Copyright: Intel(R) PROSet II Help Version 1013
Citation: Copyright (C) Intel Corporation 2003. All rights reserved.


케이블 테스트

네트워크 구성요소 트리에서 선택된 어댑터가 다음 어댑터 중 하나인 경우 일반 탭에 케이블 테스트 단추가 나타납니다.

•	82550 기반 Intel(R) PRO/100 S 서버 또는 데스크톱 어댑터(네트워크에 연결되어 있지 않음)

•	Intel(R) PRO/1000 어댑터

Intel PRO/100 어댑터에서 케이블 테스트를 실행하려면

일반 탭에서 케이블 테스트를 클릭합니다. 테스트가 끝나는 데 몇 분이 걸릴 수 있습니다.

문제 해결 탭에 테스트 결과가 표시됩니다.

Intel PRO/1000 어댑터에서 케이블 테스트를 실행하려면

케이블 테스트 기능을 사용하기 전에 어댑터가 1000 Mbps에서 작동하는지 확인합니다. 어댑터가 100 Mbps에서 작동할 경우 케이블 테스트를 사용할 수 있지만 일부 정보가 정확하지 않거나 사용하지 못할 수도 있습니다.

일반 탭에서 케이블 테스트를 클릭합니다. 테스트가 끝나는 데 몇 분이 걸릴 수 있습니다.

케이블 테스트 결과 대화 상자에 테스트 결과가 나타납니다. 다음과 같은 정보가 표시됩니다.

케이블 길이: 어댑터와 링크 파트너 사이의 대략적인 케이블 길이를 표시합니다. 보고된 케이블 길이가 실제 케이블 길이와 다를 경우 케이블이 끊긴 것일 수 있습니다. 정확한 오차 범위는 최대 30피트입니다.

극성: 이더넷 케이블에 있는 꼬인 한쌍의 전송 및 수신 와이어의 +/- 속성을 식별합니다. 이러한 속성이 올바르게 설정되어 있지 않을 경우 어댑터는 자동으로 설정을 수정하고 오류를 보고합니다.

로컬 수신 상태: 어댑터에 연결된 케이블 커넥터가 트래픽을 처리할 수 있는지 여부를 확인합니다. 로컬 상태 테스트가 실패하면 커넥터가 끊겼거나 배선이 잘못되어 있는지 확인하십시오.

원격 수신 상태: 링크 파트너에 연결된 케이블 커넥터가 작동 테스트를 거치지 않거나 오류가 발생합니다. 원격 상태 테스트가 실패하면 커넥터가 끊겼거나 배선이 잘못되어 있는지 확인하십시오.

수신 오류 계수: 수신 오류는 어댑터가 와이어에서 인식할 수 없는 전송을 감지할 때 발생합니다.
어댑터가 네트워크에 연결하거나 케이블을 어댑터에 연결하거나 컴퓨터를 다시 시작할 때 또는 자동 협상 후 어댑터를 다시 시작할 때 자동으로 수신 오류 계수가 증가합니다. 유휴 오류 계수가 5분 이내에 약 65,000에 도달하면 연결에 문제가 있는 것입니다. 연결 문제를 해결하려면 케이블을 다시 연결하거나 다른 케이블을 사용해 보십시오.

유휴 오류 계수: 유휴 오류 계수는 어댑터가 와이어에서 인식할 수 없는 전송을 감지하면 증분합니다. 수신 오류 계수와 달리 유휴 오류 계수는 어댑터가 활발하게 패킷을 수신하고 있지 않을 경우에 감지됩니다.
어댑터가 네트워크에 연결하거나 케이블을 어댑터에 연결하거나 컴퓨터를 다시 시작할 때 또는 자동 협상 후 어댑터를 다시 시작할 때 자동으로 유휴 오류 계수가 증가합니다. 유휴 오류 계수가 1분 이내에 약 255에 도달하면 연결에 문제가 있는 것입니다. 연결 문제를 해결하려면 케이블을 다시 연결하거나 다른 케이블을 사용해 보십시오.

MDI/MDI-X 상태: 어댑터에 연결된 케이블이 직선(MDI) 구성으로 되어 있는지 교차(MDI-X) 구성으로 되어 있는지 식별합니다. 시스템을 스위치 또는 허브에 연결할 때는 MDI를 사용하고 두 시스템을 연결할 때는 MDI-X를 사용합니다.

참고: 케이블 테스트 결과 대화 상자의 정보는 어댑터 유형에 따라 다르게 표시됩니다.


법률 정보

Copyright (C) 2002 Intel Corporation. All rights reserved.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

인텔사는 이 문서의 오류나 누락에 대한 책임을 지지 않습니다. 인텔은 여기에 수록된 정보를 업데이트한다는 약속을 하지 않습니다.

* 다른 이름과 브랜드는 해당 소유자의 자산일 수 있습니다.


PRO/1000 서버 어댑터 고급 설정

고급 탭에 나열된 설정을 통해 어댑터가 QoS 패킷 태그 지정, 점보 프레임, 오프로드 및 기타 기능을 처리하는 방법을 사용자 정의할 수 있습니다. 다음과 같은 몇 가지 기능은 실행 중인 운영 체제와 설치된 특정 어댑터에 따라 사용하지 못할 수도 있습니다.

고급 설정

적응 프레임 간의 간격

네트워크에서의 과도한 이더넷 패킷 충돌을 보상합니다. 기본적으로 이 설정은 0(기능의 활성을 해제함)으로 설정됩니다.

권장 값(1)은 동적으로 네트워크 트래픽 조건에 맞도록 설정하므로 대부분의 컴퓨터와 네트워크에 적합 합니다. 값이 1로 설정된 경우에만 동적 모드가 활성화 됩니다. 그러나 드물게 간격 값을 수동으로 설정하여 성능을 향상시킬 수도 있습니다. 값을 설정하면 패킷들 사이에서 안정적인 간격으로 강제로 지정됩니다.

값을 증가시켜 전송되는 프레임 간의 지연 시간을 늘립니다.

지원되는 어댑터	모두
기본값	0: 활성 해제됨
범위	0-255
적응 링크 응답

어댑터에서 케이블이 분리되면 네트워크 연결에 필요한 시작 루틴을 생략하여 시스템 시작 속도를 높입니다. 이 기능은 컴퓨터를 시작하는 데 필요한 시간을 크게 줄여줍니다.

Intel 이더넷 컨트롤러의 적용 링크 응답이 활성화되고 네트워크 케이블이 RJ-45 포트에 연결되어 있지 않으면 네트워크 연결이 활성 해제됩니다. 장치 관리자의 네트워크 연결 다음에 노란색 주의 아이콘이 나타납니다.

네트워크 연결을 다시 활성화하려면 네트워크 케이블을 RJ-45 포트에 연결한 다음 컴퓨터를 다시 시작합니다.

지원되는 어댑터	일부 어댑터 모델에서는 사용할 수 없습니다.
기본값	오프
권장	온
범위	온, 오프
참고: 적응 링크 응답(ALR, Adaptive Link Response)은 무선 어댑터가 시스템에서 활성화되었을 때에는 작동하지 않습니다.

가속 시 가용 버퍼 수

가속 시 가용 버퍼 수를 사용자가 정의하는 방식으로 전송 성능을 최적화하여, 패킷 전송 전에 어댑터가 데이터 세그먼트를 추가할 수 있도록 합니다.

가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 구성해야 합니다. 가속 시 가용 버퍼 수 설정은 전송 설명자의 30 - 50% 이어야 합니다. 가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 수정하지 않으면 전송 성능이 향상되지 않을 수도 있습니다.

가속 시 가용 버퍼 수 설정을 이용하면 Windows NT 4.0 컴퓨터에서의 전송 성능이 크게 증가합니다. 또한 Windows 98 및 2000 컴퓨터에서도 전송 성능이 향상됩니다.

지원되는 어댑터	모두
기본값	128
범위	16-768
고속 전송 완료

네트워크에서 패킷이 전송되기 전에 재사용하기 위해 전송 설명자를 비웁니다.

•	고속 전송 완료가 활성 해제된 상태에서 전송 설명자를 다시 사용하려는 경우 어댑터는 패킷이 전송될 때까지 기다려야 합니다.

•	고속 전송 완료가 활성화된 상태에서는 어댑터가 전송 설명자를 곧바로 다시 사용하므로 어댑터가 전송 성능을 향상시킬 수 있습니다.

지원되는 어댑터	82543 및 82544-기반 어댑터. 어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.
기본값	온
범위	온, 오프
흐름 제어

어댑터가 흐름 제어 프레임을 전송 또는 수신할 수 있도록 합니다. 수신된 흐름 제어 프레임에 지정된 시간 동안 전송 경로가 중지됩니다. 이러한 설정은 패킷이 끊기지 않게 하여 네트워크 성능을 미세하게 조정할 수 있도록 도와줍니다.

지원되는 어댑터	82542-기반, 전송 전용. 82540, 82543 및 82544 기반 어댑터, 전송 및 수신.  어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.
기본값	활성화됨
범위	활성 해제됨, 활성화됨, 하드웨어 기본값, 수신 잠시 멈춤 프레임, 전송 잠시 멈춤 프레임
점보 프레임

점보 프레임 기능을 활성화 또는 활성 해제합니다. 점보 프레임은 각 프레임에 더 많은 데이터를 넣어 적은 수의 프레임이 전송되도록 하는 방식으로 처리량을 늘리고 CPU 사용률을 줄일 수 있습니다. 표준 이더넷 프레임 크기는 1514바이트이고 점보 프레임은 4088, 9014 또는 16128바이트를 포함할 수 있습니다.

네트워크에 있는 장치가 점보 프레임을 지원하고 동일한 프레임 크기를 사용하도록 구성된 경우에만 점보 프레임을 활성화하십시오. 다른 네트워크 장치에서 점포 프레임을 설정하면 네트워크 장치가 점보 프레임 크기를 다르게 계산합니다. 일부 장치는 다른 장치와 달리 프레임 크기에 헤더 정보를 포함합니다. Intel 어댑터는 프레임 크기에 헤더 정보를 포함하지 않습니다.

자세한 내용은 점보 프레임  항목을 참조하십시오.

지원되는 어댑터	모두
기본값	활성 해제됨
범위	(1514), 4088, 9014, 및 16128 바이트를 활성 해제합니다. CRC의 경우 스위치를 4바이트 높게 설정하고, VLAN 사용 시에는 4바이트를 추가합니다.  참고: MaxFrameSize 매개변수를 사용하여 Windows 레지스트리에서 1514-16128 범위의 값을 설정할 수 있습니다.
로컬 관리 주소

어댑터의 MAC 주소를 무시합니다. 새로운 네트워크 주소를 입력하려면 값 상자에 12자리 16진수를 입력합니다.

지원되는 어댑터	모두
기본값	없음
범위	0000 0000 0001 - FFFF FFFF FFFD 예외: • 멀티캐스트 주소(하이 바이트 중 가장 중요도가 적은 비트 = 1)는 사용하지 마십시오.  • 모두 0 또는 모두 F는 사용하지 마십시오. 존재하지 않음 설정: 어댑터의 원래 네트워크 주소로 되돌립니다.
참고: Intel(R) PROSet II는 팀에서 다음을 사용합니다.

•	팀에 구성된 LAA가 있는 경우 팀의 LAA

•	팀에 구성된 LAA가 없는 경우 주 어댑터의 영구 MAC 주소

Intel PROSet II에서는 팀의 어댑터가 주 어댑터이고 팀에 LAA가 없는 경우 어댑터의 LAA를 사용하지 않습니다.

Windows 98SE 사용자:

수동으로 할당된 주소를 사용한 후 기본 주소를 사용하려면 다음 절차 중 하나를 수행하십시오.

•	네트워크 속성 대화 상자의 고급 탭에서 로컬 관리 주소(LAA)를 선택하고 값을 0으로 변경합니다. 확인을 클릭하여 설정을 적용합니다.

•	Intel PROSet II에서 고급 탭을 클릭한 다음 기본값 복원을 클릭하거나 값 필드에서 모든 문자를 지웁니다. 확인을 클릭하여 설정을 적용합니다.

오프로드 수신 TCP 체크섬

어댑터가 들어오는 패킷의 TCP 또는 UDP 체크섬을 확인할 수 있도록 합니다.

•	오프로드가 활성 해제된 상태에서 운영 체제가 TCP 체크섬을 확인합니다.

•	오프로드가 활성화된 상태에서 어댑터가 운영 체제에 대한 확인을 완료합니다.

이 기능은 수신 성능을 향상시키고 CPU 사용률을 줄여줍니다.

지원되는 운영 체제	• Windows XP* • Windows 2000 • Windows 98에서는 오프로드를 지원하지 않습니다.
지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.
기본값	• Windows* XP: 온 • Windows 2000: 오프
범위	온, 오프
오프로드 TCP 세그먼트화

어댑터 하드웨어가 데이터를 유효한 이더넷 프레임으로 세그먼트화할 수 있습니다.

•	TCP 세그먼트화가 활성 해제된 상태에서 운영 체제 소프트웨어는 전송하기 위해 어댑터로 보내기 전에 데이터를 세그먼트화합니다.

•	TCP 세그먼트화가 활성화된 상태에서 어댑터는 데이터를 프레임으로 세그먼트화합니다.

어댑터 하드웨어는 운영 체제 소프트웨어보다 더 빠르게 데이터 세그먼트화를 완료할 수 있기 때문에 이 기능을 이용하면 전송 성능을 크게 높일 수 있습니다. 또한 어댑터는 CPU 리소스를 더 적게 사용합니다.

지원되는 운영 체제	Windows XP
지원되는 어댑터	82544 기반. 어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.
기본값	1
범위	0 = 이 기능을 알리지 않음, 1 = 이 기능을 알림
오프로드 전송 IP 체크섬

어댑터가 나가는 패킷의 IP 체크섬을 계산할 수 있도록 합니다.

•	오프로드가 활성 해제된 상태에서 운영 체제가 IP 체크섬을 확인합니다.

•	오프로드가 활성화된 상태에서 어댑터가 운영 체제에 대한 확인을 완료합니다.

이 기능은 IP 전송 성능을 향상시키고 CPU 사용률을 줄여줍니다.

지원되는 운영 체제	• Windows XP* • Windows 2000 • Windows 98에서는 오프로드를 지원하지 않습니다.
지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.
기본값	온
범위	온, 오프
오프로드 전송 TCP 체크섬

어댑터가 나가는 패킷의 TCP 또는 UDP 체크섬을 계산할 수 있도록 합니다.

•	오프로드가 활성 해제된 상태에서 운영 체제가 TCP 체크섬을 확인합니다.

•	오프로드가 활성화된 상태에서 어댑터가 운영 체제에 대한 확인을 완료합니다.

이 기능은 TCP 및 UDP 전송 성능을 향상시키고 CPU 사용률을 줄여줍니다.

지원되는 운영 체제	• Windows XP* • Windows 2000 • Windows 98에서는 오프로드를 지원하지 않습니다.
지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.
기본값	온
범위	온, 오프 참고: 서버가 DOS 기반 클라이언트를 지원하면 이 기능을 오프로 설정합니다.
QoS 패킷 태그 지정

어댑터가 IEEE 802.3ac 태그 지정된 프레임을 전송 및 수신할 수 있도록 합니다. 여기에는 802.1p QoS 및 802.1Q VLAN 표시가 포함됩니다.

지원되는 어댑터	모두
기본값	오프
범위	온, 오프
수신 설명자

어댑터가 수신된 패킷을 메모리에 할당할 수 있도록 하는 데이터 세그먼트인 수신 설명자의 수를 정의합니다. 수신된 각 패킷에는 하나의 수신 설명자가 필요하며 각 설명자는 2KB의 메모리를 사용합니다.

수신된 트래픽의 성능이 크게 떨어지면 수신 설명자의 수를 늘릴 수도 있습니다. 수신 성능에 문제가 없으면 어댑터에 적합한 기본 설정을 사용합니다.

어댑터 컨트롤러	기본값	범위
82542 기반	160	80 � 768
82543 기반	160	80 � 256
82544 기반	160	80 � 4096
어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.

전송 설명자

어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 설명자의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 설명자가 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 설명자의 수를 늘릴 수 있습니다. 전송 설명자의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 전송 설명자가 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 기본 설정 256을 사용합니다.

어댑터 컨트롤러	기본값	범위
82542 기반	256	80 � 768
82543 기반	256	80 � 256
82544 기반	256	80 � 4096
어댑터 식별 방법에 대해서는 어댑터 사양 항목을 참조하십시오.

링크 변경 시 깨우기

컴퓨터가 대기 모드에 있는 동안 네트워크가 연결되면 컴퓨터를 깨웁니다. 기능을 활성화 또는 비활성하거나 운영 체제가 기본 값을 사용하도록 지정할 수 있습니다.

지원되는 운영 체제	Windows 9x, Windows 2000, Windows XP
범위	활성 해제됨, 강제 적용, OS 종속
기본값	활성 해제됨
설정 시 깨우기

이러한 설정은 운영 체제 또는 Intel PROSet에 의해 활성화되는 기능을 뜻합니다. 사용 중인 Windows 버전에 따라 기능이 다르게 수행되거나 전혀 지원되지 않습니다.

다음 Windows 버전에서 설정 시 깨우기를 지원합니다: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional 및 Windows Server 2003. 이 기능은 64-bit Itanium(R) 기반 시스템용 Windows Server 2003에서는 지원되지 않습니다.

설정 시 깨우기 활성화

Intel PROSet을 사용하여 어댑터가 사용하는 설정 시 깨우기를 구성할 수 있습니다. 설정 시 깨우기를 선택하기 전에 설정 시 깨우기를 사용하도록 운영 체제를 활성화해야 합니다. 이를 수행하려면 설명서를 참조하십시오.

설정 시 깨우기를 활성화하려면

1.	Intel PROSet에서 고급 탭을 클릭합니다.

2.	설정 목록 상자에서 설정 시 깨우기를 선택합니다.

3.	값 목록에서 해당 설정 시 깨우기를 선택합니다.

4.	확인 또는 적용을 클릭합니다.

5.	이러한 유형의 깨우기 패킷에 응답하는 어댑터의 경우 설정 시 깨우기를 사용하는 운영 체제를 활성화해야 합니다. 설정 시 깨우기를 활성화하려면 장치 관리자로 이동하고 이 장치가 절전 모드 상태의 컴퓨터를 해제시킬 수 있음 옵션을 활성화합니다.

사용 가능한 설정

다음 설정 시 깨우기 옵션을 Intel PROSet에서 사용할 수 있습니다.

설정	설명
활성 해제됨	어댑터가 설정 시 깨우기 옵션을 사용하지 않습니다.
매직 패킷 발견 시 깨우기	어댑터가 매직 패킷을 수신할 때 깨어나도록 합니다. 매직 패킷은 수신 어댑터의  이더넷 주소와 인접한 16개 복사본을 포함하는 패킷입니다. 이 기능을 구성하면 Intel PROSet에서 이 기능에 대한 운영 체제 값을 무시합니다.
유도 패킷 발생 시 깨우기	어댑터가 유도 패킷을 수신하면 깨어나도록 합니다. 이 패킷은 어댑터의 MAC 주소로 전송되는 유니캐스트 패킷입니다.  프로토콜은 드라이버에서 이 깨우기 방법을 활성화해야 합니다. 이 기능의 선택을 취소하면 드라이버가 이 깨우기 방법을 활성화하는 모든 프로토콜 요청을 무시합니다.
매직 패킷 및 유도 패킷 발견 시 깨우기	어댑터가 매직 패킷이나 유도 패킷을 수신할 때 깨어나도록 할 수 있습니다.
OS 제어 방식	운영 체제가 설정 시 깨우기 기능을 완벽하게 제어합니다.

참고: 여러 개의 IP 주소를 한 개의 어댑터용으로 구성할 경우 운영 체제는 구성된 모든 주소에 ARP 패턴 깨우기를 요청할 수도 있습니다. 어댑터는 목록의 첫번째 IP 주소를 쿼리하는 ARP 패킷에 대한 응답으로만 깨울 수 있습니다.

참고: 설정 시 깨우기에는 시스템을 종료(S5) 상태에서 깨우는 기능은 포함되지 않습니다. 이 상태는 PME 사용 설정으로 제어합니다. PME 사용 설정은 고급 탭에도 있습니다. 설정 시 깨우기가 비활성화되어 있는 경우 S5에서 깨어나는 기능은 PME 사용 설정으로 결정됩니다.

어댑터 드라이버가 활성화되어 있는 동안은 PME 설정이 적용됩니다. 그러나 드라이버가 비활성화되면 장치가 해당 설정을 하드웨어 기본값으로 되돌립니다. 이 기본값에 따라 종료 상태에서 컴퓨터를 깨울 수 있는지 여부가 결정됩니다.

기본값 복원 단추

이 단추는 현재 선택된 고급 설정을 해당 설정의 기본값으로 재설정합니다. 기본값은 위에 나열된 설정을 참조하십시오. 일부 설정에서는 이 옵션을 사용할 수 없습니다.


드라이버 정보
네트워크 드라이버

어댑터 드라이버에 대한 세부 정보를 보려면

1.	어댑터에 대한 자세한 내용을 보려면 네트워크 구성요소 트리에서 어댑터를 클릭하십시오.

2.	드라이버 탭을 누릅니다.

다음 정보가 나타납니다.

드라이버 정보:

이름	현재 로드된 어댑터 드라이버의 파일 이름
버전	드라이버의 버전 번호입니다. Intel 지원 사이트 http://support.intel.com에서 새로운 버전을 다운로드할 때 유용합니다.
설명	드라이버 이름
저작권	법률 정보
드라이버 통계:

참고: 아래의 통계는 어댑터 드라이버를 로드하거나 업데이트할 때 재설정됩니다.

전송된 패킷	전송된 패킷 수
수신된 패킷	수신된 패킷 수
전송 오류	오류와 함께 전송된 패킷 수
수신 오류	오류와 함께 수신된 패킷 수
이벤트 로그 메시지:

시스템 로그의 하위 집합인 이벤트 로그는 오류와 관련된 중요한 드라이버 목록을 제공합니다. 날짜 필드를 두 번 클릭하여 오류에 대한 자세한 정보를 볼 수 있습니다.

참고: 기가비트 어댑터의 경우 링크 이벤트 변경 내용은 기록되지 않습니다.

참고: 최신 드라이버를 얻으려면 메뉴에서 도움말 > 지원을 클릭합니다. 지원 페이지에서 최신 드라이버 얻기를 클릭합니다.


진단
진단 테스트

어댑터 진단에서 전체 어댑터 상태를 분석할 수 있습니다. 진단을 실행하면 Intel PROSet에서 I/O 충돌, 메모리 오류, EEPROM 작동 가능성, 전송/수신 기능 및 링크를 검사합니다.

진단 테스트 결과는 진단 탭에 표시되며 시스템 로그에도 저장됩니다.

참고:  컴퓨터에 Windows 98이 설치되어 있으면, 진단을 실행하기 전에 어댑터 전원 관리자를 먼저 비활성화 하여야할 수도 있습니다. 자세한 정보는,  전원 관리자 과정 비활성화를 참조하십시오.

개별 테스트

테스트 이름	설명	문제 해결 정보
제어 레지스터	I/O 주소에 충돌이 있는지 검사하고 레지스터의 액세스 가능성을 테스트합니다. 이 테스트에는 일반 레지스터, 수신 레지스터 및 전송 레지스터가 모두 포함됩니다. EEPROM 제어/데이터 레지스터는 테스트하지 않습니다.	제어 레지스터 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.
FIFO 레지스터	FIFO 메모리로 패턴을 쓰고 읽음으로써 어댑터의 FIFO 메모리를 테스트합니다.	FIFO 레지스터 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.
EEPROM	EEPROM에서 읽은 데이터의 무결성을 확인합니다. 이 테스트는 EEPROM 읽기 및 쓰기를 완료한 후 일관성 확인을 위해 결과를 비교합니다.	EEPROM 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.
인터럽트:	모든 어댑터 인터럽트가 작동되는지를 확인하기 위해 인터럽트 레지스터를 사용합니다.	인터럽트 테스트가 실패하면 BIOS에서 인터럽트 설정을 변경해 보십시오. 설정을 변경해도 문제가 해결되지 않으면 어댑터를 다른 슬롯으로 옮겨 보십시오.
루프백	패킷을 어댑터 자체에 전송하여 어댑터의 패킷 송수신을 테스트합니다. 이 테스트에서는 MAC 루프백 및 송수신기 루프백 모드를 모두 사용합니다. (Intel(R) PRO/1000 T 어댑터에서는 사용할 수 없음)	루프백 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.
링크	어댑터가 유효한 파트너에 링크되어 있는지 확인합니다.	링크 테스트가 실패하면 케이블이 어댑터와 링크 파트너에 제대로 연결되어 있는지 확인하십시오. 케이블이 제대로 연결되어 있으면 케이블을 링크 파트너의 다른 포트에 연결하거나 다른 케이블에 연결해 보십시오.
참고: 진단이 실행되는 도중 중지를 클릭하면 진단이 중지되기 전 잠깐 지연됩니다. 진단이 중지하면 확인 단추가 사용 가능한 상태로 변경됩니다.

기타 설정

고급 단추: 전송자-응답자 네트워크 테스트를 설정하려면 이 단추를 클릭합니다.

경고: 전송자/응답자 테스트는 시스템이 "대기" 모드 또는 "일시 중단" 모드에 있거나 케이블이 컴퓨터에 연결되어 있지 않을 때는 실행되지 않습니다.


팀 구성 및 상태
팀 구성

팀 구성에 대한 자세한 정보를 보려면

네트워크 구성요소 트리에서 테스트할 팀을 클릭합니다.

팀 구성 탭이 나타납니다.

