Copyright: Intel® PROSet Help Version 1013
Citation: Copyright © Intel Corporation 2003. All rights reserved.


Kaapelin testaaminen

Testaa kaapeli -painike näkyy Yleiset-välilehdessä, kun verkkokomponenttipuusta valittu sovitin on joko:

•	82550-pohjainen Intel(R) PRO/100 S -palvelin tai Desktop-sovitin ilman linkkiä verkkoon

•	Intel(R) PRO/1000 -sovitin

Intel PRO/100 -sovittimien kaapelitestin suorittaminen:

Valitse Yleiset-välilehdestä Testaa kaapeli. Testi voi kestää useita minuutteja.

Testin tulokset näkyvät Vianmääritys-välilehdessä.

Intel PRO/1000 -sovittimien kaapelitestin suorittaminen:

Varmista ennen kaapelitestitoiminnon käyttämistä, että sovitin toimii nopeudella 1000 Mbps. Vaikka kaapelitestin voikin suorittaa sovittimen toimiessa nopeudella 100 Mbps, jotkin tiedot eivät ehkä ole täsmällisiä tai ne eivät ole käytettävissä.

Valitse Yleiset-välilehdestä Testaa kaapeli. Testi voi kestää useita minuutteja.

Testin tulokset näkyvät Kaapelitestin tulokset -valintaikkunassa. Seuraavat tiedot tulevat näyttöön:

Kaapelin pituus: Näyttää sovittimen ja sen linkkikumppanin välisen kaapelin likimääräisen pituuden. Jos ilmoitettu kaapelin pituus poikkeaa kaapelin todellisesta pituudesta, tämä voi olla merkitä siitä, että kaapelissa on katkos. Tarkkuus voi vaihdella jopa 9 metriä.

Polariteetti: Ilmaisee Ethernet-kaapelissa havaittujen lähetyksen ja vastaanoton kierrettyjen parikaapelien +/- -ominaisuudet. Jos näitä ominaisuuksia ei ole määritetty oikein, sovitin korjaa virheen automaattisesti ja ilmoittaa siitä.

Paikallisen vastaanottimen tila: Ilmaisee, pystyykö sovittimeen liitetty kaapeliliitin käsittelemään liikennettä. Jos paikallisen tilan testi epäonnistuu, tarkista, onko liittimessä murtumia tai johdotusvirheitä.

Etävastaanottimen tila: Linkkikumppaniin kytketty kaapeliliitin läpäisee sarjan toimivuustestejä tai ei läpäise niitä. Jos etätilan testi epäonnistuu, tarkista, onko liittimessä murtumia tai johdotusvirheitä.

Vastaanoton virhemäärä: Vastaanoton virheet tapahtuvat, kun sovitin havaitsee kaapelissa tuntemattoman lähetyksen.
Vastaanottovirhemäärät luonnollisesti kasvavat, kun sovitin muodostaa yhteyden verkkoon (kun kaapeli liitetään sovittimeen tai tietokone käynnistetään uudelleen) tai kun sovitin käynnistyy uudelleen automaattisen neuvottelun jälkeen. Jos valmiustilan virhemäärä saavuttaa lukeman noin 65 000 viidessä minuutissa, linkissä on ongelma. Yritä ratkaista linkkiongelmat kytkemällä kaapeli uudelleen tai vaihtamalla kaapelia.

Valmiustilan virhemäärä: Valmiustilan virheiden määrä kasvaa, kun sovitin vastaanottaa kaapelissa tuntemattoman lähetyksen. Toisin kuin vastaanottovirheet valmiustilan virheet havaitaan, kun sovitin ei parhaillaan aktiivisesti vastaanota paketteja.
Valmiustilan virhemäärät luonnollisesti kasvavat, kun sovitin muodostaa yhteyden verkkoon (kun kaapeli liitetään sovittimeen tai tietokone käynnistetään uudelleen) tai kun sovitin käynnistyy uudelleen automaattisen neuvottelun jälkeen. Jos Valmiustilan virhemäärä saavuttaa lukeman noin 255 yhdessä minuutissa, linkissä on ongelma. Yritä ratkaista linkkiongelmat kytkemällä kaapeli uudelleen tai käyttämällä eri kaapelia.

MDI/MDI-X-tila: Ilmaisee, onko sovittimeen liitetyn kaapelin kokoonpano suoraan kytketty (MDI) vai ristiinkytketty (MDI-X). Käytä MDI-kokoonpanoa, kun yhdistät järjestelmän kytkimeen tai keskittimeen, ja MDI-X-kokoonpanoa, kun yhdistät kaksi järjestelmää.

HUOMAUTUS: Kaapelitestin tulokset -valintaikkunassa näkyvät tiedot vaihtelevat sovittimen tyypin mukaan.


Oikeudellisia tietoja

Copyright © 2002, Intel Corporation. Kaikki oikeudet pidätetään.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

Intel Corporation ei ole vastuussa tässä dokumentissa olevista virheistä tai puutteista. Intel ei sitoudu päivittämään tämän dokumentin sisältämiä tietoja.

* Muut nimet tai merkit voivat olla muiden yritysten omaisuutta.


PRO/1000 -palvelinsovittimien lisäasetukset

Lisäasetukset-välilehden asetusten avulla voidaan mukauttaa, miten sovitin käsittelee QoS-paketinmerkintää, jumbokehyksiä, purkua ja muita ominaisuuksia. Käyttöjärjestelmän ja asennettujen sovittimien mukaan kaikki seuraavat ominaisuudet eivät ehkä ole käytettävissä.

Lisäasetukset

Mukautuvat kehystenväliset ajat

Kompensoi Ethernet-pakettien liialliset yhteentörmäykset verkossa.  Oletusarvon mukaan tämä asetus on 0, jolloin toiminto on poissa käytöstä.

Suositeltava asetus (1) toimii parhaiten useimmissa tietokoneissa ja verkoissa mukautuen dynaamisesti verkkoliikennetilanteisiin. Dynaaminen tila on aktiivinen vain silloin, kun arvoksi on määritetty 1. Joissakin harvinaisissa tapauksissa voidaan ehkä saavuttaa parempi suorituskyky määrittämällä kehysten väli manuaalisesti. Arvon määrittäminen pakottaa staattisen välin pakettien välille.

Arvon kasvattaminen lisää lähetettävien kehysten välistä viivettä.

Tuetut sovittimet	Kaikki
Oletus	0: pois käytöstä
Alue	0-255

Mukautuva linkin palaute

Nopeuttaa järjestelmän käynnistymistä ohittamalla verkkoyhteyden vaatimat käynnistysrutiinit, kun kaapeli on irrotettuna sovittimesta. Tämä vähentää merkittävästi tietokoneen käynnistymiseen tarvittavaa aikaa.

Kun Mukautuva linkin palaute Intelin Ethernet-ohjaimille on käytössä ja verkkokaapelia ei ole liitetty RJ-45-porttiin, verkkoyhteys poistetaan käytöstä. Keltainen varoituskuvake tulee esiin verkkoyhteyden viereen Laitehallinnassa.

Ota verkkoyhteys uudelleen käyttöön liittämällä verkkokaapeli RJ-45-porttiin ja käynnistämällä tietokone uudelleen.

Tuetut sovittimet	Ei käytettävissä jokaisessa sovitinmallissa.
Oletus	Pois päältä
Suositus	Päälle
Alue	Päälle, Pois päältä
HUOMAUTUS: Adaptive Link Response (ALR) ei toimi, kun langaton sovitin on aktiivinen järjestelmässä.

Yhdistetyt puskurit

Optimoi lähetyksen suorituskykyä mukauttamalla yhdistettyjen puskurien määrää. Näiden puskurien avulla sovitin voi yhdistää datasegmenttejä ennen paketin lähetystä.

Yhdistettyjen puskurien asetuksen on oltava määritetty toimimaan yhdessä lähetyksen kuvaajien asetuksen kanssa. Yhdistettyjen kuvaajien asetuksen tulee olla 30 - 50 % lähetyksen kuvaajista. Jos yhdistettyjen puskurien asetusta ei muuteta vastaamaan lähetyksen kuvaajien asetusta, lähetyksen suorituskyky ei ehkä parane.

Yhdistetyt puskurit -asetus lisää huomattavasti lähetyksen suorituskykyä Windows NT 4.0 -tietokoneissa. Se parantaa lähetyksen suorituskykyä myös Windows 98- ja 2000 -tietokoneissa.

Tuetut sovittimet	Kaikki
Oletus	128
Alue	16-768

PME käyttöön

Ottaa käyttöön tai poistaa käytöstä sovittimen Herätys-ominaisuudet tietokoneissa, joissa on käytössä vanha Advanced Power Management (APM) -ominaisuus. Herätyksen avulla sovitin siirtyy pois valmius- tai virrankatkaisutilasta vastaanottaessaan tietyt pakettityypit, kuten ARP-paketit.

•	Tämän toiminnon poistaminen käytöstä poistaa käytöstä kaikki Herätys-asetukset tietokoneissa, jotka käyttävät vanhaa virranhallintaominaisuutta.

•	Kun tämä toiminto on käytössä, sovittimen sallitaan vastata Herätys-signaaliin. Jos haluat määrittää sovittimen vastaamaan tiettyihin pakettityyppeihin, katso Herätys-asetuksia koskevia tietoja jäljempänä tässä ohjeessa.

•	Laitteisto-oletus-arvo pakottaa sovittimen määrittämään Herätys-ominaisuudet järjestelmän laitteiston perusteella.

•	Ei toimintaa -arvo sallii sovittimen käyttää käyttöjärjestelmän oletusta.

Jos haluat poistaa kaikki Herätys-asetukset käytöstä, poista tämä toiminto käytöstä. Valitse muussa tapauksessa asetukseksi Ei toimintaa.

Tuetut sovittimet	82559-pohjaiset sovittimet. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Nopea lähetyksen lopettaminen

Vapauttaa Lähetyksen kuvaajat uudelleen käyttöä varten ennen kuin paketit on lähetetty verkkoon.

•	Kun Nopea lähetyksen lopettaminen on poissa käytöstä, sovittimen täytyy odottaa, kunnes paketit on lähetetty, ennen kuin se voi käyttää lähetyksen kuvaajia uudelleen.

•	Kun Nopea lähetyksen lopettaminen on käytössä, sovitin käyttää lähetyksen kuvaajia uudelleen nopeammin. Tämän ansiosta sovitin voi parantaa lähetyksen suorituskykyä.

Tuetut sovittimet	82543- ja 82544-pohjaiset sovittimet. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Päälle
Alue	Päälle, Pois päältä
Vuonohjaus

Antaa sovittimen lähettää tai vastaanottaa vuonohjauksen kehykset. Lähetyspolku pysäytetään vastaanotetun vuonohjauksen kehyksessä määritetyksi ajaksi. Nämä asetukset hienosäätävät verkon suorituskykyä estämällä pakettien ohituksen.

Tuetut sovittimet	82542-pohjainen, vain lähetys. 82540-, 82543- ja 82544-pohjaiset sovittimet, lähetys ja vastaanotto.  Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Käytössä
Alue	Pois päältä, Vastaa, Luo, Luo ja vastaa, Laitteisto-oletus
Jumbokehykset

HUOMAUTUS: Jumbokehyksiä tuetaan vain 1000 Mbps:llä. Jumbokehysten käyttäminen 10:llä tai 100 Mbps:llä voi aiheuttaa huonon suorituskyvyn tai linkin menetyksen.

Ottaa käyttöön jumbokehysominaisuuden tai poistaa sen käytöstä. Jumbokehykset voivat lisätä siirtonopeutta ja vähentää suorittimen käyttöä sijoittamalla enemmän dataa kuhunkin kehykseen, jolloin lähetetään vähemmän kehyksiä. Ethernet-vakiokehyskoko on 1514 tavua, kun taas jumbokehykset voivat sisältää 4088, 9014 tai 16128 tavua.

Ota jumbokehykset käyttöön vain silloin, kun kaikki verkon laitteet tukevat niitä ja ne on määritetty käyttämään samaa kehyksen kokoa. Kun määrität jumbokehyksiä toisiin verkkolaitteisiin, ota huomioon, että verkkolaitteet laskevat jumbokehysten koot eri tavalla. Jotkin laitteet sisällyttävät otsikkotiedot kehyksen kokoon, kun taas toiset eivät toimi näin. Intel-sovittimet eivät sisällytä otsikkotietoja kehyksen kokoon.

Lisätietoja on kohdassa Jumbokehykset.

Tuetut sovittimet	Kaikki
Oletus	Pois käytöstä
Alue	Pois käytöstä (1514), 4088, 9014 ja 16128 tavua. (Aseta kytkin 4 tavua korkeammalle CRC:lle, plus 4 tavua, jos käytössä on VLAN-verkot.)  HUOMAUTUS: Windowsin rekisteriavaimen MaxFrameSize-parametrin avulla voidaan määrittää mikä tahansa arvo alueella 1514 - 16128.
Paikallisesti määritetty osoite

Ohittaa sovittimen MAC-osoitteen. Voit määrittää uuden verkko-osoitteen kirjoittamalla Arvo-ruutuun 12-numeroisen heksadesimaaliluvun.

Tuetut sovittimet	Kaikki
Oletus	Ei mitään
Alue	0000 0000 0001 - FFFF FFFF FFFD Poikkeukset: • Älä käytä monilähetysosoitetta (vähiten merkitsevä korkean tavun bitti = 1).  • Älä käytä pelkkiä nollia tai F-kirjaimia. Ei läsnä -asetus: palauttaa sovittimen alkuperäisen verkko-osoitteen.
HUOMAUTUS: Ryhmässä Intel(R) PROSet II käyttää joko:

•	Ryhmän paikallisesti määritettyä osoitetta (LAA), jos ryhmässä on LAA määritetty, tai

•	ensisijaisen sovittimen pysyvää MAC-osoitetta, jos ryhmässä ei ole paikallisesti määritettyä osoitetta (LAA).

Intel PROSet II ei käytä sovittimen paikallisesti määritettyä osoitetta (LAA), jos sovitin on ensisijainen ryhmässä ja ryhmässä on LAA.

Windows 98SE -käyttäjät:

Jos haluat käyttää oletusosoitetta käytettyäsi manuaalisesti määritettyä osoitetta, suorita yksi seuraavista toimenpiteistä:

•	Valitse Verkon ominaisuudet -valintaikkunan Lisäasetukset-välilehdestä Paikallisesti määritetty osoite ja muuta sen arvoksi 0. Ota asetus käyttöön napsauttamalla OK.

•	Napsauta Intel PROSet II:ssa Lisäasetukset-välilehteä, napsauta sitten Palauta oletusarvot tai poista kaikki merkit Arvo-kentästä. Ota asetus käyttöön napsauttamalla OK.

Kirjaa linkin tilatapahtuma lokiin

Tällä asetuksella otetaan käyttöön ja poistetaan käytöstä linkin tilan muutosten kirjaaminen. Jos se on käytössä, linkin toiminnan muutostapahtuma tai linkin menetyksen muutostapahtuma luo viestin, joka näkyy järjestelmän tapahtumalokissa. Järjestelmänvalvojat näkevät tapahtumaviestin järjestelmän tapahtumalokista.

Seuraavat tapahtumat kirjataan:

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Tuetut sovittimet	Kaikki
Oletus	Ota käyttöön
Alue	Käyttöön, Pois käytöstä
Purku vastaanottaa TCP-tarkistussumman

Antaa sovittimen varmistaa saapuvien pakettien TCP- tai UDP-tarkistussumman.

•	Kun purku on poissa käytöstä, käyttöjärjestelmä varmistaa TCP-tarkistussumman.

•	Kun purku on käytössä, sovitin suorittaa varmistuksen käyttöjärjestelmälle.

Tämä toiminto parantaa vastaanoton suorituskykyä ja vähentää suorittimen käyttöä.

Tuetut käyttöjärjestelmät	• Windows XP* • Windows 2000 • Windows 98 ei tue purkamista.
Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	• Windows* XP: Päälle • Windows 2000: Pois päältä
Alue	Päälle, Pois päältä
TCP-segmentoinnin purku

Antaa sovitinlaitteiston segmentoida tiedot kelvollisiksi Ethernet-kehyksiksi.

•	Kun TCP-segmentointi on poissa käytöstä, käyttöjärjestelmä segmentoi tiedot ennen niiden lähettämistä sovittimeen lähetystä varten.

•	Kun TCP-segmentointi on käytössä, sovitin segmentoi tiedot kehyksiksi.

Koska sovitinlaitteisto pystyy suorittamaan datan segmentoinnin paljon nopeammin kuin käyttöjärjestelmäohjelmisto, tämä ominaisuus parantaa huomattavasti lähetyksen suorituskykyä. Tämän lisäksi sovitin kuluttaa vähemmän suoritinresursseja.

Tuetut käyttöjärjestelmät	Windows XP*
Tuetut sovittimet	82544-pohjaiset. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	1
Alue	0 = älä ilmoita tätä toimintoa; 1 = ilmoita tämä toiminto.
Pura lähetyksen IP-tarkistussumma

Antaa sovittimen laskea lähtevien pakettien IP-tarkistussumman.

•	Kun purku on poissa käytöstä, käyttöjärjestelmä varmistaa IP-tarkistussumman.

•	Kun purku on käytössä, sovitin suorittaa varmistuksen käyttöjärjestelmälle.

Tämä toiminto parantaa IP-lähetyssuorituskykyä ja vähentää suorittimen käyttöä.

Tuetut käyttöjärjestelmät	• Windows XP* • Windows 2000 • Windows 98 ei tue purkamista.
Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Päälle
Alue	Päälle, Pois päältä
Pura lähetyksen TCP-tarkistussumma

Antaa sovittimen laskea lähtevien pakettien TCP- tai UDP-tarkistussumman.

•	Kun purku on poissa käytöstä, käyttöjärjestelmä varmistaa TCP-tarkistussumman.

•	Kun purku on käytössä, sovitin suorittaa varmistuksen käyttöjärjestelmälle.

Tämä toiminto parantaa TCP:n ja UDP:n lähetyksen suorituskykyä ja vähentää suorittimen käyttöä.

Tuetut käyttöjärjestelmät	• Windows XP* • Windows 2000 • Windows 98 ei tue purkamista.
Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Päälle
Alue	Päälle, Pois päältä HUOMAUTUS: Poista tämä toiminto käytöstä, kun palvelin tukee DOS-pohjaisia asiakkaita.
QoS-paketinmerkintä

Antaa sovittimen lähettää ja vastaanottaa IEEE 802.3ac -merkittyjä kehyksiä, joihin kuuluvat seuraavat:

•	802.1pIEEE_802.1p QoS (Quality of Service, palvelun laatu) -merkinnät vaaditaan ensisijaisille merkityille paketeille ja

•	802.1Q -merkinnät vaaditaan VLAN-verkoille.

Intel PROSet ottaa automaattisesti käyttöön 802.1p-merkinnän, kun määritetään VLAN-verkko.

Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Pois päältä
Alue	Päälle, Pois päältä
Vastaanoton kuvaajat

Määrittää vastaanoton kuvaajat. Nämä ovat datasegmenttejä, joiden avulla sovitin voi varata vastaanotetut paketit muistiin. Kukin vastaanotettu paketti vaatii yhden vastaanoton kuvaajan ja kukin kuvaaja käyttää 2 kt muistia.

Haluat ehkä suurentaa Vastaanoton kuvaajat -asetusta, jos huomaat vastaanottoliikenteen suorituskyvyn heikentyvän merkitsevästi. Jos vastaanoton suorituskyvyssä ei ole ongelmaa, käytä sovittimelle sopivaa oletusasetusta.

Sovitinohjain	Oletus	Alue
82542-pohjaiset	160	80 – 768
82543-pohjaiset	160	80 – 256
82544-pohjaiset	160	80 – 2048
Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.

Lähetyksen kuvaajat

Määrittää lähetyksen kuvaajien määrän. Lähetyksen kuvaajat ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii yhden tai useamman lähetyksen kuvaajan.

Haluat ehkä lisätä lähetyksen kuvaajia, jos huomaat lähetyksen suorituskyvyssä ongelmia. Vaikka lähetyksen kuvaajien määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen kuvaajat kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä oletusasetusta 256.

Sovitinohjain	Oletus	Alue
82542-pohjaiset	256	80 – 768
82543-pohjaiset	256	80 – 256
82544-pohjaiset	256	80 – 2048
Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.

Herätys linkin muutoksella

Siirtää tietokoneen valmiustilasta toimintatilaan, jos verkkoliitäntä muodostaa linkin tietokoneen valmiustilan aikana. Tämän ominaisuuden voi ottaa käyttöön, sen voi poistaa käytöstä tai käyttöjärjestelmän voi sallia käyttää oletusasetustaan.

Tuetut käyttöjärjestelmät	Windows 9x, Windows 2000, Windows XP
Alue	Pois käytöstä, Pakotettu, Käyttöjärjestelmäriippuvainen
Oletus	Pois käytöstä

Herätysasetukset

Nämä asetukset liittyvät ominaisuuksiin, jotka ovat joko käyttöjärjestelmän tai Intel PROSet -ohjelman aktivoimia. Windowsin version mukaan ominaisuudet toimivat eri tavoin tai niitä ei tueta ollenkaan.

Seuraavat Windows-versiot tukevat Herätys asetuksilla -toimintoa: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional ja Windows Server 2003. Tätä toimintoa ei tueta Windows Server 2003 for 64-bit Itanium(R) -pohjaisissa järjestelmissä.

Herätysasetusten ottaminen käyttöön

Intel PROSetin avulla voidaan määrittää sovittimen käyttämät herätysasetukset. Ennen kuin valitset herätysasetukset, määritä käyttöjärjestelmä käyttämään herätysasetuksia. Toimi noudattamalla tähän liittyviä ohjeita.

Herätysasetusten ottaminen käyttöön

1.	Valitse Intel PROSetissa Lisäasetukset-välilehti.

2.	Valitse Asetus-luetteloruudusta Herätys asetuksilla.

3.	Valitse Arvo-luettelosta haluamasi herätysasetus.

4.	Valitse OK tai Käytä.

5.	Jotta sovitin vastaisi tämän tyyppisiin herätyspaketteihin, myös käyttöjärjestelmässä on käytettävä herätysasetuksia. Voit ottaa Herätys asetuksilla -toiminnon käyttöön siirtymällä Laitehallintaan ja ottamalla käyttöön Salli tämän laitteen palauttaa tietokone valmiustilasta -asetuksen.

Käytettävissä olevat asetukset

Intel PROSetissa käytettävissä olevat herätysasetukset:

Asetus	Kuvaus
Pois käytöstä	Sovitin ei käytä herätysasetuksia.
Herätys taikapaketilla	Sallii sovittimen herätä vasteena taikapaketin vastaanottoon. Taikapaketti on paketti, joka sisältää 16 peräkkäistä kopiota vastaanottavan sovittimen Ethernet-osoitteesta. Kun määrität tämän toiminnon, Intel PROSet ohittaa käyttöjärjestelmän arvon tälle toiminnolle.
Herätys ohjatulla paketilla	Sallii sovittimen herätä, kun se vastaanottaa Ohjatun paketin, joka on sovittimen MAC-osoitteeseen lähetetty yksittäislähetyspaketti.  Protokollan on otettava tämä herätysmenetelmä käyttöön ohjaimessa. Tämän ominaisuuden poisto käytöstä ilmoittaa ohjaimelle, että se jättää huomiotta kaikki protokollan pyynnöt tämän herätysmenetelmän käyttöönottamiseksi.
Herätys taikapaketilla ja ohjatuilla paketeilla	Sovitin herättää järjestelmän vastaanottaessaan taikapaketin tai ohjatun paketin.
Käyttöjärjestelmän ohjaama	Sallii käyttöjärjestelmän hallita kaikkia herätysasetuksia.

HUOMAUTUS: Jos yhdelle sovittimelle määritetään useita IP-osoitteita, käyttöjärjestelmä voi ARP-kuvioiden osalta edellyttää herättämistä kaikkiin määritettyihin osoitteisiin. Sovitin herätetään ainoastaan vasteena ARP-paketteihin, jotka kysyvät luettelon ensimmäistä IP-osoitetta.

HUOMAUTUS: Tietokonetta ei voi käynnistää sammutustilasta (S5) herätysasetuksia käyttämällä. Tätä tilaa hallitaan PME käyttöön -asetuksella, jota niin ikään voi käyttää Lisäasetukset-välilehdestä. Vaikka herätysasetukset olisikin poistettu käytöstä, PME käyttöön -asetus määrittää, voidaanko järjestelmä herättää S5-tilasta.

PME-asetukset toimivat niin kauan kuin sovittimen ohjain on käytössä. Kun ohjain on poistettuna käytöstä, laite kuitenkin palauttaa käyttöön laitteisto-oletusasetuksensa, joka ehkä sallii tietokoneen herättämisen sammutustilasta tai estää tämän.

Palauta oletusarvot -painike

Tällä painikkeella palautetaan valitun Lisäasetus-vaihtoehdon oletusarvo.  Katso oletusarvot yllä olevista asetuksista.  (Tämä vaihtoehto ei ole käytettävissä jokaiselle asetukselle.)


Ohjaimen tiedot
Verkko-ohjain

Sovittimen ohjaimen tietojen tarkasteleminen

1.	Valitse verkkokomponenttipuusta sovitin, jonka tietoja haluat tarkastella.

2.	Valitse Ohjain-välilehti.

Seuraavat tiedot tulevat näyttöön.

Ohjaimen tiedot:

Nimi	Nykyisen ladatun sovitinohjaimen tiedostonimi.
Versio	Ohjaimen versionumero. Hyödyllinen ladattaessa uusia versioita Intelin tukisivustosta: http://support.intel.com.
Kuvaus	Ohjaimen nimi.
Copyright	Oikeudellisia tietoja.
Ohjaimen tilastotiedot:

HUOMAUTUS: Tilastotiedot päivitetään, kun sovitinohjain ladataan tai päivitetään.

Paketteja lähetetty	Lähetettyjen pakettien määrä.
Paketteja vastaanotettu	Vastaanotettujen pakettien määrä.
Lähetysvirheet	Lähetettyjen virheellisten pakettien määrä.
Vastaanottovirheet	Vastaanotettujen virheellisten pakettien määrä.
HUOMAUTUS: Voit hankkia uusimmat ohjaimet valitsemalla valikosta Ohje > Tuki. Valitse tukisivustossa Hae uusimmat ohjaimet.


Diagnostiikka
Diagnostiikkatestit

Sovittimen diagnostiikan avulla voit analysoida sovittimen yleiskunnon. Kun Intel PROSet II suorittaa diagnostiikan, se tarkistaa I/O-ristiriidat, muistivirheet, EEPROMin toimivuuden, lähetys- sekä vastaanottotoiminnot ja linkin.

Diagnostiikkatestin tulokset näkyvät Diagnostiikka-välilehdessä, mutta ne tallennetaan myös järjestelmälokiin.

HUOMAUTUS:  Jos tietokoneessa on käytössä Windows 98, sovittimen Virranhallinta on ehkä poistettava käytöstä ennen diagnostiikan suorittamista. Katso tarkemmat tiedot kohdasta Virranhallinnan poistaminen käytöstä.

Yksittäiset testit

Testin nimi	Kuvaus	Vianmääritystiedot
Ohjausrekisterit	Tarkistaa I/O-osoitteiden ristiriidat ja rekisterien käytettävyyden. Tämä testi käsittää kaikki yleiset rekisterit, vastaanottorekisterit ja lähetysrekisterit. Se ei testaa EEPROM-hallinta/datarekisteriä.	Jos hallintarekisterien testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.
FIFO-rekisterit	Testaa sovittimen FIFO-muistin kirjoittamalla FIFO-muistiin kuvioita ja lukemalla niitä.	Jos FIFO-rekisterien testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.
EEPROM	Tarkistaa EEPROMista luettujen tietojen eheyden. Tämä testi kirjoittaa EEPROMiin ja lukee siitä. Yhtenäisyys varmistetaan vertaamalla tuloksia.	Jos EEPROM-testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.
Keskeytys	Varmistaa keskeytysrekistereitä käyttämällä, että kaikki sovitinkeskeytykset toimivat.	Jos keskeytystesti epäonnistuu, yritä muuttaa keskeytysasetuksia BIOSissa. Jos asetusten muuttaminen ei korjaa ongelmaa, kokeile siirtää sovitin toiseen korttipaikkaan.
Silmukka	Testaa sovittimen kyvyn lähettää ja vastaanottaa paketteja lähettämällä paketteja itselleen. Tämä testi käyttää sekä MAC-silmukkatilaa että lähetin-vastaanotin-silmukkatiloja. (Ei käytettävissä Intel(R) PRO/1000 T -sovittimessa.)	Jos Silmukka-testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.
Linkki	Varmistaa, että sovitin on linkitetty kelvolliseen linkkikumppaniin.	Jos linkkitesti epäonnistuu, varmista, että kaapeli on kytketty kunnolla sovittimeen ja linkkikumppaniin. Jos kaapeli on kunnolla kiinni, kokeile kytke kaapeli linkkikumppanin toiseen porttiin tai kokeile toista kaapelia.
HUOMAUTUS: Jos diagnostiikka on käynnissä ja valitset Lopeta, diagnostiikka pysähtyy lyhyen viiveen jälkeen. Kun diagnostiikka on pysähtynyt, OK-painike on käytettävissä.

