Copyright: Intel® PROSet Help Version 1013
Citation: Copyright © Intel Corporation 2003. All rights reserved.


De kabel testen

De knop Kabel testen wordt weergegeven op het tabblad Algemeen wanneer voor de adapter die is geselecteerd in het overzicht van de netwerkcomponenten een van de volgende uitspraken geldt:

•	De adapter is een op 82550 gebaseerde Intel(R) PRO/100 S Server- of Desktopadapter zonder verbinding met het netwerk

•	De adapter is een Intel(R) PRO/1000-adapter

De kabeltest uitvoeren op Intel PRO/100-adapters:

Klik op het tabblad Algemeen op Kabel testen. De test kan een aantal minuten duren.

De resultaten van de test worden weergegeven op het tabblad Problemen oplossen.

De kabeltest uitvoeren op Intel PRO/1000-adapters:

Controleer voor u de kabeltest uitvoert, of de adapter werkt op 1000 Mbps. De kabeltest kan ook worden uitgevoerd wanneer de adapter werkt op 100 Mbps, maar in dat geval zal mogelijk niet alle informatie nauwkeurig of beschikbaar zijn.

Klik op het tabblad Algemeen op Kabel testen. De test kan een aantal minuten duren.

De resultaten van de test worden weergegeven in het dialoogvenster Resultaten van kabeltest. De volgende informatie verschijnt.

Kabellengte: hier wordt een schatting gegeven van de lengte van de kabel tussen de adapter en de verbindingspartner. Als de gerapporteerde kabellengte afwijkt van de werkelijke lengte van de kabel, kan dit betekenen dat er een breuk in de kabel zit. De schatting kan tot 10 meter afwijken van de werkelijke lengte.

Polariteit: identificeert de polariteit (+/-) van de twisted pair-draden in een Ethernet-kabel die worden gebruikt voor zenden en ontvangen. Als deze eigenschappen niet goed zijn ingesteld, zal de adapter de fout automatisch corrigeren en de fout rapporteren.

Status lokale ontvanger: geeft aan of de kabel-connector die is aangesloten op de adapter in staat is verkeer te verwerken. Als het resultaat van de lokale test negatief is, controleert u de connector op breuken en verkeerde bedrading.

Status ontvanger op afstand: geeft aan of de kabelconnector die is aangesloten op de verbindingspartner door een set tests is gekomen. Als het resultaat van de test negatief is, controleert u de connector op breuken en verkeerde bedrading.

Aantal ontvangstfouten: ontvangstfouten doen zich voor wanneer de adapter een onherkenbare transmissie detecteert in de kabel.
Het aantal ontvangstfouten zal altijd omhoog gaan wanneer de adapter de communicatie met het netwerk tot stand brengt (wanneer de kabel wordt aangesloten op de adapter of wanneer de computer opnieuw wordt gestart) of wanneer de adapter opnieuw wordt gestart na automatisch onderhandelen. Als het aantal ontvangstfouten binnen vijf minuten in de buurt komt van 65.000, is er een probleem met de kwaliteit van de verbinding. Als zich problemen met de kwaliteit van de verbinding voordoen, kunt u proberen om de kabel opnieuw aan te sluiten of om een andere kabel te gebruiken.

Aantal fouten door inactiviteit: fouten door inactiviteit doen zich voor wanneer de adapter een onherkenbare transmissie ontvangt via de kabel. In tegenstelling tot ontvangstfouten, worden fouten door inactiviteit ook gedetecteerd wanneer de adapter geen pakketten ontvangt.
Fouten door inactiviteit zullen altijd optreden wanneer de adapter de communicatie met het netwerk tot stand brengt (wanneer de kabel wordt aangesloten op de adapter of wanneer de computer opnieuw wordt gestart) of wanneer de adapter opnieuw wordt gestart na automatisch onderhandelen. Als het aantal fouten door inactiviteit binnen een minuut 255 is, is er een probleem met de kwaliteit van de verbinding. Als zich problemen met de kwaliteit van de verbinding voordoen, kunt u proberen om de kabel opnieuw aan te sluiten of om een andere kabel te gebruiken.

MDI-/MDIX-status: geeft aan of een kabel die is aangesloten op de adapter een straight-through configuratie (MDI) of een crossover (MDIX) configuratie heeft. Gebruik MDI wanneer u een systeem aansluit op een switch of hub en MDIX wanneer u twee systemen met elkaar verbindt.

OPMERKING: welke informatie wordt weergegeven in het dialoogvenster Resultaten van kabeltest, is afhankelijk van het adaptertype.


Juridisch

Copyright © 2002, Intel Corporation. 	Alle rechten voorbehouden.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

Intel Corporation aanvaardt geen aansprakelijkheid voor fouten of omissies in dit document. Evenmin neemt Intel de verplichting op zich om de informatie in dit document bij te werken.

* Andere namen en merken kunnen de eigendom zijn van anderen.


Geavanceerde instellingen voor PRO/1000-serveradapters

Met de instellingen op het tabblad Geavanceerd kunt u wijzigingen aanbrengen in de manier waarop de adapter omgaat met gecodeerde QoS-pakketten, jumbo-frames, offloading en andere mogelijkheden. De beschikbaarheid van de hieronder genoemde voorzieningen, is afhankelijk van het besturingssysteem dat u gebruikt en de soort adapters die geïnstalleerd zijn.

Geavanceerde instellingen

Adaptieve afstand tussen frames

Biedt compensatie bij veel conflicten tussen Ethernet-pakketten in het netwerk.  De standaardinstelling is 0, waarmee deze voorziening wordt uitgeschakeld.

De aanbevolen instelling (1) werkt het best voor de meeste computers en netwerken. Met deze instelling wordt de afstand dynamisch aangepast aan het netwerkverkeer. Deze dynamische modus is alleen actief als de waarde 1 ingesteld is. In sommige gevallen is het mogelijk dat u een beter prestatieniveau kunt krijgen door de afstand handmatig in te stellen. Wanneer u een waarde instelt, forceert u daarmee een statische afstand tussen pakketten.

Een hogere waarde betekent een langere tijd tussen de frames die worden verzonden.

Ondersteunde adapters	Alle
Standaardwaarde	0: uitgeschakeld
Bereik	0-255

Adaptief antwoord koppeling

Hiermee wordt het opstarten van het systeem versneld wanneer de kabel niet is aangesloten op de adapter, door het overslaan van opstartroutines waarvoor een verbinding met het netwerk vereist is. Het opstarten gaat hierdoor aanzienlijk sneller.

Als adaptief antwoord koppeling is ingeschakeld voor Intel Ethernet-controllers en er geen netwerkkabel is aangesloten op de RJ-45-poort, wordt de netwerkverbinding uitgeschakeld. Er verschijnt een geel waarschuwingspictogram naast de netwerkverbinding in Apparaatbeheer.

Als u de netwerkverbinding opnieuw wilt inschakelen, moet u de netwerkkabel aansluiten op de RJ-45-poort en de computer opnieuw opstarten.

Ondersteunde adapters	Niet beschikbaar op elk adaptermodel.
Standaardwaarde	Uit
Aanbevolen	Aan
Bereik	Aan, Uit
OPMERKING: Adaptieve verbindingsrespons (Adaptive Link Response - ALR) werkt niet als een draadloze adapter actief is in het systeem.

Coalesce-buffers

Hiermee worden de transmissieprestaties verbeterd door het aantal coalesce-buffers aan te passen. Deze buffers maken het voor de adapter mogelijk gegevenssegmenten samen te voegen voordat pakketten worden verzonden.

Als het aantal coalesce-buffers wordt gewijzigd, moet ook de instelling van Verzend-descriptors worden aangepast. Coalesce-buffers moet worden ingesteld op 30 - 50% van Verzend-descriptors. Als de instelling van het aantal coalesce-buffers niet wordt aangepast aan het aantal verzend-descriptors, is het mogelijk dat de transmissieprestaties niet verbeteren.

Met coalesce-buffers kunnen de transmissieprestaties aanzienlijk worden verbeterd voor computers met Windows NT 4.0. De transmissieprestaties kunnen ook worden verbeterd voor computers met Windows 98 en 2000.

Ondersteunde adapters	Alle
Standaardwaarde	128
Bereik	16-768

PME inschakelen

Hiermee worden de Wake on-mogelijkheden van de adapter ingeschakeld of uitgeschakeld op computers die oudere implementaties van geavanceerd energiebeheer hebben. Met Wake on ingeschakeld kan de adapter uit stand-by of uitgeschakeld worden gehaald door bepaalde typen pakketten, zoals ARP-pakketten.

•	Wanneer u deze voorziening uitschakelt, worden alle Wake on-instellingen op computers met oudere implementaties van energiebeheer uitgeschakeld.

•	Wanneer u de voorziening inschakelt, kan de adapter reageren op Wake on-signalen. Als u de adapter zo wilt configureren dat deze reageert op specifieke pakketsoorten, raadpleegt u de informatie over de Wake on-instellingen verderop in dit bestand.

•	Met de waarde Hardwarestandaard wordt de adapter gedwongen om de Wake on-mogelijkheden te configureren op basis van de systeemhardware.

•	De waarde Geen actie schakelt u voor de adapter de standaardinstelling van het besturingssysteem in.

Als u alle Wake on-instellingen wilt uitschakelen, stelt u deze optie in op Uitgeschakeld. Is dat niet het geval, dan gebruikt u de waarde Geen actie.

Ondersteunde adapters	Adapters gebaseerd op 82559. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Voltooiing snel verzenden

Optimaliseert de transmissieprestaties door verzend-descriptors vrij te maken voor hergebruik, voordat pakketten worden verzonden over het netwerk.

•	Als Voltooiing snel verzenden is uitgeschakeld, moet de adapter wachten totdat pakketten verzonden zijn om verzend-descriptors opnieuw te kunnen gebruiken.

•	Als Voltooiing snel verzenden is ingeschakeld, kan de adapter de verzend-descriptors sneller opnieuw gebruiken, waardoor de transmissieprestaties van de adapter verbeteren.

Ondersteunde adapters	Op 82543 en 82544-gebaseerde adapters. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Aan
Bereik	Aan, Uit
Datatransportbesturing

Stelt de adapter in staat om transportbesturingsframes te verzenden of te ontvangen. De transmissie wordt gepauzeerd gedurende de tijd die is opgegeven in het ontvangen transportbesturingsframe. Met deze instellingen kunnen de netwerkprestaties beter worden afgestemd, doordat voorkomen wordt dat pakketten verloren gaan.

Ondersteunde adapters	Adapters gebaseerd op 82542, alleen verzending. Op 82540, 82543 en 82544 gebaseerde adapters, verzending en ontvangst.  Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Ingeschakeld
Bereik	Uit, Antwoorden, Genereren, Genereren en Antwoorden, Hardwarestandaard
Jumbo-frames

OPMERKING: Jumbo-frames worden alleen ondersteund met een snelheid van 1000 Mbps. Als u jumbo-frames gebruikt met een snelheid van 10 of 100 Mbps, kan dit een negatieve invloed hebben op de prestaties of kan de verbinding worden verbroken.

Hiermee schakelt u het gebruik van jumbo-frames in of uit. Jumbo-frames kunnen de doorvoercapaciteit vergroten en het CPU-gebruik verminderen door meer gegevens in elk frame te plaatsen, waardoor minder frames hoeven te worden verzonden. Standaard bevat een Ethernet-frame 1514 bytes, terwijl jumbo-frames 4088, 9014 of 16128 bytes kunnen bevatten.

U kunt jumbo-frames alleen inschakelen als alle apparaten in het netwerk jumbo-frames ondersteunen en zijn geconfigureerd voor het gebruik van frames van dezelfde grootte. Wanneer u het gebruik van jumbo-frames instelt voor andere netwerkapparaten, moet u er wel rekening mee houden dat apparaten de omvang van jumbo-frames op verschillende manieren kunnen berekenen. Sommige apparaten rekenen de header-informatie mee in de omvang van frames en andere niet. Intel adapters rekenen header-informatie niet mee in de omvang van frames.

Zie Jumbo-frames voor meer informatie.

Ondersteunde adapters	Alle
Standaardwaarde	Uitgeschakeld
Bereik	Uitgeschakeld (1514), 4088, 9014 en 16128 bytes. (Stel de switch 4 bytes hoger in voor CRC, plus 4 bytes als u gebruik maakt van VLAN's.)  OPMERKING: elke waarde in het bereik 1514-16128 kan worden ingesteld in het Windows-register met de parameter MaxFrameSize.
Lokaal beheerd adres

Hiermee wordt het MAC-adres van de adapter uitgeschakeld. Als u een nieuw netwerkadres wilt opgeven, typt u een hexadecimaal getal van 12 cijfers in het vak Waarde.

Ondersteunde adapters	Alle
Standaardwaarde	Geen
Bereik	0000 0000 0001 - FFFF FFFF FFFD Uitzonderingen: • Gebruik geen multicast-adres (Minst significante bit van de hoge byte = 1).  • Gebruik niet alleen nullen of alleen de letter F. Geen instelling: hiermee wordt het oorspronkelijke netwerkadres van de adapter weer hersteld.
OPMERKING:  in een team gebruikt Intel(R) PROSet II een van de volgende twee adressen:

•	Het lokaal beheerde adres van het team als een lokaal adres is geconfigureerd, of

•	Het permanente MAC-adres van de primaire adapter als voor het team geen lokaal beheerd adres is geconfigureerd

Intel PROSet II maakt geen gebruik van het lokaal beheerde adres van een adapter als de adapter de primaire adapter in een team is en er voor het team een lokaal beheerd adres is opgegeven.

Gebruikers van Windows 98 SE:

Als u het standaardadres wilt gebruiken nadat u een handmatig toegewezen adres hebt gebruikt, moet u een van de volgende procedures uitvoeren:

•	Selecteer Lokaal beheerd adres op het tabblad Geavanceerd van het dialoogvenster Netwerkeigenschappen en wijzig vervolgens de waarde in 0. Klik op OK om deze instelling toe te passen.

•	Klik op het tabblad Geavanceerd in Intel PROSet II, klik vervolgens op Standaardinstellingen herstellen of wis alle tekens in het veld Waarde. Klik op OK om de instelling toe te passen.

Gebeurtenis verbindingsstatus vastleggen

Deze instelling wordt gebruikt om het vastleggen van wijzigingen in de verbindingsstatus in of uit te schakelen. Als deze instelling is ingeschakeld, wordt bij een gebeurtenis voor het tot stand brengen of het verbreken van de verbinding een bericht gegenereerd dat wordt weergegeven in het systeemgebeurtenislogboek. Beheerders kunnen het bericht over de gebeurtenis bekijken in het systeemgebeurtenislogboek.

De volgende gebeurtenissen worden vastgelegd.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Ondersteunde adapters	Alle
Standaardwaarde	Enable
Bereik	Inschakelen, Uitschakelen
Offload TCP-controlesom ontvangst

Hiermee wordt de adapter in staat gesteld om de TCP- of UDP-controlesom van binnenkomende pakketten te verifiëren.

•	Als offloading uitgeschakeld is, verifieert het besturingssysteem de TCP-controlesom.

•	Als offloading ingeschakeld is, voert de adapter de verificatie uit voor het besturingssysteem.

