systemsteuerung starten. Das Intel PROSet II Taskleistensymbol wird nach dem Neustart des Systems in der Taskleiste angezeigt.
Beenden und nicht beim Start anzeigen	Entfernt das Intel PROSet II Taskleistensymbol und blendet es beim Neustart des Systems aus. So stellen Sie das Taskleistensymbol wieder her, nachdem Sie diese Option gewählt haben:  1. Klicken Sie auf Start > Ausführen. 2. Geben Sie im Feld "Öffnen" PROMON ein und klicken Sie auf OK.   Das Intel PROSet II Symbol verbleibt in der Taskleiste, bis der Computer neu gestartet wird. Näheres zur ständigen Anzeige des Taskleistensymbols entnehmen Sie bitte dem Abschnitt Taskleistensymbol beim Start starten weiter unten.
Symbol beim Start in der Taskleiste anzeigen	Konfiguriert das Intel PROSet II Taskleistensymbol in der Taskleiste. Durch diese Option wird sichergestellt, dass das Taskleistensymbol nach einem Computerneustart angezeigt wird. HINWEIS: Diese Option steht nur dann zur Auswahl, wenn Sie die Option Beenden und nicht beim Start anzeigen verwendet haben.


Technische Details zu SPD (Smart Power Down)
Details zu SPD (Smart Power Down)

SPD (Smart Power Down) ist eine Energieersparnismethode, die auf Intel 82558-, 82559- und 82550-basierten Adaptern eingesetzt wird, um den Energieverbrauch zu minimieren, wenn keine gültige Verbindung vorliegt. SPD ermöglicht Adaptern, in einen "Tiefschlafmodus" umzuschalten, der bis zu 150 % mehr Energie einspart. SPD ist aktiviert, wenn:

•	der Adapter über keine gültige Verbindung verfügt;

•	das Betriebssystem sich im Standbymodus befindet.

In beiden Fällen versetzt das Betriebssystem den Adapter in den "Tiefschlafmodus", wenn SPD aktiviert ist, und der gesamte Energieverbrauch wird verringert. Die normale Energiemenge und Adapteraktivität werden wieder hergestellt, wenn der Adapter eine gültige Verbindung erhält oder wenn das Betriebssystem wieder aktiviert wird.


Meldung "Gerät konnte nicht deinstalliert werden"

Wenn Sie versuchen, eine Adapter-Gruppe oder VLAN-Auflistung mit Hilfe des Geräte-Managers zu entfernen, erhalten Sie folgende Meldung: "Das Gerät konnte nicht deinstalliert werden. Das Gerät ist möglicherweise zum Start des Computers erforderlich".

Diese Meldung besagt, dass Sie einen von Intel(R) PROSet II erstellten virtuellen Adapter nicht mit Hilfe des Geräte-Managers entfernen können.  Verwenden Sie Intel PROSet II, um Adapter aus dem Geräte-Manager zu entfernen.

Siehe auch:

Adaptergruppe entfernen

Ein VLAN entfernen

GVRP aktivieren


Erweiterte Einstellungen für VLANs

So passen Sie erweiterte VLAN-Einstellungen an:

1.	Klicken Sie in der Strukturansicht "Netzwerkkomponenten"  auf VLAN-Auflistung

2.	Klicken Sie auf das Register Erweitert.

3.	Klicken Sie in der Dropdown-Liste auf NumRxPackets und geben Sie den neuen Wert ein.
NumRxPackets definiert die Anzahl von Empfangsdescriptors. Empfangsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, dem Speicher eingegangene Pakete zuzuordnen. Jedes eingegangene Paket erfordert einen Empfangsdescriptor. Jede Beschreibung verbraucht 2 KB Speicher.

Sie haben die Option, die Anzahl der Empfangsdescriptors zu erhöhen, falls Sie eine bedeutende Verminderung der Empfangsverkehrsleistung feststellen. Wenn der Empfangsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung.

Vorsicht: Die Leistung Ihres Systems wird möglicherweise durch Änderung dieser Einstellung vermindert.

4.	Klicken Sie in der Dropdown-Liste auf NumTxPackets und geben Sie den neuen Wert ein.

NumTxPackets Definiert die Anzahl von Übertragungsdescriptors. Übertragungsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu verfolgen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Übertragungsdescriptors.

Sie können die Anzahl der Übertragungsdescriptors erhöhen, wenn Sie bei der Übertragungsleistung ein mögliches Problem bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Übertragungsdescriptors verbessert werden kann, sollte beachtet werden, dass Übertragungsdescriptors Systemspeicher belegen. Wenn der Übertragungsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung.

Vorsicht: Die Leistung Ihres Systems wird möglicherweise durch Änderung dieser Einstellung vermindert.

5.	Klicken Sie auf OK.

6.	Die VLAN-Einstellungen sind jetzt benutzerdefiniert.

Das VLAN ist jetzt benutzerdefiniert.

HINWEIS:  Wenn Sie in Intel® PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


IPSec aktivieren

IPSec (IP Security) ist ein Standardset, das von IETF (Internet Engineering Task Force) zum Schutz von IP-Kommunikation entwickelt wurde. Es stellt sicher, dass Datenpakete während der Übertragung nicht geändert werden. Einzelheiten zu IPS finden Sie auf Intels Supportsite unter http://support.intel.com oder, falls Sie über Intel(R) Packet Protect verfügen, im dazugehörigen Benutzerhandbuch.

Anforderungen

Sie können IPSec in Intel® PROSet II aktivieren, wenn

•	Sie eins der folgenden Betriebssysteme verwenden:

•	Windows* 98

•	Windows NT* 4.0, SP5 oder später

•	Windows Me

•	Wenn Sie einen Intel® PRO/100 Adapter verwenden

Wenn Sie Windows 2000 oder XP verwenden, ist IPSec als Snap-In in der Microsoft Management-Konsole verfügbar. Wenden Sie sich an die Betriebssystemdokumentation, um Näheres zu IPSec-Implementation unter Windows 2000 oder XP zu erfahren.

So aktivieren Sie IPSec

1.	Klicken Sie mit der rechten Maustaste auf eine Gruppenauflistung oder auf eine Nicht gruppierte Adapter-Auflistung in der Strukturansicht "Netzwerkkomponenten" und markieren Sie dann "IPSec aktivieren".

2.	Starten Sie den Computer erneut.

3.	Installieren Sie die Intel® Packet Protect-Software.
HINWEIS:  Um Packet Protect installieren zu können, müssen Sie vor der Installation die Option "IPSec aktivieren" für mindestens einen Adapter oder eine Adaptergruppe aktivieren.

IPSec ist nun aktiviert.

So deaktivieren Sie IPSec

Klicken Sie mit der rechten Maustaste auf eine Gruppenauflistung oder auf eine Nicht gruppierte Adapter-Auflistung in der Strukturansicht "Netzwerkkomponenten" und löschen Sie dann die Markierung von "IPSec aktivieren".

Verschlüsselung für Intel(R) PRO/100 S Adapter verschieben

Die Intel® PRO/100 Adapterfamilie kann den Verschlüsselungsvorgang von IPSec-Transaktionen verschieben. Adapter reduzieren die CPU-Auslastung durch das Abwickeln von Verschlüsselungsvorgängen. So aktivieren Sie diese Verschiebungsfunktion:

1.	Aktivieren Sie IPSec entweder mit Intel Packet Protect oder, falls der Computer Windows 2000 oder XP ausführt, mit der Microsoft Verwaltungskonsole.

2.	Markieren Sie in Intel PROSet II in der Verzeichnisstruktur "Netzwerkkomponenten" den Intel PRO/100 S Adapter, der IPSec-Verschlüsselung abwickeln soll.

3.	Klicken Sie auf das Register Erweitert.

4.	Klicken Sie in der Liste "Einstellungen" auf Verschieben.

5.	Markieren Sie im Feld "Wert" die Option IPSec.

6.	Klicken Sie auf OK.

Der Adapter ist nun zur Verschiebung des Verschlüsselungsvorgangs von der CPU konfiguriert.


GVRP-Support

Arbeitsstationen und Switches verwenden das GVRP (GARP VLAN Registration Protocol), um VLANs dynamisch zu bilden, zu ändern und zu entfernen. GVRP-kompatible Switches können den Switch-Anschluss von VLAN-Mitgliedern erkennen und den VLAN-Status verfolgen.

Anforderungen

Adapter und Switches müssen das GVRP aktiviert haben, damit es auf dem gesamten Netzwerk unterstützt wird.

So aktivieren Sie das GVRP auf einem Adapter

1.	Rechtsklicken Sie in der Strukturansicht "Netzwerkkomponenten"auf eine Adaptergruppenauflistung mit mindestens einem VLAN.

2.	Klicken Sie auf GVRP-Support.
Das Dialogfeld "GVRP-Support" wird angezeigt.

3.	Klicken Sie auf Aktiviert.

4.	Geben Sie in der GVRP-Dropdown-Liste die Anzahl von Millisekunden zwischen dem Switch-Befehl GVRP LEAVE und dem Befehl PROSet II GVRP Join ein. Standardmäßig initiiert Intel(R) PROSet II einen Join-Befehl 200 Ms nach dem Leave-Befehl.

5.	Klicken Sie auf OK.

Der Adapter ist jetzt GVRP-aktiviert.

Fehlerbehebung

Aufgrund verschiedener Implementationen des GVRP stellt dessen Aktivierung auf dem Adapter keine Garantie für die GVRP-Kompatibilität zwischen Netzwerkgeräten dar. Falls GVRP nicht funktioniert, deaktivieren Sie es auf dem Adapter.

HINWEIS:  Wenn Sie in Intel(R) PROSet II mehrere Änderungen an Gruppen oder VLANs vornehmen, sollten Sie Intel PROSet II nach jeder Änderung schließen, um die Änderung zu übernehmen.  Anschließend können Sie Intel PROSet II wieder starten, um die nächste Änderung vorzunehmen.


