Copyright: Intelｮ PROSet Help Version 1013
Citation: Copyright ｩ Intel Corporation 2003. All rights reserved.


Testing the Cable
ケーブルのテスト

ネットワーク コンポーネント ツリー で選ばれたアダプタが以下の場合に、[ケーブルのテスト] ボタンが一般タブに表示されます。

•	ネットワークに接続されていない 82550 ベースの Intel(R) PRO/100 S サーバまたはデスクトップ アダプタ

•	Intel(R) PRO/1000 アダプタ

ケーブルのテストを Intel PRO/100 アダプタで実行するには

一般タブで、[ケーブルのテスト] をクリックします。テストには数分かかることがあります。

テストの結果は [トラブルシューティング] タブに表示されます。

ケーブルのテストを Intel PRO/1000 アダプタで実行するには

ケーブル テストの機能を使う前に、アダプタが 1000Mbps で実行されていることを確認します。100Mbps でアダプタを実行中にケーブル テストを使うことができますが、一部の情報は正確でなかったり、使用できない可能性があります。

一般タブで、[ケーブルのテスト] をクリックします。テストには数分かかることがあります。

テストの結果は、ケーブルのテスト結果のダイアログ ボックスに表示されます。次の情報が表示されます。

ケーブルの長さ：アダプタとそのリンク パートナー間のおおよそのケーブルの長さを表示します。表示されたケーブルの長さが実際のものと異なる場合は、ケーブルが破損している可能性があります。最高 30 フィートの誤差が生じることがあります。

極性：イーサネット ケーブルの送受信用ツイスト ペア ワイヤーの +/- プロパティを識別します。これらのプロパティが正しく設定されていないと、アダプタは自動修正され、エラーが報告されます。

ローカル受信機ステータス：アダプタに接続されたケーブル コネクタがトラフィックを処理できるかどうかを識別します。ローカル ステータスのテストが不合格な際には、コネクタの破損やワイヤーミスを確認します。

リモート受信機ステータス：リンク パートナーに接続されたケーブル コネクタが一連の操作テストで合格または不合格となります。リモート ステータスのテストが不合格な際には、コネクタの破損やワイヤーミスを確認します。

受信エラー数：受信エラーは、アダプタがワイヤーで識別不可能な送信を検出すると発生します。
（ケーブルをアダプタに接続するかコンピュータを再起動して）アダプタが通信をネットワークと確立するか、またはアダプタをオートネゴシエート後にアダプタを再起動すると、受信エラー数は自然に増加します。アイドル エラー数が 5 分以内に約 65,000 に到達すると、リンクの質に関する問題があります。リンクの質に関する問題を解決するには、ケーブルを再接続するか、別のケーブルを使います。

アイドル エラー数：アイドル エラーは、アダプタがワイヤーで識別不可能な送信を検出すると増加します。受信エラーと異なり、アイドル エラーはアダプタが能動的にパケットを受信していない場合に検出されます。
（ケーブルをアダプタに接続するかコンピュータを再起動して）アダプタが通信をネットワークと確立するか、またはアダプタをオートネゴシエート後にアダプタを再起動すると、アイドル エラー数は自然に増加します。アイドル エラー数が 1 分以内に約 255 に到達すると、リンクの質に関する問題があります。リンクの質に関する問題を解決するには、ケーブルを再接続するか、別のケーブルを使います。

MDI/MDI-X ステータス：アダプタに接続されたケーブルが、ストレートケーブル (MDI) とクロスオーバー ケーブル (MDI-X) のどちらに接続されているかを識別します。システムをスイッチかハブに接続する際には MDI を、2 つのシステムを接続する際には MDI-X を使います。

注： ケーブル テストの結果は、アダプタ タイプにより異なるケーブルのテスト結果のダイアログ ボックスに表示されます。


著作権

Copyright (C) 2002 Intel Corporation.All rights reserved.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

Intel Corporation は本書の誤記および省略に対して責任を一切負いません。また、本書の記載内容を更新する義務も一切負いません。

* その他の製品名またはブランドは各所有者に帰属します。


PRO/1000 サーバ アダプタの詳細設定

[詳細設定] タブに一覧表示された設定により、アダプタによる QoS パケット タグ、ジャンボ フレーム、オフロード、およびその他の機能の処理方法をカスタマイズすることができます。以下の機能の一部は使用しているオペレーティング システムとインストールされているアダプタに依存します。

詳細設定

アダプティブ インターフレーム スぺ－シング

ネットワークにおける過剰なイーサネット パケットのコリジョンを補償します。このデフォルト設定は 0 で、機能はオフになっています。

推奨される設定 (1) は、ネットワーク トラフィックの状態に動的に対応し、大部分のコンピュータやネットワークで最も効率的に機能します。この動的なモードは値が 1 に設定されている場合のみに有効ですが、まれにスペース値を手動設定することにより、より良いパフォーマンスが得られることがあります。値を設定するとパケット間の静的ギャップが強制されます。

値を増加すると、送信されるフレーム間の遅れが拡大します。

対応するアダプタ	すべて
デフォルト	0: オフ
範囲	0-255
アダプティブ リンク レスポンス

アダプタからケーブルが外された際に通常のネットワーク作業をバイパスしてシステムの起動を加速します。これによりコンピュータを起動する際に必要とされる時間を大幅に削減することができます。

Intel イーサネット コントローラのアダプティブ リンク レスポンスをオンにしたときにネットワーク ケーブルが RJ-45 ポートに接続されていない場合は、ネットワーク接続が切断され、黄色の注意アイコンがデバイス マネージャのネットワーク接続の隣に表示されます。

ネットワーク接続を再接続するには、ネットワーク ケーブルを RJ-45 ポートに接続してからコンピュータを再起動します。

対応するアダプタ	使用できないアダプタ モデルもあります。
デフォルト	オフ
推奨	オン
範囲	オン、オフ
注：システムで無線アダプタがアクティブな場合は、ALR (Adaptive Link Response) は機能しません。

集合バッファ

パケットの送信前にアダプタがデータ セグメントに追加されるように、集合バッファ数をカスタマイズして送信能力を最適化します。

集合バッファの設定は送信記述子の設定に対応するにように行う必要があります。集合バッファの設定は送信記述子の 30 - 50% とする必要があります。集合バッファの設定は送信記述子の設定に一致するように修正されていないと、送信能力は向上しない可能性があります。

集合バッファの設定は Windows NT 4.0 のコンピュータにおける送信能力を向上します。また Windows 98 と Windows 2000 のコンピュータにおける送信能力も向上します。

対応するアダプタ	すべて
デフォルト	128
範囲	16-768
PME をオンにする

Advanced Power Management (APM) を持つ比較的古いコンピュータにおけるアダプタの Wake on 機能のオン・オフを切り替えます。Wake on はアダプタ ARP パケットなどの特殊のタイプのパケットを受信すると、スタンバイまたは電源オフの状態からアダプタを切り替えます。

•	この機能をオフにすると、古い電源管理方法によりコンピュータにおけるすべての Wake on 設定がオフになります。

•	この機能をオンにすると、アダプタは Wake on 信号を使用可能とします。アダプタが特定のパケット タイプに応答するように設定するには、この章の後に示されている Wake on 設定をご覧ください。

•	ハードウェアのデフォルト値によりアダプタは Wake on 機能をシステムのハードウェアに基づいて設定します。

•	[アクションなし] の値によりアダプタはオペレーティング システムのデフォルトをオンにします。

Wake on 設定をすべてオフにするには、この機能をオフにします。あるいは、この機能を [アクションなし] に設定します。

対応するアダプタ	82559 ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オフ
範囲	オン、オフ
Fast Transmit Completion

パケットがネットワークに送信される前に再使用する送信記述子を使用可能状態にします。

•	Fast Transmit Completion がオフの際には、アダプタはパケットが送信記述子を再使用するために送信されるまで待つ必要があります。

•	Fast Transmit Completion がオンの際には、アダプタは送信能力を向上するために送信記述子を早めに再使用します。

対応するアダプタ	82543 と 82544 ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オン、オフ
フロー制御

アダプタによるフロー制御フレームの送受信を可能とします。送信パスは受信したフロー制御フレームで指定された時間、一時停止します。これらの設定によりパケットの喪失を防ぎ、ネットワークの性能を微調整することができます。

対応するアダプタ	82542 ベースの送信専用。82540、82543、および 82544 ベースのアダプタ、送受信。 アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オフ、応答、作成、作成して応答、ハードウェア デフォルト
ジャンボ フレーム

注：ジャンボ フレームは 1000 Mbps のみでサポートされます。10 Mbps または 100 Mbps でジャンボ フレームを使用すると、パフォーマンスが劣化したり、リンクが失われる場合があります。

ジャンボフレーム機能を有効、または無効にします。ジャンボフレームは、各フレームにより多くのデータを入力することにより少数のパケットを送信して、スループットを増加し CPU の利用を削減することができます。標準のイーサネットのサイズは 1514 バイトで、ジャンボ フレームは 4088、9014、または 16128 バイトを含むことが可能です。

ネットワーク全体のデバイスでサポートされ、同じフレーム サイズを使うように設定されている場合のみにジャンボ フレームを有効にします。他のネットワーク デバイスでジャンボ フレームを設定するには、ネットワーク デバイスによるジャンボ フレーム サイズの計算が異なることにご注意ください。フレーム サイズ内にヘッダ情報を含むデバイスと含まないデバイスがあります。インテルのアダプタはフレーム サイズにヘッダ－情報を含みません。

詳細情報は、ジャンボ フレーム のトピックをご覧ください。

対応するアダプタ	すべて
デフォルト	オフ
範囲	オフ (1514)、4088、9014、16128 バイト。(CRC ではスイッチを 4 バイト高く設定し、VLANs を使う場合はさらに 4 バイトを追加します。)  注：MaxFrameSize パラメータを使用して 1514～16128 の範囲内の値をWindows のレジストリに設定できます。
ローカル管理されるアドレス

アダプタの MAC アドレスを上書きします。新規のネットワーク アドレスを入力するには、値のボックスに 12 桁の 16 進数を入力してください。

対応するアダプタ	すべて
デフォルト	なし
範囲	0000 0000 0001 - FFFF FFFF FFFD 例外： • マルチキャストのアドレスは使用しないでください （上位バイトの LSB = 1）。  • ゼロや F のみの連数を使わないでください。 Not Present 設定:Not Present 設定: アダプタの元のネットワーク アドレスに戻ります。
注：チームで Intel(R) PROSet II は以下のいずれかを使います。

•	LAA が設定されている場合はチームの LAA、または

•	LAA が設定されていない場合はプライマリ アダプタの永久 MAC アドレス

Intel PROSet II は、アダプタがチームのプライマリ アダプタで、チームに LAA がある場合、アダプタの LAA を使いません。

Windows 98SE を使用する場合:

手動で割り当てたアドレスを使った後でデフォルト アドレスを使う場合は、次の手順のいずれかを行います。

•	[ネットワーク プロパティ] ダイアログ ボックスの [詳細] タブで [ローカル管理されるアドレス] を選択し、その値を0に変更します。[OK] をクリックして設定を適用します。

•	Intel PROSet IIで[詳細] タブをクリックし、[デフォルトの復元] をクリックするか [値] フィールドを空白にします。[OK] をクリックして設定を適用します。

リンクの状態のイベントのログ

この設定は、リンクの状態の変化をログ記録するかしないかの設定に使用します。オンに設定した場合は、リンクアップまたはリンクダウンへの変化イベントによってメッセージが生成され、システム イベント ロガーに表示されます。管理者はシステム イベント ロガーからイベント メッセージを表示します。

以下のイベントがログ記録されます。

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

対応するアダプタ	すべて
デフォルト	Enable
範囲	オン、オフ
受信 TCP チェックサムのオフロード

アダプタで着信パケットの TCP、あるいは UDP チェックサムの確認ができます。

•	オフロードがオフの場合、オペレーティング システムは TCP チェックサムを確認します。

•	オフロードがオンの場合、アダプタはオペレーティング システムの確認を完了します。

この機能は受信能力を高め、CPU 使用を削減します。

対応するオペレーティング システム	• Windows XP* • Windows 2000 • Windows 98 はオフロードに対応しません。
対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	• Windows* XP:オン • Windows 2000:オフ
範囲	オン、オフ
TCP セグメンテーションのオフロード

アダプタのハードウェアにより有効なイーサネット フレームでデータの分割を可能とします。

•	TCP セグメンテーションがオフの場合、オペレーティング システムのソフトウェアは、送信用データをアダプタに送る前に分割します。

•	TCP セグメンテーションがオンの状態ではアダプタはデータをフレームに分割します。

アダプタのハードウェアはオペレーティング システムのソフトウェアに比べてデータの分割を速く分割できるため、この機能は送信能力を大幅に改善します。更に、アダプタが消費する CPU リソース量が低下します。

対応するオペレーティング システム	Windows XP
対応するアダプタ	82544 ベース。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	1
範囲	0 = この機能を送信しない; 1 = この機能を送信する。
送信 IP チェックサムのオフロード

アダプタで送信パケットの IP チェックサムを計算できます。

•	オフロードがオフの場合、オペレーティング システムは IP チェックサムを確認します。

•	オフロードがオンの場合、アダプタはオペレーティング システムの確認を完了します。

この機能は IP の送信能力を高め、CPU 使用を削減します。

対応するオペレーティング システム	• Windows XP* • Windows 2000 • Windows 98 はオフロードに対応しません。
対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オン、オフ
送信 TCP チェックサムのオフロード

アダプタで送信パケットの TCP、あるいは UDP チェックサムの計算ができます。

•	オフロードがオフの場合、オペレーティング システムは TCP チェックサムを確認します。

•	オフロードがオンの場合、アダプタはオペレーティング システムの確認を完了します。

この機能は TCP と UDP の送信能力を高め、CPU 使用を削減します。

対応するオペレーティング システム	• Windows XP* • Windows 2000 • Windows 98 はオフロードに対応しません。
対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オン、オフ 注：サーバが DOS ベースのクライアントをサポートする場合、この機能をオフにします。
QoS パケット タグ

アダプタが以下を含む IEEE 802.3ac のタグ付きフレームの送受信をオンにします。

•	優先タグパケットに必要な IEEE_802.1p QoS (Quality of Service) タグ、および

•	VLAN に必要とされる 802.1Q タグ

Intel PROSet II は VLAN の設定時に自動的に 802.1p タグをオンにします。

対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オフ
範囲	オン、オフ
受信記述子

アダプタが着信パケットをメモリに割り当てるデータ セグメントである受信記述子の数を定義します。各着信パケットには 1 受信記述子が必要で、各記述子は 2kb のメモリを使います。

受信トラフィック能力の大幅な低下を検出した場合は、対策として受信記述子の数を増やすことがあります。受信能力に問題がない場合、アダプタに相応しいデフォルト設定を使います。

アダプタ コントローラ	デフォルト	範囲
82542 ベース。	160	80 � 768
82543 ベース。	160	80 � 256
82544 ベース。	160	80 � 2048
アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。

送信記述子

アダプタによる送信パケットのシステム メモリへの記録を可能とするデータ セグメントである、送信記述子の数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信記述子が必要です。

送信能力に問題がある可能性を検出した場合、送信記述子の数を増加するように選択することがあります。送信記述子の数を増やすと送信能力が上がる一方、システム メモリの消費量も上がります。送信能力に問題がない場合、デフォルト設定値の 256 をお使いください。

アダプタ コントローラ	デフォルト	範囲
82542 ベース。	256	80 � 768
82543 ベース。	256	80 � 256
82544 ベース。	256	80 � 2048
アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。

Wake on Link Change

コンピュータがスタンバイ モードの際にネットワーク接続がリンクを確立するとコンピュータをウェークアップします。この機能のオン・オフを切り替えたり、オペレーティング システムのデフォルトを使うことができます。

対応するオペレーティング システム	Windows 9x、Windows 2000、Windows XP
範囲	オフ、強制、OS 依存
デフォルト	オフ
Wake on Settings

これらの設定はオペレーティング システムまたは Intel PROSet によりアクティブ化される機能を指します。Windows のバージョンにより機能が異なる場合やサポートされていない場合があります。

次の Windows のバージョンは Wake On Setting をサポートします。Windows 2000、Windows XP 64 bit Edition、Windows XP Professional、Windows Server 2003。この機能は、Windows Server 2003 の 64 ビット Itanium(R) ベースのシステムではサポートされていません。

Wake on Settings をオンにする

Intel PROSet を使い、アダプタが使う Wake On 設定を行うことができます。Wake On 設定を選択する前に、オペレーティング システムで Wake On Settings を使用できるようにする必要があります。この手順は、instructionsを参照してください。

Wake on Settings をオンにするには

1.	Intel PROSet で [詳細設定] タブをクリックします。

2.	[設定] リスト ボックスで、[Wake on Settings] を選択します。

3.	[値] リストで、適切な Wake On 設定を選択します。

4.	[OK] または [適用] をクリックします。

5.	これらのタイプの Wake On packets にアダプタが対応するには、オペレーティング システムで Wake On Settings を使用できるようにする必要があります。Wake on Settings をオンにするには、デバイス マネージャにナビゲートし、[コンピュータのスタンバイ解除の管理をこのデバイスで行う] のオプションをオンにします。

使用可能な設定

Intel PROSet では次の Wake On 設定が使用可能です。

設定	説明
オフ	アダプタは Wake On 設定を使いません。
Wake on Magic Packet	アダプタの Magic Packet の受信時にアダプタのウェークアップを可能とします。Magic Packet は受信アダプタのイーサネット アドレスの 16 連続コピーを含むパケットです。この機能の設定時には Intel PROSet はこの機能のオペレーティング システム値を上書きします。
Wake on Directed Packet	アダプタがその MAC アドレスに送られたユニキャスト パケットである Directed Packet を受信するとアダプタのウェークアップはオンになります。  プロトコルはこのウェークアップ方法をドライバでオンにする必要があります。この機能を解除するとドライバはこのウェークアップ方法をオンにするためにプロトコル要求を無視します。
Wake on Magic と Directed Packets	アダプタの Magic Packet や Directed Packet の受信時にアダプタのウェークアップを可能とします。
OS 制御	オペレーティング システムに完全な制御権を与えます。

注：1 つのアダプタに複数の IP アドレスが設定されていると、オペレーティング システムはすべての設定アドレスに対する ARP パターンでウェークアップを要請することがあります。アダプタはリストの最初の IP アドレスをクエリする ARP パケットに対する返答としてのみアダプタをウェークアップします。

注： Wake On 設定はシャットダウン (S5) 状態からコンピュータをウェークアップする機能を含みません。この状態は詳細設定タブでも使用可能な [PME をオンにする] の設定により制御されます。Wake On 設定がオフの場合にも、S5 からウェークアップする機能は [PME をオンにする] の設定により決定されます。

アダプタのドライバがオンである限り、PME の設定は使用可能です。ただし、ドライバがオフになると、デバイスはそのハードウェアをデフォルトに戻し、これによりコンピュータはシャットダウンからのウェークアップを促すことがあります。

[デフォルトの復元] ボタン

このボタンは設定のデフォルト値で現在選択されている詳細設定をリセットします。デフォルト値については上記に一覧表示された設定をご覧ください。(このオプションはすべての設定で使用可能ではありません。)


ドライバ情報
ネットワーク ドライバ

アダプタのドライバに関する詳細を表示するには

1.	ネットワーク コンポーネント ツリーで、詳細を表示するアダプタをクリックします。

2.	[ドライバ] タブをクリックします。

次の情報が表示されます。

ドライバ情報：

名前	現在ロードされているアダプタ ドライバのファイル名
バージョン	ドライバのバージョン番号。インテルのサポート サイトから新バージョンをダウンロードするときに便利です。http://support.intel.com
説明	ドライバ名
著作権	著作権に関する情報
ドライバの統計：

注：以下の統計はアダプタ ドライバをロードまたは更新する際にリセットされます。

送信パケット	送信パケット数
着信パケット	着信パケット数
送信エラー	エラーを伴う送信パケット数
着信エラー	エラーを伴う着信パケット数
注：最新のドライバを取得するには、メニューから [ヘルプ] > [サポート] をクリックし、[サポート] ページで [最新ドライバを取得する] をクリックします。


診断
診断テスト

アダプタの診断はアダプタの全体的なヘルスの分析を可能とします。診断の実行中、Intel PROSet II は I/O の衝突、メモリ エラー、EEPROM 操作状況、送受信機能、およびリンクを確認します。

診断テストの結果は [診断] タブに表示されますが、同時にシステム ログにも保存されます。

注：コンピュータで Windows 98 を実行している場合は、診断を実行する前に、アダプタの電源管理をオフにしなければならないことがあります。詳細は、電源管理をオフにする手順を参照してください。

各テスト

テスト名	説明	トラブルシューティングの情報
制御レジスタ	I/O アドレスの衝突を確認し、レジスタの使用可能性をテストします。このテストには一般レジスタ、受信レジスタ、および送信レジスタが含まれます。EEPROM コントロール・データ レジスタはテストしません。	コントロール レジスタ テストが不合格な場合、アダプタを交換しテストを再実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。
FIFO レジスタ	FIFO メモリと交換するパターンを読み書きすることにより、アダプタの FIFO メモリをテストします。	FIFO レジスタ テストが不合格の場合、アダプタを交換しテストを再実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。
EEPROM	EEPROM から読み込んだデータが完全であることを確認します。このテストは EEPROM からの書き込みと読み取りテストを完了し、結果の均一性を比べます。	EEPROM テストが失敗した場合、アダプタを交換しテストを再度実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。
割り込み	すべてのアダプタが作業に割り込むことを確認する割り込みレジスタを使用します。	割り込みテストが失敗した場合は、BIOS の割り込み設定を変更します。設定を変更しても問題が解消されない場合は、アダプタを別のスロットに移動します。
ループバック	パケットをアダプタ自体に送信することにより、アダプタのパケット送受信機能をテストします。このテストには MAC ループバック、およびトランシーバ ループバック モードが使用されています。(Intel(R) PRO/1000 T アダプタでは使用不可能)	FIFO ループバック テストが不合格の場合、アダプタを交換しテストを再実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。
リンク	アダプタが有効なパートナーにリンクされていることを確認します。	リンク テストに失敗した場合、ケーブルがアダプタとリンク パートナーに固定されていることを確認します。ケーブルが固定されている場合、ケーブルを別のリンク パートナーのポートに接続してみるか、または別のケーブルを使用してみてください。
注：診断の実行中に [停止] をクリックすると、診断が停止するまでに少しの遅れが生じます。診断が中止すると、［OK］ ボタンが使用できるようになります。