Met deze voorziening worden de ontvangstprestaties verbeterd en het CPU-gebruik verminderd.

Ondersteunde besturingssystemen	• Windows XP* • Windows 2000 • Offloading wordt niet door Windows 98 ondersteund.
Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	• Windows* XP: Aan • Windows 2000: Uit
Bereik	Aan, Uit
Offload TCP-segmentatie

Hiermee wordt de adapterhardware in staat gesteld om gegevens te segmenteren in geldige Ethernet-frames.

•	Als de TCP-segmentatie uitgeschakeld is, segmenteert het besturingssysteem de gegevens alvorens die naar de adapter te verzenden voor transmissie.

•	Als de TCP-segmentatie ingeschakeld is, segmenteert de adapter de gegevens in frames.

Omdat de adapterhardware de segmentatie van gegevens veel sneller kan uitvoeren dan het besturingssysteem, gaan met deze voorziening de transmissieprestaties aanzienlijk vooruit. Bovendien gebruikt de adapter minder CPU-bronnen.

Ondersteunde besturingssystemen	Windows XP
Ondersteunde adapters	Adapters gebaseerd op 82544. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	1
Bereik	0 = deze voorziening niet adverteren; 1 = deze voorziening adverteren.
Offload IP-controlesom transmissie

Hiermee wordt de adapter in staat gesteld om de IP-controlesom van uitgaande pakketten te berekenen.

•	Als offloading uitgeschakeld is, verifieert het besturingssysteem de IP-controlesom.

•	Als offloading ingeschakeld is, voert de adapter de verificatie uit voor het besturingssysteem.

Met deze voorziening worden de IP-transmissieprestaties verbeterd en het CPU-gebruik verminderd.

Ondersteunde besturingssystemen	• Windows XP* • Windows 2000 • Offloading wordt niet door Windows 98 ondersteund.
Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Aan
Bereik	Aan, Uit
Offload TCP-controlesom transmissie

Hiermee wordt de adapter in staat gesteld om de TCP- of UDP-controlesom van uitgaande pakketten te berekenen.

•	Als offloading uitgeschakeld is, verifieert het besturingssysteem de TCP-controlesom.

•	Als offloading ingeschakeld is, voert de adapter de verificatie uit voor het besturingssysteem.

Met deze voorziening worden de TCP- en UDP-transmissieprestaties verbeterd en het CPU-gebruik verminderd.

Ondersteunde besturingssystemen	• Windows XP* • Windows 2000 • Offloading wordt niet door Windows 98 ondersteund.
Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Aan
Bereik	Aan, Uit OPMERKING: stel deze voorziening in op Uit als de server ondersteuning biedt voor op DOS gebaseerde clients.
Codering QoS-pakketten

Hiermee wordt de adapter in staat gesteld om gecodeerde IEEE 802.3ac-frames te verzenden en te ontvangen. Het gaat daarbij om:

•	802.1pIEEE_802.1p QoS-codes (Quality of Service) die vereist zijn voor pakketten met gecodeerde prioriteit en

•	802.1Q-codes die vereist zijn voor VLAN's

Intel PROSet II schakelt automatisch de 802.1p-codering in wanneer u een VLAN instelt.

Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Uit
Bereik	Aan, Uit
Receive-descriptors

Hier definieert u het aantal receive-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om ontvangen pakketten toe te wijzen aan geheugen. Voor elk ontvangen pakket is een receive-descriptor vereist en elke descriptor neemt 2KB geheugen in beslag.

U kunt ervoor kiezen om het aantal receive-descriptors te verhogen als u denkt dat de prestaties bij ontvangst van gegevens een duidelijke verslechtering vertonen. Als de ontvangstprestaties geen probleem vormen, gebruikt u de standaardwaarde die geschikt is voor de adapter.

Controller op adapter	Standaardwaarde	Bereik
Gebaseerd op 82542	160	80 – 768
Gebaseerd op 82543	160	80 – 256
Gebaseerd op 82544	160	80 – 2048
Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.

Verzend-descriptors

Hier definieert u het aantal verzend-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer verzend-descriptors, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal verzend-descriptors te verhogen. Het vergroten van het aantal verzend-descriptors kan leiden tot betere transmissieprestaties, maar de descriptors leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de standaardwaarde 256.

Controller op adapter	Standaardwaarde	Bereik
Gebaseerd op 82542	256	80 – 768
Gebaseerd op 82543	256	80 – 256
Gebaseerd op 82544	256	80 – 2048
Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.

Wake on Verbindingswijziging

Haalt de computer uit stand-by als een netwerkverbinding wordt gemaakt. Deze voorziening kan in- of uitgeschakeld zijn, of de besturingssysteem kan de standaardwaarde gebruiken.

Ondersteunde besturingssystemen	Windows 9x, Windows 2000, Windows XP
Bereik	Uitgeschakeld, geforceerd, OS afhankelijk
Standaardwaarde	Uitgeschakeld

Wake on-instellingen

Deze instellingen hebben betrekking op voorzieningen die kunnen worden geactiveerd door het besturingssysteem of met Intel PROSet. Het is afhankelijk van de versie van Windows die u gebruikt, hoe deze voorzieningen werken en of ze ondersteund worden.

In de volgende versies van Windows worden wel Wake on-instellingen ondersteund: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional en Windows Server 2003. Deze voorziening wordt niet ondersteund onder Windows Server 2003 voor systemen met 64-bits Itanium(R)-processoren.

Wake On-instellingen inschakelen

Gebruik Intel PROSet om de Wake on-instellingen voor de adapter te configureren. Voordat u de Wake On-instellingen selecteert, moet u het gebruik van de Wake On-instellingen inschakelen in het besturingssysteem. Raadpleeg hiervoor de instructies.

Ga als volgt te werk om Wake On-instellingen in te schakelen:

1.	Klik in Intel PROSet op het tabblad Geavanceerd.

2.	Selecteer Wake on-instellingen in de keuzelijst Instelling.

3.	Klik op de relevante Wake On-instelling in de keuzelijst Waarde.

4.	Klik op OK of Toepassen.

5.	Als u wilt dat de adapter reageert op deze typen Wake on-pakketten, moet het gebruik van Wake on-instellingen worden ingeschakeld in het besturingssysteem. Als u Wake on-instellingen wilt inschakelen, gaat u naar Apparaatbeheer en schakelt u de optie Dit apparaat mag de computer uit stand-by halen in.

Beschikbare instellingen

De volgende Wake on-instellingen zijn beschikbaar in Intel PROSet:

Instelling	Beschrijving
Uitgeschakeld	Adapter gebruikt geen Wake on-instellingen.
Wake on Magic Packet	Hiermee kan de adapter uit stand-by komen wanneer een Magic Packet wordt ontvangen. Een Magic Packet is een pakket dat 16 aaneengesloten exemplaren bevat van het Ethernet-adres van de ontvangende adapter. Wanneer u deze voorziening configureert, zal Intel PROSet de waarde van het besturingssysteem voor deze voorziening uitschakelen.
Wake on Gericht pakket	Hiermee kan de adapter uit stand-by komen wanneer de adapter een Gericht pakket ontvangt. Dit is een unicast-pakket dat is verzonden naar het MAC-adres van de adapter.  Het protocol moet deze Wake-methode inschakelen in het stuurprogramma. Als u de deze voorziening uitschakelt, zal het stuurprogramma verzoeken om deze Wake-methode in te schakelen, negeren.
Wake on Magic en Gericht pakketten	Hiermee kan de adapter opstarten wanneer een Magic pakket of een Gericht pakket wordt ontvangen.
Gecontroleerd door besturingssysteem	Geeft het besturingssysteem de volledige controle over Wake on-instellingen.

OPMERKING: als meerdere IP adressen geconfigureerd zijn voor één adapter, kan het besturingssysteem Wake up on ARP-patronen aanvragen voor alle geconfigureerde adressen. De adapter wil alleen opstarten in respons tot ARP-pakketten die een query versturen naar het eerste IP-adres in de lijst.

OPMERKING: Wake on-instellingen kunnen de computer niet opstarten als die uitgeschakeld staat (S5). Dit staat is geconfigureerd door de PME-inschakelen instelling op de tab Geavanceerd. Zelfs als de Wake on-instellingen uitgeschakeld zijn, wordt opstarten van S5 bepaald door de PME-inschakelen instelling.

Als het adapter stuurprogramma ingeschakeld is, blijven de PME-instellingen van kracht. Als het stuurprogramma uitgeschakeld is, echter, gaat het apparaat terug naar de standaardwaarde, die de computer wel of niet opstart als die uitgeschakeld staat.

Standaardinstellingen herstellen

Met deze knop worden de standaardwaarden hersteld voor de geselecteerde geavanceerde instelling.  De standaardwaarden voor de instellingen worden hierboven genoemd.  (Deze optie is niet beschikbaar voor alle instellingen.)


Stuurprogramma-informatie
Netwerkstuurprogramma

Gedetailleerde informatie over het stuurprogramma van een adapter weergeven

1.	Klik in Overzicht van de netwerkcomponenten op de adapter waarvoor u gedetailleerde informatie wilt zien.

2.	Klik op het tabblad Stuurprogramma.

De volgende informatie verschijnt.

Stuurprogramma informatie:

Naam	Bestandsnaam van het stuurprogramma dat momenteel is geladen.
Versie	Versienummer van het stuurprogramma. Dit nummer hebt u nodig wanneer u nieuwe versies wilt downloaden van de Intel website voor ondersteuning: http://support.intel.com
Beschrijving	Naam van het stuurprogramma.
Copyright	Juridische informatie
Stuurprogramma statistieken:

OPMERKING: de onderstaande statistische gegevens worden op 0 ingesteld wanneer u het stuurprogramma laadt of bijwerkt.

Verzonden pakketten	Aantal verzonden pakketten
Ontvangen pakketten	Aantal ontvangen pakketten
Verzendfouten	Aantal verzonden pakketten met fouten
Ontvangstfouten	Aantal ontvangen pakketten met fouten
OPMERKING: om de laatste versie van stuurprogramma's te krijgen, klikt u op Help > Ondersteuning. Klik vervolgens op de ondersteuningspagina op De meest recente stuurprogramma's ophalen.


Diagnose
Diagnostische tests

Met de diagnoses voor de adapter kunt u de algehele conditie van de adapter analyseren. Bij het uitvoeren van een diagnose controleert Intel PROSet II op I/O-conflicten, geheugenfouten, EEPROM-werking, verzend- en ontvangstfunctionaliteit en verbindingen.

De resultaten van de diagnostische tests worden weergegeven op het tabblad Diagnose, maar worden ook opgeslagen in een systeemlogboek.

OPMERKING:  Als op uw computer Windows 98 wordt uitgevoerd, moet u mogelijk de functie Power Management voor uw adapter uitschakelen voordat u het diagnoseprogramma kunt uitvoeren. Raadpleeg hiervoor Power Management voor netwerkadapter uitschakelen.

Afzonderlijke tests

Naam test	Beschrijving	Informatie over probleemoplossing
Beheerregisters	Controleert op conflicten in het I/O-adres en test de toegankelijkheid van de registers. Bij deze test worden alle algemene registers, ontvangstregisters en verzendregisters betrokken. Maar het beheer-/gegevensregister voor het EEPROM wordt niet getest.	Als de test Beheerregisters een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.
FIFO-registers	Test het FIFO-geheugen op de adapter door patronen te schrijven naar en te lezen van het FIFO-geheugen.	Als de test FIFO-registers een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.
EEPROM	Verifieert de integriteit van gegevens die worden gelezen van het EEPROM. Deze test voert een schrijf- en een leesbewerking uit op het EEPROM en vergelijkt de resultaten op consistentie.	Als de test EEPROM een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.
Interrupt	Gebruikt de Interrupt-registers om te bevestigen dat alle interrupts van de adapter werken.	Als de test Interrupt een negatief resultaat heeft, probeert u de interrupt-instellingen in het BIOS te wijzigen. Als met het wijzigen van de instellingen het probleem niet wordt verholpen, probeert u de adapter naar een andere sleuf te verplaatsen.
Loopback	Test de mogelijkheid van de adapter om pakketten te verzenden en te ontvangen door pakketten naar zichzelf te zenden. Deze test maakt gebruik van zowel de modus MAC-loopback als de modus Transceiver-loopback. (Niet beschikbaar op Intel(R) PRO/1000 T-adapter.)	Als de test Loopback een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.
Verbinding	Bevestigt dat de adapter is verbonden met een geldige partner.	Als de test Verbinding een negatief resultaat heeft, controleert u of de kabel goed is aangesloten op de adapter en op de verbindingspartner. Als de kabel goed is aangesloten, probeert u de kabel aan te sluiten op een andere poort op de verbindingspartner of probeert u een andere kabel.
OPMERKING: als een diagnostische test wordt uitgevoerd en u op Stop klikt, treedt een korte vertraging op voordat de test wordt stopgezet. Wanneer de tests stop zijn gezet, is de knop OK weer beschikbaar.

Overige instellingen

Knop Geavanceerd: Klik op deze knop om een netwerktest van het type Zender/Responder op te zetten.

Waarschuwing: de test Zender/Responder is niet ontworpen om te worden uitgevoerd terwijl het systeem in de stand-bystand of  de slaapstand staat, of terwijl de kabel niet is aangesloten op de computer.


Configuratie en status team
Teamconfiguratie

Gedetailleerde informatie over de teamconfiguratie bekijken:

Klik in het Overzicht van de netwerkcomponenten op het team waarvoor u gedetailleerde informatie wilt zien.

Het tabblad Teamconfiguratie wordt geopend.

In het statusvak Adapters in team vindt u de volgende informatie:

Adapter

Naam van elke adapter die lid is van het team.

Prioriteit

De prioriteitsstatus voor de adapters in het team (als u een prioriteit hebt opgegeven). Binnen een team kan een adapter een primaire of een secundaire prioriteit hebben.

Een adapter opgeven als primair of secundair

In de kolom Status vindt u de volgende informatie:

•	Actief: de adapter geeft netwerkverkeer door.

•	Als dit een team met fouttolerantie is, is er maar één adapter (de primaire voorkeursadapter) actief.

•	In dynamische 802.3ad-modus hebben de adapters die deel zijn van de actieve aggregator de status Actief.

•	Standby: stand-by wordt ondersteund door teams met fouttolerantie, SFT-teams en dynamische 802.3ad-teams. Een adapter in de standbystand heeft wel een verbinding met het netwerk, maar is niet actief bezig met het doorgeven van netwerkverkeer.

•	Uitgeschakeld: de adapter is verwijderd of uitgeschakeld of het stuurprogramma kon niet worden geladen. Ook als de kabel gebreken vertoont of de verbinding niet beschikbaar is, is de status van de adapter Uitgeschakeld.

In de sectie Teamgegevens vindt u de volgende informatie:

•	Ethernet-adres: het primaire MAC-adres voor het team.

•	IP-adres: het IP-adres voor het team.

•	Type team: de teammodus.

Test Switchconfiguratie knop

U kunt controleren of verbindingspartners de gekozen teammodus voor adapters ondersteunen, door de test Switchconfiguratie uit te voeren. Als de adapter, bijvoorbeeld, lid is van een team met verbindingsaggregatie, kan Intel (R) PROSet II verifiëren dat de verbindingspartners die zijn aangesloten op de adapter, verbindingsaggregatie ondersteunen.