팀에 있는 어댑터 상태 상자에 다음이 나열됩니다.

어댑터

팀에 포함된 각 어댑터 이름입니다.

우선

(우선순위를 지정한 경우) 팀에서 어댑터에 대한 우선순위 상태를 표시합니다. 어댑터는 팀에 주 또는 보조 상태가 있을 수 있습니다.

어댑터를 주 또는 보조로 지정하는 방법

상태 열에 다음이 나열됩니다.

•	활성: 어댑터에서 네트워크 트래픽이 전달되는 중입니다.

•	AFT 모드에서 주 어댑터로 기본 설정된 하나의 어댑터만 활성 상태입니다.

•	동적 802.3ad 모드에서 활성 집계자의 일부인 어댑터가 활성 상태입니다.

•	대기: AFT, SFT 및 동적 802.3ad 팀이 대기 모드를 지원합니다. 대기 모드에 있는 어댑터는 네트워크에 연결되어 있지만 트래픽이 원활하게 전달되지는 않습니다.

•	Disabled: 어댑터가 제거 또는 활성 해제되었거나 드라이버가 로드되지 않았습니다. 또한 케이블에 장애가 있거나 연결이 끊겨 어댑터가 활성 해제된 상태입니다.

팀 정보 섹션에는 다음이 나열됩니다.

•	이더넷 주소: 팀의 기본 MAC 주소를 나열합니다.

•	IP 주소: 팀의  IP 주소를 나열합니다.

•	팀 유형: 팀 모드를 나열합니다.

스위치 구성 테스트 단추

스위치 구성 테스트를 실행하여 링크 파트너가 해당 어댑터 팀 구성 모드를 지원하는지 확인할 수 있습니다.  예를 들어, 어댑터가 링크 집계 팀의 구성원인 경우 Intel (R) PROSet II는 어댑터에 연결된 링크 파트너가 링크 집계를 지원하는지 확인할 수 있습니다.

각 팀 모드의 요구 사항에 대한 자세한 내용은 팀 정보를 참조하십시오.

이 테스트를 실행할 때 팀의 네트워크 연결이 일시적으로 끊길 수 있습니다.

참고: 다음과 같은 경우 이 테스트에서 오류를 감지하지 못합니다.

어댑터 구성	스위치 구성
VLAN이 없는 링크 집계로 팀 구성 모드	다음 스위치 중 하나: • VLAN에 속하지 않음 • 태그 지정된 VLAN을 사용해서 구성됨
VLAN과 함께 링크 집계로 팀 구성 모드	스위치: • 어댑터에 구성된 VLAN에 속하지 않음, 그리고 • 정의된 링크 집계가 없음
스위치 구성 테스트를 실행하려면

1.	네트워크 구성요소 트리에서 테스트할 팀을 클릭합니다.
테스트를 실행하려면 팀에 최소한 두 개의 어댑터가 있어야 합니다.

2.	팀 구성 탭에서 팀 전환 구성을 클릭합니다.
스위치 구성 테스트 대화 상자가 나타납니다.

3.	테스트를 계속하려면 예를 클릭합니다.
팀이나 링크 파트너 구성 오류가 감지되면 문제 해결 탭이 나타납니다.

참고: 스패닝 트리 프로토콜(STP) 테스트에 필요한 시간 때문에 STP가 네트워크에서 활성 상태인지 여부를 Intel PROSet이 정확하게 표시하지 못할 수도 있습니다. 스위치는 다음과 같이 STP를 사용해서 구성해야 합니다.

•	SFT 팀에 대해 활성화

•	다른 모든 팀 모드에 대해 활성 해제됨(portfast)


VLAN
VLAN 개요

VLAN은 VLAN 구성원만 다른 구성원으로부터 트래픽을 수신할 수 있도록 네트워크 트래픽을 격리시키는 논리 네트워크 그룹 지정 방식입니다. 건물, 대학 또는 기업 네트워크에서 지리적으로 분산된 서버에 클라이언트를 연결할 경우 VLAN을 사용하여 여러 PC를 논리적인 작업 그룹으로 묶을 수 있습니다.

네트워크에서 VLAN을 사용하면 다음이 가능합니다.

•	브로드캐스트 폭풍을 제한합니다

•	네트워크 연결 수의 추가, 이동 및 변경을 개선합니다

•	보안 문제를 줄입니다

•	관리 작업을 쉽게 합니다

VLAN 유형

암시적 VLAN이라고도 하는 스위치 기반 VLAN과 명시적 VLAN이라고도 하는 태그 기반 VLAN이 있습니다.

•	암시적 VLAN은 포트 번호, MAC 주소 및 기타 레이어 2 기능과 같은 스위치 기능을 기반으로 합니다. 대부분의 Cisco* 제품을 포함하여 많은 스위치에서 기본 VLAN은 대부분 암시적 VLAN입니다. 암시적 VLAN은 스위치에서만 구성됩니다. 스위치는 패킷을 변경하거나 패킷에 태그를 달아 암시적 VLAN을 강제로 설정하지 않습니다. 모든 Intel 어댑터는 암시적 VLAN에 참여할 수 있습니다.

•	명시적 VLAN은 각 패킷 헤더에서 4바이트 태그(802.3ac)를 추가하는 것을 기반으로 합니다. 각 IEEE VLAN은 어댑터와 모든 링크 파트너를 포함하여 전체 네트워크에서 설정해야 합니다.

요구 사항

VLAN에는 다음이 필요합니다.

•	802.1Q VLAN을 지원할 수 있는 네트워크 상의 스위치

•	다음을 포함하여 802.1Q VLAN을 지원할 수 있는 어댑터:

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R) PRO/1000

•	Intel(R) PRO/100B 어댑터는 VLAN을 지원하지 않습니다.

Intel VLAN 개요는 Intel Networking 웹 사이트를 참조하십시오.

  지금 웹 사이트 방문

더 자세한 정보가 필요하면 VLAN 백서를 읽으십시오.

  웹 사이트에서 백서 읽기

참조

VLAN 추가

VLAN 속성 변경

VLAN 제거

VLAN 고급 설정


지원

인터넷에 연결되어 있고 웹 브라우저가 있을 경우 Intel 지원 사이트 중 한 곳을 방문할 수 있습니다.

인터넷을 통한 지원:

1.	도움말 메뉴에서 지원을 클릭합니다.

2.	웹 사이트 링크 중 하나를 클릭합니다.


문제 해결

문제 해결 탭은 Intel(R) PROSet II에서 어댑터 구성, 드라이버 설치 및 기타 다른 오류가 있는 경우에만 나타납니다. Intel PROSet II는 문제를 확인하며, 대부분의 경우 문제에 대한 가능한 해결책을 제공합니다.

어댑터에 문제가 있다고 생각되면 다음 중 한 가지 이상을 시도해 보십시오.

•	일반 탭의 정보를 확인하여 네트워크에 활성 링크가 있는지 점검합니다.

•	구성된 팀이 있으면 링크 파트너 구성을 테스트하여 팀 모드를 지원하는지 확인합니다.

•	진단을 실행합니다.

•	케이블 테스트를 실행하여 어댑터에서 지원되는지 확인합니다.


전송자 응답자 테스트

전송자 응답자 테스트를 사용하여 네트워크에서 어댑터를 테스트할 수 있습니다.

이 테스트를 실행하기 전에 어댑터가 네트워크에 연결되어 있는지 확인하십시오.

테스트 설정

전송자 및 응답자 컴퓨터를 설정합니다. 전송자는 응답자에게 계속해서 패킷을 전송하고, 응답자는 전송자에게 패킷을 다시 에코합니다.

전송자
계속해서 네트워크에 패킷을 전송합니다. 시작을 선택하면 패키 전송이 시작됩니다.
패킷 전송을 시작하기 전에 네트워크에 응답자를 설정해야 합니다. Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S 또는 PRO/1000 어댑터가 설치된 다른 컴퓨터로 가서 해당 어댑터에 대해 Intel(R) PROSet을 사용하여 응답자로 설정합니다. 가능하면 전송자와 응답자에 대해 동일한 모델의 어댑터를 사용하십시오.

응답자
전송자(패킷을 전송하는)에게 다시 패킷을 에코합니다. 시작을 선택하여 이 PC가 응답자로 작동하게 합니다.

용도가 다르기는 하지만, 이 테스트를 네트워크 세그먼트 연결 상태와 네트워크 구성을 테스트하는 데 사용할 수도 있습니다. 새 LAN 세그먼트를 테스트할 경우 한 쪽에 응답자를 설정하고 다른 쪽에서 전송자를 사용해서 테스트합니다.

이 테스트는 두 어댑터 간의 연결을 확인하지만 속도를 확인하기 위한 것은 아닙니다. 어댑터가 네트워크를 통해 트래픽을 송수신하는 속도는 네트워크 토폴로지 및 네트워크 로드에 따라 다를 수 있습니다. 일반 탭을 클릭하여, 설정된 어댑터 속도를 볼 수 있습니다.

참고: 스패닝 트리가 활성화된 상태로 Cisco* 6500 스위치가 구성된 경우 전송자 응답자 테스트에서 정확한 결과를 얻을 수 없습니다. Cisco 6500 스위치를 사용해서 전송자 응답자 테스트를 실행하려면 스패닝 트리의 활성을 해제해야 합니다.

경고: 전송자/응답자 테스트는 시스템이 "대기" 모드 또는 "일시 중단" 모드에 있거나 케이블이 컴퓨터에 연결되어 있지 않을 때는 실행되지 않습니다.


새 VLAN

VLAN ID: 네트워크 관리자가 할당하는 VLAN 번호입니다. 어댑터의 VLAN ID는 스위치의 VLAN ID와 일치해야 합니다. 유효 범위: 1 - 4094. 참고: VLAN 번호 0과 1은 종종 예약됩니다. 자세한 내용은 스위치 문서를 참조하십시오.

VLAN 이름: VLAN의 이름입니다. 예를 들면 마케팅 또는 엔지니어링이 있습니다. VLAN 이름은 네트워크에서 VLAN을 보다 쉽게 식별할 수 있도록 하는 선택적인 설정입니다. 어댑터의 VLAN 이름은 스위치의 VLAN 이름과 일치하지 않아도 됩니다.


어댑터 식별

어댑터 식별 기능을 사용하여 컴퓨터 뒷면에 있는 실제 어댑터를 식별할 수 있습니다.

예를 들어, 두 개의 어댑터가 설치되어 있는 경우 네트워크 구성요소 트리에서 한 개의 어댑터를 선택하고 어댑터 식별 단추를 클릭합니다. 선택된 어댑터의 브래킷 LED가 깜박입니다.

어댑터 위치를 확인하려면

1.	어댑터 식별을 클릭합니다.

2.	슬라이더를 움직여 LED가 깜박이는 시간(초)을 선택합니다. 기본값은 10초입니다.

3.	시작을 클릭합니다.

선택된 어댑터의 LED가 지정된 시간 동안 깜박입니다.


어댑터 오류 방지

어댑터 고장 대비 기능은 백업 네트워크 연결을 제공하도록 구성된 둘 이상의 어댑터로 이루어진 팀입니다. 이 기능을 이용하면 허브나 스위치 포트, 케이블 또는 어댑터에 장애가 발생해도 컴퓨터의 네트워크 성능이 그대로 유지됩니다.

어댑터 고장 대비 팀에는 주 어댑터와 백업(또는 보조) 어댑터가 있습니다. 정상 작동 중에는 주 어댑터만 트래픽을 전송합니다. 주 어댑터 또는 주 어댑터로의 링크에 오류가 생기면 보조 어댑터가 자동으로 작동합니다.

어댑터 고장 대비 기능을 사용 중인 경우에는 스패닝 트리의 활성을 해제해야 합니다.

어댑터 고장 대비 팀은 다음과 호환됩니다.

어댑터 유형	Intel 서버 어댑터 중 하나가 팀 구성원이어야 합니다.
어댑터 속도	100 Mbps에서 링크되는 어댑터와 1000 Mbps에 작동하는 어댑터 한 대씩을 함께 사용할 수 있습니다.
네트워크 구성	• 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 스패닝 트리는 활성 해제해야 합니다
프로토콜	모두
참조:

팀 정보

팀 유형


적응 로드 균형 조정

적응 로드 균형 조정(ALB)은 서버의 전송 및 수신 처리량을 늘리기 위해 구성되는 팀 유형입니다. ALB 팀은 자동으로 전송 트래픽의 로드 균형을 조정하지만 수신 트래픽의 로드 균형 조정은 활성화 또는 활성 해제될 수 있습니다.

ALB 팀은 다음과 같은 방법으로 처리량을 늘립니다.

•	어댑터 구성. 팀에 구성원을 추가하여 전체 처리량을 늘릴 수 있습니다.

•	트래픽 분석. ALB 소프트웨어는 계속해서 각 팀 구성원에 대한 전송 및 수신 로드를 분석한 후 필요하면 어댑터 간 로드 균형을 조정합니다.

전송 트래픽

ALB 팀은 모든 어댑터가 IP(IPv4 및 IPv6)와 NCP IPX  전송 트래픽의 로드 균형을 조정합니다.

수신 트래픽

•	ALB 팀에서 수신 로드 균형 조정 기능이 활성 해제된 경우 주 어댑터가 트래픽을 수신합니다.

•	수신 로드 균형 조정 기능이 활성화된 ALB 팀:

•	주 어댑터가 프로토콜을 사용하여 트래픽을 수신합니다.

•	최고 속도의 활성 어댑터가 IPv4 트래픽을 수신합니다.

예를 들어, 세 개의 어댑터로 이루어진 ALB 팀에는 주 어댑터로 지정되는 하나의 기가비트 어댑터와 두 개의 Intell(R) PRO/100 어댑터가 있습니다.

•	기가비트 어댑터는 주 어댑터이기 때문에 경로 지정이 불가능한 IPv6 트래픽을 수신합니다.

•	기가비트 어댑터는 가장 빠른 어댑터이기 때문에 IPv4를 수신합니다.

•	Intel PRO/100 어댑터는 수신 로드 균형 조정에 참여하지 않습니다.

수신 로드 균형 조정의 활성화 또는 활성 해제에 대해서는 고급 설정 구성을 참조하십시오.

또한 ALB 팀은 고장 대비 기능을 제공합니다. 주 어댑터가 고장나더라도 팀은 계속 작동하며 나머지 작동 중인 팀 구성원들 간의 트래픽을 조정합니다.

ALB 팀은 다음과 호환됩니다.

어댑터 속도	예를 들면 100 Mbps에서 작동하는 어댑터와 1000 Mbps에 작동하는 어댑터 한 대씩을 함께 사용할 수 있습니다.
프로토콜	IP, IPX (NCP) Microsoft는 Windows* 2000의 IPv6 지원을 기술 검토로 분류합니다. 따라서 Windows 2000의 IPv6 지원은 실제 환경에 적용하기 위한 것이 아닙니다. 운영 체제의 IPv6지원에 대한 자세한 내용은 시스템 문서를 참조하십시오.
네트워크 구성	모든 어댑터는 동일한 스위치에 연결해야 합니다.

Intel(R) PRO/1000 기가비트 서버 어댑터 성능 정보

Intel(R) PRO/1000 어댑터는 이미 높은 대역폭을 지원하기 때문에 일부 서버에서는 ABL 기능을 사용하면 성능이 떨어질 수도 있습니다. 그 이유는 현재 사용 가능한 많은 서버의 CPU 또는 버스의 용량이 팀으로 구성된 기가비트급 어댑터를 효과적으로 처리할 정도로 충분하지 않기 때문입니다. ALB 성능을 최상으로 유지하려면 400 MHz 이상의 속도로 실행되는 다중 PCI 버스 및  다중 Pentium II(R) 프로세서를 지원하는 최신 서버를 사용하십시오. 그러한 서버에서 최대 ALB 성능을 얻으려면 별도의 PCI 버스에 팀으로 구성된 Intel PRO/1000 어댑터를 설치해야 합니다.

참조:

팀 정보

팀 유형

고급 설정 구성


IEEE 802.3ad: 동적

802.3ad는 IEEE 링크 집계 표준입니다. 정적 집계 팀과 마찬가지로, 동적 링크 집계를 사용하는 팀도 다음과 같은 방법으로 처리량을 증가시킵니다.

•	어댑터 구성. 팀에 구성원을 추가하여 처리량을 늘릴 수 있습니다. 팀은 최고 8개의 어댑터로 구성될 수 있습니다. 각 서버는 최고 4개의 팀과 함께 작동할 수 있습니다.

•	트래픽 분석. 소프트웨어는 계속해서 각 팀 구성원에 대한 전송 로드를 분석한 후 필요하면 어댑터 간의 로드 균형을 조정합니다. 스위치 로드는 수신 트래픽의 균형을 조정합니다.

또한 802.3ad 팀은 고장 대비 기능을 제공합니다. 802.3ad 팀에서는 서버가 하나의 IP/MAC 주소를 사용하여 네트워크와 통신합니다. 네트워크 장치 및 클라이언트는 링크 집계 모드에서 팀을 하나의 컴퓨터로 취급합니다. 팀에서 어댑터에 오류가 발생하면 네트워크에서 팀을 성능이 저하된 컴퓨터로 인식합니다.

링크 집계 팀 정보

어댑터 속도	모든 어댑터는 동일한 속도로 작동해야 합니다.
네트워크 구성	• 어댑터에 연결된 스위치가 IEEE 802.3ad 표준을 완벽하게 지원해야 합니다. • 포트 종속성에 대해서는 스위치 설명서를 참조하십시오. 일부 스위치에서는 쌍의 설정이 주 포트에서 시작해야 합니다.  • 속도 및 이중성 설정을 확인하여 어댑터 및 스위치가 전이중에서 실행되고 자동 협상하도록 설정하십시오. 어댑터와 스위치 모두의 속도 및 이중성 구성은 동일해야 합니다.전이중 요구 사항은 IEEE 802.3ad 사양(http://standards.ieee.org/ 참조) 중 일부입니다.  필요하면 어댑터를 스위치에 링크하기 전에 속도 또는 이중성 설정을 변경하십시오. 팀이 만들어진 후에도 속도 및 이중성 설정을 변경할 수는 있지만 가급적 설정이 적용되기 전에 케이블 연결을 분리하는 것이 좋습니다. 네트워크에 활성 링크가 있을 때 설정을 변경하면, 간혹 스위치나 서버가 변경된 속도 또는 이중성 설정을 제대로 인식하지 못할 수도 있습니다. • VLAN을 구성하려면 스위치 설명서의 VLAN 호환 정보를 참조하십시오. 모든 스위치가 동적 802.3ad 팀과 VLAN을 모두 지원하지는 않습니다. VLAN을 설정하려는 경우 어댑터를 스위치에 링크하기 전에 어댑터에 대한 팀 구성 및 VLAN 설정을 구성하십시오. 활성 집계자를 만들고 난 후에 VLAN을 설정하면 VLAN 기능에 영향을 주게 됩니다. • 참고: 일부 스위치의 경우에는 IEEE 802.3ad 구성에서 구리 및 광섬유 어댑터가 동일한 집계자에 속할 수 없습니다. 한 시스템에서 구리 및 광섬유 어댑터가 함께 설치되어 있는 경우 스위치는 한 집계자에서는 구리 어댑터를 구성하고 다른 집계자에서는 광섬유 어댑터를 구성할 수 있습니다. 이러한 경우 최상의 성능을 얻기 위해서는 시스템에 구리 또는 광섬유 기반 어댑터 중 하나만을 사용해야 합니다.
프로토콜	모두

참조:

팀 정보

팀 유형


어댑터 팀 구성 정보
팀 구성 정보

팀은 더 나은 처리량과 고장 대비 기능을 제공하기 위해 구성되는 어댑터 그룹입니다. 팀 구성은 Windows* 2000, Windows NT* 4.0 및 Windows XP와 호환됩니다.

팀 유형이란 무엇입니까?

Intel(R) PROSet II에서 다음과 같은 팀 유형을 구성할 수 있습니다.

•	AFT(어댑터 고장 대비)

•	SFT(스위치 고장 대비)

•	ALB(적응 로드 균형 조정)

•	FEC*%Third_party_disclaimer/LA/802.3ad: 정적

•	GEC*%Third_party_disclaimer/LA/802.3ad: 정적

•	IEEE 802.3ad: 동적

한 팀에 몇 개의 어댑터를 추가할 수 있습니까?

SFT 팀을 제외하고 팀은 2 ~ 8개의 어댑터를 포함할 수 있습니다. SFT 팀은 정확하게 하나의 링크 파트너에 연결된 두 개의 어댑터를 포함해야 합니다.

한 팀에 다른 공급업체의 어댑터를 사용할 수 있습니까?

어떤 팀 구성 모드에 대해서도 여러 종류의 어댑터가 혼합된 복수 공급업체 팀(MVT)을 만들 수 있습니다. 복수 공급업체 팀을 만들려면 팀에 하나 이상의 Intel 서버 어댑터가 있어야 합니다.

MVT 정보:

어댑터 유형	네트워크 구성요소 트리를 검사하여 시스템에서 호환되는 어댑터를 확인하십시오.
어댑터 속도	팀 구성 모드의 요구 사항을 확인하십시오.
참고: 팀 구성원이 VLAN의 일부인 경우 Intel PROSet II는 복수 공급업체 팀 구성을 지원하지 않습니다.

컴퓨터에 팀을 몇 개까지 설정할 수 있습니까?

컴퓨터에 구성되는 팀의 수는 컴퓨터의 하드웨어 및 소프트웨어 구성에 따라 달라집니다.

필요한 사항은 무엇입니까?

컴퓨터에 설치한 어댑터의 유형과 네트워크 구성은 컴퓨터에 설정할 수 있는 팀 유형에 영향을 미칩니다. 팀 요구 사항 및 기능에 대한 개요는 팀 유형 항목 정보를 참조하십시오.

팀을 제거하려면 어떻게 합니까?

팀을 제거하려면 Intel PROSet II 유틸리티를 사용해야 합니다. 운영 체제의 네트워크 패널을 통해 팀을 제거하거나 활성 해제하면 시스템 안정성과 어댑터 구성에 영향을 미칠 수 있습니다.

어댑터 팀 구성 개요를 보려면 Intel(R) 네트워킹 웹 사이트를 방문하십시오.

  지금 웹 사이트 방문

각각의 팀 유형에 대한 정보는 Solving Server Bottleneck 백서를 참조하십시오.

  지금 백서 읽기

참조:

팀 유형


어댑터 세부 정보

어댑터에 대한 세부 정보를 보려면

1.	어댑터에 대한 자세한 내용을 보려면 네트워크 구성요소 트리에서 어댑터를 클릭하십시오.

2.	일반 탭에서 상세를 클릭합니다.

상세 화면이 나타납니다.

참고:  몇몇 어댑터 모델에는 일부 등록 정보가 없을 수도 있습니다.

IP 주소	이 어댑터에 현재 사용 중인 IP 주소입니다. 참고: Intel(R) PROSet II에는 IPv6 주소가 표시되지 않습니다.
버스 속도	어댑터가 사용 중인 PCI 버스의 현재 속도(MHz 단위로 표시)
버스 넓이	어댑터가 사용 중인 PCI 버스의 비트 폭(32 또는64)
컨트롤러	어댑터의 부품 번호 또는 구성요소 모델
미디어 유형	커넥터 유형(광섬유 또는 구리)
영구 이더넷 주소	어댑터의 노드(MAC) 주소는 16진수입니다. MAC 주소는 공급업체에서 어댑터에 할당합니다.
현재 이더넷 주소	이 어댑터는 현재 MAC 주소를 사용합니다.  어댑터가 팀 구성원이거나 로컬 관리 주소가 이 어댑터에 할당된 경우 현재 이더넷 주소는 어댑터의 영구 주소와 다릅니다.
PHY 장치	어댑터 설명
부품 번호	어댑터의 Intel 부품 번호
인터럽트	PCI BIOS 또는 운영 체제에서 어댑터에 할당하는 인터럽트
메모리 주소	PCI BIOS 또는 운영 체제에서 어댑터에 할당하는 메모리 주소
I/O 주소	PCI BIOS에서 어댑터에 할당하는 I/O 주소
버스 슬롯	어댑터의 버스 번호 및 슬롯 ID
시스템 슬롯	시스템 슬롯은 버스 슬롯의 하위 구분입니다. 예를 들어, 버스 슬롯이 두 개로 나뉘어진 경우 버스 슬롯의 각 부분을 식별하는 두 개의 시스템 슬롯이 있습니다.
DHCP 서버 주소	어댑터에 IP 주소를 제공한 서버의 IP 주소입니다.


팀 구성 고급 기능 구성

각 팀 유형마다 다른 고급 설정을 사용할 수 있습니다.

고급 팀 설정을 보거나 변경하려면

1.	네트워크 구성요소 트리에서 팀을 클릭합니다.

2.	고급 탭을 클릭합니다.

3.	팀 구성 중에서 원하는 부분을 변경합니다.

4.	기본값을 복원하려면 기본값 복원을 클릭합니다.

5.	변경 내용을 설정하려면 확인을 클릭합니다.

다음은 기본값과 고급 설정에 대한 설명입니다. 대부분의 경우 기본값을 그대로 사용하는 것이 좋습니다.

확인 시간(초)

소프트웨어가 팀 구성원 상태를 확인하는 주기(초)입니다. 예를 들어, 확인 시간이 1초이면 소프트웨어는 팀 구성원이 트래픽을 전송 및 수신할 수 있는지 매 초마다 확인합니다.