他の設定

[詳細] ボタン：送信機/受信機のネットワーク テストを設定するためにクリックします。

警告：システムが「スタンバイ」、あるいは「中断」モードにあるときには、送信機/応答機のテストは実行するように設計されていません。


チームの設定とステータス
チーム設定

チーム設定に関する詳細を表示するには

ネットワーク コンポーネント ツリーで、表示するチームを右クリックします。

[チーム設定] タブが表示されます。

[チームのアダプタ] のステータス ボックスに以下が一覧表示されます。

アダプタ

チームに含まれるアダプタの名前。

優先度

優先順位を指定した場合は、チームのアダプタの優先ステータスが表示されます。チームにおけるアダプタのステータスは、プライマリまたはセカンダリです。

アダプタをプライマリあるいはセカンダリに指定するには

[ステータス] 欄に以下が一覧表示されます。

•	アクティブ：アダプタがネットワーク トラフィックを通します。

•	AFT モードでは、優先プライマリ アダプタのみがアクティブです。

•	Dynamic 802.3ad モードでは、アクティブな集計に属するアダプタのステータスはアクティブです。

•	スタンバイ：AFT、SFT、および Dynamic 802.3ad チームはスタンバイ モードをサポートします。スタンバイ モードのアダプタは、ネットワークに接続されていますが、トラフィックを積極的に通していません。

•	オフ：アダプタが削除されか、オフになったか、またはドライバのロードが失敗しました。さらに、ケーブルにエラーが生じたり接続が停止すると、アダプタはオフの状態になります。

[チーム情報] のセクションには以下が一覧表示されます。

•	イーサネット アドレス：チームのプライマリ MAC アドレスを一覧表示します。

•	IP アドレス：チームの IP アドレスを表示します。

•	チームのタイプ：チーム モードを一覧表示します。

[スイッチ設定をテスト] のボタン

スイッチ設定のテストを実行することにより、リンクパートナー が選ばれたアダプタのチーム化モードをサポートすることを確証できます。たとえば、アダプタがリンク アグリゲーション チームのメンバーの場合、Intel (R) PROSet は、アダプタに接続されているリンク パートナーがリンク集計をサポートすることを確認することができます。

各チームのモードの要件に関する特有な情報は、チーム化についてでご覧ください。

このテストの実行中にチームは一時的にネットワークの接続を失います。

注： このテストは次の状況のどちらかが存在する場合にはエラーを検出しません。

アダプタの設定	スイッチの設定
VLAN なしのリンク アグリゲーションモードでチーム化	スイッチは： • どの VLAN にも属さない • タグ付き VLAN で設定されている
VLAN を持つリンク アグリゲーションモードでチーム化	スイッチは： • アダプタで設定された VLAN に属さず、また、 • 定義されたリンク集計を持たない
スイッチ設定のテストを実行するには

1.	ネットワーク コンポーネント ツリーで、テストするチームを右クリックします。
テストを実行するには、チーム内に最低 2 つのアダプタが必要になります。

2.	[チーム設定] タブで [スイッチ設定をテスト] をクリックします。
[スイッチ設定のテスト] ダイアログ ボックスが表示されます。

3.	[はい] をクリックしてテストを続行します。
チーム設定またはリンク パートナーの設定エラーが検出されると、[トラブルシューティング] タブが表示されます。

注：  STP (Spanning Tree Protocol) テストに時間がかかるため、Intel PROSet II はネットワークで Spanning Tree Protocol (STP) が有効かどうかを正確に示すことができない場合があります。スイッチの STP が次のように設定されていることを確認します。

•	SFT チームが [オン] になっている

•	他のチーム モードでは [オフ] (portfast) になっている


VLAN
VLAN の概要

VLAN は、そのメンバーが他のメンバーのみからトラフィックを受信するようにトラフィックを隔離することが可能な、論理的ネットワークのグループ化です。VLAN を使用すると、PC をまとめて論理的ワークグループへとグループ化することができます。これは、各クライアントが別の建物、構内、各企業ネットワークに地理的に分散しているサーバに接続する上で重要な考慮です。

ネットワークで VLAN を使用することにより、以下が可能になります。

•	ブロードキャスト ストームを制限する

•	ネットワークの接続の追加、移動、変更を改善する

•	セキュリティの問題を削減する

•	管理作業を簡素化する

VLAN のタイプ

内的な VLAN であるスイッチ ベースの VLAN と、外部 VLAN とも呼ばれるタグ ベースの VLAN があります。

•	内的 VLAN はポート番号、MAC アドレス、および他のレイヤ 2 機能等のスイッチ機能に基づきます。大部分の Cisco* 製品を含む多くのスイッチにおけるデフォルト VLAN は内的 VLAN です。内的 VLAN はスイッチのみに設定されています。スイッチは内部 VLAN を強化するためにパケットの変更やタグ付けをしません。すべてのインテル アダプタは内部 VLAN に参加することができます。

•	外的 VLAN は各パケット ヘッダーへの追加の 4 バイト タグ (802.3ac) に基づきます。各 IEEE VLAN はアダプタと全てのリンク パートナーを含め、ネットワーク全体で設定する必要があります。

要件

VLAN の要件は以下の通りです。

•	802.1Q VLAN をサポートすることができるネットワーク上のスイッチ

•	次を含む、802.1Q VLAN 対応可能なアダプタ。

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R) PRO/1000

•	Intel(R) PRO/100B アダプタは VLAN に対応しません。

インテルの VLAN に関する概要については、インテル ネットワーク ウェブサイトを参照してください。

  ウェブサイトを参照する

詳細に関しては、VLAN上の白書を参照してください。

  ウェブサイトの白書を読む

関連項目

VLAN を追加する

VLAN プロパティを変更する

VLAN を削除する

VLAN の詳細設定


サポート

ウェブ ブラウザへのインターネット接続が可能な場合は、インテルのサポート サイトをご覧ください。

インターネットによるサポート：

1.	ヘルプ メニューで [サポート] をクリックします。

2.	ウェブ サイトのリンクのいずれかをクリックします。


トラブルシューティング

[トラブルデューティング] タブは、Intel(R) PROSet II がアダプタの設定、ドライバのインストール、およびその他のエラーを検出したときのみ表示されます。Intel PROSet II は問題を調べ、ほとんどの場合はその問題への解決方法を提示します。

アダプタで問題があると思われる場合は、以下の対策を 1 つ以上お試しください。

•	一般タブの情報で、ネットワークにアクティブなリンクがあるかどうかを確認します。

•	チームが設定されている場合は、リンク パートナーの設定をテストする ことによって、サポート チームのモードがサポートされていることを確認します。

•	診断を実行.します。

•	アダプタでサポートされている場合はケーブル テスト を実行します。


送信機/応答機テスト

送信機/応答機テストを実行することにより、アダプタをネットワークでテストすることができます。

このテストを実行する前に、アダプタがネットワークに接続されていることを確認します。

テストを設定する

送信機と応答機のコンピュータを設定します。送信元のコンピュータは継続的に応答先のコンピュータにパケットを送信し、応答するコンピュータは送信元のコンピュータにパケットを送り返します。

送信機
ネットワークにパケットを継続的に送信します。パケットの送信を開始するには [開始] を選択します。
パケットの送信を開始する前に、ネットワークの別の場所に応答先のコンピュータを設置する必要があります。Intel(R) PRO/10+、PRO/100B、PRO/100+、PRO/100 S、あるいはPRO/1000 アダプタがインストールされている他のコンピュータで、応答先として設定できるように Intel(R) PROSet II を使用します。可能な場合センダーとレスポンダには同じモデルのアダプタを使用してください。

応答機
送信機（パケットを送信するコンピュータ）にパケットを送り返します。このコンピュータを応答先として使うには [開始] を選択します。

このテストはネットワーク セグメント ケーブルやネットワークの設定のテスト用ではないものの、これらのテストとしても使用できます。新規の LAN セグメントをテストするときは、一方に応答機を設定し、もう一方に送信機を設定してテストを実行します。

このテストにより 2 つのアダプタの間の接続を確認します。これは速度を確認するためのテストではありません。ネットワークでアダプタがトラフィックを送受信する速度は、ネットワークのトポロジとロードに依存します。アダプタの速度設定は、[一般] タブをクリックして表示できます。

注：  Cisco*  6500 スイッチで Spanning Tree がオンになっていると、送信機/応答機テストは正確な結果を提供しません。Cisco 6500 スイッチを使い送信機/応答機テストを実行するには、Spanning Tree がオフになっていることを確認します。

警告：システムが「スタンバイ」、あるいは「中断」モードにあるときには、送信機/応答機のテストは実行するように設計されていません。


新規 VLAN

VLAN ID：ネットワーク管理者により割り当てられた VLAN 番号。アダプタ上の VLAN ID はスイッチ上の VLAN ID と一致する必要があります。有効範囲：1 - 4094. (注：VLAN の値として 0 と 1 は保留となっていることがあります。詳細はスイッチのマニュアルでご覧ください。)

VLAN 名：VLAN の名前。例： Marketing、Engineering など。VLAN 名はネットワーク全体で簡単に VLAN を識別するためのオプションの設定です。アダプタ上の VLAN 名はスイッチ上の VLAN 名と一致する必要はありません。


アダプタの識別

アダプタの識別機能は物理アダプタをコンピュータの背面に接続したまま識別する機能です。

例えば、2 つのアダプタが設置されている場合、ネットワーク コンポーネント ツリー からアダプタを選び、[アダプタの識別] ボタンをクリックします。選択したアダプタのブラケット LED が点滅します。

アダプタの位置を確認するには

1.	[アダプタの識別] をクリックします。

2.	スライダで LED の点滅秒数を選びます。デフォルト値は 10 秒です。

3.	[開始] をクリックします。

選択したアダプタの LED は指定された時間点滅します。


アダプタ フォルト トレランス

アダプタ フォルト トレランスはバックアップのネットワーク接続を提供するために設定された複数のアダプタのチームです。ハブ、スイッチポート、ケーブル、あるいはアダプタにエラーが発生した場合にも、コンピュータはネットワークを中断なく使用することができます。

アダプタ フォルト トレランスのチームはプライマリ アダプタと、バックアップまたはセカンダリアダプタから構成されます。通常の操作ではプライマリ アダプタのみが通信を行います。プライマリ アダプタまたはそのリンクにエラーが生じると、セカンダリ アダプタがその代用として自動的に機能します。

アダプタ フォルト トレランスを使っている場合 Spanning Tree を無効にする必要があります。

アダプタ フォルト トレランスのチームは次との併用が可能です。

アダプタのタイプ	1 つのインテル サーバ アダプタがチームのメンバーである必要があります。
アダプタの速度	100 Mbps と 1000 Mbps でリンクされるアダプタ各 1 つずつなどの組み合わせが可能です。
ネットワークの設定	• すべてのアダプタを同じスイッチに接続する必要があります。 • Spanning Tree を無効にする必要があります。
プロトコル	すべて
関連項目：

チーム化について

チームのタイプ


アダプティブ ロード バランシング

アダプティブ ロード バランシング (ALB) はサーバの送受信のスループットを向上するために設定されたチームのタイプです。ALB チームは送信トラフィックを自動的にロード調整しますが、受信トラフィックのオン・オフは切り替え可能です。

ALB チームは次によりスループットを増加します。

•	アダプタの設定。チームにメンバーを加えることにより、総合スループットを増すことができます。

•	トラフィックの分析。ALB ソフトウェアは各チームメンバーの送受信のロードを継続的に分析し、必要に応じてアダプタ間のロードを調整します。

送信トラフィック

ALB チームに対しては、すべてのアダプタが IP (IPv4 と IPv6) および NCP IPX 送信トラフィックをロード調整します。

受信トラフィック

•	受信ロード バランシングがオフになっている

•	受信ロード バランシングがオンになっている

•	プライマリ アダプタは任意のプロトコルを使いトラフィックを受信します。

•	最高速度のアクティブなアダプタは IPv4 トラフィックを受信します。

例えば 3 つのアダプタの ALB チームは、1 ギガビットのアダプタがプライマリ アダプタと、2 つの Intel(R) PRO/100 アダプタから構成されます。

•	ギガビット アダプタはプライマリ アダプタであるため、ルーティング不可能な IPv6 トラフィックを受信します。

•	ギガビット アダプタは最も高速のアダプタであるため、IPv4 を受信します。

•	Intel PRO/100 アダプタ受信ロード バランシングを行いません。

受信ロード バランシングのオン・オフの切り替えに関する情報は、チームの詳細設定 をご覧ください。

さらに ALB チームはフォルト トラレンスを提供します。プライマリ アダプタにエラーが生じると、チームは残りのオペレーティング チームのメンバー間で、トラフィックの操作と調整を継続します。

ALB チームは次との互換性を持ちます。

アダプタの速度	100 Mbps と 1000 Mbps で機能しているアダプタ各 1 つずつなどの組み合わせが可能です。
プロトコル	IP、IPX (NCP) 注：Microsoft は、Windows* 2000 での IPv6 サポートをテクノロジ プレビューとして分類しています。つまり、Windows 2000 での IPv6 サポートは製品版環境とは意図されていません。オペレーティングシステムの IPv6 サポートの詳細は、システムのマニュアルでご確認ください。
ネットワークの設定	すべてのアダプタを同じスイッチに接続する必要があります。

Intel(R) PRO/1000 ギガビット サーバ アダプタの性能に関する注意事項

Intel(R) PRO/1000 アダプタは高帯域幅をすでにサポートしているため、ALB 機能を使用することにより一部のサーバの性能が低下することがあります。これは今日入手可能なサーバの多くは、チーム化したギガビット クラスのアダプタを効率的に処理する CPU やバス容量を持たないためです。ALB 機能を最も有効に使うには、複数の PCI バスや 400 MHz 以上の速さで動作する複数の PentiumII(R) プロセッサに対応する新しいサーバを使用してください。ALB 機能を最も有効に利用するためには、別の PCI バス上のチーム化された Intel PRO/1000 アダプタをこのようなサーバにインストールします。

関連項目：

チーム化について

チームのタイプ

チームの詳細設定


IEEE 802.3ad:動的

802.3ad は IEEE リンク集計の標準です。静的リンク アグリゲーションチームのように、動的なリンク集計を使うチームはスループットを次の方法で増やします。

•	アダプタの設定。メンバーをチームに追加することにより、スループットを増やすことができます。チームは最高 8 のアダプタから構成されます。各サーバは最高 4 つのチームにより機能します。

•	トラフィックの分析。ソフトウェアは各チームメンバーの送信のロードを継続的に分析し、必要に応じてアダプタ間のロードを調整します。スイッチ ロードは受信トラフィックを調整します。

さらに 802.3ad チームはフォルト トラレンスを提供します。802.3ad チームでは、サーバは IP/MAC アドレスを 1 つ使いネットワークと通信します。ネットワーク デバイスとクライアントは、リンク アグリゲーションのチームを 1 つのコンピュータとして処理します。アダプタがチームとして失敗するとネットワークはチームを機能を削減したコンピュータと判断します。

リンク アグリゲーションチームは以下と対応します。

アダプタの速度	すべてのアダプタは同じ速度で稼動する必要があります。
ネットワークの設定	• アダプタに接続されているスイッチが IEEE 802.3ad 標準に完全に対応することを確認します。 • スイッチのマニュアルでポートの依存を確認します。一部のスイッチはプライマリ ポートでの使用開始時にペアリングを必要とします。  • アダプタとスイッチが強制またはオートネゴシエートに関らず全二重通信モードで実行されていることを、速度とデュプレックス設定で確認します。アダプタとスイッチの両方が同じ速度とデュプレックスで設定されている必要があります。全二重通信の要件は次の IEEE 802.3ad 仕様の一部です。http://standards.ieee.org/. 必要に応じて、アダプタをスイッチにリンクする前に速度やデュプレックス設定を変更します。チームの作成後に速度とデュプレックス設定を変更することは可能ですが、インテルは設定が有効になるまでケーブルを接続しないことを推奨します。ネットワークにアクティブなリンクがある状態で設定を変更すると、スイッチやサーバが正しく修正速度やデュプレックス設定を識別しないことがあります。 • VLAN を設定する際には、VLAN の互換性に関する注意事項をスイッチのマニュアルでご確認ください。一部のスイッチは動的 802.3ad チームと VLAN を同時にサポートしません。VLAN を選ぶ場合、アダプタをスイッチにリンクする前にアダプタにおけるチーム化と VLAN 設定を行います。スイッチによるアクティブな集計の作成後に VLAN を設定すると、VLAN 機能は影響を受けます。 注：一部のスイッチでは、銅とファイバーのアダプタは IEEE 802.3ad 設定における同じ集計に属することはできません。システムに銅とファイバーがある場合、スイッチは銅製アダプタをある集計に、ファイバー ベースのアダプタを他の集計に設定することがあります。このような際に最適なパフォーマンスを得るには、銅またはファイバ ベースのみのアダプタをシステムで使う必要があります。
プロトコル	すべて

関連項目：

チーム化について

チームのタイプ


アダプタのチーム化について
チーム化について

チームはより強力なスループットとフォルト トラレンスを提供するために設定された複数のアダプタです。チーム化は Windows* 2000、Windows NT* 4.0、および Windows XP との互換性を持ちます。

チームのタイプは？

Intel(R) PROSet II により次のチームのタイプを設定することができます。

•	アダプタ フォルト トレランス (AFT)

•	スイッチ フォルト トレランス (SFT)

•	アダプティブ ロード バランシング (ALB)

•	FEC*  /LA/802.3ad:静的

•	GEC*/LA/802.3ad:静的

•	IEEE 802.3ad:動的

チームに追加できるアダプタの数は？

SFT チームを除き、チームは 2 － 8 のアダプタを含みます。SFT チームは 1 つのリンク パートナーに接続された 2 つのアダプタを含む必要があります。

チームで他のベンダのアダプタを使えますか？

任意のチーム化モードでマルチベンダ チーム (MVT) のアダプタを作成することができます。マルチベンダ チームを作るには、チームに最低 1 つのインテル サーバ アダプタが必要です。

MVT は以下に対応します。

アダプタのタイプ	ネットワーク コンポーネント ツリー で、システムに対応するアダプタを確認します。
アダプタの速度	チーム化モードの要件を確認します。
注：チーム メンバーが VLAN に含まれる場合、Intel PROSet II はマルチベンダ チーム化をサポートしません。

コンピュータに設定できるチームの数は？

任意のコンピュータに設定できるチームの数はコンピュータのハードウェアとソフトウェアの設定に依存します。

その要件は？

ネットワーク設定およびコンピュータにインストールされたアダプタのタイプが、コンピュータで設定できるチームのタイプに影響します。チーム要件と機能の概要は、チームのタイプ のトピックでご覧ください。

チームの削除方法は？

VLAN の削除には、必ず Intel PROSet II ユーティリティを使います。チームをオペレーティング システムのネットワーク パネルで削除およびオフにすると、システムの安定性が低下し、アダプタの設定に悪影響が生じることがあります。

アダプタのチーム化に関する概要については、Intel(R) ネットワーク ウェブ サイトを参照してください。

  ウェブサイトを参照する

異なるチーム タイプの目的等の特定の情報は、サーバのボトルネック解決策の白書をお読みください。

  白書を読む

関連項目：

チームのタイプ


アダプタの詳細

アダプタのドライバに関する詳細を表示するには

1	ネットワーク コンポーネント ツリーで、詳細を表示するアダプタをクリックします。

2	[一般] タブで、[詳細] をクリックします。

詳細の画面が表示されます。

注：すべてのプロパティがすべてのアダプタ モデルで使用可能とは限りません。

IP アドレス	このアダプタで現在使用されている IP アドレス。 注：Intel(R) PROSet II は IPv6 アドレスを表示しません。
バス速度	アダプタが使っている PCI バスの現在の速度 (メガヘルツ)
バス幅	アダプタが使っている PCI バス (32 または 64) のビット幅
コントローラ	アダプタの部品のパーツ番号やモデル
メディア タイプ	コネクタのタイプ （ファイバか銅）
恒久イーサネット アドレス	16 進数によるアダプタのノード（MAC）アドレス。MAC アドレスはベンダによりアダプタに割り当てられています。
現在のイーサネット アドレス	このアダプタにより現在使われている MAC アドレス。  アダプタがチームのメンバーである場合、またはローカル管理されたアドレス (LAA) がこのアダプタに割り当てられている場合、現在のイーサネット アドレスはアダプタの恒久アドレスとは異なります。
PHY デバイス	アダプタに関する説明
部品番号	アダプタのインテル パーツ番号
割り込み	アダプタに割り当てられた PCI BIOS またはオペレーティング システムの割り込み
メモリ アドレス	PCI BIOS またはアダプタに割り当てられたオペレーティング システムのメモリ アドレス
I/O アドレス	PCI BIOS がアダプタに割り当てた I/O アドレス
バス スロット	アダプタのバス番号とスロット ID
システム スロット	System Slot は Bus Slot の分割部分です。例えば Bus Slot が 2 つに分割されると、各 Bus Slot の各部分を識別する 2 つの System Slot が存在します。
DCHP サーバ アドレス	アダプタに IP アドレスを提供したサーバの IP アドレス。


チームの詳細設定

各タイプのチーム用に異なる詳細設定があります。

チームの詳細設定を表示または変更するには

1.	ネットワーク コンポーネント ツリーで、チームをクリックします。

2.	[詳細設定] タブをクリックします。

3.	チームの設定に希望する変更を加えます。

4.	デフォルトを復元するには、[デフォルトの復元] をクリックします。

5.	変更を設定するには、［OK］ をクリックします。

詳細設定の説明とそのデフォルトは以下の通りです。大部分の場合、デフォルトの使用が推奨されます。

確認頻度 (秒数)