Windows NT 4.0 Service Packs
Windows NT* 4.0 Service Packs

Um Intel(R) PROSet II und die allerneuesten Gruppierungsfunktionen verwenden zu können, muss Ihre Windows NT 4.0-Installation auf Service Pack 6a oder neuer aktualisiert werden.

Microsoft Service Pack-Informationen finden Sie unter http://www.microsoft.com/ntserver.  Sie können ein Service Pack und die Anleitungen herunterladen.


Erweiterte Einstellungen für PRO/1000 Desktop-Adapter

HINWEIS:  Bitte wenden Sie sich an Ihre Netzwerkverwaltung, bevor Sie Änderungen an diesen Einstellungen vornehmen. Die Konfiguration von erweiterten Einstellungen kann die Adapter- oder Systemleistung negativ beeinflussen, wenn die Einstellungen nicht mit anderen Netzwerkgeräten kompatibel sind.

Adaptives IFS (Inter-Frame Spacing)

Schafft Ausgleich für übermäßige Ethernet-Paketkollisionen in Ihrem Netzwerk.

Unterstützte Adapter	Alle
Standard	aktiviert

Adaptive Verbindungsreaktion

Beschleunigt den Systemstart, indem Startroutinen, die eine Verbindung mit dem Server erfordern, umgangen werden, wenn das Kabel nicht mit dem Adapter verbunden ist. So wird die zum Starten des Computers erforderliche Zeit wesentlich verkürzt.

Wenn ALR (Adaptive Link Response = Adaptive Verbindungsreaktion) aktiviert ist und kein Netzwerkkabel mit dem RJ-45-Anschluss verbunden ist, wird die Netzwerkverbindung deaktiviert. Ein gelbes Warnsymbol wird neben der Netzwerkverbindung im Gerätemanager angezeigt.

Um die Netzwerkverbindung erneut zu aktivieren, verbinden Sie das Netzwerkkabel mit dem RJ-45-Anschluss und führen Sie einen Neustart des Computers durch.

Unterstützte Adapter	Nicht für jedes Adaptermodell verfügbar.
Standard	Aus
Empfohlen	Ein
Bereich	Ein, Aus
HINWEIS: Adaptiver Link Response (ALR) wird nicht funktionieren, wenn ein drahtloser Adapter aktiv im System ist.

Coalesce Buffers

Optimiert die Übertragungsleistung, indem die Anzahl der Coalesce Buffers benutzerdefiniert wird, so dass der Adapter Datensegmente vor der Paketübertragung zusammenfügen kann.

Die Einstellung "Coalesce Buffers" muss so konfiguriert werden, dass sie zusammen mit der Einstellung "Übertragungsdescriptors" funktioniert. Die Einstellung "Coalesce Buffers" sollte 30 bis 50 % der Übertragungsdescriptors umfassen. Wird die Einstellung "Coalesce Buffers" nicht der Einstellung "Übertragungsdescriptors" angepasst, wird die Übertragungsleistung möglicherweise nicht verbessert.

Die Einstellung Coalesce Buffers erhöht die Übertragungsleistung auf Rechnern mit Windows NT 4.0 bedeutend. Sie verbessert darüber hinaus die Übertragungsleistung auf Rechnern mit Windows 98 und 2000.

Unterstützte Betriebssysteme	Windows NT 4.0, 98, 2000, XP
Unterstützte Adapter	Alle
Standard	128
Bereich	16-768
PME (Power Management Event) aktivieren

Aktiviert bzw. deaktiviert Remoteaktivierungsfunktionen des Adapters auf Computern mit älteren APM-Implementationen (Advanced Power Management). Remoteaktivierung sorgt dafür, dass der Adapter aus dem Standby- oder ausgeschalteten Modus aktiviert wird, wenn bestimmte Paketarten - z. B. ARP-Pakete (Address Resolution Protocol) - empfangen werden.

•	Wenn diese Funktion deaktiviert wird, werden alle Remoteaktivierungseinstellungen auf Computern mit älteren Energieverwaltungsimplementationen deaktiviert.

•	Wenn diese Funktion aktiviert wird, kann der Adapter auf Remoteaktivierungssignale antworten. Näheres zur Konfiguration des Adapters, so dass er bestimmte Paketarten beantwortet, entnehmen Sie bitte den Remoteaktivierungseinstellungen weiter unten in diesem Hilfeabschnitt.

•	Der Wert "Hardware-Standard" zwingt den Adapter, Remoteaktivierungsfunktionen anhand der Systemhardware zu konfigurieren.

•	Der Wert "Keine Aktion" ermöglicht dem Adapter, den Standardwert des Betriebssystems zu verwenden.

Wenn Sie alle diesbezüglichen Einstellungen deaktivieren möchten, deaktivieren Sie diese Funktion. Stellen Sie anderenfalls diese Funktion auf "Keine Aktion" ein.

Unterstützte Adapter	82559-basierte Adapter. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert
Schneller Übertragungsabschluss

Optimiert die Übertragungsleistung durch Freigeben von Übertragungsbeschreibungen zur Wiederverwendung, bevor Pakete über das Netzwerk versendet werden.

•	Ist diese Funktion deaktiviert, muss der Adapter warten, bis Pakete gesendet wurden, bevor Übertragungsbeschreibungen wiederverwendet werden können.

•	Ist diese Funktion aktiviert, kann der Adapter Übertragungsbeschreibungen früher wiederverwenden, und der Adapter kann die Übertragungsleistung verbessern.

Unterstützte Adapter	82544-basiert. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Ein
Bereich	Ein, Aus
Flusssteuerung

Ermöglicht es Adaptern, den Verkehr effektiver zu regeln.

•	Adapter generieren Flusssteuerungs-Frames, wenn ihre Empfangswarteschlangen einen vordefinierten Grenzwert erreichen. Das Generieren von Flusssteuerungs-Frames signalisiert dem Sender, die Übertragung zu verlangsamen.

•	Adapter reagieren auf Flusssteuerungs-Frames, indem sie die Paketsendung so lange anhalten, wie im Flusssteuerungs-Frame angegeben wurde.

Wenn Adapter die Paketübertragung anpassen können, kann mit Hilfe der Flusssteuerung verhindert werden, dass Pakete nicht berücksichtigt werden.

HINWEIS: Verbindungspartner müssen Flusssteuerungs-Frames unterstützen, damit die Adapter diese Funktion nutzen können.

Unterstützte Adapter	82540 und 82544-basiert, Übertragung und Empfang. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Flusssteuerungs-Frames generieren und beantworten
Bereich	• Aus, Antworten, Generieren, Generieren & Antworten, Hardwarestandard

Jumbo Frames

NOTE: Jumbo Frames werden nur bei 1000 Mbit/s unterstützt. Der Einsatz von Jumbo Frames bei 10 oder 100 Mbit/s kann in schlechter Leistung oder dem Verlust der Verbindung resultieren.

Aktiviert bzw. deaktiviert Jumbo Frame-Funktionalität. Jumbo Frames können den Durchsatz erhöhen und die CPU-Auslastung vermindern, indem jedem Frame mehr Daten zugewiesen werden und somit weniger Frames versendet werden. Die Standard-Ethernetframe-Größe beträgt 1514 Byte. Jumbo Frames dagegen können 4088, 9014 oder 16128 Byte umfassen.

Aktivieren Sie Jumbo Frames nur, wenn sie von allen Geräten auf dem Netzwerk unterstützt werden und alle diese Geräte so konfiguriert sind, dass dieselbe Frame-Größe verwendet wird. Beachten Sie beim Einrichten von Jumbo Frames auf anderen Netzwerkgeräten, dass Netzwerkgeräte Jumbo Frame-Größen auf unterschiedliche Art berechnen. Einige Geräte (jedoch nicht alle) beziehen die Kopfzeileninformationen in die Frame-Größe mit ein. Intel Adapter beziehen die Kopfzeileninformationen nicht in die Frame-Größe mit ein.

Näheres hierzu entnehmen Sie bitte dem Abschnitt Jumbo Frames .

Unterstützte Adapter	Alle
Standard	Deaktiviert
Bereich	Deaktiviert (1514), 4088, 9014 und 16128 (Stellen Sie den Switch für CRC 4 Byte höher - plus 4 Byte, falls Sie VLANs oder QoS Packet-Tagging verwenden).  HINWEIS: Jeder Wert im Bereich (1514-16128) kann im Windows-Registrierungsschlüssel MaxFrameSize eingestellt werden.
Lokal verwaltete Adresse

Überschreibt die MAC-Adresse des Adapters. Geben Sie unter Wert eine 12-stellige Hexadezimalzahl ein, um eine neue Netzwerkadresse einzugeben.

Unterstützte Adapter	Alle
Standard	Keine
Bereich	0000 0000 0001 - FFFF FFFF FFFD Ausnahmen: • Verwenden Sie keine Multicastadresse (niederwertigste Ziffer des hohen Byte = 1).  • Verwenden Sie nicht ausschließlich Nullen oder F. Einstellung "Nicht vorhanden": stellt auf Original-Netzwerkadresse des Adapters zurück.
Anwender von Windows 98SE:

Wenn Sie die Standardadresse verwenden möchten, nachdem Sie eine manuell zugewiesene Adresse verwendet haben, führen Sie eine dieser Optionen durch:

•	Markieren Sie in den Netzwerkeigenschaften im Dialogfeld Erweitert die Option "lokal verwaltete Adresse" und ändern Sie den Wert auf 0. Klicken Sie auf OK,  um die Einstellung zuzuweisen.

•	Klicken Sie in Intel PROSet II auf das Register Erweitert  und anschließend auf Standard wiederherstellen oder löschen Sie alle Eingaben im Wertefeld. Klicken Sie auf OK, um die Einstellung zu speichern.