기본값: 1초

범위: 1 - 3초

LinkAggrJoinMethod

이 고급 설정은 링크 집계 팀 구성에 사용할 수 있습니다. IEEE 802.3ad 표준에 기반하여 링크는 집계자라는 몇 개의 링크로 나뉘어질 수 있습니다. 그러나 활성 상태인 집계자는 하나뿐입니다. LinkAggrJoinMethod 매개변수는 시스템이 활성 집계자를 선택하는 방법을 지정합니다. LinkAggrJoinMethod를 최대 대역폭으로 설정하면 시스템은 더 많은 트래픽을 생성하는 집계자를 선택합니다. 매개변수를 최대 어댑터 수로 설정하면 시스템은 더 많은 어댑터를 갖는 집계자를 선택합니다.

기본값: 최대 대역폭

범위: 최대 대역폭, 최대 어댑터 수

로드 밸런스 새로 고침 비율

소프트웨어가 팀 구성원의 현재 로드를 재설정 또는 새로 고침 하기 전에 시간이 걸립니다. 최적의 성능을 내기 위해 이 설정을 기본값 또는 가장 낮은 값으로 유지하십시오.

기본값: 매 10번째 확인 시간 단위

범위: 1-50 확인 시간 단위

확인 시간 설정에 지정된 시간(초)은 새로 고침 비율을 측정하는 단위입니다. 자세한 내용은 확인 시간 설정을 참조하십시오.

로컬 관리 주소(LAA)

Windows NT 로드 균형 조정 서비스(WLBS), NLB 또는 해당 클래스의 다른 드라이버를 사용하면 팀에서 사용하는 MAC 주소를 사용자 정의할 수 있습니다.

MAC 주소를 사용자 정의하려면 LAA  필드의 팀에 대한 새 MAC 주소를 입력합니다. 새 주소는  0000 0000 0001 - FFFF FFFF FFFD 범위에 있도록 설정하십시오.

예외:

•	멀티 캐스트 주소(하이 바이트의 LSB = 1)는 사용하지 마십시오. 예를 들어, 주소 0Y123456789A에서 "Y"는 홀수 여서는 안됩니다. (Y는 반드시 0, 2, 4, 6, 8, A, C 또는 E여야 합니다.)

•	모두 0 또는 모두 F는 사용하지 마십시오.

기본 MAC 주소를 복원하려면 로컬 관리 주소(LAA) 필드에서 주소를 삭제하고 확인을 클릭하거나 기본값 복원을 클릭합니다.

참고: Intel(R) PROSet II는 다음 중 하나를 사용합니다.

•	팀에 구성된 LAA가 있는 경우 팀의 LAA

•	팀에 구성된 LAA가 없는 경우 주 어댑터의 영구 MAC 주소

팀에 구성된 LLA가 있을 경우 주 어댑터의 LAA 설정이 팀의 LAA에 의해 대체됩니다.

STP 및 SFT 팀: 팀의 기본(활성) 어댑터를 변경하려면 새 기본 어댑터의 MAC 주소를 사용하여 팀을 다시 로드합니다. 마찬가지로 팀의 로컬 관리 주소(LAA)를 변경하면 팀이 다시 로드되고 팀에 새 MAC 주소가 할당됩니다. 네트워크에서 서버 활성 중 SFT 팀을 수행하면 이 두 작업으로 인하여 모든 네트워크 장치에서 ARP 테이블을 새 기본 어댑터에 대한 주소 정보를 리프레시할 때까지 팀은 통신을 할 수 없습니다. ARP 테이블을 리프레시하는데 소요되는 시간 분량은 일부 라우터 및 운영 체제에서 사용 가능한 매개변수인 ARP 캐시 타임아웃 기간에서 설정됩니다. ARP 캐시 타임아웃 기간에 따라 팀을 10분동안 사용할 수 없습니다.

NumRxPackets

어댑터가 수신된 패킷을 메모리에 할당할 수 있도록 하는 데이터 세그먼트인 수신 설명자의 수를 정의합니다. 수신된 각 패킷에는 하나의 수신 설명자가 필요하며 각 설명자는 2KB의 메모리를 사용합니다.

수신된 트래픽의 성능이 크게 떨어지면 수신 설명자의 수를 늘릴 수도 있습니다. 수신 성능에 문제가 없으면 기본 설정을 사용합니다.

기본값: 기본값. 기본값을 사용할 경우 Intel PROSet II는 팀 구성 및 하드웨어 성능에 기반하여 이 설정에 가장 적합한 값을 자동으로 계산합니다.

권장: 250

범위: 32 - 512, 단계 16

NumTxPackets

어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 설명자의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 설명자가 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 설명자의 수를 늘릴 수 있습니다. 전송 설명자의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 전송 설명자가 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 기본 설정을 사용합니다.

기본값:  기본값. 기본값을 사용할 경우 Intel PROSet II는 팀 구성 및 하드웨어 성능에 기반하여 이 설정에 가장 적합한 값을 자동으로 계산합니다.

범위: 16 - 512, 단계 16

로드 균형 조정 수신

기본적으로 ALB 팀은 모든 전송 트래픽의 로드를 균형 조정합니다. 또한 이 설정으로 수신 로드 균형 조정을 활성화 또는 활성 해제할 수 있습니다.

수신 로드 균형 조정이 활성 해제되면 주 어댑터는 모든 트래픽을 수신합니다.

수신 로드 균형 조정이 활성화된 경우:

•	주 어댑터가 비 IP 트래픽을 수신합니다.

•	가장 속도가 빠른 활성 어댑터가 IP 트래픽을 수신합니다.

예를 들어, 세 개의 어댑터로 이루어진 팀에는 주 어댑터로 지정되는 하나의 기가비트 어댑터와 두 개의 Intel(R) PRO/100 어댑터가 있습니다.

•	기가비트 어댑터는 주 어댑터이기 때문에 비 IP 트래픽을 수신합니다.

•	기가비트 어댑터는 가장 빠른 어댑터이기 때문에 IP를 수신합니다.

•	Intel(R) PRO/100 어댑터는 수신 로드 균형 조정에 참여하지 않습니다.

기본값: 초기 설정 후에 활성화됨; 팀이 처음에 다른 팀 모드에서 작성한 후 ALB로 변경되면 활성 해제됨

범위: 활성화됨/활성 해제됨

기본값 재설정 단추

이 단추는 현재 선택된 고급 설정을 해당 설정의 기본값으로 재설정합니다.  기본값은 위에 나열된 설정을 참조하십시오.  일부 설정에서는 이 옵션을 사용할 수 없습니다.

참고: Intel PROSet II에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet II를 닫으십시오.  그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


PRO/100 및 PRO/100+ 어댑터 진단
Intel(R) PRO/100, PRO/100+ 및 PRO/100 S 어댑터 진단

참고: 진단이 실행되는 도중 중지를 클릭하면 진단이 중지되기 전 잠깐 지연됩니다. 진단이 중지되면 확인 단추가 사용 가능한 상태로 변경됩니다.

기본 진단

어댑터 진단에서는 하나 이상의 항목을 테스트할 수 있습니다.

참고:  컴퓨터에 Windows 98이 설치되어 있으면, 진단을 실행하기 전에 어댑터 전원 관리자를 먼저 비활성화 하여야할 수도 있습니다. 자세한 정보는,  전원 관리자 과정 비활성화를 참조하십시오.

제어 레지스터

소프트웨어가 8255x 컨트롤러를 구성하고 해당 컨트롤러에 명령을 전송하는 데 사용하는 레지스터를 테스트합니다.

제어 레지스터 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.

Intel 8255x 컨트롤러

8255x 컨트롤러가 제대로 작동하고 있는지 확인하면서 8255x 컨트롤러에 대해 기본 테스트를 실행합니다.

컨트롤러 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.

EEPROM

EEPROM 내용을 읽고 체크섬이 올바른지 확인합니다. 이 때 레지스터를 실제적으로 테스트하는 EEPROM 제어/데이터 레지스터를 사용합니다.

EEPROM 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.

루프백

어댑터의 패킷 송수신 기능을 테스트합니다.

루프백 테스트가 실패하면 어댑터를 교체한 후 테스트를 다시 실행합니다. 어댑터를 교체한 후에도 테스트가 실패할 경우 마더보드나 버스의 다른 장치가 올바르게 작동하지 않는 것일 수 있습니다.

링크

네트워크에서 1000개의 전용 패킷을 내보내고 해당 패킷과 동일한 패킷을 검색하는 방식으로 네트워크 연결과 어댑터의 송수신 기능을 확인하십시오.

링크 테스트가 실패하면 케이블이 어댑터와 링크 파트너에 제대로 연결되어 있는지 확인하십시오. 케이블이 제대로 연결되어 있으면 케이블을 링크 파트너의 다른 포트에 연결하거나 다른 케이블에 연결해 보십시오.


PRO/100+ 어댑터 고급 설정
Intel(R) PRO/100 어댑터 제품군 고급 설정

고급 탭에 나열된 목록은 어댑터가 QoS(서비스 품질) 태그 지정, 오프로드 및 기타 기능을 처리하는 방법을 사용자 정의할 수 있습니다. 고급 기능 중 일부는 실행 중인 운영 체제와 설치된 어댑터에 따라 사용하지 못할 수도 있습니다.

고급 설정

적응 프레임 간의 간격

네트워크에서의 과도한 이더넷 패킷 충돌을 보상합니다. 기본적으로 이 설정은 0(기능을 활성 해제함)으로 설정됩니다.

권장 값(1)은 동적으로 네트워크 트래픽 조건에 맞도록 설정하므로 대부분의 컴퓨터와 네트워크에 적합합니다. 값이 1로 설정된 경우에만 동적 모드가 활성화됩니다. 그러나 드물게 간격 값을 수동으로 설정하여 성능을 향상시킬 수도 있습니다. 값을 설정하면 패킷들 사이에서 안정적인 간격으로 강제로 지정됩니다.

값을 증가시켜 전송되는 프레임 간의 지연 시간을 늘립니다.

지원되는 어댑터	모두
기본값	0: 활성 해제됨
범위	0-255
적응 링크 응답

어댑터에서 케이블이 분리되면 네트워크 연결에 필요한 시작 루틴을 생략하여 시스템 시작 속도를 높입니다. 이 기능은 컴퓨터를 시작하는 데 필요한 시간을 크게 줄여줍니다.

Intel 이더넷 컨트롤러의 적용 링크 응답이 활성화되고 네트워크 케이블이 RJ-45 포트에 연결되어 있지 않으면 네트워크 연결이 활성 해제됩니다. 장치 관리자의 네트워크 연결 다음에 노란색 주의 아이콘이 나타납니다.

네트워크 연결을 다시 활성화하려면 네트워크 케이블을 RJ-45 포트에 연결한 다음 컴퓨터를 다시 시작합니다.

지원되는 어댑터	모바일(cardbus) 제품에만 사용됩니다. 일부 어댑터 모델에서는 사용할 수 없습니다.
기본값	오프
권장	온
범위	온, 오프
참고: 적응 링크 응답(ALR, Adaptive Link Response)은 무선 어댑터가 시스템에서 활성화되었을 때에는 작동하지 않습니다.

적응 성능 조정

인터럽트를 트리거하기 전에 어댑터가 수신하는 프레임의 수를 설정합니다. 정상적으로 작동되는 경우 어댑터는 프레임을 수신할 때마다 인터럽트를 생성합니다. 인터럽트 수를 줄이면 CPU 사용률이 향상됩니다.

최대 어댑터 대역폭으로 슬라이더를 이동하면 프레임 당 하나의 인터럽트가 생성됩니다. 이 경우 어댑터 대역폭은 증가하지만 CPU 사용률이 높아져 컴퓨터 성능이 저하될 수 있습니다. 최대 CPU 사용률로 슬라이더를 이동하면 인터럽트를 생성하기 전에 어댑터가 수신하는 프레임의 수가 증가합니다. 그러면 CPU 사용률은 향상되지만 어댑터 대역폭은 감소하게 됩니다. 기본 설정은 대부분의 컴퓨터에서 올바르게 작동합니다.

지원되는 어댑터	모두
적용 기술

어댑터 드라이버에서 마이크로 코드를 활성화 또는 활성 해제합니다. 마이크로 코드는 운영 체제 환경을 기반으로 성능을 최적화합니다.

최고의 성능을 얻으려면 적응 기술을 활성 상태로 유지합니다.

어댑터의 호환성 문제를 해결할 때 적응 기술을 활성 해제할 수 있습니다.적응 기술을 활성 해제하면 전송 제어 블록 및 적응 성능 조정도 활성 해제됩니다.

지원되는 어댑터	모두
기본값	온
범위	온, 오프
적응 전송 임계값

전송 전에 어댑터가 해당 전송 버퍼에 저장하는 바이트 수를 지정합니다. 예를 들어, 데이터 전송 전에 적응 전송 임계값이 100이면 어댑터는 버퍼에 100바이트(800비트)를 저장합니다.

•	적응 전송 임계값을 높이면 전송 성능은 낮아지지만, 언더런이 줄어들 수 있습니다.

•	적응 전송 임계값을 낮추면 전송 성능은 높아지지만, 언더런이 많아질 수 있습니다. 이 값을 낮추면 어댑터가 빠른 전송을 수행할 수 있습니다.

어댑터는 시작할 때만 적응 전송 임계값을 사용합니다. 낮은 값으로 더 나은 전송 성능을 얻을 수 있다면 어댑터가 자동으로 낮은 값을 사용할 것입니다.

전체 이더넷 프레임을 처음으로 전송하도록 어댑터를 구성한 후 최고 성능에 맞게 조정하려면 이 값을 190으로 설정합니다. 전송 성능 값이 190으로 크게 떨어지면 임계값을 16으로 설정한 후 성능을 점차 늘리십시오.

지원되는 어댑터	모두
기본값	200
권장	• 컴퓨터에 여러 개의 버스 마스터링 카드가 있거나 대기 시간이 길 경우 이 값을 200으로 설정합니다. • 컴퓨터에 하나의 버스 마스터링이 있을 경우 이 값을 12로 설정합니다
범위	0-200
리소스가 없는 경우의 기본적인 연결성

시스템 리소스가 IPSec 오프로드 및 대형 전송 오프로드와 같은 모든 고급 설정을 실행할 만큼 충분치 않은 경우에도 네트워크 연결을 유지하십시오. 컴퓨터를 다시 시작해야 고급 기능이 적용됩니다.

리소스 문제를 확인하려면 시스템 로그를 확인합니다. 시스템 로그에는 시스템 리소스가 부족해서 생기는 오류가 표시됩니다.

지원되는 어댑터	모두
기본값	활성화됨
권장 값	활성화됨
범위	활성화됨, 활성 해제됨
가속 시 가용 버퍼 수

가속 시 가용 버퍼 수를 사용자가 정의하는 방식으로 전송 성능을 최적화하여, 패킷 전송 전에 어댑터가 데이터 세그먼트를 추가할 수 있도록 합니다.

가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 구성해야 합니다. 가속 시 가용 버퍼 수 설정은 전송 설명자의 30 - 50% 이어야 합니다. 가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 수정하지 않으면 전송 성능이 향상되지 않을 수도 있습니다.

가속 시 가용 버퍼 수 설정을 이용하면 Windows NT 4.0 컴퓨터에서의 전송 성능이 크게 증가합니다. 또한 Windows 98 및 2000 컴퓨터에서도 전송 성능이 향상됩니다.

지원되는 어댑터	모두
기본값	8
권장 값	8
범위	1-32
PME 활성화

이전 고급 전원 관리(APM) 버전이 있는 컴퓨터에서 어댑터의 깨우기 기능을 활성화하거나 활성 해제합니다. 깨우기 기능을 사용하면 어댑터가 ARP 패킷과 같은 특정 패킷 유형을 수신할 경우 대기 모드 또는 전원 꺼짐 상태에서 빠져 나올 수 있습니다.

•	이 기능을 활성 해제하면 이전 전원 관리 버전을 사용하는 컴퓨터에서 모든 깨우기 기능이 활성 해제됩니다.

•	이 기능을 활성화하면 어댑터가 깨우기 신호에 반응할 수 있습니다. 어댑터가 특정 패킷 유형에 반응하도록 구성하려면 이 도움말 항목 뒷부분에 있는 설정 시 깨우기 정보를 참조하십시오.

•	하드웨어 기본값 값은 어댑터가 시스템 하드웨어를 기준으로 깨우기 기능을 구성하도록 합니다.

•	동작 없음 값은 어댑터가 운영 체제 기본값을 사용하도록 합니다.

설정 시 깨우기를 모두 활성 해제하려면 이 기능을 해제합니다. 그렇지 않은 경우 이 기능을 동작 없음으로 설정하십시오.

지원되는 어댑터	82559 기반 어댑터. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
흐름 제어

어댑터가 보다 효율적으로 트래픽을 조절할 수 있습니다.

•	수신 대기열이 미리 정의된 제한에 도달하면 어댑터가 흐름 제어 프레임을 생성합니다. 흐름 제어 프레임을 생성하면 전송자로 신호를 보내 전송 속도를 늦춥니다.

•	어댑터는 흐름 제어 프레임에 지정된 시간 동안 패킷 전송을 중지시켜 흐름 제어 프레임에 응답합니다.

어댑터가 패킷 전송 속도를 조정할 수 있도록 하여 흐름 제어가 패킷의 끊기는 현상을 막도록 도와줍니다.

참고: 이 기능에서 어댑터를 사용하려면 링크 파트너에서 플로우 제어 프레임을 지원해야 합니다.

지원되는 어댑터	모두
기본값	흐름 제어 프레임 생성 및 흐름 제어 프레임에 응답
범위	• 오프 • 흐름 제어 프레임을 생성합니다.  • 흐름 제어 프레임에 응답합니다.  • 흐름 제어 프레임을 생성하고 그에 응답합니다.
링크 기반 로그인

적응 링크 응답(ALR) 기능을 활성화합니다. 이 기능은 LinkBasedLoad 매개변수 값을 기준으로 PhyLink 상태를 검사하고 성공 또는 실패 값을 반환합니다.

지원되는 어댑터	모두
기본값	활성 해제됨 (0)
범위	활성화됨, 활성 해제됨
링크 속도 및 이중성

어댑터의 통신 설정을 구성합니다.

구성된 설정에서 작동하도록 하려면 링크 파트너 역시 구성된 설정에서 작동할 수 있어야 합니다. 예를 들어, 어댑터가 100 Mbps/전이중을 사용하도록 구성된 경우 링크 파트너도 100 Mbps/전이중에서 작동할 수 있어야 합니다. 마찬가지로, 어댑터가 자동 검색을 사용하도록 구성된 경우 링크 파트너도 자동 협상을 지원해야 합니다.

지원되는 어댑터	모든 Intel(R) PRO/100 어댑터
기본값	자동 검색
권장 값	자동 검색
범위	? 자동 검색 - 어댑터는 해당 링크 파트너와 협상 호환되는 속도 및 이중성 설정을 식별합니다. ? 10 Mbps/반이중 - 이 어댑터는 10Mbps 속도로 연결되며 전송 작업과 수신 작업을 별도로 완료합니다. 어댑터가 패킷을 수신하는 중에는 패킷을 전송할 수 없습니다. 패킷을 전송하는 중에는 패킷을 수신할 수 없습니다. ? 10 Mbps/전이중 - 이 어댑터는 10Mbps 속도로 연결되며 전송 작업과 수신 작업을 동시에 완료합니다. 그러면 어댑터의 성능이 향상됩니다. 전이중 스위치를 사용하고 있는 경우에만 이 모드를 선택하십시오. ? 100 Mbps/반이중 - 이 어댑터는 100Mbps 속도로 연결되며 전송 작업과 수신 작업을 별도로 완료합니다. 어댑터가 패킷을 수신하는 중에는 패킷을 전송할 수 없습니다. 패킷을 전송하는 중에는 패킷을 수신할 수 없습니다. ? 100 Mbps/전이중 - 이 어댑터는 100Mbps 속도로 연결되며 전송 작업과 수신 작업을 동시에 완료합니다. 그러면 어댑터의 성능이 향상됩니다. 전이중 스위치를 사용하고 있는 경우에만 이 모드를 선택하십시오.
로컬 관리 주소(LAA)

어댑터의 MAC 주소를 무시합니다. 새로운 네트워크 주소를 입력하려면 값 상자에 12자리 16진수를 입력합니다.

지원되는 어댑터	모두
기본값	없음
범위	0000 0000 0001 - FFFF FFFF FFFD 예외: • 멀티캐스트 주소(하이 바이트 중 가장 중요도가 적은 비트 = 1)는 사용하지 마십시오.  • 모두 0 또는 모두 F는 사용하지 마십시오.
참고: Intel(R) PROSet II는 팀에서 다음을 사용합니다.

•	팀에 구성된 LAA가 있는 경우 팀의 LAA

•	팀에 구성된 LAA가 없는 경우 주 어댑터의 영구 MAC 주소

Intel PROSet II에서는 팀의 어댑터가 주 어댑터이고 팀에 LAA가 없는 경우 어댑터의 LAA를 사용하지 않습니다.

Windows 98SE 사용자:

수동으로 할당된 주소를 사용한 후 기본 주소를 사용하려면 다음 절차 중 하나를 수행하십시오.

•	네트워크 속성 대화 상자의 고급 탭에서 로컬 관리 주소(LAA)를 선택하고 값을 0으로 변경합니다. 확인을 클릭하여 설정을 적용합니다.

•	Intel PROSet II에서 고급 탭을 클릭한 다음 기본값 복원을 클릭하거나 값 필드에서 모든 문자를 지웁니다. 확인을 클릭하여 설정을 적용합니다.

오프로딩

사용 중인 어댑터 유형에 맞게 설정한 경우 CPU 주기를 저장합니다.

•	Intel(R) PRO/100 S 어댑터에서 보안 오프로딩을 사용하는 경우 IP 보안 설정을 사용합니다.

•	Intel PRO/100 S 어댑터에서 보안 오프로딩을 사용하지 않는 경우 체크섬 설정을 사용합니다.

•	다른 어댑터 유형에 대해서는 없음 설정을 사용합니다.

지원되는 어댑터	모두
지원되는 운영 체제	Windows* 98SE, Windows Me, Windows NT*, Windows 2000, and Windows XP
기본값	Intel PRO/100 S: IP 보안 보안 없는 Intel PRO/100 S: 체크섬
범위	없음, IP 보안, 체크섬(어댑터 유형에 따라 다름. 일부 옵션은 사용하지 못할 수도 있습니다.)
IP 보안에 대한 정보는 IPSec 활성화 항목을 참조하십시오.

PCI 버스 효율성

어댑터에서 가장 적합한 패킷 전송 방법을 사용하거나 항상 패킷을 병합하도록 할 수 있습니다.

•	PCI 버스 효율성 기능이 활성 해제되면 어댑터는 가능한 최고 성능을 제공하는 전송 방법을 사용합니다. 병합 패킷이 최고의 전송 성능을 제공할 경우 어댑터는 자동으로 패킷을 병합합니다.

•	PCI 버스 효율성 기능이 활성화되면 어댑터에서 강제로 패킷을 병합합니다.

패킷 전송 성능에 문제가 없으면 PCI 버스 효율성 기능을 활성 해제됨으로 설정합니다. 언더런의 수가 많거나 PCI 버스에 성능 문제가 있을 경우 이 값을 활성화됨으로 설정합니다.

지원되는 어댑터	모두
기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
우선순위 단계 정의

QoS 태그 지정된 패킷의 우선순위 레벨 경계 지점을 구성합니다.

컴퓨터에서 802.1p/802.1Q 태그 지정(QoS)이 활성화되어 있으면 우선순위 대기열에서 제공하는 우선순위 레벨(0-7)을 정의할 수 있습니다. Intel 어댑터에는 높음 및 낮음의 두 가지 우선순위 대기열이 있습니다. 기본적으로 0-3의 값을 갖는 패킷은 낮은 우선순위 대기열을 통해 전송되고 4-7의 값을 갖는 패킷은 높은 우선순위 대기열을 통해 전송됩니다.

우선순위 단계 정의에 대해 입력한 번호는 고 및 저 우선순위 대기열 사이에서 컷 오프 지점입니다. 예를 들어, 6을 입력한 경우 우선순위가 0-5인 패킷은 낮은 우선순위를 통해 전송되고 우선순위가 6-7인 패킷은 높은 우선순위 대기열을 통해 전송됩니다.

지원되는 어댑터	모두
기본값	4 • 0-3의 값을 갖는 패킷은 낮은 우선순위 대기열로 전송됩니다.  • 4-7의 값을 갖는 패킷은 높은 우선순위 대기열로 전송됩니다.
범위	0-7

QoS (802.3ac) 패킷 태그 지정

Windows* 2000, XP 또는 우선순위 패킷을 통해 설정한 우선순위 필터에 대해 IEEE 802.1p/802.1Q 태그 지정을 활성화 또는 활성 해제합니다. 우선순위 패킷 필터가 제대로 작동하려면 이 옵션을 활성화됨으로 설정해야 합니다.

802.1p/Q 태그 지정을 사용하여 필터를 할당했지만 이 설정이 활성 해제됨인 경우 해당 패킷은 Intel의 높은 우선순위 대기열(HPQ)을 사용하여 우선순위가 설정됩니다.

지원되는 어댑터	82550, 82558 및 82559-기반 제품. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
수신 버퍼

메모리로 데이터를 복사할 때 드라이버에 사용되는 버퍼의 수를 지정합니다.

네트워크 로드가 큰 경우 수신 버퍼를 늘리면 성능을 향상시킬 수 있습니다. 이 경우 드라이버에 사용되는 시스템 메모리의 양을 늘려야 하는 단점이 있습니다. 그 밖의 경우 이 값을 수정하면 시스템 성능이 떨어질 수 있습니다.