ソフトウェアがチーム メンバーのステータスを確認する頻度。たとえば、確認時間が 1 秒の場合、ソフトウェアはチーム メンバーが毎秒トラフィックを送受信できることを確認します。

デフォルト:1 秒

範囲：1-3 秒

LinkAggrJoinMethod

この詳細設定はリンク アグリゲーションチーム化で使用できます。IEEE 802.3ad 規格に基づき、リンク集計と呼ばれる複数のリンクに分割することができます。しかし、アクティブな集計は 1 つのみです。LinkAggrJoinMethod パラメータはシステムによるアクティブな集計方法を指定します。LinkAggrJoinMethod を最大帯域幅に設定すると、システムはより多くのトラフィックを生じる集計を選びます。パラメータを最大帯域幅に設定すると、システムはより多くのトラフィックを生じる集計を選びます。

デフォルト:最大帯域幅

範囲：最大帯域幅、アダプタの最大数

ロード バランスの更新間隔

ソフトウェアが現在のロードをチーム メンバーでリセットまたは更新する前に経過する時間。最適なパフォーマンスを引き出すにはこの設定をデフォルトかできるだけ低いままにしてください。

デフォルト:10 確認時間ユニット毎

範囲：1-50 確認時間ユニット

（確認時間で設定された秒数は更新率の測定ユニットとして使用されます。詳細は、確認時間の設定を参照してください。

ローカル管理されるアドレス (LAA)

Windows NT Load Balancing Service (WLBS)、NLB、または同じクラスの他のドライバを使うと、そのチームが使う MAC アドレスをカスタマイズすることができます。

MAC アドレスをカスタマイズするには、チームの新しい MAC アドレスを LAA フィールドに入力します。新しいアドレスが次の範囲であることを確認します。0000 0000 0001 - FFFF FFFF FFFD

例外：

o	マルチキャストのアドレスは使用しないでください （上位バイトの LSB = 1）。たとえば、アドレス 0Y123456789A では、「Y」 は奇数以外である必要があります。（0、2、4、6、8、A、C あるいは E である必要があります。）

o	ゼロや F のみの連数を使わないでください。

デフォルトの MAC アドレスを復元するには、ローカル管理されるアドレスフィールドのアドレスを消去し、[OK]、または [デフォルトの復元] をクリックします。

注： Intel(R) PROSet II は次のいずれかを使います。

•	LAA が設定されている場合はチームの LAA、または

•	LAA が設定されていない場合はプライマリ アダプタの永久 MAC アドレス

プライマリ アダプタの LAA 設定は、チームに LAA がある場合それにより上書きされます。

STP と SFT チーム：チームのプライマリ（アクティブ） アダプタを変更すると、新規のプライマリ アダプタの MAC アドレスを使用してチームが再ロードされます。同様に、チームのローカル管理されるアドレス (LAA) を変更すると、再ロードが行われチームは新しい MAC アドレスを持ちます。サーバがネットワークでアクティブな状態で SFT チームを行うと、これら両方のアクションにより、新しいプライマリ アダプタのアドレス情報により ARP 表をすべてのネットワーク デバイスが更新するまで、チームは通信できなくなります。ARP 表を更新するために必要な時間は、一部のルータやオペレーティング システムで使用できるパラメータである ARP キャッシュ タイムアウト時間により設定されます。ARP キャッシュ タイムアウト時間により、チームは最高 10 分使用できなくなる可能性があります。

NumRxPackets

アダプタが着信パケットをメモリに割り当てるデータ セグメントである受信記述子の数を定義します。各着信パケットには 1 受信記述子が必要で、各記述子は 2kb のメモリを使います。

受信トラフィック能力の大幅な低下を検出した場合は、対策として受信記述子の数を増やすことがあります。受信能力に問題がない場合、デフォルト設定を使います。

デフォルト:デフォルト。デフォルト値を使うと、Intel PROSet II はチームの設定とハードウェアの機能により自動的にこの設定を計算します。

推奨： 250

範囲：32 - 512、変更単位 16

NumTxPackets

アダプタによる送信パケットのシステム メモリへの記録を可能とするデータ セグメントである、送信記述子の数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信記述子が必要です。

送信能力に問題がある可能性を検出した場合、送信記述子の数を増加するように選択することがあります。送信記述子の数を増やすと送信能力が上がる一方、システム メモリの消費量も上がります。送信能力に問題がない場合、デフォルト設定を使います。

デフォルト:デフォルト。デフォルト値を使うと、Intel PROSet II はチームの設定とハードウェアの機能により自動的にこの設定を計算します。

範囲：16 - 512、変更単位 16

受信ロード バランシング

デフォルトで、ALB チームはすべての送信トラフィックをロード調整します。さらに、この設定により受信ロード バランシングをオンまたはオフにすることができます。

受信ロード バランシングがオフになると、プライマリ アダプタがすべてのトラフィックを受信します。

受信ロード バランシングがオンの場合:

•	プライマリ アダプタは 非 IP トラフィックを受信します

•	最高速度のアクティブなアダプタは IP トラフィックを受信します

例えば 3 つのアダプタのチームは、1 ギガビットのアダプタがプライマリ アダプタと、2 つの Intel(R) PRO/100 アダプタから構成されます。

•	ギガビット アダプタはプライマリ アダプタであるため、非 IP トラフィックを受信します。

•	ギガビット アダプタは最も高速のアダプタであるため、IP を受信します。

•	Intel(R) PRO/100 アダプタ受信ロード バランシングを行いません。

デフォルト:初期設定後にオンになる; チームが別のチームのモードで最初に作成され、その後 ALB に変更されるとオフになります。

範囲：オン/オフ

デフォルト復元ボタン

このボタンは設定のデフォルト値で現在選択されている詳細設定をリセットします。デフォルト値については上記に一覧表示された設定をご覧ください。(このオプションはすべての設定で使用可能ではありません。)

注：  Intel PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


PRO/100 および PRO/100+ アダプタの診断
Intel(R) PRO/100、PRO/100+、および PRO/100 S アダプタの診断

注：診断の実行中に [停止] をクリックすると、診断が停止するまでに少しの遅れが生じます。診断が中止すると、［OK］ ボタンが使用できるようになります。

基本診断

アダプタの診断により、1つ以上の項目をテストすることが可能になります。

注：コンピュータで Windows 98 を実行している場合は、診断を実行する前に、アダプタの電源管理をオフにしなければならないことがあります。詳細は、電源管理をオフにする手順を参照してください。

制御レジスタ

ソフトウェアが 8255x コントローラにコマンドを設定し送信するために使用するレジスタをテストします。

制御レジスタ テストが不合格な場合、アダプタを交換しテストを再実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。

Intel 8255x コントローラ

8255x コントローラに内蔵されるテストが正しく機能していることを確認しながら実行します。

コントローラのテストが失敗した場合、アダプタを交換しテストを再度実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。

EEPROM

EEPROM の内容を読み、チェックサムが正しいことを確認します。レジスタを実際にテストする EEPROM コントロール・データ レジスタを使用します。

EEPROM テストが失敗した場合、アダプタを交換しテストを再度実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。

ループバック

パケットを送受信するアダプタの機能をテストします。

FIFO ループバック テストが不合格の場合、アダプタを交換しテストを再実行します。代替品でもテストが不合格な場合、マザーボードまたはバス上の他のデバイスが正しく機能していないことを示す可能性があります。

リンク

ネットワークでユーザ固有の 1000 パケットを送信し、それらを自ら受信して、ネットワークの接続とアダプタの送受信機能を確認します。

リンク テストに失敗した場合、ケーブルがアダプタとリンク パートナーに固定されていることを確認します。ケーブルが固定されている場合、ケーブルを別のリンク パートナーのポートに接続してみるか、または別のケーブルを使用してみてください。


PRO/100+ アダプタの詳細設定
Intel(R) PRO/100 アダプタ ファミリの詳細設定

[詳細設定] タブに一覧表示された設定により、アダプタによる Quality of Service (QoS) タグ、オフロード、およびその他の機能の処理方法をカスタマイズすることができます。高度機能の一部は使用しているオペレーティング システムとインストールされているアダプタに依存します。

詳細設定

アダプティブ インターフレーム スぺ－シング

ネットワークにおける過剰なイーサネット パケットのコリジョンを補償します。このデフォルト設定は 0 で、機能はオフになっています。

推奨される設定 (1) は、ネットワーク トラフィックの状態に動的に対応し、大部分のコンピュータやネットワークで最も効率的に機能します。この動的なモードは値が 1 に設定されている場合のみに有効ですが、まれにスペース値を手動設定することにより、より良いパフォーマンスが得られることがあります。値を設定するとパケット間の静的ギャップが強制されます。

値を増加すると、送信されるフレーム間の遅れが拡大します。

対応するアダプタ	すべて
デフォルト	0: オフ
範囲	0-255
アダプティブ リンク レスポンス

アダプタからケーブルが外された際に通常のネットワーク作業をバイパスしてシステムの起動を加速します。これによりコンピュータを起動する際に必要とされる時間を大幅に削減することができます。

Intel イーサネット コントローラのアダプティブ リンク レスポンスをオンにしたときにネットワーク ケーブルが RJ-45 ポートに接続されていない場合は、ネットワーク接続は切断されます。黄色の注意アイコンがデバイス マネージャのネットワーク接続の隣に表示されます。

ネットワーク接続を再接続するには、ネットワーク ケーブルを RJ-45 ポートに接続してからコンピュータを再起動します。

対応するアダプタ	モバイル (cardbus) 製品専用。使用できないアダプタ モデルもあります。
デフォルト	オフ
推奨	オン
範囲	オン、オフ
注：システムで無線アダプタがアクティブな場合は、ALR (Adaptive Link Response) は機能しません。

アダプティブ パフォーマンス チューニング

割り込みを実行する前にアダプタが受信するフレーム数を設定します。通常の操作では、割り込みはアダプタが 1 フレームを受信する度に発生します。割り込み数を減少することにより CPU の使用率が向上します。

1 フレームごとに割り込みが 1 つ生じるように Max Adapter Bandwidth へスライダを移動します。これによりアダプタ帯域幅が増大しますが、CPUの使用率が上がりコンピュータの作動が遅くなることがあります。割り込みが発生する前にアダプタが受信するフレーム数を増加するために Max CPU Utilization へスライダを移動します。これにより CPU 使用率は向上しますが、アダプタ帯域幅が縮小することがあります。デフォルト設定はほとんどのコンピュータで問題なく機能します。

対応するアダプタ	すべて
アダプティブ テクノロジ

アダプタ ドライバでミクロ コードのオン・オフを切り替えます。ミクロ コードはオペレーティング システムの環境に基づきパフォーマンスを最適化します。

最適なパフォーマンスを確証するには、アダプティブ テクノロジをオンのままとします。

アダプタの適合性に関する問題をトラブルシューティングする際にはアダプティブ テクノロジをオフにすることがあります。アダプティブ テクノロジをオフにすると、送信制御ブロックとアダプティブ パフォーマンス チューニングもオフになります。

対応するアダプタ	すべて
デフォルト	オン
範囲	オン、オフ
アダプティブ送信しきい値

送信前にアダプタが送信バッファに保存するバイト数を指定します。例えばアダプティブ送信しきい値が 100 の場合、アダプタはデータを送信する前にそのバッファに 100 バイト (800 ビット) を保存します。

•	アダプティブ送信しきい値を上げると送信能力が低下しますが、アンダーランが低下する可能性があります。

•	アダプティブ送信しきい値を下げると送信能力が向上しますが、アンダーランが増加する可能性があります。この値を下げると、アダプタは送信を早めに行うことができます。

アダプタはアダプティブ送信しきい値を開始点のみとして使います。アダプタが低い値を使い送信能力が改善されると、自動的に低い値が使われます。

最初にアダプタが完全なイーサネット フレームを送信するように設定し、その後最高能力に調節するには、この値を 190 に設定します。190 で送信能力が大きく低下した場合は、しきい値を 16 に設定し、徐々に増加します。

対応するアダプタ	すべて
デフォルト	200
推奨	• コンピュータに複数のバスマスタ カードがあるか、レイテンシ度が高い場合、値を 200 以上に設定します。 • コンピュータに 1 マイのバスマスタ カードがある場合、値を 12 に設定します。
範囲	0-200
リソース不足時の基本接続

システムに IPSec Offload や Large Send Offload 等の詳細設定をすべて実行する十分なリソースがない場合でもネットワーク接続を維持します。詳細設定機能はコンピュータの再起動時のみに再開します。

リソースの問題を識別するには、システム ログを確認してください。システム リソース不足により生じるエラーはシステム ログに表示されます。

対応するアダプタ	すべて
デフォルト	オン
推奨値	オン
範囲	オン、オフ
集合バッファ

パケットの送信前にアダプタがデータ セグメントに追加されるように、集合バッファ数をカスタマイズして送信能力を最適化します。

集合バッファの設定は送信記述子の設定に対応するにように行う必要があります。集合バッファの設定は送信記述子の 30 - 50% とする必要があります。集合バッファの設定は送信記述子の設定に一致するように修正されていないと、送信能力は向上しない可能性があります。

集合バッファの設定は Windows NT 4.0 のコンピュータにおける送信能力を向上します。また Windows 98 と Windows 2000 のコンピュータにおける送信能力も向上します。

対応するアダプタ	すべて
デフォルト	8
推奨値	8
範囲	1-32
PME をオンにする

Advanced Power Management (APM) を持つ比較的古いコンピュータにおけるアダプタの Wake on 機能のオン・オフを切り替えます。Wake on はアダプタ ARP パケットなどの特殊のタイプのパケットを受信すると、スタンバイまたは電源オフの状態からアダプタを切り替えます。

•	この機能をオフにすると、古い電源管理方法によりコンピュータにおけるすべての Wake on 設定がオフになります。

•	この機能をオンにすると、アダプタは Wake on 信号を使用可能とします。アダプタが特定のパケット タイプに応答するように設定するには、この章の後に示されている Wake on 設定をご覧ください。

•	ハードウェアのデフォルト値によりアダプタは Wake on 機能をシステムのハードウェアに基づいて設定します。

•	[アクションなし] の値によりアダプタはオペレーティング システムのデフォルトをオンにします。

Wake on 設定をすべてオフにするには、この機能をオフにします。あるいは、この機能を [アクションなし] に設定します。

対応するアダプタ	82559 ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オフ
範囲	オン、オフ
フロー制御

アダプタのトラフィック調整能力を向上します。

•	アダプタは受信キューが事前設定された限界に到達するとフロー制御フレームを作成します。フロー制御のフレームを作成すると、トランスミッターに送信低速化の信号が送られます。

•	アダプタはフロー制御フレームで指定された時間、パケット送信を一時停止し、フロー制御フレームに応答します。

アダプタによるパケット送信速度の調整をオンにすると、フロー制御はパケットの紛失を防ぎます。

注：アダプタがこの機能を利用するには、リンク パートナーはフロー制御フレームをサポートする必要があります。

対応するアダプタ	82540 と 82544 ベースの送受信。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	フロー制御フレームの作成およびフロー制御フレームへの応答
範囲	オフ、応答、作成、作成して応答、ハードウェア デフォルト
リンク べースのログイン

アダプティブ リンク レスポンス (ALR) 機能をオンにします。パラメータ LinkBasedLoad の値に基づき、この機能は PhyLink ステータスを確認し、Success または Failure の値を返します。

対応するアダプタ	すべて
デフォルト	オフ (0)
範囲	オン、オフ
リンク速度とデュプレックス

アダプタの通信設定を行います。

この設定で操作するには、リンク パートナーもその設定で操作可能である必要があります。例えば、アダプタが 100 Mbps/全二重モードを使うように設定されている場合、リンク パートナーも  100 Mbps/全二重モードで操作可能である必要があります。同様に、アダプタが自動検出を設定を使うように設定されていると、リンク パートナーもオートネゴシエートをサポートする必要があります。

対応するアダプタ	すべての Intel(R) PRO/100 アダプタ
デフォルト	自動検出
推奨値	自動検出
範囲	? 自動検出- アダプタは互換性をもつ速度とデュプレックス設定を識別するためにそのリンク パートナーとネゴシエートします。 ? ・10 Mbps/半二重 - アダプタは 10 Mbps で接続を強制し、別々に送受信を行います。アダプタがパケットを受信中は、パケットを送信できません。パケットの送信中は、パケットを受信できません。 ? ・10 Mbps/全二重 - アダプタは 10 Mbps で接続を強制し、同時に送受信操作を行います。これによりアダプタの性能を向上します。全二重通信スイッチが使用できる場合のみこのモードを選択してください。 ? ・100 Mbps/半二重 - アダプタは 100 Mbps で接続を強制し、別々に送受信を行います。アダプタがパケットを受信中は、パケットを送信できません。パケットの送信中は、パケットを受信できません。 ? ・100 Mbps/全二重 - アダプタは 100 Mbps で接続を強制し、同時に送受信操作を行います。これによりアダプタの性能を向上します。全二重通信スイッチが使用できる場合のみこのモードを選択してください。
ローカル管理されるアドレス (LAA)

アダプタの MAC アドレスを上書きします。新規のネットワーク アドレスを入力するには、値のボックスに 12 桁の 16 進数を入力してください。

対応するアダプタ	すべて
デフォルト	なし
範囲	0000 0000 0001 - FFFF FFFF FFFD 例外： • マルチキャストのアドレスは使用しないでください （上位バイトの LSB = 1）。  • ゼロや F のみの連数を使わないでください。
注：チームで Intel(R) PROSet II は以下のいずれかを使います。

•	LAA が設定されている場合はチームの LAA、または

•	LAA が設定されていない場合はプライマリ アダプタの永久 MAC アドレス

Intel PROSet II は、アダプタがチームのプライマリ アダプタで、チームに LAA がある場合、アダプタの LAA を使いません。

Windows 98SE を使用する場合:

手動で割り当てたアドレスを使った後でデフォルト アドレスを使う場合は、次の手順のいずれかを行います。

•	[ネットワーク プロパティ] ダイアログ ボックスの [詳細] タブで [ローカル管理されるアドレス] を選択し、その値を0に変更します。[OK] をクリックしてその設定を適用します。

•	Intel PROSet IIで[詳細] タブをクリックし、[デフォルトの復元] をクリックするか [値] フィールドを空白にします。[OK] をクリックして設定を適用します。

リンクの状態のイベントのログ

この設定は、リンクの状態の変化をログ記録するかしないかの設定に使用します。オンに設定した場合は、リンクアップまたはリンクダウンへの変化イベントによってメッセージが生成され、システム イベント ロガーに表示されます。管理者はシステム イベント ロガーからイベント メッセージを表示します。

以下のイベントがログ記録されます。

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

対応するアダプタ	すべて
デフォルト	Enable
範囲	オン、オフ
オフロード

使用しているアダプタのタイプに対応する CPU サイクルを保存します。

•	Intel(R) PRO/100 S アダプタを用いてセキュリティ オフロードを使用している場合は、IP セキュリティ設定をご使用ください。

•	セキュリティ オフロードを Intel  PRO/100 S アダプタと併用しない場合は、チェックサム設定をご使用ください。

•	その他のアダプタをご使用の場合は、［なし］設定をご使用ください。

対応するアダプタ	すべて
対応するオペレーティング システム	Windows* 98SE、Windows Me、Windows NT*、Windows 2000、およびWindows XP
デフォルト	Intel PRO/100 S:IP セキュリティ セキュリティなしの Intel PRO/100 S: チェックサム
範囲	なし、 IP セキュリティ、 チェックサム （アダプタのタイプによっては使用できないオプションがあります）。
IP セキュリティに関する詳細情報は、Enable IPSec をオンにするでご覧ください。

PCI バス効率

アダプタによる最良のパケット送信方法の使用、またはパケット集計の常時強制が可能となります。

•	PCI バス効率がオフの際には、アダプタは最高能力を提供する送信方法を使います。集合パケットが最高の送信能力を提供する場合、アダプタは自動的にパケットを集合します。

•	PCI バス効率がオンの場合、アダプタはパケットの集合を強制します。

パケット送信能力に問題がない場合には PCI バス効率をオフに設定します。アンダーラン数が多いか、または PCI バスが能力的な問題を持つ場合、この値をオンに設定します。

対応するアダプタ	すべて
デフォルト	オフ
範囲	オン、オフ
優先レベルの定義

QoS タグ付きパケットの優先レベル切り捨て点を設定します。

コンピュータで 802.1p/802.1Q タグ (QoS) がオンになっている場合、優先キューによりサポートされた優先レベル (0-7) を定義することができます。Intel のアダプタには、高と低の 2 つの優先キューがあります。デフォルトで値が 0 から 3 のパケットは Low Priority Queue 経由で送信され、値が 4 から 7 のパケットは High Priority Queue 経由で送信されます。

[優先レベルの定義] に入力した数値は High Priority Queues と Low Priority Queues の分離点です。例えば 6 を入力すると、優先度が 0 から 5 のパケットは Low Priority Queue 経由で、優先度が 6 から 7 のパケットは High Priority Queue 経由で送信されます。

対応するアダプタ	すべて
デフォルト	4 • 0 から 3 の値を持つパケットは Low Priority Queue に送られます。  • 4 から 7 の値を持つパケットは High Priority Queue に送られます。
範囲	0-7

QoS (802.3ac) パケット タグ

Windows* 2000、XP、または Priority Packet  を使って設定した優先フィルタ用のIEEE 802.1p/802.1Q タグをオンまたはオフにします。優先パケット フィルタが正しく機能するためには、このオプションをオンにする必要があります。

802.1p/Q タグを使用してフィルタを割り当て、このオプションが 「無効」 と設定された場合も、対応するパケットは Intel の High Priority Queue (HPQ)を使用することにより優先されます。

対応するアダプタ	82550、82558、および 82559 ベースの製品。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オフ
範囲	オン、オフ
受信バッファ

メモリにデータをコピーするときにドライバが使用するバッファ数を指定します。

ネットワーク ロードが高いときは、受信バッファを増やすことによりパフォーマンスが向上します。ただし、ドライバが使用するシステム メモリの量も増大します。また、この値を修正することにより、システム能力が低下することがあります。

対応するアダプタ	すべて
デフォルト	デフォルトは選んだ機能に依存します。
推奨値	• Windows NT における単一のアダプタ： 32 • Windows 98、Windows Me、Windows 2000、および Windows XP における単一のアダプタ: 48 • アダプタのチーム化： 250 • Using IPSec と複数機能の片方または両方を使用： 350
範囲	8-1024
インターフレーム スぺ－シングの再送信

フレーム送信間の遅れを増大します。コリジョンの後にアダプタがフレームを再送信するために使う内蔵のイーサネット アルゴリズムがある反面、ネットワークで異常に多数のコリジョンがある場合は遅れを増大することによりネットワークの能力を向上することができます。

対応するアダプタ	選んだアダプタはこの機能をサポートします。
デフォルト	6
範囲	6-15
セキュリティ関連

アダプタのコプロセッサに同時にオフロードできるセキュリティ関連の数を指定します。セキュリティ関連は、Intel(R) Packet Protect や他の IP セキュリティ ソフトウェアを実行する他のコンピュータとの通信セッションです。

コンピュータがデフォルト以外のセキュリティ関連に対応する場合、この値を増やします。セキュリティ関連の数を増やすことにより、このアダプタのメモリ消費が増加することにご留意ください。

対応するアダプタ	Intel(R) PRO/100 S
デフォルト	クライアント: 64 サーバ: 1000
範囲	1-5000
Smart Power Down

LAN ケーブルがアダプタから外される際に、アダプタでのエネルギー節約を可能とします。アダプタが再接続すると、アダプタの電力使用率は通常の状態 (フル稼働) に戻ります。

対応するアダプタ	82559 以降ベースのモバイル アダプタ。
デフォルト	オン
推奨値	オン
範囲	オン、オフ
技術的な詳細情報

送信制御ブロック

アダプタが送信パケットをシステム メモリで有効にするデータ セグメントである送信制御ブロックの数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信制御ブロックが必要です。

送信能力に問題がある可能性を検出した場合、送信制御ブロックの数を増加するように選択することがあります。たとえ送信制御ブロックの数の増加により送信能力が向上しても、制御ブロックはシステム メモリを消費します。送信能力に問題がない場合、デフォルト設定値の 16 をお使いください。

対応するアダプタ	すべて
デフォルト	アダプタの要件により、16 または 32
範囲	8-64
Wake on Link Change

コンピュータがスタンバイ モードの際にネットワーク接続がリンクを確立するとコンピュータをウェークアップします。この機能のオン・オフを切り替えたり、オペレーティング システムのデフォルトを使うことができます。

対応するオペレーティング システム	Windows 9x、Windows 2000、Windows XP
範囲	オフ、強制、OS 依存
デフォルト	オフ
Wake on Settings

これらの設定はオペレーティング システムまたは Intel(R) PROSet II によりアクティブ化される機能を指します。Windows のバージョンにより機能が異なる場合やサポートされていない場合があります。

•	次の Windows のバージョンは Wake On Setting をサポートします。Windows 9x、Windows Millennium Edition、Windows 2000、Windows XP 64 bit Edition、および Windows XP Professional.