Verbindungsereignis protokollieren

Diese Einstellung wird verwendet, um die Protokollierung von Veränderungen an Verbindungszuständen zu aktivieren/deaktivieren. Wenn sie aktiviert ist, wird durch ein Verbindungs- oder Verbindungstrennungs-Änderungereignis eine Meldung generiert , die im Systemereignisprotokollsystem angezeigt wird. Administratoren erhalten die Ereignismeldung vom Systemereignisprotokollsystem.

Die folgenden Ereignisse werden protokolliert.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Unterstützte Adapter	Alle
Standard	Aktivieren
Bereich	Aktivieren, Deaktivieren
Empfangs-TCP-Prüfsumme entladen

Ermöglicht es dem Adapter, die TCP- oder UDP-Prüfsumme für eingehende Pakete zu überprüfen.

•	Ist diese Option deaktiviert, überprüft das Betriebssystem die TCP-Prüfsumme.

•	Bei aktivierter Option führt der Adapter die Überprüfung für das Betriebssystem durch.

Diese Funktion verbessert die Empfangsleistung und reduziert die CPU-Auslastung.

Unterstützte Betriebssysteme	• Windows XP* • Windows 2000 • Windows 98 unterstützt die Entladungsoption nicht.
Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	• Windows* XP: Ein • Windows 2000: Aus
Bereich	Ein, Aus
Übertragungs-IP-Prüfsumme entladen

Ermöglicht dem Adapter, die IP-Prüfsumme für ausgehende Pakete zu berechnen.

•	Ist diese Option deaktiviert, überprüft das Betriebssystem die IP-Prüfsumme.

•	Bei aktivierter Option führt der Adapter die Überprüfung für das Betriebssystem durch.

Diese Funktion verbessert die IP-Übertragungsleistung und reduziert die CPU-Auslastung.

Unterstützte Betriebssysteme	• Windows XP* • Windows 2000 • Windows 98 unterstützt die Entladungsoption nicht.
Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Ein
Bereich	Ein, Aus
Übertragungs-TCP-Prüfsumme entladen

Ermöglicht es dem Adapter, die TCP- oder UDP-Prüfsumme für ausgehende Pakete zu berechnen.

•	Ist diese Option deaktiviert, überprüft das Betriebssystem die TCP-Prüfsumme.

•	Bei aktivierter Option führt der Adapter die Überprüfung für das Betriebssystem durch.

Diese Funktion verbessert die TCP- und UDP-Übertragungsleistung und reduziert die CPU-Auslastung.

Unterstützte Betriebssysteme	• Windows XP* • Windows 2000 • Windows 98 unterstützt die Entladungsoption nicht.
Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Ein
Bereich	Ein, Aus HINWEIS: Stellen Sie diese Funktion auf "Aus", wenn der Server DOS-gestützte Clients unterstützt.
QoS Packet-Tagging

Ermöglicht dem Adapter, IEEE 802.3ac-gekennzeichnete Frames zu übertragen und zu empfangen, u. a.:

•	802.1p QoS (Quality of Service) Tags, erforderlich für Priority Packets, und

•	802.1Q Tags, erforderlich für VLANs

Intel PROSet II aktiviert 802.1p Tagging automatisch, wenn Sie ein VLAN erstellen.

Unterstützte Adapter	82559-basierte Adapter und höher Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert
Empfangsdescriptors

Definiert die Anzahl von Empfangsdescriptors. Empfangsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, dem Speicher eingegangene Pakete zuzuordnen. Jedes eingegangene Paket erfordert einen Empfangsdescriptor. Jede Beschreibung verbraucht 2 KB Speicher.

Sie haben die Option, die Anzahl der Empfangsdescriptors zu erhöhen, falls Sie eine bedeutende Verminderung der Empfangsverkehrsleistung feststellen. Wenn die Empfangsleistung kein Problem darstellt, verwenden Sie die Standardeinstellung 256.

Unterstützte Adapter	Alle
Standard	160
Bereich	80-2048
TCP-Segmentierungsverschiebung

Ermöglicht es der Adapterhardware, Daten in gültige Ethernetframes zu segmentieren.

•	Ist TCP-Segmentierung deaktiviert, segmentiert das Betriebssystem die Daten, bevor sie zur Übertragung an den Adapter weitergeleitet werden.

•	Ist TCP-Segmentierung aktiviert, segmentiert der Adapter die Daten in Frames.

Da die Adapterhardware die Datensegmentierung viel schneller als das Betriebssystem abschließen kann, verbessert diese Funktion die Übertragungsleistung in beträchtlichem Maß. Darüber hinaus verbraucht der Adapter weniger CPU-Ressourcen.

Unterstützte Betriebssysteme	Windows XP
Unterstützte Adapter	nur 82544- und 82540-basiert. Beachten Sie den Abschnitt Adapterspezifikationen , wenn Sie Hilfe bei der Identifizierung Ihres Adapters benötigen.
Standard	1
Bereich	0 = diese Funktion nicht aufführen; 1 = diese Funktion aufführen.

Übertragungsdescriptors

Definiert die Anzahl von Übertragungsdescriptors. Übertragungsdescriptors sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu verfolgen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Übertragungsdescriptors.

Sie können die Anzahl der Übertragungsdescriptors erhöhen, wenn Sie bei der Übertragungsleistung ein mögliches Problem bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Übertragungsdescriptors verbessert werden kann, sollte beachtet werden, dass Übertragungsdescriptors Systemspeicher belegen. Wenn der Übertragungsverkehr kein Problem darstellt, verwenden Sie die Standardeinstellung 256.

Unterstützte Adapter	Alle
Standard	256
Bereich	80-2048
Remoteaktivierungs-Einstellungen

Remoteaktiviert den Computer, wenn die Netzwerkverbindung eine Verknüpfung herstellt, während der Computer im Standbymodus ist. Sie können die Funktion aktivieren oder deaktivieren bzw. die Standardeinstellung des Betriebssystems verwenden.

Unterstützte Betriebssysteme	Windows 9x, Windows 2000, Windows XP
Bereich	Deaktiviert, Erzwungen, Betriebssystemgesteuert
Standard	Deaktiviert

Remoteaktivierung über Einstellungen

Diese Einstellungen verweisen auf Funktionen, die entweder vom Betriebssystem oder von Intel PROSet aktiviert werden. Diese Funktionen verhalten sich je nach der Version von Windows unterschiedlich oder werden überhaupt nicht unterstützt.

Die folgenden Versionen von Windows unterstützen die Aktivierung über Einstellungen: Windows 2000, Windows XP 64-Bit-Edition, Windows XP Professional und Windows Server 2003. Diese Funktion wird unter Windows Server 2003 für auf 64-Bit Itanium(R) basierende Systeme nicht unterstützt.

Remoteaktivierung über Einstellungen

Sie können die Remoteaktivierungseinstellung des Adapters mit Intel PROSet konfigurieren. Bevor Sie die Remoteaktivierung über Einstellungen markieren, müssen Sie das Betriebssystem befähigen, Remoteaktivierung über Einstellungen zu verwenden. Lesen Sie dazu die entsprechenden Anweisungen.

So aktivieren Sie die Remoteaktivierungseinstellungen

6.	Klicken Sie in Intel PROSet auf das Register Erweitert.

7.	Klicken Sie in der Auflistung der Einstellungen auf Remoteaktivierung über Einstellungen.

8.	Markieren Sie in der Liste Wert die gewünschte Remoteaktivierungseinstellung.

9.	Klicken Sie auf OK oder Übernehmen.

10.	Damit der Adapter auf diese Arten von Remoteaktivierungspaketen reagieren kann, müssen Sie festlegen, dass das Betriebssystem die Aktivierung über Einstellungen verwendet. Navigieren Sie zum Geräte-Manager, und aktivieren Sie die Option "Gerät kann den Computer aus dem Standbymodus aktivieren", um die Aktivierung über Einstellungen zu aktivieren.

Verfügbare Einstellungen

Diese Remoteaktivierungseinstellungen sind in Intel PROSet verfügbar:

Einstellung	Beschreibung
Deaktiviert	Adapter verwendet keine Remoteaktivierungseinstellungen.
Remoteaktivierung über Magic Packet	Der Adapter wird durch ein eingehendes Magic Packet aktiviert. Ein Magic Packet ist ein Paket mit 16 miteinander verbundenen Kopien der Ethernet-Adresse des Empfangsadapters. Wenn diese Funktion konfiguriert wird, überschreibt Intel PROSet den Wert des Betriebssystems mit dem Wert dieser Funktion.
Remoteaktivierung über adressiertes Paket	Ermöglicht dem Adapter, aktiviert zu werden, wenn ein adressiertes Paket eingeht. Ein adressiertes Paket ist ein Unicast-Paket, das an die MAC-Adresse dieses Adapters geschickt wird.  Das Protokoll muss den Treiber für diese Aktivierungsmethode befähigen. Ist diese Funktion deaktiviert, ignoriert der Treiber alle Protokollanforderungen, diese Aktivierungsmethode zu verwenden.
Wake on Magic- und adressierte Pakete	Aktiviert den Adapter entweder durch ein Magic- oder ein an ihn gerichtetes Paket.
Betriebssystem-gesteuert	Adapter verwendet keine Remoteaktivierungseinstellungen.

HINWEIS: Wenn mehrere IP-Adressen für einen Adapter konfiguriert werden, fordert das Betriebssystem möglicherweise die Remoteaktivierung über ARP-Muster von allen konfigurierten Adressen an. Der Adapter wird nur als Antwort auf ARP-Pakete aktiviert, die die erste IP-Adresse in der Liste abfragen.

HINWEIS: Remoteaktivierungseinstellungen haben nicht die Fähigkeit, eine Maschine im heruntergefahrenen Zustand (S5-Zustand) zu aktivieren. Dieser Zustand wird nur durch die Einstellung "PME aktivieren" kontrolliert, die ebenfalls im Register "Erweitert" zur finden ist. Selbst wenn die Remoteaktivierungseinstellungen deaktiviert sind, wird die Fähigkeit zur Aktivierung aus dem S5-Zustand durch die Einstellung "PME aktivieren" reguliert.