Zie Info over teaming voor specifieke informatie over de vereisten voor elke teammodus.

Wanneer deze test wordt uitgevoerd, wordt de verbinding van het team met het netwerk tijdelijk verbroken.

OPMERKING: met deze test worden geen fouten gevonden, wanneer een van de volgende scenario's van kracht is.

Adapterconfiguratie	Switchconfiguratie
Adapterteam in modus verbindingsaggregatie zonder VLAN's	Voor de switch geldt de volgende: • De switch behoort niet bij een VLAN • De switch is geconfigureerd met gecodeerde VLAN's
Adapterteam in modus verbindingsaggregatie met VLAN's	Voor de switch geldt: • De switch behoort niet bij het VLAN dat is geconfigureerd op de adapter, en • Voor de switch is verbindingsaggregatie niet gedefinieerd
De test Switchconfiguratie uitvoeren:

1.	Klik in het Overzicht van de netwerkcomponenten op het team dat u wilt testen.
Om de test uit te voeren, moeten er tenminste twee adapters lid zijn van het team.

2.	Klik op het tabblad Teamconfiguratie op Test switchconfiguratie.
Het dialoogvenster Test switchconfiguratie verschijnt.

3.	Klik op Ja om door te gaan met de test.
Als team of verbindingspartner configuratie fouten gedetecteerd zijn, het tabblad Probleemoplossing verschijnt.

OPMERKING:   Gezien de tijd die nodig is om Spanning Tree Protocol (STP) te testen, is het mogelijk dat Intel PROSet II niet nauwkeurig aangeeft of STP ingeschakeld is in het netwerk. Zorg ervoor dat switches zijn geconfigureerd met STP:

•	Ingeschakeld voor SFT-teams

•	Uitgeschakeld voor alle andere teammodi


VLAN
Overzicht VLAN's

Een VLAN is een logische netwerkgroepering waarmee u netwerkverkeer kunt isoleren, zodat leden van het VLAN alleen verkeer ontvangen van andere leden. Met VLAN's kunt u computers groeperen in logische werkgroepen, een belangrijke overweging wanneer u clients verbindt met servers die zijn verspreid over het gebouw, het bedrijfsterrein of het bedrijfsnetwerk.

Door in het netwerk gebruik te maken van VLAN's, kunt u het volgende bereiken:

•	Broadcast-stormen beperken

•	Het toevoegen, verplaatsen en wijzigen van netwerkverbindingen verbeteren

•	Beveiligingsproblemen verminderen

•	Beheertaken vereenvoudigen

Soorten VLAN's

Er wordt onderscheid gemaakt tussen op switches gebaseerde VLAN's, ook wel impliciete VLAN's genoemd, en op codes gebaseerde VLAN's, ook wel expliciete VLAN's genoemd.

•	Impliciete VLAN's maken gebruik van voorzieningen van de switch, zoals het poortnummer, het MAC-adres en andere functies van Layer 2. Het standaard-VLAN op de meeste switches, inclusief de meeste Cisco*-producten, is een impliciet VLAN. Impliciete VLAN's worden alleen geconfigureerd op de switch. De switch hoeft geen pakketten te wijzigen of coderen om een impliciet VLAN af te dwingen. Alle Intel-adapters kunnen deelnemen in impliciete VLAN's.

•	In Expliciete VLAN's wordt een code van vier bytes (802.3ac) toegevoegd aan elke pakketheader. Elk IEEE-VLAN moet in het gehele netwerk worden ingesteld, dus ook op de adapter en alle verbindingspartners.

Vereisten

De vereisten voor VLAN's zijn:

•	Switches in het netwerk die ondersteuning kunnen bieden voor 802.1Q-VLAN's

•	Adapters die ondersteuning kunnen bieden voor 802.1Q-VLAN's, zoals:

o	Intel® PRO/100+

o	Intel® PRO/100 S

o	Intel® PRO/1000

•	Intel® PRO/100B-adapters bieden geen ondersteuning voor VLAN's.

Voor een overzicht van Intel VLAN's bezoekt u de website Intel Networking:

  Nu naar website gaan

Voor meer specifieke informatie kunt u het white paper over VLAN's lezen:

  White paper op website lezen

Zie ook:

VLAN toevoegen

VLAN-eigenschappen wijzigen

VLAN verwijderen

Geavanceerde instellingen voor VLAN’s


Ondersteuning

Als u een verbinding met het Internet en een webbrowser hebt, kunt u naar een van de Intel sites voor ondersteuning gaan.

Ga als volgt te werk om ondersteuning via het Internet te krijgen:

1.	Klik op Ondersteuning in het menu Help.

2.	Klik een van de website links.


Problemen oplossen

Het tabblad Probleemoplossing wordt alleen weergegeven wanneer Intel® PROSet II een probleem detecteert met de adapterconfiguratie of een geïnstalleerd stuurprogramma of een andere fout. Intel PROSet II onderzoekt het probleem en zal in de meeste gevallen een oplossing voorstellen.

Als u vermoedt dat er een probleem is met de adapter, kunt u een of meer van de volgende oplossingen uitproberen:

•	Controleer de informatie op het tabblad Algemeen om te zien of er een actieve verbinding met het netwerk is.

•	Als u een team hebt geconfigureerd, test u de configuratie van verbindingspartners om er zeker van te zijn dat die de teammodus ondersteunen.

•	Voer diagnose uit.

•	Voer Kabel testen uit als dit wordt ondersteund voor de adapter.


Test Zender/Responder

Met de test Zender/Responder kunt u de functionaliteit van de adapter binnen het netwerk testen.

Voordat u deze test uitvoert, moet u ervoor zorgen dat de adapter een verbinding met het netwerk heeft.

De test instellen

Stel één computer in als Zender en een andere computer als Responder. De Zender verzendt voortdurend pakketten naar de Responder, die op zijn beurt de pakketten terugzendt naar de Zender.

Zender
Verstuurt pakketten continu naar het netwerk. Selecteer Start om te beginnen met het verzenden van pakketten.
Voordat u begint met het verzenden van pakketten, moet u elders in het netwerk een Responder hebben ingesteld. Ga naar een andere computer waarin een Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S of PRO/1000 adapter is geïnstalleerd en gebruik Intel(R) PROSet II om die adapter in te stellen als de Responder. Indien mogelijk gebruikt u voor Zender en Responder adapters van hetzelfde model.

Responder
Zendt pakketten terug naar de Zender (de computer die de pakketten uitstuurt). Selecteer Starten om deze computer te laten optreden als Responder.

De test kan, ook al is de test er niet voor ontworpen, ook worden gebruikt om de bekabeling in een netwerksegment en de netwerkconfiguratie te testen. Wanneer u een nieuw LAN-segment test, stelt u een Responder in aan het ene uiteinde en een Zender aan het andere uiteinde.

De test verifieert de verbinding tussen twee adapters en is niet bedoeld om de snelheid te controleren. De snelheid waarmee een adapter verkeer over het netwerk kan verzenden en ontvangen, is afhankelijk van de netwerktopologie en de netwerkbelasting. Als u op het tabblad Algemeen klikt, kunt u zien welke snelheid voor de adapter is geconfigureerd.

OPMERKING:  als een Cisco* 6500-switch is geconfigureerd met Spanning Tree ingeschakeld, zal de test Zender/Responder geen nauwkeurige resultaten leveren. Als u de test Zender/Responder wilt uitvoeren met een Cisco 6500-switch, moet Spanning Tree uitgeschakeld zijn.

Waarschuwing: de test Zender/Responder is niet ontworpen om te worden uitgevoerd terwijl het systeem in de stand-bystand of  de slaapstand staat, of terwijl de kabel niet is aangesloten op de computer.


Nieuw VLAN

VLAN-ID: VLAN-nummer dat is toegewezen door de netwerkbeheerder. De VLAN-ID voor de adapter moet overeenkomen met de VLAN-ID voor de switch. Geldig bereik:  1 - 4094. (OPMERKING: VLAN-nummers 0 en 1 zijn vaak gereserveerd. Controleer de documentatie over de switch voor meer informatie.)

Naam VLAN: de naam van het VLAN. Bijvoorbeeld, Marketing of Engineering. De naam van een VLAN is een optionele instelling die u helpt om VLAN's in het netwerk te identificeren. De naam op de adapter hoeft niet overeen te komen met de naam op de switch.


Adapter identificeren

Met de voorziening Adapter identificeren kunt u de fysieke adapter identificeren aan de achterkant van de computer.

Bijvoorbeeld: als u twee adapters hebt geïnstalleerd, kunt u een adapter selecteren in het overzicht van de netwerkcomponenten en dan op de knop Adapter identificeren klikken. Het lampje op de beugel van de geselecteerde adapter gaat knipperen.

De positie van een adapter verifiëren:

1	Klik op Adapter identificeren.

2	Verplaats de schuifknop om het aantal seconden te selecteren dat het lampje moet knipperen. De standaardwaarde is 10 seconden.

3	Klik op Start.

 Het lampje van de geselecteerde adapter gaat nu gedurende de opgegeven tijd knipperen


Fouttolerantie van adapters

Fouttolerantie van adapters wil zeggen dat een team van twee of meer adapters wordt geconfigureerd om een back-up voor een netwerkverbinding te leveren. Wanneer een storing optreedt in een hub, een switchpoort, een kabel of een adapter, heeft dat geen gevolgen voor de netwerkprestaties van de computer.

In adapterteams met fouttolerantie is er een primaire adapter en een back-up-, of secundaire, adapter. Bij normale werking zal alleen de primaire adapter gegevens verzenden en ontvangen. Als een storing optreedt in de primaire adapter of de verbinding met de primaire adapter, neemt de secundaire adapter de taken automatisch over.

Als u gebruik maakt van fouttolerantie van adapters, moet het Spanning Tree Protocol uitgeschakeld zijn.

Adapterteams met fouttolerantie zijn compatibel met het volgende:

Adaptertype	Er moet ten minste één Intel serveradapter lid zijn van het team.
Adaptersnelheid	Kan gemengd zijn, bijvoorbeeld één adapter met een snelheid van 100 Mbps en een tweede met een snelheid van 1000 Mbps.
Netwerkconfiguratie	• Alle adapters moeten aangesloten zijn op dezelfde switch. • Het Spanning Tree Protocol moet uitgeschakeld zijn.
Protocollen	Alle
Zie ook:

Info over teaming

Soorten teams


Adaptieve taakverdeling

Adaptieve taakverdeling wil zeggen dat een team van adapters zo wordt geconfigureerd dat de capaciteit van de server bij verzenden en ontvangen toeneemt. In adapterteams met taakverdeling wordt de taakverdeling altijd toegepast op de transmissie en kan de taakverdeling voor ontvangen in- of uitgeschakeld zijn.

Adapterteams met taakverdeling vergroten de capaciteit middels:

•	Adapterconfiguratie. Door leden toe te voegen aan een team, kunt u de totale capaciteit vergroten.

•	Analyse van het gegevensverkeer. De software voor de taakverdeling analyseert continu de belasting in transmissie en ontvangst voor elk teamlid en verdeelt, waar nodig, de taken over de adapters.

Transmissieverkeer

Voor teams met taakverdeling wordt het transmissieverkeer via IP (IPv4 en IPv6) en NCP IPX verdeeld.

Ontvangstverkeer

•	Voor teams waarvoor de taakverdeling bij ontvangst is uitgeschakeld, verloopt al het ontvangstverkeer via de primaire adapter.

•	Voor teams waarvoor de taakverdeling bij ontvangst is ingeschakeld:

•	De primaire adapter ontvangt het verkeer voor alle protocollen.

•	De actieve adapters met de hoogste snelheden ontvangen IPv4-verkeer.

Bijvoorbeeld: u hebt een team met drie adapters, dat bestaat uit een gigabit-adapter die is aangewezen als de primaire adapter en twee Intel(R) PRO/100-adapters.

•	De gigabyte adapter ontvangt als het verkeer dat niet doorgestuurd kan worden en al het IPv6-verkeer, omdat dit de primaire adapter is.

•	De gigabyte adapter ontvangt het IPv4-verkeer omdat het de snelste adapter is.

•	De Intel PRO/100-adapters nemen dus geen deel in de taakverdeling bij de ontvangst.

Zie Geavanceerde voorzieningen voor teams configureren voor informatie over het inschakelen of uitschakelen van de taakverdeling bij ontvangst raadpleegt u Geavanceerde voorzieningen voor teams configureren.

Daarnaast bieden teams met taakverdeling ook fouttolerantie. Als een storing optreedt in de primaire adapter, blijft het team werken en worden de taken verdeeld over de resterende teamleden.

Adapterteams met taakverdeling zijn compatibel met het volgende:

Adaptersnelheid	Kan gemengd zijn, bijvoorbeeld één adapter met een snelheid van 100 Mbps en een tweede met een snelheid van 1000 Mbps.
Protocollen	IP, IPX (NCP) OPMERKING: IPv6-ondersteuning  wordt door Microsoft in Windows* 2000 aangeduid als evaluatietechnologie. De IPv6-ondersteuning in Windows 2000 is als zodanig niet bestemd voor een productieomgeving. Raadpleeg de documentatie bij het systeem voor gedetailleerde informatie over ondersteuning van het besturingssysteem voor IPv6.
Netwerkconfiguratie	Alle adapters moeten aangesloten zijn op dezelfde switch.

Opmerkingen over de prestaties van de Intel(R) PRO/1000 Gigabit Server Adapter

Aangezien de Intel® PRO/1000-adapter al een grote bandbreedte ondersteunt, kan gebruik van taakverdeling tot verminderde prestaties op sommige servers leiden. Dit komt doordat veel van de gangbare servers, niet de CPU- of buscapaciteit hebben om effectief om te gaan met een team van gigabyte-adapters. Voor de beste prestaties bij de taakverdeling moet u nieuwe servers gebruiken die ondersteuning bieden voor meerdere PCI-bussen en meerdere Pentium II(R)-processoren met een snelheid van 400 MHz of meer. Voor maximale prestaties bij taakverdeling, installeer de Intel PRO/1000-adapters in het team op afzonderlijke PCI-bussen.

Zie ook:

Info over teaming

Soorten teams

Geavanceerde instellingen configureren


IEEE 802.3ad: Dynamisch

802.3ad is een IEEE-standaard voor de aggregatie van verbindingen. Net als teams met statische aggregatie, vergroten teams met dynamische aggregatie de doorvoercapaciteit middels:

•	Adapterconfiguratie. Door leden toe te voegen aan een team, kunt u de doorvoercapaciteit vergroten. Teams kunnen bestaan uit maximaal acht adapters. Elke server kan werken met maximaal vier teams.

•	Analyse van het gegevensverkeer. De software analyseert continu de belasting in transmissie voor elk teamlid en verdeelt, waar nodig, de taken over de adapters. De switch draagt zorg voor de taakverdeling van het binnenkomende verkeer.