지원되는 어댑터	모두
기본값	기본값은 선택된 기능에 따라 다릅니다.
권장 값	• Windows NT에 있는 하나의 어댑터: 32 • Windows 98, Windows Me, Windows 2000 및 Windows XP의 단일 어댑터: 48 • 팀 구성된 어댑터: 250 • IPSec 및/또는 다중 기능 사용: 350
범위	8-1024
프레임 간의 재전송 간격

프레임 재전송 사이의 지연 시간을 늘립니다. 충돌 후 어댑터가 프레임을 재전송하는 데 사용하는 내장 이더넷 알고리즘이 있더라도 네트워크에 비정상적으로 많은 수의 충돌이 있는 경우 지연 시간을 늘려 네트워크 성능을 향상시킬 수 있습니다.

지원되는 어댑터	선택된 어댑터가 이 기능을 지원합니다.
기본값	6
범위	6-15
보안 연관

어댑터의 보조 프로세서를 오프로드할 수 있는 동시 보안 연관의 수를 지정합니다. 보안 연관은 Intel(R) 패킷 보호 또는 다른 IP 보안 소프트웨어를 실행하는 다른 컴퓨터를 갖는 통신 세션입니다.

컴퓨터가 기본값으로 지정된 수보다 더 많은 보안 연관을 지원할 수 있으면 이 값을 늘리십시오. 보안 연관의 수를 늘리면 어댑터의 메모리 소비량이 증가한다는 점에 유의하십시오.

지원되는 어댑터	Intel(R) PRO/100 S
기본값	클라이언트: 64 서버: 1000
범위	1-5000
스마트 전원 차단

LAN 케이블이 어댑터에서 분리될 때 어댑터가 전원 소모량을 줄이도록 합니다. 어댑터가 다시 연결되면 어댑터 전원 사용이 정상 상태(전체 전원 사용)로 돌아옵니다.

지원되는 어댑터	82559 기반 모바일 어댑터 이상
기본값	활성화됨
권장 값	활성화됨
범위	활성화됨, 활성 해제됨
기술 정보

전송 제어 블록

어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 제어 블록의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 제어 블록이 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 제어 블록의 수를 늘릴 수 있습니다. 전송 제어 블록의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 제어 블록이 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 기본 설정 16을 사용합니다.

지원되는 어댑터	모두
기본값	16 또는 32(어댑터에 따라 다름)
범위	8-64
링크 변경 시 깨우기

컴퓨터가 대기 모드에 있는 동안 네트워크가 연결되면 컴퓨터를 깨웁니다. 기능을 활성화 또는 비활성하거나 운영 체제가 기본 값을 사용하도록 지정할 수 있습니다.

지원되는 운영 체제	Windows 9x, Windows 2000, Windows XP
범위	활성 해제됨, 강제 적용, OS 종속
기본값	활성 해제됨
설정 시 깨우기

이 설정에 대해 운영 체제 또는 Intel(R) PROSet II에서 활성화되는 기능을 참조하십시오. 사용 중인 Windows 버전에 따라 기능이 다르게 수행되거나 전혀 지원되지 않습니다.

•	다음 Windows 버전에서 설정 시 깨우기를 지원합니다. Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	다음 Windows 버전에서 설정 시 깨우기를 지원하지 않습니다. Windows 98 retail 및 Windows NT 4.0.

참고: Intel(R) PRO/100+ 관리, 서버 어댑터 및 Intel(R) PRO/100 S 어댑터에서만 설정 시 깨우기를 지원합니다.

운영 체제에서 설정 시 깨우기 활성화

다음 유형의 깨우기 패킷을 사용하려면 운영 체제에서 설정 시 깨우기 기능이 활성화되어 있어야 합니다.

•	ARP 시 깨우기

•	유도 패킷 발생 시 깨우기

•	NBT 쿼리 시 깨우기

어댑터에서 이러한 유형의 깨우기 패킷에 응답하려면 설정 시 깨우기를 사용할 수 있도록 운영 체제를 활성화해야 합니다. 설정 시 깨우기를 활성화하려면 장치 관리자에서 검색하여 이 장치가 절전 모드 상태의 컴퓨터를 해제시킬 수 있음 옵션을 활성화합니다. 이 옵션을 찾으려면 다음을 수행하십시오.

1.	시작 > 제어판을 클릭합니다.
제어판 창이 열립니다.

2.	시스템을 두 번 클릭합니다.
시스템 대화 상자가 나타납니다.

3.	하드웨어 탭을 클릭한 다음 장치 관리자 단추를 클릭합니다
장치 관리자 창이 열립니다.

4.	설정 시 깨우기를 사용할 어댑터를 두 번 클릭합니다.
속성 대화 상자가 나타납니다.

5.	전원 관리 탭을 클릭합니다.

6.	이 장치가 절전 모드 상태의 컴퓨터를 해제시킬 수 있음을 클릭하여 어댑터에 대해 설정 시 깨우기를 활성화합니다.

To Configure Wake on Settings

1.	In Intel PROSet II, click the Advanced tab.

2.	In the Setting list, select  Wake on Settings.

3.	In the Value list, select the appropriate Wake On setting.

4.	Click OK or Apply.

사용 가능한 설정

다음 설정 시 깨우기 옵션을 Intel PROSet II에서 사용할 수 있습니다.

설정	설명
Disabled	어댑터가 설정 시 깨우기 옵션을 사용하지 않습니다.
매직 패킷 발생 시 깨우기	어댑터가 매직 패킷을 수신할 때 깨어나도록 합니다. 매직 패킷은 수신 어댑터의  이더넷 주소와 인접한 16개 복사본을 포함하는 패킷입니다. 이 기능을 구성하면 Intel PROSet II에서 이 기능에 대한 운영 체제 값을 무시합니다.
유도 패킷 발생 시 깨우기	어댑터가 유도 패킷을 수신하면 깨어나도록 합니다. 이 패킷은 어댑터의 MAC 주소로 전송되는 유니캐스트 패킷입니다.  반드시 프로토콜이 이 드라이버의 깨우기 방법을 활성화하여야 합니다. 이 기능을 선택하지 않으면 드라이버가 이 깨우기 방법을 활성화하려는 프로토콜의 요청을 무시하게 됩니다.
매직 및 유도 패킷 발생 시 깨우기	어댑터가 매직 패킷이나 유도 패킷을 수신할 때 깨어나도록 할 수 있습니다.
OS 제어 방식	운영 체제가 설정 시 깨우기 기능을 완벽하게 제어합니다.

참고: 여러 개의 IP 주소를 한 개의 어댑터용으로 구성할 경우 운영 체제는 구성된 모든 주소에 ARP 패턴 깨우기를 요청할 수도 있습니다. 어댑터는 목록의 첫번째 IP 주소를 쿼리하는 ARP 패킷에 대한 응답으로만 깨울 수 있습니다.

참고: 설정 시 깨우기에는 시스템을 종료(S5) 상태에서 깨우는 기능은 포함되지 않습니다. 이 상태는 PME 사용 설정으로 제어합니다. PME 사용 설정은 고급 탭에도 있습니다. 설정 시 깨우기가 비활성화되어 있는 경우 S5에서 깨어나는 기능은 PME 사용 설정으로 결정됩니다.

어댑터 드라이버가 활성화되어 있는 동안은 PME 설정이 적용됩니다. 그러나 드라이버가 비활성화되면 장치가 해당 설정을 하드웨어 기본값으로 되돌립니다. 이 기본값에 따라 종료 상태에서 컴퓨터를 깨울 수 있는지 여부가 결정됩니다.

참조

팀 구성 고급 설정


우선순위 패킷 개요
Intel(R) 우선순위 패킷 개요

Intel(R) 우선순위 패킷은 우선순위가 높은 트래픽을 일반적인 트래픽보다 먼저 처리하도록 필터를 설정할 수 있는 트래픽 우선순위 지정 유틸리티입니다. Intel 우선순위 패킷을 사용하여 중요한 응용 프로그램에 우선순위를 지정하는 필터를 설정할 수 있습니다.

Intel 우선순위 패킷은 Intel(R) PROSet II의 별도 유틸리티입니다.

요구 사항

지원되는 운영 체제	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 이상
지원되는 어댑터	Intel(R) PRO/100 및 PRO/1000 어댑터 제품군
Intel 우선순위 패킷을 설치하려면

1.	컴퓨터의 CD-ROM 드라이브에 어댑터 CD를 넣습니다.
자동 실행 화면이 나타납니다.

2.	자동 실행 화면을 닫습니다.

3.	Intel CD의 WINDOWS/PRTPKT 폴더로 이동합니다.

4.	setup.exe를 두 번 클릭하여 Intel 우선순위 패킷을 설치합니다.

5.	화면의 지시를 따라 우선순위 패킷 설치를 완료합니다.

설치 후에는 시작 > 프로그램 > Intel(R) 우선순위 패킷 II를 클릭하여 유틸리티를 열 수 있습니다.

네트워크 트래픽 우선순위 지정

Intel 우선순위 패킷을 사용하면 중요한 노드나 응용 프로그램의 정보를 우선순위가 표시된 상태로 전송하도록 필터를 설정할 수 있습니다. 호스트 또는 네트워크의 진입점에서 트래픽에 우선순위를 지정하면 네트워크 장치는 패킷에 정의된 우선순위 정보를 기준으로 전달할지 여부를 결정할 수 있습니다.

Intel 우선순위 패킷은 보내는(전송) 패킷에 적용되도록 지정한 매개변수인 필터를 기준으로 트래픽의 우선순위를 지정합니다. 우선순위 패킷 필터 마법사를 사용하면 노드(MAC) 주소, 이더넷 유형 또는 프로토콜과 포트의 여러 속성에 따라 미리 정의된 필터나 사용자 정의 필터를 설정할 수 있습니다. 우선순위 패킷은 트래픽의 우선순위를 지정하는 방법으로  IEEE 802.1p 태그 지정과 Intel 높은 우선순위 대기열의 두 가지를 제공합니다.

IEEE 802.1p 태그 지정

IEEE 802.1p는 우선순위 레벨을 정의하기 위해 패킷에 태그를 지정하는 IEEE 표준입니다. 패킷에는 패킷 크기를 늘리고 우선순위 레벨을 표시하는 4개의 추가 바이트로 태그가 지정됩니다. 네트워크에서 이러한 패킷이 전송될 경우 우선순위가 높은 패킷이 먼저 전송됩니다. 우선순위 패킷 태그 지정(트래픽 클래스 우선 전송이라고도 함)을 사용하면 어댑터가 네트워크의 다른 요소(스위치, 라우터)와 함께 작동하여 우선순위가 높은 패킷을 먼저 전달할 수 있습니다. 802.1p 태그 지정을 사용하면 응용 프로그램이 특정 우선순위 레벨을 0(낮음)부터 7(높음)까지 지정할 수 있습니다.

Windows* 2000, XP 또는 Intel 우선순위 패킷에 필터를 설정했으면 Intel PROSet II를 실행하고 고급 설정 탭에서 QoS 태그 지정을 활성화해야 합니다.

참고: IEEE 802.1p 태그 지정은 태그가 지정된 패킷의 크기를 늘립니다. 일부 허브와 스위치는 늘어난 패킷을 인식하지 못하며 해당 패킷을 삭제합니다. 허브 또는 스위치 문서에서 802.1p의 지원 여부를 확인하십시오. 이러한 장치가 802.1p를 지원하지 않거나 지원 여부를 잘 모르면 높은 우선순위 대기열을 사용하여 네트워크 트래픽의 우선순위를 지정하십시오.

IEEE 802.1p 태그 지정의 효율적인 사용을 위한 요구사항:

•	802.1p 태그 지정 패킷을 수신 및 라우팅하는 모든 컴퓨터는 802.1p를 지원해야 합니다.

•	태그 지정 패킷을 처리하는 컴퓨터에 설치된 어댑터는 802.1p 태그 지정을 지원해야 합니다. 모든 Intel(R) PRO/1000, PRO/100+ 및 PRO/100 S 어댑터는 802.1p를 지원합니다. Intel(R) PRO/100B 어댑터는 VLAN을 지원하지 않습니다.

•	어댑터를 어댑터 팀에 할당할 수 없습니다.

•	VLAN 또는 패킷 태그를 동일한 어댑터에서 설정할 경우 Intel PROSet II 고급 설정 탭에서 802.1p/802.1Q 태그 지정을 활성화해야 합니다.

•	VLAN(802.1Q) 및 우선순위 지정(802.1p)은 802.3ac 태그를 공유합니다. Intel 어댑터는 어댑터에 VLAN 및/또는 QoS 태그 지정이 구성되어 있을 때 802.3ac 태그를 사용합니다.

•	어댑터가 VLAN용으로 구성된 경우 스위치 VLAN은 어댑터와 동일한 유형의 태그 지정(802.3ac)을 지원해야 합니다.

•	어댑터가 우선순위 지정용으로 구성된 경우 일부 스위치에는 태그 전달을 활성화할 수 있는 비기본 VLAN이 필요합니다.


필터

IEEE 802.1p로 태그 지정해야 할지 높은 우선순위 대기열에 넣어야 할지 결정할 수 있도록 나가는(전송) 패킷에 적용되는 매개변수입니다.


IEEE 802.1p 사양

우선순위 레벨이 서로 다른 패킷을 태그 지정하는 IEEE 표준입니다. 네트워크에서 이러한 패킷이 전송될 경우 우선순위가 높은 패킷이 먼저 전송됩니다. 우선순위 패킷 태그 지정을 사용하면 어댑터가 다른 네트워크 장치와 함께 작동하여 전체 성능을 향상시킬 수 있습니다.

IEEE 802.1p 태그 지정은 스위치 및 다른 라우팅 장치를 포함한 네트워크 인프라에서 지원하는 경우에만 적용됩니다. 사용 중인 인프라가 IEEE 802.1p 태그 지정을 지원하지 않거나 지원 여부가 확실하지 않으면 Intel의 높은 우선순위 대기열을 사용하여 트래픽 우선순위를 지정할 수 있습니다


고 우선순위 대기열

Intel(R) 우선순위 패킷과 함게 사용되는 전송 대기열입니다. 높은 우선순위 대기열(HPQ)은 높은 우선순위 패킷을 처리합니다.

HPQ는 82558 이상의 컨트롤러를 갖는 Intel(R) PRO/100 어댑터에서 사용할 수 있습니다. 컨트롤러에 대한 정보는 어댑터 사양 테이블을 참조하십시오.

HPQ에 대한 자세한 내용은 Intel 우선순위 패킷 온라인 도움말을 참조하십시오.


태그 지정

패킷에 정보를 추가합니다. IEEE 802.1p 태그 지정을 사용하는 우선순위 패킷의 경우, 패킷의 우선순위 정보를 나타내는 4개의 바이트를 추가하는 것을 의미합니다.


검색된 Cardbus

단일 어댑터 설치

하나의 Cardbus 어댑터를 설치하려는 경우 설치할 모델을 클릭합니다.

참고: Intel(R) PRO/100 Cardbus II 어댑터(LAN 전용)가 설치되어 있고 Intel(R) PRO/100 LAN+Modem56 Cardbus II 어댑터를 설치하려는 경우 다음을 수행해야 합니다.

1.	LAN 전용 어댑터 드라이버를 제거합니다.

2.	컴퓨터를 다시 시작합니다.

3.	LAN+Modem56 어댑터용 드라이버를 다시 설치합니다.

두 개의 어댑터 설치

두 개의 Cardbus 어댑터를 설치하려는 경우 둘 중 하나 또는 둘 모두가 Intel PRO/100 LAN+Modem56 Cardbus II 어댑터이면 Intel(R) PRO/100 LAN+Modem56 Cardbus II를 클릭합니다.

두 어댑터 모두가 Intel PRO/100 Cardbus II 어댑터(LAN 전용)이면 Intel(R) PRO/100 Cardbus II를 클릭합니다.

PCI 어댑터

PCI 어댑터(예: 도킹 스테이션)를 설치하려는 경우 Intel(R) PRO PCI 어댑터를 클릭합니다.


CardBus 리소스
Cardbus 리소스 정의

네트워크 어댑터 및 모뎀에 대해 사용할 수 있는 리소스 집합을 선택합니다.

선택한 리소스가 컴퓨터와 호환되는지 확인하려면

제어판에서 Intel PROSet II 아이콘을 두 번 클릭하여 Intel(R) PROSet II를 시작합니다.
Intel PROSet II가 나타납니다.

•	리소스가 충돌하지 않으면 일반 탭에 어댑터 상태 정보가 표시됩니다.

•	리소스가 다른 장치와 충돌이 발생하면 Intel PROSet II는 지침을 제공하는 문제 해결 탭을 표시합니다. 이 지침을 따라 다른 리소스를 선택하십시오.


점보 프레임

점보 프레임은 표준 이더넷 프레임보다 크기가 큽니다. 즉, 표준 이더넷 프레임 크기는 1.5 KB 이하이고 점보 프레임 크기는 16KB 이하입니다.

대부분의 트래픽 크기가 크고 추가 지연 시간이 허용되는 경우 점보 프레임은 CPU 사용률을 줄이고 와이어 효율성을 향상시킬 수 있습니다.

참고: 점보 프레임은 TCP/IP 패킷에만 적용됩니다.

시작하기 전에

다음을 확인하십시오.

•	Intel(R) PRO/1000 어댑터가 설치되어 있는지 여부. Intel(R) PRO/100 어댑터는 점보 프레임을 지원하지 않습니다.

•	시스템에서 Windows* 2000, XP 또는 NT* 4.0을 실행하는지 여부

•	네트워크 장치가 점보 프레임을 지원하는지 여부. 다른 네트워크 장치에서 점포 프레임을 설정하면 네트워크 장치가 점보 프레임 크기를 다르게 계산합니다. 일부 장치는 다른 장치와 달리 프레임 크기에 헤더 정보를 포함합니다.

점보 프레임 설정

•	일반적으로 사용할 수 있는 패킷 크기를 구성하려면 Intel(R) PROSet II를 사용합니다.

•	다른 패킷 크기를 구성하려면 레지스트리에 값을 입력합니다.

Intel(R) PROSet II에서 점보 프레임을 구성하려면

네트워크에서의 점보 프레임 설정은 세 단계로 이루어집니다.

단계 1: 점보 프레임을 지원하도록 어댑터 구성:

1.	Intel(R) PROSet II를 엽니다.

2.	네트워크 구성요소 트리에서 점보 프레임을 구성할 어댑터를 클릭합니다.

3.	고급 탭을 클릭합니다.

4.	설정 목록에서 점보 프레임을 클릭합니다.

5.	값 상자에서 패킷 크기를 클릭합니다.

지금 점보 프레임을 지원하도록 어댑터를 구성합니다.

단계 2: 점보 프레임을 지원하도록 네트워크 스위치를 구성합니다. 자세한 내용은 전환 문서를 참조하십시오.

단계 3: 점보 프레임을 지원하도록 서버를 구성합니다. 자세한 내용은 서버 문서를 참조하십시오.

레지스트리를 사용하여 점보 프레임을 구성하려면

네트워크에서의 점보 프레임 설정은 세 단계로 이루어집니다.

단계 1: 점보 프레임을 지원하도록 어댑터 구성:

1.	레지스트리 편집기를 엽니다. 시작 > 실행을 클릭합니다. 열기 상자에 regedit를 입력합니다.
레지스트리 편집기가 열립니다.

2.	MaxFrameSize 레지스트리 키로 이동합니다.

3.	프레임 크기로 1415에서 16128까지의 값을 입력합니다.

지금 점보 프레임을 지원하도록 어댑터를 구성합니다.

단계 2: 점보 프레임을 지원하도록 네트워크 스위치를 구성합니다. 자세한 내용은 전환 문서를 참조하십시오.

단계 3: 점보 프레임을 지원하도록 서버를 구성합니다. 자세한 내용은 서버 문서를 참조하십시오.


MiniPCI 어댑터

MiniPCI 어댑터는 MiniPCI 폼 팩터를 지원하는 특정 모바일 컴퓨터에서 작동합니다. 이러한 어댑터는 이 도움말 파일에 설명된 클라이언트 어댑터와 동일한 기능을 지원합니다. 일부 MiniPCI 어댑터에는 모뎀이 포함되어 있기도 합니다.

제품에 모뎀이 포함되어 있는 경우 컴퓨터와 함께 제공된 설명서에서 모뎀 구성을 참조하십시오.

참조:

Intel(R) PRO/100+ 어댑터 고급 설정


PRO/10+ 어댑터 고급 설정
Intel(R) PRO/10 및 PRO/10+ 어댑터 고급 설정

고급 탭에 있는 설정을 이용하면 어댑터가 링크 변경, 버퍼, 오프로드 및 기타 기능을 처리하는 방법을 사용자 정의할 수 있습니다. 다음과 같은 몇 가지 기능은 실행 중인 운영 체제와 설치된 특정 어댑터에 따라 사용하지 못할 수도 있습니다.

고급 설정

적응 프레임 간의 간격

네트워크에서의 과도한 이더넷 패킷 충돌을 보상합니다. 기본 설정(1)은 동적으로 네트워크 트래픽 조건에 맞도록 설정하므로 대부분의 컴퓨터 및 네트워크에 적합합니다. 값이 1로 설정된 경우에만 동적 모드가 활성화됩니다. 그러나 드물게 간격 값을 수동으로 설정하여 성능을 향상시킬 수도 있습니다. 값을 설정하면 패킷들 사이에서 안정적인 간격으로 강제로 지정됩니다.

값을 증가시켜 전송되는 프레임 간의 지연 시간을 늘립니다.

지원되는 어댑터	모두
기본값	1
범위	0-255
적용 기술

어댑터 드라이버에서 마이크로 코드를 활성화 또는 활성 해제합니다. 마이크로 코드는 운영 체제 환경을 기반으로 성능을 최적화합니다.

최고의 성능을 얻으려면 적응 기술을 활성 상태로 유지합니다.

어댑터의 호환성 문제를 해결할 때 적응 기술을 활성 해제할 수 있습니다. 적응 기술을 활성 해제하면 전송 제어 블록 및 적응 성능 조정도 활성 해제됩니다.

지원되는 어댑터	모두
기본값	온
범위	온, 오프
적응 전송 임계값

전송 전에 어댑터가 해당 전송 버퍼에 저장하는 바이트 수를 지정합니다. 예를 들어, 데이터 전송 전에 적응 전송 임계값이 100이면 어댑터는 버퍼에 100바이트(800비트)를 저장합니다.

•	적응 전송 임계값을 높이면 전송 성능은 낮아지지만, 언더런이 줄어들 수 있습니다.

•	적응 전송 임계값을 낮추면 전송 성능은 높아지지만, 언더런이 많아질 수 있습니다. 이 값을 낮추면 어댑터가 빠른 전송을 수행할 수 있습니다.

어댑터는 시작할 때만 적응 전송 임계값을 사용합니다. 낮은 값으로 더 나은 전송 성능을 얻을 수 있다면 어댑터가 자동으로 낮은 값을 사용할 것입니다.

전체 이더넷 프레임을 처음으로 전송하도록 어댑터를 구성한 후 최고 성능에 맞게 조정하려면 이 값을 190으로 설정합니다. 전송 성능 값이 190으로 크게 떨어지면 임계값을 16으로 설정한 후 성능을 점차 늘리십시오.

지원되는 어댑터	모두
기본값	12
권장	• 컴퓨터에 여러 개의 버스 마스터링 카드가 있거나 대기 시간이 길 경우 이 값을 200으로 설정합니다. • 컴퓨터에 하나의 버스 마스터링이 있을 경우 이 값을 12로 설정합니다
범위	0-200
리소스가 없는 경우의 기본적인 연결성

시스템 리소스가 모든 고급 설정을 실행할 만큼 충분치 않은 경우에도 네트워크 연결을 유지하십시오. IPSec 오프로드 및 대량 전송 오프로드와 같은 기능은 리소스가 충분할 때만 시작합니다. 시스템 리소스가 부족해서 생기는 오류는 시스템 로그에 기록될 수 있습니다.

지원되는 어댑터	모두
기본값	오프
권장 값	온
범위	온, 오프
가속 시 가용 버퍼 수

가속 시 가용 버퍼 수를 사용자가 정의하는 방식으로 전송 성능을 최적화하여, 패킷 전송 전에 어댑터가 데이터 세그먼트를 추가할 수 있도록 합니다.

가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 구성해야 합니다. 가속 시 가용 버퍼 수 설정은 전송 설명자의 30 - 50% 이어야 합니다. 가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 수정하지 않으면 전송 성능이 향상되지 않을 수도 있습니다.

가속 시 가용 버퍼 수 설정을 이용하면 Windows NT 4.0 컴퓨터에서의 전송 성능이 크게 증가합니다. 또한 Windows 98 및 2000 컴퓨터에서도 전송 성능이 향상됩니다.

지원되는 어댑터	모두
기본값	8
권장 값	8
범위	1-32
흐름 제어 수신

어댑터가 전송 경로를 일시적으로 중단시켜 전이중 흐름 제어 프레임을 수신할 수 있도록 합니다. 수신된 흐름 제어 프레임에 지정된 시간 동안 전송 경로가 중지됩니다. 이러한 설정은 패킷이 끊기지 않게 하여 네트워크 성능을 미세하게 조정할 수 있도록 도와줍니다.

지원되는 어댑터	일부 어댑터에서는 이 기능을 사용할 수 없습니다.
기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
링크 기반 로그인

적응 링크 응답(ALR) 기능을 활성화합니다. 이 기능은 LinkBasedLoad 매개변수 값을 기준으로 PhyLink 상태를 검사하고 성공 또는 실패 값을 반환합니다.

지원되는 어댑터	모두
기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
링크 속도 및 이중성

링크 설정을 사용해서 Intel(R) PRO/10+ 어댑터를 구성합니다.