Solange der Adaptertreiber aktiviert ist, funktionieren die PME-Einstellungen. Sobald der Treiber deaktiviert ist, geht das Gerät zu seiner Hardwarestandardeinstellung zurück, die dem Computer unter Umständen eine Aktivierung aus dem ausgeschalteten Zustand gestattet.

Schaltfläche "Standard wiederherstellen"

Mit dieser Schaltfläche wird der Standardwert für diese erweiterte Einstellung wiederhergestellt.  Die Standardwerte entnehmen Sie den oben aufgeführten Einstellungen.  (Diese Option ist nicht für jede Einstellung verfügbar.)


Konfiguration speichern oder wiederherstellen
Intel(R) PROSet II Konfiguration aus einer gespeicherten Datei wiederherstellen

Wenn Sie die erweiterten Einstellungen eines Adapters in eine Datei gespeichert haben, können benutzerdefinierte VLAN- und Gruppeneinstellungen anhand der Datei wiederhergestellt werden. Beachten Sie, dass die Wiederherstellung der Intel PROSet II Konfiguration nicht die betriebssystemspezifischen Netzwerkeinstellungen, wie beispielsweise die IP-Adresse oder Protokoll-Bindings, wiederherstellt.

Bevor Sie beginnen

Einstellungen müssen auf demselben Computer wiederhergestellt werden, auf dem sie erstellt wurden. Darüber hinaus muss auf dem Computer dasselbe Netzwerk und dieselbe Hardware wie in der ursprünglich gespeicherten Konfiguration installiert sein. War der Computer beispielsweise mit einem Intel Gigabitswitch verbunden, als die Konfigurationsdatei gespeichert wurde, muss er mit demselben Switch verbunden sein, wenn die Konfiguration wiederhergestellt wird.

Die Funktion "Speichern/Wiederherstellen" ist mit  Windows NT* 4.0, 2000, 98SE, Me und XP kompatibel.

VORSICHT: Bearbeiten Sie die Konfigurationsdatei nicht. Jegliche Änderungen an der Konfigurationsdatei machen sie unbrauchbar.

So stellen Sie Adaptereinstellungen von einer gespeicherten Datei wieder her:

1.	Klicken Sie im Menü "Extras" auf Konfiguration speichern/wiederherstellen.
Das Dialogfeld "Speichern/Wiederherstellen" wird angezeigt.

2.	Klicken Sie auf Wiederherstellen.
Das Dialogfeld "Öffnen" wird angezeigt.

3.	Suchen Sie den Ordner, in dem Sie die Konfigurationsdatei gespeichert haben, und wählen Sie die Datei aus.

4.	Klicken Sie auf Öffnen.
Intel PROSet II zeigt die wiederhergestellten Einstellungen an. Diese Einstellungen werden erst übernommen, wenn Sie auf OK klicken.

5.	Nehmen Sie gegebenenfalls Änderungen an der Adapterkonfiguration vor.

6.	Klicken Sie auf OK, um Intel® PROSet II zu schließen und die wiederhergestellte Konfiguration zuzuweisen.

Siehe auch:

Konfiguration speichern


Warnhinweis beim Hinzufügen eines Adapters zu einer Gruppe
Einen Adapter einer Gruppe hinzufügen

Stellen Sie bei der Erstellung einer Gruppe sicher, dass jeder Adapter nur in einer Gruppe Mitglied ist. Dies gilt auch für mit Intel(R) PROSet und anderen Konfigurationstools erstellte Gruppen. Das Hinzufügen desselben Adapters zu mehreren Gruppen könnte einen negativen Einfluss auf die Gruppenfunktionalität und Leistung haben.

•	Wenn Sie Gruppen mit Intel PROSet erstellt haben, überprüfen Sie die Strukturansicht , um vorhandene Gruppenmitglieder zu finden.

•	Wenn Sie Gruppen mit anderen Konfigurationstools erstellt haben, überprüfen Sie die Gruppen und Gruppenmitglieder in diesen Tools noch einmal, und stellen Sie sicher, dass der Adapter nicht bereits Mitglied einer Gruppe ist.

Siehe auch:

Adapter aus einer Gruppe entfernen

Neue Gruppe erstellen


Durch PROSet II navigieren
Durch Intel(R) PROSet II navigieren

Intel(R) PROSet II hat drei Navigationsbereiche:

•	Menü

•	Verzeichnisstruktur "Netzwerkkomponenten"

•	Register

Über das Menü können Sie:

•	In "Aktion" Gruppen bilden oder IP-Sicherheit aktivieren.

•	In "Tools" die Konfiguration von Adaptern VLANs und Gruppenbildung speichern oder wiederherstellen.

•	Die Online-Hilfe verwenden oder die Intel Supportwebsite aufrufen.

Aus der Strukturansicht "Netzwerkkomponenten" können Sie:

•	Auf einen Adapter klicken, um Details und Konfigurationseinstellungen aufzurufen.

•	Auf einen Adapter rechtsklicken, um Gruppen zu bilden und IPSec zu aktivieren.

•	Auf eine Gruppe rechtsklicken, um Gruppeneinstellungen zu ändern oder VLANs einzurichten.

•	Auf ein Gruppenmitglied rechtsklicken, um Gruppenadaptereinstellungen zu ändern.

Über die Register können Sie Adapterüberwachung und Konfigurationstasks ausführen.

Das Taskleistensymbol

Das Kontrollkästchen "Taskleistensymbol anzeigen" ermöglicht Ihnen, das Intel PROSet II Symbol in der Taskleiste (neben der Uhr) zu aktivieren oder zu deaktivieren. Wenn Sie das Taskleistensymbol ausblenden möchten, deaktivieren Sie das Kontrollkästchen.

Mehr zum Intel(R) PROSet II Taskleistensymbol


Allgemeine Informationen

Um allgemeine Informationen über einen Adapter anzuzeigen, klicken Sie in der Verzeichnisstruktur Netzwerkkomponentenauf den Adapter.

Im Register "Allgemein" können Sie

•	Grundlegende Adapterinformationen überprüfen

•	Die Kabelfunktionalität testen
HINWEIS: Der Kabeltest ist nur für markierte Adapter verfügbar.

•	Adapter-Steckplatzposition identifizieren

•	Zusätzliche Details anzeigen


Grundlegende Adapterinformationen überprüfen

Das Register "Allgemein" enthält folgende Informationen zum in der Strukturansicht Netzwerkkomponenten ausgewählten Adapter.

Ethernet-Adresse	Die 12-stellige hexadezimale Knotenadresse dieses Adapters, auch MAC-Adresse genannt.
Teilenummer	Die Intel Teilenummer dieses Adapters
IP-Adresse	Die TCP/IP-Adresse dieses Adapters, falls Sie das IPv4-Protokoll verwenden.  Intel PROSet II zeigt zur Zeit keine IPv6-Adressen an.
Netzwerktreiberstatus	Zeigt an, ob der Intel Netzwerktreiber für den ausgewählten Adapter geladen ist.
Netzwerkstatus	Zeigt den Verbindungs-, Geschwindigkeits- und Duplexstatus für den ausgewählten Adapter an. Die Felder in der Gruppe "Netzwerkstatus" sind je nach Adapter unterschiedlich.  • Verbindungs-LED: Die Einstellung "Ein" gibt an, dass das Adapterkabel mit einem gültigen Hub oder Switch-Anschluss verbunden ist. "Aus" bedeutet, dass keine Verbindung hergestellt ist. • Geschwindigkeit: Die hier aufgeführte Geschwindigkeit (1000, 100 oder 10) ist die Verbindungsgeschwindigkeit des Adapters. • Aktivitäts-LED: Blinkt, wenn der Adapter mit einem Netzwerk mit Aktivität verbunden ist. "Aus" bedeutet keine Aktivität oder nicht verbundenes Kabel. • Duplex: "Vollduplex" bedeutet, dass der Adapter Verkehr gleichzeitig überträgt und empfängt. "Halbduplex" bedeutet, dass der Adapter entweder überträgt oder empfängt - jedoch nicht beides gleichzeitig.


Geschwindigkeit und Duplex einstellen

Standardmäßig handeln Intel Adapter Geschwindigkeits- und Duplexeinstellungen automatisch aus. Wenn der Adapter über automatische Absprache keine Verbindung herstellen kann, sollten Sie die Geschwindigkeits- und Duplexeinstellungen für den Adapter und Verbindungspartner manuell konfigurieren. Wenn beispielsweise ein Switch "Automatische Absprache" nicht unterstützt oder auf bestimmte Geschwindigkeits- und Duplexeinstellungen konfiguriert ist, müssen die Adaptergeschwindigkeit und -duplex manuell konfiguriert werden, damit sie mit den Switch-Einstellungen übereinstimmen.

VORSICHT: Wenn die Adaptergeschwindigkeits- und Duplexeinstellungen nicht genau mit den Einstellungen des Verbindungspartners übereinstimmen, kann die Verbindung mit dem Server unterbrochen werden.

Wenn "Automatische Absprache" deaktiviert ist, sind die möglichen Einstellungen für Verbindungsgeschwindigkeit und Duplex wie folgt:

•	10 Mbit/s oder 100 Mbit/s Vollduplex (erfordert einen Vollduplex-Verbindungspartner, der auf Vollduplex eingestellt ist. Der Adapter kann Pakete gleichzeitig übertragen und empfangen.

•	10 Mbit/s oder 100 Mbit/s Halbduplex (erfordert einen Verbindungspartner, der auf Halbduplex eingestellt ist. Der Adapter überträgt oder empfängt, jedoch nicht beides gleichzeitig.