Daarnaast bieden 802.3ad-teams ook fouttolerantie. In 802.3ad-teams gebruikt de server één IP/MAC-adres voor de communicatie met het netwerk. De netwerkapparaten en clients behandelen een team in de modus verbindingsaggregatie als één computer. Wanneer zich een storing voordoet in een van de adapters van het team, beschouwt het netwerk het team als een computer met verminderde mogelijkheden.

Adapterteams met verbindingsaggregatie zijn compatibel met het volgende:

Adaptersnelheid	Alle adapters moeten op dezelfde snelheid werken.
Netwerkconfiguratie	• De switch die is aangesloten op de adapters, moet volledige ondersteuning bieden voor de IEEE 802.3ad-standaard. • Controleer de documentatie bij de switch voor informatie over poortafhankelijkheden. Voor sommige switches moet het eerste paar op een primaire poort beginnen.  • Controleer de instellingen voor snelheid en duplexmodus om er zeker van te zijn dat adapter en switch de full duplex-modus gebruiken, hetzij geforceerd, hetzij vanwege de instelling van automatisch onderhandelen. De adapter en de switch moeten dezelfde snelheid en dezelfde duplex-configuratie hebben. Full duplex is vereist op grond van de IEEE 802.3ad-specificaties: http://standards.ieee.org/.  Desgewenst kunt u de instelling van de snelheid en de duplexmodus wijzigen voordat u de adapter verbindt met de switch. De instellingen voor de snelheid en de duplexmodus kunnen nog worden gewijzigd nadat het team is gemaakt, maar Intel raadt u aan de kabels niet aan te sluiten totdat de instellingen van kracht zijn. In sommige gevallen is het mogelijk dat switches of servers de gewijzigde instellingen voor snelheid en duplexmodus niet herkennen als er instellingen worden gewijzigd terwijl er een actieve verbinding met het netwerk is.  • Als u een VLAN aan het configureren bent, controleert u de documentatie bij de switch voor informatie over VLAN-compatibiliteit. Niet alle switches bieden ondersteuning voor gelijktijdig gebruik van dynamische 802.3ad-teams en VLAN's. Als u ervoor kiest om VLAN's op te zetten, configureert u de instellingen voor teams en VLAN's op de adapter voordat u de adapter verbindt met de switch. Wanneer u VLAN's opzet nadat de switch een actieve aggregator heeft gemaakt, heeft dat gevolgen voor de VLAN-functionaliteit. OPMERKING:  in sommige switches kunnen koperen adapters en glasvezeladapters niet tot dezelfde aggregator behoren in een IEEE 802.3ad-configuratie. Als er in een systeem koperen adapters en glasvezeladapters zijn geïnstalleerd, kan de switch de koperen adapters in één aggregator configureren en de glasvezeladapters in een andere. Als u dergelijk gedrag bemerkt, dient u voor de beste prestaties hetzij koperen adapters hetzij glasvezeladapters te gebruiken in een systeem.
Protocollen	Alle

Zie ook:

Info over teaming

Soorten teams


Informatie over adapterteams
Info over teaming

Een team is een groep adapters die zo is geconfigureerd dat deze een grotere doorvoercapaciteit en fouttolerantie levert. Teaming is compatibel met Windows* 2000, Windows NT* 4.0 en Windows XP.

Welke soorten teams zijn er?

In Intel(R) PROSet II kunt u de volgende soorten teams configureren:

•	Fouttolerantie van adapters (AFT)

•	Fouttolerantie van switches (SFT)

•	Adaptieve taakverdeling (ALB)

•	FEC*/LA/802.3ad: Statisch

•	GEC/LA/802.3ad: Statisch

•	IEEE 802.3ad: Dynamisch

Hoeveel adapters kan ik toevoegen aan een team?

Met de uitzondering van SFT-teams, kunnen teams bestaan uit twee tot acht adapters. SFT-teams moeten precies twee adapters bevatten die elk aan één verbindingspartner zijn gekoppeld.

Kan ik adapters van andere leveranciers gebruiken in een team?

U kunt voor elke teammodus een team met adapters van meerdere leveranciers maken. Als u een team met adapters van meerdere leveranciers maakt, moet ten minste één Intel server-adapter deel uitmaken van het team.

Teams van meerdere leveranciers zijn compatibel met:

Adaptertype	Controleer het Overzicht van de netwerkcomponenten om te zien welke adapters in uw systeem compatibel zijn.
Adaptersnelheid	Controleer de vereisten voor de teammodus.
OPMERKING: Als teamleden onderdeel zijn van een VLAN, biedt Intel PROSet II geen ondersteuning voor teams met adapters van meerdere leveranciers.

Hoeveel teams kan ik instellen op een computer?

Het aantal teams dat kan worden geconfigureerd op een computer, is afhankelijk van de hardware- en softwareconfiguratie van de computer.

Wat zijn de vereisten?

Welke soorten teams kunnen worden ingesteld op een computer, is afhankelijk van de netwerkconfiguratie en het type van de adapters die zijn geïnstalleerd in de computer. Raadpleeg de informatie in Soorten teams voor een overzicht van de vereisten en mogelijkheden van verschillende teams.

Hoe verwijder ik teams?

Als u een adapterteam wilt verwijderen, moet u Intel(R) PROSet II gebruiken. Wanneer u een team verwijdert of uitschakelt via het onderdeel Netwerk van het besturingssysteem, kan dit gevolgen hebben voor de systeemstabiliteit en de adapterconfiguratie.

Voor een overzicht van adapterteams bezoekt u de website Intel(R) Networking:

  Nu naar website gaan

Voor meer specifieke informatie over het doel van de verschillende soorten teams kunt u het white paper Solving Server Bottlenecks lezen:

  White paper nu lezen

Zie ook:

Soorten teams


Details adapter

Gedetailleerde informatie over een adapter bekijken:

1.	Klik in Overzicht van de netwerkcomponenten op de adapter waarvoor u gedetailleerde informatie wilt zien.

2.	Klik op het tabblad Algemeen op Details.

Het scherm met gedetailleerde gegevens verschijnt.

OPMERKING: Niet alle eigenschappen zijn beschikbaar voor elke adaptersoort.

IP-adres	Het IP-adres dat op dit moment wordt gebruikt voor deze adapter. OPMERKING: Intel(R) PROSet II geeft geen IPv6-adressen weer.
Bussnelheid	De huidige snelheid van de PCI-bus (in megahertz) waarvan de adapter gebruik maakt.
Busbreedte	.De bitbreedte van de PCI-bus (32 of 64) waarvan de adapter gebruik maakt
Controller	Het artikelnummer of model van de component op de adapter.
Mediatype	Het type van de connector (glasvezel of koper).
Permanent Ethernet- adres	MAC-adres van de adapter in hexadecimale notatie. Het MAC-adres wordt door de leverancier toegewezen aan de adapter.
Huidig Ethernet- adres	Het MAC-adres dat op dit moment wordt gebruikt door deze adapter.  Als de adapter lid van een team is, of aan deze adapter een lokaal beheerd adres is toegewezen, verschilt het huidige Ethernet-adres van het permanente adres van de adapter.
PHY-apparaat	Een beschrijving van de adapter.
Artikelnummer	Het Intel artikelnummer van de adapter.
Interrupt	De interrupt die door het PCI BIOS of het besturingssysteem is toegewezen aan de adapter.
Geheugenadres	Het geheugenadres dat door het PCI BIOS of het besturingssysteem is toegewezen aan de adapter.
I/O-adres	Het I/O-adres dat door het PCI BIOS is toegewezen aan de adapter.
Bussleuf	Het busnummer en de sleuf-ID van de adapter.
Systeem-sleuf	Systeem-sleuven zijn onderverdelingen van de bussleuf. Als de bussleuf, bijvoorbeeld, in twee sleuven is gesplitst, zijn er twee systeem-sleuven die elk onderdeel van de bussleuf identificeren.
Adres DHCP-server	IP-adres van de server die het IP-adres voor de adapter heeft geleverd.


Geavanceerde voorzieningen voor teams configureren

Voor elk type team zijn verschillende geavanceerde instellingen beschikbaar.

Geavanceerde instellingen voor een team bekijken of wijzigen:

1.	Klik in het Overzicht van de netwerkcomponenten op een team.

2.	Klik op het tabblad Geavanceerd.

3.	Breng de gewenste wijzigingen aan in de teamconfiguratie.

4.	Als u de standaardinstellingen wilt herstellen, klikt u op Standaardinstellingen.

5.	Klik op OK om de wijzigingen in te stellen.

Hieronder vindt u beschrijvingen van de geavanceerde instellingen en de standaardwaarden. In de meeste gevallen is het best om de standaardwaarden te gebruiken.

Tijd tussen controles (seconden)

Hiermee wordt aangegeven hoe vaak de status van teamleden moet worden geverifieerd. Bijvoorbeeld: als Tijd tussen controles is ingesteld op één seconde, zal de software elke seconde controleren of de teamleden verkeer kunnen verzenden en ontvangen.

Standaardwaarde: 1 seconde

Bereik: 1 - 3 seconden

LinkAggrJoinMethod

Deze geavanceerde instelling is beschikbaar voor teams met verbindingsaggregatie. Volgens de IEEE 802.3ad-standaard kan een verbinding worden onderverdeeld in verschillende deelverbindingen die aggregators worden genoemd. Er is echter altijd maar één van de aggregators actief. Met de parameter LinkAggrJoinMethod kunt u opgeven hoe het systeem de actieve aggregator moet kiezen. Als u LinkAggrJoinMethod instelt op Maximale bandbreedte, selecteert het systeem de aggregator die het meeste verkeer genereert. Als u LinkAggrJoinMethod instelt op Maximumaantal adapters, selecteert het systeem de aggregator met de meeste adapters.

Standaardwaarde: Maximale bandbreedte

Bereik: Maximale bandbreedte, Maximumaantal adapters

Vernieuwingsfrequentie taakverdeling

De tijd die verstrijkt voordat de software de huidige taken opnieuw verdeelt over de teamleden. Voor optimale prestaties stelt u de standaardwaarde of een zo laag mogelijke waarde in.

Standaardwaarde: Elke 10 eenheden opgegeven bij Tijd tussen controles

Bereik: 1-50 Eenheden opgegeven bij Tijd tussen controles

Het aantal seconden dat is opgegeven bij Tijd tussen controles wordt gebruikt als de maateenheid voor de vernieuwingsfrequentie.  Raadpleeg het gedeelte over de instelling Tijd tussen controles voor meer informatie.

Lokaal beheerd adres

Als u gebruik maakt van de Windows NT Load Balancing Service (WLBS), NLB of andere stuurprogramma's uit deze klasse, kunt u het MAC-adres aanpassen dat wordt gebruikt voor het team.

Als u het MAC-adres wilt aanpassen, typt u een nieuw MAC-adres voor het team in het veld voor het lokaal beheerde adres. Het nieuwe adres moet vallen binnen dit bereik:  0000 0000 0001 - FFFF FFFF FFFD

Uitzonderingen:

o	Gebruik geen multicast-adres (Minst significante bit van de hoge byte = 1). Zo kan "Y" in het adres 0Y123456789A geen oneven getal zijn. (Y moet 0, 2, 4, 6, 8, A, C of E zijn.)

o	Gebruik niet alleen nullen of alleen de letter F.

Als u het standaard MAC-adres wilt herstellen, verwijdert u het adres in het veld Lokaal beheerd adres en klikt u op OK of klikt u op Standaardinstellingen.

OPMERKING:  Intel(R) PROSet II gebruikt een van de volgende adressen:

•	Het lokaal beheerde adres van het team als een lokaal adres is geconfigureerd, of

•	Het permanente MAC-adres van de primaire adapter als voor het team geen lokaal beheerd adres is geconfigureerd

Als voor de primaire adapter een lokaal beheerd adres wordt opgegeven, wordt dit overschreven met het lokaal beheerde adres van het team, als een dergelijk adres voor het team wordt opgegeven.

STP- en SFT-teams: als u een andere adapter tot de primaire (actieve) adapter van een team maakt, wordt dat team opnieuw geladen en wordt daarbij het MAC-adres van de nieuwe primaire adapter gebruikt. En wanneer u het lokaal beheerde adres van een team wijzigt, zal het team ook opnieuw worden geladen en een nieuw MAC-adres krijgen. Als deze acties worden uitgevoerd op een team met fouttolerantie van switches terwijl de server actief is in het netwerk, zal het team niet meer in staat zijn om te communiceren, totdat de ARP-tabellen van alle netwerkapparaten zijn bijgewerkt met de adresgegevens van de nieuwe primaire adapter. Hoe lang het duurt voor de ARP-tabellen worden bijgewerkt, kan op sommige routers en in sommige besturingssystemen worden ingesteld met een parameter voor de time-outperiode van de ARP-cache. Het team kan tot tien minuten niet beschikbaar zijn, afhankelijk van de instelling van deze parameter.

NumRxPackets

Hier definieert u het aantal receive-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om ontvangen pakketten toe te wijzen aan geheugen. Voor elk ontvangen pakket is een receive-descriptor vereist en elke descriptor neemt 2KB geheugen in beslag.

U kunt ervoor kiezen om het aantal receive-descriptors te verhogen als u denkt dat de prestaties bij ontvangst van gegevens een duidelijke verslechtering vertonen. Als de ontvangstprestaties geen probleem vormen, gebruikt u de standaardwaarde.

Standaardwaarde: Standaard. Wanneer u de standaardwaarde gebruikt, berekent Intel PROSet II automatisch de beste waarde voor deze instelling op basis van de teamconfiguratie en de hardwaremogelijkheden.

Aanbevolen: 250

Bereik: 32 - 512, stappen van 16

NumTxPackets

Hier definieert u het aantal verzend-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer verzend-descriptors, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal verzend-descriptors te verhogen. Het vergroten van het aantal verzend-descriptors kan leiden tot betere transmissieprestaties, maar de descriptors leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de standaardwaarde.

Standaardwaarde:  Standaard. Wanneer u de standaardwaarde gebruikt, berekent Intel PROSet II automatisch de beste waarde voor deze instelling op basis van de teamconfiguratie en de hardwaremogelijkheden.

Bereik: 16 - 512, stappen van 16

Taakverdeling bij ontvangst

Standaard wordt in teams met taakverdeling de taakverdeling toegepast bij verzending. De taakverdeling bij ontvangst kan worden in- of uitgeschakeld met deze optie.

Als u de taakverdeling bij ontvangst uitschakelt, wordt al het binnenkomende verkeer verwerkt door de primaire adapter.

Als de taakverdeling bij ontvangst is ingeschakeld:

•	Ontvangt de primaire adapter al het verkeer dat geen IP-verkeer is

•	Ontvangen actieve adapters met de hoogste snelheid IPv4-verkeer

Bijvoorbeeld: u hebt een team met drie adapters dat bestaat uit een gigabit-adapter die is aangewezen als de primaire adapter en twee Intel(R) PRO/100-adapters.

•	De gigabyte adapter ontvangt al het verkeer dat geen IP-verkeer is, omdat dit de primaire adapter is.

•	De gigabyte adapter ontvangt het IP-verkeer omdat het de snelste adapter is.

•	De Intel PRO/100-adapters nemen dus geen deel in de taakverdeling bij de ontvangst.