Muut asetukset

Lisäasetukset-painike: Valitsemalla tämän voit määrittää Lähettäjä-vastaaja-verkkotestin.

Varoitus: Lähettäjä-vastaanottaja-testiä ei ole suunniteltu käytettäväksi järjestelmän ollessa valmius- tai keskeytystilassa tai silloin, kun kaapelia ei ole kytketty tietokoneeseen.


Ryhmän kokoonpano ja tila
Ryhmän kokoonpano

Ryhmän kokoonpanon yksityiskohtien tarkasteleminen:

Valitse verkkokomponenttipuusta ryhmä, jota haluat tarkastella.

Näyttöön tulee Ryhmän kokoonpano -välilehti.

Sovittimet ryhmässä -tilaruutu sisältää seuraavat tiedot:

Sovitin

Kunkin ryhmässä olevan sovittimen nimi.

Prioriteetti

Näyttää sovittimien prioriteettitilan ryhmässä (jos prioriteetti on määritetty). Sovittimen prioriteettitila ryhmässä voi olla ensisijainen tai toissijainen.

Sovittimen määrittäminen ensisijaiseksi tai toissijaiseksi

Tila-sarake sisältää seuraavat tiedot:

•	Aktiivinen: Sovitin välittää verkkoliikennettä.

•	AFT-tilassa vain yksi sovitin, suositeltu ensisijainen sovitin, on aktiivinen.

•	Dynaamisessa 802.3ad-tilassa sovittimien, jotka ovat osa aktiivista aggregaattoria, tila on Aktiivinen.

•	Valmiustilassa: AFT-, SFT- ja Dynaaminen 802.3ad -ryhmät tukevat valmiustilaa. Valmiustilassa olevalla sovittimella on linkki verkkoon, mutta se ei aktiivisesti välitä liikennettä.

•	Pois käytöstä: Sovitin on poistettu tietokoneesta, poistettu käytöstä tai sen ohjaimen lataaminen on epäonnistunut. Sovittimen tila on Pois käytöstä myös silloin, kun kaapeli on viallinen tai linkki on katkennut.

Ryhmän tiedot -osa sisältää seuraavat tiedot:

•	Ethernet-osoite: Näyttää ryhmän ensisijaisen MAC-osoitteen.

•	IP-osoite: Näyttää ryhmän IP-osoitteen.

•	Ryhmän tyyppi: Näyttää ryhmän tilan.

Testaa kytkimen kokoonpano -painike

Suorittamalla Kytkimen kokoonpano -testin voit varmistaa, että linkkikumppanit tukevat valittua sovittimen ryhmitystilaa. Jos sovitin on esimerkiksi Link Aggregation team -ryhmän jäsen, Intel(R) PROSet II voi varmistaa, että sovittimeen kytketyt linkkikumppanit tukevat Link Aggregation -toimintoa.

Yksityiskohtaisia lisätietoja kunkin ryhmätilan vaatimuksista on kohdassa Tietoja ryhmittämisestä.

Tämän testin suorituksen aikana ryhmä menettää väliaikaisesti verkkoyhteyden.

HUOMAUTUS: Tämä testi ei havaitse virheitä, kun seuraavissa tilanteissa:

Sovittimen kokoonpano	Kytkimen kokoonpano
Ryhmitetty Link Aggregation -tilassa ilman VLAN-verkkoja	Kytkin joko: • ei kuulu mihinkään VLAN-verkkoon • on määritetty merkityillä VLAN-verkoilla
on ryhmitetty Link Aggregation -tilassa VLAN-verkkojen kanssa	Kytkin: • ei kuulu sovittimessa määritettyyn VLAN-verkkoon ja • sille ei ole määritetty Link Aggregation  -toimintoa.
Kytkimen kokoonpanon testin suorittaminen:

1.	Valitse verkkokomponenttipuusta ryhmä, jota haluat testata.
Testin suorittaminen edellyttää sitä, että ryhmässä on vähintään kaksi sovitinta.

2.	Valitse Ryhmän kokoonpanon -välilehdestä Testaa kytkimen kokoonpano.
Näyttöön tulee Testaa kytkimen kokoonpano -valintaikkuna.

3.	Voit jatkaa testiä valitsemalla Kyllä.
Jos ryhmän tai linkkikumppanin kokoonpanossa havaitaan virheitä, näyttöön tulee Vianmääritys-välilehti.

HUOMAUTUS:  Spanning Tree Protocol (STP) -yhteyskäytännön testaamiseen tarvittavan ajan vuoksi Intel(R) PROSet II ei ehkä ilmaise oikein sitä, onko Spanning Tree Protocol (STP) käytössä verkossa. Varmista, että kytkimet on määritetty käyttämällä STP-yhteyskäytäntöä:

•	Käytössä SFT-ryhmille

•	Pois käytöstä (portfast) kaikille muille ryhmätiloille


VLAN
VLAN-verkon yleiskatsaus

VLAN on looginen verkkoryhmä, jonka avulla verkkoliikenteen voi eristää niin, että VLAN-verkon jäsenet vastaanottavat liikennettä vain toisilta verkon jäseniltä. VLAN-verkkoja käyttämällä voidaan ryhmittää tietokoneita loogisiksi työryhmiksi, mikä on tärkeää yhdistettäessä asiakaskoneita palvelimiin, jotka sijaitsevat fyysisesti rakennuksen eri osissa, kampuksella tai yrityksen verkossa.

VLAN-verkkoja käyttämällä voidaan:

•	rajoittaa lähetysmyrskyjä

•	parantaa verkkoyhteyksien lisäyksiä, siirtoja ja muutoksia

•	vähentää suojausongelmia

•	helpottaa hallintatehtäviä.

VLAN-tyypit

On olemassa kytkinpohjaisia VLAN-verkkoja, joita kutsutaan myös nimellä implisiittiset VLAN-verkot, ja koodimerkintäpohjaisia VLAN-verkkoja, joita kutsutaan myös nimellä eksplisiittiset VLAN-verkot.

•	Implisiittiset VLAN-verkot pohjautuvat kytkinominaisuuksiin, kuten porttinumeroon, MAC-osoitteeseen ja muihin Layer 2 toimintoihin. VLAN-verkon oletustyyppi monissa kytkimissä, mukaan lukien useimmat Cisco*-tuotteet, on implisiittinen VLAN. Implisiittiset VLAN-verkot määritetään vain kytkimessä. Kytkin ei muuta eikä merkitse paketteja implisiittisen VLAN-verkon pakottamiseksi. Kaikki Intelin sovittimet voivat osallistua implisiittisiin VLAN-verkkoihin.

•	Eksplisiittiset VLAN-verkot pohjautuvat nelitavuisen koodimerkinnän (tagin) (802.3ac) liittämiseen kunkin paketin otsikkoon. Kukin IEEE VLAN on määritettävä koko verkkoon, mukaan lukien sovitin ja kaikki linkkikumppanit.

Vaatimukset

VLAN-verkot vaativat:

•	802.1Q VLAN -verkkoja tukevat verkkokytkimet

•	802.1Q VLAN -verkkoja tukevat sovittimet, joihin kuuluvat:

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R) PRO/1000

•	Intel(R) PRO/100B -sovittimet eivät tue VLAN-verkkoja.

Intelin VLAN-verkkojen yleiskuvaus on Intel Networking -Web-sivustossa:

  Siirry Web-sivustoon nyt

Yksityiskohtaisia lisätietoja VLAN-verkoista on White Paper -tiedotteessa:

  Lue White Paper -tiedote nyt

Katso myös

VLAN-verkon lisääminen

VLAN-ominaisuuksien muuttaminen

VLAN-verkon poistaminen

VLAN-verkkojen lisäasetukset


Tuki

Voit käydä Intelin tukisivustoissa, jos käytössäsi on Internet-yhteys ja Web-selain.

Internetin kautta saatava tuki:

1.	Valitse Ohje-valikosta Tuki.

2.	Napsauta jotain Web-sivuston linkkiä.


Vianmääritys

Vianmääritys-välilehti tulee näyttöön vain silloin, kun Intel(R) PROSet II havaitsee ongelman sovittimen kokoonpanossa, ohjaimen asennuksessa tai muussa kohteessa. Intel PROSet II tutkii ongelman ja useimmissa tapauksissa tarjoaa ongelmaan ratkaisuehdotuksen.

Jos epäilet, että sovittimessa on ongelma, kokeile jotain seuraavista ratkaisuista:

•	Tarkista Yleiset-välilehdestä, onko verkon linkissä liikennettä.

•	Jos ryhmä on määritetty, varmista testaamalla linkkikumppaneiden kokoonpano, että ne tukevat ryhmätilaa.

•	Suorita diagnostiikka.

•	Suorita Kaapelitesti, jos sitä voi käyttää sovittimessa.


Lähettäjä-vastaaja-testi

Lähettäjä-vastaaja-testillä voi testata sovittimen koko verkossa.

Varmista ennen tämän testin suorittamista, että sovittimella on linkki verkkoon.

Testin määrittäminen

Määritä Lähettäjä- ja Vastaaja-tietokone. Lähettäjä lähettää paketteja jatkuvasti vastaajalle, joka kaiuttaa paketit takaisin lähettäjälle.

Lähettäjä
Lähettää jatkuvasti paketteja verkkoon. Käynnistä pakettien lähettäminen valitsemalla Käynnistä.
Ennen kuin käynnistät pakettien lähettämisen, määritä muualla verkossa sijaitseva vastaaja. Mene toiselle tietokoneelle, johon on asennettu jokin seuraavista sovittimista: Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S tai PRO/1000. Määritä sovitin vastaajaksi Intel(R) PROSet II -ohjelman avulla. Jos mahdollista, käytä samaa sovitinmallia lähettäjänä ja vastaajana.

Vastaaja
Kaiuttaa paketit lähettäjälle (paketteja lähettävälle laitteelle). Käynnistä tämä tietokone toimimaan vastaajana valitsemalla Käynnistä.

Tämän testin avulla voidaan testata verkkosegmentin kaapelit ja verkon kokoonpano, vaikka testiä ei olekaan suunniteltu tätä tehtävää varten. Kun testaat uutta LAN-segmenttiä, määritä vastaaja yhteen päähän ja testaa lähettäjän ollessa toisessa päässä.

Tämä testi varmistaa kahden sovittimen välisen yhteyden; sitä ei ole tarkoitettu tarkistamaan nopeutta. Nopeus, jolla sovitin lähettää tai vastaanottaa liikenteen verkossa voi vaihdella verkon rakenteen ja kuormituksen mukaan. Näet sovittimen määritetyn nopeuden valitsemalla Yleiset-välilehden.

HUOMAUTUS:   Jos Cisco* 6500 -kytkin on määritetty Spanning Tree -toiminnon ollessa käytössä, Lähettäjä-vastaaja-testi ei tuota tarkkoja tuloksia. Kun suoritat Lähettäjä-vastaaja-testin käyttämällä Cisco 6500 -kytkintä, varmista, että Spanning Tree on poissa käytöstä.

Varoitus: Lähettäjä-vastaanottaja-testiä ei ole suunniteltu käytettäväksi järjestelmän ollessa valmius- tai keskeytystilassa tai silloin, kun kaapelia ei ole kytketty tietokoneeseen.


Uusi VLAN

VLAN-tunnus: Verkonvalvojasi määrittämä VLAN-numero. Sovittimen VLAN-tunnuksen on vastattava kytkimen VLAN-tunnusta. Kelvollinen alue:  1 - 4094. (HUOMAUTUS: VLAN-numerot 0 ja 1 ovat usein varattuja. Tarkista yksityiskohtaiset tiedot kytkimen ohjeista.)

VLAN-NIMI: VLAN-verkon nimi. Anna nimeksi esimerkiksi Markkinointi tai Suunnittelu. VLAN-nimi on valinnainen asetus, jonka avulla VLAN-verkot voidaan helposti tunnistaa koko verkossasi. VLAN-nimen ei tarvitse vastata kytkimen VLAN-nimeä.


Tunnista sovitin

Tunnista sovitin -toiminnon avulla voit tunnistaa fyysisen sovittimen tietokoneen takaa.

Jos tietokoneeseen on esimerkiksi asennettu kaksi sovitinta, voit valita sovittimen verkkokomponenttipuusta ja valita sitten Tunnista sovitin -painikkeen. Valitun sovittimen kiinnikkeen merkkivalo vilkkuu.

Sovittimen sijainnin tarkistaminen:

1.	Valitse Tunnista sovitin.

2.	Määritä liukusäädintä siirtämällä, kuinka monta sekuntia merkkivalon pitää vilkkua. Oletusarvo on 10 sekuntia.

3.	Valitse Käynnistä.

 Valitun sovittimen merkkivalo vilkkuu määritetyn ajan.


Sovittimen vikasieto

Sovittimen vikasieto on kahden tai useamman sovittimen ryhmä, joka toimii verkkoyhteyden varmistuksena. Keskittimen tai kytkinportin, kaapelin tai sovittimen vikaantuessa tietokone säilyttää keskeytymättömän verkkotoiminnan.

Sovittimen vikasietoryhmissä on ensisijainen sovitin ja varmistussovitin eli toissijainen sovitin. Normaalin käytön aikana vain ensisijainen sovitin lähettää liikennettä. Jos ensisijainen sovitin tai tai linkki ensisijaiseen sovittimeen vikaantuu, toissijainen sovitin siirtyy automaattisesti sen tilalle.

Spanning Tree -toiminnon on oltava pois käytöstä, jos sovittimien vikasietotoiminto on käytössä.

Sovittimen vikasietoryhmien yhteensopivuus:

Sovitintyyppi	Ryhmässä on oltava yksi Intel-palvelinsovitin.
Sovittimen nopeus	Eri sovittimien nopeus voi vaihdella esimerkiksi niin, että yksi sovitin voi olla linkitetty 100 Mbps:n nopeudella ja toinen voi toimia 1000 Mbps:n nopeudella.
Verkkokokoonpano	• Kaikki sovittimet on kytkettävä samaan kytkimeen. • Spanning Tree -toiminnon on oltava poissa käytöstä.
Yhteyskäytännöt	Kaikki
Katso myös:

Tietoja ryhmittämisestä

Ryhmätyypit


Mukautuva kuormituksen tasaus

Mukautuva kuormituksen tasaus (Adaptive Load Balancing, ALB) on ryhmätyyppi, joka on määritetty kasvattamaan palvelimen lähetys- ja vastaanottosiirtonopeutta. ALB-ryhmät tasauttavat kuormituksen automaattisesti lähetysliikenteessä, mutta vastaanottoliikenteen kuormituksen tasaus otetaan valinnaisesti käyttöön tai pois käytöstä.

ALB-ryhmät kasvattavat siirtonopeutta seuraavasti:

•	Sovittimen kokoonpano. Kokonaissiirtonopeutta voidaan parantaa lisäämällä ryhmään jäseniä.

•	Liikenneanalyysi. ALB-ohjelmisto analysoi jatkuvasti kunkin ryhmäjäsenen lähetys- ja vastaanottokuormitusta ja tasaa tarvittaessa kuormitusta sovittimien kesken.

Lähetysliikenne

ALB-ryhmissä kaikki sovittimet tasaavat IP (IPv4 ja IPv6)- ja NCP IPX -lähetysliikenteen kuormitusta.

Vastaanottoliikenne

•	ALB-ryhmissä, joissa vastaanottokuormituksen tasaus on pois käytöstä, ensisijainen sovitin vastaanottaa liikenteen.

•	ALB-ryhmissä, joissa vastaanottokuormituksen tasaus on käytössä:

•	Ensisijainen sovitin vastaanottaa liikenteen käyttäen mitä tahansa yhteyskäytäntöä.

•	Suurimmalla nopeudella toimivat aktiiviset sovittimet vastaanottavat IPv4-liikenteen.

Jos käytössä on esimerkiksi kolmen sovittimen ALB-ryhmä, jossa on ensisijaiseksi sovittimeksi määritetty yhden gigabitin sovitin ja kaksi Intel(R) PRO/100 -sovitinta:

•	Gigabitin sovitin vastaanottaa reitittämättömän liikenteen ja IPv6-liikenteen, koska se on ensisijainen sovitin.

•	Gigabitin sovitin vastaanottaa IPv4:n, koska se on nopein sovitin.

•	Intel PRO/100 -sovittimet eivät osallistu vastaanottokuormituksen tasaukseen.

Lisätietoja vastaanottokuormituksen tasauksen ottamisesta käyttöön ja sen poistamisesta käytöstä on kohdassa Lisäasetusten määrittäminen.

ALB-ryhmät antavat lisäksi käyttöön vikasietotoiminnon. Jos ensisijainen sovitin vikaantuu, ryhmä jatkaa toimintaa ja tasaa liikenteen jäljellä olevien ryhmäjäsenten kesken.

ALB-ryhmät ovat yhteensopivia seuraavien ominaisuuksien kanssa:

Sovittimen nopeus	Eri nopeudet ovat mahdollisia, esimerkiksi niin, että yksi sovitin toimii 100 Mbps:n nopeudella ja toinen 1000 Mbps:n nopeudella.
Yhteyskäytännöt	IP, IPX (NCP) HUOMAUTUS: Microsoft luokittelee IPv6-tuen Windows* 2000:ssa Technology Preview’nä (tekniikan ennakkoesittelynä). Siten IPv6-tukea Windows 2000:ssa ei ole tarkoitettu tuotantoympäristöön. Katso järjestelmän dokumentaatiosta tarkemmat tiedot IPv6:n tuesta käyttöjärjestelmässä.
Verkkokokoonpano	Kaikki sovittimet on kytkettävä samaan kytkimeen.

Gigabitin Intel(R) PRO/1000 -palvelinsovittimen suorituskykyä koskevia huomautuksia

Koska Intel(R) PRO/1000 -sovitin tukee jo suurta kaistaleveyttä, ALB-toiminnon käyttäminen voi ehkä heikentää suorituskykyä joissakin palvelimissa. Tämä johtuu siitä, että monissa nykyisissä palvelimissa ei ole riittävää keskussuoritin- tai väyläkapasiteettia gigabittiluokan ryhmitettyjen sovittimien tehokasta käsittelemistä varten. Paras ALB-suorituskyky saavutetaab käyttämällä uudempia palvelimia, jotka tukevat useita PCI-väyliä ja Pentium II(R) -suorittimia, joiden nopeus on 400 MHz rtai enemmän. Tällaisessa palvelimessa ryhmitetyt Intel PRO/1000 -sovittimet on asennettava eri PCI-väyliin, jotta ALB-suorituskyky olisi mahdollisimman hyvä.

Katso myös:

Tietoja ryhmittämisestä

Ryhmätyypit

Lisäasetusten määrittäminen


IEEE 802.3ad: Dynaaminen

802.3ad on IEEE Link Aggregation -standardi. Staattisten Link Aggregation -ryhmien tavoin dynaamista Link Aggregation -toimintoa käyttävät ryhmät lisäävät siirtonopeutta seuraavasti:

•	Sovittimen kokoonpano. Voit lisätä siirtonopeutta lisäämällä ryhmään jäseniä. Ryhmät voivat sisältää korkeintaan kahdeksan sovitinta. Kukin palvelin voi toimia korkeintaan neljän ryhmän kanssa.

•	Liikenneanalyysi. Ohjelmisto analysoi jatkuvasti kunkin ryhmäjäsenen lähetyskuormitusta ja tasaa tarvittaessa kuormituksen sovittimien kesken. Kytkin tasaa vastaanottoliikenteen kuormituksen.

802.3ad-ryhmät antavat käyttöön myös vikasietotoiminnon. 802.3ad-ryhmissä palvelin käyttää yhtä IP/MAC-osoitetta tiedonsiirtoon verkon kanssa. Link Aggregation -tilassa verkkolaitteet ja asiakkaat vuorostaan käsittelevät ryhmää yhtenä tietokoneena. Kun ryhmään kuuluva sovitin vikaantuu, verkko näkee ryhmän tietokoneena, jonka toimintakyky on rajoittunut.

Link Aggregation -ryhmät ovat yhteensopivia seuraavien ominaisuuksien kanssa:

Sovittimen nopeus	Kaikkien sovittimien tulee toimia samalla nopeudella.
Verkkokokoonpano	• Varmista, että sovittimiin yhdistetty kytkin tukee täysin IEEE 802.3ad -standardia. • Tarkista portin riippuvuudet kytkimen ohjeista. Jotkin kytkimet vaativat parit ensisijaisesta portista lähtien.  • Varmista tarkistamalla nopeus- ja suuntaisuusasetukset, että sovitin ja kytkin toimivat kaksisuuntaisessa tilassa, joko pakotettuna tai käyttämällä automaattista neuvottelua. Sekä sovittimessa että kytkimessä on oltava samat nopeus- ja kaksisuuntaisuusasetukset. Kaksisuuntaisuusvaatimus on osa IEEE 802.3ad -määritystä: http://standards.ieee.org/.  Muuta tarvittaessa nopeus- tai suuntaisuusasetusta, ennen kuin linkität sovittimen kytkimeen. Vaikka nopeus- ja suuntaisuusasetuksia voi muuttaa ryhmän luomisen jälkeen, Intel suosittelee kaapelien kytkemistä irti siihen asti, kun asetukset on otettu käyttöön. Joissakin tapauksissa kytkimet tai palvelimet eivät ehkä tunnista uusia nopeus- tai suuntaisuusasetuksia, jos asetuksia muutetaan verkon linkin ollessa aktiivinen.  • Jos määrität VLAN-verkkoa, tarkista VLAN-verkon yhteensopivuustiedot kytkimen ohjeista. Kaikki kytkimet eivät tue samanaikaisia dynaamisia 802.3ad-ryhmiä ja VLAN-verkkoja. Jos määrität VLAN-verkkoja, määritä ryhmitys ja VLAN-asetukset sovittimessa, ennen kuin linkität sovittimen kytkimeen. VLAN-verkkojen määrittäminen kytkimen luotua aktiivisen aggregaattorin vaikuttaa VLAN-verkon toimintaan. HUOMAUTUS:  Joissakin kytkimissä IEEE 802.3ad -kokoonpanon samaan aggregaattoriin ei voi kuulua sekä kupari- että kuitusovittimia. Jos järjestelmään on asennettu kupari- ja kuitusovittimia, kytkin voi ehkä määrittää kuparisovittimet yhteen aggregaattoriin ja kuitupohjaiset sovittimet toiseen. Jos havaitset näin tapahtuvan, saat parhaan suorituskyvyn käyttämällä järjestelmässä joko kupari- tai kuitupohjaisia sovittimia.
Yhteyskäytännöt	Kaikki

Katso myös:

Tietoja ryhmittämisestä

Ryhmätyypit


Tietoja sovittimien ryhmittämisestä
Tietoja ryhmittämisestä

Ryhmä on joukko sovittimia, jotka on määritetty parantamaan tiedonsiirtokapasiteettia ja vikasietoisuutta. Ryhmitys on yhteensopiva Windows* 2000:n, Windows NT* 4.0:n ja Windows XP:n kanssa.

Ryhmätyypit

Intel(R) PROSet II:n avulla voidaa määrittää seuraavia ryhmätyyppejä:

•	Sovittimen vikasietoryhmä (AFT)

•	Kytkimen vikasieto (SFT)

•	Mukautuva kuormituksen tasaus (ALB)

•	FEC* /LA/802.3ad: Staattinen

•	GEC/LA/802.3ad: Staattinen

•	IEEE 802.3ad: Dynaaminen

Ryhmän sovitinten enimmäismäärä

SFT-ryhmiä lukuun ottamatta ryhmissä voi olla kahdesta kahdeksaan sovitinta. SFT-ryhmissä on oltava täsmälleen kaksi sovitinta, jotka on yhdistetty yhteen linkkikumppaniin.

Muiden valmistajien sovittimien käyttäminen ryhmässä

Sovittimista voidaan luoda monen toimittajan ryhmä (MVT) mitä tahansa ryhmitystilaa varten. Monen toimittajan ryhmän luominen edellyttää, että ryhmän sovittimista vähintään yksi on Intel-palvelinsovitin.

MVT on yhteensopiva seuraavien ominaisuuksien kanssa:

Sovitintyyppi	Tarkista verkkokomponenttipuusta, mitkä järjestelmän sovittimista ovat yhteensopivia.
Sovittimen nopeus	Tarkista ryhmitystilan vaatimukset.
HUOMAUTUS: Jos ryhmän jäsenet ovat osa VLAN-verkkoa, Intel PROSet II ei tue monen toimittajan ryhmitystä.

Ryhmien enimmäismäärä tietokoneessa

Tietokoneeseen määritettyjen ryhmien määrä vaihtelee tietokoneen laitteiston ja ohjelmiston kokoonpanon mukaan.

Vaatimukset

Asennettu verkkokokoonpanosi ja sovittimien tyyppi määrittävät, minkätyyppisiä ryhmiä tietokoneeseen voidaan asentaa. Lisätietoja ryhmien vaatimuksista ja ominaisuuksista on kohdassa Ryhmätyypit.

Ryhmien poistaminen

Kun poistat ryhmiä, tee se aina Intel PROSet II -apuohjelmalla. Ryhmien poistaminen tai poistaminen käytöstä käyttöjärjestelmän Ohjauspaneelin Verkko-sovelluksessa voi vaikuttaa järjestelmän vakauteen ja sovittimen kokoonpanoon.

Katso sovittimien ryhmityksen yleiskatsaus Intel(R) Networking -sivustosta:

  Siirry Web-sivustoon nyt

Tarkemmat tiedot eri ryhmätyyppien tarkoituksesta on White Paper -tiedotteessa Solving Server Bottlenecks:

  Lue White Paper -tiedote nyt

Katso myös:

Ryhmätyypit


Sovittimen tiedot

Sovittimen tietojen tarkasteleminen

1.	Valitse verkkokomponenttipuusta sovitin, jonka tietoja haluat tarkastella.

2.	Valitse Yleiset-välilehdestä Tiedot.

Tiedot tulevat näyttöön.

HUOMAUTUS: Kaikki ominaisuudet eivät ole käytettävissä jokaisessa sovitinmallissa.

IP-osoite	Tämän sovittimen käytössä oleva IP-osoite. HUOMAUTUS: Intel(R) PROSet II ei näytä IPv6-osoitteita.
Väylän nopeus	Sovittimen käyttämä nykyinen PCI-väylänopeus (megahertsiä).
Väylän leveys	Sovittimen käyttämän PCI-väylän bittileveys (32 tai 64).
Ohjain	Sovittimessa oleva osanumero tai komponenttimalli.
Tietovälinetyyppi	Liitäntätyyppi (kuitu tai kupari)
Pysyvä Ethernet- osoite	Sovittimen solmuosoite (MAC) heksadesimaaleina. Sovittimen MAC-osoite on toimittajan määrittämä.
Nykyinen Ethernet- osoite	Tämän sovittimen käyttämä nykyinen MAC-osoite.  Jos sovitin kuuluu ryhmään tai sille on annettu paikallisesti määritetty osoite (LAA), nykyinen Ethernet-osoite poikkeaa sovittimen pysyvästä osoitteesta.
PHY-laite	Sovittimen kuvaus.
Osanumero	Sovittimen Intel-osanumero.
Keskeytys	PCI BIOSin tai käyttöjärjestelmän sovittimelle määrittämä keskeytys.
Muistiosoite	PCI BIOSin tai käyttöjärjestelmän sovittimelle määrittämä keskeytys.
I/O-osoite	PCI BIOSin sovittimelle määrittämä I/O-osoite.
Väyläpaikka	Sovittimen väylänumero ja paikkatunnus.
Järjestelmäpaikka	Järjestelmäpaikat ovat väyläpaikan alajaksoja. Jos väyläpaikka on esimerkiksi jaettu kahteen osaan, molemmat osat tunnistetaan kahdella järjestelmäpaikalla.
DHCP-palvelinosoite	Sovittimen IP-osoitteen muodostaneen palvelimen IP-osoite.


Ryhmityksen lisäominaisuuksien määrittäminen

Kullekin ryhmätyypille voidaan määrittää eri lisäasetuksia.

Ryhmän lisäasetusten tarkasteleminen tai muuttaminen:

1.	Valitse ryhmä verkkokomponenttipuusta.

2.	Valitse Lisäasetukset-välilehti.

3.	Tee haluamasi muutokset ryhmän kokoonpanoon.

4.	Voit palauttaa oletusasetukset valitsemalla Palauta oletusarvot.

5.	Vahvista muutokset valitsemalla OK.

Lisäasetusten kuvaukset ja niiden oletusasetukset on kuvattu jäljempänä. Useimmissa tapauksissa on parasta säilyttää oletusasetukset.