•	次の Windows のバージョンは Wake On Setting をサポートしません。Windows 98 retail、および Windows NT 4.0.

注：Intel(R) PRO/100+ マネージメントとサーバ アダプタ、および Intel(R) PRO/100 S アダプタが Wake On 設定をサポートします。

オペレーティング システムで Wake On Setting をオンにする

以下のタイプの Wake On packets には、Wake On Settings がオンのオペレーティング システムが必要です。

•	Wake on ARP

•	Wake on Directed Packet

•	Wake On NBT

これらのタイプの Wake On packets にアダプタが対応するには、オペレーティング システムは Wake On Settings を使用できる必要があります。Wake on Settings をオンにするには、デバイス マネージャにナビゲートし、[コンピュータのスタンバイ解除の管理をこのデバイスで行う] のオプションをオンにします。このオプションを検出するには次の手順に従います。

1.	[スタート]、[コントロールパネル] の順にクリックします。
コントロール パネルのウィンドウが開きます。

2.	[システム] をダブルクリックします。
[システム] ダイアログ ボックスが表示されます。

3.	[ハードウェア] タブをクリックして [デバイス マネージャ] ボタンをクリックします。
[デバイス マネージャ] ウィンドウが開きます。

4.	Wake On Settings をオンにするアダプタをダブル クリックします。
[プロパティ] ダイアログ ボックスが表示されます。

5.	[電源の管理] タブをクリックします。

6.	アダプタで Wake on Setting をオンにするには、[Allow this device to bring the computer out of standby] のオプションをオンにします。

Wake on Settings を設定するには

1.	Intel PROSet II で [詳細設定] タブをクリックします。

2.	[設定] リストのボックスで、[Wake on Settings] を選択します。

3.	[値] リストで、適切な Wake On 設定を選択します。

4.	[OK] または [適用] をクリックします。

使用可能な設定

Intel PROSet II では次の Wake On 設定が使用可能です。

設定	説明
オフ	アダプタは Wake On 設定を使いません。
Wake on Magic Packet	アダプタの Magic Packet の受信時にアダプタのウェークアップを可能とします。Magic Packet は受信アダプタのイーサネット アドレスの 16 連続コピーを含むパケットです。この機能の設定時には Intel PROSet II はこの機能のオペレーティング システム値を上書きします。
Wake on Directed Packet	アダプタがその MAC アドレスに送られたユニキャスト パケットである Directed Packet を受信するとアダプタのウェークアップはオンになります。  プロトコルはドライバ内でこのウェークアップ方法をオンにする必要があります。この機能を選択解除すると、ドライバはこのウェークアップ方法をオンにするプロトコルからの要求を無視します。
Wake on Magic と Directed Packets	アダプタの Magic Packet や Directed Packet の受信時にアダプタのウェークアップを可能とします。
OS 制御	オペレーティング システムに完全な制御権を与えます。

注：1 つのアダプタに複数の IP アドレスが設定されていると、オペレーティング システムはすべての設定アドレスに対する ARP パターンでウェークアップを要請することがあります。アダプタはリストの最初の IP アドレスをクエリする ARP パケットに対する返答としてのみアダプタをウェークアップします。

注：Wake On 設定はシャットダウン (S5) 状態からコンピュータをウェークアップする機能を含みません。この状態は詳細設定タブでも使用可能な [PME をオンにする] の設定により制御されます。Wake On 設定がオフの場合にも、S5 からウェークアップする機能は [PME をオンにする] の設定により決定されます。

アダプタのドライバがオンである限り、PME の設定は使用可能です。ただし、ドライバがオフになると、デバイスはそのハードウェアをデフォルトに戻し、これによりコンピュータはシャットダウンからのウェークアップを促すことがあります。

関連項目：

チームの詳細設定


優先パケットの概要
Intel(R) Priority Packet の概要

Intel(R) Priority Packet は、優先度の高いトラフィックを普通のトラフィックより先に処理するフィルタを設定できるトラフィック優先順位付けユーティリティです。これを使って、重要なアプリケーションを優先するフィルタを設定できます。

Intel Priority Packet は Intel(R) PROSet II とは別のユーティリティです。

要件

対応するオペレーティング システム	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 以降
対応するアダプタ	Intel(R) PRO/100 および PRO/1000 アダプタ ファミリ
Intel Priority Packet をインストールするには

1.	アダプタ CD をコンピュータの CD-ROM ドライブに挿入します。
オートラン画面が表示されます。

2.	オートラン画面を閉じます。

3.	 Intel CD の WINDOWS/PRTPKT フォルダを開きます。

4.	setup.exe をダブルクリックします。

5.	画面に表示される指示に従って、Priority Packet のインストールを完了します。

インストール後、[スタート] > [プログラム] > [Intel(R) Priority Packet II] をクリックしてユーティリティを開きます。

ネットワーク トラフィックの優先順位付け

Intel Priority Packet を使うと、フィルタ を設定し、重要なノードやアプリケーションからの情報に高い優先度を指定して優先的に送信することができます。ネットワークのホストや入り口点でのトラフィックに優先順位を付けることで、パケット内で定義されている優先度情報に基づいて転送決定を行うことができます。

Intel Priority Packet は、フィルタすなわち発信 (送信) パケットに適用するパラメータを使ってトラフィックの優先順位を付けます。優先パケット フィルタ ウィザードを使って、ノード (MAC) アドレス、イーサネット タイプ、その他プロトコルおよびポートの各プロパティに基づいて、定義済みまたはカスタムフィルタを設定することができます。優先パケットは、IEEE 802.1p タグ と Intel High Priority Queue の 2 とおりの方法でトラフィックの優先順位付けを行うことができます。

IEEE 802.1p タグ

IEEE 802.1p は、優先度を定義するためにパケットに付けるタグの IEEE 規格です。パケットは優先度を指定する追加の 4 バイトでタグ付けされるため、パケット サイズが増えます。タグ付けされたこれらのパケットがネットワークに送信されると、優先順位が高いパケットが先に処理されます。優先パケット タギング (Traffic Class Expediting ともいう) によって、アダプタはネットワークのその他の要素 (スイッチ、ルーター) と連携して優先度の高いパケットを先に届けることができます。802.1p タグでは、アプリケーションが 0 (低) から 7 (高) までの特定の優先度を割り当てることができます。

After you set up the filter in Windows* 2000、XP、または Intel Priority Packet でフィルタを設定した後、Intel PROSet II を起動し、[詳細設定] タブで [QoS パケット タグ ] をオンにします。

注：IEEE 802.1p タグではパケット サイズが増えます。一部のハブやスイッチはサイズの大きいパケットを認識しないので、破棄されることがあります。ご使用のハブやスイッチのマニュアルを参照して、802.1p がサポートされていることを確認してください。802.1p がサポートされていないか、サポートされているかどうか分からない場合は、High Priority Queue をご使用ください。

IEEE 802.1p タギングを効率的に使用するための要件:

•	802.1p タグの付いたパケットを受信/ルーティングするコンピュータはすべて 802.1p をサポートする必要があります。

•	タグの付けられたパケットを処理するコンピュータにインストールしたアダプタは802.1p タグをサポートする必要があります。Intel(R) PRO/1000、PRO/100+、および PRO/100 S アダプタはすべて 802.1p をサポートする必要があります。Intel(R) PRO/100B アダプタは 802.1p をサポートしていません。

•	これらのアダプタはアダプタ チームに割り当てることはできません。

•	VLAN とパケットタグを同じアダプタに設定する場合は、Intel PROSet II の [詳細設定] タブで 802.1p/802.1Q タグをオンにする必要があります。

•	VLANs (802.1Q) と優先順位付け (802.1p) は 802.3ac タグを共有します。Intel アダプタは VLAN または QoS タグが設定されている場合に 802.3ac タグを使用します。

•	アダプタが VLAN 用に設定されている場合は、スイッチ VLAN はアダプタと同じタイプのタグ (802.3ac) をサポートする必要があります。

•	アダプタが優先順位付け用に設定されている場合、スイッチによっては、その上の非デフォルト VLAN がタグを渡すことができる必要がありものがあります。


フィルタ

送信パケットに割り当てられるパラメータにより、パケットが IEEE 802.1p にタグされるべきか High Priority Queueに送られるべきかが判断されます。


IEEE 802.1p 仕様

パケットにタグ付けして優先順位処理を行う IEEE 規格です。これらのパケットがネットワークに送信されると、優先順位が高いパケットが先に処理されます。	優先順位パケット タグにより、アダプタは他のネットワーク デバイスと協調して全体的なパフォーマンスを向上します。

この優先順位機能をオンにするには、ご使用のネットワーク インフラストラクチャ (スイッチや他のルーティング デバイス) がIEEE802.1p タグをサポートすることが必要です。インフラストラクチャが IEEE 802.1p タグをサポートしないか、サポートするかどうか分からない場合は、Inte の High Priority Queue を使用してトラフィックの優先順位付けを行うことができます。


High Priority Queue

Intel(R) Priority Packet と併用される送信キュー。High Priority Queue (HPQ) は優先順位の高いパケットを処理します。

HPQ は 82558 ベース以降のコントローラ を持つ Intel(R) PRO/100 アダプタで使用することができます。コントローラに関する詳細情報は、アダプタの仕様表でご覧ください。

HPQ に関する詳細情報は、Intel Priority Packet のオンライン ヘルプでご覧ください。


タグ付け

パケットへの情報を追加します。IEEE802.1p タグを使用する Priority Packet の場合は、パケットの優先順位を示す 4 バイトの情報がパケットに追加されます。


検出された CardBus

アダプタを1つインストールするには

CardBus アダプタを 1 つインストールする場合は、インストールするモデルを選択します。

注：Intel(R) PRO/100 Cardbus II アダプタ (LAN 専用) が既にインストールされている状態で、Intel(R) PRO/100 LAN+Modem56 Cardbus II アダプタをインストールするには、次を行います。

1.	LAN 専用アダプタのドライバを削除します。

2.	コンピュータを再起動します。

3.	LAN+Modem56 アダプタ用のドライバをインストールします。

アダプタを2つインストールするには

CardBus アダプタを 2 つインストールする際、片方または両方が Intel PRO/100 LAN+Modem56 CardBus II アダプタの場合は、[Intel(R) PRO/100 LAN+Modem56 Cardbus II] をクリックします。

両方のアダプタが Intel PRO/100 Cardbus II アダプタ (LAN 専用) の場合は、[Intel(R) PRO/100 Cardbus II] をクリックします。

PCI ADAPTER

PCI ADAPTER (例：ドッキングステーションなど) インストールするには、[Intel(R) PRO PCI Adapter] をクリックします。


カードバス リソース
CardBus リソースを定義する

Network Adapter と Modem 用に使用できるリソースのセットを選びます。

選んだリソースがコンピュータに対応することを確認するには、コントロール パネルで

コントロール パネルで [Intel PROSet II] アイコンをダブルクリックして Intel(R) PROSet II を開始します。
Intel PROSet II が表示されます。

•	リソースの衝突がない場合は、[一般] タブにアダプタのステータスが表示されます。

•	他のデバイスとリソース間に衝突がある場合は、Intel PROSet II は ［トラブルシューティング］ タブを表示して問題を解決するための手順を示します。この指示に従って他のリソースを選択してください。


ジャンボ フレーム

ジャンボ フレームは標準のイーサネット フレームよりも大型です。標準のイーサネット フレームは最高 1.5K バイトで、ジャンボ フレームは最高 16K バイトを許容します。

大型のパケットが大部分のトラフィックを構成し、追加のレイテンシが許容可能な場合、ジャンボ フレームは CPU 使用率を削減し、伝送効率を改善することができます。

注：ジャンボ フレームは 1000 Mbps のみでサポートされます。10 Mbps または 100 Mbps でジャンボ フレームを使用すると、パフォーマンスが劣化したり、リンクが失われる場合があります。ジャンボ フレームは TCP/IP パケットのみで有効です。

はじめる前に

以下を確認します。

•	Intel(R) PRO/1000 アダプタが 1000 Mbps で実行されている。Intel(R) PRO/100 アダプタはジャンボ フレームをサポートしない。

•	システムが  Windows* 2000、XP、または NT* 4.0 を実行している。

•	ネットワーク デバイスはジャンボ フレームをサポートする。他のネットワーク デバイスでジャンボ フレームを設定するには、ネットワーク デバイスによるジャンボ フレーム サイズの計算が異なることにご注意ください。フレーム サイズ内にヘッダ情報を含むデバイスと含まないデバイスがあります。

ジャンボ フレームを設定する

•	一般的に使用可能なパケット サイズを設定するには、Intel(R) PROSet II を使います。

•	他のパケット サイズを設定するには、レジストリに値を入力します。

Intel(R) PROSet II にジャンボ フレームを設定するには

ネットワークにジャンボ フレームを設定するには、以下の 3 つの手順に従います。

手順 1：ジャンボ フレームをサポートするアダプタを設定します。

1.	Intel(R) PROSet II を開きます。

2.	ネットワーク コンポーネント ツリーで、ジャンボ フレームで設定するアダプタをクリックします。

3.	[詳細設定] タブをクリックします。

4.	設定リストから、[ジャンボ フレーム] をクリックします。

5.	値のボックスから、パケット サイズをクリックします。

この時点でアダプタはジャンボ フレームをサポートするように設定されています。

手順 2：ジャンボ フレームをサポートするようにネットワーク スイッチを設定します。詳細はスイッチのマニュアルでご覧ください。

手順 3：ジャンボ フレームをサポートするようにサーバを設定します。詳細はサーバのマニュアルでご覧ください。

レジストリを使いジャンボ フレームを設定するには

ネットワークにジャンボ フレームを設定するには、以下の 3 つの手順に従います。

手順 1：ジャンボ フレームをサポートするアダプタを設定します。

1.	レジストリ エディタを開きます。[スタート]、[ファイル名を指定して実行...] の順にクリックします。[名前] のボックスに、「regedit」 と入力します。
レジストリ エディタ が開きます。

2.	MaxFrameSize レジストリ キーにナビゲートします。

3.	1415 から 16128 のフレーム サイズを入力します。

この時点でアダプタはジャンボ フレームをサポートするように設定されています。

手順 2：ジャンボ フレームをサポートするようにネットワーク スイッチを設定します。詳細はスイッチのマニュアルでご覧ください。

手順 3：ジャンボ フレームをサポートするようにサーバを設定します。詳細はサーバのマニュアルでご覧ください。


MiniPCI アダプタ

MiniPCI アダプタは MiniPCI フォーム要素をサポートする特定のポータブル コンピュータで使用することができます。これらのアダプタは、このヘルプ ファイルに記述されたクライアント アダプタと同様の機能をサポートします。MiniPCI アダプタによっては、製品に統合モデム ハードウェアが含まれているものがあります。

ご使用の製品にモデムが含まれている場合は、モデムの設定に関する情報はコンピュータのユーザ マニュアルでご覧ください。

関連項目

Intel(R) PRO/100+ アダプタ用の詳細設定


PRO/10+ アダプタの詳細設定
Intel(R) PRO/10 と PRO/10+ アダプタ用の高度設定

[詳細設定] タブにリストされた設定により、アダプタのリンク変更、バッファ、オフロード、およびその他の機能の処理方法をカスタマイズすることができます。以下の機能の一部は使用しているオペレーティング システムとインストールされているアダプタに依存します。

詳細設定

アダプティブ インターフレーム スぺ－シング

ネットワークにおける過剰なイーサネット パケットのコリジョンを補償します。このデフォルト設定は 0 で、機能はオフになっています。推奨される設定 (1) は、ネットワーク トラフィックの状態に動的に対応し、大部分のコンピュータで最も効率的に機能します。この動的なモードは値が 1 に設定されている場合のみに有効ですが、まれにスペース値を手動設定することにより、より良いパフォーマンスが得られることがあります。値を設定するとパケット間の静的ギャップが強制されます。

値を増加すると、送信されるフレーム間の遅れが拡大します。

対応するアダプタ	すべて
デフォルト	1
範囲	0-255
アダプティブ テクノロジ

アダプタ ドライバでミクロ コードのオン・オフを切り替えます。ミクロ コードはオペレーティング システムの環境に基づきパフォーマンスを最適化します。

最適なパフォーマンスを確証するには、アダプティブ テクノロジをオンのままとします。

アダプタの適合性に関する問題をトラブルシューティングする際にはアダプティブ テクノロジをオフにすることがあります。アダプティブ テクノロジをオフにすると、送信制御ブロックとアダプティブ パフォーマンス チューニングもオフになります。

対応するアダプタ	すべて
デフォルト	オン
範囲	オン、オフ
アダプティブ送信しきい値

送信前にアダプタが送信バッファに保存するバイト数を指定します。例えばアダプティブ送信しきい値が 100 の場合、アダプタはデータを送信する前にそのバッファに 100 バイト (800 ビット) を保存します。

•	アダプティブ送信しきい値を上げると送信能力が低下しますが、アンダーランが低下する可能性があります。

•	アダプティブ送信しきい値を下げると送信能力が向上しますが、アンダーランが増加する可能性があります。この値を下げると、アダプタは送信を早めに行うことができます。

アダプタはアダプティブ送信しきい値を開始点のみとして使います。アダプタが低い値を使い送信能力が改善されると、自動的に低い値が使われます。

最初にアダプタが完全なイーサネット フレームを送信するように設定し、その後最高能力に調節するには、この値を 190 に設定します。190 で送信能力が大きく低下した場合は、しきい値を 16 に設定し、徐々に増加します。

対応するアダプタ	すべて
デフォルト	12
推奨	• コンピュータに複数のバスマスタ カードがあるか、レイテンシ度が高い場合、値を 200 以上に設定します。 • コンピュータに 1 マイのバスマスタ カードがある場合、値を 12 に設定します。
範囲	0-200
リソース不足時の基本接続

システムに詳細設定をすべて実行する十分なリソースがない場合でもネットワーク接続を保持します。IPSec Offload や Large Send Offload などの機能はリソースが十分にある場合のみに再開します。システム リソース不足により生じるエラーはシステム ログに記録されます。

対応するアダプタ	すべて
デフォルト	オフ
推奨値	オン
範囲	オン、オフ
集合バッファ

パケットの送信前にアダプタがデータ セグメントに追加されるように、集合バッファ数をカスタマイズして送信能力を最適化します。

集合バッファの設定は送信記述子の設定に対応するにように行う必要があります。集合バッファの設定は送信記述子の 30 - 50% とする必要があります。集合バッファの設定は送信記述子の設定に一致するように修正されていないと、送信能力は向上しない可能性があります。

集合バッファの設定は Windows NT 4.0 のコンピュータにおける送信能力を向上します。また Windows 98 と Windows 2000 のコンピュータにおける送信能力も向上します。

対応するアダプタ	すべて
デフォルト	8
推奨値	8
範囲	1-32
フロー制御受信

送信パスを一時停止して全二重制御のフレームを受信するようにアダプタをオンにします。送信パスは受信したフロー制御フレームで指定された時間、一時停止します。これらの設定によりパケットの喪失を防ぎ、ネットワークの性能を微調整することができます。

対応するアダプタ	この機能はすべてのタイプのアダプタで使用できるとは限りません。
デフォルト	オフ
範囲	オン、オフ
リンク べースのログイン

アダプティブ リンク レスポンス (ALR) 機能をオンにします。パラメータ LinkBasedLoad の値に基づき、この機能は PhyLink ステータスを確認し、Success または Failure の値を返します。