지원되는 어댑터	모두
기본값	자동 검색
권장 값	자동 검색
범위	? 자동 검색 - 어댑터가 패킷을 송수신하는 방법(전이중 또는 반이중)을 스위치와 협상합니다.  참고: 링크 속도 및 이중성 옵션이 자동 검색으로 설정된 상태에서 전이중을 지원하기 위해서는 반드시 자동 협상 스위치가 있어야 합니다. ? 10Mbps/반이중 - 어댑터는 10 Mbps의 속도를 사용하며 작업을 한 번에 하나씩 수행합니다. 송신 또는 수신 작업입니다. • 10Mbps/전이중 - 어댑터는 10 Mbps의 속도를 사용하며 패킷을 동시에 송수신합니다. 그러면 어댑터의 성능이 향상됩니다. 전이중 스위치를 사용하고 있는 경우에만 이 모드를 선택하십시오.
로컬 관리 주소

어댑터의 MAC 주소를 무시합니다. 새 네트워크 주소를 입력하려면 이 상자에 12자리 16진수를 입력하십시오.

지원되는 어댑터	모두
기본값	없음
범위	0000 0000 0001 - FFFF FFFF FFFD 예외: • 멀티캐스트 주소(하이 바이트 중 가장 중요도가 적은 비트 = 1)는 사용하지 마십시오.  • 모두 0 또는 모두 F는 사용하지 마십시오.
PCI 버스 효율성

어댑터에서 가장 적합한 패킷 전송 방법을 사용하거나 항상 패킷을 병합하도록 할 수 있습니다.

•	PCI 버스 효율성 기능이 활성 해제되면 어댑터는 가능한 최고 성능을 제공하는 전송 방법을 사용합니다. 병합 패킷이 최고의 전송 성능을 제공할 경우 어댑터는 자동으로 패킷을 병합합니다.

•	PCI 버스 효율성 기능이 활성화되면 어댑터에서 강제로 패킷을 병합합니다.

패킷 전송 성능에 문제가 없으면 PCI 버스 효율성 기능을 활성 해제됨으로 설정합니다. 언더런의 수가 많거나 PCI 버스에 성능 문제가 있을 경우 이 값을 활성화됨으로 설정합니다.

지원되는 어댑터	모두
기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
우선순위 단계 정의

QoS 태그 지정된 패킷의 우선순위 레벨에 대한 경계 지점을 정의합니다.

컴퓨터에서 802.1p/802.1Q 태그 지정(QoS)이 활성화되어 있으면 우선순위 대기열에서 제공하는 우선순위 레벨(0-7)을 정의할 수 있습니다. Intel 어댑터에는 높음 및 낮음의 두 가지 우선순위 대기열이 있습니다. 기본적으로 0-3의 값을 갖는 패킷은 낮은 우선순위 대기열을 통해 전송되고 4-7의 값을 갖는 패킷은 높은 우선순위 대기열을 통해 전송됩니다.

우선순위 단계 정의에 대해 입력한 번호는 고 및 저 우선순위 대기열 사이에서 컷 오프 지점입니다. 예를 들어, 6을 입력한 경우 우선순위가 0-5인 패킷은 낮은 우선순위를 통해 전송되고 우선순위가 6-7인 패킷은 높은 우선순위 대기열을 통해 전송됩니다.

지원되는 어댑터	모두
기본값	4 • 0-3의 값을 갖는 패킷은 낮은 우선순위 대기열로 전송됩니다.  • 4-7의 값을 갖는 패킷은 높은 우선순위 대기열로 전송됩니다.
범위	0-7

수신 버퍼

프로토콜 메모리에 데이터를 복사할 때 드라이버에서 사용하는 버퍼의 수를 지정합니다.

네트워크 로드가 큰 경우 수신 버퍼를 늘리면 성능을 향상시킬 수 있습니다. 이 경우 드라이버에 사용되는 시스템 메모리의 양을 늘려야 하는 단점이 있습니다. 그 밖의 경우 이 값을 수정하면 시스템 성능이 떨어질 수 있습니다.

지원되는 어댑터	모두
기본값	48
권장 값	• Windows 98, Windows Me, Windows 2000 및 Windows XP의 단일 어댑터: 48 • Windows NT에 있는 하나의 어댑터: 32 • 팀 구성된 어댑터: 250
범위	8-1024
프레임 간의 재전송 간격

프레임 재전송 사이의 지연 시간을 늘립니다. 충돌 후 어댑터가 프레임을 재전송하는 데 사용하는 내장 이더넷 알고리즘이 있더라도 네트워크에 비정상적으로 많은 수의 충돌이 있는 경우 지연 시간을 늘려 네트워크 성능을 향상시킬 수 있습니다.

지원되는 어댑터	모두
기본값	10
범위	6-15
전송 제어 블록

어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 제어 블록의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 제어 블록이 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 제어 블록의 수를 늘릴 수 있습니다. 전송 제어 블록의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 제어 블록이 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 권장 값 16을 사용합니다.

지원되는 어댑터	모두
기본값	32
권장 값	16
범위	8-64


PRO/1000 링크 구성
Intel(R) PRO/1000 링크 구성(구리 모델 전용)

주의: 거의 모든 경우에 자동 협상을 활성 상태로 두어야 합니다. 자동 협상을 활성 해제하면 링크 파트너 설정을 어댑터 설정과 같도록 해야 합니다. 자동 협상이 활성 해제 상태이면 어댑터가 1000 Mbps에서 작동하지 않습니다.

속도 및 이중성을 설정하려면

1.	링크 구성 탭에서 자동 협상 설정을 수정하려면 활성화됨 또는 활성 해제됨을 클릭합니다.

•	자동 협상이 활성화된 상태에서 어댑터는 해당 링크 파트너와 속도 및 이중성을 협상합니다.

•	자동 협상이 활성 해제된 상태에서 어댑터는 지정된 속도 및 이중성 설정으로 강제로 지정됩니다.  자동 협상을 활성 해제한 경우 링크 파트너가 지정된 속도 및 이중성에서 작동할 수 있어야 합니다. 링크 파트너가 강제로 지정된 어댑터 설정에서 작동할 수 없으면 어댑터와 링크 파트너 간의 통신이 설정될 수 없습니다.

2.	자동 협상이 활성화된 상태이면 협상 중 링크 파트너에게 알려진 속도 및 이중성 설정을 선택합니다. 기본적으로 모든 설정이 인지됩니다. 가능한 설정은 다음과 같습니다.

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

•	1000 Mbps FULL

참고: IEEE 사양에 따르면 1000 기반 T 작업은 강제로 적용할 수 없습니다. 그러나 자동 협상을 선택한 다음 고급 설정 섹션에서 1000 Mbps Full을 선택하여 어댑터가 1000 Mbps에서만 작동하도록 구성할 수 있습니다.

3.	자동 협상이 활성 해제된 상태이면 다음 설정 중 하나를 클릭하여 어댑터의 속도 및 이중성을 강제로 지정합니다.

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

통신이 가능하도록 하려면 링크 파트너가 강제 설정을 지원하는지 확인하십시오.

4.	확인을 클릭합니다.

5.	메시지가 나타나면 컴퓨터를 다시 시작하십시오.

이제 속도 및 이중성 설정이 어댑터에 맞게 구성되었습니다.


링크 파트너

어댑터를 다른 어댑터, 허브, 스위치 등에 링크하는 장치입니다.


네트워크 구성요소 트리 보기
네트워크 구성 요소 트리

Intel(R) PROSet II의 왼쪽 창에 네트워크 구성 요소 트리가 나타납니다. 구성 요소에 대한 세부 정보를 보려면 어댑터, VLAN 또는 팀을 클릭합니다.


Boot Agent

이 탭에는 Boot Agent 소프트웨어의 작동을 제어하는 설정이 있습니다. 설정 선택 상자에서 일부 설정을 변경할 수 있으며 IT 관리자가 이 기능을 활성화한 경우 이 탭을 사용하여 플래시 ROM 장치를 Boot Agent 소프트웨어 이미지와 함께 업데이트할 수도 있습니다.

가능한 각각의 구성 설정에 대한 자세한 내용은 다음을 참조하십시오.

•	 네트워크 부트 프로토콜

•	 부트 순서

•	 설정 메뉴 대기 시간

•	 설정 프롬프트 표시

•	 레거시 OS 깨우기지

 구성 설정에 대한 지침은 Intel（Ｒ） Boot Agent User´s Guide를 참조하십시오.

주:

구성 설정을 변경할 수 없을 경우 어댑터나 시스템에서 해당 설정을 활성화하지 못할 수도 있습니다.

이 도움말 파일의 정보는 Boot Agent 16-bit PXE 2.0 버전에만 적용됩니다. EFI 환경에서는 여기에 설명된 대부분의 구성 설정 옵션이 사용되지 않습니다.

Boot Agent 업데이트 단추

이 단추를 사용하여 Intel Boot Agent 소프트웨어를 설치 또는 업데이트합니다.

주:

Boot Agent 업데이트 작업은 플래시 ROM에 새로운 Boot Agent 이미지를 기록하며, 이를 통해 일시적으로 Windows* 네트워크 장치 드라이버의 작동을 활성 해제할 수 있습니다. 이 작업 후에는 컴퓨터를 다시 부팅해야 할 수도 있습니다.

DOS 설치가 필요하면 Intel(R) Boot Agent User´s Guide의 DOS Installing/Updating in DOS Environments를 참조하십시오.

Boot Agent 소프트웨어를 설치 또는 업데이트하려면

참고: Intel 웹 사이트에서 플래시 ROM 이미지 파일을 다운로드할 때 이 프로시저 도중 쉽게 찾을 수 있는 임시 디렉토리나 위치에 저장하십시오.

1.	시작 메뉴에서 설정을 클릭한 다음 제어판을 클릭합니다.
제어판 창이 나타납니다.

2.	Intel(R) PROSet II 아이콘을 두 번 클릭합니다.
Intel PROSet II 화면이 나타납니다.

3.	네트워크 구성요소 트리에서 업데이트할 플래시 ROM이 포함된 어댑터를 선택합니다.

4.	Boot Agent 탭을 클릭합니다. 이 탭이 나타나지 않으면 네트워크 드라이버를 업데이트하거나 Intel PROSet 버전 4.0에 이상이 있는지 확인하십시오.

참고: Intel PROSet II에서는 PXE 및 RPL 환경에 맞도록 구성 설정을 변경할 수 있습니다. Intel PROSet II 화면 왼쪽의 네트워크 구성요소 아래에 나열된 장치에서 PXE 또는 RPL 환경에서 작동하는 어댑터를 선택하면 화면 오른쪽에 나타나는 구성 설정을 보거나 변경할 수 있습니다. 자세한 내용은 Intel Boot Agent User´s Guide의 Configuring the Boot Agent in a Windows Environment를 참조하십시오. 몇몇 플래시 ROM에서는 일부 구성 설정을 지원하지 않습니다.

5.	설정을 편집하려면 Ctrl+S를 누릅니다. Ctrl+S를 누르면 Boot Agent 탭의 모양이 변경되고 희미하게 표시된(활성 해제된) 설정 적용 단추가 포함됩니다.

6.	Boot Agent 업데이트를 클릭합니다.
부트 이미지를 업데이트하는 동안 일시적으로 네트워크 연결이 끊어짐을 알리는 경고 창이 표시됩니다.

7.	예를 클릭하고 업데이트를 계속합니다.
현재 사용 중인 플래시 ROM의 백업 사본을 만들지 묻는 대화 상자가 표시됩니다.

8.	플래시를 업데이트하기 전에 현재 플래시 ROM을 백업하려면 예를 클릭합니다. Save Existing Flash Image As 대화 상자가 나타납니다. 단계 10로 가십시오.

9.	현재 플래시 ROM 이미지 백업을 파일로 저장하지 않으려면 아니오를 클릭합니다. 경고 대화 상자가 나타납니다. 예를 클릭하고 11 단계로 가십시오.

10.	기본 경로 및 파일 이름(파일 이름 기본값은 어댑터의 고유 MAC 주소임)을 그대로 사용하려면 저장을 클릭합니다. 그렇지 않은 경우 이 매개변수를 변경하고 저장을 클릭합니다.

11.	저장한 플래시 ROM 이미지 파일이 화면의 기본 경로 및 파일 이름으로 표시되면 파일 열기 대화 상자에서 열기를 클릭합니다. 그렇지 않은 경우에는 경로 및 파일 이름을 수정하고 열기를 클릭합니다.
참고: 플래시 ROM 이미지는 Intel 웹 사이트에서 구할 수 있습니다.

업데이트에는 5초에서 10초 정도 걸리며 업데이트 작업이 진행 중인 동안 진행 표시기가 나타납니다.


네트워크 부트 프로토콜

Boot Agent가 RPL을 지원하지 않으면 이 설정을 변경할 수 없습니다.

가능한 값:

•	PXE(Preboot eXecution Environment)

•	RPL(Remote Program Load)

설명:

WfM 호환 네트워크 관리 프로그램(예: LANDesk* Management Suite, Windows* 2000 RIS, Windows XP RIS 및 Linux*)에서 사용할 PXE를 선택합니다.

일부 Novell Ware*의 경우 및 기존 스타일의 원격 부팅이 필요한 경우 RPL을 선택합니다.


부트 순서

가능한 값:

•	BIOS 설정 부트 순서 사용

•	네트워크, 그 다음 로컬 드라이브

•	로컬 드라이브,  그 다음 네트워크

•	네트워크만

•	로컬 드라이브만

설명:

시스템이 부팅될 때 부트 장치가 선택되는 순서를 선택할 수 있습니다. 컴퓨터에 BBS(BIOS Boot Specification)를 지원하는 BIOS가 있거나 BIOS Setup 프로그램에서 플러그 앤 플레이(PnP) 호환 부팅 순서 선택이 가능할 경우 이 설정은 항상 BIOS 설정 부트 순서 사용이며 변경할 수 없습니다. 이러한 경우 부트 옵션을 설정하려면 클라이언트 컴퓨터의 BIOS Setup 설명서를 참조하십시오.

클라이언트 컴퓨터에 BBS 호환 또는 PnP 호환 BIOS가 없는 경우 BIOS 설정 부트 순서 사용을 제외하고 위에 나열된 값 중 하나를 선택할 수 있습니다.


설정 프롬프트 표시

가능한 값:

•	활성화됨 - 기본값

•	활성 해제됨

설명:

Enabled를 선택하면 POST 후 Ctrl+S 설정 프롬프트가 나타나 설정 메뉴 대기 시간 설정에서 허용하는 시간(초) 이내에 Ctrl+S를 눌러 구성 설정 메뉴를 표시할 수 있습니다.

Disabled를 선택하면 설정 메뉴 대기 시간 설정이 0이 되며 부팅 도중 Ctrl+S 설정 프롬프트가 표시되지 않습니다. 그러나 포스트 후 메뉴가 나타날때까지 즉시 Ctrl+S를 반복적으로 누르면 구성 설정 메뉴를 표시할 수 있습니다. 구성 설정 메뉴가 나타나지 않으면 Ctrl+S를 반복해서 누른 후 재부팅하고 다시 시도합니다.


설정 메뉴 대기 시간

가능한 값:

•	0초

•	2초

•	3초

•	5초

설명:

Boot Agent는 Ctrl+S를 누를 때까지 몇 초 동안 대기했다가 시스템 부팅 중에 구성 설정 메뉴를 표시합니다.

0으로 설정된 설정 메뉴 대기 시간 및/또는 Disabled 설정 프롬프트 표시 설정을 선택하면 Ctrl+S 설정 프롬프트가 부팅 도중 나타나지 않습니다. 그러나 포스트 후 메뉴가 나타날때까지 즉시 Ctrl+S를 반복적으로 누르면 구성 설정 메뉴를 표시할 수 있습니다. 구성 설정 메뉴가 나타나지 않으면 Ctrl+S를 반복해서 누른 후 재부팅하고 다시 시도합니다.


레거시 OS Wakeup 지원

기가비트 어댑터에서 부팅하지 않을 경우 구성 설정 메뉴에 이 설정이 나타나지 않습니다.

운영 체제에서 원격 깨우기를 지원하는지 여부와 이 기능의 사용 방법은 운영 체제 설명서를 참조하십시오.

가능한 값:

•	활성화됨

•	활성 해제됨

설명:

비 Windows* 운영 체제(예: DOS 또는 NetWare*)에서 WfM 어댑터의 원격 깨우기 기능을 사용하려면 활성화됨을 선택합니다.

Windows 2000, XP, Me 또는 98SE를 사용할 경우에는 이 설정에서 활성 해제됨을 선택합니다.


VLAN 목록

구성된 VLAN은 네트워크 구성요소 트리에 다음과 같이 나타납니다.

VLAN을 마우스 오른쪽 단추로 클릭하면 다음 옵션이 나타납니다.

•	VLAN 속성 변경 - VLAN 구성을 변경할 수 있습니다.

•	제거 - VLAN을 제거할 수 있습니다.

참조

VLAN 추가


팀 목록

구성된 어댑터 팀은 네트워크 구성요소 트리에 나타납니다.

팀을 마우스 오른쪽 단추로 클릭하면 다음 옵션이 나타납니다.

•	팀 제거

•	팀 모드 변경

•	VLAN 추가

•	IPSec 활성화

•	GVRP 활성화

구성된 팀이 네트워크 구성요소 트리에 나타나지 않으면 Intel(R) PROSet II를 닫아 팀 설정을 적용해야 할 수도 있습니다.


팀 구성된 어댑터 목록

팀 구성된 어댑터 목록을 마우스 오른쪽 단추로 클릭하면 다음 옵션이 나타납니다.

•	기본 설정 - 선택한 어댑터를 팀에 대한 주 전송 어댑터로 지정합니다. 보통 여기서 지정하는 어댑터가 최고 대역폭 어댑터입니다.

•	기본 이차 - 선택한 어댑터를 기본 설정 어댑터에 대한 백업 어댑터로 지정합니다. 이 옵션은 기본 설정 어댑터를 지정하기 전에는 사용할 수 없습니다.

•	팀에서 제거 - 선택한 어댑터를 팀에서 제거합니다.

참조

•	어댑터 팀 구성 모드 변경

•	기존 팀에 어댑터 추가

•	새 팀 만들기

•	팀에서 어댑터 제거

•	어댑터 팀 제거

•	어댑터를 주 또는 보조로 지정


네트워크 구성요소
네트워크 구성 요소 트리

네트워크 구성 요소 트리는 시스템에서 활성 상태인 네트워크 구성 요소를 나열합니다. 네트워크 구성요소로는 어댑터, 팀 및 VLAN이 있습니다.


구성원 어댑터

구성원 어댑터 목록 상자에는 팀을 구성하는 어댑터가 나타납니다. 해당 어댑터에 대한 정보를 보려면 구성원 어댑터를 클릭하십시오.

참조

팀에서 어댑터 제거


가상 LAN

네트워크 구성요소 트리에 있는 가상 LAN 탭 항목에는 구성된 VLAN 목록이 나와 있습니다.

참조

VLAN 추가

VLAN 속성 변경

VLAN 정의

VLAN 제거

VLAN 고급 설정

GVRP 설정


어댑터 인스턴스 제거
어댑터 제거

Intel(R) PROSet II에서 어댑터를 제거하거나 컴퓨터에서 어댑터를 제거하기 전에 어댑터가 팀의 구성원이 아닌지 확인해야 합니다. 어댑터가 팀의 구성원이면 먼저 팀에서 어댑터를 제거한 다음 아래의 지침을 따르십시오.

Intel(R) PROSet II에서 어댑터를 제거하려면

1.	네트워크 구성요소 트리에서 제거할 어댑터를 마우스 오른쪽 단추로 클릭합니다.

2.	제거를 클릭합니다.
해당 어댑터가 더 이상 팀의 구성원이 아님을 알려주는 확인 대화 상자가 나타납니다.

3.	예를 클릭합니다.

4.	확인을 클릭하여 Intel PROSet II를 닫고 변경 사항을 적용합니다.

5.	메시지가 표시되면 시스템을 다시 시작합니다.

더 이상 Intel PROSet II가 어댑터를 관리하지 않습니다.


새 팀 만들기

팀은 장애 조치 또는 전송 처리량 증가와 같이 네트워크 기능을 향상시키기 위해 구성되는 어댑터 그룹입니다.

팀을 작성하려면

1	네트워크 구성요소 트리에서 팀에 속하지 않는 어댑터를 마우스 오른쪽 단추로 클릭합니다.

2	팀에 추가를 클릭한 다음 새 팀 작성을 클릭합니다.
팀 구성 마법사가 나타납니다.

3	작성할 팀의 유형을 선택하고 다음을 클릭합니다. 다음 중에서 선택할 수 있습니다.

•	어댑터 고장 방지

•	스위치 고장 방지

•	적응 로드 균형 조정

•	링크 협상 (Dynamic_3ad* / GEC / LA / 802.3ad 정적 모드)

4	적응 로드 균형 조정 팀을 작성 중인 경우 수신 로드 균형 조정(RLB)을 활성화 또는 활성 해제할 수 있습니다.

•	RLB를 활성화하면 속도가 가장 빠른 팀 구성원이 IP 트래픽을 수신하며 주 어댑터는 비 IP 트래픽을 수신합니다.
참고: RLB가 활성화되면 Intel(R) PROSet II는 자동으로 기본 설정 주 어댑터를 선택합니다. Intel PROSet II에서는 어댑터 모델이나 속도를 기준으로 기본 설정 어댑터를 선택하지 않습니다.

•	RLB를 활성 해제하면 주 어댑터만 트래픽을 수신합니다.

5	목록에는 현재 팀의 일부가 아닌 모든 어댑터가 표시됩니다. 목록에서 현재 팀에 포함시킬 어댑터를 선택하고 다음을 클릭합니다.

6	마침을 누릅니다.

7	선택한 경우 팀에서 주 어댑터로 사용할 어댑터를 지정할 수 있습니다. 주 어댑터를 지정하려면 주 어댑터로 사용할 어댑터를 마우스 오른쪽 단추로 클릭한 다음 기본 설정 주를 클릭합니다.
주 어댑터를 선택하지 않을 경우 Intel PROSet II는 기본 설정 어댑터를 선택합니다.

8	닫기를 클릭하여 Intel PROSet II를 닫고 변경 사항을 적용합니다.

이제 팀이 구성되었습니다.

참고: Intel PROSet II에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet II를 닫으십시오.  그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


기존 팀에 어댑터 추가

항상 기존 팀에 어댑터를 추가할 수 있습니다.

참고: 동적 802.3ad 팀에서 구성을 변경하면 스위치가 링크 집계자를 다시 계산하기 때문에 트래픽 흐름이 일시적으로 중단될 수도 있습니다.

Intel(R) PROSet II에서 기존 팀에 어댑터를 추가하려면

1.	네트워크 구성요소 트리에서 팀 목록을 마우스 오른쪽 단추로 클릭합니다.

2.	팀에 어댑터 추가를 클릭한 다음 추가할 어댑터를 선택합니다.

이제 어댑터가 팀의 일부가 되었습니다.

참고: Intel(R) PROSet에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet을 닫으십시오. 그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


VLAN 추가
VLAN 만들기

VLAN은 네트워크 보안 성능을 향상시키고 브로드캐스트 도메인의 크기를 줄이기 위해 구성되는 논리적인 어댑터 그룹입니다.

VLAN을 만들려면

1.	네트워크 구성요소 트리에서 팀 목록 또는 팀 구성되지 않은 어댑터 목록을 마우스 오른쪽 단추로 클릭합니다.

2.	VLAN 추가를 클릭합니다.
새 VLAN 추가 대화 상자가 열립니다.

3.	VLAN ID 필드에서 어댑터에 할당된 VLAN의 번호를 입력합니다. VLAN ID는 스위치에 구성된 VLAN ID와 일치해야 합니다.
참고: VLAN 번호 0과 1은 종종 예약됩니다. 자세한 내용은 스위치 문서를 참조하십시오.

4.	VLAN 이름 필드에 VLAN에 대한 레이블을 입력합니다. 예를 들면 마케팅 또는 엔지니어링이 있습니다. 단지 식별을 위한 용도로만 사용되므로 이름이 반드시 다른 네트워크 장치의 이름과 같을 필요는 없습니다.

5.	확인을 클릭합니다.

이제 어댑터가 VLAN 구성원이 되도록 구성되었습니다. 어댑터가 VLAN 구성원이 되도록 설정한 후 적합한 VLAN 정보를 사용해서 다른 네트워크 장치를 설정하여 VLAN 구성을 완료해야 합니다.

참고: Intel(R) PROSet에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet을 닫으십시오. 그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


VLAN 제거

VLAN을 제거할 때 Intel(R) PROSet II를 사용합니다. 운영 체제에서 네트워크 패널을 통해 VLAN 팀을 제거하거나 활성 해제하면 시스템 안정성과 어댑터 구성에 영향을 미칠 수 있습니다.

팀 또는 어댑터에서 VLAN을 제거하려면

1	네트워크 구성요소 트리에서 팀 목록을 마우스 오른쪽 단추로 클릭합니다.

2	VLAN 제거를 클릭합니다.

팀 또는 어댑터에서 VLAN이 제거됩니다.

참고: Intel PROSet II에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet II를 닫으십시오.  그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


어댑터 팀 제거

팀을 제거할 경우 Intel(R) PROSet II 유틸리티를 사용해야 합니다. 운영 체제의 네트워크 패널을 통해 팀을 제거하거나 활성 해제하면 시스템 안정성과 어댑터 구성에 영향을 미칠 수 있습니다.

전체 어댑터 팀을 제거하려면

1.	네트워크 구성요소 트리에서 팀 목록을 마우스 오른쪽 단추로 클릭합니다.

2.	제거를 클릭합니다.

3.	확인 메시지가 나타납니다.  예를 클릭합니다.

이제 팀이 제거되었습니다. 어댑터는 개별 장치로 계속 작동합니다.