Klicken Sie auf die betreffende Adapterfamilie, um Näheres über die Geschwindigkeits- und Duplexkonfiguration zu erfahren.

•	Intel(R) PRO/1000 (Kupfer)
HINWEIS: Fiber-basierte Intel(R) PRO/1000 Adapter werden bei 1000 Mbit/s und Vollduplex betrieben.

•	Intel(R) PRO/10 or PRO/100


PRO 10/100 Verbindungskonfiguration
Geschwindigkeit und Duplex konfigurieren: Intel(R) PRO/10 und PRO/100 Adapter

Klicken Sie in der Strukturansicht "Netzwerkkomponenten" auf den Intel(R) PRO/10 oder Intel(R) PRO/100 Adapter, den Sie konfigurieren möchten.

1.	Klicken Sie auf das Register Erweitert.

2.	Klicken Sie in der Liste "Einstellungen" auf Verbindungsgeschwindigkeit und Duplex.

3.	Klicken Sie im Feld "Verbindungsgeschwindigkeit und Duplex" auf den Ihrem Adapter und dessen Verbindungspartner entsprechenden Geschwindigkeits- und Duplexmodus.  Wenden Sie sich an die Verbindungspartnerdokumentation, um herauszufinden, welcher Geschwindigkeits- und Duplexmodus für den Verbindungspartner verwendet werden sollte.

4.	Klicken Sie auf OK.

5.	Starten Sie Ihren Computer neu, wenn Sie dazu aufgefordert werden.

Der Adapter ist jetzt mit den Geschwindigkeits- und Duplexeinstellungen konfiguriert.

VORSICHT: Wenn die Adaptergeschwindigkeits- und Duplexkonfiguration den Einstellungen auf dem verbundenen Gerät nicht genau entspricht, kann die Verbindung mit dem Server möglicherweise unterbrochen oder die Adapterleistung beeinträchtigt werden.


Erweiterte Adapterfunktionen konfigurieren

Wählen Sie eine Adapterart, um deren erweiterte Funktionen anzuzeigen:

•	Intel(R) PRO/1000 Desktop

•	Intel(R) PRO/1000 Server

•	Intel(R)PRO/100

•	Intel(R) PRO/100 VE and VM

•	Intel(R)PRO/10


SFT (Switched Fehler-Toleranz).
SFT (Switched Fehlertoleranz).

Mit SFT (Switch Fault Tolerance) können Sie zwei gruppierte Adapter mit zwei Switches verbinden. Jeder Adapter wird mit einem separaten Switch verbunden.

SFT (Switch Fault Tolerance) kann Fehler erkennen, wenn sie

•	auf einem der gruppierten Adapter,

•	auf einem der Kabel, die den gruppierten Adapter mit dem Switch verbinden,

•	auf mit den Adaptern verbundenen Switch-Anschlüssen,

•	oder auf mit den Adaptern verbundenen Switches auftreten.

In SFT-Gruppen ist ein Adapter der Primäradapter und ein Adapter der Sekundäradapter. Im Normalbetrieb befindet sich der Sekundäradapter im Standbymodus. Er übertragt und empfängt keinen Verkehr. Wenn der Primäradapter die Verbindung verliert, übernimmt der Sekundäradapter automatisch alle Aufgaben.

Adaptergeschwindigkeit	Kann gemischt sein, z. B.: ein Adapter läuft bei einer Geschwindigkeit von 100 Mbit/s und einer bei 1000 Mbit/s.
Protokolle	Alle
Netzwerkkonfiguration	• Jeder Adapter wird mit einem separaten Switch verbunden. • Spanning Tree muss aktiviert sein.
Siehe auch:

Info zu Gruppenbildung

Gruppenarten


Konfiguration in eine externe Datei speichern
Konfiguration in eine Datei speichern

Sie können Ihre Intel(R) PROSet Gruppenbildungs- und VLAN-Konfiguration in eine Datei speichern und sie später in Intel PROSet wiederherstellenerstellen. Beachten Sie, dass beim Speichern der Intel PROSet II Konfiguration nicht die betriebssystemspezifischen Netzwerkeinstellungen, wie beispielsweise die IP-Adresse oder Protokoll-Bindings, gespeichert werden.

Die Funktion "Speichern/Wiederherstellen" ist mit Windows NT*4.0, 2000, 98SE, Me und  XP kompatibel.

HINWEIS: Wenn einmal eine Konfiguration unter einem bestimmten Dateinamen gespeichert ist, kann dieser nicht wieder verwendet werden. Sie müssen jedes Mal, wenn Sie die Intel PROSet II Konfiguration speichern, einen anderen Dateinamen verwenden.

So speichern Sie die Intel(R) PROSet II Konfiguration

1.	Klicken Sie im Menü "Extras" auf Konfiguration speichern/wiederherstellen.
Das Dialogfeld "Speichern/Wiederherstellen" wird angezeigt.

2.	Klicken Sie auf Speichern.
Das Dialogfeld "Speichern unter" wird angezeigt.

3.	Suchen Sie nach dem Ordner, in den Sie Ihre Konfigurationsdatei speichern möchten, und geben Sie einen Dateinamen ein.

4.	Klicken Sie auf Speichern.

5.	Klicken Sie auf OK.

Die Intel PROSet II Konfiguration ist gespeichert.

Bearbeiten oder ändern Sie die Datei nicht, nachdem sie einmal gespeichert wurde. Jegliche Änderungen an der Konfigurationsdatei machen sie unbrauchbar.

Siehe auch:

Restoring configuration


Switch-Konfiguration testen

Mit Hilfe des Switch-Konfigurationstests können Sie sicherstellen, dass die Verbindungspartner den konfigurierten Adaptergruppenbildungsmodus unterstützen. Wenn der Adapter beispielsweise Mitglied einer Fast EtherChannel* -Gruppe ist, kann Intel(R) PROSet II überprüfen, ob mit dem Adapter verbundene Verbindungspartner Link Aggregation unterstützen.

Näheres zu den Anforderungen der verschiedenen Gruppenmodi erfahren Sie unter Info zur Gruppenbildung.

Vorsicht: Bei der Ausführung dieses Tests wird die Verbindung mit dem Server vorübergehend unterbrochen.

HINWEIS: Dieser Test ermittelt unter folgenden Voraussetzungen keine Fehler:

Adapterkonfiguration	Switch-Konfiguration
Dynamic 802.3ad	Beliebig
Im Link Aggregation-Modus ohne VLANs gruppiert	Der Switch • gehört entweder keinem VLAN an oder • ist mit gekennzeichneten VLANs konfiguriert.
Im Link Aggregation-Modus mit VLANs gruppiert	Der Switch • gehört nicht zum auf dem Adapter konfigurierten VLAN und • Link Aggregation wurde für ihn nicht definiert.
So führen Sie den Switch-Konfigurationstest aus:

1.	Klicken Sie in der Strukturansicht Netzwerkkomponenten auf die Gruppe, die getestet werden soll.
Um den Test auszuführen, müssen mindestens zwei Adapter in der Gruppe vorhanden sein.

2.	Klicken Sie im Register "Gruppenkonfiguration" auf Switch-Konfiguration testen.
Das Dialogfeld "Switch-Konfiguration testen" wird angezeigt.

3.	Um mit dem Test fortzufahren, klicken Sie auf Ja.
Wenn Konfigurationsfehler für die Gruppe oder Verbindungspartner gefunden werden, wird das Register "Fehlerbehebung" angezeigt.

HINWEIS:  Aufgrund der für den STP-Test (Spanning Tree Protocol) erforderlichen Dauer, gibt Intel® PROSet II möglicherweise nicht genau an, ob STP (Spanning Tree Protocol) auf dem Netzwerk aktiviert ist. Stellen Sie sicher, dass Switches mit STP konfiguriert sind:

•	Aktiviert für SFT-Gruppen

•	Deaktiviert (Portfast) für alle anderen Gruppenmodi


Haftungsausschluss gegenüber Dritten
*Andere Produkt- und Firmennamen können Marken anderer Unternehmen sein und werden nur zur Erläuterung und zum Nutzen der jeweiligen Eigentümer verwendet. Es besteht keine Absicht, vorhandene Rechte zu verletzen.


Energieverwaltung konfigurieren
Energieverbrauch konfigurieren

Über das Register "Energieeinsparung" können Sie den Energieverbrauch des Adapters konfigurieren.  Wenn der Adapter Energie einspart, wird er bei 10 Mbit/s betrieben.

Um diese Funktion zu unterstützten, muss der Adapter:

•	konfiguriert sein, um die Geschwindigkeit automatisch auszuhandeln und

•	mit einem Verbindungspartner verbunden sein, der die Geschwindigkeit automatisch aushandeln kann.

Ist die Adaptergeschwindigkeit auf 100 Mbit/s festgelegt oder der Verbindungspartner kann nicht bei 10 Mbit/s betrieben werden, kann die Energieeinsparung für diesen Adapter nicht aktiviert werden.

Auf einigen Computern werden die Energiesparoptionen nach einem Neustart des Computers nicht gespeichert. Wenn sie nicht gespeichert sind, zeigt der obere Teil des Energiesparregisters den Text Vorübergehender Energiesparmodus an. Die Einstellungen werden auf allen Systemen, die Windows XP oder Windows Server 2003 ausführen, nicht gespeichert.

Wenn die Einstellungen nach einem Computerneustart nicht geändert werden, zeigt der obere Teil den Text Energiesparmodus an.

HINWEIS: Wenn die Energieeinsparung aktiviert ist, verlangsamen Intel(R) PRO/100 M Adapter die Adapterverarbeitungszyklen. Diese Funktion ermöglicht es Intel PRO/100 M Adaptern den Energieverbrauch weiter einzuschränken. Andere Intel PRO/100 Adapter verlangsamen die Verarbeitungszyklen nicht, um Energie einzusparen.