対応するアダプタ	すべて
デフォルト	オフ
範囲	オン、オフ
リンク速度とデュプレックス

Intel(R) PRO/10+ アダプタとそのリンク設定を行います。

対応するアダプタ	すべて
デフォルト	自動検出
推奨値	自動検出
範囲	? 自動検出 - アダプタはスイッチと折衝してパケットの送受信方法 （全二重、または半二重）を決めます。  注：リンク速度と二重通信オプションを自動検出に設定した状態で、全二重通信をサポートするにはオートネゴシエート スイッチが必要です。 ? 10Mbps/半二重通信 - アダプタは 10 Mbps の速度で操作を逐次に行います。1 回の操作は送信か受信のどちらかです。 • 10Mbps/全二重 - アダプタは 10 Mbps の速度でパケットの送受信を同時に行います。これによりアダプタの性能を向上します。全二重通信スイッチが使用できる場合のみこのモードを選択してください。
ローカル管理されるアドレス

アダプタの MAC アドレスを上書きします。新規のネットワーク アドレスを入力するには、このボックスに 12 桁の 16 進数を入力してください。

対応するアダプタ	すべて
デフォルト	なし
範囲	0000 0000 0001 - FFFF FFFF FFFD 例外： • マルチキャストのアドレスは使用しないでください （上位バイトの LSB = 1）。  • ゼロや F のみの連数を使わないでください。
PCI バス効率

アダプタによる最良のパケット送信方法の使用、またはパケット集計の常時強制が可能となります。

•	PCI バス効率がオフの際には、アダプタは最高能力を提供する送信方法を使います。集合パケットが最高の送信能力を提供する場合、アダプタは自動的にパケットを集合します。

•	PCI バス効率がオンの場合、アダプタはパケットの集合を強制します。

パケット送信能力に問題がない場合には PCI バス効率をオフに設定します。アンダーラン数が多いか、または PCI バスが能力的な問題を持つ場合、この値をオンに設定します。

対応するアダプタ	すべて
デフォルト	オフ
範囲	オン、オフ
優先レベルの定義

QoS タグ付きパケットの優先レベル切り捨て点を定義します。

コンピュータで 802.1p/802.1Q タグ (QoS) がオンになっている場合、優先キューによりサポートされた優先レベル (0-7) を定義することができます。Intel のアダプタには、高と低の 2 つの優先キューがあります。デフォルトで値が 0 から 3 のパケットは Low Priority Queue 経由で送信され、値が 4 から 7 のパケットは High Priority Queue 経由で送信されます。

[優先レベルの定義] に入力した数値は High Priority Queues と Low Priority Queues の分離点です。例えば 6 を入力すると、優先度が 0 から 5 のパケットは Low Priority Queue 経由で、優先度が 6 から 7 のパケットは High Priority Queue 経由で送信されます。

対応するアダプタ	すべて
デフォルト	4 • 0 から 3 の値を持つパケットは Low Priority Queue に送られます。  • 4 から 7 の値を持つパケットは High Priority Queue に送られます。
範囲	0-7

受信バッファ

プロトコル メモリにデータをコピーするときにドライバが使用するバッファ数を指定します。

ネットワーク ロードが高いときは、受信バッファを増やすことによりパフォーマンスが向上します。ただし、ドライバが使用するシステム メモリの量も増大します。また、この値を修正することにより、システム能力が低下することがあります。

対応するアダプタ	すべて
デフォルト	48
推奨値	• Windows 98、Windows Me、Windows 2000、および Windows XP における単一のアダプタ: 48 • Windows NT における単一のアダプタ： 32 • アダプタのチーム化： 250
範囲	8-1024
インターフレーム スぺ－シングの再送信

フレーム送信間の遅れを増大します。コリジョンの後にアダプタがフレームを再送信するために使う内蔵のイーサネット アルゴリズムがある反面、ネットワークで異常に多数のコリジョンがある場合は遅れを増大することによりネットワークの能力を向上することができます。

対応するアダプタ	すべて
デフォルト	10
範囲	6-15
送信制御ブロック

アダプタが送信パケットをシステム メモリで有効にするデータ セグメントである送信制御ブロックの数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信制御ブロックが必要です。

送信能力に問題がある可能性を検出した場合、送信制御ブロックの数を増加するように選択することがあります。たとえ送信制御ブロックの数の増加により送信能力が向上しても、制御ブロックはシステム メモリを消費します。送信能力に問題がない場合、推奨値の 16 をお使いください。

対応するアダプタ	すべて
デフォルト	32
推奨値	16
範囲	8-64


PRO/1000 リンク設定
Intel(R) PRO/1000 リンク設定 (銅モード専用)

注意：ほとんどの場合、オートネゴシエートをオンのままとする必要があります。オートネゴシエートをオフにする際にはリンク パートナーの設定がアダプタの設定と一致することを確認します。オートネゴシエートがオフの状態では、アダプタは 1000 Mbps で機能しません。

速度とデュプレックスを設定するには

1.	[リンク設定] タブで、[オン] または [オフ] をクリックオートネゴシエートの設定を修正します。

•	オートネゴシエートがオンの場合は、アダプタはそのリンク パートナーと速度とデュプレックスをネゴシエートします。

•	オートネゴシエートがオフの場合は、アダプタは指定された速度とデュプレックス設定を強制されます。オートネゴシエートをオフにする際は、リンク パートナーが指定された速度とデュプレックス設定で機能できることを確認します。リンク パートナーがアダプタの強制する設定で機能できない場合、アダプタとリンク パートナー間の通信は確立されません。

2.	オートネゴシエートがオンの場合は、ネゴシエーション中にリンクパートナー通知される速度とデュプレックスを選びます。デフォルトで、すべての設定が通知されます。使用可能な設定は：

•	10 Mbps 半二重

•	10 Mbps 全二重

•	100 Mbps 半二重

•	100 Mbps 全二重

•	1000 Mbps 全二重

注：IEEE 仕様によると、1000 ベースの T オペレーションは強制することはできません。しかしオートネゴシエートを選び、その後に 1000 Mbps 全二重設定のみを選ぶことにより、アダプタが 1000 Mbps のみで機能するように設定することはできます。

3.	オートネゴシエートがオフの場合は、次の設定をクリックしてアダプタの速度とデュプレックスを強制します。

•	10 Mbps 半二重

•	10 Mbps 全二重

•	100 Mbps 半二重

•	100 Mbps 全二重

通信を確証するために、リンク パートナーが強制された設定をサポートすることを確認します。

4.	[OK] をクリックします。

5.	プロンプトに従ってコンピュータを再起動します。

この時点でアダプタの速度とデュプレックスが設定されました。


リンク パートナー

アダプタがリンクする他のアダプタ、ハブ、スイッチなどのデバイスです。


ネットワーク コンポーネント ツリー ビュー
ネットワーク コンポーネント ツリー

ネットワーク コンポーネント ツリーは Intel(R) PROSet II の左側に表示されます。アダプタ、VLAN、またはチームをクリックすると、それぞれの説明が表示されます。


Boot Agent

このタブにより Boot Agent ソフトウェアの動作を制御する設定を表示することができます。設定の選択ボックスの値は一部変更可能なことがあります。IT 管理者がこの機能を有効に設定した場合は、このタブを使って Boot Agent ソフトウェアのイメージでフラッシュ ROM デバイスを更新することもできます。

可能な設定に関する詳細については以下の項目をご覧ください。

•	ネットワーク ブート プロトコル

•	ブート順序

•	セットアップ メニューの待機時間

•	設定プロンプトの表示

•	レガシ OS ウェイクアップ サポート

設定を変更する手順は、『Intel(R) Boot Agent User's Guide』でご覧ください。

注：

設定を変更できない場合は、アダプタやシステムがその設定をオンにできない可能性があります。

ヘルプ ファイルで提示された情報は Boot Agent の 16 ビット PXE 2.0 バージョンのみで有効です。ここで示す大部分の設定オプションは EFI 環境で使われます。

[Boot Agent を更新] ボタン

このボタンを使い Intel Boot Agent ソフトウェアのインストールや更新をします。

注：

Boot Agent 更新操作は、Boot Agent イメージをフラッシュ ROM に書きます。これはWindows* ネットワーク デバイス ドライバの動作を一時的にオフにする可能性があります。この操作の後にコンピュータを再起動する必要があります。

DOS インストールが必要な場合、『Intel(R) Boot Agent ユーザーズ ガイド』を参照してください。

Boot Agent ソフトウェアをインストールまたは更新するには

注： フラッシュ ROM のイメージ ファイルをインテルのウェブサイトからダウンロードする際には、一次ディレクトリに保存するか、またはこの手順を行う際に容易に検出できる場所に保存します。

1.	[スタート] メニューから、[設定]、[コントロール パネル] の順にクリックします。
コントロール パネルのウィンドウが表示されます。

2.	Intel(R) PROSet II のアイコンをダブルクリックします。
Intel PROSet II 画面が表示されます。

3.	ネットワーク コンポーネント ツリーから、更新するフラッシュ ROM を含むアダプタを選びます。

4.	[Boot Agent] タブをクリックします。タブが表示されない場合は、ネットワーク ドライバを更新するか、または Intel PROSet II のバージョン 4.0 以降がインストールされていることを確認します。

注：Intel PROSet II により PXE と RPL 環境の設定を変更することもできます。Intel PROSet II  画面の左側にあるネットワーク コンポーネントの下に一覧表示されたデバイスから、PXE か RPL 環境で機能するアダプタを選び、画面の右側に表示される設定を表示または変更することができます。詳細情報は、『Intel(R)Boot Agent ユーザーズ ガイド』の「Windows 環境で Boot Agent を設定する」のセクションを参照してください。一部のフラッシュ ROM はすべての設定をサポートしません。

5.	設定を編集するには、Ctrl+S を押します。[Boot Agent] タブに灰色表示の [設定を適用] ボタンが表示されます。

6.	[Boot Agent を更新] をクリックします。
Boot イメージの更新中にネットワークの接続が一時的に失われるという警告のダイアログ ボックスが表示されます。

7.	更新手順を継続するには、[はい] をクリックします。
既存のフラッシュ ROM のバックアップを作成するかどうかを確認するダイアログ ボックスが表示されます。

8.	既存のフラッシュの更新前にフラッシュ ROM のバックアップを作成するには、[はい] をクリックします。[現在のフラッシュ イメージに名前を付けて保存] のダイアログ ボックスが表示されます。手順 10 に進みます。

9.	現在のフラッシュ ROM のバックアップをファイルに保存しない場合は、[いいえ] をクリックします。
警告ダイアログボックスが表示されます。[はい] をクリックして手順 11 に進みます。

10.	デフォルトのパスとファイル名を使うには、[保存] をクリックします (アダプタ特有の MAC アドレスのファイル名デフォルト)。そうでない場合は、これらのパラメータを修正し、[保存] をクリックします。

11.	[ファイルを開く] ダイアログ ボックスで、保存した希望するフラッシュ ROM のイメージファイルが画面のデフォルト パスとファイル名として表示された場合は、[開く] をクリックします。そうでない場合、パスとファイル名を修正し、[開く] をクリックします。
注：フラッシュ ROM のイメージはインテルのウェブサイトからダウンロードすることができます。

更新手順には 5 － 10 分かかり、この間に進行状況を示すインジケータが表示されます。


ネットワーク ブート プロトコル

Boot Agent が RPL をサポートしない場合は、この設定は変更できません。

使用可能な値：

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

説明：

Intel LANDesk Management Suite、Windows* 2000 RIS、Windows XP RIS、および Linux*等の WfM 準拠ネットワーク管理プログラムと併用するには [PXE] を選びます。

レガシ形態のリモート起動や一部の Novell NetWare* リモート起動ソリューション用には、[RPL] を選びます。


ブート順序

使用可能な値：

•	BIOS セットアップ ブート順序

•	Try network first, then local drives

•	Try local drives first, then network

•	Try network only

•	Try local drives only

説明：

システムの起動時に起動デバイスを選択する順序を選択できます。ご使用のコンピュータの BIOS がBIOS Boot Specification (BBS) 対応であるか、または BIOS セットアップ プログラムで起動順序をプラグアンドプレイ (PnP) 準拠選択できる場合、この設定は常に [Use BIOS Setup Boot Order] となり、変更できません。この場合、起動オプションの設定については、クライアント コンピュータ仕様の BIOS セットアップ マニュアルを参照してください。

ご使用のクライアント コンピュータが BBS あるいは PNP 準拠の BIOS をサポートしない場合は、[Use BIOS Setup Boot Order] 以外の上記にリストされた値の 1 つを選びます。


セットアップ プロンプトの表示

使用可能な値：

•	オン - デフォルト値

•	オフ

説明：

オンを選ぶと、POST 後に設定メニューを表示するためにセットアップ メニューの待機時間 で与えられた時間内に Ctrl +S を押すためのプロンプトが表示されます。

オフを選ぶと、セットアップ メニューの待機時間の設定が 0 になり、Ctrl+S 設定プロンプトは起動中には表示されません。ただし、メニューが表示されるまで POST 直後に Ctrl +S を継続的に押して設定メニューを表示することもできます。Ctrl +S を継続的に押しても設定メニューが表示されない場合は、再起動して再度試行します。


セットアップ メニューの待機時間

使用可能な値：

•	0 秒

•	2 秒

•	3 秒

•	5 秒

説明：

システム起動のプロセス時に、ユーザが設定メニューを表示するために Ctrl + S を押すまでの Boot Agent の待機時間（秒）。

セットアップ メニューの待機時間を 0 秒に設定するか、または設定プロンプトの表示  をオフに設定すると、システムの起動中にセットアップ プロンプト (Ctrl + S を押す) が表示されなくなります。ただし、メニューが表示されるまで POST 直後に Ctrl +S を継続的に押して設定メニューを表示することもできます。Ctrl +S を継続的に押しても設定メニューが表示されない場合は、再起動して再度試行します。


レガシ OS ウェイクアップ サポート

この設定をギガビット アダプタから起動する場合には、設定メニューに表示されません。

ご使用のオペレーティング システムでのリモート ウェイクアップの互換性およびこの機能の使用法を確認してください。

使用可能な値：

•	オン

•	オフ

説明：

WfM アダプタのリモート ウェークアップ機能を使うには、Windows* 以外のオペレーティング システム (DOS または NetWare*等) を [オン] にします。

Select Disabled for this setting when using Windows 2000、XP、Me、または 98SE を使用する場合は、この設定を [オフ] にします。


VLAN リスト

VLANsは設定後にネットワーク コンポーネント ツリーに表示されます。

VLAN を右クリックすると、次のオプションが表示されます。

•	VLAN プロパティを変更  - VLAN の設定変更を可能とします。

•	削除 - VLAN の削除を可能とします。

関連項目

VLAN を追加する


チーム一覧

アダプタのチームが設定されている場合は、ネットワーク コンポーネント ツリー に表示されます。

チームを右クリックすると、次のオプションが表示されます。

•	チームの削除

•	チーム モードの変更

•	VLAN の追加

•	IPSec の有効化

•	GVRP の有効化

チームを設定してもネットワーク コンポーネント ツリーに表示されない場合は、チームの設定を適用するために Intel(R) PROSet II を閉じることが必要な場合があります。


チームに属するアダプタ

チームに属するアダプタを右クリックすると、以下のオプションが表示されます。

•	優先プライマリ - 選択したアダプタをチームのプライマリ送信アダプタに指定します。通常、ここで指定するアダプタがユーザの最高帯域幅のアダプタとなります。

•	優先セカンダリ - 選択したアダプタを優先プライマリ アダプタのバックアップ アダプタに指定します。このオプションは優先プライマリ アダプタを指定するまで使用できません。

•	チームから削除 - 選択したアダプタをチームから削除します。

関連項目

•	アダプタのチーム モードを変更

•	既存のチームにアダプタを追加

•	新規チームを作成

•	アダプタをチームから削除する

•	アダプタ チームを削除

•	アダプタをプライマリまたはセカンダリに指定する


ネットワーク コンポーネント
ネットワーク コンポーネント ツリー

ネットワーク コンポーネント ツリーには、システム上でアクティブなネットワーク コンポーネントが一覧表示されます。ネットワーク コンポ－ネントにはアダプタ、チーム、および VLAN が含まれます。


メンバー アダプタ

［メンバー アダプタ］ リスト ボックスタブにはチームを構成するアダプタが表示されます。メンバー アダプタをクリックし、そのアダプタに特有の情報を表示します。

関連項目

アダプタをチームから削除する


仮想 LAN

ネットワーク コンポーネント ツリーの ［仮想 LAN］ タブのエントリには設定された VLAN が表示されます。

関連項目

VLAN を追加する

VLAN プロパティを変更する

VLAN の定義

VLAN を削除する

VLAN の詳細設定

GVRP を設定する


アダプタ インスタンスの削除
アダプタの削除

Intel(R) PROSet II からアダプタを削除する前、またはアダプタをコンピュータから削除する前にアダプタがチームのメンバーでないことを確認します。アダプタがチームのメンバーの場合は、まずアダプタをチームから削除  し、次に以下の手順に従います。

Intel(R) PROSet II からアダプタを削除するには

1.	ネットワーク コンポーネント ツリーで、削除するアダプタを右クリックします。

2.	[削除] をクリックします。
アダプタがチームのメンバーでないことを示す、確認のダイアログ ボックスが表示されます。

3.	[はい] をクリックします。

4.	[OK] をクリックして、Intel PROSet II を閉じ、変更を適用します。

5.	プロンプトに従ってシステムを再起動します。

これで Intel PROSet II によるアダプタの管理は解除されます。


新規のチームを作成する

チームはフェ－ルオーバーや送信スループット増加等のネットワーク機能を拡張するために設定されたアダプタのグループです。

チームを作成するには

1.	ネットワーク コンポーネント ツリーで、チーム化されていないアダプタを右クリックします。

2.	[チームに追加]、[新規チームを作成] の順にクリックします。
チーム化ウィザードが表示されます。

3.	作成するチームのタイプを選び、[次へ] をクリックします。選択項目は以下の通りです。

•	アダプタ フォルト トレランス

•	スイッチ フォルト トレランス

•	アダプタ ロード バランシング

•	リンク アグリゲーション (動的_3ad* / GEC / LA / 802.3ad 静的モード)

4.	アダプティブ ロード バランシングチームを作る場合、受信ロード バランシング (RLB) をオンまたはオフにすることができます。

•	RLB をオンにすると、最高速度を使えるチーム メンバーが IP トラフィックを受信し、プライマリ アダプタが 非 IP トラフィックを受信します。
注：RLB がオンの場合、Intel(R) PROSet II は自動的に優先プライマリ アダプタ を選びます。Intel PROSet II はアダプタ モデルや速度を基準にして優先プライマリ アダプタを選びません。

•	RLB がオフの場合、プライマリ アダプタのみがトラフィックを受信します。

5.	リストには現在チームにないすべてのアダプタがすべて表示されます。リストからこのチームに含むアダプタをクリックし、[次へ] をクリックします。

6.	[完了] をクリックします。

7.	チームのプライマリ アダプタとして特定のアダプタを指定することができます。この場合、プライマリ アダプタとして指定するアダプタを右クリックし、次に優先プライマリをクリックします。
ユーザが優先プライマリ アダプタを選ばないと、Intel PROSet II がこれを選びます。

8.	[閉じる] をクリックして、Intel PROSet II を閉じ、変更を適用します。

この時点でチームが設定されます。

注：  Intel PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


既存のチームにアダプタを追加する

既存のチームにいつでもアダプタを追加することができます。

注：Dynamic 802.3ad チームで設定を変更すると、スイッチがリンク集計を再計算するため、一時的にトラフィックの流れが中断されることがあります。

Intel(R) PROSet II でアダプタを既存のチームに追加するには

1.	ネットワーク コンポーネント ツリーで、チーム一覧を右クリックします。

2.	[アダプタをチームに追加] をクリックして、追加するアダプタを選択します。

この時点でアダプタはチームに追加されます。

注：  Intel(R) PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


VLAN を追加する
VLAN を作成する

VLAN はネットワーク セキュリティを強化しブロードキャスト ドメインのサイズを縮小するために設定されたアダプタの論理的グループです。

VLAN を作成するには

1.	ネットワーク コンポーネント ツリーで、チームまたはチームに属さないアダプタを右クリックします。

2.	[VLAN の追加] をクリックします。
［新規 VLAN の追加］ダイアログ ボックスが表示されます。

3.	VLAN ID フィールドにアダプタに割り当てられている VLAN の数字を入力します。VLAN ID はスイッチ用に設定された VLAN ID と同じである必要があります。
注：VLAN の値として 0 と 1 は保留となっていることがあります。詳細はスイッチのマニュアルでご覧ください。

4.	VLAN 名のフィールドに VLAN のラベルを入力します。例： Marketing、Engineering など。名前を使う目的は識別のみであるため、他のネットワーク デバイスの名前と一致する必要はありません。

5.	[OK] をクリックします。

この時点でアダプタは VLAN のメンバーとして設定されます。VLAN メンバーとしてアダプタを設定した後、正しい VLAN の情報をもつ他のネットワーク デバイスを設定して VLAN の設定が完了したことを確認します。

注：  Intel(R) PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


VLAN を削除する

VLAN の削除には、Intel(R) PROSet II を使います。VLAN をオペレーティング システムのネットワーク パネルで削除およびオフにすると、システムの安定性が低下し、アダプタの設定に悪影響が生じることがあります。

VLAN をチームやアダプタから削除するには

1.	ネットワーク コンポーネント ツリーで、VLAN一覧を右クリックします。

2.	[VLAN の削除] をクリックします。

VLAN がチームかアダプタから削除されます。

注：  Intel PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


アダプタ チームを削除する

VLAN の削除には、必ず Intel(R) PROSet II ユーティリティを使います。チームをオペレーティング システムのネットワーク パネルで削除およびオフにすると、システムの安定性が低下し、アダプタの設定に悪影響が生じることがあります。