Tarkistusaika (sekuntia)

Kuinka usein ohjelmisto tarkistaa ryhmän jäsenen tilan. Jos esimerkiksi Tarkistusaika-asetus on yksi sekunti, ohjelmisto tarkistaa yhden sekunnin välein, että ryhmän jäsenet pystyvät lähettämään ja vastaanottamaan liikennettä.

Oletusasetus: 1 sekunti

Alue: 1 - 3 sekuntia

LinkAggrJoinMethod

Tämä lisäasetus on käytettävissä Link Aggregation -ryhmitystä varten. IEEE 802.3ad -standardin perusteella linkki voidaan jakaa useiksi linkeiksi, joita kutsutaan aggregaattoreiksi. Kuitenkin vain yksi aggregaattoreista on aktiivinen. LinkAggrJoinMethod-parametri määrittää, miten järjestelmä valitsee aktiivisen aggregaattorin. Jos LinkAggrJoinMethod-parametrin arvoksi määritetään Enimmäiskaistanleveys, järjestelmä valitsee aggregaattorin, joka tuottaa lisää liikennettä. Jos LinkAggrJoinMethod-parametrin arvoksi määritetään Sovittimien enimmäismäärä, järjestelmä valitsee aggregaattorin, jossa on enemmän sovittimia.

Oletusasetus: Enimmäiskaistanleveys

Alue: Enimmäiskaistanleveys, Sovittimien enimmäismäärä

Kuormatasapainon virkistystaajuus

Aika, joka kuluu, ennen kuin ohjelmisto palauttaa tai päivittää nykyisen kuormituksen ryhmän jäsenten kesken. Paras suorituskyky saavutetaan säilyttämällä tämän asetuksen oletusasetus tai määrittämällä asetus mahdollisimman pieneksi.

Oletusasetus: 10 tarkistusaikayksikön välein

Alue: 1-50 tarkistusaikayksikköä

Tarkistusaika-asetukseksi määritetty sekuntimäärä on päivitysvälin mittayksikkö.  Katso Tarkistusaika-asetuksesta lisätietoja.

Paikallisesti määritetty osoite (LAA)

Jos käytät Windows NT:n kuormituksen tasauspalvelua (WLBS), NLB:tä tai muita sen luokan ohjaimia, voit mukauttaa ryhmän käyttämää MAC-osoitetta.

Voit mukauttaa MAC-osoitetta kirjoittamalla LAA-kenttään ryhmän uuden MAC-osoitteen. Varmista, että uusi osoite on välillä  0000 0000 0001 - FFFF FFFF FFFD

Poikkeukset:

o	Älä käytä monilähetysosoitetta (vähiten merkittävä korkean tavun bitti (LSB) = 1). Esimerkiksi osoitteessa 0Y123456789A "Y" ei voi olla pariton luku. (Y:n täytyy olla 0, 2, 4, 6, 8, A, C tai E.)

o	Älä käytä pelkkiä nollia tai F-kirjaimia.

Voit palauttaa MAC-oletusosoitteen poistamalla osoitteen Paikallisesti määritetty osoite -kentästä ja valitsemalla sitten OK tai napsauttamalla Palauta oletusarvot.

HUOMAUTUS: Intel(R) PROSet II käyttää joko:

•	Ryhmän paikallisesti määritettyä osoitetta (LAA), jos ryhmässä on LAA määritetty, tai

•	ensisijaisen sovittimen pysyvää MAC-osoitetta, jos ryhmässä ei ole paikallisesti määritettyä osoitetta (LAA).

Mikä tahansa ensisijaisen sovittimen LAA-asetus korvataan ryhmän LAA:lla, jos ryhmässä on LAA määritetty.

STP- ja SFT-ryhmät:  Jos ryhmän ensisijaista (aktiivista) sovitinta muutetaan, ryhmä ladataan uudelleen käyttämällä uuden ensisijaisen sovittimen MAC-osoitetta. Vastaavasti jos paikallisesti määritettyä osoitetta (LAA) muutetaan, ryhmä ladataan uudelleen ja ryhmällä on uusi MAC-osoite. Molemmat toiminnot, jos ne suoritetaan SFT-ryhmässä palvelimen ollessa aktiivinen verkossa, aiheuttavat sen, että ryhmä ei voi tilapäisesti viestiä, ennen kuin kaikki verkon laitteet päivittävät ARP-taulukkonsa uuden ensisijaisen sovittimen osoitetiedoilla. ARP-välimuistin aikakatkaisujaksolla määrittää ARP-taulukon päivitysajan. Tämä parametri on käytettävissä joissakin reitittimissä ja käyttöjärjestelmissä. ARP-välimuistin aikakatkaisujakson mukaan ryhmä voi olla poissa käytöstä enintään 10 minuuttia.

NumRxPackets

Määrittää vastaanoton kuvaajat. Nämä ovat datasegmenttejä, joiden avulla sovitin voi varata vastaanotetut paketit muistiin. Kukin vastaanotettu paketti vaatii yhden vastaanoton kuvaajan ja kukin kuvaaja käyttää 2 kt muistia.

Haluat ehkä suurentaa Vastaanoton kuvaajat -asetusta, jos huomaat vastaanottoliikenteen suorituskyvyn heikentyvän merkitsevästi. Jos vastaanoton suorituskyvyssä ei ole ongelmia, käytä oletusasetusta.

Oletusasetus: Oletusasetus. Kun oletusarvo on käytössä, Intel PROSet II automaattisesti laskee parhaan arvon tälle asetukselle ryhmän kokoonpanon ja laitteisto-ominaisuuksien perusteella.

Suositus: 250

Alue: 32 - 512, vaihe 16

NumTxPackets

Määrittää lähetyksen kuvaajien määrän. Lähetyksen kuvaajat ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii yhden tai useamman lähetyksen kuvaajan.

Haluat ehkä lisätä lähetyksen kuvaajia, jos huomaat lähetyksen suorituskyvyssä ongelmia. Vaikka lähetyksen kuvaajien määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen kuvaajat kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä oletusasetusta.

Oletusasetus:  Oletusasetus. Kun oletusarvo on käytössä, Intel PROSet II automaattisesti laskee parhaan arvon tälle asetukselle ryhmän kokoonpanon ja laitteisto-ominaisuuksien perusteella.

Alue: 16 - 512, vaihe 16

Vastaanottokuormituksen tasaus

Oletusarvon mukaan ALB-ryhmät tasaavat kaiken lähetysliikenteen kuormituksen. Tällä asetuksella voidaan lisäksi ottaa vastaanottokuormituksen tasaus käyttöön tai poistaa se käytöstä.

Jos vastaanottokuormituksen tasaus on poissa käytöstä, ensisijainen sovitin vastaanottaa kaiken liikenteen.

Jos vastaanottokuormituksen tasaus on käytössä:

•	Ensisijainen sovitin vastaanottaa muun kuin IP-liikenteen

•	Suurimmalla nopeudella toimivat aktiiviset sovittimet vastaanottavat IP-liikenteen.

Jos käytössä on esimerkiksi kolmen sovittimen ryhmä, jossa on ensisijaiseksi sovittimeksi määritetty yhden gigabitin sovitin ja kaksi Intel(R) PRO/100 -sovitinta:

•	Gigabitin sovitin vastaanottaa reitittämättömän IP-liikenteen, koska se on ensisijainen sovitin.

•	Gigabitin sovitin vastaanottaa IP:n, koska se on suurinopeuksinen sovitin.

•	Intel(R) PRO/100 -sovittimet eivät osallistu vastaanottokuormituksen tasaukseen.

Oletusasetus: Käytössä alkuperäisten asetusten jälkeen; Poissa käytöstä, jos ryhmä luodaan ensin eri ryhmätilassa ja sen jälkeen vaihdetaan ALB-tilaan

Alue: Käytössä, Pois käytöstä

Palauta oletus -painike

Tällä painikkeella palautetaan valitun Lisäasetus-vaihtoehdon oletusarvo.  Katso oletusarvot yllä olevista asetuksista.  (Tämä vaihtoehto ei ole käytettävissä jokaiselle asetukselle.)

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


PRO/100- ja PRO/100+ -sovittimien diagnostiikka
Intel(R) PRO/100-, PRO/100+- ja PRO/100 S -sovittimien diagnostiikka

HUOMAUTUS: Jos diagnostiikka on käynnissä ja valitset Lopeta, diagnostiikka pysähtyy lyhyen viiveen jälkeen. Kun diagnostiikka on pysähtynyt, OK-painike on käytettävissä.

Perusdiagnostiikka

Sovittimen diagnostiikka antaa joustavuutta testata yhden kohteen tai useita kohteita.

HUOMAUTUS:  Jos tietokoneessa on käytössä Windows 98, sovittimen Virranhallinta on ehkä poistettava käytöstä ennen diagnostiikan suorittamista. Katso tarkemmat tiedot kohdasta Virranhallinnan poistaminen käytöstä.

Ohjausrekisterit

Testaa rekisterit, joita ohjelmisto käyttää komentojen määrittämiseen ja lähettämiseen 8255x-ohjaimeen.

Jos hallintarekisterien testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.

Intel 8255x -ohjain

Suorittaa sisäisiä testejä 8255x-ohjaimessa varmistaen, että se toimii kunnolla.

Jos ohjaimen testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.

EEPROM

Lukee EEPROMin sisällön ja vahvistaa, että tarkistussumma on oikein. Tämä käyttää EEPROM-hallinta-/datarekisteriä, joka itse asiassa testaa rekisterin.

Jos EEPROM-testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.

Silmukka

Testaa sovittimen kyvyn lähettää ja vastaanottaa paketteja.

Jos Silmukka-testi epäonnistuu, vaihda sovitin ja suorita testi uudelleen. Jos testi epäonnistuu uuttakin sovitinta käytettäessä, tämä voi olla merkki siitä, että emolevy tai jokin muu väylän laite ei toimi oikein.

Linkki

Tarkistaa verkkoyhteyden ja sovittimen lähetys- ja vastaanottotoiminnon lähettämällä verkkoon 1000 valmistajakohtaista pakettia ja hakemalla samat paketit.

Jos linkkitesti epäonnistuu, varmista, että kaapeli on kytketty kunnolla sovittimeen ja linkkikumppaniin. Jos kaapeli on kunnolla kiinni, kokeile kytke kaapeli linkkikumppanin toiseen porttiin tai kokeile toista kaapelia.


PRO/100+ -sovittimien lisäasetukset
Intel(R) PRO/100 -sovitinsarjan lisäasetukset

Lisäasetukset-välilehden asetusten avulla voi mukauttaa sitä, miten sovitin käsittelee QoS (palvelun laatu) -paketinmerkintää, purkua ja muita ominaisuuksia. Käyttöjärjestelmän ja asennettujen sovittimien mukaan kaikki lisäominaisuudet eivät ehkä ole käytettävissä.

Lisäasetukset

Mukautuvat kehystenväliset ajat

Kompensoi Ethernet-pakettien liialliset yhteentörmäykset verkossa.  Oletusarvon mukaan tämä asetus on 0, jolloin toiminto on poissa käytöstä.

Suositeltava asetus (1) toimii parhaiten useimmissa tietokoneissa ja verkoissa mukautuen dynaamisesti verkkoliikennetilanteisiin. Dynaaminen tila on aktiivinen vain silloin, kun arvoksi on määritetty 1. Joissakin harvinaisissa tapauksissa voidaan ehkä saavuttaa parempi suorituskyky määrittämällä kehysten väli manuaalisesti. Arvon määrittäminen pakottaa staattisen välin pakettien välille.

Arvon kasvattaminen lisää lähetettävien kehysten välistä viivettä.

Tuetut sovittimet	Kaikki
Oletus	0: pois käytöstä
Alue	0-255

Mukautuva linkin palaute

Nopeuttaa järjestelmän käynnistymistä ohittamalla verkkoyhteyden vaatimat käynnistysrutiinit, kun kaapeli on irrotettuna sovittimesta. Tämä vähentää merkittävästi tietokoneen käynnistymiseen tarvittavaa aikaa.

Kun Mukautuva linkin palaute Intelin Ethernet-ohjaimille on käytössä ja verkkokaapelia ei ole liitetty RJ-45-porttiin, verkkoyhteys poistetaan käytöstä. Keltainen varoituskuvake tulee esiin verkkoyhteyden viereen Laitehallinnassa.

Ota verkkoyhteys uudelleen käyttöön liittämällä verkkokaapeli RJ-45-porttiin ja käynnistämällä tietokone uudelleen.

Tuetut sovittimet	Vain Mobile (CardBus) -tuotteet. Ei käytettävissä jokaisessa sovitinmallissa.
Oletus	Pois päältä
Suositus	Päälle
Alue	Päälle, Pois päältä
HUOMAUTUS: Adaptive Link Response (ALR) ei toimi, kun langaton sovitin on aktiivinen järjestelmässä.

Mukautuva suorituskyvyn hienosäätö

Määrittää sovittimen vastaanottamien kehysten määrän ennen keskeytyksen liipaisemista. Normaalissa toiminnassa sovitin luo keskeytyksen aina, kun vastaanotetaan kehys. Keskeytysten vähentäminen tehostaa suorittimen käyttöä.

Siirrä liukusäädin kohtaan Sovittimen enimmäiskaistanleveys, kun haluat saada keskeytyksen kehystä kohti. Tämä kasvattaa sovittimen kaistanleveyttä, mutta se saattaa lisätä suorittimen käyttöä ja hidastaa tietokoneen toimintaa. Siirrä liukusäädin kohtaan CPU:n enimmäiskäyttö, kun haluat lisätä sovittimen vastaanottamien kehysten määrää ennen keskeytyksen muodostamista. Tämä tehostaa suorittimen käyttöä, mutta voi pienentää sovittimen kaistanleveyttä. Oletusasetus toimii hyvin useimmissa tietokoneissa.

Tuetut sovittimet	Kaikki

Mukautuva tekniikka

Ottaa käyttöön sovitinohjaimen mikrokoodin tai poistaa sen käytöstä. Mikrokoodi optimoi suorituskykyä käyttöjärjestelmäympäristön perusteella.

Varmista paras mahdollinen suorituskyky jättämällä Mukautuva tekniikka käyttöön.

Kun suoritat sovittimen yhteensopivuuden vianmääritystä, haluat ehkä poistaa Mukautuvan tekniikan käytöstä.  Mukautuvan tekniikan poistaminen käytöstä poistaa käytöstä myös lähetyksen valvontalohkot ja mukautuvan suorituskyvyn hienosäädön.

Tuetut sovittimet	Kaikki
Oletus	Päälle
Alue	Päälle, Pois päältä
Mukautuva lähetyskynnys

Määrittää tavujen määrän, jonka sovitin säilyttää lähetyspuskurissa ennen lähetystä. Jos esimerkiksi Mukautuva lähetyskynnys -arvo on 100, sovitin säilyttää 100 tavua (800 bittiä) puskurissaan ennen datan lähettämistä.

•	Mukautuvan lähetyskynnyksen arvon kasvattaminen heikentää lähetyksen suorituskykyä, mutta voi vähentää alikuormitusta.

•	Mukautuvan lähetyskynnyksen arvon pienentäminen parantaa lähetyksen suorituskykyä, mutta voi lisätä alikuormitusta. Tämän arvon pienentäminen mahdollistaa sovittimen aikaiset lähetykset.

Sovitin käyttää Mukautuva lähetyskynnys -arvoa vain lähtöpisteenään. Jos sovitin pystyy saavuttamaan paremman lähetyksen suorituskyvyn pienempää arvoa käyttämällä, se käyttää automaattisesti pienempää arvoa.

Voit määrittää sovittimen ensin lähettämään täydet Ethernet-kehykset ja sitten sovittamaan arvon parhaan suorituskyvyn saavuttamista varten, määrittämällä arvoksi 190. Jos lähetyksen suorituskyky heikentyy huomattavasti käytettäessä arvoa 190, määritä Kynnysarvo-asetukseksi 16 ja suurenna arvoa vähitellen.

Tuetut sovittimet	Kaikki
Oletus	200
Suositus	• Jos tietokoneessa on useita väylänhallintakortteja tai suuri latenssi, tämän arvon on oltava vähintään 200. • Jos tietokoneessa on yksi väylänhallintakortti, tämän arvon tulee olla 12.
Alue	0-200

Perusyhteys resurssien puuttuessa

Säilyttää verkkoyhteyden, vaikka järjestelmässä ei ole kaikkien lisäasetusten suorittamiseksi tarvittavia resursseja. Tällaisia lisäasetuksia ovat esimerkksi IPSec-purku ja Suuren lähetyksen purku. Lisäasetustoiminnot palautuvat vain silloin, kun tietokone käynnistetään uudelleen.

Voit tunnistaa resurssiongelmat järjestelmälokista. Vähissä olevista järjestelmäresursseista aiheutuvat virheet näkyvät järjestelmälokissa.

Tuetut sovittimet	Kaikki
Oletus	Käytössä
Suositeltava arvo	Käytössä
Alue	Käytössä, Pois käytöstä
Yhdistetyt puskurit

Optimoi lähetyksen suorituskykyä mukauttamalla yhdistettyjen puskurien määrää. Näiden puskurien avulla sovitin voi yhdistää datasegmenttejä ennen paketin lähetystä.

Yhdistettyjen puskurien asetuksen on oltava määritetty toimimaan yhdessä lähetyksen kuvaajien asetuksen kanssa. Yhdistettyjen kuvaajien asetuksen tulee olla 30 - 50 % lähetyksen kuvaajista. Jos yhdistettyjen puskurien asetusta ei muuteta vastaamaan lähetyksen kuvaajien asetusta, lähetyksen suorituskyky ei ehkä parane.

Yhdistetyt puskurit -asetus lisää huomattavasti lähetyksen suorituskykyä Windows NT 4.0 -tietokoneissa. Se parantaa lähetyksen suorituskykyä myös Windows 98- ja 2000 -tietokoneissa.

Tuetut sovittimet	Kaikki
Oletus	8
Suositeltava arvo	8
Alue	1-32

PME käyttöön

Ottaa käyttöön tai poistaa käytöstä sovittimen Herätys-ominaisuudet tietokoneissa, joissa on käytössä vanha Advanced Power Management (APM) -ominaisuus. Herätyksen avulla sovitin siirtyy pois valmius- tai virrankatkaisutilasta vastaanottaessaan tietyt pakettityypit, kuten ARP-paketit.

•	Tämän toiminnon poistaminen käytöstä poistaa käytöstä kaikki Herätys-asetukset tietokoneissa, jotka käyttävät vanhaa virranhallintaominaisuutta.

•	Kun tämä toiminto on käytössä, sovittimen sallitaan vastata Herätys-signaaliin. Jos haluat määrittää sovittimen vastaamaan tiettyihin pakettityyppeihin, katso Herätys-asetuksia koskevia tietoja jäljempänä tässä ohjeessa.

•	Laitteisto-oletus-arvo pakottaa sovittimen määrittämään Herätys-ominaisuudet järjestelmän laitteiston perusteella.

•	Ei toimintaa -arvo sallii sovittimen käyttää käyttöjärjestelmän oletusta.

Jos haluat poistaa kaikki Herätys-asetukset käytöstä, poista tämä toiminto käytöstä. Valitse muussa tapauksessa asetukseksi Ei toimintaa.

Tuetut sovittimet	82559-pohjaiset sovittimet. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Vuonohjaus

Mahdollistaa sovittimien liikenteen tehokkaan säätelyn.

•	Sovittimet luovat vuonohjauskehyksiä, kun niiden vastaanottojonot saavuttavat ennalta määritetyn rajan. Vuonohjauskehysten luominen viestittää lähettäjälle, että lähetystä on hidastettava.

•	Sovittimet vastaavat vuonohjauskehyksiin keskeyttämällä pakettien lähettämisen vuonohjauskehyksen määrittämäksi ajaksi.

Kun sovittimien sallitaan säätää pakettien lähetysnopeutta, vuonohjaus auttaa estämään pakettien ohittamista.

HUOMAUTUS: Jotta sovittimet voisivat hyödyntää tätä ominaisuutta, linkkikumppaneiden on tuettava vuonohjauskehyksiä.

Tuetut sovittimet	82540- ja 82544-pohjaiset, lähetys ja vastaanotto. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Luo vuonohjauskehykset ja vastaa niihin.
Alue	Pois päältä, Vastaa, Luo, Luo ja vastaa, Laitteisto-oletus

Linkkipohjainen sisäänkirjaus

Ottaa käyttöön mukautuvan linkin palautteen (Adaptive Link Response, ALR). Tämä ominaisuus tarkistaa LinkBasedLoad-parametriarvon perusteella PhyLink-tilan ja palauttaa onnistumisen tai epäonnistumisen arvon.

Tuetut sovittimet	Kaikki
Oletus	Pois käytöstä (0)
Alue	Käytössä, Pois käytöstä

Linkkinopeus ja suuntaisuus

Määrittää sovittimen tiedonsiirtoasetukset.

Jotta sovitin toimisi määritettyä asetusta käyttämällä, myös linkkikumppanin on toimittava määritettyä asetusta käyttämällä. Jos esimerkiksi sovitin on määritetty käyttämään asetusta 100 Mbps/kaksisuuntainen, linkkikumppanin on myös voitava toimia käyttämällä asetusta 100 Mbps/kaksisuuntainen. Vastaavasti jos sovitin on määritetty käyttämään automaattista tunnistusta, linkkikumppanin on tuettava automaattista neuvottelua.

Tuetut sovittimet	Kaikki Intel(R) PRO/100 -sovittimet
Oletus	Automaattinen tunnistus
Suositeltava arvo	Automaattinen tunnistus
Alue	• Automaattinen tunnistus - Sovitin neuvottelee linkkikumppaneidensa kanssa yhteensopivat nopeus- ja suuntaisuusasetukset. • 10 Mbps/yksisuuntainen - Sovitin pakottaa yhteyden nopeudeksi 10 Mbps ja suorittaa lähetys- ja vastaanottotoiminnot erikseen. Kun sovitin vastaanottaa paketteja, se ei voi lähettää paketteja. Kun se lähettää paketteja, se ei voi vastaanottaa paketteja. • 10 Mbps/kaksisuuntainen - Sovitin pakottaa yhteyden nopeudeksi 10 Mbps ja lähettää sekä vastaanottaa samanaikaisesti. Tämä parantaa sovittimen suorituskykyä. Valitse tämä tila käyttöön vain silloin, kun käytössä on kaksisuuntainen kytkin. • 100 Mbps/yksisuuntainen - Sovitin pakottaa yhteyden nopeudeksi 100 Mbps ja suorittaa lähetys- ja vastaanottotoiminnot erikseen. Kun sovitin vastaanottaa paketteja, se ei voi lähettää paketteja. Kun se lähettää paketteja, se ei voi vastaanottaa paketteja. • 100 Mbps/kaksisuuntainen - Sovitin pakottaa yhteyden nopeudeksi 100 Mbps ja lähettää sekä vastaanottaa samanaikaisesti. Tämä parantaa sovittimen suorituskykyä. Valitse tämä tila käyttöön vain silloin, kun käytössä on kaksisuuntainen kytkin.

Paikallisesti määritetty osoite (LAA)

Ohittaa sovittimen MAC-osoitteen. Voit määrittää uuden verkko-osoitteen kirjoittamalla Arvo-ruutuun 12-numeroisen heksadesimaaliluvun.

Tuetut sovittimet	Kaikki
Oletus	Ei mitään
Alue	0000 0000 0001 - FFFF FFFF FFFD Poikkeukset: • Älä käytä monilähetysosoitetta (vähiten merkitsevä korkean tavun bitti = 1).  • Älä käytä pelkkiä nollia tai F-kirjaimia.
HUOMAUTUS: Ryhmässä Intel(R) PROSet II käyttää joko:

•	Ryhmän paikallisesti määritettyä osoitetta (LAA), jos ryhmässä on LAA määritetty, tai

•	ensisijaisen sovittimen pysyvää MAC-osoitetta, jos ryhmässä ei ole paikallisesti määritettyä osoitetta (LAA).

Intel PROSet II ei käytä sovittimen paikallisesti määritettyä osoitetta (LAA), jos sovitin on ensisijainen ryhmässä ja ryhmässä on LAA.

Windows 98SE -käyttäjät:

Jos haluat käyttää oletusosoitetta käytettyäsi manuaalisesti määritettyä osoitetta, suorita yksi seuraavista toimenpiteistä:

•	Valitse Verkon ominaisuudet -valintaikkunan Lisäasetukset-välilehdestä Paikallisesti määritetty osoite ja muuta sen arvoksi 0. Ota asetus käyttöön napsauttamalla OK.

•	Napsauta Intel PROSet II:ssa Lisäasetukset-välilehteä, napsauta sitten Palauta oletusarvot tai poista kaikki merkit Arvo-kentästä. Ota asetus käyttöön napsauttamalla OK.

Kirjaa linkin tilatapahtuma lokiin

Tällä asetuksella otetaan käyttöön ja poistetaan käytöstä linkin tilan muutosten kirjaaminen. Jos se on käytössä, linkin toiminnan muutostapahtuma tai linkin menetyksen muutostapahtuma luo viestin, joka näkyy järjestelmän tapahtumalokissa. Järjestelmänvalvojat näkevät tapahtumaviestin järjestelmän tapahtumalokista.

Seuraavat tapahtumat kirjataan:

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Tuetut sovittimet	Kaikki
Oletus	Ota käyttöön
Alue	Käyttöön, Pois käytöstä
Purkaminen

Säästää CPU:n kierroksia, jos se on asetettu vastaamaan käyttämääsi sovitinta.

•	Jos käytät suojattua purkamista Intel(R) PRO/100 S -sovittimen kanssa, käytä IP-suojausasetusta.

•	Jos et käytä suojattua purkamista Intel(R) PRO/100 S -sovittimen kanssa, käytä Tarkistussumma-asetusta.

•	Käytä muille sovitintyypeille asetusta Ei mitään.

Tuetut sovittimet	Kaikki
Tuetut käyttöjärjestelmät	Windows 98SE, Windows Me, Windows NT, Windows 2000 ja Windows XP
Oletus	Intel PRO/100 S: IP-suojaus Intel PRO/100 S ilman suojausta: Tarkistussumma
Alue	Ei mitään, IP-suojaus, Tarkistussumma (sovittimen tyypin mukaan jotkin asetukset eivät ehkä ole käytettävissä)
Lisätietoja IP-suojauksesta on kohdassa IPSec käyttöön.

PCI-väylän suorituskyky

Antaa sovittimen joko käyttää parasta menetelmää pakettien lähetykseen tai pakottaa aina käyttöön pakettien yhdistämisen.

•	Kun PCI-väylän suorituskyky -toiminto on poissa käytöstä, sovitin käyttää sitä lähetysmenetelmää, jolla saavutetaan paras mahdollinen suorituskyky. Jos pakettien yhdistäminen tuottaa parhaan lähetyksen suorituskyvyn, sovitin automaattisesti yhdistää paketit.

•	Kun PCI-väylän suorituskyky -asetus on käytössä, sovitin pakottaa käyttämään pakettien yhdistämistä.

Poista PCI-väylän suorituskyky -asetus käytöstä, jos pakettien lähetyksen suorituskyvyssä ei ole ongelmia. Jos alikuormitus on suurta tai PCI-väylässä on suorituskykyongelmia, ota tämä asetus käyttöön.

Tuetut sovittimet	Kaikki
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Prioriteettitason määritys

Määrittää QoS-merkittyjen pakettien prioriteettitason katkaisurajan.

Jos tietokoneessa on 802.1p/802.1Q -merkintä (QoS) käytössä, voit määrittää prioriteettijonojen palvelemat prioriteettitasot (0 - 7). Intel-sovittimissa on kaksi prioriteettijonoa: suuri ja pieni. Oletusarvon mukaan paketit, joiden arvo on välillä 0 - 3, lähetetään pienen prioriteetin jonossa ja paketit, joiden arvo on välillä 4 - 7, lähetetään suuren prioriteetin jonossa.

Prioriteettitason määritys -kohtaan annettu arvo on katkaisuraja suuren ja pienen prioriteettijonon välillä. Jos esimerkiksi määrität arvoksi 6, paketit, joiden prioriteetti on välillä 0 - 5, lähetetään pienen prioriteetin jonossa ja paketit, joiden arvo on välillä 6 - 7, lähetetään suuren prioriteetin jonossa.

Tuetut sovittimet	Kaikki
Oletus	4 • Paketit, joiden arvo on välillä 0 - 3, lähetetään pienen prioriteetin jonossa.  • Paketit, joiden arvo on välillä 4 - 7, lähetetään suuren prioriteetin jonossa.
Alue	0-7

QoS (802.3ac) -paketinmerkintä

Ottaa käyttöön tai poistaa käytöstä IEEE 802.1p/802.1Q -merkinnän prioriteettisuodattimille, jotka olet määrittänyt Windows* 2000:n, XP:n tai Prioriteettipaketin  kautta. Tämän asetuksen on oltava Käytössä, jotta prioriteettipakettisuodattimet toimivat kunnolla.