Standaardwaarde: Ingeschakeld bij eerste configuratie; Uitgeschakeld als het team eerst in een andere modus is gemaakt en daarna gewijzigd in een team met taakverdeling

Bereik: Ingeschakeld/Uitgeschakeld

Knop Standaardinstellingen

Met deze knop worden de standaardwaarden hersteld voor de geselecteerde geavanceerde instelling.  De standaardwaarden voor de instellingen worden hierboven genoemd.  (Deze optie is niet beschikbaar voor alle instellingen.)

OPMERKING:  Wanneer u in Intel PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


Diagnoses voor PRO/100 en PRO/100+ Adapters
Diagnoses voor Intel(R) PRO/100-, PRO/100+- en PRO/100 S-adapters

OPMERKING: als een diagnostische test wordt uitgevoerd en u op Stop klikt, treedt een korte vertraging op voordat de test wordt stopgezet. Wanneer de tests stop zijn gezet, is de knop OK weer beschikbaar.

Basisdiagnoses

Met de adapterdiagnoses kunt u kiezen of u één of meer items wilt testen.

OPMERKING:  Als op uw computer Windows 98 wordt uitgevoerd, moet u mogelijk de functie Power Management voor uw adapter uitschakelen voordat u het diagnoseprogramma kunt uitvoeren. Raadpleeg hiervoor Power Management voor netwerkadapter uitschakelen.

Beheerregisters

Hiermee worden de registers getest die de software gebruikt voor het configureren en verzenden van opdrachten naar de 8255x-controller.

Als de test Beheerregisters een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.

Intel 8255x-controller

Hiermee worden  ingebouwde tests uitgevoerd op de 8255x-controller, waarmee wordt bevestigd dat de controller goed werkt.

Als de test Controller een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.

EEPROM

Met deze test wordt de inhoud van het EEPROM gelezen om te bevestigen dat de controlesom juist is. Hierbij wordt het beheer-/gegevensregister van het EEPROM gebruikt, waarmee feitelijk het register wordt getest.

Als de test EEPROM een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.

Loopback

Dit is een test van de mogelijkheid van de adapter om pakketten te verzenden en te ontvangen.

Als de test Loopback een negatief resultaat heeft, vervangt u de adapter en probeert u de test opnieuw uit te voeren. Als de test ook met de vervangende adapter een negatief resultaat heeft, kan dit betekenen dat het moederbord of een ander apparaat op de bus niet goed functioneert.

Verbinding

Met deze test wordt de verbinding met het netwerk gecontroleerd, alsmede de zend- en ontvangstfunctionaliteit van de adapter, door 1000 pakketten naar het netwerk te verzenden en die zelfde pakketten weer op te halen.

Als de test Verbinding een negatief resultaat heeft, controleert u of de kabel goed is aangesloten op de adapter en op de verbindingspartner. Als de kabel goed is aangesloten, probeert u de kabel aan te sluiten op een andere poort op de verbindingspartner of probeert u een andere kabel.


Geavanceerde instellingen voor PRO/100+-adapters
Geavanceerde instellingen voor de Intel(R) PRO/100-familie van adapters

Met de instellingen op het tabblad Geavanceerd kunt u wijzigingen aanbrengen in de manier waarop de adapter omgaat met gecodeerde QoS-pakketten, offloading en andere mogelijkheden. Welke van de hieronder genoemde voorzieningen beschikbaar zijn, is afhankelijk van het besturingssysteem dat u gebruikt en van het type van de geïnstalleerde adapters.

Geavanceerde instellingen

Adaptieve afstand tussen frames

Biedt compensatie bij veel conflicten tussen Ethernet-pakketten in het netwerk.  De standaardinstelling is 0, waarmee deze voorziening wordt uitgeschakeld.

De aanbevolen instelling (1) werkt het best voor de meeste computers en netwerken. Met deze instelling wordt de afstand dynamisch aangepast aan het netwerkverkeer. Deze dynamische modus is alleen actief als de waarde 1 ingesteld is. In sommige gevallen is het mogelijk dat u een beter prestatieniveau kunt krijgen door de afstand handmatig in te stellen. Wanneer u een waarde instelt, forceert u daarmee een statische afstand tussen pakketten.

Een hogere waarde betekent een langere tijd tussen de frames die worden verzonden.

Ondersteunde adapters	Alle
Standaardwaarde	0: uitgeschakeld
Bereik	0-255

Adaptief antwoord koppeling

Hiermee wordt het opstarten van het systeem versneld wanneer de kabel niet is aangesloten op de adapter, door het overslaan van opstartroutines waarvoor een verbinding met het netwerk vereist is. Het opstarten gaat hierdoor aanzienlijk sneller.

Als adaptief antwoord koppeling is ingeschakeld voor Intel Ethernet-controllers en er geen netwerkkabel is aangesloten op de RJ-45-poort, wordt de netwerkverbinding uitgeschakeld. Er verschijnt een geel waarschuwingspictogram naast de netwerkverbinding in Apparaatbeheer.

Als u de netwerkverbinding opnieuw wilt inschakelen, moet u de netwerkkabel aansluiten op de RJ-45-poort en de computer opnieuw opstarten.

Ondersteunde adapters	Alleen mobiele (CardBus) producten. Niet beschikbaar op elk adaptermodel.
Standaardwaarde	Uit
Aanbevolen	Aan
Bereik	Aan, Uit
OPMERKING: Adaptieve verbindingsrespons (Adaptive Link Response - ALR) werkt niet als een draadloze adapter actief is in het systeem.

Adapterprestaties afstemmen

Hiermee kunt u het aantal frames instellen dat de adapter kan ontvangen zonder een interrupt te genereren. Bij normale werking genereert de adapter een interrupt na elk frame dat wordt ontvangen. Als u het aantal interrupts vermindert, zal het CPU-gebruik verbeteren.

Verplaats de schuifknop naar de maximale bandbreedte voor de adapter om één interrupt per frame te genereren. Hiermee wordt de bandbreedte van de adapter groter, maar neemt ook het CPU-gebruik toe, waardoor de computer langzamer kan gaan werken. Verplaats de schuifknop naar maximaal CPU-gebruik om het aantal frames dat de adapter ontvangt zonder een interrupt te genereren, te vergroten. Hiermee zal het CPU-gebruik beter zijn, maar kan de bandbreedte van de adapter afnemen. De standaardwaarde werkt goed op de meeste computers.

Ondersteunde adapters	Alle

Adaptieve technologie

In- of uitschakelt de microcode in het stuurprogramma van de adapter. De microcode optimaliseert de prestaties op basis van het besturingssysteem dat wordt gebruikt.

Voor de beste prestaties, Adaptieve technologie inschakelen.

U kunt Adaptieve technologie uitschakelen wanneer u problemen met de compatibiliteit van adapters probeert op te lossen.  Als u Adaptieve technologie uitschakelt, worden ook Transmit Control-blocks en Adapterprestaties afstemmen uitgeschakeld.

Ondersteunde adapters	Alle
Standaardwaarde	Aan
Bereik	Aan, Uit
Adaptieve drempelwaarde verzending

Geeft het aantal bytes op dat de adapter moet opslaan in de transmissiebuffer voor verzenden. Bijvoorbeeld: als Adaptieve drempelwaarde verzending is ingesteld op 100, slaat de adapter 100 bytes (800 bits) op in de buffer voordat de gegevens verzonden worden.

•	Wanneer u een hogere drempelwaarde instelt, zullen de prestaties bij verzending minder zijn, maar het aantal underruns kan ook minder worden.

•	Wanneer u een lagere drempelwaarde instelt, zullen de prestaties bij verzenden beter zijn, maar het aantal underruns kan ook hoger worden. Met een lage waarde kan de adapter sneller overgaan tot verzenden.

De adapter gebruikt de ingestelde drempelwaarde alleen maar als een beginpunt. Als de adapter betere prestaties bij verzenden met een lagere waarde kan behalen, wordt automatisch een lagere waarde gebruikt.

Om de adapter te configureren voor het verzenden van volledige Ethernet-frames en daarna de drempelwaarde aan te passen voor de beste prestaties, stelt u als drempelwaarde 190 in. Als de prestaties bij de verzending met een drempelwaarde van 190 duidelijk afnemen, stelt u 16 in als de drempelwaarde en verhoogt u die waarde vervolgens in stappen.

Ondersteunde adapters	Alle
Standaardwaarde	200
Aanbevolen	• Als de computer meerdere bus mastering-kaarten heeft of een hoge latentie, stelt u een waarde hoger dan 200 in. • Als de computer maar één bus mastering-kaart heeft, stelt u als drempelwaarde 12 in
Bereik	0-200

Basisverbindingen bij weinig resources

Hiermee worden netwerkverbindingen in stand gehouden, zelfs als het systeem niet voldoende resources heeft om alle geavanceerde instellingen (zoals IPSec-offload en Large Send Offload) toe te passen. De geavanceerde voorzieningen worden pas weer hervat, wanneer u de computer opnieuw opstart.

Als u meer informatie wilt over problemen met resources, controleert u het systeemlogboek. In het systeemlogboek worden fouten weergegeven die zich voordoen als gevolg van een gebrek aan systeemresources.

Ondersteunde adapters	Alle
Standaardwaarde	Ingeschakeld
Aanbevolen waarde	Ingeschakeld
Bereik	Ingeschakeld, Uitgeschakeld
Coalesce-buffers

Hiermee worden de transmissieprestaties verbeterd door het aantal coalesce-buffers aan te passen. Deze buffers maken het voor de adapter mogelijk gegevenssegmenten samen te voegen voordat pakketten worden verzonden.

Als het aantal coalesce-buffers wordt gewijzigd, moet ook de instelling van Verzend-descriptors worden aangepast. Coalesce-buffers moet worden ingesteld op 30 - 50% van Verzend-descriptors. Als de instelling van het aantal coalesce-buffers niet wordt aangepast aan het aantal verzend-descriptors, is het mogelijk dat de transmissieprestaties niet verbeteren.

Met coalesce-buffers kunnen de transmissieprestaties aanzienlijk worden verbeterd voor computers met Windows NT 4.0. De transmissieprestaties kunnen ook worden verbeterd voor computers met Windows 98 en 2000.

Ondersteunde adapters	Alle
Standaardwaarde	8
Aanbevolen waarde	8
Bereik	1-32

PME inschakelen

Hiermee worden de Wake on-mogelijkheden van de adapter ingeschakeld of uitgeschakeld op computers die oudere implementaties van geavanceerd energiebeheer hebben. Met Wake on ingeschakeld kan de adapter uit stand-by of uitgeschakeld worden gehaald door bepaalde typen pakketten, zoals ARP-pakketten.

•	Wanneer u deze voorziening uitschakelt, worden alle Wake on-instellingen op computers met oudere implementaties van energiebeheer uitgeschakeld.

•	Wanneer u de voorziening inschakelt, kan de adapter reageren op Wake on-signalen. Als u de adapter zo wilt configureren dat deze reageert op specifieke pakketsoorten, raadpleegt u de informatie over de Wake on-instellingen verderop in dit bestand.

•	Met de waarde Hardwarestandaard wordt de adapter gedwongen om de Wake on-mogelijkheden te configureren op basis van de systeemhardware.

•	De waarde Geen actie schakelt u voor de adapter de standaardinstelling van het besturingssysteem in.

Als u alle Wake on-instellingen wilt uitschakelen, stelt u deze optie in op Uitgeschakeld. Is dat niet het geval, dan gebruikt u de waarde Geen actie.

Ondersteunde adapters	Adapters gebaseerd op 82559. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Datatransportbesturing

Hiermee worden adapters in staat gesteld om het verkeer effectiever te regelen.

•	Wanneer wachtrijen van adapters een vooraf gedefinieerde limiet bereiken, genereren de adapters transportbesturingsframes. Het genereren van transportbesturingsframes laat de verzender weten dat de transmissie vertraagd moet worden.

•	Adapters reageren op transportbesturingsframes door de verzending van pakketten te pauzeren gedurende de tijd die is opgegeven in het transportbesturingsframe.

Door adapters in staat te stellen om de snelheid van de verzending van pakketten aan te passen op basis van transportbesturingsframes, wordt voorkomen dat pakketten verloren gaan.

OPMERKING: als adapters van deze voorziening gebruik willen maken, moeten verbindingspartners ondersteuning bieden voor transportbesturingsframes.

Ondersteunde adapters	Op 82540 en 82544 gebaseerde adapters, verzending en ontvangst. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Transportbesturingsframes genereren en erop reageren
Bereik	Uit, Antwoorden, Genereren, Genereren en Antwoorden, Hardwarestandaard

Aanmelding op basis van verbinding

Hiermee wordt de voorziening Adaptief antwoord koppeling ingeschakeld. Deze voorziening controleert, op basis van de waarde voor de parameter LinkBasedLoad, de status van de PhyLink en retourneert een waarde die succes of mislukking aangeeft.

Ondersteunde adapters	Alle
Standaardwaarde	Uitgeschakeld (0)
Bereik	Ingeschakeld, Uitgeschakeld

Verbindingssnelheid en duplexmodus

Hiermee configureert u de communicatie-instellingen van de adapter.

Om te kunnen werken met de geconfigureerde instelling, moet de verbindingspartner ook in staat zijn om met deze instelling te werken. Bijvoorbeeld: als de adapter is geconfigureerd om te werken op 100 Mbps in full duplex-modus, moet de verbindingspartner ook in staat zijn om te werken op 100 Mbps en in full duplex-modus. En als de adapter is geconfigureerd voor gebruik van autodetectie, moet de verbindingspartner automatische onderhandelingen ondersteunen.

Ondersteunde adapters	Alle Intel(R) PRO/100-adapters
Standaardwaarde	Autodetectie
Aanbevolen waarde	Autodetectie
Bereik	• Autodetectie - De adapter onderhandelt met de verbindingspartners om een compatibele snelheid en duplexmodus te identificeren. • 10 Mbps/Half duplex - De adapter forceert een verbindingssnelheid van 10 Mbps en voltooit verzend- en ontvangstbewerkingen afzonderlijk. Wanneer de adapter pakketten ontvangt, kunnen geen pakketten worden verstuurd. Wanneer pakketten worden verzonden, kunnen geen pakketten worden ontvangen. • 10 Mbps/Full duplex - De adapter forceert een verbindingssnelheid van 10 Mbps en voltooit verzend- en ontvangstbewerkingen tegelijkertijd. Hiermee krijgt u betere prestaties van de adapter. Selecteer deze modus alleen als u een switch hebt die de full duplex-modus ondersteunt. • 100 Mbps/Half duplex - De adapter forceert een verbindingssnelheid van 100 Mbps en voltooit verzend- en ontvangstbewerkingen afzonderlijk. Wanneer de adapter pakketten ontvangt, kunnen geen pakketten worden verstuurd. Wanneer pakketten worden verzonden, kunnen geen pakketten worden ontvangen. • 100 Mbps/Full duplex - De adapter forceert een verbindingssnelheid van 100 Mbps en voltooit verzend- en ontvangstbewerkingen tegelijkertijd. Hiermee krijgt u betere prestaties van de adapter. Selecteer deze modus alleen als u een switch hebt die de full duplex-modus ondersteunt.