참고: 팀에 대한 VLAN 또는 우선순위 패킷 필터를 만들었다면 이러한 필터는 팀과 함께 제거됩니다. 팀에 속하기 전에 어댑터에 대한 VLAN 또는 우선순위 패킷 필터를 작성한 경우 팀이 제거되면 해당 필터도 같이 제거됩니다.


어댑터 팀 구성 모드 변경
팀 구성 모드 변경

팀의 팀 구성 모드를 변경하려면

1.	네트워크 구성요소 트리에서 팀 목록을 마우스 오른쪽 단추로 클릭합니다.

2.	팀 모드 변경을 클릭하고 다음 중 하나를 클릭합니다.

•	어댑터 고장 방지

•	스위치 고장 방지

•	적응 로드 균형 조정
조정 팀 모드를 적응 로드 균형 조정으로 변경하면 기본적으로 수신 로드 균형 조정이 활성 해제됩니다. 수신 로드 균형 조정을 활성화하려면 팀 모드를 변경한 다음 팀 구성 고급 탭에서 수신 로드 균형 조정을 활성화합니다.

•	링크 협상 (Dynamic_3ad* / GEC / LA / 802.3ad 정적 모드) FECIEEE_802_3ad

이제 팀 모드가 변경되었습니다.

참고: Intel(R) PROSet에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet을 닫으십시오. 그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


팀에서 어댑터 제거

항상 기존 팀에서 어댑터를 제거할 수 있습니다.

참고: 동적 802.3ad 팀에서 구성을 변경하면 스위치가 링크 집계자를 다시 계산하기 때문에 트래픽 흐름이 일시적으로 중단될 수도 있습니다.

팀에서 어댑터를 제거하려면

1.	네트워크 구성요소 트리에서 팀을 마우스 오른쪽 단추로 클릭합니다.

2.	팀에서 제거를 클릭합니다.

3.	확인을 클릭하여 변경 내용을 적용합니다.

어댑터가 더 이상 팀의 일부가 아닙니다.

참고: Intel(R) PROSet에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet을 닫으십시오. 그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


VLAN 속성 변경

VLAN ID를 변경하여 어댑터를 다른 VLAN의 구성원이 되도록 재구성할 수 있습니다. 어댑터와 연관된 VLAN ID를 변경하면 기존 VLAN에 있는 컴퓨터와의 통신에 사용되는 기존 VLAN에서 어댑터가 제거됩니다.

예를 들어, VLAN ID를 7에서 9로 변경하면 컴퓨터가 VLAN 7에 있는 컴퓨터와 더 이상 통신할 수 없으며 VLAN 9에 있는 컴퓨터와 통신할 수 있게 됩니다.

VLAN 구성을 변경하려면

1.	네트워크 구성요소 트리에서 VLAN을 마우스 오른쪽 단추로 클릭합니다.

2.	VLAN 등록 정보 변경을 클릭합니다.

3.	VLAN ID 필드에서 어댑터에 할당된 VLAN의 번호를 입력합니다.  VLAN ID는 스위치에 구성된 VLAN ID와 일치해야 합니다.
참고: VLAN 번호 0과 1은 종종 예약됩니다. 자세한 내용은 스위치 문서를 참조하십시오.

4.	VLAN 이름 필드에 VLAN에 대한 레이블을 입력합니다. 예를 들면 마케팅 또는 엔지니어링이 있습니다. VLAN 이름은 정보를 제공하기 위한 용도로만 사용되는 것이므로 다른 네트워크 장치에 구성된 VLAN 이름과 같지 않아도 됩니다.

5.	Intel(R) PROSet II를 닫으려면 확인을 클릭합니다.

이제 VLAN 구성이 업데이트되었습니다.

참고: Intel(R) PROSet에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet을 닫으십시오. 그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.

참조

GVRP 활성화

VLAN 고급 설정


어댑터를 주 또는 보조로 지정

각 팀에는 하나의 주 어댑터와 하나 이상의 보조 어댑터가 있습니다.

•	팀의 주 어댑터를 수동으로 선택하거나 Intel(R) PROSet II에서 주 어댑터를 선택하도록 할 수 있습니다.

•	주 어댑터를 선택하면 해당 어댑터는 기본 설정 어댑터가 됩니다. 기본 설정 어댑터는 활성 상태에 있는 동안 트래픽을 전송 및 수신합니다. 기본 설정 어댑터에 오류가 발생했지만 나중에 정상 상태로 복원되는 경우, 자동으로 기본 설정 어댑터로 제어 권한이 돌아갑니다.

예를 들어, Intel(R) PRO/1000 기가비트 어댑터를 주 어댑터로 사용하고 Intel(R) PRO/100+ 또는 PRO/100 S 어댑터를 보조 어댑터로 사용하는 서버의 경우 Intel PRO/1000 기가비트 어댑터를 주 어댑터로 사용할 수 있습니다. 이 시나리오에서는 Intel PRO/1000 어댑터에 오류가 생겨 Intel PRO/100+ 또는 PRO/100 S가 대신 작동합니다. Intel PRO/1000 어댑터가 교체되면 팀의 주 어댑터 역할이 자동으로 재개됩니다.

주 어댑터를 수동으로 선택하면 팀에는 항상 기본 설정 주 어댑터가 있습니다.

•	주 어댑터로 설정하지 않을 경우 Intel PROSet II는 어댑터 모델 및 속도를 기준으로 가장 적합한 어댑터를 선택합니다. 즉, 주 어댑터는 있지만 기본 설정 어댑터는 없습니다. 기본 설정 어댑터가 없으면 Intel PROSet II는 주 어댑터에 오류가 발생할 경우를 대비해서 다른 주 어댑터를 선택할 수 있습니다.

예를 들어, 주 어댑터인 Intel(R) PRO/1000 기가비트 어댑터에 오류가 발생할 경우 Intel PROSet II는 팀에서 다른 어댑터를 주 어댑터로 지정할 수 있습니다. Intel(R) PRO/1000 어댑터가 계속 활성 상태일 경우 이 어댑터는 주 어댑터가 아닌 팀 구성원으로 다시 추가됩니다.

어댑터를 기본 또는 보조 어댑터로 설정하려면

1.	네트워크 구성요소 트리에서 팀 구성된 어댑터 목록을 마우스 오른쪽 단추로 클릭합니다.

2.	기본 설정 또는 기본 보조를 클릭합니다.

이제 어댑터 구성이 완료되었습니다.

어댑터 우선순위 상태 변경

위에 설명된 것과 동일한 절차를 사용하여 어댑터 우선순위도 변경할 수 있습니다.

STP 및 SFT 팀:  팀의 기본(활성) 어댑터를 변경하려면 새 기본 어댑터의 MAC 주소를 사용하여 팀을 다시 로드합니다. 마찬가지로 팀의 로컬 관리 주소(LAA)를 변경하면 팀이 다시 로드되고 팀에 새 MAC 주소가 할당됩니다. 네트워크에서 서버 활성 중 SFT 팀을 수행하면 이 두 작업으로 인하여 모든 네트워크 장치에서 ARP 테이블을 새 기본 어댑터에 대한 주소 정보를 리프레시할 때까지 팀은 통신을 할 수 없습니다. ARP 테이블을 리프레시하는데 소요되는 시간 분량은 일부 라우터 및 운영 체제에서 사용 가능한 매개변수인 ARP 캐시 타임아웃 기간에서 설정됩니다. ARP 캐시 타임아웃 기간에 따라 팀을 10분동안 사용할 수 없습니다.

참고: 기본 설정 주를 지정하기 전까지는 기본 설정 보조 옵션을 사용할 수 없습니다.


PROSet 트레이 아이콘
Intel(R) PROSet II 트레이 아이콘

Intel(R) PROSet II를 설치하면 시계 옆에 있는 작업 표시줄에 Intel PROSet 트레이 아이콘이 표시됩니다.

그 아이콘을 마우스 오른쪽 단추로 클릭하면 다음과 같은 옵션이 나타납니다.

명령	설명
Intel(R) PROSet II 실행	Intel PROSet II 유틸리티를 표시합니다.
트레이 아이콘 숨기기	작업 표시줄에서 트레이 아이콘을 숨깁니다.   아이콘을 만들면 아이콘이 작업 표시줄에 다시 나타납니다. Intel PROSet II의 일반 탭에서 트레이 아이콘 표시를 클릭합니다.
종료	Intel PROSet II를 닫고 작업 표시줄에서 트레이 아이콘을 일시적으로 제거합니다.  작업 표시줄에 아이콘이 표시되지 않더라도 제어판에서 Intel PROSet II 아이콘을 두 번 클릭하여 Intel PROSet을 시작할 수 있습니다. 컴퓨터를 다시 시작하면 작업 표시줄에 Intel PROSet II 트레이 아이콘이 나타납니다.
종료하고 다시 시작하기 않기	Intel PROSet II 트레이 아이콘을 제거하고 컴퓨터를 다시 시작할 때 나타나지 않도록 합니다. 이 옵션을 선택한 후 트레이 아이콘을 복원하려면 다음을 수행하십시오.  1. 시작 > 실행을 클릭합니다. 2. 열기 필드에 PROMON을 입력한 다음 확인을 클릭합니다.   컴퓨터를 다시 시작할 때까지 작업 표시줄에 Intel PROSet II 아이콘이 남아 있습니다. 트레이 아이콘을 영구적으로 표시하려면 아래의 부팅 시 트레이 아이콘 시작을 참조하십시오.
부팅 시 트레이 아이콘 시작	작업 표시줄에 Intel PROSet II 트레이 아이콘이 표시되도록 구성합니다. 이 옵션을 선택할 경우 컴퓨터를 다시 시작하면 트레이 아이콘이 표시됩니다. 참고: 이 옵션은 종료하고 다시 시작하지 않기 옵션을 사용한 경우에만 사용할 수 있습니다.


스마트 전원 차단 기술 정보
스마트 전원 차단 정보

스마트 전원 차단(SPD)은 연결되지 않았을 때 전원 소모량을 최소화하기 위해 Intel 82558, 82559 및 82550 기반 어댑터에 사용되는 절전 방법입니다. SPD를 사용하면 어댑터가 휴면 모드로 들어가 전원을 최대 150%까지 절약할 수 있습니다. SPD는 다음과 같은 상황에서 활성화됩니다.

•	어댑터가 제대로 연결되지 않은 경우

•	운영 체제가 일시 중단 모드에 있는 경우

이 두 가지 시나리오 모두에서 스마트 전원 차단 옵션은 어댑터가 휴면 모드에 놓이도록 하여 전반적인 전원 소비를 줄여줍니다. 어댑터가 연결되거나 운영 체제의 일시 중단 모드가 끝나면 정상적인 전원 소비 및 어댑터 활동이 다시 시작됩니다.


장치 메시지 제거 실패

장치 관리자를 사용하여 어댑터 팀 목록 또는 VLAN 목록을 제거하려고 하면 다음 메시지가 표시됩니다. "장치를 제거하지 못했습니다. 컴퓨터를 다시 부팅하십시오."

이 메시지는 장치 관리자에서 Intel(R) PROSet II에서 만든 가상 어댑터를 제거할 수 없음을 의미합니다.  장치 관리자에서 어댑터를 제거하려면 Intel PROSet II를 사용하십시오.

참조

어댑터 팀 제거

VLAN 제거

GVRP 활성화


VLAN 고급 설정

VLAN 고급 설정을 사용자 정의하려면

1.	네트워크 구성요소 트리.에서 VLAN 목록을 클릭합니다.

2.	고급 탭을 클릭합니다.

3.	드롭 다운 목록에서 NumRxPackets을 클릭한 다음 새 값을 입력합니다.
NumRxPackets은 어댑터가 수신된 패킷을 메모리에 할당할 수 있도록 하는 데이터 세그먼트인 수신 설명자의 수를 정의합니다. 수신된 각 패킷에는 하나의 수신 설명자가 필요하며 각 설명자는 2KB의 메모리를 사용합니다.

수신된 트래픽의 성능이 크게 떨어지면 수신 설명자의 수를 늘릴 수도 있습니다. 수신 성능에 문제가 없으면 기본 설정을 사용합니다.

	주의: 이 값을 수정하면 시스템 성능이 저하될 수 있습니다.
4.	드롭 다운 목록에서 NumTxPacket을 클릭한 다음 새 값을 입력합니다.

NumTxPackets는 어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 설명자의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 설명자가 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 설명자의 수를 늘릴 수 있습니다. 전송 설명자의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 전송 설명자가 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 기본 설정을 사용합니다.

	주의: 이 값을 수정하면 시스템 성능이 저하될 수 있습니다.
5.	확인을 클릭합니다.

6.	이제 VLAN에서 설정이 사용자 정의 되었습니다.

이제 VLAN이 사용자 정의 되었습니다.

참고: Intel(R) PROSet에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet을 닫으십시오. 그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


IPSec 활성화

IP 보안(IPSec)은 전송 도중 데이터 패킷의 변경 여부를 확인하여 IP 통신을 보호하는 IETF(Internet Engineering Task Force)에서 개발한 표준설정 입니다. IP 보안에 대한 자세한 내용은 Intel 지원 사이트 http://support.intel.com로 이동하고 또는 Intel(R) Packet Protect가 있는 경우에는 Packet Protect User Guide를 참조하십시오.

요구 사항

다음과 같은 경우 Intel(R) PROSet II에서 IP 보안을 활성화 또는 활성 해제할 수 있습니다.

•	다음 운영 체제 중 하나를 사용하는 경우

•	Windows* 98

•	Windows NT* 4.0, SP5 이상

•	Windows Me

•	Intel� PRO/100 어댑터를 사용하는 경우

Windows 2000 또는 Windows XP를 사용할 경우 IP 보안을 Microsoft Management Console에서 스냅인으로 사용할 수 있습니다. Windows 2000 또는 XP의 IPSec 구현에 대한 자세한 내용은 운영 체제 설명서를 참조하십시오.

IPSec을 활성화하려면

1.	네트워크 구성 요소 트리에서 팀 목록 또는 팀에 속하지 않는 어댑터 목록을 마우스 오른쪽 단추로 클릭한 다음 IPSec 활성화를 선택합니다.

2.	컴퓨터를 재부팅합니다.

3.	Intel(R) 패킷 보호 소프트웨어를 설치합니다.
참고: 패킷 보호를 설치하려면 설치 전에 최소한 하나의 어댑터 또는 어댑터 팀에서 IPSec 활성화 옵션을 선택해야 합니다.

이제 IPSec이 활성화되었습니다.

IPSec을 활성 해제하려면

네트워크 구성 요소 트리에서 팀 목록 또는 팀에 속하지 않는 어댑터 목록을 마우스 오른쪽 단추로 클릭한 다음 IPSec 활성화의 선택을 취소합니다.

Intel(R) PRO/100 S 어댑터의 암호화 오프로드

어댑터의 Intel(R) PRO/100 S 제품군은 IP 보안 트랜잭션의 암호화 처리를 오프로드할 수 있습니다. 어댑터는 암호화 처리를 처리하여 CPU 사용률을 줄입니다. 이 오프로드 기능을 활성화하려면 다음을 수행하십시오.

1.	Intel 패킷 보호를 사용하고 컴퓨터에서 Windows 2000이나 XP를 실행하는 경우에는 Microsoft Management Console을 사용하여 IP 보안을 활성화합니다.

2.	Intel PROSet의 네트워크 구성 요소 트리에서 IP 보안 암호화를 처리할 Intel PRO/100 S 어댑터를 선택합니다.

3.	고급 탭을 클릭합니다.

4.	설정 목록에서 오프로딩을 클릭합니다.

5.	값 상자에서 IP 보안을 선택합니다.

6.	확인을 클릭합니다.

이제 어댑터가 CPU의 암호화 처리를 오프로드할 수 있게 구성되었습니다.


GVRP 지원

워크스테이션 및 스위치는 GVRP(GARP VLAN Registration Protocol)를 사용하여 VLAN을 동적으로 작성, 변경 및 제거합니다. GVRP가 활성 상태인 스위치는 VLAN 구성원의 스위치 포트를 식별하고 VLAN의 상태를 추적할 수 있습니다.

요구 사항

네트워크에서 GVRP가 지원되도록 하려면 어댑터와 스위치 모두에서 GVRP가 활성화되어 있어야 합니다.

어댑터에서 GVRP를 활성화하려면

1.	네트워크 구성 요소 트리에서 최소한 하나의 VLAN이 있는 팀 구성된 어댑터 목록을 마우스 오른쪽 단추로 클릭합니다.

2.	GVRP 지원을 클릭합니다.
GVRP Support 대화 상자가 나타납니다.

3.	활성화됨을 클릭합니다.

4.	GVRP Join Time 드롭 다운 상자에서 스위치 GVRP LEAVE 명령과 PROSet GVRP Join 명령 사이의 수를 밀리초 단위로 입력합니다. 기본적으로 Intel(R) PROSet II는 Leave 명령을 실행하고 200 ms 후에 Join 명령을 실행합니다.

5.	확인을 클릭합니다.

이제 어댑터가 GVRP 가능 상태가 되었습니다.

문제 해결

다른 GVRP 구현이 있으므로 어댑터에서 GVRP를 활성화해도 네트워크 장치들 사이에서 GVRP 호환성을 보장할 수는 없습니다. GVRP가 제대로 작동하지 않는 것 같으면 어댑터에서 GVRP를 활성 해제하십시오.

참고: Intel PROSet II에서 팀 또는 VLAN을 여러 가지로 변경할 때 변경 사항을 적용하려면 변경할 때마다 매번 Intel PROSet II를 닫으십시오.  그런 다음 Intel PROSet II를 다시 열어 다음 내용을 변경합니다.


Windows NT 4.0 서비스 팩
Windows NT* 4.0 서비스 팩

Intel(R) PROSet와 대부분의 고급 팀 구성 기능을 사용하려면 Windows NT 4.0 설치를 서비스 팩 6a 이상으로 업데이트해야 합니다.

Microsoft 서비스 팩 정보는 http://www.microsoft.com/ntserver/로 이동하여 서비스 팩과 지침을 다운로드하십시오.


PRO/1000 데스크탑 어댑터 고급 설정

참고:  이러한 설정으로 변경하기 전에 네트워크 관리자에게 확인하십시오. 다른 네트워크 장치와 호환되지 않는 방법으로 고급 설정을 구성하면 어댑터나 시스템의 성능에 나쁜 영향을 미칠 수 있습니다.

적응 프레임 간의 간격

네트워크에서의 과도한 이더넷 패킷 충돌을 보상합니다. 기본적으로 이 설정은 0(기능을 활성 해제함)으로 설정됩니다.

권장 값(1)은 동적으로 네트워크 트래픽 조건에 맞도록 설정하므로 대부분의 컴퓨터와 네트워크에 적합합니다. 값이 1로 설정된 경우에만 동적 모드가 활성화됩니다. 그러나 드물게 간격 값을 수동으로 설정하여 성능을 향상시킬 수도 있습니다. 값을 설정하면 패킷들 사이에서 안정적인 간격으로 강제로 지정됩니다.

값을 증가시켜 전송되는 프레임 간의 지연 시간을 늘립니다.

지원되는 어댑터	모두
기본값	0: 활성 해제됨
범위	0-255
적응 링크 응답

어댑터에서 케이블이 분리되면 네트워크 연결에 필요한 시작 루틴을 생략하여 시스템 시작 속도를 높입니다. 이 기능은 컴퓨터를 시작하는 데 필요한 시간을 크게 줄여줍니다.

Intel 이더넷 컨트롤러의 적용 링크 응답이 활성화되고 네트워크 케이블이 RJ-45 포트에 연결되어 있지 않으면 네트워크 연결이 활성 해제됩니다. 장치 관리자의 네트워크 연결 다음에 노란색 주의 아이콘이 나타납니다.

네트워크 연결을 다시 활성화하려면 네트워크 케이블을 RJ-45 포트에 연결한 다음 컴퓨터를 다시 시작합니다.

지원되는 어댑터	일부 어댑터 모델에서는 사용할 수 없습니다.
기본값	오프
권장	온
범위	온, 오프
참고: 적응 링크 응답(ALR, Adaptive Link Response)은 무선 어댑터가 시스템에서 활성화되었을 때에는 작동하지 않습니다.

가속 시 가용 버퍼 수

가속 시 가용 버퍼 수를 사용자가 정의하는 방식으로 전송 성능을 최적화하여, 패킷 전송 전에 어댑터가 데이터 세그먼트를 추가할 수 있도록 합니다.

가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 구성해야 합니다. 가속 시 가용 버퍼 수 설정은 전송 설명자의 30 - 50% 이어야 합니다. 가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 수정하지 않으면 전송 성능이 향상되지 않을 수도 있습니다.

가속 시 가용 버퍼 수 설정을 이용하면 Windows NT 4.0 컴퓨터에서의 전송 성능이 크게 증가합니다. 또한 Windows 98 및 2000 컴퓨터에서도 전송 성능이 향상됩니다.

지원되는 운영 체제	Windows NT 4.0, 98, 2000, XP
지원되는 어댑터	모두
기본값	128
범위	16-768
고속 전송 완료

네트워크에서 패킷이 전송되기 전에 다시 사용하려면 전송 설명자를 비워 전송 성능을 최적화합니다.

•	고속 전송 완료가 활성 해제된 상태에서 전송 설명자를 다시 사용하려는 경우 어댑터는 패킷이 전송될 때까지 기다려야 합니다.

•	고속 전송 완료가 활성화된 상태에서는 어댑터가 전송 설명자를 곧바로 다시 사용하므로 어댑터가 전송 성능을 향상시킬 수 있습니다.

지원되는 어댑터	82544 기반. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	온
범위	온, 오프
흐름 제어

어댑터가 보다 효율적으로 트래픽을 조절할 수 있습니다.

•	수신 대기열이 미리 정의된 제한에 도달하면 어댑터가 흐름 제어 프레임을 생성합니다. 흐름 제어 프레임을 생성하면 전송자로 신호를 보내 전송 속도를 늦춥니다.

•	어댑터는 흐름 제어 프레임에 지정된 시간 동안 패킷 전송을 중지시켜 흐름 제어 프레임에 응답합니다.

어댑터가 패킷 전송 속도를 조정할 수 있도록 하여 흐름 제어가 패킷의 끊기는 현상을 막도록 도와줍니다.

참고: 이 기능에서 어댑터를 사용하려면 링크 파트너에서 플로우 제어 프레임을 지원해야 합니다.

지원되는 어댑터	82540 및 82544 기반 어댑터, 전송 및 수신.  해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	흐름 제어 프레임 생성 및 흐름 제어 프레임에 응답
범위	• 오프 • 흐름 제어 프레임을 전송합니다.  • 흐름 제어 프레임을 생성합니다.  • 흐름 제어 프레임을 생성하고 그에 응답합니다.  • 하드웨어 기본값입니다.
점보 프레임

점보 프레임 기능을 활성화 또는 활성 해제합니다. 점보 프레임은 각 프레임에 더 많은 데이터를 넣어 적은 수의 프레임이 전송되도록 하는 방식으로 처리량을 늘리고 CPU 사용률을 줄일 수 있습니다. 표준 이더넷 프레임 크기는 1514바이트이고 점보 프레임은 4088, 9014 또는 16128바이트를 포함할 수 있습니다.

네트워크에 있는 장치가 점보 프레임을 지원하고 동일한 프레임 크기를 사용하도록 구성된 경우에만 점보 프레임을 활성화하십시오. 다른 네트워크 장치에서 점포 프레임을 설정하면 네트워크 장치가 점보 프레임 크기를 다르게 계산합니다. 일부 장치는 다른 장치와 달리 프레임 크기에 헤더 정보를 포함합니다. Intel 어댑터는 프레임 크기에 헤더 정보를 포함하지 않습니다.

자세한 내용은 점보 프레임 항목을 참조하십시오.

지원되는 어댑터	모두
기본값	활성 해제됨
범위	(1514), 4088, 9014 및 16128을 활성 해제합니다(CRC에 대해 4바이트 높게 스위치를 설정하고 VLAN 또는 QoS 패킷 태그 지정 사용 시 4바이트 추가).  참고: 범위(1514-16128) 내에 있는 모든 값은 Windows 레지스트리 키 MaxFrameSize로 설정할 수 있습니다.
로컬 관리 주소

어댑터의 MAC 주소를 무시합니다. 새로운 네트워크 주소를 입력하려면 값 상자에 12자리 16진수를 입력합니다.

지원되는 어댑터	모두
기본값	없음
범위	0000 0000 0001 - FFFF FFFF FFFD 예외: • 멀티캐스트 주소(하이 바이트 중 가장 중요도가 적은 비트 = 1)는 사용하지 마십시오.  • 모두 0 또는 모두 F는 사용하지 마십시오. 존재하지 않음 설정: 어댑터의 원래 네트워크 주소로 되돌립니다.
Windows 98SE 사용자:

수동으로 할당된 주소를 사용한 후 기본 주소를 사용하려면 다음 절차 중 하나를 수행하십시오.

•	네트워크 속성 대화 상자의 고급 탭에서 로컬 관리 주소(LAA)를 선택하고 값을 0으로 변경합니다. 확인을 클릭하여 설정을 적용합니다.

•	Intel PROSet II에서 고급 탭을 클릭한 다음 기본값 복원을 클릭하거나 값 필드에서 모든 문자를 지웁니다. 확인을 클릭하여 설정을 적용합니다.

오프로드 수신 TCP 체크섬

어댑터가 들어오는 패킷의 TCP 또는 UDP 체크섬을 확인할 수 있도록 합니다.

•	오프로드가 활성 해제된 상태에서 운영 체제가 TCP 체크섬을 확인합니다.

•	오프로드가 활성화된 상태에서 어댑터가 운영 체제에 대한 확인을 완료합니다.

이 기능은 수신 성능을 향상시키고 CPU 사용률을 줄여줍니다.