Jos olet määrittänyt suodattimet käyttäen 802.1p/Q -merkintää, mutta tämä asetus on Pois käytöstä, vastaavat paketit priorisoidaan silti käyttäen toimintoa Intelin High Priority Queue (HPQ).

Tuetut sovittimet	82550, 82558 ja 82559-pohjaiset tuotteet. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä
Vastaanottopuskurit

Määrittää puskurien määrän, jota ohjain käyttää kopioidessaan tietoja muistiin.

Verkon kuormituksen ollessa suuri vastaanottopuskurien lisääminen voi parantaa suorituskykyä. Haittapuolena on kuitenkin se, että tämä lisää ohjaimen käyttämää järjestelmämuistin määrää. Muissa tapauksissa tämän arvon muuttaminen voi huonontaa järjestelmän suorituskykyä.

Tuetut sovittimet	Kaikki
Oletus	Oletusarvo vaihtelee valittujen ominaisuuksien mukaan.
Suositeltava arvo	• Yksi sovitin Windows NT:ssä: 32 • Yksi sovitin käyttöjärjestelmissä Windows 98, Windows Me, Windows 2000 ja Windows XP: 48 • Ryhmitetty sovitin: 250 • IPSec-toiminnon ja/tai monien toimintojen käyttäminen: 350
Alue	8-1024

Lähetä uudelleen kehystenvälinen aika

Lisää kehysten uudelleenlähetysten välistä viivettä. Vaikka sovittimet käyttävät sisäänrakennettua Ethernet-algoritmia kehysten lähettämiseksi uudelleen törmäysten jälkeen, viiveen kasvattaminen voi parantaa verkon suorituskykyä, jos verkossa on epätavallisen suuri määrä törmäyksiä.

Tuetut sovittimet	Vain tietyt sovittimet tukevat tätä ominaisuutta
Oletus	6
Alue	6-15

Suojaussidokset

Määrittää samanaikaisten suojaussidosten määrän, joka voidaan purkaa sovittimen apusuorittimeen. Suojaussidos on tiedonsiirtoistunto toisen tietokoneen kanssa, jossa on käynnissä Intel(R) Packet Protect tai muu IP-suojausohjelmisto.

Jos tietokone pystyy tukemaan oletusasetusta useampia suojaussidoksia kuin oletusmääritys, suurenna tätä arvoa. Ota huomioon, että suojaussidosten määrän lisääminen lisää sovittimen muistin kulutusta.

Tuetut sovittimet	Intel(R) PRO/100 S
Oletus	Asiakas: 64 Palvelin: 1000
Alue	1-5000

Älykäs virran sammuttaminen

Sallii sovittimen vähentää virrankulutusta, kun LAN-kaapeli on irrotettuna sovittimesta. Kun sovitin muodostaa jälleen kelvollisen linkin, sovittimen virrankäyttö palaa normaaliin tilaan (täysi virrankäyttö).

Tuetut sovittimet	82559-pohjaiset mobile-sovittimet ja uudemmat.
Oletus	Käytössä
Suositeltava arvo	Käytössä
Alue	Käytössä, Pois käytöstä
Tekniset tiedot

Lähetyksen valvontalohkot

Määrittää lähetyksen valvontalohkojen määrän. Lähetyksen valvontalohkot ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii vähintään yhden lähetyksen valvontalohkon.

Haluat ehkä lisätä lähetyksen valvontalohkoja, jos huomaat mahdollisen ongelman lähetyksen suorituskyvyssä. Vaikka lähetyksen valvontalohkojen määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen valvontalohkot kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä oletusasetusta 16.

Tuetut sovittimet	Kaikki
Oletus	16 tai 32 sovittimen vaatimusten mukaan
Alue	8-64
Herätys linkin muutoksella

Siirtää tietokoneen valmiustilasta toimintatilaan, jos verkkoliitäntä muodostaa linkin tietokoneen valmiustilan aikana. Tämän ominaisuuden voi ottaa käyttöön, sen voi poistaa käytöstä tai käyttöjärjestelmän voi sallia käyttää oletusasetustaan.

Tuetut käyttöjärjestelmät	Windows 9x, Windows 2000, Windows XP
Alue	Pois käytöstä, Pakotettu, Käyttöjärjestelmäriippuvainen
Oletus	Pois käytöstä
Herätysasetukset

Nämä asetukset liittyvät ominaisuuksiin, jotka ovat joko käyttöjärjestelmän tai Intel(R) PROSet II -ohjelman aktivoimia. Windowsin version mukaan ominaisuudet toimivat eri tavoin tai niitä ei tueta ollenkaan.

•	Seuraavat Windows-versiot tukevat Herätys asetuksilla -toimintoa: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP* 64 bit Edition ja Windows XP Professional.

•	Seuraavat Windows-versiot eivät tue mitään Herätys asetuksilla -toimintoa:  Windows 98 retail ja Windows NT 4.0.

HUOMAUTUS: Vain Intel(R) PRO/100+ Management -sovittimet ja -palvelinsovittimet sekä Intel(R) PRO/100 S -sovittimet tukevat Herätys asetuksilla -ominaisuutta.

Herätys asetuksilla -toiminnon ottaminen käyttöön käyttöjärjestelmässä

Seuraavat Herätys-paketit vaativat, että Herätys asetuksilla -toiminto on otettu käyttöön käyttöjärjestelmässä:

•	Herätys ARPilla

•	Herätys ohjatulla paketilla

•	Herätys NBT-kyselyllä

Jotta sovitin vastaista näihin Herätys-paketteihin, Herätys asetuksilla -toiminnon on oltava käytössä käyttöjärjestelmässä. Voit ottaa Herätys asetuksilla -toiminnon käyttöön siirtymällä Laitehallintaan ja ottamalla käyttöön Salli tämän laitteen palauttaa tietokone valmiustilasta -asetuksen. Tämä asetus löytyy seuraavasti:

1.	Valitse Käynnistä > Ohjauspaneeli.
Ohjauspaneeli-ikkuna avautuu.

2.	Kaksoisnapsauta Järjestelmä.
Näyttöön tulee Järjestelmä-valintaikkuna.

3.	Valitse Laitteisto-välilehti ja valitse sitten Laitehallinta-painike.
Näyttöön tulee Laitehallinta-ikkuna.

4.	Kaksoisnapsauta sovitinta, jossa haluat ottaa käyttöön herätysasetukset.
Näyttöön tulee Ominaisuudet-valintaikkuna.

5.	Valitse Virranhallinta-välilehti.

6.	Ota Herätys asetuksilla -toiminto käyttöön sovittimessa valitsemalla Salli tämän laitteen palauttaa tietokone valmiustilasta -asetus.

Herätysasetusten määrittäminen

1.	Valitse Intel PROSet II:ssa Lisäasetukset-välilehti.

2.	Valitse Asetus-luetteloruudusta Herätys asetuksilla.

3.	Valitse Arvo-luettelosta haluamasi herätysasetus.

4.	Valitse OK tai Käytä.

Käytettävissä olevat asetukset

Intel PROSet II:ssa käytettävissä olevat herätysasetukset:

Asetus	Kuvaus
Pois käytöstä	Sovitin ei käytä herätysasetuksia.
Herätys taikapaketilla	Sallii sovittimen herätä vasteena taikapaketin vastaanottoon. Taikapaketti on paketti, joka sisältää 16 peräkkäistä kopiota vastaanottavan sovittimen Ethernet-osoitteesta. Kun määrität tämän toiminnon, Intel PROSet II ohittaa käyttöjärjestelmän arvon tälle toiminnolle.
Herätys ohjatulla paketilla	Sallii sovittimen herätä, kun se vastaanottaa Ohjatun paketin, joka on sovittimen MAC-osoitteeseen lähetetty yksittäislähetyspaketti.  Protokollan on otettava tämä herätysmenetelmä käyttöön ohjaimessa. Tämän ominaisuuden poisto käytöstä ilmoittaa ohjaimelle, että se jättää huomiotta kaikki protokollan pyynnöt tämän herätysmenetelmän käyttöönottamiseksi.
Herätys taikapaketilla ja ohjatuilla paketeilla	Sovitin herättää järjestelmän vastaanottaessaan taikapaketin tai ohjatun paketin.
Käyttöjärjestelmän ohjaama	Sallii käyttöjärjestelmän hallita kaikkia herätysasetuksia.

HUOMAUTUS: Jos yhdelle sovittimelle määritetään useita IP-osoitteita, käyttöjärjestelmä voi ARP-kuvioiden osalta edellyttää herättämistä kaikkiin määritettyihin osoitteisiin. Sovitin herätetään ainoastaan vasteena ARP-paketteihin, jotka kysyvät luettelon ensimmäistä IP-osoitetta.

HUOMAUTUS: Tietokonetta ei voi käynnistää sammutustilasta (S5) herätysasetuksia käyttämällä. Tätä tilaa hallitaan PME käyttöön -asetuksella, jota niin ikään voi käyttää Lisäasetukset-välilehdestä. Vaikka herätysasetukset olisikin poistettu käytöstä, PME käyttöön -asetus määrittää, voidaanko järjestelmä herättää S5-tilasta.

PME-asetukset toimivat niin kauan kuin sovittimen ohjain on käytössä. Kun ohjain on poistettuna käytöstä, laite kuitenkin palauttaa käyttöön laitteisto-oletusasetuksensa, joka ehkä sallii tietokoneen herättämisen sammutustilasta tai estää tämän.

Katso myös

Ryhmityksen lisäasetusten määrittäminen


Prioriteettipaketin yleiskatsaus
Intel(R)-prioriteettipaketin yleiskatsaus

Intel(R)-prioriteettipaketti on liikenteen priorisointiohjelma, jonka avulla voit määrittää suodattimet käsittelemään suuren prioriteetin liikennettä ennen normaalia liikennettä. Voit käyttää Intel-prioriteettipakettia määrittämään suodattimet, joiden avulla annetaan prioriteetti kriittisille sovelluksille.

Intel-prioriteettipaketti on erillinen apuohjelma Intel(R) PROSet II:sta.

Vaatimukset

Tuetut käyttöjärjestelmät	• Windows* XP* • Windows 2000 • Windows 98 • Windows NT SP5.0 tai uudempi
Tuetut sovittimet	Intel(R) PRO/100- ja PRO/1000 -sovitinsarjat
Intel-prioriteettipaketin asentaminen

1.	Aseta sovittimen CD tietokoneen CD-ROM-asemaan.
Automaattisen käynnistyksen näyttö tulee esiin.

2.	Sulje automaattisen käynnistyksen näyttö.

3.	Siirry Intelin CD:n WINDOWS/PRTPKT-kansioon.

4.	Asenna Intel-prioriteettipaketti kaksoisnapsauttamalla setup.exe.

5.	Seuraa näyttöön tulevia ohjeita prioriteettipaketin asennuksen suorittamiseksi.

Asennuksen jälkeen voit avata apuohjelman valitsemalla Käynnistä > Ohjelmat > Intel(R)-prioriteettipaketti II.

Verkkoliikenteen priorisointi

Intel-prioriteettipaketin avulla voit määrittää suodattimet lähettämään tietoja kriittisistä solmuista tai sovelluksista määrätyllä prioriteetilla. Priorisoimalla liikenteen verkon isännässä tai alkupisteessä, verkkolaitteet voivat perustaa välityspäätökset paketissa määritettyihin prioriteettitietoihin.

Intel-prioriteettipaketti priorisoi liikenteen suodattimien perusteella – parametrit, jotka määrität käytettäviksi lähteviin (lähetys) paketteihin. Käyttäessäsi ohjattua prioriteettipaketin suodatinta voit asettaa esimääritetyt tai mukautetut suodattimet solmuosoitteen (MAC), Ethernet-tyypin tai yhteyskäytännön ja portin eri ominaisuuksien mukaan. Prioriteettipaketilla voidaan priorisoida liikennettä kahdella eri tavalla: IEEE 802.1p -merkintä ja Intel -suuren prioriteetin jono.

IEEE 802.1p -merkintä

IEEE 802.1p on pakettien merkinnän IEEE-standardi prioriteettitasojen määrittämiseksi. Paketit merkitään neljällä (4) ylimääräisellä tavulla, mikä lisää paketin kokoa ja ilmaisee prioriteettitason. Kun nämä merkityt paketit lähetetään verkkoon, suurimman prioriteetin paketit lähetetään ensin. Prioriteettipaketin merkintä (kutsutaan myös nimellä Traffic Class Expediting) sallii sovittimen toimia muiden verkon elementtien kanssa (kytkimet, reitittimet) prioriteettipakettien välittämiseksi ensin. 802.1p-merkintä sallii sovellusten määrittää tietyt prioriteettitasot 0 (pieni) - 7 (suuri).

Määritettyäsi suodattimen Windows* 2000:ssa, XP:ssä tai Intel-prioriteettipaketissa, käynnistä Intel PROSet II ja ota käyttöön QoS-merkintä Lisäasetukset-välilehdestä.

HUOMAUTUS: IEEE 802.1p -merkintä lisää merkittyjen pakettien kokoa. Jotkin keskittimet ja kytkimet eivät tunnista isompia paketteja ja pudottavat ne. Tarkista keskittimen tai kytkimen dokumentaatiosta, tukevatko ne 802.1p:tä. Jos nämä laitteet eivät tue 802.1p:tä tai olet epävarma siitä, käytä suuren prioriteetin jonoa verkkoliikenteen priorisoimiseksi.

Tehokkaan IEEE 802.1p -merkinnän käytön vaatimukset:

•	Kaikkien 802.1p-merkittyjä paketteja vastaanottavien ja reitittävien tietokoneiden on tuettava 802.1p:tä.

•	Merkittyjä paketteja käsitteleviin tietokoneisiin asennettujen sovittimien on tuettava 802.1p-merkintää. Kaikki Intel(R) PRO/1000-, PRO/100+- ja PRO/100 S -sovittimet tukevat 802.1p:tä Intel(R) PRO/100B -sovittimet eivät tue sitä.

•	Sovitinta (sovittimia) ei voi määrittää sovitinryhmään.

•	Jos määrität VLAN-verkot tai paketinmerkinnän samaan sovittimeen, 802.1p/802.1Q-merkintä täytyy ottaa käyttöön Intel PROSet II:n Lisäasetukset-välilehdessä.

•	VLAN-verkot (802.1Q) ja priorisointi (802.1p) jakavat 802.3ac-merkinnän. Intel-sovittimet käyttävät 802.3ac-merkintää, kun VLAN-verkot ja/tai QoS-merkintä määritetään sovittimeen.

•	Jos sovitin määritetään VLAN-verkoille, kytkin-VLAN-verkon on tuettava samantyyppistä merkintää (802.3ac) kuin sovitin.

•	Jos sovitin määritetään priorisointia varten, jotkin kytkimet vaativat ei-oletus-VLAN-verkon kytkimeen merkinnän välittämisen käyttöönottamiseksi.


Suodatin

Lähtevässä (lähetettävässä) paketissa käytettävä parametri, joka määrittää, merkitäänkö paketti IEEE 802.1p:llä vai sijoitetaanko se Suuren prioriteetin jonoon.


IEEE 802.1p -määritys

IEEE-standardi pakettien merkitsemiseksi eri prioriteettitasoilla. Kun nämä paketit lähetetään verkkoon, suurimman prioriteetin paketit lähetetään ensin. Pakettien prioriteettimerkinnän avulla sovitin toimii toisten verkkolaitteiden kanssa paremman yleissuorituskyvyn saamiseksi.

IEEE 802.1p -merkintä on tehokas vain silloin kun verkkosi infrastruktuuri (kytkimet ja muut reititinlaitteet) tukee toimintoa. Jos infrastruktuuri ei tue IEEE 802.1p -merkintää tai olet epävarma siitä, voit priorisoida liikenteen käyttämällä Intelin suuren prioriteetin jonoa.


Suuren prioriteetin jono

Intel(R)-prioriteettipaketin käyttämä lähetysjono. High Priority Queue (HPQ) käsittelee suuren prioriteetin paketit.

HPQ on käytettävissä Intel(R) PRO/100 -sovittimissa, joissa on 82558-pohjaiset ohjaimet tai uudemmat. Lisätietoja ohjaimista on kohdassa Sovittimien tekniset tiedot.

Lisätietoja HPQ:sta on Intel-prioriteettipaketin online-ohjeessa.


Merkintä

Lisätietojen liittäminen pakettiin. IEEE 802.1p -merkintää käyttävään prioriteettipakettiin voidaan lisätä neljä lisätavua tietoja, jotka ilmaisevat paketin prioriteetin.


CardBus tunnistettu

Yhden sovittimen asennus

Jos asennat yhden Cardbus-sovittimen, valitse asennettava malli.

HUOMAUTUS: Jos Intel(R) PRO/100 Cardbus II -sovitin (vain LAN) on asennettu ja olet asentamassa Intel(R) PRO/100 LAN+Modem56 Cardbus II -sovitinta, toimi seuraavasti:

1.	Poista vain-LAN-sovittimen ohjaimet.

2.	Käynnistä tietokone uudelleen.

3.	Asenna LAN+Modem56 -sovittimen ohjaimet uudelleen.

Kahden sovittimen asennus

Jos olet asentamassa kahta CardBus-sovitinta ja toinen tai molemmat niistä ovat Intel PRO/100 LAN+Modem56 Cardbus II -sovittimia, valitse Intel(R) PRO/100 LAN+Modem56 Cardbus II.

Jos molemmat sovittimet ovat Intel PRO/100 Cardbus II -sovittimia (vain LAN), valitse Intel(R) PRO/100 Cardbus II.

PCI-sovittimet

Jos olet asentamassa PCI-sovitinta (esimerkiksi telakointiasemaan), valitse Intel(R) PRO PCI -sovitin.


CardBus-resurssit
CardBus-resurssien määrittäminen

Valitse verkkosovittimelle ja modeemille käytettävissä olevat resurssit.

Varmista, että valitut resurssit ovat yhteensopivia tietokoneesi kanssa:

Käynnistä Intel(R) PROSet II kaksoisnapsauttamalla Intel PROSet II -kuvaketta Ohjauspaneelissa.
 Intel PROSet II -ikkuna tulee näyttöön.

•	Jos resurssiristiriitoja ei ole, sovittimen tilatiedot näkyvät Yleiset-välilehdessä.

•	Jos toisen laitteen kanssa on resurssiristiriita, Intel PROSet II tuo näyttöön ohjeet sisältävän Vianmääritys-välilehden. Valitse eri resurssit noudattamalla näitä ohjeita.


Jumbokehykset

Jumbokehykset ovat suurempia kuin Ethernet-vakiokehykset. Kun Ethernet-kehysten koko on noin 1,5 kilotavua, jumbokehykset sisältävät jopa noin 16 kilotavua

Tilanteissa, joissa suurin osa liikennettä koostuu suurista paketeista ja lisälatenssia voidaan sallia, jumbokehykset voivat vähentää suorittimen käyttöä ja parantaa tehoa.

HUOMAUTUKSIA: Jumbokehyksiä tuetaan vain 1000 Mbps:llä. Jumbokehysten käyttäminen 10:llä tai 100 Mbps:llä voi aiheuttaa huonon suorituskyvyn tai linkin menetyksen. Jumbokehykset ovat tehokkaita vain TCP/IP-paketeissa.

Ennen aloittamista

Varmista seuraavat seikat:

•	Intel(R) PRO/1000 -sovitin on käynnissä 1000 Mbps:llä. Intel(R) PRO/100 -sovittimet eivät tue jumbokehyksiä.

•	Järjestelmä käyttää Windows* 2000:ta, XP:tä tai NT* 4.0:aa.

•	Verkkolaitteet tukevat jumbokehyksiä. Kun määrität jumbokehyksiä toisiin verkkolaitteisiin, ota huomioon, että verkkolaitteet laskevat jumbokehysten koot eri tavalla. Jotkin laitteet sisällyttävät otsikkotiedot kehyksen kokoon, kun taas toiset eivät toimi näin.

Jumbokehysten määrittäminen

•	Määritä yleisesti käytettävissä oleva pakettikoko käyttämällä Intel(R) PROSet II -ohjelmaa.

•	Määritä mikä tahansa muu pakettikoko antamalla arvo rekisteriin.

Jumbokehysten määrittäminen Intel(R) PROSet II -ohjelmassa

Jumbokehykset määritetään verkkoon kolmevaiheisesti.

Vaihe 1: Määritä sovitin tukemaan jumbokehyksiä:

1.	Käynnistä Intel(R) PROSet II.

2.	Valitse verkkokomponenttipuustasovitin, jonka haluat määrittää tukemaan jumbokehyksiä.

3.	Valitse Lisäasetukset-välilehti.

4.	Valitse Asetus-luettelosta Jumbokehykset.

5.	Valitse Arvo-ruudusta pakettikoko.

Sovitin on nyt määritetty tukemaan jumbokehyksiä.

Vaihe 2: Määritä verkkokytkimet tukemaan jumbokehyksiä. Katso yksityiskohtaiset lisätiedot kytkimen ohjeista.

Vaihe 3: Määritä palvelimet tukemaan jumbokehyksiä. Katso yksityiskohtaiset lisätiedot palvelimen ohjeista.

Jumbokehysten määrittäminen rekisterin avulla

Jumbokehykset määritetään verkkoon kolmevaiheisesti.

Vaihe 1: Määritä sovitin tukemaan jumbokehyksiä:

1.	Avaa Rekisterieditori. Valitse Käynnistä > Suorita. Kirjoita Avaa-ruutuun regedit.
Rekisterieditori käynnistyy.

2.	Siirry MaxFrameSize-rekisteriavaimeen.

3.	Anna kehyksen kooksi arvo väliltä 1415 ja 16128.

Sovitin on nyt määritetty tukemaan jumbokehyksiä.

Vaihe 2: Määritä verkkokytkimet tukemaan jumbokehyksiä. Katso yksityiskohtaiset lisätiedot kytkimen ohjeista.

Vaihe 3: Määritä palvelimet tukemaan jumbokehyksiä. Katso yksityiskohtaiset lisätiedot palvelimen ohjeista.


MiniPCI-sovittimet

MiniPCI-sovittimet toimivat erityisten kannettavien tietokoneiden kanssa, jotka tukevat MiniPCI-muotokerrointa. Nämä sovittimet tukevat samaa ominaisuusjoukkoa kuin tässä ohjetiedostossa kuvatut asiakassovittimet. Joihinkin MiniPCI-sovittimiin on myös integroitu tuotteen sisältämä modeemilaitteisto.

Jos tuotteessa on modeemi, katso tietoja modeemin määrittämisestä tietokoneen mukana toimitetuista ohjeista.

Katso myös:

Intel(R) PRO/100+ -sovittimien lisäasetukset


PRO/10+ -sovittimien lisäasetukset
Intel(R) PRO/10- ja PRO/10+-sovittimien lisäasetukset

Lisäasetukset-välilehden sisältämien asetusten avulla voit mukauttaa sitä, miten sovitin käsittelee linkkimuutoksia, puskureita, purkuja ja muita ominaisuuksia. Käyttöjärjestelmän ja asennettujen sovittimien mukaan kaikki seuraavat ominaisuudet eivät ehkä ole käytettävissä.

Lisäasetukset

Mukautuvat kehystenväliset ajat

Kompensoi Ethernet-pakettien liialliset yhteentörmäykset verkossa. Oletusarvon mukaan tämä asetus on 0, jolloin toiminto on poissa käytöstä. Suositeltava asetus (1) toimii parhaiten useimmissa tietokoneissa mukautuen dynaamisesti verkkoliikennetilanteisiin. Dynaaminen tila on aktiivinen vain silloin, kun arvoksi on määritetty 1. Joissakin harvinaisissa tapauksissa voidaan ehkä saavuttaa parempi suorituskyky määrittämällä kehysten väli manuaalisesti. Arvon määrittäminen pakottaa staattisen välin pakettien välille.

Arvon kasvattaminen lisää lähetettävien kehysten välistä viivettä.

Tuetut sovittimet	Kaikki
Oletus	1
Alue	0-255

Mukautuva tekniikka

Ottaa käyttöön sovitinohjaimen mikrokoodin tai poistaa sen käytöstä. Mikrokoodi optimoi suorituskykyä käyttöjärjestelmäympäristön perusteella.

Varmista paras mahdollinen suorituskyky jättämällä Mukautuva tekniikka käyttöön.

Kun suoritat sovittimen yhteensopivuuden vianmääritystä, haluat ehkä poistaa Mukautuvan tekniikan käytöstä.  Mukautuvan tekniikan poistaminen käytöstä poistaa käytöstä myös lähetyksen valvontalohkot ja mukautuvan suorituskyvyn hienosäädön.

Tuetut sovittimet	Kaikki
Oletus	Päälle
Alue	Päälle, Pois päältä
Mukautuva lähetyskynnys

Määrittää tavujen määrän, jonka sovitin säilyttää lähetyspuskurissa ennen lähetystä. Jos esimerkiksi Mukautuva lähetyskynnys -arvo on 100, sovitin säilyttää 100 tavua (800 bittiä) puskurissaan ennen datan lähettämistä.

•	Mukautuvan lähetyskynnyksen arvon kasvattaminen heikentää lähetyksen suorituskykyä, mutta voi vähentää alikuormitusta.

•	Mukautuvan lähetyskynnyksen arvon pienentäminen parantaa lähetyksen suorituskykyä, mutta voi lisätä alikuormitusta. Tämän arvon pienentäminen mahdollistaa sovittimen aikaiset lähetykset.

Sovitin käyttää Mukautuva lähetyskynnys -arvoa vain lähtöpisteenään. Jos sovitin pystyy saavuttamaan paremman lähetyksen suorituskyvyn pienempää arvoa käyttämällä, se käyttää automaattisesti pienempää arvoa.

Voit määrittää sovittimen ensin lähettämään täydet Ethernet-kehykset ja sitten sovittamaan arvon parhaan suorituskyvyn saavuttamista varten, määrittämällä arvoksi 190. Jos lähetyksen suorituskyky heikentyy huomattavasti käytettäessä arvoa 190, määritä Kynnysarvo-asetukseksi 16 ja suurenna arvoa vähitellen.

Tuetut sovittimet	Kaikki
Oletus	12
Suositus	• Jos tietokoneessa on useita väylänhallintakortteja tai suuri latenssi, tämän arvon on oltava vähintään 200. • Jos tietokoneessa on yksi väylänhallintakortti, tämän arvon tulee olla 12.
Alue	0-200

Perusyhteys resurssien puuttuessa

Säilyttää verkkoyhteyden, vaikka järjestelmässä ei ole tarpeeksi resursseja kaikkien lisäasetusten suorittamiseksi. Toiminnot, kuten IPSec-purku ja Suuren lähetyksen purku, jatkuvat vain silloin, kun resursseja on tarpeeksi. Vähissä olevien järjestelmäresurssien aiheuttamat virheet löytyvät järjestelmälokista.

Tuetut sovittimet	Kaikki
Oletus	Pois päältä
Suositeltava arvo	Päälle
Alue	Päälle, Pois päältä
Yhdistetyt puskurit

Optimoi lähetyksen suorituskykyä mukauttamalla yhdistettyjen puskurien määrää. Näiden puskurien avulla sovitin voi yhdistää datasegmenttejä ennen paketin lähetystä.

Yhdistettyjen puskurien asetuksen on oltava määritetty toimimaan yhdessä lähetyksen kuvaajien asetuksen kanssa. Yhdistettyjen kuvaajien asetuksen tulee olla 30 - 50 % lähetyksen kuvaajista. Jos yhdistettyjen puskurien asetusta ei muuteta vastaamaan lähetyksen kuvaajien asetusta, lähetyksen suorituskyky ei ehkä parane.

Yhdistetyt puskurit -asetus lisää huomattavasti lähetyksen suorituskykyä Windows NT 4.0 -tietokoneissa. Se parantaa lähetyksen suorituskykyä myös Windows 98- ja 2000 -tietokoneissa.

Tuetut sovittimet	Kaikki
Oletus	8
Suositeltava arvo	8
Alue	1-32
Vuonohjauksen vastaanotto

Sallii sovittimen vastaanottaa kaksisuuntaisen vuonohjauksen kehykset pysäyttämällä lähetyspolun. Lähetyspolku pysäytetään vastaanotetun vuonohjauksen kehyksessä määritetyksi ajaksi. Nämä asetukset hienosäätävät verkon suorituskykyä estämällä pakettien ohituksen.

Tuetut sovittimet	Tämä ominaisuus ei ehkä ole käytettävissä kaikissa sovitintyypeissä.
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Linkkipohjainen sisäänkirjaus

Ottaa käyttöön mukautuvan linkin palautteen (Adaptive Link Response, ALR). Tämä ominaisuus tarkistaa LinkBasedLoad-parametriarvon perusteella PhyLink-tilan ja palauttaa onnistumisen tai epäonnistumisen arvon.

Tuetut sovittimet	Kaikki
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Linkkinopeus ja suuntaisuus

Määrittää Intel(R) PRO/10+ -sovittimen linkkiasetukset.