Lokaal beheerd adres

Hiermee wordt het MAC-adres van de adapter uitgeschakeld. Als u een nieuw netwerkadres wilt opgeven, typt u een hexadecimaal getal van 12 cijfers in het vak Waarde.

Ondersteunde adapters	Alle
Standaardwaarde	Geen
Bereik	0000 0000 0001 - FFFF FFFF FFFD Uitzonderingen: • Gebruik geen multicast-adres (Minst significante bit van de hoge byte = 1).  • Gebruik niet alleen nullen of alleen de letter F.
OPMERKING:  in een team gebruikt Intel(R) PROSet II een van de volgende twee adressen:

•	Het lokaal beheerde adres van het team als een lokaal adres is geconfigureerd, of

•	Het permanente MAC-adres van de primaire adapter als voor het team geen lokaal beheerd adres is geconfigureerd

Intel PROSet II maakt geen gebruik van het lokaal beheerde adres van een adapter als de adapter de primaire adapter in een team is en er voor het team een lokaal beheerd adres is opgegeven.

Gebruikers van Windows 98 SE:

Als u het standaardadres wilt gebruiken nadat u een handmatig toegewezen adres hebt gebruikt, moet u een van de volgende procedures uitvoeren:

•	Selecteer Lokaal beheerd adres op het tabblad Geavanceerd van het dialoogvenster Netwerkeigenschappen en wijzig vervolgens de waarde in 0. Klik op OK om deze instelling toe te passen.

•	Klik op het tabblad Geavanceerd in Intel PROSet II, klik vervolgens op Standaardinstellingen herstellen of wis alle tekens in het veld Waarde. Klik op OK om de instelling toe te passen.

Gebeurtenis verbindingsstatus vastleggen

Deze instelling wordt gebruikt om het vastleggen van wijzigingen in de verbindingsstatus in of uit te schakelen. Als deze instelling is ingeschakeld, wordt bij een gebeurtenis voor het tot stand brengen of het verbreken van de verbinding een bericht gegenereerd dat wordt weergegeven in het systeemgebeurtenislogboek. Beheerders kunnen het bericht over de gebeurtenis bekijken in het systeemgebeurtenislogboek.

De volgende gebeurtenissen worden vastgelegd.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Ondersteunde adapters	Alle
Standaardwaarde	Enable
Bereik	Inschakelen, Uitschakelen
Offloading

Hiermee kunt u CPU-cycli besparen als de instelling overeenkomt met het adaptertype dat u gebruikt.

•	Als u offloading gebruikt met een Intel(R) PRO/100 S-adapter, gebruikt u de instelling IP-beveiliging.

•	Als u offloading niet gebruikt met een Intel(R) PRO/100 S-adapter, gebruikt u de instelling Controlesom.

•	Voor alle andere adaptertypen gebruikt u de instelling Geen.

Ondersteunde adapters	Alle
Ondersteunde besturingssystemen	Windows 98SE, Windows Me, Windows NT, Windows 2000 en Windows XP
Standaardwaarde	Intel PRO/100 S: IP-beveiliging Intel PRO/100 S zonder beveiliging: Controlesom
Bereik	Geen, IP-beveiliging, Controlesom (welke opties beschikbaar zijn, is afhankelijk van het adaptertype)
Zie  IPSec inschakelen voor informatie over IP-beveiliging.

Efficiëntie PCI-bus

Stelt de adapter in staat om de beste methode voor het verzenden van pakketten te gebruiken of dwingt te allen tijde samenvoeging van pakketten af.

•	Als Efficiëntie PCI-bus is uitgeschakeld, gebruikt de adapter de verzendmethode die de beste prestaties levert. Als samenvoeging van pakketten leidt tot de beste prestaties, zal de adapter automatisch pakketten samenvoegen.

•	Als Efficiëntie PCI-bus is ingeschakeld, forceert de adapter het samenvoegen van pakketten.

U kunt Efficiëntie PCI-bus uitschakelen als zich geen problemen voordoen met de prestaties bij het verzenden van pakketten. Als er een groot aantal underruns optreedt of als de PCI-bus prestatieproblemen vertoont, schakelt u deze optie in.

Ondersteunde adapters	Alle
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Definitie prioriteitsniveau

Hiermee definieert u de grenswaarde voor de prioriteitsniveaus van gecodeerde QoS-pakketten.

Als 802.1p/802.1Q-codering (QoS) is ingeschakeld op de computer, kunt u prioriteitsniveaus (0-7) definiëren die worden gekoppeld aan wachtrijen. Intel adapters hebben twee wachtrijen: hoge en lage prioriteit. Standaard worden pakketten met een prioriteitsniveau van 0 tot en met 3 verzonden via de wachtrij met lage prioriteit en pakketten met een waarde van 4 tot 7 worden verzonden via de wachtrij met hoge prioriteit.

Het nummer dat u opgeeft bij Definitie prioriteitsniveau vormt de grens tussen de wachtrijen met hoge en lage prioriteit. Bijvoorbeeld: als u 6 opgeeft, worden pakketten met een prioriteitsniveau van 0 tot en met 5 verzonden via de wachtrij met lage prioriteit en pakketten met een waarde van 6 of 7 worden verzonden via de wachtrij met hoge prioriteit.

Ondersteunde adapters	Alle
Standaardwaarde	4 • Pakketten met de waarden 0-3 worden naar de wachtrij met lage prioriteit gestuurd.  • Pakketten met de waarden 4-7 worden naar de wachtrij met hoge prioriteit gestuurd.
Bereik	0-7

Codering QoS-pakketten (802.3ac)

Hiermee wordt IEEE 802.1p/802.1Q-codering in- of uitgeschakeld voor de prioriteitsfilters die u hebt ingesteld Windows* 2000, XP of Prioriteitspakket   De filters van Prioriteitspakket werken alleen correct als u deze optie instelt op Ingeschakeld.

Als u filters hebt toegewezen met 802.1p/Q-codering, maar deze optie is ingesteld op Uitgeschakeld, wordt de pakketten prioriteit gegeven middels de wachtrij met hoge prioriteit van Intel.

Ondersteunde adapters	Op 82550, 82558 en 82559 gebaseerde producten. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld
Ontvangstbuffers

Hier geeft u het aantal buffers op dat door het stuurprogramma wordt gebruikt bij het kopiëren van gegevens naar het geheugen.

In situaties met een hoge netwerkbelasting kan het vergroten van het aantal ontvangstbuffers de prestaties ten goede komen. Het nadeel is dat het stuurprogramma dan een groter beslag op het systeemgeheugen legt. Als u deze waarde in andere situaties wijzigt, kan dit leiden tot verminderde systeemprestaties.

Ondersteunde adapters	Alle
Standaardwaarde	De standaardwaarde is afhankelijk van de geselecteerde voorzieningen.
Aanbevolen waarde	• Enkele adapter in Windows NT: 32 • Enkele adapter in Windows 98, Windows Me, Windows 2000 en Windows XP: 48 • Adapter in een team: 250 • Bij gebruik van IPSec en/of meerdere voorzieningen: 350
Bereik	8-1024

Afstand tussen frames bij opnieuw verzenden

Hiermee vergroot u het interval tussen frames bij opnieuw verzenden. Ofschoon er een ingebouwd Ethernet-algoritme is dat adapters gebruiken voor het opnieuw verzenden van frames na conflicten, kan het vergroten van deze waarde leiden tot betere netwerkprestaties als er een abnormaal groot aantal conflicten is in het netwerk.

Ondersteunde adapters	Deze voorziening wordt ondersteund door een beperkt aantal adapters.
Standaardwaarde	6
Bereik	6-15

Beveiligingskoppelingen

Hiermee geeft u het aantal gelijktijdige beveiligingskoppelingen op voor offloaden naar de coprocessor van de adapter. Een beveiligingskoppeling is een communicatiesessie met een andere computer waarop Intel(R) Pakketbescherming of andere software voor IP-beveiliging wordt uitgevoerd.

Als de computer meer beveiligingskoppelingen kan ondersteunen dan met de standaardwaarde worden opgegeven, verhoogt u deze waarde. Houd er wel rekening mee dat een groter aantal beveiligingskoppelingen leidt tot een toename van het geheugengebruik door de adapter.

Ondersteunde adapters	Intel® PRO/100 S
Standaardwaarde	Client: 64 Server: 1000
Bereik	1-5000

Slim uitschakelen

Hiermee wordt de adapter in staat gesteld om het energieverbruik te verminderen wanneer de LAN-kabel is losgekoppeld van de adapter. Wanneer de adapter weer een geldige verbinding detecteert, keert het energieverbruik terug naar het normale niveau.

Ondersteunde adapters	Op 82559 gebaseerde mobiele adapters en latere.
Standaardwaarde	Ingeschakeld
Aanbevolen waarde	Ingeschakeld
Bereik	Ingeschakeld, Uitgeschakeld
Technische gegevens

Transmit Control-blocks

Hier definieert u het aantal Transmit Control-blocks. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer Transmit Control-blocks, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal Transmit Control-blocks te verhogen. Het vergroten van het aantal Transmit Control-blocks kan leiden tot betere transmissieprestaties, maar de Control-blocks leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de standaardwaarde 16.

Ondersteunde adapters	Alle
Standaardwaarde	16 of 32, afhankelijk van de vereisten van de adapter
Bereik	8-64
Wake on Verbindingswijziging

Haalt de computer uit stand-by als een netwerkverbinding wordt gemaakt. Deze voorziening kan in- of uitgeschakeld zijn, of de besturingssysteem kan de standaardwaarde gebruiken.

Ondersteunde besturingssystemen	Windows 9x, Windows 2000, Windows XP
Bereik	Uitgeschakeld, geforceerd, OS afhankelijk
Standaardwaarde	Uitgeschakeld
Wake on-instellingen

Deze instellingen hebben betrekking op voorzieningen die kunnen worden geactiveerd door het besturingssysteem of met Intel(R) PROSet II. Het is afhankelijk van de versie van Windows die u gebruikt, hoe deze voorzieningen werken en of ze ondersteund worden.

•	De volgende versies van Windows ondersteunen Wake on-instellingen: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP 64 bit Edition en Windows XP Professional.

•	De volgende versie van Windows ondersteunen geen Wake On-instellingen:  Windows 98 handelsversie en Windows NT 4.0.

OPMERKING: Wake on-instellingen worden alleen ondersteund door Intel(R) PRO/100+ Management- en serveradapters en Intel(R) PRO/100 S-adapters.

Wake on-instellingen inschakelen in het besturingssysteem

Voor de volgende typen Wake on-pakketten moeten Wake on-instellingen zijn ingeschakeld in het besturingssysteem:

•	Wake on ARP

•	Wake on Gericht pakket

•	Wake On NBT

Als u wilt dat de adapter reageert op deze typen Wake on-pakketten, moet het gebruik van Wake on-instellingen worden ingeschakeld in het besturingssysteem. Als u Wake on-instellingen wilt inschakelen, gaat u naar Apparaatbeheer en schakelt u de optie Dit apparaat mag de computer uit stand-by halen in. Ga als volgt te werk om deze optie te vinden:

1.	Klik op Start > Configuratiescherm.
Het Configuratiescherm wordt geopend.

2.	Dubbelklik op Systeem.
Het dialoogvenster Systeemeigenschappen verschijnt.

3.	Klik op de tab Hardware en klik op de knop Apparaatbeheer.
Het venster Apparaatbeheer wordt geopend.

4.	Dubbelklik op de adapter waarvoor u de Wake on-instellingen wilt inschakelen.
Het dialoogvenster Eigenschappen verschijnt.

5.	Klik op de tab Energiebeheer.

6.	Klik op Dit apparaat mag de computer uit stand-by halen om Wake on-instellingen in te schakelen voor de adapter.

Ga als volgt te werk om Wake On-instellingen te configureren:

1.	Klik in Intel PROSet II op het tabblad Geavanceerd.

2.	Klik op Wake on-instellingen in de keuzelijst Instelling.

3.	Klik op de relevante Wake On-instelling in de keuzelijst Waarde.

4.	Klik op OK of Toepassen.

Beschikbare instellingen

De volgende Wake on-instellingen zijn beschikbaar in Intel PROSet II:

Instelling	Beschrijving
Uitgeschakeld	Adapter gebruikt geen Wake on-instellingen.
Wake on Magic Packet	Hiermee kan de adapter uit stand-by komen wanneer een Magic Packet wordt ontvangen. Een Magic Packet is een pakket dat 16 aaneengesloten exemplaren bevat van het Ethernet-adres van de ontvangende adapter. Wanneer u deze voorziening configureert, zal Intel PROSet II de waarde van het besturingssysteem voor deze voorziening uitschakelen.
Wake on Gericht pakket	Hiermee kan de adapter uit stand-by komen wanneer de adapter een Gericht pakket ontvangt. Dit is een unicast-pakket dat is verzonden naar het MAC-adres van de adapter.  Het protocol moet deze Wake-methode inschakelen in het stuurprogramma. Als deze functie wordt uitgeschakeld, negeert het stuurprogramma alle verzoeken van het protocol om deze Wake-methode in te schakelen.
Wake on Magic en Gericht pakketten	Hiermee kan de adapter opstarten wanneer een Magic pakket of een Gericht pakket wordt ontvangen.
Gecontroleerd door besturingssysteem	Geeft het besturingssysteem de volledige controle over Wake on-instellingen.

OPMERKING: Als meerdere IP-adressen zijn geconfigureerd voor één adapter, kan het besturingssysteem Wake up on ARP-patronen aanvragen voor alle geconfigureerde adressen. De adapter wil alleen opstarten als reactie op ARP-pakketten die een query versturen naar het eerste IP-adres in de lijst.

OPMERKING: Wake on-instellingen kunnen de computer niet opstarten als die uitgeschakeld staat (S5). Deze staat is geconfigureerd door de instelling PME-inschakelen op het tabblad Geavanceerd. Zelfs als de Wake on-instellingen zijn uitgeschakeld, wordt opstarten van S5 bepaald door de instelling PME-inschakelen.

Zolang het adapterstuurprogramma is ingeschakeld, blijven de PME-instellingen van kracht. Als het stuurprogramma echter wordt uitgeschakeld, wordt de standaardwaarde van het apparaat hersteld en wordt de computer wel of niet opgestart als deze is uitgeschakeld.

Zie ook:

Geavanceerde instellingen teams configureren


Overzicht Prioriteitspakket
Overzicht Intel(R) Prioriteitspakket

Intel(R) Prioriteitspakket is een hulpprogramma voor het toekennen van prioriteit aan gegevensverkeer waarmee u filters kunt instellen om gegevensverkeer met hoge prioriteit te verwerken vóór normaal gegevensverkeer. U kunt Intel Prioriteitspakket gebruiken voor het instellen van filters die prioriteit toekennen aan kritieke toepassingen.

Intel Prioriteitspakket is een afzonderlijk hulpprogramma dat geen onderdeel vormt van Intel(R) PROSet II.