Im Register "Energieeinsparung" können Sie Folgendes anpassen:

•	Gesamter Energieverbrauch des Adapters. Wenn Sie den gesamten Energieverbrauch konfigurieren, wird diese Einstellung für den Adapter so lange verwendet, wie der Adapter aktiviert ist. Wird der Adapter deaktiviert, wird diese Energieeinstellung nicht gespeichert.

•	Energieverbrauch im Standbymodus. Wenn der Computer in den Standbymodus wechselt, spart der Adapter automatisch Energie und wird bei 10 Mbit/s betrieben. Intel PROSet II behält diese Einstellung bei, auch wenn der Computer ausgeschaltet wird.

•	Energieverbrauch im Batteriebetrieb für Windows* XP. Wenn der Computer batteriebetrieben wird, spart der Adapter automatisch Energie und wird bei 10 Mbit/s betrieben. Intel PROSet II behält diese Einstellung bei, auch wenn der Computer ausgeschaltet wird.

Unterstützte Adapter	Intel(R) PRO/100 Adapter
Unterstützte Betriebssysteme	• Windows* 98, 2000, XP, Me und NT* zur Bestimmung des Gesamtenergieverbrauchs oder des Energieverbrauchs im Standbymodus • Windows XP zur Bestimmung des Energieverbrauchs während des Batteriebetriebs
Standard	Standardmäßig verbrauchen Adapter die normale, zum Erhalt von Geschwindigkeit und der Duplexeinstellungen erforderliche Energiemenge.  Wenn der Adapter Energie einspart, wird er bei 10 Mbit/s betrieben und das gesamte vom Adapter geregelte Verkehrsaufkommen wird reduziert.
So konfigurieren Sie den Energieverbrauch des Adapters:

1.	Klicken Sie in der Strukturansicht "Netzwerkkomponenten"auf den Adapter, dessen Energieverbrauch Sie konfigurieren möchten.
Wenn der Adapter Energieverwaltung unterstützt, wird das Register Energiesparmodus angezeigt.

2.	Klicken Sie auf Wenig Energie verbrauchen und bei 10 Mbit/s laufen und klicken Sie auf Übernehmen, um den Gesamtenergieverbrauch zu reduzieren. Der Adapter behält diese Einstellung bei, solange sie aktiviert bleibt.
Um den Adapter so zu konfigurieren, dass er die übliche Energiemenge verbraucht und mit seiner Standard-Geschwindigkeitseinstellung operiert, klicken Sie auf die Option Normalen Energieverbrauchsmodus verwenden und Originalgeschwindigkeit beibehalten und klicken Sie dann auf Zuweisen.

3.	Klicken Sie auf Wenig Energie im Standbymodus verbrauchen, um den Energieverbrauch im Standbymodus zu reduzieren.

4.	Wird der Adapter auf einem Windows XP-Computer betrieben, können Sie Energiespareinstellungen auch für den Batteriebetrieb des Computers festlegen. Klicken Sie auf Energiesparmodus bei Batteriebetrieb, um den Energieverbrauch im Batteriebetrieb zu reduzieren.

5.	Klicken Sie auf OK, um die Energiekonfiguration zuzuweisen.


Empfangslastenausgleich

Mit ALB-Gruppen (ALB - Adaptive Load Balancing) können Sie den Empfangslastenausgleich aktivieren oder deaktivieren. Die Option "Empfangslastenausgleich" ist immer verfügbar:

•	im Register "Erweitert" einer ALB-Gruppe

•	bei der Erstellung einer ALB-Gruppe im Gruppenbildungsassistenten

Wenn Sie "Empfangslastenausgleich" deaktivieren, wird der Verkehr lediglich vom Primäradapter empfangen. Alle Adapter verteilen die Auslastung von ausgehendem Verkehr (Tx).

Wenn Sie den Empfangslastenausgleich aktivieren, richtet sich die Verkehrsverteilung nach den Geschwindigkeitsdifferenzen der Gruppen.

•	In einer Gruppe mit gleicher Geschwindigkeit übertragen und empfangen alle Adapter IP-Verkehr. Der Primäradapter verarbeitet den nicht umgeleiteten Verkehr (Ebene 2).

•	In einer Gruppe mit unterschiedlichen Geschwindigkeiten, lasten die Gruppenmitglieder mit den schnellsten Verbindungen eingehenden IP-Verkehr (Rx) aus. Alle Adapter verteilen die Auslastung von ausgehendem IP-Verkehr (Tx). Der Primäradapter verarbeitet den nicht umgeleiteten Verkehr (Ebene 2).
HINWEIS: Wenn Empfangslastenausgleich aktiviert ist, markiert Intel(R) PROSet II automatisch einen bevorzugten Primäradapter. Sie können die Standardauswahl überschreiben, indem Sie einen Adapter als Primär- oder Sekundäradapter bestimmen.

Siehe auch:

Info zur Gruppenbildung

Neue Gruppe erstellen


Erweiterte Einstellungen für PRO/100 VE und VM Adapter
Erweiterte Einstellungen für Intel(R) PRO/100 VE und VM Adapter

Mit Hilfe der im Register aufgeführten Einstellungen können Sie definieren, wie der Adapter Puffer, Energieverwaltung und sonstige Funktionen behandelt. Einige der folgenden Funktionen sind möglicherweise nicht verfügbar, je nachdem, welches Betriebssystem Sie verwenden und welche Adapter Sie installiert haben.

Erweiterte Einstellungen

Adaptives IFS (Inter-Frame Spacing)

Schafft Ausgleich für übermäßige Ethernet-Paketkollisionen in Ihrem Netzwerk.  Standardmäßig ist diese Einstellung auf "0" gesetzt, wodurch die Funktion deaktiviert wird.

Die empfohlene Einstellung (1) funktioniert für die meisten Computer und Netzwerke am besten, da mit ihr die Netzwerkverkehrsbedingungen dynamisch angepasst werden. Dieser dynamische Modus ist nur aktiviert, wenn der Wert auf "1" eingestellt ist. In einigen Fällen kann jedoch eine bessere Leistung erzielt werden, wenn der Spacing-Wert manuell eingestellt wird. Durch Einstellung eines Wertes wird eine statische Lücke zwischen Paketen erzwungen.

Wird der Wert erhöht, erhöht sich die Verzögerung zwischen den übertragenen Frames.

Unterstützte Adapter	Alle
Standard	0: deaktiviert
Bereich	0-255

Adaptive Verbindungsreaktion

Beschleunigt den Systemstart, indem Startroutinen, die eine Verbindung mit dem Server erfordern, umgangen werden, wenn das Kabel nicht mit dem Adapter verbunden ist. So wird die zum Starten des Computers erforderliche Zeit wesentlich verkürzt.

Wenn ALR (Adaptive Link Response = Adaptive Verbindungsreaktion) aktiviert ist und kein Netzwerkkabel mit dem RJ-45-Anschluss verbunden ist, wird die Netzwerkverbindung deaktiviert. Ein gelbes Warnsymbol wird neben der Netzwerkverbindung im Gerätemanager angezeigt.

Um die Netzwerkverbindung erneut zu aktivieren, verbinden Sie das Netzwerkkabel mit dem RJ-45-Anschluss und führen Sie einen Neustart des Computers durch.

Unterstützte Adapter	Nur mobile Produkte. Nicht für jedes Adaptermodell verfügbar.
Standard	Aus
Empfohlen	Ein
Bereich	Ein, Aus
HINWEIS: Adaptiver Link Response (ALR) wird nicht funktionieren, wenn ein drahtloser Adapter aktiv im System ist.

Coalesce Buffers

Optimiert die Übertragungsleistung, indem die Anzahl der Coalesce Buffers benutzerdefiniert wird, so dass der Adapter Datensegmente vor der Paketübertragung zusammenfügen kann.

Die Einstellung "Coalesce Buffers" muss so konfiguriert werden, dass sie zusammen mit der Einstellung "Übertragungsdescriptors" funktioniert. Die Einstellung "Coalesce Buffers" sollte 30 bis 50 % der Übertragungsdescriptors umfassen. Wird die Einstellung "Coalesce Buffers" nicht der Einstellung "Übertragungsdescriptors" angepasst, wird die Übertragungsleistung möglicherweise nicht verbessert.

Die Einstellung Coalesce Buffers erhöht die Übertragungsleistung auf Rechnern mit Windows NT 4.0 bedeutend. Sie verbessert darüber hinaus die Übertragungsleistung auf Rechnern mit Windows 98 und 2000.

Standard	8
Empfohlener Wert	8
Bereich	1-32
Lokal verwaltete Adresse

Überschreibt die MAC-Adresse des Adapters. Geben Sie unter Wert eine 12-stellige Hexadezimalzahl ein, um eine neue Netzwerkadresse einzugeben.

Standard	Keine
Bereich	0000 0000 0001 - FFFF FFFF FFFD Ausnahmen: • Verwenden Sie keine Multicastadresse (niederwertigste Ziffer des hohen Byte = 1).  • Verwenden Sie keine Nullen oder nur Fs.
Anwender von Windows 98SE:

Wenn Sie die Standardadresse verwenden möchten, nachdem Sie eine manuell zugewiesene Adresse verwendet haben, führen Sie eine dieser Optionen durch:

•	Markieren Sie in den Netzwerkeigenschaften im Dialogfeld Erweitert die Option "lokal verwaltete Adresse" und ändern Sie den Wert auf 0. Klicken Sie auf OK,  um die Einstellung zuzuweisen.

•	Klicken Sie in Intel PROSet II auf das Register Erweitert  und anschließend auf Standard wiederherstellen oder löschen Sie alle Eingaben im Wertefeld. Klicken Sie auf OK, um die Einstellung zu speichern.

PCI Bus-Effizienz

Ermöglicht dem Adapter, entweder die beste Methode zur Paketübertragung zu benutzen oder immer Paketzusammenführung zu erzwingen.