アダプタ チームごと削除するには

1.	ネットワーク コンポーネント ツリーで、チーム一覧を右クリックします。

2.	[削除] をクリックします。

3.	確認メッセージが表示されます。[はい] をクリックします。

これでチームが削除されました。この後もアダプタは別のデバイスとして機能します。

注：チームに作成された VLAN または優先パケットフィルタがある場合は、これらはチームとともに削除されます。チーム化される前にアダプタに作成された VLAN または優先パケットのフィルタは、チームが削除されるときに削除されます。


アダプタのチーム モードを変更する
チーム モードを変更する

チームのチーム モードを変更するには

1.	ネットワーク コンポーネント ツリーで、チーム一覧を右クリックします。

2.	[チーム モードの変更] をクリックして、次のいずれかをクリックします。

•	アダプタ フォルト トレランス

•	スイッチ フォルト トレランス

•	アダプティブ ロード バランシング アダプティブ ロード バランシングチーム モードをアダプティブ ロード バランシングに変更する際には、デフォルトで受信ロードの調整がオフになります。受信ロードの調整をオンにするには、チーム モードを変更してチームの [詳細設定] タブで受信ロードの調整をオンにします。

•	リンク アグリゲーション (動的_3ad* / GEC / LA / 802.3ad 静的モード)

この時点でモードが変更されます。

注：  Intel(R) PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


アダプタをチームから削除する

既存のチームからいつでもアダプタを削除することができます。

注：Dynamic 802.3ad チームで設定を変更すると、スイッチがリンク集計を再計算するため、一時的にトラフィックの流れが中断されることがあります。

チームからアダプタを削除するには

1.	ネットワーク コンポーネント ツリーで、チームを右クリックします。

2.	[チームから削除] をクリックします。

3.	[OK] をクリックして変更を適用します。

この時点でアダプタはチームから削除されます。

注：  Intel(R) PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


VLAN プロパティの変更
VLAN プロパティを変更する

VLAN ID を変更することによりアダプタを別の VLAN のメンバーとして再設定することができます。アダプタに関連する VLAN ID を変更すると、アダプタは既存の VLAN のコンピュータと通信する既存の VLAN から削除されます。

例えば VLAN ID を 7 から 9 に変えると、コンピュータは VLAN 7 のコンピュータとの通信を停止し、VLAN 9 のコンピュータと通信します。

VLAN の設定を変更するには

1.	ネットワーク コンポーネント ツリーで、VLAN を右クリックします。

2.	[VLAN プロパティの変更] をクリックします。

3.	VLAN ID フィールドにアダプタに割り当てられている VLAN の数字を入力します。VLAN ID はスイッチ用に設定された VLAN ID と同じである必要があります。
注：VLAN の値として 0 と 1 は保留となっていることがあります。詳細はスイッチのマニュアルでご覧ください。

4.	VLAN 名のフィールドに VLAN のラベルを入力します。例： Marketing、Engineering など。VLAN 名は参考情報としてのみ使われるため、他のネットワーク デバイスで設定された VLAN 名と一致する必要はありません。

5.	Intel(R) PROSet II を閉じるには、[OK] をクリックします。

VLAN の設定はこの時点で更新されました。

注：  Intel(R) PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。

関連項目

GVRP の有効化

VLAN の詳細設定


アダプタをプライマリまたはセカンダリに指定する

各チームには、1 つのプライマリ アダプタと、1 つ以上のセカンダリ アダプタが含まれます。

プライマリ アダプタは手動または Intel(R) PROSet II により選ぶことができます。

•	プライマリ アダプタを選ぶと、そのアダプタは優先プライマリ アダプタになります。優先プライマリ アダプタはそのステータスがアクティブである限りトラフィックを送受信します。優先プライマリ アダプタが非アクティブな状態からアクティブな状態に変わると、コントロールは自動的に優先プライマリ アダプタを使います。

例えば、Intel(R) PRO/1000 ギガビット アダプタ をプライマリ アダプタとし、Intel(R) PRO/100+ あるいは PRO/100 S アダプタ をセカンダリ アダプタとしたサーバを使用する場合、Intel(R) PRO/1000 ギガビット アダプタ を優先プライマリにします。この例では、PRO/1000 アダプタにエラーが生じた場合、PRO/100+ あるいはPRO/100 S アダプタ が引き継ぎ機能します。the Intel PRO/1000 アダプタを交換すると、自動的にチーム内のプライマリ アダプタの役割を再開します。

手動でプライマリ アダプタを選択した場合は、チーム内には常に優先プライマリ アダプタが存在します。

•	アダプタをプライマリとして設定しないと、Intel PROSet II はアダプタ モデルと速度を基に最適のアダプタを選びます。つまり、プライマリ アダプタが存在し、優先プライマリ アダプタが存在しません。優先プライマリ アダプタが存在しないと、Intel PROSet II はプライマリ アダプタにエラーが生じた際に代用のプライマリ アダプタを選ぶことができます。

例えば、プライマリ アダプタである Intel(R) PRO/1000 ギガビット アダプタにエラーが生じると、Intel PROSetII  はチームの別のアダプタをプライマリ アダプタとして指定することができます。Intel(R) PRO/1000 アダプタが再度アクティブになると、プライマリ アダプタでなくメンバーとしてチームに再加入します。

アダプタをプライマリまたはセカンダリ アダプタとして設定するには

1.	ネットワーク コンポーネント ツリーで、チームに属するアダプタを右クリックします。

2.	[優先プライマリ] または [優先セカンダリ] をクリックします。

この時点でアダプタのステータスは設定されました。

アダプタの優先ステータスを変更するには

上記と同様の手順を使い、アダプタの優先順位を変更することができます。

STP と SFT チーム： チームのプライマリ（アクティブ） アダプタを変更すると、新規のプライマリ アダプタの MAC アドレスを使用してチームが再ロードされます。同様に、チームのローカル管理されるアドレス (LAA) を変更すると、再ロードが行われチームは新しい MAC アドレスを持ちます。サーバがネットワークでアクティブな状態で SFT チームを行うと、これら両方のアクションにより、新しいプライマリ アダプタのアドレス情報により ARP 表をすべてのネットワーク デバイスが更新するまで、チームは通信できなくなります。ARP 表を更新するために必要な時間は、一部のルータやオペレーティング システムで使用できるパラメータである ARP キャッシュ タイムアウト時間により設定されます。ARP キャッシュ タイムアウト時間により、チームは最高 10 分使用できなくなる可能性があります。

注： 優先セカンダリ オプションは、優先プライマリが設定されるまで使用できません。


PROSet トレー アイコン
Intel(R) PROSet II トレー アイコン

Intel(R) PROSet II のインストール時に Intel PROSet II のトレー アイコンがクロックの側にあるタスクバーに表示されます。

アイコンを右クリックすると、次のオプションが表示されます。

コマンド	説明
Intel(R) PROSet II を起動(L)	Intel PROSet II ユーティリティを表示します。
Show Status for	インストールされている無線アダプタの名前を表示します。
トレー アイコンを隠す	タスクバー上のトレーアイコンを隠します。   タスクバーにトレーアイコンを再び表示するには: Intel PROSet II の [一般] タブで [トレーアイコンを表示] をクリックします。
終了	Intel PROSet II を閉じ、一時的にタスクバーからトレーアイコンを削除します。  アイコンはタスクバーに表示されていませんが、Intel PROSet II をコントロール パネルで [Intel PROSet II] アイコンをダブルクリックして起動することができます。 コンピュータが再スタートすると、Intel PROSet II トレーアイコンがタスクバーに表示されます。
終了し、起動時に実行しない	Intel PROSet II トレーアイコンを削除し、コンピュータの再起動時に再表示されないようにします。 このオプションの選択後にトレーアイコンを復元するには：  1. [スタート]、[ファイル名を指定して実行...] の順にクリックします。 2. 入力フィールドに 「PROMON」 と入力し、[OK] をクリックします。   Intel PROSet II アイコンはコンピュータが再起動するまでタスクバーに保持されます。 トレーアイコンを永久に表示するには、次の [スタートアップ時にトレイ アイコンを開始] をご覧ください。
スタートアップ時にトレイ アイコンを開始(S)	Intel PROSet II トレイ アイコンがタスクバーに再び表示されるように設定します。このオプションは、コンピュータを再起動した後トレイ アイコンが表示されるようにします。 注：このオプションは [終了し、起動時に実行しない] オプションを使用する場合にのみ使用できます。


Smart Power Down に関する技術情報
Smart Power Down に関する情報

Smart Power Down (SPD) は有効な接続がない場合に電力を節約する Intel 82558、82559、および 82550 ベースのアダプタで使われる電力節約方法です。SPD は最高 150% の電力を節約するようにアダプタを完全なスリープ モードにすることが可能です。SPD は次の状況にオンになります。

•	アダプタに有効な接続がない

•	オペレーティング システムが中断モードである

どちらの場合も、Smart Power Down がオンの際にはオペレーティング システムがアダプタをスリープ モードにして全体の電力消費量を削減します。通常の電力消費とアダプタ アクティビティは、アダプタが有効に接続されるか、またはオペレーティング システムが休止モードから切り替わると再開します。


デバイス メッセージを削除できない

[デバイス マネージャ] を使用してアダプタのチーム一覧 や VLAN リストを削除する場合は、「デバイスを作成できませんでした。[デバイスをアンインストールできませんでした。コンピュータを再起動してください。] というメッセージが表示されます。

このメッセージは、Intel(R) PROSet II により作成された仮想アダプタを削除するのに [デバイス マネージャ] を使用できないことを意味します。デバイス マネージャからアダプタを削除するには Intel PROSet II を使用してください。

関連項目

アダプタ チームを削除

VLAN を削除する

GVRP の有効化


VLAN 用の詳細設定

VLAN の詳細設定をカスタマイズするには

1.	ネットワーク コンポーネント ツリー. で [VLAN] をクリックします。

2.	[詳細設定] タブをクリックします。

3.	ドロップ ダウンリストから、[NumRxPackets] をクリックし、新しい値を入力します。
NumRxPackets はアダプタが着信パケットをメモリに割り当てるデータ セグメントである受信記述子の数を定義します。各着信パケットには 1 受信記述子が必要で、各記述子は 2kb のメモリを使います。

受信トラフィック能力の大幅な低下を検出した場合は、対策として受信記述子の数を増やすことがあります。受信能力に問題がない場合、デフォルト設定を使います。

注意：この値を修正するとシステムの性能が低下することがあります。

4.	ドロップ ダウンリストから、[NumTxPackets] をクリックし、新しい値を入力します。

[NumTxPackets] はアダプタによる送信パケットのシステム メモリへの記録を可能とするデータ セグメントである、送信記述子の数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信記述子が必要です。

送信能力に問題がある可能性を検出した場合、送信記述子の数を増加するように選択することがあります。送信記述子の数を増やすと送信能力が上がる一方、システム メモリの消費量も上がります。送信能力に問題がない場合、デフォルト設定を使います。

注意：この値を修正するとシステムの性能が低下することがあります。

5.	[OK] をクリックします。

6.	この時点で VLAN はカスタマイズされた設定があります。

この時点で VLAN はカスタマイズされます。

注：  Intel(R) PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


IPSec の有効化

 Internet Engineering Task Force (IETF) が開発した IP セキュリティ (IPSec) は、データ パケットが伝送中に変更されなかったことを確認することによって IP 通信を保護する標準規格セットです。IP セキュリティの詳細情報は、Intel のサポート サイト http://support.intel.com をご覧になるか、Intel(R) Packet Protect をお持ちの場合は『パケット保護ユーザ ガイド』を参照してください。

要件

以下の場合には、Intel(R) PROSet II で IP セキュリティをオンまたはオフにできます。

•	以下のいずれかのオペレーティング システムを使用している。

•	Windows* 98

•	Windows NT* 4.0, SP5 以降

•	Windows Me

•	Intelｮ PRO/100 アダプタを使用している。

Windows 2000 または Windows XP を使用している場合は、Microsoft Management Console でのスナップ インとして IP セキュリティを使うことができます。これらのオペレーティング システムにおける IPSec の導入に関する詳細情報は、Windows 2000 または XP のマニュアルをご覧ください。

IPSec をオンにするには

1.	ネットワーク コンポーネント ツリー の [チーム] または [チームに属さないアダプタ] を右クリックして、[IPSec の有効化] を選択します。

2.	コンピュータを再起動します。

3.	Intel(R) Packet Protect ソフトウェアをインストールします。
注：パケット保護をインストールするには、その前に少なくとも1つのアダプタまたは 1 チームのアダプタに対し [IPSec の有効化] オプションが選択されている必要があります。

これで IPSec がオンになりました。

IPSec をオフにするには

ネットワーク コンポーネント ツリー の [チーム] または [チームに属さないアダプタ] を右クリックして、[IPSec の有効化] を選択解除します。

Intel(R) PRO/100 S アダプタでの暗号化をオフロードする

Intel(R) PRO/100 S アダプタ ファミリは、IP セキュリティ トランザクションの暗号化処理をオフロードすることができます。アダプタで暗号化処理をオフロードすることで、CPU 使用率を低下させることができます。このオフロード機能をオンにするには:

1.	Intel Packet Protect か、Windows 2000 または XP の場合は Microsoft Management Console を使って、IP セキュリティをオンにします。

2.	Intel PROSet II で、ネットワーク コンポーネント ツリーから IP セキュリティ暗号化を取り扱う Intel PRO/100 S アダプタを選択します。

3.	[詳細設定] タブをクリックします。

4.	[設定] の一覧で、[オフロード] をクリックします。

5.	[値] ボックスで、[IP セキュリティ] を選択します。

6.	[OK] をクリックします。

これでこのアダプタが暗号化処理を CPU からオフロードすることになります。


GVRP サポート

ワークステーションやスイッチは、GVRP (GARP VLAN Registration Protocol) を使いネットワークを超えた動的な VLAN の作成、変更、および削除を行います。GVRP 対応のスイッチは VLAN メンバーのスイッチ ポートを識別し、VLAN ステータスを記録することができます。

要件

ネットワーク全体で GVRP をサポートするには、ネットワーク、アダプタ、およびスイッチは GVRP 対応であることが必要です。

アダプタで GVRP をオンにするには

1.	ネットワーク コンポーネント ツリーで、最低 １ つの VLAN を持つ チームに属するアダプタ を右クリックします。

2.	[GVRP サポート] をクリックします。
[GVRP サポート] のダイアログ ボックスが表示されます。

3.	[オン] をクリックします。

4.	GVRP Join Time ドロップダウン ボックスにスイッチ GVRP LEAVE コマンドと PROSet II GVRP Join コマンド間のミリ秒数を入力します。デフォルトでは、Intel(R) PROSet II は Join コマンド ２00 ms を Leave コマンドの後に開始します。

5.	[OK] をクリックします。

アダプタはこの時点で GVRP に対応します。

トラブルシューティング

異なる GVRP の導入があるため、アダプタで GVRP をオンにしてもネットワーク デバイス間で GVRP が対応するとは限りません。GVRP が機能しない場合は、アダプタの GVRP をオフにします。

注：  Intel PROSet II のチームや VLAN で複数の変更を行う場合、変更を設定するために各変更の後に Intel PROSet II を閉じることが推奨されます。その後 Intel PROSet II を再度開き次の変更を行うことができます。


Windows NT 4.0 サービス パック
Windows NT*  4.0 サービス パック

Intel(R) PROSet II および最先端のチーム化機能を使用するためには、Windows NT 4.0 をサービス パック 6a 以降でアップデートする必要があります。

Microsoft サービス パックおよび説明書は、http://www.microsoft.com/ntserver/ からダウンロードできます。


PRO/1000 デスクトップ アダプタ用の詳細設定

注：これらの変更を行う前に、ネットワークのシステム管理者にご相談ください。他のネットワーク デバイスに対応しない詳細設定を行うと、アダプタやシステムの性能が低下することがあります。

アダプティブ インターフレーム スぺ－シング

ネットワークにおける過剰なイーサネット パケットのコリジョンを補償します。

対応するアダプタ	すべて
デフォルト	オン
アダプティブ リンク レスポンス

アダプタからケーブルが外された際に通常のネットワーク作業をバイパスしてシステムの起動を加速します。これによりコンピュータを起動する際に必要とされる時間を大幅に削減することができます。

Intel イーサネット コントローラのアダプティブ リンク レスポンスをオンにしたときにネットワーク ケーブルが RJ-45 ポートに接続されていない場合は、ネットワーク接続は切断されます。黄色の注意アイコンがデバイス マネージャのネットワーク接続の隣に表示されます。

ネットワーク接続を再接続するには、ネットワーク ケーブルを RJ-45 ポートに接続してからコンピュータを再起動します。

対応するアダプタ	使用できないアダプタ モデルもあります。
デフォルト	オフ
推奨	オン
範囲	オン、オフ
注：システムで無線アダプタがアクティブな場合は、ALR (Adaptive Link Response) は機能しません。

集合バッファ

パケットの送信前にアダプタがデータ セグメントに追加されるように、集合バッファ数をカスタマイズして送信能力を最適化します。

集合バッファの設定は送信記述子の設定に対応するにように行う必要があります。集合バッファの設定は送信記述子の 30 - 50% とする必要があります。集合バッファの設定は送信記述子の設定に一致するように修正されていないと、送信能力は向上しない可能性があります。

集合バッファの設定は Windows NT 4.0 のコンピュータにおける送信能力を向上します。また Windows 98 と Windows 2000 のコンピュータにおける送信能力も向上します。

対応するオペレーティング システム	Windows NT 4.0、98、2000、XP
対応するアダプタ	すべて
デフォルト	128
範囲	16-768
PME をオンにする

Advanced Power Management (APM) を持つ比較的古いコンピュータにおけるアダプタの Wake on 機能のオン・オフを切り替えます。Wake on はアダプタ ARP パケットなどの特殊のタイプのパケットを受信すると、スタンバイまたは電源オフの状態からアダプタを切り替えます。

•	この機能をオフにすると、古い電源管理方法によりコンピュータにおけるすべての Wake on 設定がオフになります。

•	この機能をオンにすると、アダプタは Wake on 信号を使用可能とします。アダプタが特定のパケット タイプに応答するように設定するには、この章の後に示されている Wake on 設定をご覧ください。

•	ハードウェアのデフォルト値によりアダプタは Wake on 機能をシステムのハードウェアに基づいて設定します。

•	[アクションなし] の値によりアダプタはオペレーティング システムのデフォルトをオンにします。

Wake on 設定をすべてオフにするには、この機能をオフにします。あるいは、この機能を [アクションなし] に設定します。

対応するアダプタ	82559 ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オフ
範囲	オン、オフ
Fast Transmit Completion

パケットがネットワークに送信される前に再使用する送信記述子を使用可能状態にして送信能力を最適化します。

•	Fast Transmit Completion がオフの際には、アダプタはパケットが送信記述子を再使用するために送信されるまで待つ必要があります。

•	Fast Transmit Completion がオンの際には、アダプタは送信能力を向上するために送信記述子を早めに再使用します。

対応するアダプタ	82544 ベース。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オン、オフ
フロー制御

アダプタのトラフィック調整能力を向上します。

•	アダプタは受信キューが事前設定された限界に到達するとフロー制御フレームを作成します。フロー制御のフレームを作成すると、トランスミッターに送信低速化の信号が送られます。

•	アダプタはフロー制御フレームで指定された時間、パケット送信を一時停止し、フロー制御フレームに応答します。

アダプタによるパケット送信ベースの調整をオンにすると、フロー制御はパケットの喪失を防ぎます。

注：アダプタがこの機能を利用するには、リンク パートナーはフロー制御フレームをサポートする必要があります。

対応するアダプタ	82540 と 82544 ベースの送受信。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	フロー制御フレームの作成およびフロー制御フレームへの応答
範囲	• オフ、応答、作成、作成して応答、ハードウェア デフォルト

ジャンボ フレーム

注：ジャンボ フレームは 1000 Mbps のみでサポートされます。10 Mbps または 100 Mbps でジャンボ フレームを使用すると、パフォーマンスが劣化したり、リンクが失われる場合があります。

ジャンボフレーム機能を有効、または無効にします。ジャンボフレームは、各フレームにより多くのデータを入力することにより少数のパケットを送信して、スループットを増加し CPU の利用を削減することができます。標準のイーサネットのサイズは 1514 バイトで、ジャンボ フレームは 4088、9014、または 16128 バイトを含むことが可能です。

ネットワーク全体のデバイスでサポートされ、同じフレーム サイズを使うように設定されている場合のみにジャンボ フレームを有効にします。他のネットワーク デバイスでジャンボ フレームを設定するには、ネットワーク デバイスによるジャンボ フレーム サイズの計算が異なることにご注意ください。フレーム サイズ内にヘッダ情報を含むデバイスと含まないデバイスがあります。インテルのアダプタはフレーム サイズにヘッダ－情報を含みません。

詳細情報は、ジャンボ フレーム のトピックをご覧ください。

対応するアダプタ	すべて
デフォルト	オフ
範囲	オフ (1514)、4088、9014、16128。 (CRC ではスイッチを 4 バイト高く設定し、VLAN や QoS パケット タグを使う場合はさらに 4 バイトを追加します。)  注：: 1514-16128 の範囲内のすべての値を Windows のレジストリ キー MaxFrameSize で設定することができます。
ローカル管理されるアドレス

アダプタの MAC アドレスを上書きします。新規のネットワーク アドレスを入力するには、値のボックスに 12 桁の 16 進数を入力してください。

対応するアダプタ	すべて
デフォルト	なし
範囲	0000 0000 0001 - FFFF FFFF FFFD 例外： • マルチキャストのアドレスは使用しないでください （上位バイトの LSB = 1）。  • ゼロや F のみの連数を使わないでください。 Not Present 設定:Not Present 設定: アダプタの元のネットワーク アドレスに戻ります。
Windows 98SE を使用する場合:

手動で割り当てたアドレスを使った後でデフォルト アドレスを使う場合は、次の手順のいずれかを行います。

•	[ネットワーク プロパティ] ダイアログ ボックスの [詳細] タブで [ローカル管理されるアドレス] を選択し、その値を0に変更します。[OK] をクリックしてその設定を適用します。

•	Intel PROSet IIで[詳細] タブをクリックし、[デフォルトの復元] をクリックするか [値] フィールドを空白にします。[OK] をクリックして設定を適用します。