Vereisten

Ondersteunde besturingssystemen	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 of hoger
Ondersteunde adapters	Intel(R) PRO/100- en PRO/1000-adapterfamilie
Intel Prioriteitspakket installeren

1.	Plaats de bij de adapter geleverde cd in het cd-romstation van de computer.
Het autorun-venster verschijnt.

2.	Sluit het autorun-venster.

3.	Blader naar de map WINDOWS/PRTPKT op de Intel-cd.

4.	Dubbelklik op setup.exe om Intel Prioriteitspakket te installeren.

5.	Voer de aanwijzingen op het scherm uit om de installatie van Prioriteitspakket te voltooien.

Na de installatie, kunt u het hulpprogramma openen door achtereenvolgens op Start > Programma’s > Intel(R) Prioriteitspakket II te klikken.

Prioriteit toekennen aan netwerkverkeer

Met Intel Prioriteitspakket kunt u filters instellen, zodat gegevens van kritieke knooppunten of toepassingen met de door u opgegeven prioriteit worden verzonden. Door gegevensverkeer op de host of het ingangspunt van het netwerk, kunnen netwerkapparaten beslissingen over het doorsturen nemen op basis van de prioriteitsgegevens die voor het pakket zijn ingesteld.

Door Intel Prioriteitspakket wordt het gegevensverkeer prioriteit verleend op basis van filters. Dat wil zeggen: parameters die u toewijst aan uitgaande pakketten. Met de wizard Prioriteitsfilter kunt u vooraf gedefinieerde of aangepaste filters instellen op basis van het (MAC-) adres van een knooppunt, het Ethernet-type of verschillende eigenschappen van het protocol en de poort. Prioriteitspakket biedt twee verschillende methoden voor het toekennen van prioriteit aan gegevensverkeer: IEEE 802.1p-codering en Intel Wachtrij met hoge prioriteit.

IEEE 802.1p-codering

IEEE 802.1p is een IEEE-standaard voor het coderen van pakketten, zodat prioriteitsniveaus kunnen worden toegewezen. De pakketten worden gecodeerd met vier (4) extra bytes, waardoor de pakketgrootte wordt verhoogd en waarmee een prioriteitsniveau wordt aangegeven. Wanneer deze gecodeerde pakketten worden verzonden naar het netwerk, worden eerst de pakketten met de hogere prioriteit overgedragen. Met codering van prioriteitspakketten (ook wel Traffic Class Expediting genoemd) kan de adapter samenwerken met andere netwerkonderdelen (switches, routers), zodat prioriteitspakketten eerst worden afgeleverd. Via 802.1p-codering kunnen toepassingen specifieke prioriteitsniveaus van 0 (laag) tot en met 7 (hoog) toewijzen.

Nadat u het filter hebt ingesteld in Windows* 2000, XP of in Intel Prioriteitspakket, moet u Intel PROSet II starten en QoS-codering inschakelen op het tabblad Geavanceerde instellingen.

OPMERKING: Met IEEE 802.1p-codering wordt de grootte van gecodeerde pakketten verhoogd. Bepaalde hubs en switches kunnen de grotere pakketten niet herkennen en laten deze derhalve vallen. Controleer de documentatie bij de hub of switch en ga na of 802.1p wordt ondersteund. Als de apparaten 802.1p niet ondersteunen of u het niet zeker weet, moet u Wachtrij met hoge prioriteit gebruiken voor het toekennen van prioriteit aan netwerkverkeer.

Vereisten voor effectief gebruik van IEEE 802.1p-codering:

•	Alle computers die met 802.1p gecodeerde pakketten ontvangen en doorsturen moeten 802.1p ondersteunen.

•	Adapters die zijn geïnstalleerd op computers die gecodeerde pakketten verwerken, moeten 802.1p-codering ondersteunen. Alle Intel(R) PRO/1000-, PRO/100+- en PRO/100 S-adapters ondersteunen 802.1p. Intel® PRO/100B-adapters bieden geen ondersteuning.

•	De adapter(s) kan (kunnen) niet aan een adapterteam zijn toegewezen.

•	Als u VLAN’s of pakketcodering instelt op dezelfde adapter moet 802.1p/802.1Q-codering worden ingesteld op Ingeschakeld op het tabblad Geavanceerde instellingen van Intel PROSet II.

•	Voor VLAN’s (802.1Q) en het toekennen van prioriteit (802.1p) wordt de 802.3ac-code gebruikt. Intel-adapters gebruiken de 802.3ac-code wanneer VLAN’s en/of QoS-codering is ingeschakeld op de adapter.

•	Als een adapter voor VLAN’s is geconfigureerd, moet het VLAN van de switch hetzelfde type codering ondersteunen (802.3ac) als de adapter.

•	Als een adapter is geconfigureerd voor het toekennen van prioriteit is voor bepaalde switches een niet-standaard-VLAN op de switch vereist voor het doorgeven van codes.


Filter

Een parameter die wordt toegepast op een uitgaand pakket om te bepalen of het pakket moet worden gecodeerd met IEEE 802.1p of dat het in de Wachtrij met hoge prioriteit moet worden geplaatst.


IEEE 802.1p-specificaties

Een IEEE-standaard voor het coderen van pakketten met verschillende prioriteitsniveaus. Wanneer deze pakketten worden verzonden naar het netwerk, worden eerst de pakketten met de hogere prioriteit overgedragen. Met de codering van prioriteitspakketten kan de adapter samenwerken met andere netwerkapparaten om de algehele prestaties te verbeteren.

IEEE 802.1p-codering is alleen effectief wanneer deze wordt ondersteund door de netwerkinfrastructuur (inclusief switches en andere routeringsapparaten). Als de infrastructuur geen ondersteuning biedt voor IEEE 802.1p-codering of u het niet zeker weet, kunt u prioriteit toekennen aan gegevensverkeer via de Wachtrij met hoge prioriteit van Intel.


Wachtrij met hoge prioriteit

Een transmissiewachtrij die wordt gebruikt met Intel(R) Prioriteitspakket. De wachtrij met hoge prioriteit verwerkt pakketten waarvoor een hoge prioriteit is ingesteld.

De wachtrij is beschikbaar op Intel(R) PRO/100-adapters met op 82558 gebaseerde controllers en latere adapters. Raadpleeg de tabel Adapterspecificaties voor informatie over controllers.

Voor meer informatie over de wachtrij met hoge prioriteit raadpleegt u de on line Help bij Intel Prioriteitspakket.


Codering

Aanvullende informatie toevoegen aan een pakket. In het geval van een prioriteitspakket met IEEE 802.1p-codering, betekent dit dat vier extra bytes worden toegevoegd die de prioriteit van het pakket aangeven.


CardBus gedetecteerd

Installatie van één adapter

Als u één Cardbus-adapter wilt installeren, klikt u op het model dat u gaat installeren.

OPMERKING: als u een Intel(R) PRO/100 Cardbus II-adapter (alleen LAN) hebt geïnstalleerd en u nu een Intel(R) PRO/100 LAN+Modem56 Cardbus II-adapter installeert, moet u het volgende doen:

1.	De stuurprogramma's voor de LAN-adapter verwijderen.

2.	De computer opnieuw opstarten.

3.	De stuurprogramma's voor de LAN+Modem56-adapter installeren.

Installatie van twee adapters

Als u twee Cardbus-adapters installeert en één van beide of beide zijn Intel PRO/100 LAN+Modem56 Cardbus II-adapters, klikt u op Intel(R) PRO/100 LAN+Modem56 Cardbus II.

Als beide adapters Intel PRO/100 Cardbus II-adapters (alleen LAN) zijn, klikt u op Intel(R) PRO/100 Cardbus II.

PCI-adapters

Als u een PCI-adapter installeert (bijvoorbeeld in een docking station), klikt u op Intel(R) PRO PCI Adapter.


CardBus-resources
Cardbus-resources definiëren

Selecteer een set beschikbare resources voor de netwerkadapter en de modem.

Controleren of de geselecteerde resources compatibel zijn met uw computer:

Start Intel(R) PROSet door te dubbelklikken op het pictogram van Intel PROSet II in het Configuratiescherm.
Intel PROSet II verschijnt.

•	Als er geen resourceconflicten zijn, wordt op het tabblad Algemeen statusinformatie voor de adapter weergegeven.

•	Als er een resourceconflict is met een ander apparaat, wordt in Intel PROSet II een tabblad Problemen oplossen weergegeven met instructies. Volg de instructies om andere resources te selecteren.


Jumbo-frames

Jumbo-frames zijn groter dan de standaard Ethernet-frames. Terwijl standaard Ethernet-frames ~ 1,5k bytes zijn, kunnen Jumbo-frames tot ~16k bytes bevatten.

In situaties waarin het merendeel van het verkeer bestaat uit grote pakketten en extra latentie geen probleem is, kunnen Jumbo-frames het CPU-gebruik verminderen en de efficiëntie verhogen.

OPMERKINGEN: Jumbo-frames worden alleen ondersteund met een snelheid van 1000 Mbps. Als u jumbo-frames gebruikt met een snelheid van 10 of 100 Mbps, kan dit een negatieve invloed hebben op de prestaties of kan de verbinding worden verbroken. Jumbo-frames zijn alleen effectief voor TCP/IP-pakketten.

Voordat u begint

Verifieer het volgende:

•	U hebt een Intel(R) PRO/1000-adapter met een snelheid van 1000 Mbps geïnstalleerd. Intel(R) PRO/100-adapters bieden geen ondersteuning voor jumbo-frames.

•	Op het systeem wordt Windows* 2000, XP of NT* 4.0 uitgevoerd.

•	De netwerkapparaten ondersteunen Jumbo-frames. Wanneer u het gebruik van jumbo-frames instelt voor andere netwerkapparaten, moet u er wel rekening mee houden dat apparaten de omvang van jumbo-frames op verschillende manieren kunnen berekenen. Sommige apparaten rekenen de header-informatie mee in de omvang van frames en andere niet.

Jumbo-frames instellen

•	Als u een algemeen beschikbare pakketgrootte wilt configureren, kunt u Intel(R) PROSet II gebruiken.

•	Voor alle andere pakketgroottes voert u de waarde in het register in.

Jumbo-frames configureren in Intel(R) PROSet II:

Het instellen van jumbo-frames in het netwerk is een proces dat uit drie stappen bestaat.

Stap 1: De adapter configureren voor ondersteuning van jumbo-frames:

1.	Open Intel(R) PROSet II.

2.	Klik in het overzicht van de netwerkcomponenten op de adapter waarvoor u jumbo-frames wilt configureren.

3.	Klik op het tabblad Geavanceerd.

4.	Klik in de lijst Instelling op Jumbo-frames.

5.	Klik in de lijst Waarde op een pakketgrootte.

De adapter is nu geconfigureerd voor ondersteuning van jumbo-frames.

Stap 2: De netwerkswitches configureren voor ondersteuning van jumbo-frames. Zie de documentatie bij de switch voor meer informatie.

Stap 3: De servers configureren voor ondersteuning van jumbo-frames. Zie de documentatie bij de server voor meer informatie.

Jumbo-frames configureren met behulp van het register:

Het instellen van jumbo-frames in het netwerk is een proces dat uit drie stappen bestaat.

Stap 1: De adapter configureren voor ondersteuning van jumbo-frames:

1.	Open de Register-editor. Klik op Start > Uitvoeren. Typ in het vak Openen regedit.
De Register-editor wordt gestart.

2.	Ga naar de registersleutel MaxFrameSize.

3.	Geef voor de framegrootte een waarde op tussen 1415 en 16128.

De adapter is nu geconfigureerd voor ondersteuning van jumbo-frames.

Stap 2: De netwerkswitches configureren voor ondersteuning van jumbo-frames. Zie de documentatie bij de switch voor meer informatie.

Stap 3: De servers configureren voor ondersteuning van jumbo-frames. Zie de documentatie bij de server voor meer informatie.


MiniPCI-adapters

De MiniPCI-adapters werken met bepaalde mobiele computers die de MiniPCI-vormfactor ondersteunen. Deze adapters ondersteunen dezelfde set voorzieningen als de clientadapters die worden beschreven in dit Help-bestand. Bij sommige MiniPCI-adapters is tevens modemhardware geïntegreerd in het product.

Als in uw product een modem is geïntegreerd, raadpleegt u de documentatie die is geleverd bij de computer voor informatie over de modemconfiguratie.

Zie ook:

Geavanceerde instellingen voor Intel(R) PRO/100+-adapters


Geavanceerde instellingen voor PRO/10+-adapters
Geavanceerde instellingen voor Intel® PRO/10 en PRO/10+ adapters

In het tabblad Geavanceerd kunt u wijzigingen aanbrengen in de adapter instellingen voor koppelingen, buffers, offloads en andere mogelijkheden. De beschikbaarheid van de hieronder genoemde voorzieningen, is afhankelijk van het besturingssysteem dat u gebruikt en de soort adapters die geïnstalleerd zijn.

Geavanceerde instellingen

Adaptieve afstand tussen frames

Biedt compensatie bij veel conflicten tussen Ethernet-pakketten in het netwerk. De standaardinstelling is 0, waarmee deze voorziening wordt uitgeschakeld. De aanbevolen instelling (1) werkt het best voor de meeste computers. Met deze instelling wordt de afstand dynamisch aangepast aan het netwerkverkeer. Deze dynamische modus is alleen actief als de waarde 1 ingesteld is. In sommige gevallen is het mogelijk dat u een beter prestatieniveau kunt krijgen door de afstand handmatig in te stellen. Wanneer u een waarde instelt, forceert u daarmee een statische afstand tussen pakketten.

Een hogere waarde betekent een langere tijd tussen de frames die worden verzonden.

Ondersteunde adapters	Alle
Standaardwaarde	1
Bereik	0-255

Adaptieve technologie

In- of uitschakelt de microcode in het stuurprogramma van de adapter. De microcode optimaliseert de prestaties op basis van het besturingssysteem dat wordt gebruikt.

Voor de beste prestaties, Adaptieve technologie inschakelen.

U kunt Adaptieve technologie uitschakelen wanneer u problemen met de compatibiliteit van adapters probeert op te lossen.  Als u Adaptieve technologie uitschakelt, worden ook Transmit Control-blocks en Adapterprestaties afstemmen uitgeschakeld.

Ondersteunde adapters	Alle
Standaardwaarde	Aan
Bereik	Aan, Uit
Adaptieve drempelwaarde verzending

Geeft het aantal bytes op dat de adapter moet opslaan in de transmissiebuffer voor verzenden. Bijvoorbeeld: als Adaptieve drempelwaarde verzending is ingesteld op 100, slaat de adapter 100 bytes (800 bits) op in de buffer voordat de gegevens verzonden worden.

•	Wanneer u een hogere drempelwaarde instelt, zullen de prestaties bij verzending minder zijn, maar het aantal underruns kan ook minder worden.

•	Wanneer u een lagere drempelwaarde instelt, zullen de prestaties bij verzenden beter zijn, maar het aantal underruns kan ook hoger worden. Met een lage waarde kan de adapter sneller overgaan tot verzenden.

De adapter gebruikt de ingestelde drempelwaarde alleen maar als een beginpunt. Als de adapter betere prestaties bij verzenden met een lagere waarde kan behalen, wordt automatisch een lagere waarde gebruikt.

Om de adapter te configureren voor het verzenden van volledige Ethernet-frames en daarna de drempelwaarde aan te passen voor de beste prestaties, stelt u als drempelwaarde 190 in. Als de prestaties bij de verzending met een drempelwaarde van 190 duidelijk afnemen, stelt u 16 in als de drempelwaarde en verhoogt u die waarde vervolgens in stappen.