Tuetut sovittimet	Kaikki
Oletus	Automaattinen tunnistus
Suositeltava arvo	Automaattinen tunnistus
Alue	• Automaattinen tunnistus - Sovitin neuvottelee kytkimen kanssa pakettien lähetys-/vastaanottotilan (joko yksisuuntainen tai kaksisuuntainen).  HUOMAUTUS:  Jotta kaksisuuntaisuuden tuki voitaisiin ottaa käyttöön määrittämällä Linkkinopeus ja suuntaisuus -asetuksen arvoksi Automaattinen tunnistus, käytössä on oltava automaattisesti neuvotteleva kytkin. • 10 Mbps/yksisuuntainen - Sovitin käyttää 10 Mbps:n nopeutta ja suorittaa yhden toiminnon kerrallaan. Se joko lähettää tai vastaanottaa. • 10 Mbps/kaksisuuntainen - Sovitin käyttää 10 Mbps:n nopeutta ja lähettää sekä vastaanottaa paketit samanaikaisesti. Tämä parantaa sovittimen suorituskykyä. Valitse tämä tila käyttöön vain silloin, kun käytössä on kaksisuuntainen kytkin.

Paikallisesti määritetty osoite

Ohittaa sovittimen MAC-osoitteen. Voit antaa uuden verkko-osoitteen kirjoittamalla tähän ruutuun 12-numeroisen heksadesimaaliluvun.

Tuetut sovittimet	Kaikki
Oletus	Ei mitään
Alue	0000 0000 0001 - FFFF FFFF FFFD Poikkeukset: • Älä käytä monilähetysosoitetta (vähiten merkitsevä korkean tavun bitti = 1).  • Älä käytä pelkkiä nollia tai F-kirjaimia.

PCI-väylän suorituskyky

Antaa sovittimen joko käyttää parasta menetelmää pakettien lähetykseen tai pakottaa aina käyttöön pakettien yhdistämisen.

•	Kun PCI-väylän suorituskyky -toiminto on poissa käytöstä, sovitin käyttää sitä lähetysmenetelmää, jolla saavutetaan paras mahdollinen suorituskyky. Jos pakettien yhdistäminen tuottaa parhaan lähetyksen suorituskyvyn, sovitin automaattisesti yhdistää paketit.

•	Kun PCI-väylän suorituskyky -asetus on käytössä, sovitin pakottaa käyttämään pakettien yhdistämistä.

Poista PCI-väylän suorituskyky -asetus käytöstä, jos pakettien lähetyksen suorituskyvyssä ei ole ongelmia. Jos alikuormitus on suurta tai PCI-väylässä on suorituskykyongelmia, ota tämä asetus käyttöön.

Tuetut sovittimet	Kaikki
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Prioriteettitason määritys

Määrittää QoS-merkittyjen pakettien prioriteettitason katkaisurajan.

Jos tietokoneessa on 802.1p/802.1Q -merkintä (QoS) käytössä, voit määrittää prioriteettijonojen palvelemat prioriteettitasot (0 - 7). Intel-sovittimissa on kaksi prioriteettijonoa: suuri ja pieni. Oletusarvon mukaan paketit, joiden arvo on välillä 0 - 3, lähetetään pienen prioriteetin jonossa ja paketit, joiden arvo on välillä 4 - 7, lähetetään suuren prioriteetin jonossa.

Prioriteettitason määritys -kohtaan annettu arvo on katkaisuraja suuren ja pienen prioriteettijonon välillä. Jos esimerkiksi määrität arvoksi 6, paketit, joiden prioriteetti on välillä 0 - 5, lähetetään pienen prioriteetin jonossa ja paketit, joiden arvo on välillä 6 - 7, lähetetään suuren prioriteetin jonossa.

Tuetut sovittimet	Kaikki
Oletus	4 • Paketit, joiden arvo on välillä 0 - 3, lähetetään pienen prioriteetin jonossa.  • Paketit, joiden arvo on välillä 4 - 7, lähetetään suuren prioriteetin jonossa.
Alue	0-7

Vastaanottopuskurit

Määrittää puskurien määrän, jota ohjain käyttää tietojen kopioimisessa yhteyskäytäntömuistiin.

Verkon kuormituksen ollessa suuri vastaanottopuskurien lisääminen voi parantaa suorituskykyä. Haittapuolena on kuitenkin se, että tämä lisää ohjaimen käyttämää järjestelmämuistin määrää. Muissa tapauksissa tämän arvon muuttaminen voi huonontaa järjestelmän suorituskykyä.

Tuetut sovittimet	Kaikki
Oletus	48
Suositeltava arvo	• Yksi sovitin käyttöjärjestelmissä Windows 98, Windows Me, Windows 2000 ja Windows XP: 48 • Yksi sovitin Windows NT:ssä: 32 • Ryhmitetty sovitin: 250
Alue	8-1024

Lähetä uudelleen kehystenvälinen aika

Lisää kehysten uudelleenlähetysten välistä viivettä. Vaikka sovittimet käyttävät sisäänrakennettua Ethernet-algoritmia kehysten lähettämiseksi uudelleen törmäysten jälkeen, viiveen kasvattaminen voi parantaa verkon suorituskykyä, jos verkossa on epätavallisen suuri määrä törmäyksiä.

Tuetut sovittimet	Kaikki
Oletus	10
Alue	6-15

Lähetyksen valvontalohkot

Määrittää lähetyksen valvontalohkojen määrän. Lähetyksen valvontalohkot ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii vähintään yhden lähetyksen valvontalohkon.

Haluat ehkä lisätä lähetyksen valvontalohkoja, jos huomaat mahdollisen ongelman lähetyksen suorituskyvyssä. Vaikka lähetyksen valvontalohkojen määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen valvontalohkot kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä suositeltua oletusasetusta 16.

Tuetut sovittimet	Kaikki
Oletus	32
Suositeltava arvo	16
Alue	8-64


PRO/1000 -linkin määrittäminen
Intel(R) PRO/1000 -linkin määrittäminen (vain kuparimallit)

VAROITUS:  Lähes kaikissa tapauksissa automaattisen neuvottelun on oltava käytössä. Jos poistat automaattisen neuvottelun käytöstä, varmista, että linkkikumppanin asetukset vastaavat sovittimen asetuksia. Sovitin ei toimi 1000 Mbps:n nopeudella, jos automaattinen neuvottelu on pois käytöstä.

Nopeuden ja suuntaisuuden määrittäminen:

1.	Voit mukauttaa automaattisen neuvottelun asetusta valitsemalla Linkin määritys -välilehdessä Käytössä- tai Pois käytöstä -asetuksen.

•	Kun automaattinen neuvottelu on käytössä, sovitin neuvottelee nopeuden ja suuntaisuuden linkkikumppaninsa kanssa.

•	Kun automaattinen neuvottelu on poissa käytöstä, sovitin on pakotettu käyttämään määritettyä nopeuden ja suuntaisuuden asetusta.  Kun poistat automaattisen neuvottelun käytöstä, varmista, että linkkikumppani voi käyttää määritettyä nopeutta ja suuntaisuutta. Jos linkkikumppani ei voi toimia sovittimen pakotetulla asetuksella, tiedonsiirtoa sovittimen ja linkkikumppanin välillä ei voi muodostaa.

2.	Jos automaattinen neuvottelu on käytössä, valitse nopeuden ja suuntaisuuden asetukset, jotka ilmoitetaan linkkikumppanille neuvottelun aikana. Oletusarvon mukaan ilmoitetaan kaikki asetukset. Mahdollisia asetuksia ovat seuraavat:

•	10 Mbps YKSISUUNTAINEN

•	10 Mbps KAKSISUUNTAINEN

•	100 Mbps YKSISUUNTAINEN

•	100 Mbps KAKSISUUNTAINEN

•	1000 Mbps KAKSISUUNTAINEN

HUOMAUTUS: IEEE-määritysten mukaisesti 1000-pohjaista T-toimintoa ei voi pakottaa.  Voit kuitenkin määrittää sovittimen käyttämään ainoastaan 1000 Mbps:n nopeutta valitsemalla automaattisen neuvottelun ja valitsemalla sitten Ilmoitetut asetukset -osasta vain 1000 Mbps kaksisuuntainen -asetuksen.

3.	Jos automaattinen neuvottelu on poissa käytöstä, pakota sovittimen nopeus ja suuntaisuus napsauttamalla jotain seuraavista asetuksista:

•	10 Mbps YKSISUUNTAINEN

•	10 Mbps KAKSISUUNTAINEN

•	100 Mbps YKSISUUNTAINEN

•	100 Mbps KAKSISUUNTAINEN

Varmista tiedonsiirtoyhteys tarkistamalla, että linkkikumppani tukee pakotettua asetusta.

4.	Valitse OK.

5.	Käynnistä tarvittaessa tietokone uudelleen.

Nopeuden ja suuntaisuuden asetus on nyt määritetty sovittimelle.


Linkkikumppani

Laite, johon sovitin on linkitetty, esimerksi toinen sovitin, keskitin tai kytkin.


Verkkokomponenttien puunäkymä
Verkkokomponenttipuu

Verkkokomponenttipuu näkyy Intel(R) PROSet II -ikkunan vasemmassa laidassa. Valitse sovittimet, VLAN-verkot tai ryhmät, kun haluat tarkastella tietoja komponentista.


Boot Agent

Tämän välilehden avulla voit tarkastella asetuksia, jotka ohjaavat Boot Agent -ohjelmiston toimintaa. Voit mahdollisesti muuttaa joitakin asetuksia Asetusten valinta -ruudussa. Tällä välilehdellä voit ehkä myös päivittää Flash ROM -laitteen Boot Agent -ohjelmiston vedoksen, jos järjestelmänvalvoja on ottanut tämän toiminnon käyttöön.

Katso tarkempia tietoja kustakin mahdollisesta kokoonpanoasetuksesta kohdasta:

•	Verkon käynnistyksen yhteyskäytäntö

•	Käynnistysjärjestys

•	Asetusvalikon odotusaika

•	Näytä asetuskehote

•	Ei-PnP-käyttöjärjestelmän herätystuki

Katso kokoonpanoasetusten muuttamisohjeita Intel® Boot Agent -käyttöoppaasta.

HUOMAUTUKSIA:

Jos et voi muuttaa kokoonpanoasetusta, se ei mahdollisesti ole sovittimen tai järjestelmän käytettävissä.

Tämän ohjetiedoston tiedot koskevat vain Boot Agentin 16-bittistä PXE 2.0 -versiota. Useimmat tässä kuvatuista kokoonpanoasetuksista eivät ole käytettävissä EFI-ympäristössä.

Päivitä Boot Agent -painike

Tämän painikkeen avulla voit asentaa tai päivittää Intel Boot Agent -ohjelmiston.

HUOMAUTUKSIA:

Boot Agentin päivitystoiminto kirjoittaa uuden Boot Agent -vedoksen Flash ROM -muistiin ja voi tilapäisesti poistaa käytöstä Windowsin* verkkolaiteohjaimen. Tietokone on ehkä käynnistettävä uudelleen päivittämisen jälkeen.

Jos tarvitaan DOS-asennusta, katso tietoja asennuksesta ja päivityksestä DOS-ympäristöissä Intel® Boot Agent -käyttöoppaasta.

Boot Agent -ohjelmiston asentaminen ja päivittäminen

HUOMAUTUS: Kun lataat Flash ROM -vedoksen Intelin Web-sivustosta, tallenna se tilapäiseen kansioon tai paikkaan, josta löydät sen helposti tätä toimenpidettä varten.

1.	Valitse Käynnistä-valikosta Asetukset ja valitse sitten Ohjauspaneeli.
Näyttöön tulee Ohjauspaneeli-ikkuna.

2.	Kaksoisnapsauta Intel(R) PROSet II -kuvaketta.
Näyttöön tulee Intel PROSet II -ikkuna.

3.	Valitse verkkokomponenttipuusta sovitin, joka sisältää päivitettävän Flash ROMin.

4.	Valitse Boot Agent -välilehti. Jos välilehteä ei näy, päivitä verkko-ohjain tai varmista, että käytössä on Intel PROSet II:n versio 4.0 tai uudempi.

HUOMAUTUS: Intel PROSet II -ohjelman avulla voi myös muuttaa PXE- ja RPL-ympäristöjen kokoonpanoasetuksia. Jos valitset PXE- tai RPL-ympäristössä toimivan sovittimen Intel PROSet II -näytön vasemmassa osassa olevasta Verkkokomponentit-kohdasta, voit tarkastella tai muuttaa kokoonpanoasetuksia, jotka näkyvät näytön oikeassa osassa. Lisätietoja Boot Agentin määrittämisestä Windows-ympäristössä on Intel® Boot Agent -käyttöoppaassa. Jotkin Flash ROMit eivät tue kaikkia kokoonpanoasetuksia.

5.	Muokkaa asetusta painamalla Ctrl+S. Kun painat Ctrl+S, Boot Agent -välilehden ulkoasu muuttuu ja sisältää himmennetyn (pois käytöstä) Käytä asetuksia -painikkeen.

6.	Valitse Päivitä Boot Agent.
Näyttöön tulee varoitussanoma, jossa ilmoitetaan verkkoyhteyden tilapäisestä menettämisestä käynnistysvedoksen päivittämisen aikana.

7.	Jatka päivitystoimenpidettä valitsemalla Kyllä.
Näyttöön tulee valintaikkuna, jossa kysytään, haluatko varmuuskopioida nykyisen Flash ROMin.

8.	Jos haluat luoda varmuuskopion nykyisestä Flash ROM -vedoksesta ennen Flashin päivittämistä, valitse Kyllä. Näyttöön tulee Tallenna nykyinen Flash ROM -vedos nimellä -valintaikkuna. Siirry vaiheeseen 10.

9.	Jos et tallenna nykyisen Flash ROMin varmuuskopiota, valitse Ei.
Näyttöön tulee varoitusikkuna. Valitse Kyllä ja siirry vaiheeseen 11.

10.	Valitse Tallenna, jos hyväksyt oletuspolun ja -tiedostonimen (tiedostonimen oletusasetus on sovittimen yksilöllinen MAC-osoite). Muussa tapauksessa muokkaa parametreja ja valitse sitten Tallenna.

11.	Valitse Avaa tiedosto -valintaikkunassa Avaa, jos tallentamasi Flash ROM -vedos näkyy ikkunassa oletuspolkuna ja -tiedostonimenä. Muussa tapauksessa muokkaa polkua ja tiedostonimeä ja valitse sitten Avaa.
HUOMAUTUS: Flash ROM -vedokset ovat saatavilla Intelin Web-sivustossa.

Päivitysprosessi kestää 5 - 10 sekuntia ja edistymisilmaisin on näytössä päivityksen ollessa käynnissä.


Verkon käynnistyksen yhteyskäytäntö

Jos Boot Agent ei tue RPL:ää, tätä asetusta ei voi muuttaa.

Mahdolliset arvot:

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

Kuvaus:

Valitse PXE käytettäväksi WfM-yhteensopivia verkonhallintaohjelmia, kuten Intel LANDesk* Management Suite-, Windows* 2000 RIS-, Windows XP RIS- ja Linux*-ohjelmistoja varten.

Valitse RPL ei-PnP-etäkäynnistystä sekä joitakin Novell NetWare* -etäkäynnistysratkaisuja varten.


Käynnistysjärjestys

Mahdolliset arvot:

•	Käytä BIOS Setupin käynnistysjärjestystä

•	Kokeile ensin verkkoa, sitten paikallisia asemia

•	Kokeile ensin paikallisia asemia, sitten verkkoa

•	Kokeile vain verkkoa

•	Kokeile vain paikallisia asemia

Kuvaus:

Antaa käyttäjän valita käynnistyslaitteiden valintajärjestyksen, kun järjestelmä käynnistyy. Jos tietokoneessa on BIOS, joka tukee BIOS Boot Specification (BBS) -määritystä tai ottaa käyttöön Plug and Play (PnP) -yhteensopivan käynnistysjärjestysvalinnan BIOS-asetusohjelmassa, tämä asetus on aina Käytä BIOS Setupin käynnistysjärjestystä eikä sitä voi muuttaa. Katso tässä tapauksessa käynnistysasetusten määrittämisohjeita asiakastietokoneen BIOS-oppaasta.

Jos asiakastietokoneessa ei ole BBS- tai PnP-yhteensopivaa BIOSia, voit valita minkä tahansa yllä mainituista arvoista paitsi Käytä BIOS Setupin käynnistysjärjestystä -vaihtoehdon.


Näytä asetuskehote

Mahdolliset arvot:

•	Käytössä – oletusarvo

•	Pois käytöstä

Kuvaus:

Jos valitset Käytössä, Ctrl+S -asetuskehote tulee näyttöön POST-testin jälkeen, jotta voit tuoda näyttöön Kokoonpanoasetusten valikon painamalla näppäinyhdistelmää Ctrl+S Asetusvalikon odotusajan määrittämän sekuntimäärän kuluessa.

Jos valitset Pois käytöstä, Asetusvalikon odotusajan asetus on nolla eikä Ctrl+S -asetuskehote ei tule näyttöön käynnistyksen yhteydessä. Voit kuitenkin tuoda Kokoonpanoasetusten valikon näyttöön painamalla toistuvasti näppäinyhdistelmää Ctrl+S heti POST-testin jälkeen, kunnes valikko tulee näyttöön. Jos Kokoonpanoasetusten valikko ei tule näyttöön näppäinyhdistelmän Ctrl+S toistuvasta käyttämisestä huolimatta, käynnistä tietokone uudelleen ja yritä uudelleen.


Asetusvalikon odotusaika

Mahdolliset arvot:

•	0 sekuntia

•	2 sekuntia

•	3 sekuntia

•	5 sekuntia

Kuvaus:

Sekuntien määrä, jonka Boot Agent odottaa näppäinyhdistelmän Ctrl+S painamista kokoonpanon asetusvalikon avaamiseksi järjestelmän käynnistysprosessin aikana.

Jos määrität Asetusvalikon odotusaika -asetukseksi nolla ja/tai Näytä asetuskehote -asetukseksi Pois käytöstä, Ctrl+S -asetuskehotetta ei tuoda näyttöön käynnistyksen yhteydessä. Voit kuitenkin tuoda Kokoonpanoasetusten valikon näyttöön painamalla toistuvasti näppäinyhdistelmää Ctrl+S heti POST-testin jälkeen, kunnes valikko tulee näyttöön. Jos Kokoonpanoasetusten valikko ei tule näyttöön näppäinyhdistelmän Ctrl+S toistuvasta käyttämisestä huolimatta, käynnistä tietokone uudelleen ja yritä uudelleen.


Ei-PnP-käyttöjärjestelmän herätystuki

Tämä asetus ei näy Kokoonpanoasetukset-valikossa, kun käynnistys tapahtuu gigabitin sovittimesta.

Ota selvää käyttöjärjestelmän ohjeista, tukeeko käyttöjärjestelmä etäherätystä ja kuinka tätä ominaisuutta käytetään.

Mahdolliset arvot:

•	Käytössä

•	Pois käytöstä

Kuvaus:

Valitse Käytössä, kun haluat käyttää WfM-sovittimen etäherätystoimintoa muussa kuin Windows*-käyttöjärjestelmissä (kuten DOS tai NetWare*).

Valitse Pois käytöstä tälle asetukselle, kun käytössä on Windows 2000, XP, Me tai 98SE.


VLAN-luettelo

Jos olet määrittänyt VLAN-verkkoja, ne näkyvät verkkokomponenttipuussa:

Kun napsautat hiiren kakkospainikkeella VLAN-verkkoa, näyttöön tulevat seuraavat vaihtoehdot:

•	Muuta VLAN-ominaisuuksia - VLAN-kokoonpanon muuttaminen.

•	Poista - VLAN-verkon poistaminen.

Katso myös

VLAN-verkon lisääminen


Ryhmäluettelo

Jos olet määrittänyt sovitinryhmiä, ne näkyvät verkkokomponenttipuussa.

Kun napsautat ryhmää hiiren kakkospainikkeella, seuraavat vaihtoehdot tulevat näyttöön:

•	Poista ryhmä

•	Vaihda ryhmätila

•	Lisää VLAN

•	IPSec käyttöön

•	GVRP:n ottaminen käyttöön

Jos olet määrittänyt ryhmän, mutta se ei näy verkkokomponenttipuussa, ryhmän asennus on ehkä otettava käyttöön sulkemalla Intel(R) PROSet II.


Ryhmitettyjen sovittimien luettelo

Kun napsautat hiiren kakkospainikkeella Ryhmitettyjen sovittimien luetteloa, seuraavat vaihtoehdot tulevat näyttöön:

•	Suositeltava ensisijainen - Määrittää valitun sovittimen ryhmän ensisijaiseksi lähettäväksi sovittimeksi. Tavallisesti tällä sovittimella on suurin kaistanleveys.

•	Suositeltu toissijainen - Määrittää valitun sovittimen suositellun ensisijaisen sovittimen varmistussovittimeksi.  Tämä vaihtoehto on käytettävissä vasta sitten, kun suositeltu ensisijaisen sovitin on määritetty.

•	Poista ryhmästä - Poistaa valitun sovittimen ryhmästä.

Katso myös

•	Sovitinryhmätilan muuttaminen

•	Sovittimen lisääminen olemassa olevaan ryhmään

•	Uuden ryhmän luominen

•	Sovittimen poistaminen ryhmästä

•	Sovitinryhmän poistaminen

•	Sovittimen määrittäminen ensisijaiseksi tai toissijaiseksi


Verkkokomponentit
Verkkokomponenttipuu

Verkkokomponenttipuussa näkyvät verkkokomponentit, jotka ovat aktiivisia järjestelmässäsi. Verkkokomponentteihin voivat kuulua verkkosovittimet, ryhmät ja VLAN-verkot.


Ryhmän sovittimet

Ryhmän sovittimet -luetteloruutu sisältää sovittimet, jotka muodostavat ryhmän. Valitsemalla ryhmän sovittimen voit tarkastella sille ominaisia tietoja.

Katso myös

Sovittimen poistaminen ryhmästä


VLAN-verkot

VLAN-verkkojen välilehti verkkokomponenttipuussa sisältää määritetyt VLAN-verkot.

Katso myös

VLAN-verkon lisääminen

VLAN-ominaisuuksien muuttaminen

VLAN-määritys

VLAN-verkon poistaminen

VLAN-verkkojen lisäasetukset

GVRP:n määrittäminen


Sovitinesiintymän poistaminen
Sovittimen poistaminen

Varmista ennen sovittimen poistamista Intel(R) PROSet II:sta tai tietokoneesta, ettei sovitin ole ryhmän jäsen. Jos sovitin on ryhmän jäsen, poista sovitin ensin ryhmästä ja noudata sitten alla olevia ohjeita.

Sovittimen poistaminen Intel(R) PROSet II:sta

1.	Napsauta verkkokomponenttipuussa hiiren kakkospainikkeella sovitinta, jonka haluat poistaa.

2.	Valitse Poista.
Näyttöön tulee vahvistusikkuna, jossa ilmoitetaan, että sovitin EI ole ryhmän jäsen.

3.	Napsauta Kyllä.

4.	Sulje Intel PROSet II ja ota muutokset käyttöön napsauttamalla OK.

5.	Käynnistä tarvittaessa tietokone uudelleen.

Intel PROSet II ei enää hallitse sovitinta.


Uuden ryhmän luominen

Ryhmä on sovittimien joukko, joka on määritetty parantamaan verkon toimivuutta, kuten lisäämään sen vikasietoa tai siirtonopeutta.

Ryhmän luominen:

1.	Napsauta verkkokomponenttipuussa hiiren kakkospainikkeella ei-ryhmitettyä sovitinta.

2.	Valitse Lisää ryhmään ja valitse sitten Luo uusi ryhmä.
Näyttöön tulee Ohjattu ryhmitys -ikkuna.

3.	Valitse luotavan ryhmän tyyppi ja valitse Seuraava. Vaihtoehdot ovat:

•	Sovittimen vikasieto

•	Kytkimen vikasieto

•	Mukautuva kuormituksen tasaus

•	Link Aggregation (Dynamic_3ad* / GEC / LA / 802.3ad -staattinen tila)

4.	Jos luot Mukautuva kuormituksen tasaus -ryhmän, voit vaihtoehtoisesti ottaa vastaanottokuormituksen tasauksen (Receive Load Balancing, RLB) käyttöön tai poistaa sen käytöstä.

•	Jos otat käyttöön vastaanottokuormituksen tasauksen, suurimmalla nopeudella toimivat ryhmäjäsenet vastaanottavat IP-liikenteen ja ensisijainen sovitin vastaanottaa muun kuin IP-liikenteen.
HUOMAUTUS: Kun Vastaanottokuormitus on käytössä, Intel(R) PROSet valitsee automaattisesti suositellun ensisijaisen sovittimen. Intel PROSet II:n valitsema suositeltu ensisijainen sovitin ei perustu sovittimen malliin tai nopeuteen.

•	Jos poistat vastaanottokuormituksen käytöstä, vain ensisijainen sovitin vastaanottaa liikennettä.

5.	Luettelossa on kaikki sovittimet, jotka eivät sillä hetkellä ole ryhmän jäseniä. Valitse luettelosta ne sovittimet, jotka haluat sisällyttää tähän ryhmään. Valitse sitten Seuraava.

6.	Valitse Valmis.

7.	Voit halutessasi määrittää ryhmän sovittimen ensisijaiseksi sovittimeksi. Voit määrittää ensisijaisen sovittimen napsauttamalla haluamaasi sovitinta hiiren kakkospainikkeella ja valitsemalla Suositeltava ensisijainen.
Jos et halua valita ensisijaista sovitinta, Intel PROSet II valitsee suositellun ensisijaisen sovittimen.

8.	Sulje Intel PROSet II ja ota muutokset käyttöön napsauttamalla Sulje.

Ryhmä on nyt määritetty.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


Sovittimen lisääminen olemassa olevaan ryhmään

Sovittimen voi lisätä olemassa olevaan ryhmään milloin tahansa.

HUOMAUTUS:  Dynaamisissa 802.3ad-ryhmissä kokoonpanon muuttaminen voi väliaikaisesti keskeyttää liikennevirran, kun kytkin laskee uudelleen linkin aggregaattorit.

Sovittimen lisääminen olemassa olevaan ryhmään Intel(R) PROSet II -ohjelmassa

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun Ryhmäluettelo-kohtaa.

2.	Valitse Lisää sovitin ryhmään ja valitse sitten haluamasi sovitin.

Sovitin on nyt osa ryhmää.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


VLAN-verkon lisääminen
VLAN-verkon luominen

VLAN-verkko on looginen ryhmä sovittimia, jotka on määritetty tehostamaan verkon suojausta ja pienentämään lähetystoimialueiden kokoa.

VLAN-verkon luominen

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun Ryhmäluettelo- tai Ei-ryhmitettyjen sovittimien luettelo -kohtaa.

2.	Valitse Lisää VLAN.
Näyttöön tulee Lisää uusi VLAN -valintaikkuna.

3.	Kirjoita VLAN-tunnus-ruutuun sovittimelle määritetyn VLAN-verkon numero.  VLAN-tunnuksen on vastattava kytkimessä määritettyä VLAN-tunnusta.
HUOMAUTUS: VLAN-numerot 0 ja 1 ovat usein varattuja. Tarkista yksityiskohtaiset tiedot kytkimen ohjeista.

4.	Kirjoita VLAN-nimi-ruutuun VLAN-verkon nimi. Anna nimeksi esimerkiksi Markkinointi tai Suunnittelu. Nimen ei tarvitse vastata muiden verkkolaitteiden nimeä; sitä käytetään vain tunnistamiseen.

5.	Valitse OK.

Sovitin on nyt määritetty VLAN-verkon jäseneksi. Kun olet määrittänyt sovittimen VLAN-verkon jäseneksi, muista tehdä VLAN-asetukset loppuun määrittämällä muiden verkkolaitteiden asianmukaiset VLAN-tiedot.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


VLAN-verkon poistaminen

Kun poistat VLAN-verkkoja, käytä Intel(R) PROSet II -ohjelmaa. VLAN-verkkojen poistaminen tai niiden poistaminen käytöstä käyttöjärjestelmän Ohjauspaneelin Verkko-sovelluksessa voi vaikuttaa järjestelmän vakauteen ja sovittimen kokoonpanoon.

VLAN-verkon poistaminen ryhmästä tai sovittimesta:

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun VLAN-luettelo-kohtaa.

2.	Valitse Poista VLAN.

VLAN on poistettu ryhmästä tai sovittimesta.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


Sovitinryhmän poistaminen

Poista ryhmät aina käyttämällä Intel(R) PROSet II -apuohjelmaa. Ryhmien poistaminen tai poistaminen käytöstä käyttöjärjestelmän Ohjauspaneelin Verkko-sovelluksessa voi vaikuttaa järjestelmän vakauteen ja sovittimen kokoonpanoon.

Koko sovitinryhmän poistaminen:

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun Ryhmäluettelo-kohtaa.

2.	Valitse Poista.

3.	Vahvistussanoma tulee esiin.  Napsauta Kyllä.

Ryhmä on nyt poistettu. Sovittimet jatkavat toimintaa erillisinä laitteina.