•	Wenn PCI Bus-Effizienz deaktiviert ist, verwendet der Adapter die Übertragungsmethode mit der besten Leistung. Bietet die Zusammenführung von Paketen die beste Übertragungsleistung, führt der Adapter Pakete automatisch zusammen.

•	Wenn PCI Bus-Effizienz aktiviert ist, erzwingt der Adapter Paketzusammenführung.

Deaktivieren Sie PCI Bus-Effizienz, wenn mit der Paketübertragung keine Probleme bestehen. Aktivieren Sie diese Einstellung, wenn es zu einer hohen Anzahl von Unterläufen kommt oder der PCI-Bus Leistungsschwächen aufweist.

Standard	Deaktiviert
Bereich	Aktiviert, Deaktiviert

Empfangspuffer

Bestimmt die Anzahl der Puffer, die das Laufwerk beim Kopieren von Daten in den Protokollarbeitsspeicher verwendet.

Bei hoher Netzwerkauslastung kann das Erhöhen der Anzahl der Empfangspuffer zu verbesserter Leistung führen. Der Nachteil ist jedoch, dass der Treiber dabei mehr Arbeitsspeicher beansprucht. In anderen Fällen kann die Änderung dieses Werts zu einer Verminderung der Leistung Ihres Systems führen.  Bedenken Sie die Risiken bei Verwendung dieser Einstellung.

Standard	48
Empfohlener Wert	• Einzeladapter in Windows 98, Windows Me, Windows 2000 und Windows XP: 48 • Einzeladapter in Windows NT 4.0: 32 • Gruppenadapter: 250
Bereich	8-1024
IFS (Inter-Frame Spacing) erneut übertragen

Verlängert die Verzögerung zwischen Frame-Neuübertragungen. Trotz eines eingebauten Ethernet-Algorithmus, den Adapter zur Neuübertragung von Frames nach Konflikten verwenden, kann eine Verlängerung der Verzögerung die Netzwerkleistung verbessern, wenn es auf dem Netzwerk zu einer ungewöhnlich hohen Anzahl von Konflikten kommt.

Unterstützte Adapter	Alle
Standard	6
Bereich	6-15

Transmit Control Blocks

Definiert die Anzahl von Transmit Control Blocks. Transmit Control Blocks (oder Übertragungs-Steuerungsblöcke) sind Datensegmente, die es dem Adapter ermöglichen, zu übertragende Pakete im Systemspeicher zu überwachen. Je nach Größe des Pakets erfordert jedes Übertragungspaket einen oder mehrere Transmit Control Blocks.

Sie können die Anzahl der Transmit Control Blocks erhöhen, wenn Sie ein mögliches Problem bezüglich der Übertragungsleistung bemerken. Obwohl die Übertragungsleistung durch eine Erhöhung der Anzahl der Transmit Control Blocks verbessert werden kann, sollte beachtet werden, dass Transmit Control Blocks Arbeitsspeicher belegen. Wenn die Übertragungsleistung kein Problem darstellt, verwenden Sie den empfohlenen Wert von 32.

Standard	16
Empfohlener Wert	32
Bereich	8-64
Remoteaktivierung bei Verbindungsänderung

Remoteaktiviert den Computer, wenn die Netzwerkverbindung eine Verknüpfung herstellt, während der Computer im Standbymodus ist. Sie können die Funktion aktivieren oder deaktivieren bzw. die Standardeinstellung des Betriebssystems verwenden.

Unterstützte Betriebssysteme	Windows 9x, Windows 2000, Windows XP
Bereich	Deaktiviert, Erzwungen, Betriebssystemabhängig
Standard	Deaktiviert
Remoteaktivierung über Einstellungen

Diese Einstellungen verweisen auf Funktionen, die entweder vom Betriebssystem oder von Intel(R) PROSet II aktiviert werden. Diese Funktionen verhalten sich je nach der Version von Windows unterschiedlich oder werden überhaupt nicht unterstützt.

•	These Windows versions do support Wake On Settings: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	Die folgenden Versionen von Windows unterstützen die Aktivierung über Einstellungen nicht:  Die folgenden Versionen von Windows unterstützen die Aktivierung über Einstellungen nicht:

HINWEIS: Nur die Intel(R) PRO/100+ Management und Server Adapter und Intel(R) PRO/100 Adapter unterstützen Aktivierung über Einstellungen.

Aktivierung über Einstellungen auf dem Betriebssystem aktivieren

Folgende Arten von Remoteaktivierungspaketen erfordern, dass die Aktivierung über Einstellungen auf dem Betriebssystem aktiviert ist:

•	Remoteaktivierung über ARP

•	Remoteaktivierung über adressiertes Paket

•	Remoteaktivierung über NBT

Damit der Adapter diese Arten von Remoteaktivierungspaketen beantworten kann, muss die Aktivierung über Einstellungen auf dem Betriebssystem aktiviert sein. Navigieren Sie zum Geräte-Manager, und aktivieren Sie die Option Gerät kann den Computer aus dem Standbymodus aktivieren, um die Aktivierung über Einstellungen zu aktivieren. So finden Sie diese Option:

1.	Klicken Sie auf Start > Systemsteuerung.
Das Systemsteuerungsfenster wird geöffnet.

2.	Doppelklicken Sie auf System.
Das Dialogfeld "System" wird angezeigt.

3.	Klicken Sie auf das Register Hardware und anschließend auf die Schaltfläche Geräte-Manager.
Das Fenster "Geräte-Manager" wird angezeigt.

4.	Doppelklicken Sie auf den Adapter, der für die Aktivierung über Einstellungen aktiviert werden soll.
Das Dialogfeld "Eigenschaften" wird angezeigt.

5.	Klicken Sie auf das Register Energieverwaltung.

6.	Klicken Sie auf Gerät kann den Computer aus dem Standbymodus aktivieren, um die Aktivierung über Einstellungen für diesen Adapter zu aktivieren.

Verfügbare Einstellungen

Diese Remoteaktivierungseinstellungen sind in Intel PROSet II verfügbar:

Einstellung	Beschreibung
Deaktiviert	Adapter verwendet keine Remoteaktivierungseinstellungen.
Remoteaktivierung über Magic Paket	Der Adapter wird durch ein eingehendes Magic Packet aktiviert. Ein Magic Packet ist ein Paket mit 16 miteinander verbundenen Kopien der Ethernet-Adresse des Empfangsadapters. Wenn diese Funktion konfiguriert wird, überschreibt Intel PROSet II den Wert des Betriebssystems mit dem Wert dieser Funktion.
Remoteaktivierung über adressiertes Paket	Ermöglicht dem Adapter, aktiviert zu werden, wenn ein adressiertes Paket eingeht. Ein adressiertes Paket ist ein Unicast-Paket, das an die MAC-Adresse dieses Adapters geschickt wird.  Das Protokoll muss diese Aktivierungsmethode im Treiber aktivieren. Durch Deaktivieren dieser Funktion wird dem Treiber signalisiert, dass er sämtliche Protokollanfragen ignorieren soll, um diese Aktivierungsmethode zu aktivieren.
Wake on Magic- und adressierte Pakete	Aktiviert den Adapter entweder durch ein Magic- oder ein an ihn gerichtetes Paket.
Betriebssystem-gesteuert	Gibt dem Betriebssystem komplette Kontrolle über die Aktivierungseinstellungen.

HINWEIS: Wenn mehrere IP-Adressen für einen Adapter konfiguriert werden, fordert das Betriebssystem möglicherweise die Remoteaktivierung über ARP-Muster von allen konfigurierten Adressen an. Der Adapter wird nur als Antwort auf ARP-Pakete aktiviert, die die erste IP-Adresse in der Liste abfragen.

HINWEIS: Remoteaktivierungseinstellungen haben nicht die Fähigkeit, eine Maschine im heruntergefahrenen Zustand (S5-Zustand) zu aktivieren. Dieser Zustand wird nur durch die Einstellung "PME aktivieren" kontrolliert, die ebenfalls im Register "Erweitert" zu finden ist. Selbst wenn die Remoteaktivierungseinstellungen deaktiviert sind, wird die Fähigkeit zur Aktivierung aus dem S5-Zustand durch die Einstellung "PME aktivieren" reguliert.

Solange der Adaptertreiber aktiviert ist, funktionieren die PME-Einstellungen. Sobald der Treiber deaktiviert ist, geht das Gerät zu seiner Hardwarestandardeinstellung zurück, die dem Computer unter Umständen eine Aktivierung aus dem ausgeschalteten Zustand gestattet.


Gruppenarten

Mit Intel(R) PROSet II können Sie folgende Gruppen konfigurieren:

•	AFT (Adapter Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	Adaptiver Lastenausgleich (ALB - Adaptive Load Balancing). Einschließlich Empfangslastenausgleich (RLB - Receive Load Balancing)

•	FEC*/ LA / 802.3ad: Statisch

•	GEC* / LA / 802.3ad: Statisch

•	IEEE 802.3ad: Dynamic

Adapter Fault Tolerance

Funktionen	• Failover Bietet automatische Redundanz für Ihren Adapter. Wenn der Primäradapter ausfällt, übernimmt der Sekundäradapter alle Aufgaben.
Netzwerkkonfiguration	• Alle Adapter müssen mit demselben Switch verbunden sein. • Spanning Tree muss deaktiviert sein. • Alle Switch-Arten werden unterstützt.

Switch Fault Tolerance

Funktionen	• Failover Erstellt ein Failover-Verhältnis zwischen zwei Adaptern, wenn jeder Adapter mit einem separaten Switch verbunden ist.
Netzwerkkonfiguration	• Jeder Adapter wird mit einem separaten Switch verbunden. • Spanning Tree muss aktiviert sein.

Adaptive Load Balancing  (ALB)

Funktionen	• Failover • Übertragungslastenausgleich • Empfangslastenausgleich (RLB) von IP-Verkehr (Optional)
Netzwerkkonfiguration	• Alle Adapter müssen mit demselben Switch verbunden sein. • Alle Switch-Arten werden unterstützt.