지원되는 운영 체제	• Windows XP* • Windows 2000 • Windows 98에서는 오프로드를 지원하지 않습니다.
지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	• Windows* XP: 온 • Windows 2000: 오프
범위	온, 오프
오프로드 전송 IP 체크섬

어댑터가 나가는 패킷의 IP 체크섬을 계산할 수 있도록 합니다.

•	오프로드가 활성 해제된 상태에서 운영 체제가 IP 체크섬을 확인합니다.

•	오프로드가 활성화된 상태에서 어댑터가 운영 체제에 대한 확인을 완료합니다.

이 기능은 IP 전송 성능을 향상시키고 CPU 사용률을 줄여줍니다.

지원되는 운영 체제	• Windows XP* • Windows 2000 • Windows 98에서는 오프로드를 지원하지 않습니다.
지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	온
범위	온, 오프
오프로드 전송 TCP 체크섬

어댑터가 나가는 패킷의 TCP 또는 UDP 체크섬을 계산할 수 있도록 합니다.

•	오프로드가 활성 해제된 상태에서 운영 체제가 TCP 체크섬을 확인합니다.

•	오프로드가 활성화된 상태에서 어댑터가 운영 체제에 대한 확인을 완료합니다.

이 기능은 TCP 및 UDP 전송 성능을 향상시키고 CPU 사용률을 줄여줍니다.

지원되는 운영 체제	• Windows XP* • Windows 2000 • Windows 98에서는 오프로드를 지원하지 않습니다.
지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	온
범위	온, 오프 참고: 서버가 DOS 기반 클라이언트를 지원하면 이 기능을 오프로 설정합니다.
QoS 패킷 태그 지정

어댑터가 IEEE 802.3ac 태그 지정된 프레임을 송수신할 수 있도록 합니다. 그러한 태그는 다음과 같습니다.

•	우선순위 태그 지정된 패킷에 필요한 802.1p QoS(서비스 품질) 태그

•	VLAN에 필요한 802.1Q 태그

Intel PROSet II는 VLAN 설정 시 자동으로 802.1p 태그 지정을 활성화합니다.

지원되는 어댑터	82559 이상을 기반으로 하는 어댑터. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	오프
범위	온, 오프
수신 설명자

어댑터가 수신된 패킷을 메모리에 할당할 수 있도록 하는 데이터 세그먼트인 수신 설명자의 수를 정의합니다. 수신된 각 패킷에는 하나의 수신 설명자가 필요하며 각 설명자는 2KB의 메모리를 사용합니다.

수신된 트래픽의 성능이 크게 떨어지면 수신 설명자의 수를 늘릴 수도 있습니다. 수신 성능에 문제가 없으면 기본 설정 256을 사용합니다.

지원되는 어댑터	모두
기본값	160
범위	80-4096
TCP 세그먼트화 오프로드

어댑터 하드웨어가 데이터를 유효한 이더넷 프레임으로 세그먼트화할 수 있습니다.

•	TCP 세그먼트화가 활성 해제된 상태에서 운영 체제 소프트웨어는 전송하기 위해 어댑터로 보내기 전에 데이터를 세그먼트화합니다.

•	TCP 세그먼트화가 활성화된 상태에서 어댑터는 데이터를 프레임으로 세그먼트화합니다.

어댑터 하드웨어는 운영 체제 소프트웨어보다 더 빠르게 데이터 세그먼트화를 완료할 수 있기 때문에 이 기능을 이용하면 전송 성능을 크게 높일 수 있습니다. 또한 어댑터는 CPU 리소스를 더 적게 사용합니다.

지원되는 운영 체제	Windows XP
지원되는 어댑터	82544 및 82540-기반만. 해당 어댑터에 대한 도움말을 보려면 어댑터 사양 항목을 살펴봅니다.
기본값	1
범위	0 = 이 기능을 알리지 않음, 1 = 이 기능을 알림
전송 설명자

어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 설명자의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 설명자가 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 설명자의 수를 늘릴 수 있습니다. 전송 설명자의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 전송 설명자가 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 기본 설정 256을 사용합니다.

지원되는 어댑터	모두
기본값	256
범위	80-4096
링크 변경 시 깨우기

컴퓨터가 대기 모드에 있는 동안 네트워크가 연결되면 컴퓨터를 깨웁니다. 기능을 활성화 또는 비활성하거나 운영 체제가 기본 값 사용하도록 지정할 수 있습니다.

지원되는 운영 체제	Windows 9x, Windows 2000, Windows XP
범위	활성 해제됨, 강제 적용, OS 종속
기본값	활성 해제됨
설정 시 깨우기

이러한 설정은 운영 체제 또는 Intel PROSet에 의해 활성화되는 기능을 뜻합니다. 사용 중인 Windows 버전에 따라 기능이 다르게 수행되거나 전혀 지원되지 않습니다.

다음 Windows 버전에서 설정 시 깨우기를 지원합니다: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional 및 Windows Server 2003. 이 기능은 64-bit Itanium(R) 기반 시스템용 Windows Server 2003에서는 지원되지 않습니다.

설정 시 깨우기 활성화

Intel PROSet을 사용하여 어댑터가 사용하는 설정 시 깨우기를 구성할 수 있습니다. 설정 시 깨우기를 선택하기 전에 설정 시 깨우기를 사용하도록 운영 체제를 활성화해야 합니다. 이를 수행하려면 설명서를 참조하십시오.

설정 시 깨우기를 활성화하려면

6.	Intel PROSet에서 고급 탭을 클릭합니다.

7.	설정 목록 상자에서 설정 시 깨우기를 선택합니다.

8.	값 목록에서 해당 설정 시 깨우기를 선택합니다.

9.	확인 또는 적용을 클릭합니다.

10.	이러한 유형의 깨우기 패킷에 응답하는 어댑터의 경우 설정 시 깨우기를 사용하는 운영 체제를 활성화해야 합니다. 설정 시 깨우기를 활성화하려면 장치 관리자로 이동하고 이 장치가 절전 모드 상태의 컴퓨터를 해제시킬 수 있음 옵션을 활성화합니다.

사용 가능한 설정

다음 설정 시 깨우기 옵션을 Intel PROSet에서 사용할 수 있습니다.

설정	설명
활성 해제됨	어댑터가 설정 시 깨우기 옵션을 사용하지 않습니다.
매직 패킷 발견 시 깨우기	어댑터가 매직 패킷을 수신할 때 깨어나도록 합니다. 매직 패킷은 수신 어댑터의  이더넷 주소와 인접한 16개 복사본을 포함하는 패킷입니다. 이 기능을 구성하면 Intel PROSet에서 이 기능에 대한 운영 체제 값을 무시합니다.
유도 패킷 발생 시 깨우기	어댑터가 유도 패킷을 수신하면 깨어나도록 합니다. 이 패킷은 어댑터의 MAC 주소로 전송되는 유니캐스트 패킷입니다.  프로토콜은 드라이버에서 이 깨우기 방법을 활성화해야 합니다. 이 기능의 선택을 취소하면 드라이버가 이 깨우기 방법을 활성화하는 모든 프로토콜 요청을 무시합니다.
매직 패킷 및 유도 패킷 발견 시 깨우기	어댑터가 매직 패킷이나 유도 패킷을 수신할 때 깨어나도록 할 수 있습니다.
OS 제어 방식	운영 체제가 설정 시 깨우기 기능을 완벽하게 제어합니다.

참고: 여러 개의 IP 주소를 한 개의 어댑터용으로 구성할 경우 운영 체제는 구성된 모든 주소에 ARP 패턴 깨우기를 요청할 수도 있습니다. 어댑터는 목록의 첫번째 IP 주소를 쿼리하는 ARP 패킷에 대한 응답으로만 깨울 수 있습니다.

참고: 설정 시 깨우기에는 시스템을 종료(S5) 상태에서 깨우는 기능은 포함되지 않습니다. 이 상태는 PME 사용 설정으로 제어합니다. PME 사용 설정은 고급 탭에도 있습니다. 설정 시 깨우기가 비활성화되어 있는 경우 S5에서 깨어나는 기능은 PME 사용 설정으로 결정됩니다.

어댑터 드라이버가 활성화되어 있는 동안은 PME 설정이 적용됩니다. 그러나 드라이버가 비활성화되면 장치가 해당 설정을 하드웨어 기본값으로 되돌립니다. 이 기본값에 따라 종료 상태에서 컴퓨터를 깨울 수 있는지 여부가 결정됩니다.

기본값 복원 단추

이 단추는 현재 선택된 고급 설정을 해당 설정의 기본값으로 재설정합니다. 기본값은 위에 나열된 설정을 참조하십시오.  일부 설정에서는 이 옵션을 사용할 수 없습니다.


구성 저장 또는 복원
저장된 파일을 이용하여 Intel(R) PROSet 구성 복원

저장된 어댑터 고급 설정을 파일에 저장한 경우 해당 파일을 사용하여 사용자 정의 VLAN 및 팀 구성 설정을 복원할 수 있습니다. Intel PROSet 구성 복원은 IP 주소나 프로토콜 바인딩과 같은 운영 체제 고유의 네트워크 설정은 복원하지 않는다는 점에 유의하십시오.

시작하기 전에

설정 복원은 원래 설정을 만들었던 컴퓨터에서 수행해야 합니다. 그리고 컴퓨터에는 원래 저장한 구성과 동일한 네트워크 및 하드웨어가 설치되어 있어야 합니다. 예를 들어, 구성 파일이 저장될 때 컴퓨터가 Intel 기가비트 스위치에 연결되어 있었다면 구성을 복원할 때 역시 해당 컴퓨터가 동일한 스위치에 연결되어 있어야 합니다.

저장/복원 기능은 Windows NT*4.0, 2000, 98SE, Me 및 XP와 호환됩니다.

주의: 구성 파일은 편집하지 마십시오. 구성 파일을 수정하면 해당 파일을 사용할 수 없게 됩니다.

저장된 파일에서 어댑터 설정을 복원하려면

1.	도구 메뉴에서 구성 저장/복원을 클릭합니다.
저장/복원 대화 상자가 나타납니다.

2.	복원을 클릭합니다.
열기 대화 상자가 나타납니다.

3.	구성 파일을 저장했던 폴더로 이동하여 파일을 선택합니다.

4.	열기를 클릭합니다.
Intel PROSet은 저장된 설정을 표시합니다. 확인을 클릭해야 이러한 설정이 적용됩니다.

5.	필요하면 어댑터 구성을 변경합니다.

6.	확인을 클릭하여 Intel(R) PROSet II를 닫고 복원된 구성을 적용합니다.

참조:

구성 저장


팀에 어댑터 추가 시 주의 사항
팀에 어댑터 추가

팀을 만들 때 각 어댑터는 오직 하나의 팀 구성원이어야 합니다. 이러한 팀에는 Intel(R) PROSet에서 작성한 팀과 다른 구성 도구를 이용해서 작성한 팀이 포함됩니다. 같은 어댑터를 여러 팀에 추가하면 팀의 기능과 성능에 나쁜 영향을 미칠 수 있습니다.

•	Intel PROSet을 사용하여 팀을 작성한 경우 트리 보기를 통해 기존 팀 구성원을 식별합니다.

•	다른 구성 도구를 사용하여 팀을 작성한 경우 해당 도구로 팀 및 팀 구성원을 검토하여 어댑터가 이미 팀 구성원이 아닌지 확인합니다.

참조

팀에서 어댑터 제거

새 팀 만들기


PROSet II 탐색
Intel(R) PROSet II 탐색

Intel(R) PROSet II에는 다음과 같이 세 개의 탐색 영역이 있습니다.

•	메뉴

•	네트워크 구성 요소 트리

•	탭

메뉴에서는 다음을 수행할 수 있습니다.

•	작업 메뉴에서 팀 설정 또는 IP 보안 활성화

•	도구 메뉴에서 어댑터 VLAN 및 팀 구성 저장 또는 복원

•	온라인 도움말 시스템 사용 또는 Intel 지원 웹 사이트 엑세스

네트워크 구성 요소 트리에서 다음을 수행할 수 있습니다.

•	어댑터를 한 번 클릭하면 어댑터 상세 정보와 구성 설정이 표시됩니다.

•	마우스 오른쪽 단추로 어댑터를 클릭하여 팀을 설정하고 IPSec을 활성화합니다.

•	마우스 오른쪽 단추로 팀을 클릭하여 팀 설정 변경 또는 VLAN 설정

•	마우스 오른쪽 단추로 팀 구성원을 클릭하여 팀 어댑터 설정 변경

탭에서는 어댑터 모니터링 및 구성 작업을 수행할 수 있습니다.

트레이 아이콘

트레이 아이콘 표시 확인란을 사용하여 작업 표시줄의 시계 옆에 있는 Intel PROSet II 트레이 아이콘을 표시하거나 숨길 수 있습니다. 트레이 아이콘을 숨기려면 확인란의 선택을 취소하십시오.

Intel(R) PROSet II 트레이 아이콘 추가 정보


일반 정보

어댑터에 대한 일반 정보를 보려면 네트워크 구성 요소 트리에서 어댑터를 클릭합니다

일반 탭을 사용하여 다음을 수행할 수 있습니다.

•	기본 어댑터 정보 검토

•	케이블 기능 테스트
참고: 케이블 테스트는 선택된 어댑터에서만 수행할 수 있습니다.

•	어댑터 슬롯 위치 식별

•	추가 정보 보기


기본 어댑터 정보 검토

일반 탭에는 다음과 같이 네트워크 구성요소 트리에서 선택한 어댑터에 대한 정보가 들어 있습니다.

이더넷 주소	MAC 주소라고도 하는, 어댑터의 12자리 16진수 노드 주소입니다.
부품 번호	어댑터의 Intel 부품 번호입니다.
IP 주소	IPv4 프로토콜을 사용하는 경우 해당 어댑터의 TCP/IP 주소입니다.  여기서 IPv6 주소는 표시되지 않습니다.
네트워크 드라이버 상태	현재 선택한 어댑터에 대해 Intel 네트워크 드라이버가 로드되어 있는지 여부를 나타냅니다.
네트워크 상태	선택한 어댑터의 링크, 속도 및 이중성 상태를 나타냅니다. 네트워크 상태 그룹 상자의 필드는 어댑터에 따라 다르게 표시됩니다.  • 링크 LED: On은 어댑터 케이블이 유효한 허브 또는 스위치 포트에 연결되어 있다는 것을 나타내고, Off는 연결되어 있지 않다는 것을 나타냅니다. • 속도: 여기 나온 속도(10, 100 또는 1000)는 어댑터의 연결 속도를 나타냅니다. • 활동 LED: 어댑터가 활동 상태의 네트워크에 연결되면 깜박이며 Off는 활동 없음 또는 케이블 분리 상태를 나타냅니다. • 이중성: 전이중은 어댑터가 트래픽을 동시에 전송 및 수신하는 중임을 나타내며, 반이중은 어댑터가 전송 또는 수신 중임을 나타냅니다(트래픽 전송 및 수신이 동시에 이루어지지 않음).


속도 및 이중성 설정

기본적으로 Intel 어댑터는 속도 및 이중성 설정을 자동 협상합니다. 자동 협상을 사용하여 어댑터를 연결할 수 없는 경우 어댑터 및 링크 파트너에서 수동으로 속도 및 이중성 설정을 구성해야 할 수도 있습니다. 예를 들어, 스위치가 자동 협상을 지원하지 않거나 특정 속도 및 이중성이 구성되어 있는 경우 스위치 설정과 일치하도록 어댑터 속도 및 이중성을 수동으로 구성해야 합니다.

주의: 어댑터 속도 및 이중성 구성이 링크 파트너의 설정과 정확히 같지 않으면 네트워크 연결이 끊길 수도 있습니다.

자동 협상이 활성 해제된 경우 링크 속도 및 이중성에 대한 설정은 다음과 같습니다.

•	10 Mbps 또는 100 Mbps Full duplex(링크 파트너가 전이중로 설정되어야 함). 어댑터는 패킷을 동시에 전송 및 수신할 수 있습니다.

•	10 Mbps 또는 100 Mbps Half duplex(링크 파트너가 반이중로 설정되어야 함). 어댑터는 한 번에 전송 또는 수신 중 하나의 작업만 수행합니다.

속도 및 이중성 구성에 대한 자세한 내용을 보려면 해당 어댑터 제품군을 클릭하십시오.

•	Intel(R) PRO/1000 (구리)
참고: 광섬유 기반 Intel(R) PRO/1000 어댑터는 1000 Mbps 또는 전이중에서 작동합니다.

•	Intel(R) PRO/10 또는 PRO/100


PRO 10/100 링크 구성
속도 및 이중성 구성: Intel(R) PRO/10 및 PRO/100 어댑터

네트워크 구성요소 트리에서 구성하고자 하는 Intel(R) PRO/10 또는 PRO/100 어댑터를 클릭합니다.

1.	고급 탭을 클릭합니다.

2.	설정 목록에서 링크 속도 및 이중성을 클릭합니다.

3.	링크 속도 및 이중성 상자에서 어댑터와 해당 링크 파트너에 맞는 속도 및 이중성 모드를 클릭합니다.  링크 파트너의 속도 및 이중성 모드를 식별하는 방법에 대해서는 링크 파트너 설명서를 참조하십시오.

4.	확인을 클릭합니다.

5.	메시지가 나타나면 컴퓨터를 다시 시작하십시오.

이제 어댑터가 지정된 속도 및 이중성 설정으로 구성되었습니다.

주의: 어댑터 속도 및 이중성 구성이 연결된 장치의 설정과 정확하게 일치하지 않으면 네트워크 연결이 끊어졌거나 어댑터 성능이 저하된 것일 수 있습니다.


어댑터 고급 기능 구성

어댑터 고급 기능 구성을 보려면 다음 어댑터 유형 중에서 선택하십시오.

•	Intel(R) PRO/1000 데스크탑

•	Intel(R) PRO/1000 서버

•	Intel(R) PRO/100

•	Intel(R) PRO/100 VE 및 VM

•	Intel(R)PRO/10


스위치 오류 방지

스위치 고장 대비(SFT)를 사용하면 두 개의 팀 구성된 어댑터를 두 개의 스위치에 연결할 수 있습니다. 각 어댑터는 다음과 같이 별도의 스위치에 연결됩니다.

다음에서 오류가 발생하면 스위치 고장 대비 기능이 해당 오류를 감지할 수 있습니다.

•	팀 구성된 어댑터에서

•	팀 구성된 어댑터를 해당 스위치에 연결하는 케이블에서

•	어댑터에 연결된 스위치 포트에서

•	어댑터에 연결된 스위치에서

SFT 팀에서 한 어댑터는 주 어댑터이고 다른 어댑터는 보조 어댑터입니다. 정상적인 경우 보조 어댑터는 대기 모드 상태에 있습니다. 이 때 어댑터는 트래픽을 전송하거나 수신하지 않습니다. 주 어댑터의 연결이 끊어지면 보조 어댑터가 자동으로 주 어댑터를 대신합니다.

어댑터 속도	한 어댑터는 100Mbps에서 실행되고 다른 하나는 1000 Mbps에서 실행되는 식으로 속도가 혼합될 수 있습니다.
프로토콜	모두
네트워크 구성	• 각 어댑터는 다른 스위치에 연결됩니다 • 스패닝 트리를 활성화해야 합니다
참조:

팀 정보

팀 유형


외부 파일에 구성 저장
파일에 구성 저장

Intel(R) PROSet 팀 구성 및 VLAN 구성을 파일에 저장하고 나중에 Intel PROSet으로 복원할 수 있습니다. Intel PROSet 구성을 저장해도 IP 주소 또는 바운드 프로토콜과 같은 운영 체제 고유의 네트워크 설정은 저장되지 않는다는 점에 유의하십시오.

저장/복원 기능은 Windows NT* 4.0, 2000, 98SE, Me 및 XP와 호환됩니다.

참고: 특정 파일 이름으로 구성을 저장한 후에는 해당 파일 이름은 다시 사용할 수 없습니다. Intel PROSet 구성을 저장할 때마다 다른 이름을 사용해야 합니다.

Intel(R) PROSet 구성을 저장하려면

1.	도구 메뉴에서 구성 저장/복원을 클릭합니다.
저장/복원 대화 상자가 나타납니다.

2.	저장을 클릭합니다.
다른 이름으로 저장 대화 상자가 나타납니다.

3.	구성 파일을 저장하려는 폴더를 찾아 파일 이름을 입력합니다.

4.	저장을 클릭합니다.

5.	확인을 클릭합니다.

Intel PROSet 구성이 저장됩니다.

구성을 저장한 후에는 파일을 편집하거나 수정하지 마십시오. 구성 파일을 수정하면 해당 파일을 사용할 수 없게 됩니다.

참조

구성 복원


스위치 구성 테스트

스위치 구성 테스트를 실행하여 링크 파트너가 팀 구성 모드를 지원하도록 할 수 있습니다. 예를 들어, 어댑터가 Fast EtherChannel* 팀의 구성원일 경우 Intel(R) PROSet II는 어댑터에 연결된 링크 파트너가 링크 집계를 지원하는지 확인할 수 있습니다.

각 팀 모드의 요구 사항에 대한 자세한 내용은 팀 정보를 참조하십시오.

	주의: 이 테스트를 실행할 때 팀의 네트워크 연결이 일시적으로 끊길 수 있습니다.
참고: 다음과 같은 경우 이 테스트에서 오류를 감지하지 못합니다.

어댑터 구성	스위치 구성
동적 802.3ad	Any
VLAN 없는 링크 집계로 팀 구성 모드	다음 스위치 중 하나: • VLAN에 속하지 않음 • 태그 지정된 VLAN을 사용해서 구성됨
VLAN과 함께 링크 집계로 팀 구성 모드	스위치: • 어댑터에 구성된 VLAN에 속하지 않음, 그리고 • 정의된 링크 집계가 없음
스위치 구성 테스트를 실행하려면

1.	네트워크 구성요소 트리에서 테스트할 팀을 클릭합니다.
테스트를 실행하려면 팀에 최소한 두 개의 어댑터가 있어야 합니다.

2.	팀 구성 탭에서 팀 전환 구성을 클릭합니다.
스위치 구성 테스트 대화 상자가 나타납니다.

3.	테스트를 계속하려면 예를 클릭합니다.
팀이나 링크 파트너 구성 오류가 감지되면 문제 해결 탭이 나타납니다.

참고: 스패닝 트리 프로토콜(STP) 테스트에 필요한 시간 때문에 Intel(R) PROSet II는 STP가 네트워크에서 활성 상태인지 여부를 정확하게 표시하지 못할 수도 있습니다. 스위치는 다음과 같이 STP를 사용해서 구성해야 합니다.

•	SFT 팀에 대해 활성화

•	다른 모든 팀 모드에 대해 활성 해제됨(portfast)


제3자 법적 고지 사항
 * 다른 제품과 회사 이름은 해당 회사의 상표일 수 있으며 침해의 의도 없이 설명 전용으로만 사용되거나 소유자의 이익을 위해서만 사용됩니다.


전원 관리 구성
전원 사용 구성

절전 탭을 사용하여 어댑터 전원 사용을 구성할 수 있습니다. 어댑터가 절전 상태이면 10Mbps 속도에서 작동합니다.

이 기능을 지원하려면 어댑터가 다음 두 조건을 모두 만족해야 합니다.

•	속도를 자동 협상하도록 구성되어야 합니다.

•	속도 자동 협상이 가능한 링크 파트너에 연결되어 있어야 합니다.

100 Mbps에서 작동하도록 어댑터 속도가 강제로 설정되어 있거나 링크 파트너가 10 Mbps에서 작동하지 않는 경우 어댑터에서 절전 기능을 사용할 수 없습니다.

일부 컴퓨터에서는 컴퓨터를 재부팅한 후 절전 옵션이 저장되지 않습니다. 설정이 저장되지 않은 경우 절전 탭 위쪽에 임시 절전이 표시됩니다. Windows XP 또는 Windows Server 2003을 실행하는 모든 시스템에서 이러한 설정은 저장되지 않습니다,컴퓨터를 재부팅한 후 설정이 변경되지 않으면 위쪽에 절전 설정 텍스트가 표시됩니다.

참고: 절전 기능이 활성화되면 Intel(R) PRO/100 M 어댑터가 어댑터 처리 주기를 늦춥니다. 이 기능은 Intel PRO/100 M 어댑터의 전원 소비를 훨씬 감소시킬 수 있습니다. 다른 Intel PRO/100 어댑터는 절전 기능을 사용해도 처리 주기가 늦춰지지 않습니다.

절전 탭에서 다음을 사용자 정의할 수 있습니다.

•	전체 어댑터 전원 사용. 전체 전원 사용량을 구성할 때 어댑터는 활성 상태인 동안 이 설정을 유지합니다. 어댑터가 활성 해제되면 전원 설정은 저장되지 않습니다.

•	대기 모드에서 전원 사용. 컴퓨터가 대기 상태일 때 어댑터는 자동으로 전원을 절약하고 10 Mbps 속도로 작동합니다. 컴퓨터를 부팅하는 사이에 Intel PROSet II에서 이 설정을 보존합니다.

•	Windows* XP에서 배터리 작동 중 전원 사용. 컴퓨터에서 배터리를 사용하면 어댑터는 자동으로 전원을 절약하고 10 Mbps 속도로 조정합니다. 컴퓨터를 부팅하는 사이에 Intel PROSet II에서 이 설정을 보존합니다.