HUOMAUTUS: Jos olet luonut ryhmälle VLAN-verkkoja tai prioriteettipaketin suodattimia, nämä poistetaan ryhmän mukana.  Jos ryhmälle on luotu VLAN-verkkoja tai prioriteettipaketin suodattimia ennen sen ryhmittämistä, nämä menetetään ryhmän poistamisen yhteydessä.


Sovitinryhmätilan muuttaminen
Ryhmätilan muuttaminen

Ryhmän ryhmitystilan muuttaminen:

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun Ryhmäluettelo-kohtaa.

2.	Valitse Vaihda ryhmätila ja valitse sitten jokin seuraavista vaihtoehdoista:

•	Sovittimen vikasieto

•	Kytkimen vikasieto

•	Mukautuva kuormituksen tasaus
Kun ryhmätilaksi vaihdetaan Mukautuva kuormituksen tasaus, oletusarvon mukaan vastaanottokuormituksen tasaus poistetaan käytöstä. Voit ottaa vastaanottokuormituksen tasauksen käyttöön muuttamalla ryhmätilaa ja ottamalla vastaanottokuormituksen tasauksen käyttöön Ryhmityksen Lisäasetukset -välilehdellä.

•	Link Aggregation (Dynamic_3ad* / GEC / LA / 802.3ad -staattinen tila)

Ryhmätila on nyt muutettu.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


Sovittimen poistaminen ryhmästä

Sovittimen voi poistaa olemassa olevasta ryhmästä milloin tahansa.

HUOMAUTUS:  Dynaamisissa 802.3ad-ryhmissä kokoonpanon muuttaminen voi väliaikaisesti keskeyttää liikennevirran, kun kytkin laskee uudelleen linkin aggregaattorit.

Sovittimen poistaminen ryhmästä:

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun Ryhmä-kohtaa.

2.	Valitse Poista ryhmästä.

3.	Ota muutos käyttöön napsauttamalla OK.

Sovitin ei enää ole ryhmän jäsen.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


VLAN-ominaisuuksien muuttaminen

Voit määrittää sovittimen jäseneksi eri VLAN-verkkoon muuttamalla sen VLAN-tunnuksen. VLAN-tunnuksen muuttaminen poistaa sovittimen olemassa olevasta VLAN-verkosta ja katkaisee yhteyden kyseisessä VLAN-verkossa oleviin tietokoneisiin.

Jos esimerkiksi muutat VLAN-tunnuksen 7 tunnukseksi 9, tietokone ei enää kommunikoi VLAN 7:n tietokoneiden kanssa. Sen sijaan se kommunikoi VLAN 9:n tietokoneiden kanssa.

VLAN-kokoonpanon muuttaminen

1.	Napsauta hiiren kakkospainikkeella verkkokomponenttipuun VLAN-kohtaa.

2.	Valitse Muuta VLAN-ominaisuuksia.

3.	Kirjoita VLAN-tunnus-ruutuun sovittimelle määritetyn VLAN-verkon numero.  VLAN-tunnuksen on vastattava kytkimessä määritettyä VLAN-tunnusta.
HUOMAUTUS: VLAN-numerot 0 ja 1 ovat usein varattuja. Tarkista yksityiskohtaiset tiedot kytkimen ohjeista.

4.	Kirjoita VLAN-nimi-ruutuun VLAN-verkon nimi. Anna nimeksi esimerkiksi Markkinointi tai Suunnittelu. VLAN-nimi on tarkoitettu vain tiedoksi, eikä sen tarvitse vastata muille verkkolaitteille määritettyä VLAN-nimeä.

5.	Sulje Intel(R) PROSet II napsauttamalla OK.

VLAN-kokoonpano on nyt päivitetty.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.

Katso myös

GVRP:n ottaminen käyttöön

VLAN-verkkojen lisäasetukset


Sovittimen määrittäminen ensisijaiseksi tai toissijaiseksi sovittimeksi

Kussakin ryhmässä on ensisijainen sovitin ja vähintään yksi toissijainen sovitin.

Voit valita ryhmän ensisijaisen sovittimen joko manuaalisesti tai voit antaa Intel(R) PROSet II -ohjelman valita sen.

•	Jos valitset ensisijaisen sovittimen, valitusta sovittimesta tulee suositeltu ensisijainen sovitin. Suositeltu ensisijainen sovitin lähettää ja vastaanottaa liikennettä niin kauan kuin se on aktiivisessa tilassa. Jos suositeltu ensisijainen sovitin vikaantuu, mutta se myöhemmin palautetaan aktiiviseen tilaan, ohjaus siirtyy automaattisesti takaisin suositellulle ensisijaiselle sovittimelle.

Jos käytössä on esimerkiksi palvelin, jossa ensisijaisena sovittimena on Intel(R) PRO/1000 Gigabit -sovitin ja toissijaisena sovittimena on Intel(R) PRO/100+ tai PRO/100 S -sovitin, Intel PRO/1000 Gigabit -sovittimen tulisi olla suositeltu ensisijainen sovitin. Jos tässä tapauksessa Intel PRO/1000 -sovitin vikaantuu, Intel PRO/100+ tai PRO/100 S siirtyy sen tilalle. Kun Intel PRO/1000 -sovitin vaihdetaan, se jatkaa automaattisesti ensisijaisen sovittimen roolia ryhmässä.

Jos valitset manuaalisesti ensisijaisen sovittimen, ryhmässä on aina suositeltava ensisijainen sovitin.

•	Jos et määritä sovitinta ensisijaiseksi sovittimeksi, Intel PROSet II valitsee parhaan sovittimen sovitinmallin ja nopeuden perusteella. Tämä tarkoittaa sitä, että vaikka ryhmässä on ensisijainen sovitin, siinä ei ole suositeltua ensisijaista sovitinta. Kun käytössä ei ole suositeltua ensisijaista sovitinta, Intel PROSet II voi valita vaihtoehtoisen ensisijaisen sovittimen siltä varalta, että ensisijainen sovitin vikaantuu.

Jos esimerkiksi ensisijainen sovitin, Intel(R) PRO/1000 Gigabit -sovitin, vikaantuu, Intel PROSet II voi määrittää ryhmän eri sovittimen toimimaan ensisijaisena sovittimena.  Jos Intel(R) PRO/1000 -sovitin jatkaa aktiivista tilaa, se liittyy uudelleen ryhmään jäsenenä eikä ensisijaisena sovittimena.

Sovittimen määrittäminen ensisijaiseksi tai toissijaiseksi sovittimeksi:

1.	Napsauta verkkokomponenttipuussa hiiren kakkospainikkeella Ryhmitettyjen sovittimien luetteloa.

2.	Valitse Suositeltu ensisijainen tai Suositeltu toissijainen.

Sovittimella on nyt määritetty tila.

Sovittimen prioriteettitilan muuttaminen:

Voit myös muuttaa sovittimen prioriteettia toimimalla edellä olevien ohjeiden mukaan.

STP- ja SFT-ryhmät:   Jos ryhmän ensisijaista (aktiivista) sovitinta muutetaan, ryhmä ladataan uudelleen käyttämällä uuden ensisijaisen sovittimen MAC-osoitetta. Vastaavasti jos paikallisesti määritettyä osoitetta (LAA) muutetaan, ryhmä ladataan uudelleen ja ryhmällä on uusi MAC-osoite. Molemmat toiminnot, jos ne suoritetaan SFT-ryhmässä palvelimen ollessa aktiivinen verkossa, aiheuttavat sen, että ryhmä ei voi tilapäisesti viestiä, ennen kuin kaikki verkon laitteet päivittävät ARP-taulukkonsa uuden ensisijaisen sovittimen osoitetiedoilla. ARP-välimuistin aikakatkaisujaksolla määrittää ARP-taulukon päivitysajan. Tämä parametri on käytettävissä joissakin reitittimissä ja käyttöjärjestelmissä. ARP-välimuistin aikakatkaisujakson mukaan ryhmä voi olla poissa käytöstä enintään 10 minuuttia.

HUOMAUTUS: Suositeltu toissijainen -asetus ei ole käytettävissä ennen kuin suositeltu ensisijainen sovitin on määritetty.


PROSetin tehtäväpalkin kuvake
Intel(R) PROSet II:n tehtäväpalkin kuvake

Kun asennat Intel(R) PROSet II -ohjelman, Intel PROSet II -kuvake tulee näkyviin tehtäväpalkkiin lähelle kelloa.

Kun napsautetaan hiiren kakkospainikkeella kuvaketta, seuraavat vaihtoehdot tulevat näyttöön:

Komento	Kuvaus
Käynnistä Intel(R) PROSet II	Näyttää Intel PROSet II -apuohjelman.
Näytä tila:	Näyttää asennettujen langattomien sovittimien nimet.
Piilota tehtäväpalkin kuvake	Piilottaa tehtäväpalkissa olevan kuvakkeen.   Tuo kuvake uudelleen esiin tehtäväpalkkiin: Valitse Intel PROSet II:n Yleiset-välilehdellä Näytä tehtäväpalkin kuvake.
Lopeta	Sulkee Intel PROSet II -ohjelman ja poistaa väliaikaisesti tehtäväpalkin kuvakkeen tehtäväpalkista.  Vaikka kuvake ei ole näkyvissä tehtäväpalkissa, voit käynnistää Intel PROSet II -ohjelman kaksoisnapsauttamalla Intel PROSet II -kuvaketta Ohjauspaneelissa. Kun tietokone käynnistyy uudelleen, Intel PROSet II -kuvake näkyy tehtäväpalkissa.
Lopeta ja Älä avaa käynnistettäessä	Poistaa Intel PROSet II:n tehtäväpalkin kuvakkeen ja estää sen näyttämisen tehtäväpalkissa tietokoneen uudelleenkäynnistyksen yhteydessä. Voit palauttaa tehtäväpalkin kuvakkeen käyttöön valittuasi tämän vaihtoehdon:  1. Valitse Käynnistä > Suorita. 2. Kirjoita Avaa-kenttään PROMON ja valitse OK.   Intel PROSet II -kuvake jää tehtäväpalkkiin, kunnes tietokone käynnistetään uudelleen. Lisätietoja tehtäväpalkin kuvakkeen määrittämisestä pysyvästi näkymään tehtäväpalkissa on kohdassa Lataa tehtäväpalkin kuvake käynnistettäessä.
Lataa tehtäväpalkin kuvake käynnistettäessä	Määrittää Intel PROSet II -tehtäväpalkin kuvakkeen näkymään tehtäväpalkissa. Tämä asetus varmistaa, että tehtäväpalkin kuvake on näkyvissä tietokoneen käynnistyttyä uudelleen. HUOMAUTUS: Tämä asetus on käytettävissä vain silloin, kun on käytetty Lopeta ja Älä avaa käynnistettäessä -asetusta.


Älykkään virran sammuttamisen tekniset tiedot
Älykkään virran sammuttamisen tiedot

Smart Power Down (SPD) eli älykäs virran sammuttaminen on virransäästömenetelmä, jota käytetään Intel 82558-, 82559- ja 82550-pohjaisissa sovittimissa minimoimaan virrankulutus, kun käytössä ei ole kelvollista linkkiä. SPD sallii sovittimien siirtyä syvään lepotilaan, joka lisää virransäästöä jopa 150 prosentilla. SPD on aktivoitu kun:

•	Sovittimella ei ole kelvollista linkkiä

•	Käyttöjärjestelmä on Keskeytystilassa

Jos molemmissa näistä tapauksista Älykäs virran sammuttaminen on käytössä, käyttöjärjestelmä siirtää sovittimen lepotilaan vähentäen näin virran kokonaiskulutusta. Normaali virrankulutus ja sovittimien toiminta palautuu, kun sovittimella on kelvollinen linkki tai kun käyttöjärjestelmä siirtyy pois keskeytystilasta.


Laitteen asennuksen poisto epäonnistui -sanoma

Jos sovitinryhmän luettelo tai VLAN-luettelo yritetään poistaa Laitehallinnan avulla, näyttöön tulee seuraava sanoma: "Laitteen asennuksen poisto epäonnistui. Laitetta voidaan tarvita tietokoneen käynnistämiseen."

Tämä sanoma tarkoittaa, että Intel(R) PROSet II -ohjelmalla luotua virtuaalisovitinta ei voi poistaa Laitehallinnan avulla.  Voit poistaa sovittimet Laitehallinnasta Intel PROSet II -ohjelman avulla.

Katso myös

Sovitinryhmän poistaminen

VLAN-verkon poistaminen

GVRP:n ottaminen käyttöön


VLAN-verkkojen lisäasetukset

VLAN-lisäasetusten mukauttaminen:

1.	Valitse verkkokomponenttipuusta VLAN-luettelo.

2.	Valitse Lisäasetukset-välilehti.

3.	Valitse luetteloruudusta NumTxPackets ja kirjoita sitten uusi arvo.
NumRxPackets määrittää vastaanoton kuvaajien määrän. Nämä ovat datasegmenttejä, joiden avulla sovitin voi varata vastaanotetut paketit muistiin. Kukin vastaanotettu paketti vaatii yhden vastaanoton kuvaajan ja kukin kuvaaja käyttää 2 kt muistia.

Haluat ehkä suurentaa Vastaanoton kuvaajat -asetusta, jos huomaat vastaanottoliikenteen suorituskyvyn heikentyvän merkitsevästi. Jos vastaanoton suorituskyvyssä ei ole ongelmia, käytä oletusasetusta.

Varoitus: Tämän arvon muuttaminen voi huonontaa järjestelmän suorituskykyä.

4.	Valitse luetteloruudusta NumTxPackets ja kirjoita sitten uusi arvo.

NumTxPackets määrittää lähetyksen kuvaajien määrän. Lähetyksen kuvaajat ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii yhden tai useamman lähetyksen kuvaajan.

Haluat ehkä lisätä lähetyksen kuvaajia, jos huomaat lähetyksen suorituskyvyssä ongelmia. Vaikka lähetyksen kuvaajien määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen kuvaajat kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä oletusasetusta.

Varoitus: Tämän arvon muuttaminen voi huonontaa järjestelmän suorituskykyä.

5.	Valitse OK.

6.	VLAN-verkossa käytetään nyt mukautettuja asetuksia.

VLAN-verkko on nyt mukautettu.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


IPSec-vaihtoehdon ottaminen käyttöön

IP Security (IPSec) on sarja standardeja, jotka on kehittänyt Internet Engineering Task Force (IETF). Se suojaa IP-tietoliikennettä varmistamalla, että tietopaketteja ei muuteta lähetyksen aikana. Tarkempia tietoja IP-suojauksesta on Intelin tukisivustossa: http://support.intel.com tai, jos käytössäsi on Intel(R) Packet Protect, katso tietoja Packet Protect -käyttöoppaasta.

Vaatimukset

Voit ottaa IP-suojauksen käyttöön tai poistaa sen käytöstä Intel(R) PROSet II:ssa, jos:

•	Käytät jotain seuraavista käyttöjärjestelmistä:

•	Windows* 98

•	Windows NT* 4.0, SP5 tai uudempi

•	Windows Me

•	Käytät Intel® PRO/100 -sovitinta

Jos käytät Windows 2000:ta tai Windows XP:tä, IP-suojaus on käytettävissä Microsoft Management Consolen laajennuksena. Lisätietoja IPSec-suojauksen käyttöönotosta Windows 2000- tai XP -käyttöjärjestelmissä on kyseisten käyttöjärjestelmien ohjeissa.

IPSec -suojauksen käyttöönotto:

1.	Napsauta hiiren kakkospainikkeella Ryhmäluettelo tai Ei-ryhmitettyjen sovittimien luetteloa verkkokomponenttipuussa ja valitse sitten IPSec käyttöön.

2.	Käynnistä tietokone uudelleen.

3.	Asenna Intel(R) Packet Protect -ohjelmisto.
HUOMAUTUS:  Jotta voit asentaa Packet Protect -ohjelman, valitse IPSec käyttöön –asetus vähintään yhdessä sovittimessa tai sovitinryhmässä ennen Packet Protect -ohjelman asentamista.

IPSec on nyt käytössä.

IPSec -suojauksen poisto käytöstä

Napsauta hiiren kakkospainikkeella Ryhmäluetteloa tai Ei-ryhmitettyjen sovittimien luetteloa verkkokomponenttipuussa ja poista sitten valinta IPSec käyttöön.

Salauksen purkaminen Intel(R) PRO/100 S -sovittimissa

Intel(R) PRO/100 S -sovitinsarja voi purkaa IP-suojaustapahtumien salausprosessin. Käsittelemällä salausprosessin sovittimet vähentävät CPU:n käyttöä. Purkutoiminnon käyttöönotto:

1.	Ota IP-suojaus käyttöön joko Intel Packet Protect -ohjelman avulla tai, jos tietokoneessa käytetään Windows 2000:ta tai XP:tä, käyttämällä Microsoft Management Consolea.

2.	Valitse Intel PROSet II:n verkkokomponenttipuuussa Intel PRO/100 S -sovitin, jonka haluat käsittelevän IP-suojauksen salauksen.

3.	Valitse Lisäasetukset-välilehti.

4.	Valitse Asetus-luettelosta Purkaminen.

5.	Valitse Arvo-ruudusta IP-suojaus.

6.	Valitse OK.

Sovitin on nyt määritetty purkamaan salauksen käsittely CPU:sta.


GVRP-tuki

Työasemat ja kytkimet dynaamisesti luovat, muuttavat ja poistavat VLAN-verkkoja käyttämällä GVRP (GARP VLAN Registration Protocol) -yhteyskäytäntöä. GVRP-yhteensopivat kytkimet voivat tunnistaa VLAN-jäsenten kytkinportin ja jäljittää VLAN-tilan.

Vaatimukset

Jotta GVRP:tä tuetaan verkossa, sovittimissa ja kytkimissä, näiden komponenttien pitää olla GVRP-yhteensopivia.

GVRP:n ottaminen käyttöön sovittimessa:

1.	Napsauta verkkokomponenttipuussa hiiren kakkospainikkeella vähintään yhden VLAN-verkon sisältävää Ryhmitettyjen sovittimien luetteloa.

2.	Valitse GVRP-tuki.
Näyttöön tulee GVRP-tuki-valintaikkuna.

3.	Valitse Käytössä.

4.	Kirjoita GVRP-yhdysaika-ruutuun numero, joka on kytkimen GVRP LEAVE -komennon ja PROSET II GVRP:n Liitä-komennon välinen aika millisekunteina. Oletusarvon mukaan Intel(R) PROSet II käynnistää Liitä-komennon 200 ms Jätä-komennon jälkeen.

5.	Valitse OK.

Sovitin voi käyttää nyt GVRP-yhteyskäytäntöä.

Vianmääritys

Koska GVRP:stä on olemassa erilaisia toteutuksia, GVRP:n ottaminen käyttöön sovittimessa ei takaa GVRP:n yhteensopivuutta eri verkkolaitteiden välillä. Jos GVRP ei näytä toimivan, poista sovittimessa GVRP käytöstä.

HUOMAUTUS:  Kun teet useita muutoksia ryhmiin tai VLAN-verkkoihin Intel(R) PROSet II -ohjelmassa, on suositeltavaa, että otat kunkin muutoksen käyttöön välittömästi sen tekemisen jälkeen lopettamalla Intel PROSet II -ohjelman.  Käynnistä tämän jälkeen Intel PROSet II -ohjelma uudelleen mahdollisen seuraavan muutoksen tekemistä varten.


Windows NT 4.0 Service Packit
Windows NT* 4.0 Service Packit

Voidaksesi käyttää Intel(R) PROSet II -ohjelmaa ja kaikkein edistyneimpiä ryhmitystoimintoja Windows NT 4.0:n asennus on päivitettävä service pack 6a:lla tai uudemmalla.

Voit ladata Microsoftin service packin ja ohjeet osoitteesta http://www.microsoft.com/ntserver/.


PRO/1000 Desktop -sovittimien lisäasetukset

HUOMAUTUS:  Ota yhteyttä verkonvalvojaan, ennen kuin teet mitään muutoksia näihin asetuksiin. Lisäasetusten määrittäminen tavalla, joka ei ole yhteensopiva muiden verkkolaitteiden kanssa, voi vaikuttaa haitallisesti sovittimen tai järjestelmän suorituskykyyn.

Mukautuvat kehystenväliset ajat

Kompensoi Ethernet-pakettien liialliset yhteentörmäykset verkossa.

Tuetut sovittimet	Kaikki
Oletus	käytössä

Mukautuva linkin palaute

Nopeuttaa järjestelmän käynnistymistä ohittamalla verkkoyhteyden vaatimat käynnistysrutiinit, kun kaapeli on irrotettuna sovittimesta. Tämä vähentää merkittävästi tietokoneen käynnistymiseen tarvittavaa aikaa.

Kun Mukautuva linkin palaute Intelin Ethernet-ohjaimille on käytössä ja verkkokaapelia ei ole liitetty RJ-45-porttiin, verkkoyhteys poistetaan käytöstä. Keltainen varoituskuvake tulee esiin verkkoyhteyden viereen Laitehallinnassa.

Ota verkkoyhteys uudelleen käyttöön liittämällä verkkokaapeli RJ-45-porttiin ja käynnistämällä tietokone uudelleen.

Tuetut sovittimet	Ei käytettävissä jokaisessa sovitinmallissa.
Oletus	Pois päältä
Suositus	Päälle
Alue	Päälle, Pois päältä
HUOMAUTUS: Adaptive Link Response (ALR) ei toimi, kun langaton sovitin on aktiivinen järjestelmässä.

Yhdistetyt puskurit

Optimoi lähetyksen suorituskykyä mukauttamalla yhdistettyjen puskurien määrää. Näiden puskurien avulla sovitin voi yhdistää datasegmenttejä ennen paketin lähetystä.

Yhdistettyjen puskurien asetuksen on oltava määritetty toimimaan yhdessä lähetyksen kuvaajien asetuksen kanssa. Yhdistettyjen kuvaajien asetuksen tulee olla 30 - 50 % lähetyksen kuvaajista. Jos yhdistettyjen puskurien asetusta ei muuteta vastaamaan lähetyksen kuvaajien asetusta, lähetyksen suorituskyky ei ehkä parane.

Yhdistetyt puskurit -asetus lisää huomattavasti lähetyksen suorituskykyä Windows NT 4.0 -tietokoneissa. Se parantaa lähetyksen suorituskykyä myös Windows 98- ja 2000 -tietokoneissa.

Tuetut käyttöjärjestelmät	Windows NT 4.0, 98, 2000, XP
Tuetut sovittimet	Kaikki
Oletus	128
Alue	16-768
PME käyttöön

Ottaa käyttöön tai poistaa käytöstä sovittimen Herätys-ominaisuudet tietokoneissa, joissa on käytössä vanha Advanced Power Management (APM) -ominaisuus. Herätyksen avulla sovitin siirtyy pois valmius- tai virrankatkaisutilasta vastaanottaessaan tietyt pakettityypit, kuten ARP-paketit.

•	Tämän toiminnon poistaminen käytöstä poistaa käytöstä kaikki Herätys-asetukset tietokoneissa, jotka käyttävät vanhaa virranhallintaominaisuutta.

•	Kun tämä toiminto on käytössä, sovittimen sallitaan vastata Herätys-signaaliin. Jos haluat määrittää sovittimen vastaamaan tiettyihin pakettityyppeihin, katso Herätys-asetuksia koskevia tietoja jäljempänä tässä ohjeessa.

•	Laitteisto-oletus-arvo pakottaa sovittimen määrittämään Herätys-ominaisuudet järjestelmän laitteiston perusteella.

•	Ei toimintaa -arvo sallii sovittimen käyttää käyttöjärjestelmän oletusta.

Jos haluat poistaa kaikki Herätys-asetukset käytöstä, poista tämä toiminto käytöstä. Valitse muussa tapauksessa asetukseksi Ei toimintaa.

Tuetut sovittimet	82559-pohjaiset sovittimet. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä
Nopea lähetyksen lopettaminen

Optimoi lähetyksen suorituskykyä vapauttamalla lähetyksen kuvaajia uudelleenkäyttöä varten, ennen kuin paketit lähetetään verkkoon.

•	Kun Nopea lähetyksen lopettaminen on poissa käytöstä, sovittimen täytyy odottaa, kunnes paketit on lähetetty, ennen kuin se voi käyttää lähetyksen kuvaajia uudelleen.

•	Kun Nopea lähetyksen lopettaminen on käytössä, sovitin käyttää lähetyksen kuvaajia uudelleen nopeammin. Tämän ansiosta sovitin voi parantaa lähetyksen suorituskykyä.

Tuetut sovittimet	82544-pohjaiset. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Päälle
Alue	Päälle, Pois päältä
Vuonohjaus

Mahdollistaa sovittimien liikenteen tehokkaan säätelyn.

•	Sovittimet luovat vuonohjauskehyksiä, kun niiden vastaanottojonot saavuttavat ennalta määritetyn rajan. Vuonohjauskehysten luominen viestittää lähettäjälle, että lähetystä on hidastettava.

•	Sovittimet vastaavat vuonohjauskehyksiin keskeyttämällä pakettien lähettämisen vuonohjauskehyksen määrittämäksi ajaksi.

Kun sovittimien annetaan säätää vuonohjausta pakettien lähetyksen perusteella, voidaan estää ohitettuja paketteja.

HUOMAUTUS: Jotta sovittimet voisivat hyödyntää tätä ominaisuutta, linkkikumppaneiden on tuettava vuonohjauskehyksiä.

Tuetut sovittimet	82540- ja 82544-pohjaiset, lähetys ja vastaanotto. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Luo vuonohjauskehykset ja vastaa niihin.
Alue	• Pois päältä, Vastaa, Luo, Luo ja vastaa, Laitteisto-oletus

Jumbokehykset

HUOMAUTUS: Jumbokehyksiä tuetaan vain 1000 Mbps:llä. Jumbokehysten käyttäminen 10:llä tai 100 Mbps:llä voi aiheuttaa huonon suorituskyvyn tai linkin menetyksen.

Ottaa käyttöön jumbokehysominaisuuden tai poistaa sen käytöstä. Jumbokehykset voivat lisätä siirtonopeutta ja vähentää suorittimen käyttöä sijoittamalla enemmän dataa kuhunkin kehykseen, jolloin lähetetään vähemmän kehyksiä. Ethernet-vakiokehyskoko on 1514 tavua, kun taas jumbokehykset voivat sisältää 4088, 9014 tai 16128 tavua.

Ota jumbokehykset käyttöön vain silloin, kun kaikki verkon laitteet tukevat niitä ja ne on määritetty käyttämään samaa kehyksen kokoa. Kun määrität jumbokehyksiä toisiin verkkolaitteisiin, ota huomioon, että verkkolaitteet laskevat jumbokehysten koot eri tavalla. Jotkin laitteet sisällyttävät otsikkotiedot kehyksen kokoon, kun taas toiset eivät toimi näin. Intel-sovittimet eivät sisällytä otsikkotietoja kehyksen kokoon.

Lisätietoja on kohdassa Jumbokehykset.

Tuetut sovittimet	Kaikki
Oletus	Pois käytöstä
Alue	Pois käytöstä (1514), 4088, 9014 ja 16128. (Aseta kytkimen 4 tavua suuremmaksi CRC-tarkistusta käytettäessä ja vielä 4 tavua suuremmaksi, jos käytössä on VLAN-verkkoja tai QoS-paketinmerkintä.)  HUOMAUTUS: Mikä tahansa arvo alueella (1514 - 16128) voidaan määrittää Windowsin rekisteriavaimessa MaxFrameSize.
Paikallisesti määritetty osoite

Ohittaa sovittimen MAC-osoitteen. Voit määrittää uuden verkko-osoitteen kirjoittamalla Arvo-ruutuun 12-numeroisen heksadesimaaliluvun.

Tuetut sovittimet	Kaikki
Oletus	Ei mitään
Alue	0000 0000 0001 - FFFF FFFF FFFD Poikkeukset: • Älä käytä monilähetysosoitetta (vähiten merkitsevä korkean tavun bitti = 1).  • Älä käytä pelkkiä nollia tai F-kirjaimia. Ei läsnä -asetus: palauttaa sovittimen alkuperäisen verkko-osoitteen.
Windows 98SE -käyttäjät:

Jos haluat käyttää oletusosoitetta käytettyäsi manuaalisesti määritettyä osoitetta, suorita yksi seuraavista toimenpiteistä:

•	Valitse Verkon ominaisuudet -valintaikkunan Lisäasetukset-välilehdestä Paikallisesti määritetty osoite ja muuta sen arvoksi 0. Ota asetus käyttöön napsauttamalla OK.

•	Napsauta Intel PROSet II:ssa Lisäasetukset-välilehteä, napsauta sitten Palauta oletusarvot tai poista kaikki merkit Arvo-kentästä. Ota asetus käyttöön napsauttamalla OK.