リンクの状態のイベントのログ

この設定は、リンクの状態の変化をログ記録するかしないかの設定に使用します。オンに設定した場合は、リンクアップまたはリンクダウンへの変化イベントによってメッセージが生成され、システム イベント ロガーに表示されます。管理者はシステム イベント ロガーからイベント メッセージを表示します。

以下のイベントがログ記録されます。

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

対応するアダプタ	すべて
デフォルト	Enable
範囲	オン、オフ
受信 TCP チェックサムのオフロード

アダプタで着信パケットの TCP、あるいは UDP チェックサムの確認ができます。

•	オフロードがオフの場合、オペレーティング システムは TCP チェックサムを確認します。

•	オフロードがオンの場合、アダプタはオペレーティング システムの確認を完了します。

この機能は受信能力を高め、CPU 使用を削減します。

対応するオペレーティング システム	• Windows XP* • Windows 2000 • Windows 98 はオフロードに対応しません。
対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	• Windows* XP:オン • Windows 2000:オフ
範囲	オン、オフ
送信 IP チェックサムのオフロード

アダプタで送信パケットの IP チェックサムを計算できます。

•	オフロードがオフの場合、オペレーティング システムは IP チェックサムを確認します。

•	オフロードがオンの場合、アダプタはオペレーティング システムの確認を完了します。

この機能は IP の送信能力を高め、CPU 使用を削減します。

対応するオペレーティング システム	• Windows XP* • Windows 2000 • Windows 98 はオフロードに対応しません。
対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オン、オフ
送信 TCP チェックサムのオフロード

アダプタで送信パケットの TCP、あるいは UDP チェックサムの計算ができます。

•	オフロードがオフの場合、オペレーティング システムは TCP チェックサムを確認します。

•	オフロードがオンの場合、アダプタはオペレーティング システムの確認を完了します。

この機能は TCP と UDP の送信能力を高め、CPU 使用を削減します。

対応するオペレーティング システム	• Windows XP* • Windows 2000 • Windows 98 はオフロードに対応しません。
対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オン
範囲	オン、オフ 注：サーバが DOS ベースのクライアントをサポートする場合、この機能をオフにします。
QoS パケット タグ

アダプタが以下を含む IEEE 802.3ac のタグ付きフレームの送受信をオンにします。

•	優先タグパケットに必要な 802.1p QoS (Quality of Service) タグ、および

•	VLAN に必要とされる 802.1Q タグ

Intel PROSet II は VLAN の設定時に自動的に 802.1p タグをオンにします。

対応するアダプタ	82559 以降ベースのアダプタ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	オフ
範囲	オン、オフ
受信記述子

アダプタが着信パケットをメモリに割り当てるデータ セグメントである受信記述子の数を定義します。各着信パケットには 1 受信記述子が必要で、各記述子は 2kb のメモリを使います。

受信トラフィック能力の大幅な低下を検出した場合は、対策として受信記述子の数を増やすことがあります。受信能力に問題がない場合、デフォルト設定値の 256 をお使いください。

対応するアダプタ	すべて
デフォルト	160
範囲	80-2048
TCP Segmentation Offload

アダプタのハードウェアにより有効なイーサネット フレームでデータの分割を可能とします。

•	TCP セグメンテーションがオフの場合、オペレーティング システムのソフトウェアは、送信用データをアダプタに送る前に分割します。

•	TCP セグメンテーションがオンの状態ではアダプタはデータをフレームに分割します。

アダプタのハードウェアはオペレーティング システムのソフトウェアに比べてデータの分割を速く分割できるため、この機能は送信能力を大幅に改善します。更に、アダプタが消費する CPU リソース量が低下します。

対応するオペレーティング システム	Windows XP
対応するアダプタ	82544 と 82540 ベースのみ。アダプタを識別するには、アダプタの仕様 のトピックをご覧ください。
デフォルト	1
範囲	0 = この機能を送信しない; 1 = この機能を送信する。
送信記述子

アダプタによる送信パケットのシステム メモリへの記録を可能とするデータ セグメントである、送信記述子の数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信記述子が必要です。

送信能力に問題がある可能性を検出した場合、送信記述子の数を増加するように選択することがあります。送信記述子の数を増やすと送信能力が上がる一方、システム メモリの消費量も上がります。送信能力に問題がない場合、デフォルト設定値の 256 をお使いください。

対応するアダプタ	すべて
デフォルト	256
範囲	80-2048
Wake on Link Settings

コンピュータがスタンバイ モードの際にネットワーク接続がリンクを確立するとコンピュータをウェークアップします。この機能のオン・オフを切り替えたり、オペレーティング システムのデフォルトを使うことができます。

対応するオペレーティング システム	Windows 9x、Windows 2000、Windows XP
範囲	オフ、強制、OS 依存
デフォルト	オフ
Wake on Settings

これらの設定はオペレーティング システムまたは Intel PROSet によりアクティブ化される機能を指します。Windows のバージョンにより機能が異なる場合やサポートされていない場合があります。

次の Windows のバージョンは Wake On Setting をサポートします。Windows 2000、Windows XP 64 bit Edition、Windows XP Professional、Windows Server 2003。この機能は、Windows Server 2003 の 64 ビット Itanium(R) ベースのシステムではサポートされていません。

Wake on Settings をオンにする

Intel PROSet を使い、アダプタが使う Wake On 設定を行うことができます。Wake On 設定を選択する前に、オペレーティング システムで Wake On Settings を使用できるようにする必要があります。この手順は、instructionsを参照してください。

Wake on Settings をオンにするには

6.	Intel PROSet で [詳細設定] タブをクリックします。

7.	[設定] リスト ボックスで、[Wake on Settings] を選択します。

8.	[値] リストで、適切な Wake On 設定を選択します。

9.	[OK] または [適用] をクリックします。

10.	これらのタイプの Wake On packets にアダプタが対応するには、オペレーティング システムで Wake On Settings を使用できるようにする必要があります。Wake on Settings をオンにするには、デバイス マネージャにナビゲートし、[コンピュータのスタンバイ解除の管理をこのデバイスで行う] のオプションをオンにします。

使用可能な設定

Intel PROSet では次の Wake On 設定が使用可能です。

設定	説明
オフ	アダプタは Wake On 設定を使いません。
Wake on Magic Packet	アダプタの Magic Packet の受信時にアダプタのウェークアップを可能とします。Magic Packet は受信アダプタのイーサネット アドレスの 16 連続コピーを含むパケットです。この機能の設定時には Intel PROSet はこの機能のオペレーティング システム値を上書きします。
Wake on Directed Packet	アダプタがその MAC アドレスに送られたユニキャスト パケットである Directed Packet を受信するとアダプタのウェークアップはオンになります。  プロトコルはこのウェークアップ方法をドライバでオンにする必要があります。この機能を解除するとドライバはこのウェークアップ方法をオンにするためにプロトコル要求を無視します。
Wake on Magic と Directed Packets	アダプタの Magic Packet や Directed Packet の受信時にアダプタのウェークアップを可能とします。
OS 制御	オペレーティング システムに完全な制御権を与えます。

注：1 つのアダプタに複数の IP アドレスが設定されていると、オペレーティング システムはすべての設定アドレスに対する ARP パターンでウェークアップを要請することがあります。アダプタはリストの最初の IP アドレスをクエリする ARP パケットに対する返答としてのみアダプタをウェークアップします。

注： Wake On 設定はシャットダウン (S5) 状態からコンピュータをウェークアップする機能を含みません。この状態は詳細設定タブでも使用可能な [PME をオンにする] の設定により制御されます。Wake On 設定がオフの場合にも、S5 からウェークアップする機能は [PME をオンにする] の設定により決定されます。

アダプタのドライバがオンである限り、PME の設定は使用可能です。ただし、ドライバがオフになると、デバイスはそのハードウェアをデフォルトに戻し、これによりコンピュータはシャットダウンからのウェークアップを促すことがあります。

[デフォルトの復元] ボタン

このボタンは設定のデフォルト値で現在選択されている詳細設定をリセットします。デフォルト値については上記に一覧表示された設定をご覧ください。(このオプションはすべての設定で使用可能ではありません。)


設定の保存/復元
Intel(R) PROSet II 設定を保存されたファイルから復元する

アダプタの詳細設定をファイルに保存した場合、ファイルを使いカスタム VLAN とチーム化の設定を復元することができます。Intel PROSet II 設定の復元は IP アドレスやプロトコルのバインド等のオペレーティング システム特有のネットワーク設定を復元しないことにご注意ください。

はじめる前に

設定の復元時、設定はそれを作成したコンピュータで復元する必要があります。さらに、コンピュータは最初に設定を保存した際と同じネットワークとハードウェアを使っている必要があります。例えば、コンピュータが最初に設定ファイルを保存した際にインテルのギガビット スイッチに接続されていた場合、設定の復元時にも同じスイッチがコンピュータに接続されている必要があります。

保存/復元機能は Windows NT* 4.0、2000、98SE、Me、および XP と互換性があります。

注意：設定ファイルを編集しないでください。設定ファイルを修正すると使用できなくなります。</span>

アダプタの設定を保存されたファイルから復元するには

1.	ツール メニューから [有線アダプタ用設定の保存/復元] をクリックします。
[設定の保存/復元] のダイアログ ボックスが表示されます。

2.	[復元] をクリックします。
[開く] ダイアログ ボックスが表示されます。

3.	設定ファイルを保存したフォルダに移動し、ファイルを選びます。

4.	[開く] をクリックします。
Intel PROSet II が復元された設定を表示します。これらの設定は [OK] をクリックするまで適用されません。

5.	必要に応じてアダプタの設定を変更します。

6.	[OK] をクリックして、Intel PROSet II を閉じ、復元した設定を適用します。

関連項目：

設定の保存


チームにアダプタを追加する

チームの作成時に各アダプタが 1 つのみのチームのメンバーであることを確認します。これには Intel(R) PROSet および他の設定ツールを使って作成されたチームを含みます。同じアダプタを複数のチームに追加するとチームの機能と性能に悪影響を与えることがあります。

•	Intel PROSet を使いチームを作成した場合、ツリー ビュー で既存のチーム メンバーを確認します。

•	他の設定ツールによりチームを作成した場合は、それらのツールでチームとそのメンバーを見直し、該当のアダプタがチーム化されていないことを確認します。

関連項目：

アダプタをチームから削除する

新規チームを作成


PROSet II をナビゲートする
Intel(R) PROSet II をナビゲートする

Intel(R) PROSet II には次の 3 つのナビゲーション エリアがあります。

•	メニュー

•	ネットワーク コンポーネント ツリー

•	タブ

メニューから、次を行うことができます。

•	 [アクション] でチームを設定するか、またはIPセキュリティをオンにする。

•	[ツール] でVLANとチーム化設定を保存またはアダプタに復元する。

•	サポートが必要な際にはオンライン ヘルプ システムを使うか、またはインテルのウェブサイトにアクセスしてください。

ネットワーク コンポーネント ツリーから、以下を行うことができます。

•	アダプタを 1 度クリックしてアダプタの詳細と設定を表示する。

•	アダプタを右クリックしてチームを設定し、IPSec をオンにする。

•	チームを右クリックしてその設定を変更する、または VLAN を設定する。

•	チーム メンバーを右クリックしてチーム アダプタの設定を変更する。

タブからアダプタを監視し、タスクを設定します。

トレーアイコン

トレーアイコンのチェックボックスを使い、クロックの側に表示されるタスクバーの Intel PROSet II を表示・非表示することができます。トレーアイコンを隠すには、チェックボックスを解除します。

Intel(R) PROSet II トレーアイコンに関する詳細情報


一般的な情報

アダプタに関する一般的な情報を表示するには、ネットワーク コンポーネント ツリーでアダプタをクリックします。

[一般] タブでは、次の操作ができます。

•	基本的なアダプタの情報の確認

•	ケーブルの機能テスト
注:ケーブルのテストは一部のアダプタのみで可能です。

•	アダプタのスロット位置の確認

•	その他の詳細情報の表示


基本的なアダプタの情報の確認

[一般] タブには、ネットワーク コンポーネント ツリーで選ばれたアダプタに関する次の情報が含まれます。

イーサネット アドレス	MAC アドレスと呼ばれる、このアダプタの 16 進数による 12 桁 のノードアドレス。
部品番号	このアダプタのインテル パーツ番号です。
IP アドレス	IPv4 プロトコルを使う場合は、このアダプタの TCP/IP。 Intel PROSet II は現在 IPv6 アドレスを表示しません。
ネットワーク ドライバのステータス	選択されているアダプタにおけるインテル ネットワークドライバのロード状態を示します。
ネットワークのステータス：	選択したアダプタのリンク、速度、およびデュプレックス ステータスを示します。[ネットワークのステータス] グループ ボックスのフィールドはアダプタにより異なります。  • リンク LED：点灯はアダプタ ケーブルが有効なハブ、あるいはスイッチ ポートに接続されていることを示し、消灯はリンクがないことを示します。 • 速度：ここに一覧表示される速度 (1000、100、または 10) は、アダプタがリンクされている速度です。 • アクティビティ LED：アクティブなネットワークにアダプタが接続しているときに点滅します。消灯は動作が行われていないかケーブルが接続されていないことを示します。 • デュプレックス：全二重はトラフィックの送信と受信を同時に行うことを示し、半二重はアダプタが同時でなく逐次で送信と受信のどちらかを行うことを指します。


速度とデュプレックスを設定する

デフォルトでインテルのアダプタは速度とデュプレックスの設定をオートネゴシエートします。アダプタがオートネゴシエートを使い接続を確立できない場合、アダプタとリンク パートナーの速度とデュプレックスの設定を手動で行う必要がある可能性があります。例えば、スイッチがオートネゴシエートをサポートしない場合や特定の速度やデュプレックスで設定されている場合、アダプタの速度やデュプレックスをスイッチの設定と一致するように、手動で設定する必要があります。

注意：アダプタの速度やデュプレックスの設定がリンク パートナーの設定と一致しない場合、ネットワークの接続が失われることがあります。

オートネゴシエートがオフの場合、使用可能な接続速度とデュプレックスの設定は次のようになります。

•	10 Mbps または 100 Mbps 全二重 (全二重リンク パートナーを全二重に設定する必要あり)。アダプタはパケットの送受信を同時に行えます。

•	10 Mbps または 100 Mbps 半二重 (リンク パートナーを半二重に設定する必要あり)。アダプタは一度に送信または受信のどちらか 1 つの操作を行います。

速度とデュプレックスの設定に関する情報は、適切なアダプタ ファミリをクリックしてご覧ください。

•	Intel(R) PRO/1000 (銅)
注:ファイバー ベースの Intel(R) PRO/1000 アダプタは 1000 Mbps、全二重で機能します。

•	Intel(R) PRO/10 または PRO/100


PRO 10/100 リンク設定
速度とデュプレックスの設定：Intel(R) PRO/10 および PRO/100 アダプタ

ネットワーク コンポーネント ツリーで、設定する Intel(R) PRO/10 または PRO/100 アダプタをクリックします。

1.	[詳細設定] タブをクリックします。

2.	設定リストで、[リンク速度とデュプレックス] をクリックします。

3.	[リンク速度とデュプレックス] ボックスで、アダプタとそのリンク パートナーに相応しいリンク速度とデュプレックスをクリックします。リンク パートナーの速度とデュプレックスを識別する方法は、リンク パートナーのマニュアルでご覧ください。

4.	[OK] をクリックします。

5.	プロンプトに従ってコンピュータを再起動します。

この時点でアダプタは指定された速度とデュプレックスに設定されています。

注意：アダプタの速度とデュプレックス設定が、接続されているデバイスの設定と一致しないと、ネットワークの接続が失われたりアダプタの性能が低下することがあります。


アダプタの詳細設定

アダプタの詳細設定を表示するには、次からアダプタのタイプを選びます。

•	Intel(R) PRO/1000 デスクトップ

•	Intel(R) PRO/1000 サーバ

•	Intel(R) PRO/100

•	Intel(R) PRO/100 VE と VM

•	Intel(R) PRO/10


スイッチ フォルト トレランス

スイッチ フォルト トレランス (SFT) は 2 つのチーム化されたアダプタを 2 つのスイッチに接続することができます。各アダプタは別のスイッチに接続されます。

スイッチ フォルト トレランスは以下で生じたエラーを検出することができます。

•	チーム化されたアダプタのどちらか

•	チーム化されたアダプタをそのスイッチに接続するケーブルのどちらか

•	アダプタに接続されたスイッチのポート

•	アダプタに接続されたスイッチのどちらか

SFT チームで、1 つのアダプタがプライマリ アダプタとなり、もう 1 つのアダプタはセカンダリ アダプタとなります。通常の操作時にはセカンダリ アダプタはスタンバイ モードになり、トラフィックの送受信を行いません。プライマリ アダプタが接続を失うと、セカンダリ アダプタが自動的にこの役割を引き継ぎます。

アダプタの速度	100 Mbps と 1000 Mbps で機能しているアダプタ各 1 つずつなどの組み合わせが可能です。
プロトコル	すべて
ネットワークの設定	• 各アダプタは別のスイッチに接続されます。 • Spanning Tree はオンである必要があります。
関連項目：

チーム化について

チームのタイプ


外部ファイルに設定を保存する
設定をファイルに保存する

Intel(R) PROSet II チーム化と VLAN 設定をファイルに保存し、後で restore it back to Intel PROSet に保存し直す ことができます。Intel PROSet II 設定の保存により IP アドレスやプロトコルのバインド等のオペレーティング システム特有のネットワーク設定が保存されないことにご留意ください。

保存/復元機能は Windows NT* 4.0、2000、98SE、Me、および XP と互換性があります。

注：特定のファイル名に設定を保存すると、そのファイル名を再度使うことはできません。Intel PROSet II 設定を保存するたびに異なる名前を使う必要があります。

Intel(R) PROSet II 設定を保存するには

1.	ツール メニューから [有線アダプタ用設定の保存/復元] をクリックします。
[設定の保存/復元] のダイアログ ボックスが表示されます。

2.	[保存] をクリックします。
[名前を付けて保存] ダイアログ ボックスが表示されます。

3.	設定ファイルを保存する場所に移動し、ファイル名を入力します。

4.	[保存] をクリックします。

5.	[OK] をクリックします。

Intel PROSet II の設定が保存されました。

設定の保存後、ファイルの編集や修正をしないでください。設定ファイルを修正すると使用できなくなります。

関連項目：

設定を復元する


スイッチ設定のテスト

スイッチ設定のテストを実行することにより、リンク パートナー が設定されたチーム化モードをサポートすることを確証できます。例えば、アダプタが Fast EtherChannel* チームのメンバーの場合、Intel(R) PROSet はリンク パートナーがリンク集計をサポートするアダプタに接続されていることを確認することができます。

各チームのモードの要件に関する特有な情報は、チーム化についてでご覧ください。

注意：このテストの実行中にチームは一時的にネットワークの接続を失います。

注： このテストは次の状況のどちらかが存在する場合にはエラーを検出しません。

アダプタの設定	スイッチの設定
Dynamic 802.3ad	任意
VLAN なしのリンク アグリゲーションモードでチーム化	スイッチは： • どの VLAN にも属さない • タグ付き VLAN で設定されている
VLAN を持つリンク アグリゲーションモードでチーム化	スイッチは： • アダプタで設定された VLAN に属さず、また、 • 定義されたリンク集計を持たない
スイッチ設定のテストを実行するには

1.	ネットワーク コンポーネント ツリーで、テストするチームを右クリックします。
テストを実行するには、チーム内に最低 2 つのアダプタが必要になります。

2.	[チーム設定] タブで [スイッチ設定をテスト] をクリックします。
[スイッチ設定のテスト] ダイアログ ボックスが表示されます。

3.	[はい] をクリックしてテストを続行します。
チーム設定またはリンク パートナーの設定エラーが検出されると、[トラブルシューティング] タブが表示されます。

注：  STP (Spanning Tree Protocol) テストに時間がかかるため、Intel(R) PROSet II はネットワークで Spanning Tree Protocol (STP) が有効かどうかを正確に示すことができない場合があります。スイッチの STP が次のように設定されていることを確認します。

•	SFT チームが [オン] になっている

•	他のチーム モードでは [オフ] (portfast) になっている


サード パーティに関する注意事項
* その他の製品名および会社名は一般に各社の商標であり、本書では、説明の用途でのみ使用しており、これらの所有権を侵害する意図はありません。


電源管理を設定する
電力消費量を設定する

[省電力] タブを使い、アダプタの電力消費量を設定することができます。アダプタが電力を節約中は、10Mbps で稼動します。

この機能を使うには、アダプタが次の条件を満たすことが必要です。

•	速度をオート ネゴシエートするように設定されており、また

•	速度をオートネゴシエートできるリンク パートナーに接続されている

アダプタの速度が 100Mbps で稼動するように強制されているか、リンク パートナーが 10Mbps で稼動できない場合、省電力はアダプタでオンにできません。

コンピュータによっては、コンピュータを再起動すると省電オプションが保存されません。その場合には、[省電力] タブの上の部分に [一時的省電] と表示されます。Windows XP または Windows Server 2003 を実行中のすべてのシステムでは、省電の設定は保存されません。

コンピュータを再起動後に設定が変更されない場合には、[省電力] タブの上の部分に [省電設定] と表示されます。

注: [省電力] がオンの場合、Intel(R) PRO/100 M アダプタは処理サイクルの速度を低化します。この機能により Intel PRO/100 M アダプタは更に電力消費量を節約することができます。他の Intel PRO/100 アダプタは電力を節約するために処理サイクル速度を低下しません。

[省電力] タブで、次をカスタマイズすることができます。

•	アダプタ全体の電力消費量全体電力消費量を設定すると、それがオンの限りアダプタはこの設定を保持します。アダプタがオフの場合、この電力設定は保存されません。

•	電力消費量がスタンバイ モードの場合コンピュータがスタンバイ状態になるとアダプタは自動的に電力を保持し 10 Mbps にネゴシエートします。コンピュータを何度起動しても Intel PROSet II はこの設定を保持します。

•	Windows* XP のバッテリ使用中の電力消費量コンピュータがバッテリを使う際にアダプタは自動的に電力を節約し 10 Mbps にネゴシエートします。コンピュータを何度起動しても Intel PROSet II はこの設定を保持します。

対応するアダプタ	Intel(R) PRO/100 アダプタ
対応するオペレーティング システム	• Windows* 98、2000、XP、Me、および NT* におけるスタンバイ モード中の全体の電力消費量を定義します。 • コンピュータをバッテリ操作時に Windows XP における電力消費量を定義します。
デフォルト	デフォルトでは、アダプタは速度とデュプレックス設定を保持するための通常の必要電力を消費します。アダプタが電力を節約する際には、アダプタは 10Mbps にネゴシエートしアダプタにより処理される全体のトラフィック量を減らします。
アダプタの電力消費量を設定するには

1.	ネットワーク コンポーネント ツリーで、電力使用で設定するアダプタをクリックします。
アダプタが電源の管理をサポートする場合は、[省電力] タブが表示されます。

2.	全体的な電力消費量を低下させるには、[省電力を使用し、速度を 10 Mbps にネゴシエートする] をクリックしてから [適用] をクリックします。オンの限りアダプタはこの設定を保持します。
通常の電力消費量を使うようにアダプタの速度をデフォルトに設定するには、[標準電源力および元の速度設定を使用する] をクリックしてから [適用] をクリックします。

3.	コンピュータがスタンバイ モードの間にアダプタが消費する電力量を削減するには、[スタンバイ時に省電力を使用する] をクリックします。

4.	Windows XP でアダプタを使用中、コンピュータがバッテリを使用している際にも省電力設定を定義することができます。コンピュータがバッテリを使用中にアダプタが消費する電力量を削減するには、[バッテリ操作時に省電力を使用する] をクリックします。

5.	[OK] をクリックして電力設定を適用します。


受信ロード バランシング

アダプティブ ロード バランシング (ALB) チームで、受信ロード バランシング (RLB) のオン・オフを切り替えることができます。RLB オプションは常時使用可能です。

•	アダプティブ ロード バランシング (ALB) チームの 詳細設定タブ

•	チーム化ウィザードを使った ALB チームの作成時

RLB がオフの場合、プライマリ アダプタのみがトラフィックを受信します。すべてのアダプタは (Tx) 送信トラフィックのロードを調整します。

RLB をオンにすると、トラフィックの分割はチーム メンバー間の速度の違いに依存します。

•	同じ速度のチームで、すべてのアダプタが IP トラフィックを送受信します。プライマリ アダプタはルーティングされていない (レイヤ 2) トラフィックを通します。

•	混合速度のチームでは、接続の最高速度を持つチーム メンバーが受信 (Rx) IP トラフィックのロードを調整します。すべてのアダプタは (Tx) IP トラフィックのロードを調整します。プライマリ アダプタはルーティングされていない (レイヤ 2) トラフィックを通します。
注：RLB がオンの場合、Intel(R) PROSet II は自動的に優先プライマリ アダプタ. アダプタをプライマリまたはセカンダリに指定する ことでデフォルトを上書きすることができます。.