지원되는 어댑터	Intel(R) PRO/100 어댑터
지원되는 운영 체제	• 대기 모드에서 전체 전원 사용 또는 전원 사용을 정의할 경우 Windows* 98, 2000, XP, Me 및 NT* • 컴퓨터가 배터리로 작동되는 컴퓨터의 전원 사용을 정의할 경우 Windows XP
기본값	기본적으로 어댑터는 속도와 전이중 설정을 유지하는 데 필요한 표준 전원량을 소비합니다.  어댑터가 절전 상태가 되면 작동 속도가 10 Mbps로 바뀌어 어댑터에서 처리하는 전체 트래픽의 양이 줄어듭니다.
어댑터 전원 사용을 구성하려면

1.	네트워크 구성요소 트리에서 전원 사용량을 구성할 어댑터를 클릭합니다.
어댑터가 전원 관리를 지원하면 절전 탭이 나타납니다.

2.	전체 전원 사용량을 줄이려면 낮은 전력을 사용하고 속도를 10Mbps로 교섭을 클릭한 다음 적용을 클릭합니다. 어댑터는 활성 상태인 동안 이 설정을 유지합니다.
표준 전원량을 사용하고 기본 속도 설정에서 작동할 수 있게 어댑터를 구성하려면 표준 전원량을 사용하고 원래 속도 재개를 클릭한 다음 적용을 클릭합니다.

3.	컴퓨터가 대기 모드일 때 어댑터가 소비하는 전원량을 줄이려면 대기중 낮은 전력 사용을 클릭합니다.

4.	어댑터가 Windows XP 컴퓨터에서 실행 중인 경우 컴퓨터에서 배터리를 사용하면서 절전 설정을 정의할 수도 있습니다. 컴퓨터에서 배터리를 사용 중일 때 어댑터가 소비하는 전원량을 줄이려면 대기중 낮은 전력 사용을 클릭합니다.

5.	확인을 클릭하여 전원 구성을 적용합니다.


로드 균형 조정 수신

적응 로드 균형 조정(ALB) 팀을 사용해서 수신 로드 균형 조정(RLB)을 활성화하거나 활성 해제할 수 있습니다. 다음과 같은 경우에는 항상 RLB 옵션을 사용할 수 있습니다.

•	적응 로드 균형 조정(ALB) 팀의 고급 설정 탭에서

•	팀 구성 마법사를 사용하여 ALB 팀을 작성할 때

RLB를 활성 해제하면 주 어댑터만 트래픽을 수신합니다. 모든 어댑터는 나가는 트래픽(Tx)의 로드를 조정합니다.

RLB가 활성 상태이면 트래픽은 팀 구성원들 간의 속도 차이에 따라 다르게 분산됩니다.

•	동일한 속도의 팀에서 모든 어댑터는 IP 트래픽을 전송 및 수신합니다. 주 어댑터에서 라우트되지 않은(layer�2) 트래픽을 통과합니다.

•	여러 속도가 혼합된 팀에서는 연결 속도가 가장 빠른 팀 구성원이 들어오는(Rx) IP 트래픽의 로드 균형을 조정하며 모든 어댑터가 나가는(Tx) IP 트래픽의 로드 균형을 조정합니다. 주 어댑터에서 라우트되지 않은(layer�2) 트래픽을 통과합니다.
참고: RLB가 활성화된 상태에서 Intel(R) PROSet II는 자동으로 기본 설정 주 어댑터 를 선택합니다. 어댑터를 주 또는 보조 어댑터로 지정하면 기본 선택을 무시할 수 있습니다.

참조:

팀 정보

새 팀 만들기


PRO/100 VE 및 VM 어댑터 고급 설정
Intel(R) PRO/100 VE 및 VM 어댑터 고급 설정

고급 탭에 나열된 설정을 사용하여 어댑터가 버퍼, 전원 관리 및 기타 기능을 처리하는 방법을 사용자 정의할 수 있습니다. 다음과 같은 몇 가지 기능은 실행 중인 운영 체제와 설치된 특정 어댑터에 따라 사용하지 못할 수도 있습니다.

고급 설정

적응 프레임 간의 간격

네트워크에서의 과도한 이더넷 패킷 충돌을 보상합니다.  기본적으로 이 설정은 0(기능을 활성 해제함)으로 설정됩니다.

권장 값(1)은 동적으로 네트워크 트래픽 조건에 맞도록 설정하므로 대부분의 컴퓨터와 네트워크에 적합합니다. 값이 1로 설정된 경우에만 동적 모드가 활성화됩니다. 그러나 드물게 간격 값을 수동으로 설정하여 성능을 향상시킬 수도 있습니다. 값을 설정하면 패킷들 사이에서 안정적인 간격으로 강제로 지정됩니다.

값을 증가시켜 전송되는 프레임 간의 지연 시간을 늘립니다.

지원되는 어댑터	모두
기본값	0: 활성 해제됨
범위	0-255
적응 링크 응답

어댑터에서 케이블이 분리되면 네트워크 연결에 필요한 시작 루틴을 생략하여 시스템 시작 속도를 높입니다. 이 기능은 컴퓨터를 시작하는 데 필요한 시간을 크게 줄여줍니다.

Intel 이더넷 컨트롤러의 적용 링크 응답이 활성화되고 네트워크 케이블이 RJ-45 포트에 연결되어 있지 않으면 네트워크 연결이 활성 해제됩니다. 장치 관리자의 네트워크 연결 다음에 노란색 주의 아이콘이 나타납니다.

네트워크 연결을 다시 활성화하려면 네트워크 케이블을 RJ-45 포트에 연결한 다음 컴퓨터를 다시 시작합니다.

지원되는 어댑터	모바일 제품에만 사용됩니다. 일부 어댑터 모델에서는 사용할 수 없습니다.
기본값	오프
권장	온
범위	온, 오프
참고: 적응 링크 응답(ALR, Adaptive Link Response)은 무선 어댑터가 시스템에서 활성화되었을 때에는 작동하지 않습니다.

가속 시 가용 버퍼 수

가속 시 가용 버퍼 수를 사용자가 정의하는 방식으로 전송 성능을 최적화하여, 패킷 전송 전에 어댑터가 데이터 세그먼트를 추가할 수 있도록 합니다.

가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 구성해야 합니다. 가속 시 가용 버퍼 수 설정은 전송 설명자의 30 - 50% 이어야 합니다. 가속 시 가용 버퍼 수 설정을 전송 설명자 설정에 맞게 수정하지 않으면 전송 성능이 향상되지 않을 수도 있습니다.

가속 시 가용 버퍼 수 설정을 이용하면 Windows NT 4.0 컴퓨터에서의 전송 성능이 크게 증가합니다. 또한 Windows 98 및 2000 컴퓨터에서도 전송 성능이 향상됩니다.

기본값	8
권장 값	8
범위	1-32
로컬 관리 주소

어댑터의 MAC 주소를 무시합니다. 새로운 네트워크 주소를 입력하려면 값 상자에 12자리 16진수를 입력합니다.

기본값	없음
범위	0000 0000 0001 - FFFF FFFF FFFD 예외: • 멀티캐스트 주소(하이 바이트 중 가장 중요도가 적은 비트 = 1)는 사용하지 마십시오.  • 모두 0 또는 모두 F는 사용하지 마십시오.
Windows 98SE 사용자:

수동으로 할당된 주소를 사용한 후 기본 주소를 사용하려면 다음 절차 중 하나를 수행하십시오.

•	네트워크 속성 대화 상자의 고급 탭에서 로컬 관리 주소(LAA)를 선택하고 값을 0으로 변경합니다. 확인을 클릭하여 설정을 적용합니다.

•	Intel PROSet II에서 고급 탭을 클릭한 다음 기본값 복원을 클릭하거나 값 필드에서 모든 문자를 지웁니다. 확인을 클릭하여 설정을 적용합니다.

PCI 버스 효율성

어댑터에서 가장 적합한 패킷 전송 방법을 사용하거나 항상 패킷을 병합하도록 할 수 있습니다.

•	PCI 버스 효율성 기능이 활성 해제되면 어댑터는 가능한 최고 성능을 제공하는 전송 방법을 사용합니다. 병합 패킷이 최고의 전송 성능을 제공할 경우 어댑터는 자동으로 패킷을 병합합니다.

•	PCI 버스 효율성 기능이 활성화되면 어댑터에서 강제로 패킷을 병합합니다.

패킷 전송 성능에 문제가 없으면 PCI 버스 효율성 기능을 활성 해제됨으로 설정합니다. 언더런의 수가 많거나 PCI 버스에 성능 문제가 있을 경우 이 값을 활성화됨으로 설정합니다.

기본값	활성 해제됨
범위	활성화됨, 활성 해제됨
수신 버퍼

프로토콜 메모리에 데이터를 복사할 때 드라이버에서 사용하는 버퍼의 수를 지정합니다.

네트워크 로드가 큰 경우 수신 버퍼를 늘리면 성능을 향상시킬 수 있습니다. 이 경우 드라이버에 사용되는 시스템 메모리의 양을 늘려야 하는 단점이 있습니다. 그 밖의 경우 이 값을 수정하면 시스템 성능이 떨어질 수 있습니다.  사용자가 이러한 점을 잘 판단해서 값을 결정해야 합니다.

기본값	48
권장 값	• Windows 98, Windows Me, Windows 2000 및 Windows XP의 단일 어댑터: 48 • Windows NT의 단일 어댑터: 32 • 팀 구성된 어댑터: 250
범위	8-1024
프레임 간의 재전송 간격

프레임 재전송 사이의 지연 시간을 늘립니다. 충돌 후 어댑터가 프레임을 재전송하는 데 사용하는 내장 이더넷 알고리즘이 있더라도 네트워크에 비정상적으로 많은 수의 충돌이 있는 경우 지연 시간을 늘려 네트워크 성능을 향상시킬 수 있습니다.

지원되는 어댑터	모두
기본값	6
범위	6-15
전송 제어 블록

어댑터가 시스템 메모리의 전송 패킷을 추적할 수 있도록 하는 데이터 세그먼트인 전송 제어 블록의 수를 정의합니다. 각 전송 패킷에는 패킷 크기에 따라 한 개 또는 그 이상의 전송 제어 블록이 필요합니다.

전송 성능 문제가 발생할 가능성이 있다고 판단되면 전송 제어 블록의 수를 늘릴 수 있습니다. 전송 제어 블록의 수를 늘려 전송 성능을 향상시킬 수도 있지만 그렇게 하면 제어 블록이 시스템 메모리를 사용하게 됩니다. 전송 성능에 문제가 없으면 권장 값 32을 사용합니다.

기본값	16
권장 값	32
범위	8-64
링크 변경 시 깨우기

컴퓨터가 대기 모드에 있는 동안 네트워크가 연결되면 컴퓨터를 깨웁니다. 기능을 활성화 또는 비활성하거나 운영 체제가 기본 값을 사용하도록 지정할 수 있습니다.

지원되는 운영 체제	Windows 9x, Windows 2000, Windows XP
범위	활성 해제됨, 강제 적용, OS 종속
기본값	활성 해제됨
설정 시 깨우기

이 설정에 대해 운영 체제 또는 Intel(R) PROSet II에서 활성화되는 기능을 참조하십시오. 사용 중인 Windows 버전에 따라 기능이 다르게 수행되거나 전혀 지원되지 않습니다.

•	다음 Windows 버전에서 설정 시 깨우기를 지원합니다. Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	다음 Windows 버전에서 설정 시 깨우기를 지원하지 않습니다. Windows 98 retail 및 Windows NT 4.0.

참고: Intel(R) PRO/100+ 관리, 서버 어댑터 및 Intel(R) PRO/100 S 어댑터에서만 설정 시 깨우기를 지원합니다.

운영 체제에서 설정 시 깨우기 활성화

다음 유형의 깨우기 패킷을 사용하려면 운영 체제에서 설정 시 깨우기 기능이 활성화되어 있어야 합니다.

•	ARP 시 깨우기

•	유도 패킷 발생 시 깨우기

•	NBT 쿼리 시 깨우기

어댑터에서 이러한 유형의 깨우기 패킷에 응답하려면 설정 시 깨우기를 사용할 수 있도록 운영 체제를 활성화해야 합니다. 설정 시 깨우기를 활성화하려면 장치 관리자에서 검색하여 이 장치가 절전 모드 상태의 컴퓨터를 해제시킬 수 있음 옵션을 활성화합니다. 이 옵션을 찾으려면 다음을 수행하십시오.

1	시작 > 제어판을 클릭합니다.
제어판 창이 열립니다.

2	시스템을 두 번 클릭합니다.
시스템 대화 상자가 나타납니다.

3	하드웨어 탭을 클릭한 다음 장치 관리자 단추를 클릭합니다
장치 관리자 창이 열립니다.

4	설정 시 깨우기를 사용할 어댑터를 두 번 클릭합니다.
속성 대화 상자가 나타납니다.

5	전원 관리 탭을 클릭합니다.

6	이 장치가 절전 모드 상태의 컴퓨터를 해제시킬 수 있음을 클릭하여 어댑터에 대해 설정 시 깨우기를 활성화합니다.

사용 가능한 설정

다음 설정 시 깨우기 옵션을 Intel PROSet II에서 사용할 수 있습니다.

설정	설명
Disabled	어댑터가 설정 시 깨우기 옵션을 사용하지 않습니다.
매직 패킷 발생 시 깨우기	어댑터가 매직 패킷을 수신할 때 깨어나도록 합니다. 매직 패킷은 수신 어댑터의  이더넷 주소와 인접한 16개 복사본을 포함하는 패킷입니다. 이 기능을 구성하면 Intel PROSet II에서 이 기능에 대한 운영 체제 값을 무시합니다.
유도 패킷 발생 시 깨우기	어댑터가 유도 패킷을 수신하면 깨어나도록 합니다. 이 패킷은 어댑터의 MAC 주소로 전송되는 유니캐스트 패킷입니다.  반드시 프로토콜이 이 드라이버의 깨우기 방법을 활성화하여야 합니다. 이 기능을 선택하지 않으면 드라이버가 이 깨우기 방법을 활성화하려는 프로토콜의 요청을 무시하게 됩니다.
매직 및 유도 패킷 발생 시 깨우기	어댑터가 매직 패킷이나 유도 패킷을 수신할 때 깨어나도록 할 수 있습니다.
OS 제어 방식	운영 체제가 설정 시 깨우기 기능을 완벽하게 제어합니다.

참고: 여러 개의 IP 주소를 한 개의 어댑터용으로 구성할 경우 운영 체제는 구성된 모든 주소에 ARP 패턴 깨우기를 요청할 수도 있습니다. 어댑터는 목록의 첫번째 IP 주소를 쿼리하는 ARP 패킷에 대한 응답으로만 깨울 수 있습니다.

참고: 설정 시 깨우기에는 시스템을 종료(S5) 상태에서 깨우는 기능은 포함되지 않습니다. 이 상태는 PME 사용 설정으로 제어합니다. PME 사용 설정은 고급 탭에도 있습니다. 설정 시 깨우기가 비활성화되어 있는 경우 S5에서 깨어나는 기능은 PME 사용 설정으로 결정됩니다.

어댑터 드라이버가 활성화되어 있는 동안은 PME 설정이 적용됩니다. 그러나 드라이버가 비활성화되면 장치가 해당 설정을 하드웨어 기본값으로 되돌립니다. 이 기본값에 따라 종료 상태에서 컴퓨터를 깨울 수 있는지 여부가 결정됩니다.


팀 유형

Intel(R) PROSet II에서 다음과 같은 팀을 구성할 수 있습니다.

•	AFT(어댑터 고장 대비)

•	SFT(스위치 고장 대비)

•	ALB(적응 로드 균형 조정) 수신 로드 균형 조정(RLB)을 포함합니다.

•	FEC */ LA / 802.3ad: 정적

•	GEC* / LA / 802.3ad: 정적

•	IEEE 802.3ad: 동적

어댑터 고장 방지

기능	• 장애 조치 어댑터의 자동 중복을 제공합니다. 주 어댑터가 실패하면 보조 어댑터가 대신 작동합니다.
네트워크 구성	• 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 스패닝 트리는 활성 해제해야 합니다. • 모든 유형의 스위치가 지원됩니다.
스위치 고장 방지

기능	• 장애 조치 어댑터가 각각 다른 스위치에 연결된 경우 두 어댑터 사이에 장애 조치 관계를 만듭니다.
네트워크 구성	• 각 어댑터는 다른 스위치에 연결됩니다. • 스패닝 트리를 활성화해야 합니다.
어댑터 로드 균형 조정 (ALB)

기능	• 장애 조치 • 전송 로드 균형 조정 • IP 트래픽(옵션)의 수신 로드 균형 조정(RLB)
네트워크 구성	• 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 모든 유형의 스위치가 지원됩니다.

FEC/ LA/ 802.3ad: 정적

기능	• 장애 조치 • 전송 로드 균형 조정 • 로드 균형 조정 수신
네트워크 구성	• 모든 어댑터는 100 Mbps 속도에서 작동해야 합니다. • 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 다음과 같은 링크 집계를 처리할 수 있는 스위치에서 사용해야 합니다. • PAgP 프로토콜을 사용하는 Cisco FEC 가능 스위치 • 링크 집계 가능한 Intel Express(R) 스위치 • 정적 802.3ad가 가능한 기타 스위치
GEC/ LA/ 802.3ad: 정적

기능	• 장애 조치 • 전송 로드 균형 조정 • 로드 균형 조정 수신
네트워크 구성	• 모든 어댑터가 1000 Mbps 속도에서 작동해야 합니다. • 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 다음과 같은 링크 집계를 처리할 수 있는 스위치에서 사용해야 합니다. • PAgP 프로토콜을 사용하는 Cisco GEC 가능 스위치 • 링크 집계 가능한 Intel Express 스위치 • 정적 802.3ad가 가능한 기타 스위치
IEEE 802.3ad: 동적

기능	• 장애 조치 • 전송 로드 균형 조정 • 로드 균형 조정 수신
네트워크 구성	• 팀 구성원은 다른 속도로 작동할 수 있습니다. • 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 어댑터에 연결된 스위치는 IEEE 802.3ad 표준을 완벽하게 지원해야 합니다.
참조:

팀 정보


진단 로그
진단 로그 설정

Intel PROSet은 진단 로그에 진단 테스트 및 전송자/응답자 테스트에서 얻은 정보를 저장합니다.

로그를 구성하려면

1.	레지스트리 편집기를 엽니다. 시작 > 실행을 클릭합니다. 열기 상자에 regedit를 입력합니다.
레지스트리 편집기가 열립니다.

2.	HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation 레지스트리 키로 이동합니다.

3.	레지스트리 매개변수를 수정합니다.

작업	이름	기본값	가능한 값
진단 로깅 활성화 또는 활성 해제	활성화	1: 활성화	1: 활성화 0: 활성 해제
로그 파일 위치	FilePath	System32	시스템에서의 유효한 경로
Intel PROSet이 로그에 있는 기존 정보를 유지할지 또는 삭제할지 여부를 정의합니다.	FileAppend	1: 활성화	1: 기존 로그에 정보 추가 0: 사용자가 진단 또는 전송자/응답자 테스트를 실행할 때마다 기존 정보를 삭제합니다.
로그의 파일 크기(바이트 단위) 설정	MaxFileSize	36 kb	로그에 포함될 수 있는 정보의 크기(바이트 단위)입니다.
4.	로그 구성을 모두 변경한 후에는 레지스트리 편집기를 닫습니다.


진단: 개요
진단 개요

Intel(R) PROSet II에서는 세 가지 종류의 진단 테스트를 수행할 수 있습니다.

•	진단 테스트에서는 어댑터 상태에 대한 기본적인 분석을 제공합니다.  기본 진단 테스트를 실행하면 Intel PROSet이 I/O 충돌, 메모리 오류,  EEPROM 작동 가능성, 전송/수신 기능 및 링크를 검사합니다.

•	케이블 테스트에서는 케이블의 길이, 극성 및 기타 케이블 속성에 대한 정보를 제공합니다.

•	전송자 응답자 테스트에서는 네트워크에서의 어댑터 기능을 분석할 수 있습니다. 이 테스트는 두 대의 컴퓨터를 실행해야 하는 보다 고급 테스트입니다.

Intel PROSet에 테스트 결과가 나타납니다. 또한 Intel PROSet은 진단 로그 파일에 진단 테스트와 전송자 응답자 테스트의 결과를 저장합니다. 자세한 내용은 진단 로그 설정을 참조하십시오.


어댑터 사양

컨트롤러	보드 ID 번호	제품 이름(커넥터)	Intel 부품 번호
82545EM	A92165-xxx	PRO/1000 MT 서버 어댑터	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT 이중 포트 서버 어댑터	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MF 서버 어댑터	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF 서버 어댑터(LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF 이중 포트 서버 어댑터	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT 데스크탑 어댑터	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T 데스크탑	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF 서버 어댑터	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI 서버 어댑터	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT 서버 어댑터	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T 서버 어댑터	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F 기가비트 서버 어댑터	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 기가비트 서버 어댑터	PWLA8490
82562	A19716-xxx	PRO/100 VE 데스크탑 어댑터	CNLA6000
82550	A78921-xxx	PRO/100 M 데스크탑 어댑터	A69928-01
82550	751767-xxx	PRO/100 S 데스크탑(TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S 서버(TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S 이중 포트 서버	PILA8472C3
82559	741462-xxx	PRO/100+ PCI(TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI 관리 어댑터(TP)	PILA8460B
82559	748566-xxx	PRO/100 S 관리(TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S 관리(TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100 어댑터	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI 어댑터(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4(TP)	PILA8475B
82559	351360	PRO/100 EISA(TP)	EILA8265
82559	351361-xxx	PRO/100 PCI(TP)	PILA8465
82559	651538-xxx	PRO/100 ISA(TP)	PCLA8560
82559	670666-xxx	PRO/100 모바일 PC 카드(TP)	MBLA1600
82559	670667-xxx	PRO/100 모바일 CardBus(TP)	MBLA3200
82559	687755-xxx	PRO/100 모바일 LAN+Modem56 PC 카드(TP)	MBLA1656
82559	748568-xxx	PRO/100 S 서버(TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S 서버(TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI(TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI 관리 어댑터	PILA8900
82558	701738-xxx	PRO/100+ PCI 관리 어댑터(TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ 이중 포트 서버 어댑터	PILA8472
82559	729757-xxx	PRO/100+ 서버 어댑터(TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI 서버 어댑터(TP)	PILA8470


FEC
FEC* /LA/802.3ad: 정적

Fast EtherChannel/링크 집계 팀은 다음과 같은 방법으로 처리량을 늘릴 수 있습니다.

•	어댑터 구성. 팀에 구성원을 추가하여 처리량을 늘릴 수 있습니다. 팀은 최고 8개의 어댑터로 구성될 수 있습니다. 각 서버는 최고 4개의 팀과 함께 작동할 수 있습니다.

•	트래픽 분석. 소프트웨어는 계속해서 각 팀 구성원에 대한 전송 로드를 분석한 후 필요하면 어댑터 간의 로드 균형을 조정합니다. 스위치 로드는 수신 트래픽의 균형을 조정합니다.

또한 FEC 팀은 고장 대비 기능을 제공합니다. 팀에서 어댑터 오류가 생기면 보조 어댑터가 대신 작동합니다.

링크 집계 팀 정보

어댑터 속도	모든 어댑터는 동일한 속도로 작동해야 합니다.
네트워크 구성	• 모든 어댑터는 100 Mbps 속도에서 작동해야 합니다. • 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 다음과 같은 링크 집계를 처리할 수 있는 스위치에서 사용해야 합니다. • PAgP 프로토콜을 사용하는 Cisco FEC 가능 스위치 • 링크 집계 가능한 Intel Express(R) 스위치 • 정적 802.3ad가 가능한 기타 스위치
프로토콜	모두

참조:

팀 정보

팀 유형


GEC
GEC* /LA/802.3ad: 정적

Gigabit EtherChannel/링크 집계 팀은 다음과 같은 방법으로 처리량을 늘립니다.

•	어댑터 구성. 팀에 구성원을 추가하여 처리량을 늘릴 수 있습니다. 팀은 최고 8개의 어댑터로 구성될 수 있습니다. 각 서버는 최고 4개의 팀과 함께 작동할 수 있습니다.

•	트래픽 분석. 소프트웨어는 계속해서 각 팀 구성원에 대한 전송 로드를 분석한 후 필요하면 어댑터 간 로드 균형을 조정합니다. 스위치 로드는 수신 트래픽의 균형을 조정합니다.

또한 GEC 팀은 고장 대비 기능을 제공합니다. 팀에서 어댑터 오류가 생기면 보조 어댑터가 대신 작동합니다.

링크 집계 팀 정보

어댑터 속도	모든 어댑터는 동일한 속도로 작동해야 합니다.
네트워크 구성	• 모든 어댑터는 100 Mbps 속도에서 작동해야 합니다. • 모든 어댑터는 동일한 스위치에 연결해야 합니다. • 다음과 같은 링크 집계를 처리할 수 있는 스위치에서 사용해야 합니다. • PAgP 프로토콜을 사용하는 Cisco GEC 가능 스위치 • 링크 집계 가능한 Intel Express(R) 스위치 • 정적 802.3ad가 가능한 기타 스위치
프로토콜	모두

참조:

팀 정보

팀 유형


네트워크 어댑터 전원 관리자 비활성화

1. Windows 데스크톱에서 내 컴퓨터를 오른쪽 마우스로 클릭합니다.

2. 속성을 클릭합니다.

3. 장치 관리자 탭을 클릭합니다.

4. 네트워크 어댑터 아이콘을 두번 누릅니다.

5. 인텔 네트워크 어댑터를 두 번 누릅니다.

6. 전원 관리자 탭이 보이면, 클릭하고 컴퓨터가 절전을 위해 이 장치를 사용하지 않기 확인 상자가 선택되지 않았다는 것을 확인합니다.

7. 확인을 클릭합니다. 이제 진단을 실행할 수 있습니다.

진단을 실행한 후에는, 단계 6의 확인 상자를 다시 선택하여도 됩니다.