Kirjaa linkin tilatapahtuma lokiin

Tällä asetuksella otetaan käyttöön ja poistetaan käytöstä linkin tilan muutosten kirjaaminen. Jos se on käytössä, linkin toiminnan muutostapahtuma tai linkin menetyksen muutostapahtuma luo viestin, joka näkyy järjestelmän tapahtumalokissa. Järjestelmänvalvojat näkevät tapahtumaviestin järjestelmän tapahtumalokista.

Seuraavat tapahtumat kirjataan:

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Tuetut sovittimet	Kaikki
Oletus	Ota käyttöön
Alue	Käyttöön, Pois käytöstä
Purku vastaanottaa TCP-tarkistussumman

Antaa sovittimen varmistaa saapuvien pakettien TCP- tai UDP-tarkistussumman.

•	Kun purku on poissa käytöstä, käyttöjärjestelmä varmistaa TCP-tarkistussumman.

•	Kun purku on käytössä, sovitin suorittaa varmistuksen käyttöjärjestelmälle.

Tämä toiminto parantaa vastaanoton suorituskykyä ja vähentää suorittimen käyttöä.

Tuetut käyttöjärjestelmät	• Windows XP* • Windows 2000 • Windows 98 ei tue purkamista.
Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	• Windows* XP: Päälle • Windows 2000: Pois päältä
Alue	Päälle, Pois päältä
Pura lähetyksen IP-tarkistussumma

Antaa sovittimen laskea lähtevien pakettien IP-tarkistussumman.

•	Kun purku on poissa käytöstä, käyttöjärjestelmä varmistaa IP-tarkistussumman.

•	Kun purku on käytössä, sovitin suorittaa varmistuksen käyttöjärjestelmälle.

Tämä toiminto parantaa IP-lähetyssuorituskykyä ja vähentää suorittimen käyttöä.

Tuetut käyttöjärjestelmät	• Windows XP* • Windows 2000 • Windows 98 ei tue purkamista.
Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Päälle
Alue	Päälle, Pois päältä
Pura lähetyksen TCP-tarkistussumma

Antaa sovittimen laskea lähtevien pakettien TCP- tai UDP-tarkistussumman.

•	Kun purku on poissa käytöstä, käyttöjärjestelmä varmistaa TCP-tarkistussumman.

•	Kun purku on käytössä, sovitin suorittaa varmistuksen käyttöjärjestelmälle.

Tämä toiminto parantaa TCP:n ja UDP:n lähetyksen suorituskykyä ja vähentää suorittimen käyttöä.

Tuetut käyttöjärjestelmät	• Windows XP* • Windows 2000 • Windows 98 ei tue purkamista.
Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Päälle
Alue	Päälle, Pois päältä HUOMAUTUS: Poista tämä toiminto käytöstä, kun palvelin tukee DOS-pohjaisia asiakkaita.
QoS-paketinmerkintä

Antaa sovittimen lähettää ja vastaanottaa IEEE 802.3ac -merkittyjä kehyksiä, joihin kuuluvat seuraavat:

•	802.1p QoS (Quality of Service, palvelun laatu) -merkinnät vaaditaan ensisijaisille merkityille paketeille ja

•	802.1Q -merkinnät vaaditaan VLAN-verkoille.

Intel PROSet II ottaa automaattisesti käyttöön 802.1p-merkinnän, kun määritetään VLAN-verkko.

Tuetut sovittimet	82559-pohjaiset sovittimet ja uudemmat. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä
Vastaanoton kuvaajat

Määrittää vastaanoton kuvaajat. Nämä ovat datasegmenttejä, joiden avulla sovitin voi varata vastaanotetut paketit muistiin. Kukin vastaanotettu paketti vaatii yhden vastaanoton kuvaajan ja kukin kuvaaja käyttää 2 kt muistia.

Haluat ehkä suurentaa Vastaanoton kuvaajat -asetusta, jos huomaat vastaanottoliikenteen suorituskyvyn heikentyvän merkitsevästi. Jos vastaanoton suorituskyvyssä ei ole ongelmia, käytä oletusasetusta 256.

Tuetut sovittimet	Kaikki
Oletus	160
Alue	80-2048
TCP-segmentoinnin purku

Antaa sovitinlaitteiston segmentoida tiedot kelvollisiksi Ethernet-kehyksiksi.

•	Kun TCP-segmentointi on poissa käytöstä, käyttöjärjestelmä segmentoi tiedot ennen niiden lähettämistä sovittimeen lähetystä varten.

•	Kun TCP-segmentointi on käytössä, sovitin segmentoi tiedot kehyksiksi.

Koska sovitinlaitteisto pystyy suorittamaan datan segmentoinnin paljon nopeammin kuin käyttöjärjestelmäohjelmisto, tämä ominaisuus parantaa huomattavasti lähetyksen suorituskykyä. Tämän lisäksi sovitin kuluttaa vähemmän suoritinresursseja.

Tuetut käyttöjärjestelmät	Windows XP*
Tuetut sovittimet	Vain 82544- ja 82540-pohjaiset. Lisätietoja sovittimen tunnistamisesta on kohdassa Sovittimien tekniset tiedot.
Oletus	1
Alue	0 = älä ilmoita tätä toimintoa; 1 = ilmoita tämä toiminto.

Lähetyksen kuvaajat

Määrittää lähetyksen kuvaajien määrän. Lähetyksen kuvaajat ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii yhden tai useamman lähetyksen kuvaajan.

Haluat ehkä lisätä lähetyksen kuvaajia, jos huomaat lähetyksen suorituskyvyssä ongelmia. Vaikka lähetyksen kuvaajien määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen kuvaajat kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä oletusasetusta 256.

Tuetut sovittimet	Kaikki
Oletus	256
Alue	80-2048
Herätys linkillä -asetukset

Siirtää tietokoneen valmiustilasta toimintatilaan, jos verkkoliitäntä muodostaa linkin tietokoneen valmiustilan aikana. Tämän ominaisuuden voi ottaa käyttöön, sen voi poistaa käytöstä tai käyttöjärjestelmän voi sallia käyttää oletusasetustaan.

Tuetut käyttöjärjestelmät	Windows 9x, Windows 2000, Windows XP
Alue	Pois käytöstä, Pakotettu, Käyttöjärjestelmän ohjaama
Oletus	Pois käytöstä

Herätysasetukset

Nämä asetukset liittyvät ominaisuuksiin, jotka ovat joko käyttöjärjestelmän tai Intel PROSet -ohjelman aktivoimia. Windowsin version mukaan ominaisuudet toimivat eri tavoin tai niitä ei tueta ollenkaan.

Seuraavat Windows-versiot tukevat Herätys asetuksilla -toimintoa: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional ja Windows Server 2003. Tätä toimintoa ei tueta Windows Server 2003 for 64-bit Itanium(R) -pohjaisissa järjestelmissä.

Herätysasetusten ottaminen käyttöön

Intel PROSetin avulla voidaan määrittää sovittimen käyttämät herätysasetukset. Ennen kuin valitset herätysasetukset, määritä käyttöjärjestelmä käyttämään herätysasetuksia. Toimi noudattamalla tähän liittyviä ohjeita.

Herätysasetusten ottaminen käyttöön

1.	Valitse Intel PROSetissa Lisäasetukset-välilehti.

2.	Valitse Asetus-luetteloruudusta Herätys asetuksilla.

3.	Valitse Arvo-luettelosta haluamasi herätysasetus.

4.	Valitse OK tai Käytä.

5.	Jotta sovitin vastaisi tämän tyyppisiin herätyspaketteihin, myös käyttöjärjestelmässä on käytettävä herätysasetuksia. Voit ottaa Herätys asetuksilla -toiminnon käyttöön siirtymällä Laitehallintaan ja ottamalla käyttöön Salli tämän laitteen palauttaa tietokone valmiustilasta -asetuksen.

Käytettävissä olevat asetukset

Intel PROSetissa käytettävissä olevat herätysasetukset:

Asetus	Kuvaus
Pois käytöstä	Sovitin ei käytä herätysasetuksia.
Herätys taikapaketilla	Sallii sovittimen herätä vasteena taikapaketin vastaanottoon. Taikapaketti on paketti, joka sisältää 16 peräkkäistä kopiota vastaanottavan sovittimen Ethernet-osoitteesta. Kun määrität tämän toiminnon, Intel PROSet ohittaa käyttöjärjestelmän arvon tälle toiminnolle.
Herätys ohjatulla paketilla	Sallii sovittimen herätä, kun se vastaanottaa Ohjatun paketin, joka on sovittimen MAC-osoitteeseen lähetetty yksittäislähetyspaketti.  Protokollan on otettava tämä herätysmenetelmä käyttöön ohjaimessa. Tämän ominaisuuden poisto käytöstä ilmoittaa ohjaimelle, että se jättää huomiotta kaikki protokollan pyynnöt tämän herätysmenetelmän käyttöönottamiseksi.
Herätys taikapaketilla ja ohjatuilla paketeilla	Sovitin herättää järjestelmän vastaanottaessaan taikapaketin tai ohjatun paketin.
Käyttöjärjestelmän ohjaama	Sallii käyttöjärjestelmän hallita kaikkia herätysasetuksia.

HUOMAUTUS: Jos yhdelle sovittimelle määritetään useita IP-osoitteita, käyttöjärjestelmä voi ARP-kuvioiden osalta edellyttää herättämistä kaikkiin määritettyihin osoitteisiin. Sovitin herätetään ainoastaan vasteena ARP-paketteihin, jotka kysyvät luettelon ensimmäistä IP-osoitetta.

HUOMAUTUS: Tietokonetta ei voi käynnistää sammutustilasta (S5) herätysasetuksia käyttämällä. Tätä tilaa hallitaan PME käyttöön -asetuksella, jota niin ikään voi käyttää Lisäasetukset-välilehdestä. Vaikka herätysasetukset olisikin poistettu käytöstä, PME käyttöön -asetus määrittää, voidaanko järjestelmä herättää S5-tilasta.

PME-asetukset toimivat niin kauan kuin sovittimen ohjain on käytössä. Kun ohjain on poistettuna käytöstä, laite kuitenkin palauttaa käyttöön laitteisto-oletusasetuksensa, joka ehkä sallii tietokoneen herättämisen sammutustilasta tai estää tämän.

Palauta oletusarvot -painike

Tällä painikkeella palautetaan valitun Lisäasetus-vaihtoehdon oletusarvo.  Katso oletusarvot yllä olevista asetuksista.  (Tämä vaihtoehto ei ole käytettävissä jokaiselle asetukselle.)


Kokoonpanon tallentaminen tai palauttaminen
Intel(R) PROSet II -kokoonpanon palauttaminen tallennetusta tiedostosta

Jos olet tallentanut sovittimen lisäasetukset tiedostoon, voit käyttää tiedostoa palauttamaan mukautetut VLAN- ja ryhmäasetukset. Huomaa, että Intel PROSet II -kokoonpanon palauttaminen ei palauta käyttöjärjestelmäkohtaisia verkkoasetuksia, kuten IP-osoitetta tai yhteyskäytäntösidoksia.

Ennen aloittamista

Asetukset on palautettava samassa tietokoneessa, jossa ne on luotu. Lisäksi tietokoneeseen on oltava asennettuna sama verkko ja laitteisto kuin alkuperäisessä tallennetussa kokoonpanossa. Jos esimerkiksi tietokone oli kytketty Intel gigabit -kytkimeen kokoonpanotiedoston tallentamisen aikana, tietokone on kytkettävä samaan kytkimeen kokoonpanoa palautettaessa.

Tallenna/Palauta-toiminto on yhteensopiva Windows NT* 4.0:n, 2000:n, 98SE:n, Me:n ja XP:n kanssa.

VAROITUS: Älä muokkaa kokoonpanotiedostoa. Kokoonpanotiedoston muokkaaminen tekee siitä käyttökelvottoman.

Sovittimen asetusten palauttaminen tallennetusta tiedostosta:

1.	Valitse Työkalut-valikosta Tallenna/palauta-kokoonpano.
Näyttöön tulee Tallenna/palauta-valintaikkuna.

2.	Valitse Palauta.
Näyttöön tulee Avaa-valintaikkuna.

3.	Siirry kansioon, johon kokoonpanotiedosto on tallennettu, ja valitse tiedosto.

4.	Valitse Avaa.
Intel PROSet II tuo näyttöön palautetut asetukset. Näitä asetuksia ei käytetä, ennen kuin valitset OK.

5.	Tee tarvittaessa muutokset sovittimen kokoonpanoon.

6.	Sulje Intel(R) PROSet II ja ota muutokset käyttöön napsauttamalla OK.

Katso myös:

Tallenna kokoonpano


Lisää sovitin ryhmään -varoitus
Sovittimen lisääminen ryhmään

Kun luot ryhmän, varmista, että kukin sovitin on vain yhden ryhmän jäsen. Tämä käsittää ryhmät, jotka on luotu Intel(R) PROSet -ohjelmalla, ja ryhmät, jotka on luotu muita kokoonpanotyökaluja käyttämällä. Saman sovittimen lisääminen useisiin ryhmiin voi heikentää ryhmän toimintaa ja suorituskykyä.

•	Jos ryhmät on luotu Intel PROSet -ohjelmalla, tarkista ryhmän nykyiset jäsenet puunäkymässä.

•	Jos ryhmät on luotu jollain muulla kokoonpanotyökalulla, tarkista ryhmät ja niiden jäsenet kyseisten työkalujen avulla ja varmista, että sovitin ei ole jo toisessa ryhmässä.

Katso myös

Sovittimen poistaminen ryhmästä

Uuden ryhmän luominen


Liikkuminen PROSet II -ohjelmassa
Liikkuminen Intel(R) PROSet II -ohjelmassa

Intel(R) PROSet II -ohjelmassa on kolme osaa liikkumista varten:

•	Valikko

•	Verkkokomponenttipuu

•	Välilehdet

Valikon kautta voidaan:

•	määrittää ryhmiä tai ottaa käyttöön IP-suojaus kohdasta Toiminta

•	tallentaa sovittimen VLAN-verkko ja ryhmityskokoonpano tai palauttaa ne kohdasta Työkalut

•	käyttää online-ohjetta tai Intelin tuen Web-sivustoa.

Verkkokomponenttipuun avulla voidaan:

•	tarkastella sovittimen tietoja ja kokoonpanoasetuksia sovitinta napsauttamalla

•	määrittää ryhmiä ja ottaa käyttöön IPSec napsauttamalla sovitinta hiiren kakkospainikkeella

•	muuttaa ryhmäasetuksia tai määrittää VLAN-verkkoja napsauttamalla ryhmää hiiren kakkospainikkeella

•	muuttaa ryhmän sovittimen asetuksia napsauttamalla ryhmän jäsentä hiiren kakkospainikkeella.

Välilehdillä voi suorittaa sovittimen valvonta- ja määritystehtäviä.

Tehtäväpalkin kuvake

Näytä tehtäväpalkin kuvake -valintaruudun avulla voit näyttää tai piilottaa Intel PROSet II -tehtäväpalkin kuvakkeen tehtäväpalkissa (lähellä kelloa). Voit piilottaa kuvakkeen poistamalla valinnan valintaruudusta.

Lisätietoja Intel(R) PROSet II -tehtäväpalkin kuvakkeesta


Yleistä

Kun haluat tarkastella yleisiä tietoja sovittimesta, napsauta sovitinta verkkokomponenttipuussa.

Yleiset-välilehdestä voit suorittaa seuraavat toiminnot:

•	sovittimen perustietojen tarkasteleminen

•	kaapelin toimivuuden testaaminen
HUOMAUTUS: Kaapelitesti on käytettävissä vain valituille sovittimille.

•	sovittimen paikan tunnistaminen

•	lisätietojen tarkasteleminen


Sovittimen perustietojen tarkasteleminen

Yleiset-välilehti sisältää seuraavat tiedot verkkokomponenttipuussa valitusta sovittimesta:

Ethernet-osoite	Sovittimen 12-numeroinen heksadesimaaliosoite, jota kutsutaan myös MAC-osoitteeksi.
Osanumero	Sovittimen Intel-osanumero.
IP-osoite	Sovittimen TCP/IP-osoite, jos käytössä on IPv4-yhteyskäytäntö.  Intel PROSet II ei toistaiseksi näytä IPv6-osoitteita.
Verkko-ohjaimen tila	Ilmaisee, onko valittuun sovittimeen tällä hetkellä ladattu Intel-verkko-ohjain vai ei.
Verkon tila	Ilmaisee valitun sovittimen linkin, nopeuden ja suuntaisuuden tilan. Verkon tila -ryhmäruudussa olevat kentät vaihtelevat sovittimen mukaan.  • Linkin merkkivalo: Kun merkkivalo palaa, sovittimen kaapeli on kytketty toimivaan keskittimeen tai kytkinporttiin. Jos merkkivalo ei pala, linkkiä ei ole. • Nopeus: Ilmoitettu nopeus (1000, 100 tai 10) ilmaisee, millä nopeudella sovitin on linkitetty. • Toiminnan merkkivalo: Vilkkuu, kun sovitin on yhdistetty verkkoon, jossa on toimintaa. Jos merkkivalo ei pala, verkossa ei ole liikennettä tai kaapeli on irrotettu. • Suuntaisuus: Kaksisuuntaisuus ilmaisee, että sovitin lähettää ja vastaanottaa liikennettä samanaikaisesti. Yksisuuntaisuus ilmaisee, että sovitin parhaillaan joko lähettää tai vastaanottaa (lähetys- ja vastaanottoliikenne ei tapahdu samanaikaisesti).


Nopeuden ja suuntaisuuden määrittäminen

Oletusarvon mukaan Intel-sovittimet neuvottelevat automaattisesti nopeuden ja suuntaisuuden asetukset. Jos sovitin ei pysty muodostamaan verkkoyhteyttä käyttämällä automaattista neuvottelua, nopeuden ja suuntaisuuden asetukset on ehkä manuaalisesti määritettävä sovittimessa ja linkkikumppanissa. Jos kytkin ei esimerkiksi tue automaattista neuvottelua tai siihen on määritetty erityiset nopeuden ja suuntaisuuden asetukset, sovittimen nopeus ja suuntaisuus on määritettävä manuaalisesti, jotta ne vastaavat kytkimen asetuksia.

VAROITUS: Jos sovittimen nopeuden ja suuntaisuuden asetukset eivät täysin vastaa linkkikumppanin asetuksia, verkkoyhteys voidaan menettää.

Kun automaattinen neuvottelu on poissa käytöstä, käytettävissä ovat seuraavat linkkinopeus- ja suuntaisuusasetukset:

•	10 Mbps tai 100 Mbps kaksisuuntainen (vaatii kaksisuuntaiseksi määritetyn kaksisuuntaisuuslinkkikumppanin). Sovitin voi lähettää ja vastaanottaa paketteja samanaikaisesti.

•	10 Mbps tai 100 Mbps yksisuuntainen (vaatii yksisuuntaiseksi määritetyn linkkikumppanin). Sovitin suorittaa yhden toiminnon kerrallaan; se joko lähettää tai vastaanottaa.

Lisätietoja nopeuden ja suuntaisuuden määrittämisestä napsauttamalla asianmukaista sovitinsarjaa:

•	Intel(R) PRO/1000 (kupari)
HUOMAUTUS: Kuitupohjaiset Intel(R) PRO/1000 -sovittimet toimivat kaksisuuntaisesti nopeudella 1000 Mbps.

•	Intel(R) PRO/10- ja PRO/100 -sovittimet


PRO 10/100 -linkin määrittäminen
Nopeuden ja suuntaisuuden määrittäminen: Intel(R) PRO/10- ja PRO/100 -sovittimet

Valitse verkkokomponenttipuusta se Intel(R) PRO/10- tai PRO/100 -sovitin, jonka asetukset haluat määrittää.

1.	Valitse Lisäasetukset-välilehti.

2.	Valitse Asetus-luettelosta Linkkinopeus ja suuntaisuus.

3.	Valitse Linkkinopeus ja suuntaisuus -ruudusta sovittimelle ja sen linkkikumppanille sopiva nopeus ja suuntaisuus.  Lisätietoja linkkikumppanin nopeus- ja suuntaisuustilan tunnistamisesta on linkkikumppanin ohjeissa.

4.	Valitse OK.

5.	Käynnistä tarvittaessa tietokone uudelleen.

Sovittimen nopeus- ja suuntaisuusasetukset on nyt määritetty.

VAROITUS: Jos sovittimen nopeus- ja suuntaisuusasetukset eivät täysin vastaa kytketyn laitteen asetuksia, verkkoyhteys voi katketa tai sovittimen suorituskyky voi olla huono.


Sovittimen lisäominaisuuksien määrittäminen

Voit tarkastella sovittimen lisäominaisuuksia valitsemalla sovittimen tyypin:

•	Intel(R) PRO/1000 Desktop

•	Intel(R) PRO/1000 -palvelin

•	Intel(R) PRO/100 S

•	Intel(R) PRO/100 VE ja VM

•	Intel(R) PRO/10


Kytkimen vikasieto

Kytkimen vikasieto (SFT) -toiminnon avulla voit yhdistää kaksi ryhmitettyä sovitinta kahteen kytkimeen. Kumpikin sovitin yhdistetään eri kytkimeen:

Kytkimen vikasieto voi tunnistaa viat niiden esiintymisen yhteydessä:

•	jommassakummassa ryhmitetyssä sovittimessa

•	jommassakummassa kaapelissa, joka yhdistää ryhmän sovittimen sen kytkimeen

•	sovittimiin yhdistetyissä kytkinporteissa

•	jommassakummassa sovittimiin yhdistetyssä kytkimessä.

SFT-ryhmissä yksi sovitin on ensisijainen sovitin ja yksi sovitin on toissijainen sovitin. Normaalikäytössä toissijainen sovitin on valmiustilassa. Se ei lähetä eikä vastaanota liikennettä. Jos ensisijainen sovitin menettää verkkoyhteyden, toissijainen sovitin siirtyy automaattisesti sen tilalle.

Sovittimen nopeus	Eri nopeudet ovat mahdollisia, esimerkiksi niin, että toinen sovitin toimii nopeudella 100 Mbps ja toinen nopeudella 1000 Mbps.
Yhteyskäytännöt	Kaikki
Verkkokokoonpano	• Kumpikin sovitin yhdistetään eri kytkimeen. • Spanning Tree on otettava käyttöön.
Katso myös:

Tietoja ryhmittämisestä

Ryhmätyypit


Kokoonpanon tallentaminen ulkoiseen tiedostoon
Kokoonpanon tallentaminen tiedostoon

Voit tallentaa Intel(R) PROSet II -ryhmityksen ja VLAN-kokoonpanon tiedostoon ja palauttaa sen Intel PROSetiin myöhemmin. Huomaa, että Intel PROSet II -kokoonpanon tallentaminen ei tallenna käyttöjärjestelmäkohtaisia verkkoasetuksia, kuten IP-osoitetta tai sidottuja yhteyskäytäntöjä.

Tallenna/Palauta-toiminto on yhteensopiva Windows NT* 4.0:n, 2000:n, 98SE:n, Me:n ja XP:n kanssa.

HUOMAUTUS: Kun kokoonpano on tallennettu tietyllä tiedostonimellä, kyseistä tiedostonimeä ei voi käyttää uudelleen. Sinun on käytettävä eri nimeä joka kerta, kun tallennat Intel PROSet II -kokoonpanon.

Intel(R) PROSet II -kokoonpanon tallentaminen:

1.	Valitse Työkalut-valikosta Tallenna/palauta-kokoonpano.
Näyttöön tulee Tallenna/palauta-valintaikkuna.

2.	Valitse Tallenna.
Näyttöön tulee Tallenna nimellä -valintaikkuna.

3.	Siirry kansioon, johon haluat tallentaa kokoonpanotiedoston, ja kirjoita tiedostonimi.

4.	Valitse Tallenna.

5.	Valitse OK.

Intel PROSet II -kokoonpano on tallennettu.

Älä muokkaa tai muuta tiedostoa kokoonpanon tallentamisen jälkeen. Kokoonpanotiedoston muokkaaminen tekee siitä käyttökelvottoman.

Katso myös

Kokoonpanon palauttaminen


Kytkimen kokoonpanon testaaminen

Suorittamalla kytkimen kokoonpanon testin voit varmistaa, että linkkikumppanit tukevat määritettyä ryhmitystilaa. Jos sovitin on esimerkiksi Fast EtherChannel** -ryhmän jäsen, Intel(R) PROSet II voi varmistaa, että sovittimeen kytketyt linkkikumppanit tukevat Link Aggregation -toimintoa.

Yksityiskohtaisia lisätietoja kunkin ryhmätilan vaatimuksista on kohdassa Tietoja ryhmittämisestä.

Varoitus: Tämän testin suorituksen aikana ryhmä menettää väliaikaisesti verkkoyhteyden.

HUOMAUTUS: Tämä testi ei havaitse virheitä, kun seuraavissa tilanteissa:

Sovittimen kokoonpano	Kytkimen kokoonpano
Dynaaminen 802.3ad	Mikä tahansa
Ryhmitetty Link Aggregation -tilassa ilman VLAN-verkkoja	Kytkin joko: • ei kuulu mihinkään VLAN-verkkoon • on määritetty merkityillä VLAN-verkoilla
on ryhmitetty Link Aggregation -tilassa VLAN-verkkojen kanssa	Kytkin: • ei kuulu sovittimessa määritettyyn VLAN-verkkoon ja • sille ei ole määritetty Link Aggregation  -toimintoa.
Kytkimen kokoonpanon testin suorittaminen:

1.	Valitse verkkokomponenttipuusta ryhmä, jota haluat testata.
Testin suorittaminen edellyttää sitä, että ryhmässä on vähintään kaksi sovitinta.

2.	Valitse Ryhmän kokoonpanon -välilehdestä Testaa kytkimen kokoonpano.
Näyttöön tulee Testaa kytkimen kokoonpano -valintaikkuna.

3.	Voit jatkaa testiä valitsemalla Kyllä.
Jos ryhmän tai linkkikumppanin kokoonpanossa havaitaan virheitä, näyttöön tulee Vianmääritys-välilehti.

HUOMAUTUS:  Spanning Tree Protocol (STP) -yhteyskäytännön testaamiseen tarvittavan ajan vuoksi Intel(R) PROSet II ei ehkä ilmaise oikein sitä, onko Spanning Tree Protocol (STP) käytössä verkossa. Varmista, että kytkimet on määritetty käyttämällä STP-yhteyskäytäntöä:

•	Käytössä SFT-ryhmille

•	Pois käytöstä (portfast) kaikille muille ryhmätiloille


Kolmatta osapuolta koskeva vastuuvapautuslauseke
* Muut tuote- ja yritysnimet voivat olla muiden yritysten tavaramerkkejä, ja niitä käytetään ainoastaan selitystarkoituksessa ja omistajien eduksi, ilman tarkoitusta loukata omistajien oikeuksia.


Virranhallinnan määrittäminen
Virrankäytön määrittäminen

Virransäästö-välilehden avulla voit määrittää sovittimen virrankäytön.  Kun sovitin säästää virtaa, se toimii nopeudella 10 Mbps.

Tämän toiminnon käyttäminen edellyttää, että sovitin:

•	on määritetty automaattisesti neuvottelemaan nopeus ja

•	on yhdistetty linkkikumppaniin, joka voi automaattisesti neuvotella nopeuden.

Jos sovitin pakotetaan toimimaan 100 Mbps:n nopeudella tai jos linkkikumppani ei voi toimia 10 Mbps:n nopeudella, virransäästöä ei voi ottaa käyttöön sovittimessa.

Joissakin tietokoneissa virransäästöasetuksia ei tallenneta tietokoneen uudelleenkäynnistyksen jälkeen. Jos asetuksia ei tallenneta, Virransäästö-välilehden yläosassa näkyy teksti Tilapäinen virransäästö. Asetuksia ei tallenneta Windows XP- tai Windows Server 2003 -järjestelmissä.

Jos asetukset eivät muutu tietokoneen uudelleenkäynnistyksen jälkeen, yläosassa näkyy teksti Virransäästöasetukset.

HUOMAUTUS: Kun virransäästö on käytössä, Intel(R) PRO/100 M -sovittimet hidastavat sovittimen käsittelyjaksoja. Tämän ominaisuuden ansiosta Intel PRO/100 M -sovittimet voivat edelleen pienentää virrankulutusta. Muut Intel PRO/100 -sovittimet eivät vähennä käsittelyjaksoja virransäästämiseksi.

Virransäästö-välilehdellä voit mukauttaa seuraavia asetuksia:

•	Sovittimen kokonaisvirrankäyttö. Kun määrität kokonaisvirrankäytön, sovitin säilyttää tämän asetuksen niin kauan kuin se pidetään käytössä. Jos sovitin poistetaan käytöstä, tätä virta-asetusta ei tallenneta.

•	Virrankäyttö valmiustilassa. Kun tietokone siirtyy valmiustilaan, sovitin säästää automaattisesti virtaa ja neuvottelee nopeudeksi 10 Mbps. Intel PROSet II säilyttää tämän asetuksen tietokoneen käynnistyskertojen välillä.