FEC/LA/802.3ad: Static

Funktionen	• Failover • Übertragungslastenausgleich • Empfangslastenausgleich
Netzwerkkonfiguration	• Alle Adapter müssen bei 1000 Mbit/s betrieben werden. • Alle Adapter müssen mit demselben Switch verbunden sein. • Es muss ein Switch verwendet werden, der Link Aggregation verarbeiten kann: • Cisco FEC-kompatible Switches unter Verwendung des PAgP-Protokolls • Intel Express(R) Link Aggregation-kompatible Switches • Andere mit statischem 802.3ad-kompatible Switches

GEC/LA/802.3ad: Static

Funktionen	• Failover • Übertragungslastenausgleich • Empfangslastenausgleich
Netzwerkkonfiguration	• Alle Adapter müssen bei 1000 Mbit/s betrieben werden. • Alle Adapter müssen mit demselben Switch verbunden sein. • Es muss ein Switch verwendet werden, der Link Aggregation verarbeiten kann: • Cisco GEC-kompatible Switches unter Verwendung des PAgP-Protokolls • Intel Express Link Aggregation-kompatible Switches • Andere mit statischem 802.3ad-kompatible Switches

IEEE 802.3ad: Dynamic

Funktionen	• Failover • Übertragungslastenausgleich • Empfangslastenausgleich
Netzwerkkonfiguration	• Gruppenmitglieder können bei unterschiedlichen Geschwindigkeiten betrieben werden. • Alle Adapter müssen mit demselben Switch verbunden sein. • Der mit den Adaptern verbundene Switch muss den Standard IEEE 802.3ad uneingeschränkt unterstützen.
Siehe auch:

Info zur Gruppenbildung


Diagnoseprotokoll
Diagnoseprotokoll einrichten

Intel PROSet speichert Informationen der Diagnosetests  und des Sender/Responder-Tests in einem Diagnoseprotokoll.

So konfigurieren Sie das Protokoll:

1.	Starten Sie den Registrierungseditor. Klicken Sie auf Start > Ausführen. Geben Sie in das Feld "Öffnen" regedit ein.
Der Registrierungseditor wird geöffnet.

2.	Navigieren Sie zum Registrierungsschlüssel HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Ändern Sie die Registrierungsparameter.

Task	Name	Standardwert	Mögliche Werte
Diagnoseprotokoll aktivieren oder deaktivieren	Aktivieren	1: Aktivieren	1: Aktivieren 0: Deaktivieren
Protokolldateipfad	FilePath	System32	Beliebiger gültiger Pfad auf dem System
Definieren, ob Intel PROSet II im Protokoll vorhandene Informationen beibehält oder löscht	FileAppend	1: Aktivieren	1: Im Anschluss an Informationen im vorhandenen Protokoll hinzufügen 0: Vorhandene Informationen jedes Mal löschen, wenn der Benutzer eine Diagnose oder einen Sender/Responder-Test durchführt
Stellt die Maximalgröße des Protokolls in Byte ein	MaxFileSize	36 KB	Informationsmenge in Byte, die das Protokoll enthalten kann
4.	Schließen Sie den Registrierungseditor, wenn Sie die Änderungen an der Protokollkonfiguration abgeschlossen haben.


Diagnose: Eine Übersicht
Diagnoseübersicht

Intel(R) PROSet II bietet Ihnen drei Arten von Diagnosetests.

•	Diagnosetests  bieten Ihnen eine grundlegende Analyse des Zustands Ihres Adapters.  Bei Ausführung der grundlegenden Diagnosetests überprüft Intel PROSet II den Adapter nach I/O-Konflikten und Arbeitsspeicherfehlern und testet die EEPROM-Operabilität, Übertragungs- und Empfangsfunktionalität und die Verbindungen.

•	Der Kabeltest  bietet Informationen zur Kabellänge, Polarität und zu sonstigen Kabeleigenschaften.

•	Der Sender/Responder-Test ermöglicht Ihnen, die Adapterfunktionalität auf einem Netzwerk zu analysieren. Hierbei handelt es sich um einen erweiterten Test, bei dem zwei Computer eingeschaltet sein müssen.

Die Testergebnisse erscheinen in Intel PROSet II. Darüber hinaus speichert Intel PROSet II die Ergebnisse des Diagnosetests und Sender/Responder-Tests in einer Diagnoseprotokolldatei. Nähere Informationen hierzu entnehmen Sie bitte dem Abschnitt Diagnoseprotokoll einrichten .


Adapterspezifikationen

Controller	Kartenkennnummer	Produktname (Connectors)	Intel Teilenummer
82545EM	A92165-xxx	PRO/1000 MT Serveradapter	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT Dual Port Serveradapter	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MF Serveradapter	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF Serveradapter (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF Dual Port Serveradapter	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Desktop-Adapter	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF Serveradapter	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI Serveradapter	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT Serveradapter	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T Serveradapter	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit Serveradapter	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 Gigabit Serveradapter	PWLA8490
82562	A19716-xxx	PRO/100 VE Desktop-Adapter	CNLA6000
82550	A78921-xxx	PRO/100 M Desktop-Adapter	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S Server (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port Serveradapter	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management-Adapter (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100 Adapter	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI-Adapter(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC Card (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC Card (TP)	MBLA1656
82559	748568-xxx	PRO/100 S Server (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S Server (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management-Adapter	PILA8900
82558	701738-xxx	PRO/100+ PCI Management-Adapter (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port Serveradapter	PILA8472
82559	729757-xxx	PRO/100+ Serveradapter (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI Serveradapter (TP)	PILA8470


FEC
FEC* /LA/802.3ad: Statisch

Fast EtherChannel/Link Aggregation-Gruppen erhöhen den Durchsatz durch:

•	Adapterkonfiguration. Durch das Hinzufügen von Mitgliedern zu Gruppen kann der Durchsatz erhöht werden. Gruppen können aus bis zu acht Adaptern bestehen. Jeder Server kann mit bis zu vier Gruppen operieren.

•	Verkehrsanalyse. Die Software analysiert ständig die Übertragungsauslastung für jedes Gruppenmitglied und verteilt dann die Auslastung wie erforderlich über die Adapter. Die Switch-Auslastung regelt den Empfangsverkehr.

Darüber hinaus bieten FEC-Gruppen Fault Tolerance. Wenn ein Adapter in der Gruppe ausfällt, übernimmt ein Sekundäradapter alle Aufgaben.

Link Aggregation-Gruppen sind kompatibel mit:

Adaptergeschwindigkeit	Alle Adapter müssen mit gleicher Geschwindigkeit betrieben werden.
Netzwerkkonfiguration	• Alle Adapter müssen bei 1000 Mbit/s betrieben werden. • Alle Adapter müssen mit demselben Switch verbunden sein. • Es muss ein Switch verwendet werden, der Link Aggregation verarbeiten kann: • Cisco FEC-kompatible Switches unter Verwendung des PAgP-Protokolls • Intel Express(R) Link Aggregation-kompatible Switches • Andere mit statischem 802.3ad-kompatible Switches
Protokolle	Alle

Siehe auch:

Info zur Gruppenbildung

Gruppenarten


GEC
GEC* /LA/802.3ad: Statisch

Gigabit EtherChannel/Link Aggregation-Gruppen erhöhen den Durchsatz durch:

•	Adapterkonfiguration. Durch das Hinzufügen von Mitgliedern zu Gruppen kann der Durchsatz erhöht werden. Gruppen können aus bis zu acht Adaptern bestehen. Jeder Server kann mit bis zu vier Gruppen operieren.

•	Verkehrsanalyse. Die Software analysiert ständig die Übertragungsauslastung für jedes Gruppenmitglied und verteilt dann die Auslastung wie erforderlich über die Adapter. Die Switch-Auslastung regelt den Empfangsverkehr.

Darüber hinaus bieten GEC-Gruppen Fault Tolerance. Wenn ein Adapter in der Gruppe ausfällt, übernimmt ein Sekundäradapter alle Aufgaben.

Link Aggregation-Gruppen sind kompatibel mit:

Adaptergeschwindigkeit	Alle Adapter müssen mit gleicher Geschwindigkeit betrieben werden.
Netzwerkkonfiguration	• Alle Adapter müssen bei 1000 Mbit/s betrieben werden. • Alle Adapter müssen mit demselben Switch verbunden sein. • Es muss ein Switch verwendet werden, der Link Aggregation verarbeiten kann: • Cisco GEC-kompatible Switches unter Verwendung des PAgP-Protokolls • Intel Express(R) Link Aggregation-kompatible Switches • Andere mit statischem 802.3ad-kompatible Switches
Protokolle	Alle

Siehe auch:

Info zur Gruppenbildung

Gruppenarten


{0>Disable Network Adapter Power Management<}0{>Energieverwaltung des Netzwerkadapters deaktivieren<0}
Energieverwaltung des Netzwerkadapters deaktivieren

1. Auf dem Windows Desktop, klicken Sie mit der rechten Maustaste auf „Mein Computer".

2. Klicken Sie auf Eigenschaften.

3. Klicken Sie auf das Register Gerätemanager.

4. Doppelklicken Sie auf das Symbol Netzwerkadapter.

5. Doppelklicken Sie auf das Symbol Intel Netzwerkadapter.

6. Wenn das Register Energieverwaltung sichtbar ist, klicken Sie darauf und vergewissern Sie sich, daß das Ankreuzfeld Dem Computer erlauben dieses Gerät abzuschalten um Energie zu sparen nicht markiert ist.

7. Klicken Sie auf OK. Jetzt können Sie die Diagnose starten.

Nachdem Sie die Diagnose durchgeführt haben, können Sie die Energieverwaltungsfunktion durch Anwählen des Ankreuzfeldes in Schritt 6 oben wiederherstellen.