関連項目：

チーム化について

新規チームを作成


PRO/100 VE と VM アダプタの詳細設定
Intel(R) PRO/100 VE と VM アダプタの詳細設定

[詳細設定] タブにリストされた設定により、アダプタのバッファ処理、電力管理、およびその他の機能の処理方法をカスタマイズすることができます。以下の機能の一部は使用しているオペレーティング システムとインストールされているアダプタに依存します。

詳細設定

アダプティブ インターフレーム スぺ－シング

ネットワークにおける過剰なイーサネット パケットのコリジョンを補償します。このデフォルト設定は 0 で、機能はオフになっています。

推奨される設定 (1) は、ネットワーク トラフィックの状態に動的に対応し、大部分のコンピュータやネットワークで最も効率的に機能します。この動的なモードは値が 1 に設定されている場合のみに有効ですが、まれにスペース値を手動設定することにより、より良いパフォーマンスが得られることがあります。値を設定するとパケット間の静的ギャップが強制されます。

値を増加すると、送信されるフレーム間の遅れが拡大します。

対応するアダプタ	すべて
デフォルト	0: オフ
範囲	0-255
アダプティブ リンク レスポンス

アダプタからケーブルが外された際に通常のネットワーク作業をバイパスしてシステムの起動を加速します。これによりコンピュータを起動する際に必要とされる時間を大幅に削減することができます。

Intel イーサネット コントローラのアダプティブ リンク レスポンスをオンにしたときにネットワーク ケーブルが RJ-45 ポートに接続されていない場合は、ネットワーク接続は切断されます。黄色の注意アイコンがデバイス マネージャのネットワーク接続の隣に表示されます。

ネットワーク接続を再接続するには、ネットワーク ケーブルを RJ-45 ポートに接続してからコンピュータを再起動します。

対応するアダプタ	モバイル製品専用。使用できないアダプタ モデルもあります。
デフォルト	オフ
推奨	オン
範囲	オン、オフ
注：システムで無線アダプタがアクティブな場合は、ALR (Adaptive Link Response) は機能しません。

集合バッファ

パケットの送信前にアダプタがデータ セグメントに追加されるように、集合バッファ数をカスタマイズして送信能力を最適化します。

集合バッファの設定は送信記述子の設定に対応するにように行う必要があります。集合バッファの設定は送信記述子の 30 - 50% とする必要があります。集合バッファの設定は送信記述子の設定に一致するように修正されていないと、送信能力は向上しない可能性があります。

集合バッファの設定は Windows NT 4.0 のコンピュータにおける送信能力を向上します。また Windows 98 と Windows 2000 のコンピュータにおける送信能力も向上します。

デフォルト	8
推奨値	8
範囲	1-32
ローカル管理されるアドレス

アダプタの MAC アドレスを上書きします。新規のネットワーク アドレスを入力するには、値のボックスに 12 桁の 16 進数を入力してください。

デフォルト	なし
範囲	0000 0000 0001 - FFFF FFFF FFFD 例外： • マルチキャストのアドレスは使用しないでください （上位バイトの LSB = 1）。  • ゼロや F のみの連数を使用しないでください。
Windows 98SE を使用する場合:

手動で割り当てたアドレスを使った後でデフォルト アドレスを使う場合は、次の手順のいずれかを行います。

•	[ネットワーク プロパティ] ダイアログ ボックスの [詳細] タブで [ローカル管理されるアドレス] を選択し、その値を0に変更します。[OK] をクリックしてその設定を適用します。

•	Intel PROSet IIで[詳細] タブをクリックし、[デフォルトの復元] をクリックするか [値] フィールドを空白にします。[OK] をクリックして設定を適用します。

PCI バス効率

アダプタによる最良のパケット送信方法の使用、またはパケット集計の常時強制が可能となります。

•	PCI バス効率がオフの際には、アダプタは最高能力を提供する送信方法を使います。集合パケットが最高の送信能力を提供する場合、アダプタは自動的にパケットを集合します。

•	PCI バス効率がオンの場合、アダプタはパケットの集合を強制します。

パケット送信能力に問題がない場合には PCI バス効率をオフに設定します。アンダーラン数が多いか、または PCI バスが能力的な問題を持つ場合、この値をオンに設定します。

デフォルト	オフ
範囲	オン、オフ
受信バッファ

プロトコル メモリにデータをコピーするときにドライバが使用するバッファ数を指定します。

ネットワーク ロードが高いときは、受信バッファを増やすことによりパフォーマンスが向上します。ただし、ドライバが使用するシステム メモリの量も増大します。また、この値を修正することにより、システム能力が低下することがあります。ご使用中のリスクはすべてユーザ負担となります。

デフォルト	48
推奨値	• Windows 98、Windows Me、Windows 2000、および Windows XP における単一のアダプタ: 48 • Windows NT 4.0 における単一のアダプタ： 32 • アダプタのチーム化： 250
範囲	8-1024
インターフレーム スぺ－シングの再送信

フレーム送信間の遅れを増大します。コリジョンの後にアダプタがフレームを再送信するために使う内蔵のイーサネット アルゴリズムがある反面、ネットワークで異常に多数のコリジョンがある場合は遅れを増大することによりネットワークの能力を向上することができます。

対応するアダプタ	すべて
デフォルト	6
範囲	6-15
送信制御ブロック

アダプタが送信パケットをシステム メモリで有効にするデータ セグメントである送信制御ブロックの数を定義します。パケットのサイズにより、各送信パケットには 1 つ以上の送信制御ブロックが必要です。

送信能力に問題がある可能性を検出した場合、送信制御ブロックの数を増加するように選択することがあります。たとえ送信制御ブロックの数の増加により送信能力が向上しても、制御ブロックはシステム メモリを消費します。送信能力に問題がない場合、推奨値の 32 をお使いください。

デフォルト	16
推奨値	32
範囲	8-64
Wake on Link Change

コンピュータがスタンバイ モードの際にネットワーク接続がリンクを確立するとコンピュータをウェークアップします。この機能のオン・オフを切り替えたり、オペレーティング システムのデフォルトを使うことができます。

対応するオペレーティング システム	Windows 9x、Windows 2000、Windows XP
範囲	オフ、強制、OS 依存
デフォルト	オフ
Wake on Settings

これらの設定はオペレーティング システムまたは Intel(R) PROSet II によりアクティブ化される機能を指します。Windows のバージョンにより機能が異なる場合やサポートされていない場合があります。

•	次の Windows のバージョンは Wake On Setting をサポートします。Windows 98SE、Windows Me、Windows 2000、Windows XP.

•	次の Windows のバージョンは Wake On Setting をサポートしません。Windows 98 retail、および Windows NT 4.0.

注：Intel(R) PRO/100+ マネージメントとサーバ アダプタ、および Intel(R) PRO/100 S アダプタが Wake On 設定をサポートします。

オペレーティング システムで Wake On Setting をオンにする

以下のタイプの Wake On packets には、Wake On Settings がオンのオペレーティング システムが必要です。

•	Wake on ARP

•	Wake on Directed Packet

•	Wake On NBT

これらのタイプの Wake On packets にアダプタが対応するには、オペレーティング システムは Wake On Settings を使用できる必要があります。Wake on Settings をオンにするには、デバイス マネージャにナビゲートし、[コンピュータのスタンバイ解除の管理をこのデバイスで行う] のオプションをオンにします。このオプションを検出するには次の手順に従います。

1.	[スタート]、[コントロールパネル] の順にクリックします。
コントロール パネルのウィンドウが開きます。

2.	[システム] をダブルクリックします。
[システム] ダイアログ ボックスが表示されます。

3.	[ハードウェア] タブをクリックして [デバイス マネージャ] ボタンをクリックします。
[デバイス マネージャ] ウィンドウが開きます。

4.	Wake On Settings をオンにするアダプタをダブル クリックします。
[プロパティ] ダイアログ ボックスが表示されます。

5.	[電源の管理] タブをクリックします。

6.	アダプタで Wake on Setting をオンにするには、[Allow this device to bring the computer out of standby] のオプションをオンにします。

使用可能な設定

Intel PROSet II では次の Wake On 設定が使用可能です。

設定	説明
オフ	アダプタは Wake On 設定を使いません。
Wake on Magic Packet	アダプタの Magic Packet の受信時にアダプタのウェークアップを可能とします。Magic Packet は受信アダプタのイーサネット アドレスの 16 連続コピーを含むパケットです。この機能の設定時には Intel PROSet II はこの機能のオペレーティング システム値を上書きします。
Wake on Directed Packet	アダプタがその MAC アドレスに送られたユニキャスト パケットである Directed Packet を受信するとアダプタのウェークアップはオンになります。  プロトコルはドライバ内でこのウェークアップ方法をオンにする必要があります。この機能を選択解除すると、ドライバはこのウェークアップ方法をオンにするプロトコルからの要求を無視します。
Wake on Magic と Directed Packets	アダプタの Magic Packet や Directed Packet の受信時にアダプタのウェークアップを可能とします。
OS 制御	オペレーティング システムに完全な制御権を与えます。

注：1 つのアダプタに複数の IP アドレスが設定されていると、オペレーティング システムはすべての設定アドレスに対する ARP パターンでウェークアップを要請することがあります。アダプタはリストの最初の IP アドレスをクエリする ARP パケットに対する返答としてのみアダプタをウェークアップします。

注：Wake On 設定はシャットダウン (S5) 状態からコンピュータをウェークアップする機能を含みません。この状態は詳細設定タブでも使用可能な [PME をオンにする] の設定により制御されます。Wake On 設定がオフの場合にも、S5 からウェークアップする機能は [PME をオンにする] の設定により決定されます。

アダプタのドライバがオンである限り、PME の設定は使用可能です。ただし、ドライバがオフになると、デバイスはそのハードウェアをデフォルトに戻し、これによりコンピュータはシャットダウンからのウェークアップを促すことがあります。


チームのタイプ

Intel(R) PROSet II により次のチームを設定することができます。

•	アダプタ フォルト トレランス (AFT)

•	スイッチ フォルト トレランス (SFT)

•	アダプティブ ロード バランシング (ALB)。受信ロード バランシング (RLB) を含む

•	FEC* / LA / 802.3ad:静的

•	* / LA / 802.3ad:静的

•	IEEE 802.3ad:動的

アダプタ フォルト トレランス

機能	• フェールオーバー アダプタの自動冗長構成を提供します。プライマリ アダプタが機能しなくなった場合、セカンダリ アダプタが引き継ぎ機能します。
ネットワークの設定	• すべてのアダプタを同じスイッチに接続する必要があります。 • Spanning Tree を無効にする必要があります。 • すべてのタイプのスイッチがサポートされています。
スイッチ フォルト トレランス

機能	• フェ－ルオーバー 2 つのアダプタが別のスイッチに接続されている場合、それらの間でフェ－ルオーバーの関係を作ります。
ネットワークの設定	• 各アダプタは別のスイッチに接続されます。 • Spanning Tree はオンである必要があります。
アダプティブ ロード バランシング  (ALB)

機能	• フェールオーバー • 送信ロード バランシング • IP トラフィック (オプション) の受信ロード バランシング (RLB)
ネットワークの設定	• すべてのアダプタを同じスイッチに接続する必要があります。 • すべてのタイプのスイッチがサポートされています。

FEC/ LA/ 802.3ad:静的

機能	• フェールオーバー • 送信ロード バランシング • 受信ロード バランシング
ネットワークの設定	• すべてのアダプタは 100MBs で機能する必要があります。 • すべてのアダプタを同じスイッチに接続する必要があります。 • リンク集計に対応するスイッチと併用する必要があります。 • PAgP プロトコル使用の Cisco FEC 対応スイッチ • リンク集計可能な Intel Express(R) スイッチ • 静的 802.3ad 対応の他のスイッチ
GEC/ LA/ 802.3ad:静的

機能	• フェールオーバー • 送信ロード バランシング • 受信ロード バランシング
ネットワークの設定	• すべてのアダプタは 1000 MBs で実行する必要があります。 • すべてのアダプタを同じスイッチに接続する必要があります。 • リンク集計に対応するスイッチと併用する必要があります。 • PAgP プロトコル使用の Cisco GEC 対応スイッチ • リンク集計の可能な Intel Express(R) スイッチ • 静的 802.3ad 対応の他のスイッチ
IEEE 802.3ad:動的

機能	• フェールオーバー • 送信ロード バランシング • 受信ロード バランシング
ネットワークの設定	• チーム メンバーは異なる速度で操作可能です。 • すべてのアダプタを同じスイッチに接続する必要があります。 • アダプタに接続されているスイッチは IEEE 802.3ad 標準に完全に対応する必要があります。
関連項目：

チーム化について


診断ログ
診断ログを設定する

Intel PROSet II は診断テスト と 送信機/応答機テスト  から診断ログに保存します。

ログを設定するには

1.	レジストリ エディタを開きます。[スタート]、[ファイル名を指定して実行...] の順にクリックします。[名前] のボックスに、「regedit」 と入力します。
レジストリ エディタ が開きます。

2.	HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation  のレジストリ キーにナビゲートします。

3.	レジストリ パラメータを修正します。

タスク：	名前	デフォルト値	使用可能な値
診断ログをオンまたはオフにする	Enable	1: Enable	1: Enable 0: オフ
ログ ファイルの場所	FilePath	System32	システムで有効な任意のパス
Intel PROSet II がログの既存情報を保持するか消去するかを決める	FileAppend	1: Enable	1: 既存ログに情報を追加する 0: ユーザが診断または送信機/応答機テストを実行するたびに既存情報を消去する
バイト単位で最高ファイル サイズを設定する	MaxFileSize	36 kb	ログ情報が保持できる最高バイト数。
4.	ログ設定の変更後、レジストリ エディタを閉じます。


診断概要
診断の概要

Intel(R) PROSet IIは 3 タイプの診断テストを提供します。

•	診断テスト はアダプタのヘルスの基本的な分析を提供します。基本的な診断テストの実行中に、Intel PROSet II は I/O の衝突、メモリ エラー、EEPROM 操作状況、送受信機能、およびリンクを確認します。

•	ケーブル テスト はケーブルの長さ、極性、その他のケーブル プロパティを提供します。

•	送信機/応答機のテスト はネットワークにおけるアダプタの機能性の分析を可能とします。これは 2 台のコンピュータを必要とする高度なテストです。

テストの結果は Intel PROSet II に表示されます。更に Intel PROSet II は診断テストと送信機/応答機のテストの結果を診断ログ ファイルに保存します。詳細情報は診断ログを設定する をご覧ください。


アダプタの仕様

コントローラ	ボード ID 番号	製品名 (コネクタ)	インテル パーツ番号
82545EM	A92165-xxx	PRO/1000 MT サーバ アダプタ	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT デュアル ポート サーバ アダプタ	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MF サーバ アダプタ	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF サーバ アダプタ (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF デュアル ポート サーバ アダプタ	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT デスクトップ アダプタ	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T デスクトップ	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF サーバ アダプタ	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI サーバ アダプタ	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT サーバ アダプタ	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T サーバ アダプタ	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F ギガビット サーバ アダプタ	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 ギガビット サーバ アダプタ	PWLA8490
82562	A19716-xxx	PRO/100 VE デスクトップ アダプタ	CNLA6000
82550	A78921-xxx	PRO/100 M デスクトップ アダプタ	A69928-01
82550	751767-xxx	PRO/100 S デスクトップ (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S サーバ (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S デュアル ポート サーバ アダプタ	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI マネージメント アダプタ (TP)	PILA8460B
82559	748566-xxx	PRO/100 S マネージメント (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S マネージメント (TP)	PILA8464B
82559	742252-xxx	InBusiness(TM) 10/100 アダプタ	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress(TM) PRO/100B PCI アダプタ(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC Card (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC Card (TP)	MBLA1656
82559	748568-xxx	PRO/100 S サーバ (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S サーバ (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI マネージメント アダプタ	PILA8900
82558	701738-xxx	PRO/100+ PCI マネージメント アダプタ (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ デュアル ポート サーバ アダプタ	PILA8472
82559	729757-xxx	PRO/100+ サーバ アダプタ (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI サーバ アダプタ (TP)	PILA8470


FEC
FEC* /LA/802.3ad:静的

Fast EtherChannel/リンク アグリゲーションチームはスループットを以下の方法で増やします。

•	アダプタの設定。メンバーをチームに追加することにより、スループットを増やすことができます。チームは最高 8 のアダプタから構成されます。各サーバは最高 4 つのチームにより機能します。

•	トラフィックの分析。ソフトウェアは各チームメンバーの送信のロードを継続的に分析し、必要に応じてアダプタ間のロードを調整します。スイッチ ロードは受信トラフィックを調整します。

さらに FEC チームはフォルト トラレンスを提供します。アダプタがチームで失敗すると、セカンダリ アダプタが引き継ぎ機能します。

リンク アグリゲーションチームは以下と対応します。

アダプタの速度	すべてのアダプタは同じ速度で稼動する必要があります。
ネットワークの設定	• すべてのアダプタは 100MBs で機能する必要があります。 • すべてのアダプタを同じスイッチに接続する必要があります。 • リンク集計に対応するスイッチと併用する必要があります。 • PAgP プロトコル使用の Cisco FEC 対応スイッチ • リンク集計可能な Intel Express(R) スイッチ • 静的 802.3ad 対応の他のスイッチ
プロトコル	すべて

関連項目：

チーム化について

チームのタイプ


GEC
GEC* /LA/802.3ad:静的

Gigabit EtherChannel/リンク アグリゲーションチームはスループットを以下の方法で増やします。

•	アダプタの設定。メンバーをチームに追加することにより、スループットを増やすことができます。チームは最高 8 のアダプタから構成されます。各サーバは最高 4 つのチームにより機能します。

•	トラフィックの分析。ソフトウェアは各チームメンバーの送信のロードを継続的に分析し、必要に応じてアダプタ間のロードを調整します。スイッチ ロードは受信トラフィックを調整します。

さらに GEC チームはフォルト トラレンスを提供します。アダプタがチームで失敗すると、セカンダリ アダプタが引き継ぎ機能します。

リンク アグリゲーションチームは以下と対応します。

アダプタの速度	すべてのアダプタは同じ速度で稼動する必要があります。
ネットワークの設定	• すべてのアダプタは 100MBs で機能する必要があります。 • すべてのアダプタを同じスイッチに接続する必要があります。 • リンク集計に対応するスイッチと併用する必要があります。 • PAgP プロトコル使用の Cisco GEC 対応スイッチ • リンク集計可能な Intel Express(R) スイッチ • 静的 802.3ad 対応の他のスイッチ
プロトコル	すべて

関連項目：

チーム化について

チームのタイプ


Disable Network Adapter Power Management
ネットワーク アダプタの電源管理をオフにする

1. Windows のデスクトップで [マイ コンピュータ] を右クリックします。

2. [プロパティ] をクリックします。

3. [デバイス マネージャ] タブをクリックします。

4. [ネットワーク アダプタ] アイコンをダブルクリックします。

5. インテル ネットワーク アダプタをダブルクリックします。

6. [電源の管理] タブが表示されている場合は、このタブをクリックし、[節電のために、コンピュータでこのデバイスの電源をオフにできるようにする] チェックボックスがオフになっていることを確認します。

7. [OK] をクリックします。これで診断を実行できます。

診断が終了したら、上記の手順 6 のチェックボックスをオンにして、電源管理機能を再度アクティブにすることができます。