•	Virrankäyttö akkukäytön aikana Windows* XP:ssä. Kun tietokone käyttää akkua, sovitin säästää automaattisesti virtaa ja neuvottelee nopeudeksi 10 Mbps. Intel PROSet II säilyttää tämän asetuksen tietokoneen käynnistyskertojen välillä.

Tuetut sovittimet	Intel(R) PRO/100 -sovittimet
Tuetut käyttöjärjestelmät	• Windows* 98, 2000, XP, Me ja NT* kokonaisvirrankäytön määrittämiseen tai virrankäyttöön valmiustilan aikana • Windows XP virrankäytön määrittämiseen, kun tietokone toimii akkuvirralla
Oletus	Oletusarvon mukaan sovittimet kuluttavat normaalin määrän virtaa, joka tarvitaan nopeus- ja suuntaisuusasetusten säilyttämiseksi.  Kun sovitin säästää virtaa, se neuvottelee nopeudeksi 10 Mbps, mikä vähentää sovittimen käsittelemää kokonaisliikennettä.
Sovittimen virrankäytön määrittäminen:

1.	Valitse verkkokomponenttipuusta sovitin, jonka virransäästöasetukset haluat määrittää.
Jos sovitin tukee virranhallintaa, näyttöön tulee Virransäästö-välilehti.

2.	Voit vähentää kokonaisvirrankäyttöä valitsemalla Käytä virransäästöä ja neuvottele nopeudeksi 10 Mbps -vaihtoehdon ja valitsemalla sitten Käytä. Sovitin säilyttää tämän asetuksen niin kauan kuin sitä ei poisteta käytöstä.
Voit määrittää sovittimen käyttämään normaalia virtamääräänsä ja toimimaan oletusnopeudellaan valitsemalla Käytä normaalia virrankulutusta ja palauta alkuperäinen nopeus ja sen jälkeen Käytä.

3.	Voit vähentää sovittimen virrankulutusta tietokoneen ollessa valmiustilassa valitsemalla Virransäästö valmiustilassa -vaihtoehdon.

4.	Jos sovitin on käytössä Windows XP -tietokoneessa, voit myös määrittää virransäästöasetukset, kun tietokone käyttää akkuvirtaa. Voit vähentää sovittimen virrankulutusta, kun tietokone on akkuvirtatilassa, valitsemalla Virransäästö akkukäytön aikana -vaihtoehdon.

5.	Ota virransäästöasetukset käyttöön napsauttamalla OK.


Vastaanottokuormituksen tasaus

Mukautuva kuormituksen tasaus (ALB) -ryhmillä voi valinnaisesti ottaa käyttöön vastaanottokuormituksen tasauksen (Receive Load Balancing, RLB) tai poistaa sen käytöstä. RLB-asetus on aina käytettävissä:

•	Mukautuva kuormituksen tasaus (ALB) -ryhmän Lisäasetukset-välilehdessä

•	Luotaessa ALB-ryhmä käyttämällä ohjattua ryhmitystä.

Jos poistat vastaanottokuormituksen käytöstä, vain ensisijainen sovitin vastaanottaa liikennettä. Kaikki sovittimet tasaavat lähtevän (Tx) liikenteen kuormitusta.

Jos otat vastaanottokuormituksen tasauksen (RLB) käyttöön, liikenne jaetaan ryhmän jäsenten välisten nopeuserojen perusteella.

•	Saman nopeuden ryhmässä kaikki sovittimet lähettävät ja vastaanottavat IP-liikennettä. Ensisijainen sovitin välittää reitittämättömän (kerros 2) liikenteen.

•	Sekanopeusryhmässä ryhmän nopeimman yhteyden omaavay jäsenet tasaavat saapuvan (Rx) IP-liikenteen kuormitusta. Kaikki sovittimet tasaavat lähtevän (Tx) IP-liikenteen kuormitusta. Ensisijainen sovitin välittää reitittämättömän (kerros 2) liikenteen.
HUOMAUTUS: Kun vastaanottokuormituksen tasaus on käytössä, Intel(R) PROSet II valitsee automaattisesti suositellun ensisijaisen sovittimen. Voit ohittaa oletusvalinnan määrittämällä sovittimen ensisijaiseksi tai toissijaiseksi sovittimeksi.

Katso myös:

Tietoja ryhmittämisestä

Uuden ryhmän luominen


PRO/100 VE- ja VM -sovittimien lisäasetukset
Intel(R) PRO/100 VE- ja VM -sovittimien lisäasetukset

Lisäasetukset-välilehden asetusten avulla voit mukauttaa sitä, miten sovitin käsittelee puskureita, virranhallintaa ja muita ominaisuuksia. Käyttöjärjestelmän ja asennettujen sovittimien mukaan kaikki seuraavat ominaisuudet eivät ehkä ole käytettävissä.

Lisäasetukset

Mukautuvat kehystenväliset ajat

Kompensoi Ethernet-pakettien liialliset yhteentörmäykset verkossa.  Oletusarvon mukaan tämä asetus on 0, jolloin toiminto on poissa käytöstä.

Suositeltava asetus (1) toimii parhaiten useimmissa tietokoneissa ja verkoissa mukautuen dynaamisesti verkkoliikennetilanteisiin. Dynaaminen tila on aktiivinen vain silloin, kun arvoksi on määritetty 1. Joissakin harvinaisissa tapauksissa voidaan ehkä saavuttaa parempi suorituskyky määrittämällä kehysten väli manuaalisesti. Arvon määrittäminen pakottaa staattisen välin pakettien välille.

Arvon kasvattaminen lisää lähetettävien kehysten välistä viivettä.

Tuetut sovittimet	Kaikki
Oletus	0: pois käytöstä
Alue	0-255

Mukautuva linkin palaute

Nopeuttaa järjestelmän käynnistymistä ohittamalla verkkoyhteyden vaatimat käynnistysrutiinit, kun kaapeli on irrotettuna sovittimesta. Tämä vähentää merkittävästi tietokoneen käynnistymiseen tarvittavaa aikaa.

Kun Mukautuva linkin palaute Intelin Ethernet-ohjaimille on käytössä ja verkkokaapelia ei ole liitetty RJ-45-porttiin, verkkoyhteys poistetaan käytöstä. Keltainen varoituskuvake tulee esiin verkkoyhteyden viereen Laitehallinnassa.

Ota verkkoyhteys uudelleen käyttöön liittämällä verkkokaapeli RJ-45-porttiin ja käynnistämällä tietokone uudelleen.

Tuetut sovittimet	Vain Mobile-tuotteet. Ei käytettävissä jokaisessa sovitinmallissa.
Oletus	Pois päältä
Suositus	Päälle
Alue	Päälle, Pois päältä
HUOMAUTUS: Adaptive Link Response (ALR) ei toimi, kun langaton sovitin on aktiivinen järjestelmässä.

Yhdistetyt puskurit

Optimoi lähetyksen suorituskykyä mukauttamalla yhdistettyjen puskurien määrää. Näiden puskurien avulla sovitin voi yhdistää datasegmenttejä ennen paketin lähetystä.

Yhdistettyjen puskurien asetuksen on oltava määritetty toimimaan yhdessä lähetyksen kuvaajien asetuksen kanssa. Yhdistettyjen kuvaajien asetuksen tulee olla 30 - 50 % lähetyksen kuvaajista. Jos yhdistettyjen puskurien asetusta ei muuteta vastaamaan lähetyksen kuvaajien asetusta, lähetyksen suorituskyky ei ehkä parane.

Yhdistetyt puskurit -asetus lisää huomattavasti lähetyksen suorituskykyä Windows NT 4.0 -tietokoneissa. Se parantaa lähetyksen suorituskykyä myös Windows 98- ja 2000 -tietokoneissa.

Oletus	8
Suositeltava arvo	8
Alue	1-32
Paikallisesti määritetty osoite

Ohittaa sovittimen MAC-osoitteen. Voit määrittää uuden verkko-osoitteen kirjoittamalla Arvo-ruutuun 12-numeroisen heksadesimaaliluvun.

Oletus	Ei mitään
Alue	0000 0000 0001 - FFFF FFFF FFFD Poikkeukset: • Älä käytä monilähetysosoitetta (vähiten merkitsevä korkean tavun bitti = 1).  • Älä käytä vain nollia tai vain F:iä.
Windows 98SE -käyttäjät:

Jos haluat käyttää oletusosoitetta käytettyäsi manuaalisesti määritettyä osoitetta, suorita yksi seuraavista toimenpiteistä:

•	Valitse Verkon ominaisuudet -valintaikkunan Lisäasetukset-välilehdestä Paikallisesti määritetty osoite ja muuta sen arvoksi 0. Ota asetus käyttöön napsauttamalla OK.

•	Napsauta Intel PROSet II:ssa Lisäasetukset-välilehteä, napsauta sitten Palauta oletusarvot tai poista kaikki merkit Arvo-kentästä. Ota asetus käyttöön napsauttamalla OK.

PCI-väylän suorituskyky

Antaa sovittimen joko käyttää parasta menetelmää pakettien lähetykseen tai pakottaa aina käyttöön pakettien yhdistämisen.

•	Kun PCI-väylän suorituskyky -toiminto on poissa käytöstä, sovitin käyttää sitä lähetysmenetelmää, jolla saavutetaan paras mahdollinen suorituskyky. Jos pakettien yhdistäminen tuottaa parhaan lähetyksen suorituskyvyn, sovitin automaattisesti yhdistää paketit.

•	Kun PCI-väylän suorituskyky -asetus on käytössä, sovitin pakottaa käyttämään pakettien yhdistämistä.

Poista PCI-väylän suorituskyky -asetus käytöstä, jos pakettien lähetyksen suorituskyvyssä ei ole ongelmia. Jos alikuormitus on suurta tai PCI-väylässä on suorituskykyongelmia, ota tämä asetus käyttöön.

Oletus	Pois käytöstä
Alue	Käytössä, Pois käytöstä

Vastaanottopuskurit

Määrittää puskurien määrän, jota ohjain käyttää tietojen kopioimisessa yhteyskäytäntömuistiin.

Verkon kuormituksen ollessa suuri vastaanottopuskurien lisääminen voi parantaa suorituskykyä. Haittapuolena on kuitenkin se, että tämä lisää ohjaimen käyttämää järjestelmämuistin määrää. Muissa tapauksissa tämän arvon muuttaminen voi huonontaa järjestelmän suorituskykyä.  Olet itse vastuussa muutosten seurauksista.

Oletus	48
Suositeltava arvo	• Yksi sovitin käyttöjärjestelmissä Windows 98, Windows Me, Windows 2000 ja Windows XP: 48 • Yksi sovitin Windows NT 4.0:ssa: 32 • Ryhmitetty sovitin: 250
Alue	8-1024
Lähetä uudelleen kehystenvälinen aika

Lisää kehysten uudelleenlähetysten välistä viivettä. Vaikka sovittimet käyttävät sisäänrakennettua Ethernet-algoritmia kehysten lähettämiseksi uudelleen törmäysten jälkeen, viiveen kasvattaminen voi parantaa verkon suorituskykyä, jos verkossa on epätavallisen suuri määrä törmäyksiä.

Tuetut sovittimet	Kaikki
Oletus	6
Alue	6-15

Lähetyksen valvontalohkot

Määrittää lähetyksen valvontalohkojen määrän. Lähetyksen valvontalohkot ovat datasegmenttejä, joiden avulla sovitin voi jäljittää lähetyspaketteja järjestelmämuistissa. Paketin koon mukaan kukin lähetyspaketti vaatii vähintään yhden lähetyksen valvontalohkon.

Haluat ehkä lisätä lähetyksen valvontalohkoja, jos huomaat mahdollisen ongelman lähetyksen suorituskyvyssä. Vaikka lähetyksen valvontalohkojen määrän lisääminen voi parantaa lähetyksen suorituskykyä, lähetyksen valvontalohkot kuluttavat järjestelmämuistia. Jos lähetyksen suorituskyvyssä ei ole ongelmia, käytä suositeltua oletusasetusta 32.

Oletus	16
Suositeltava arvo	32
Alue	8-64
Herätys linkin muutoksella

Siirtää tietokoneen valmiustilasta toimintatilaan, jos verkkoliitäntä muodostaa linkin tietokoneen valmiustilan aikana. Tämän ominaisuuden voi ottaa käyttöön, sen voi poistaa käytöstä tai käyttöjärjestelmän voi sallia käyttää oletusasetustaan.

Tuetut käyttöjärjestelmät	Windows 9x, Windows 2000, Windows XP
Alue	Pois käytöstä, Pakotettu, Käyttöjärjestelmäriippuvainen
Oletus	Pois käytöstä
Herätysasetukset

Nämä asetukset liittyvät ominaisuuksiin, jotka ovat joko käyttöjärjestelmän tai Intel(R) PROSet II -ohjelman aktivoimia. Windowsin version mukaan ominaisuudet toimivat eri tavoin tai niitä ei tueta ollenkaan.

•	Seuraavat Windows-versiot tukevat Herätys asetuksilla -toimintoa: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	Seuraavat Windows-versiot eivät tue mitään Herätys asetuksilla -toimintoa:  Windows 98 retail ja Windows NT 4.0.

HUOMAUTUS: Vain Intel(R) PRO/100+ Management -sovittimet ja -palvelinsovittimet sekä Intel(R) PRO/100 S -sovittimet tukevat Herätys asetuksilla -ominaisuutta.

Herätys asetuksilla -toiminnon ottaminen käyttöön käyttöjärjestelmässä

Seuraavat Herätys-paketit vaativat, että Herätys asetuksilla -toiminto on otettu käyttöön käyttöjärjestelmässä:

•	Herätys ARPilla

•	Herätys ohjatulla paketilla

•	Herätys NBT-kyselyllä

Jotta sovitin vastaista näihin Herätys-paketteihin, Herätys asetuksilla -toiminnon on oltava käytössä käyttöjärjestelmässä. Voit ottaa Herätys asetuksilla -toiminnon käyttöön siirtymällä Laitehallintaan ja ottamalla käyttöön Salli tämän laitteen palauttaa tietokone valmiustilasta -asetuksen. Tämä asetus löytyy seuraavasti:

1.	Valitse Käynnistä > Ohjauspaneeli.
Ohjauspaneeli-ikkuna avautuu.

2.	Kaksoisnapsauta Järjestelmä.
Näyttöön tulee Järjestelmä-valintaikkuna.

3.	Valitse Laitteisto-välilehti ja valitse sitten Laitehallinta-painike.
Näyttöön tulee Laitehallinta-ikkuna.

4.	Kaksoisnapsauta sovitinta, jossa haluat ottaa käyttöön herätysasetukset.
Näyttöön tulee Ominaisuudet-valintaikkuna.

5.	Valitse Virranhallinta-välilehti.

6.	Ota Herätys asetuksilla -toiminto käyttöön sovittimessa valitsemalla Salli tämän laitteen palauttaa tietokone valmiustilasta -asetus.

Käytettävissä olevat asetukset

Intel PROSet II:ssa käytettävissä olevat herätysasetukset:

Asetus	Kuvaus
Pois käytöstä	Sovitin ei käytä herätysasetuksia.
Herätys taikapaketilla	Sallii sovittimen herätä vasteena taikapaketin vastaanottoon. Taikapaketti on paketti, joka sisältää 16 peräkkäistä kopiota vastaanottavan sovittimen Ethernet-osoitteesta. Kun määrität tämän toiminnon, Intel PROSet II ohittaa käyttöjärjestelmän arvon tälle toiminnolle.
Herätys ohjatulla paketilla	Sallii sovittimen herätä, kun se vastaanottaa Ohjatun paketin, joka on sovittimen MAC-osoitteeseen lähetetty yksittäislähetyspaketti.  Protokollan on otettava tämä herätysmenetelmä käyttöön ohjaimessa. Tämän ominaisuuden poisto käytöstä ilmoittaa ohjaimelle, että se jättää huomiotta kaikki protokollan pyynnöt tämän herätysmenetelmän käyttöönottamiseksi.
Herätys taikapaketilla ja ohjatuilla paketeilla	Sovitin herättää järjestelmän vastaanottaessaan taikapaketin tai ohjatun paketin.
Käyttöjärjestelmän ohjaama	Sallii käyttöjärjestelmän hallita kaikkia herätysasetuksia.

HUOMAUTUS: Jos yhdelle sovittimelle määritetään useita IP-osoitteita, käyttöjärjestelmä voi ARP-kuvioiden osalta edellyttää herättämistä kaikkiin määritettyihin osoitteisiin. Sovitin herätetään ainoastaan vasteena ARP-paketteihin, jotka kysyvät luettelon ensimmäistä IP-osoitetta.

HUOMAUTUS: Tietokonetta ei voi käynnistää sammutustilasta (S5) herätysasetuksia käyttämällä. Tätä tilaa hallitaan PME käyttöön -asetuksella, jota niin ikään voi käyttää Lisäasetukset-välilehdestä. Vaikka herätysasetukset olisikin poistettu käytöstä, PME käyttöön -asetus määrittää, voidaanko järjestelmä herättää S5-tilasta.

PME-asetukset toimivat niin kauan kuin sovittimen ohjain on käytössä. Kun ohjain on poistettuna käytöstä, laite kuitenkin palauttaa käyttöön laitteisto-oletusasetuksensa, joka ehkä sallii tietokoneen herättämisen sammutustilasta tai estää tämän.


Ryhmätyypit

Intel(R) PROSet II:n avulla voidaan määrittää seuraavia ryhmiä:

•	Sovittimen vikasietoryhmä (AFT)

•	Kytkimen vikasieto (SFT)

•	Mukautuva kuormituksen tasaus (ALB). Sisältää vastaanottokuormituksen tasauksen (RLB).

•	FEC* / LA / 802.3ad: Staattinen

GEC* / LA / 802.3ad: Staattinen

•	IEEE 802.3ad: Dynaaminen

Sovittimen vikasieto

Ominaisuudet	• Vikasieto Antaa käyttöön sovittimen automaattisen rinnakkaisvarmennuksen. Jos ensisijainen sovitin vikaantuu, toissijainen sovitin siirtyy sen tilalle.
Verkkokokoonpano	• Kaikki sovittimet on kytkettävä samaan kytkimeen. • Spanning Tree -toiminnon on oltava poissa käytöstä. • Kaikkia kytkintyyppejä tuetaan.

Kytkimen vikasieto

Ominaisuudet	• Vikasieto Luo vikasietosuhteen kahden sovittimen välille, kun kumpikin sovitin on yhdistetty eri kytkimeen. •
Verkkokokoonpano	• Kumpikin sovitin yhdistetään eri kytkimeen. • Spanning Tree on otettava käyttöön.

Mukautuva kuormituksen tasaus (ALB)

Ominaisuudet	• Vikasieto • Lähetyskuormituksen tasaus • IP-liikenteen vastaanottokuormituksen tasaus (RLB) (valinnainen)
Verkkokokoonpano	• Kaikki sovittimet on kytkettävä samaan kytkimeen. • Kaikkia kytkintyyppejä tuetaan.

FEC/LA/802.3ad: Staattinen

Ominaisuudet	• Vikasieto • Lähetyskuormituksen tasaus • Vastaanottokuormituksen tasaus
Verkkokokoonpano	• Kaikkien sovittimien tulee toimia 100 Mt/s:n nopeudella. • Kaikki sovittimet on kytkettävä samaan kytkimeen. • Käytettävä kytkimellä, joka pystyy käsittelemään Link Aggregation -toiminnon: • Cisco FEC:tä tukevat kytkimet käyttäen PAgP-yhteyskäytäntöä. • Intel Express(R) -kytkimet, jotka tukevat Link Aggregation -toimintoa. • Muut kytkimet, jotka tukevat staattista 802.3ad:tä.

GEC/LA/802.3ad: Staattinen

Ominaisuudet	• Vikasieto • Lähetyskuormituksen tasaus • Vastaanottokuormituksen tasaus
Verkkokokoonpano	• Kaikkien sovittimien tulee toimia 1000 Mt/s:n nopeudella. • Kaikki sovittimet on kytkettävä samaan kytkimeen. • Käytettävä kytkimellä, joka pystyy käsittelemään Link Aggregation -toiminnon: • Cisco GEC:tä tukevat kytkimet käyttäen PAgP-yhteyskäytäntöä. • Intel Express -kytkimet, jotka tukevat Link Aggregation -toimintoa. • Muut kytkimet, jotka tukevat staattista 802.3ad:tä.

IEEE 802.3ad: Dynaaminen

Ominaisuudet	• Vikasieto • Lähetyskuormituksen tasaus • Vastaanottokuormituksen tasaus
Verkkokokoonpano	• Ryhmän jäsenet voivat toimia eri nopeuksilla. • Kaikki sovittimet on kytkettävä samaan kytkimeen. • Sovittimiin yhdistetyn kytkimen on tuettava täysin IEEE 802.3ad -standardia.
Katso myös:

Tietoja ryhmittämisestä


Diagnostiikkaloki
Diagnostiikkalokin määrittäminen

Intel PROSet II tallentaa diagnostiikkatesti- ja Lähettäjä/vastaaja-testi-tiedot diagnostiikkalokiin.

Lokin määrittäminen:

1.	Avaa Rekisterieditori. Valitse Käynnistä > Suorita. Kirjoita Avaa-ruutuun regedit.
Rekisterieditori käynnistyy.

2.	Siirry rekisteriavaimeen HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Muokkaa rekisteriparametreja.

Tehtävä	Nimi	Oletusarvo	Mahdolliset arvot
Ota diagnostiikkaloki käyttöön tai poista se käytöstä	Ota käyttöön	1: Ota käyttöön	1: Ota käyttöön 0: Poista käytöstä
Lokitiedoston sijainti	FilePath	System32	Mikä tahansa järjestelmän kelvollinen polku
Määritä, säilyttääkö Intel PROSet II lokitiedostossa olevat tiedot vai poistaako se ne	FileAppend	1: Ota käyttöön	1: Lisää olemassa olevan lokin tietoihin 0: Poista olemassa olevat tiedot aina, kun käyttäjä suorittaa diagnostiikka- tai Lähettäjä/vastaaja-testin.
Määrittää lokitiedoston enimmäiskoon tavuina	MaxFileSize	36 kt	Lokin sisältämien tietojen tavumäärä.
4.	Sulje Rekisterieditori, kun olet tehnyt muutokset lokin kokoonpanoon.


Diagnostiikka: Yleiskatsaus
Diagnostiikan yleiskatsaus

Intel(R) PROSet II -ohjelmassa on kolme eri diagnostiikkatestiä.

•	Diagnostiikkatestit suorittavat sovittimen kunnon perusanalyysin.  Kun Intel PROSet II suorittaa perusdiagnostiikan testit, se tarkistaa I/O-ristiriidat, muistivirheet, EEPROMin toimivuuden, lähetys- ja vastaanottotoiminnot ja linkin.

•	Kaapelitesti antaa tietoja kaapelin pituudesta, polaarisuudesta ja muista kaapelin ominaisuuksista.

•	Lähettäjä-vastaaja-testin avulla voidaan analysoida sovittimen toimintoja verkossa. Tämän testin suorittamiseen tarvitaan kaksi tietokonetta.

Testitulokset näkyvät Intel PROSet II -ohjelmassa. Tämän lisäksi Intel PROSet II tallentaa diagnostiikkatestien ja Lähettäjä-vastaanottaja-testin tulokset diagnostiikan lokitiedostoon. Lisätietoja on kohdassa Diagnostiikkalokin määrittäminen.


Sovittimien tekniset tiedot

Ohjain	Kortin tunnusnumero	Tuotenimi (liittimet)	Intel -osanumero
82545EM	A92165-xxx	PRO/1000 MT -palvelinsovitin	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT Dual Port -palvelinsovitin	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MT -palvelinsovitin	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF -palvelinsovitin (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF Dual Port -palvelinsovitin	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Desktop -sovitin	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF -palvelinsovitin	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI -palvelinsovitin	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT -palvelinsovitin	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T -palvelinsovitin	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit -palvelinsovitin	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 Gigabit -palvelinsovitin	PWLA8490
82562	A19716-xxx	PRO/100 VE Desktop -sovitin	CNLA6000
82550	A78921-xxx	PRO/100 M Desktop -sovitin	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S -palvelin (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port -palvelinsovitin	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management -sovitin (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100 -sovitin	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI -sovitin (TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile -PC-kortti (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 -PC-kortti (TP)	MBLA1656
82559	748568-xxx	PRO/100 S -palvelin (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S -palvelin (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management -sovitin	PILA8900
82558	701738-xxx	PRO/100+ PCI Management -sovitin (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port --palvelinsovitin	PILA8472
82559	729757-xxx	PRO/100+ -palvelinsovitin (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI -palvelinsovitin (TP)	PILA8470


FEC
FEC* /LA/802.3ad: Staattinen

Fast EtherChannel/Link Aggregation -ryhmät lisäävät siirtonopeutta seuraavasti:

•	Sovittimen kokoonpano. Voit lisätä siirtonopeutta lisäämällä ryhmään jäseniä. Ryhmät voivat sisältää korkeintaan kahdeksan sovitinta. Kukin palvelin voi toimia korkeintaan neljän ryhmän kanssa.

•	Liikenneanalyysi. Ohjelmisto analysoi jatkuvasti kunkin ryhmäjäsenen lähetyskuormitusta ja tasaa tarvittaessa kuormituksen sovittimien kesken. Kytkin tasaa vastaanottoliikenteen kuormituksen.

FEC-ryhmät tarjoavat myös vikasietotoiminnon. Jos sovitin vikaantuu ryhmässä, toissijainen sovitin siirtyy sen tilalle.

Link Aggregation -ryhmät ovat yhteensopivia seuraavien ominaisuuksien kanssa:

Sovittimen nopeus	Kaikkien sovittimien tulee toimia samalla nopeudella.
Verkkokokoonpano	• Kaikkien sovittimien tulee toimia 100 Mt/s:n nopeudella. • Kaikki sovittimet on kytkettävä samaan kytkimeen. • Käytettävä kytkimellä, joka pystyy käsittelemään Link Aggregation -toiminnon: • Cisco FEC:tä tukevat kytkimet käyttäen PAgP-yhteyskäytäntöä. • Intel Express(R) -kytkimet, jotka tukevat Link Aggregation -toimintoa. • Muut kytkimet, jotka tukevat staattista 802.3ad:tä.
Yhteyskäytännöt	Kaikki

Katso myös:

Tietoja ryhmittämisestä

Ryhmätyypit


GEC
GEC* /LA/802.3ad: Staattinen

Gigabit EtherChannel/Link Aggregation -ryhmät lisäävät siirtonopeutta seuraavasti:

•	Sovittimen kokoonpano. Voit lisätä siirtonopeutta lisäämällä ryhmään jäseniä. Ryhmät voivat sisältää korkeintaan kahdeksan sovitinta. Kukin palvelin voi toimia korkeintaan neljän ryhmän kanssa.

•	Liikenneanalyysi. Ohjelmisto analysoi jatkuvasti kunkin ryhmäjäsenen lähetyskuormitusta ja tasaa tarvittaessa kuormituksen sovittimien kesken. Kytkin tasaa vastaanottoliikenteen kuormituksen.

GEC-ryhmät antavat käyttöön myös vikasietotoiminnon. Jos sovitin vikaantuu ryhmässä, toissijainen sovitin siirtyy sen tilalle.

Link Aggregation -ryhmät ovat yhteensopivia seuraavien ominaisuuksien kanssa:

Sovittimen nopeus	Kaikkien sovittimien tulee toimia samalla nopeudella.
Verkkokokoonpano	• Kaikkien sovittimien tulee toimia 100 Mt/s:n nopeudella. • Kaikki sovittimet on kytkettävä samaan kytkimeen. • Käytettävä kytkimellä, joka pystyy käsittelemään Link Aggregation -toiminnon: • Cisco GEC:tä tukevat kytkimet käyttäen PAgP-yhteyskäytäntöä. • Intel Express(R) -kytkimet, jotka tukevat Link Aggregation -toimintoa. • Muut kytkimet, jotka tukevat staattista 802.3ad:tä.
Yhteyskäytännöt	Kaikki

Katso myös:

Tietoja ryhmittämisestä

Ryhmätyypit


Sovittimen virranhallinnan poistaminen käytöstä

1. Napsauta hiiren kakkospainikkeella Windowsin työpöydällä olevaa Oma tietokone -kuvaketta.

2. Valitse Ominaisuudet.

3. Valitse Laitehallinta-välilehti.

4. Kaksoisnapsauta Verkkosovittimet-kuvaketta.

5. Kaksoisnapsauta Intel verkko-sovitinta.

6. Jos Virranhallinta-välilehti on näkyvissä, napsauta sitä ja varmista, että ruudusta
Salli tietokoneen sammuttaa tämä laite virran säästämiseksi
on poistettu valinta.

7. Valitse OK. Voit nyt suorittaa diagnostiikan.

Diagnostiikan suorittamisen jälkeen haluat ehkä palauttaa Virranhallinta-
toiminnon valitsemalla valintaruudun yllä olevassa kohdassa 6.