Ondersteunde adapters	Alle
Standaardwaarde	12
Aanbevolen	• Als de computer meerdere bus mastering-kaarten heeft of een hoge latentie, stelt u een waarde hoger dan 200 in. • Als de computer maar één bus mastering-kaart heeft, stelt u als drempelwaarde 12 in
Bereik	0-200

Basisverbindingen bij weinig resources

Hiermee worden netwerkverbindingen in stand gehouden, zelfs als het systeem niet voldoende resources heeft om alle geavanceerde instellingen toe te passen. Voorzieningen als IPSec-offload en Large Send Offload worden in dat geval pas hervat wanneer er weer voldoende resources zijn. Fouten die zich voordoen als gevolg van het gebrek aan systeemresources, zijn te vinden in het systeemlogboek.

Ondersteunde adapters	Alle
Standaardwaarde	Uit
Aanbevolen waarde	Aan
Bereik	Aan, Uit
Coalesce-buffers

Hiermee worden de transmissieprestaties verbeterd door het aantal coalesce-buffers aan te passen. Deze buffers maken het voor de adapter mogelijk gegevenssegmenten samen te voegen voordat pakketten worden verzonden.

Als het aantal coalesce-buffers wordt gewijzigd, moet ook de instelling van Verzend-descriptors worden aangepast. Coalesce-buffers moet worden ingesteld op 30 - 50% van Verzend-descriptors. Als de instelling van het aantal coalesce-buffers niet wordt aangepast aan het aantal verzend-descriptors, is het mogelijk dat de transmissieprestaties niet verbeteren.

Met coalesce-buffers kunnen de transmissieprestaties aanzienlijk worden verbeterd voor computers met Windows NT 4.0. De transmissieprestaties kunnen ook worden verbeterd voor computers met Windows 98 en 2000.

Ondersteunde adapters	Alle
Standaardwaarde	8
Aanbevolen waarde	8
Bereik	1-32
Datatransportbesturing bij ontvangst

Hiermee kan de adapter in full duplex-modus transportbesturingsframes ontvangen door de transmissie te pauzeren. De transmissie wordt gepauzeerd gedurende de tijd die is opgegeven in het ontvangen transportbesturingsframe. Met deze instellingen kunnen de netwerkprestaties beter worden afgestemd, doordat voorkomen wordt dat pakketten verloren gaan.

Ondersteunde adapters	Deze voorziening is mogelijk niet beschikbaar op elk type adapter.
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Aanmelding op basis van verbinding

Hiermee wordt de voorziening Adaptief antwoord koppeling ingeschakeld. Deze voorziening controleert, op basis van de waarde voor de parameter LinkBasedLoad, de status van de PhyLink en retourneert een waarde die succes of mislukking aangeeft.

Ondersteunde adapters	Alle
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Verbindingssnelheid en duplexmodus

Hiermee worden verbindingsinstellingen geconfigureerd voor de Intel(R) PRO/10+-adapter.

Ondersteunde adapters	Alle
Standaardwaarde	Autodetectie
Aanbevolen waarde	Autodetectie
Bereik	• Autodetectie - De adapter onderhandelt met de switch over de methode voor verzending en ontvangst van pakketten (hetzij full, hetzij half duplex).  OPMERKING:  Om ondersteuning van de full duplex-modus te krijgen terwijl de optie Verbindingssnelheid en duplex-modus is ingesteld op Autodetectie, moet u een switch hebben die in staat is tot automatisch onderhandelen. • 10Mbps/Half duplex - De adapter gebruikt 10 Mbps als snelheid en voert maar één bewerking tegelijk uit. De adapter verzendt of ontvangt. • 10Mbps/Full duplex - De adapter gebruikt 10 Mbps als snelheid en verzendt en ontvangt pakketten tegelijkertijd. Hiermee krijgt u betere prestaties van de adapter. Selecteer deze modus alleen als u een switch hebt die de full duplex-modus ondersteunt.

Lokaal beheerd adres

Hiermee wordt het MAC-adres van de adapter uitgeschakeld. Als u een nieuw netwerkadres wilt opgeven, typt u een hexadecimaal getal van 12 cijfers in dit vak.

Ondersteunde adapters	Alle
Standaardwaarde	Geen
Bereik	0000 0000 0001 - FFFF FFFF FFFD Uitzonderingen: • Gebruik geen multicast-adres (Minst significante bit van de hoge byte = 1).  • Gebruik niet alleen nullen of alleen de letter F.

Efficiëntie PCI-bus

Stelt de adapter in staat om de beste methode voor het verzenden van pakketten te gebruiken of dwingt te allen tijde samenvoeging van pakketten af.

•	Als Efficiëntie PCI-bus is uitgeschakeld, gebruikt de adapter de verzendmethode die de beste prestaties levert. Als samenvoeging van pakketten leidt tot de beste prestaties, zal de adapter automatisch pakketten samenvoegen.

•	Als Efficiëntie PCI-bus is ingeschakeld, forceert de adapter het samenvoegen van pakketten.

U kunt Efficiëntie PCI-bus uitschakelen als zich geen problemen voordoen met de prestaties bij het verzenden van pakketten. Als er een groot aantal underruns optreedt of als de PCI-bus prestatieproblemen vertoont, schakelt u deze optie in.

Ondersteunde adapters	Alle
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Definitie prioriteitsniveau

Hiermee definieert u de grenswaarde voor de prioriteitsniveaus van gecodeerde QoS-pakketten.

Als 802.1p/802.1Q-codering (QoS) is ingeschakeld op de computer, kunt u prioriteitsniveaus (0-7) definiëren die worden gekoppeld aan wachtrijen. Intel adapters hebben twee wachtrijen: hoge en lage prioriteit. Standaard worden pakketten met een prioriteitsniveau van 0 tot en met 3 verzonden via de wachtrij met lage prioriteit en pakketten met een waarde van 4 tot 7 worden verzonden via de wachtrij met hoge prioriteit.

Het nummer dat u opgeeft bij Definitie prioriteitsniveau vormt de grens tussen de wachtrijen met hoge en lage prioriteit. Bijvoorbeeld: als u 6 opgeeft, worden pakketten met een prioriteitsniveau van 0 tot en met 5 verzonden via de wachtrij met lage prioriteit en pakketten met een waarde van 6 of 7 worden verzonden via de wachtrij met hoge prioriteit.

Ondersteunde adapters	Alle
Standaardwaarde	4 • Pakketten met de waarden 0-3 worden naar de wachtrij met lage prioriteit gestuurd.  • Pakketten met de waarden 4-7 worden naar de wachtrij met hoge prioriteit gestuurd.
Bereik	0-7

Ontvangstbuffers

Hier geeft u het aantal buffers op dat door het stuurprogramma wordt gebruikt bij het kopiëren van gegevens naar het protocolgeheugen.

In situaties met een hoge netwerkbelasting kan het vergroten van het aantal ontvangstbuffers de prestaties ten goede komen. Het nadeel is dat het stuurprogramma dan een groter beslag op het systeemgeheugen legt. Als u deze waarde in andere situaties wijzigt, kan dit leiden tot verminderde systeemprestaties.

Ondersteunde adapters	Alle
Standaardwaarde	48
Aanbevolen waarde	• Enkele adapter in Windows 98, Windows Me, Windows 2000 en Windows XP: 48 • Enkele adapter in Windows NT: 32 • Adapter in een team: 250
Bereik	8-1024

Afstand tussen frames bij opnieuw verzenden

Hiermee vergroot u het interval tussen frames bij opnieuw verzenden. Ofschoon er een ingebouwd Ethernet-algoritme is dat adapters gebruiken voor het opnieuw verzenden van frames na conflicten, kan het vergroten van deze waarde leiden tot betere netwerkprestaties als er een abnormaal groot aantal conflicten is in het netwerk.

Ondersteunde adapters	Alle
Standaardwaarde	10
Bereik	6-15

Transmit Control-blocks

Hier definieert u het aantal Transmit Control-blocks. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer Transmit Control-blocks, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal Transmit Control-blocks te verhogen. Het vergroten van het aantal Transmit Control-blocks kan leiden tot betere transmissieprestaties, maar de Control-blocks leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de aanbevolen waarde 16.

Ondersteunde adapters	Alle
Standaardwaarde	32
Aanbevolen waarde	16
Bereik	8-64


PRO/1000-verbindingsconfiguratie
Intel(R) PRO/1000-verbindingsconfiguratie (alleen voor koperen modellen)

Voorzichtig:   in bijna alle gevallen dient u de optie voor automatisch onderhandelen ingeschakeld te laten. Als u deze optie uitschakelt, moet u ervoor zorgen dat de instellingen van de verbindingspartner overeenkomen met de instellingen van de adapter. De adapter werkt alleen met een snelheid van 1000 Mbps als automatisch onderhandelen is ingeschakeld.

Snelheid en duplexmodus instellen:

1.	Klik op het tabblad Verbindingsconfiguratie op Ingeschakeld of Uitgeschakeld om de instelling voor automatisch onderhandelen te wijzigen.

•	Als automatisch onderhandelen is ingeschakeld, onderhandelt de adapter met de verbindingspartner over de snelheid en de duplexmodus.

•	Als automatisch onderhandelen is uitgeschakeld, wordt de adapter geforceerd om de opgegeven snelheid en duplexmodus te gebruiken.  Als u automatisch onderhandelen uitschakelt, moet u controleren of de verbindingspartner de opgegeven snelheid en duplexmodus kan gebruiken. Als de verbindingspartner niet kan werken met de geforceerde instellingen van de adapter, kan geen communicatie tot stand komen tussen de adapter en de verbindingspartner.

2.	Als automatisch onderhandelen is ingeschakeld, selecteert u de snelheid en duplexmodus die tijdens het onderhandelen worden geadverteerd voor de verbindingspartner. Standaard worden alle instellingen geadverteerd. Mogelijke instellingen zijn:

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

•	1000 Mbps FULL

OPMERKING: in overeenstemming met de IEEE-specificaties kan 1000-based T-werking niet worden geforceerd.  U kunt de adapter echter wel configureren om alleen te werken met een snelheid van 1000 Mbps, door automatisch onderhandelen in te schakelen en dan alleen 1000 Mbps Full te selecteren in de sectie met de te adverteren instellingen.

3.	Als automatisch onderhandelen is uitgeschakeld, kunt u de snelheid en duplexmodus van de adapter forceren door op een van de volgende instellingen te klikken:

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

Om er zeker van te zijn dat er communicatie zal plaatsvinden, moet u verifiëren dat de verbindingspartner de geforceerde instelling ondersteunt.

4.	Klik op OK.

5.	Start de computer opnieuw, als u dat gevraagd wordt.

De snelheid en duplexmodus zijn nu geconfigureerd voor de adapter.


Verbindingspartner

Een apparaat waarmee een adapter kan worden verbonden, zoals een andere adapter, een hub, een switch, enzovoort.


Overzicht van netwerkcomponenten
Overzicht van de netwerkcomponenten

Het overzicht van de netwerkcomponenten bevindt zich aan de linkerkant van het Intel® PROSet II-venster. Klik op adapters, VLAN’s of teams om gedetailleerde informatie weer te geven over de component.


Boot Agent

Op dit tabblad kunt u de instellingen bekijken die het gedrag bepalen van de Boot Agent-software. Het is mogelijk dat u een aantal van de instellingen kunt wijzigen in het selectievak Instelling. Tevens is het mogelijk dat u dit tabblad kunt gebruiken om een Flash ROM-apparaat bij te werken met een Boot Agent-image, als de netwerkbeheerder die voorziening tenminste heeft ingeschakeld.

Voor meer gedetailleerde beschrijvingen van elk van de configuratie-instellingen raadpleegt u:

•	Opstartprotocol netwerk

•	Opstartvolgorde

•	Wachttijd menu Instellingen

•	Setup-aanwijzing weergeven

•	Ondersteuning voor activering in oude besturingssystemen

Raadpleeg de Intel® Boot Agent User´s Guide voor instructies over het wijzingen van de configuratie-instellingen.

OPMERKINGEN:

Als het niet lukt om configuratie-instellingen te wijzigen, is het mogelijk dat uw adapter of systeem die instelling niet ondersteunt.

De informatie in dit Help-bestand geldt alleen voor de 16-bits PXE 2.0-versie van Boot Agent. De meeste configuratie-instellingen die hier worden beschreven, worden niet gebruikt in een EFI-omgeving.

Knop Boot Agent bijwerken

Met deze knop kunt u de software van de Intel Boot Agent installeren of bijwerken.

OPMERKINGEN:

Bij het bijwerken van Boot Agent wordt een nieuw Boot Agent-image naar het Flash ROM geschreven. Het is mogelijk dat hierdoor de werking van het Windows*-stuurprogramma voor het apparaat tijdelijk wordt onderbroken. Na deze bewerking moet de computer mogelijk opnieuw worden opgestart.

Als u Boot Agent moet installeren in een DOS-omgeving, raadpleegt u het desbetreffende gedeelte van de Intel® Boot Agent User´s Guide.

De Boot Agent-software installeren of bijwerken:

OPMERKING: wanneer u een Flash ROM-image hebt gedownload van de website van Intel, moet u dat image opslaan in een tijdelijke directory of een andere locatie waarop u het bestand snel terug kunt vinden voor deze procedure.

1.	Klik in het menu Start op Instellingen en klik vervolgens op Configuratiescherm.
Het Configuratiescherm verschijnt.

2.	Dubbelklik op het pictogram van Intel(R) PROSet II.
Het scherm van Intel PROSet II verschijnt.

3.	Selecteer in het overzicht van de netwerkcomponenten de adapter die het Flash ROM bevat dat u wilt bijwerken.

4.	Klik op de tab Boot Agent. Als deze tab niet wordt weergegeven, moet u het netwerkstuurprogramma bijwerken en controleren of u Intel PROSet II versie 4.0 of hoger hebt.

OPMERKING: met Intel PROSet II kunt u ook configuratie-instellingen wijzigen voor PXE- en RPL-omgevingen. Als u in de lijst met netwerkcomponenten aan de linkerkant van het Intel PROPSet II-scherm een adapter selecteert die werkt in PXE- of RPL-omgevingen, kunt u mogelijk de configuratie-instellingen, die verschijnen aan de rechterkant van het venster, bekijken en wijzigen. Voor meer informatie over het configureren van Boot Agent in een Windows-omgeving, raadpleegt u het desbetreffende gedeelte van de Intel® Boot Agent User´s Guide. Niet alle Flash ROM's ondersteunen deze configuratie-instellingen.

5.	Druk op Ctrl+S om een instelling te bewerken. Als u op Ctrl+S hebt geklikt, wordt het uiterlijk van het tabblad Boot Agent gewijzigd en wordt de knop Instellingen toepassen hierin uitgeschakeld weergegeven.

6.	Klik op Boot Agent bijwerken.
Er verschijnt een waarschuwingsvenster met de mededeling dat de netwerkverbinding tijdelijk verloren zal gaan, terwijl het Boot Agent-image wordt bijgewerkt.

7.	Klik op Ja om door te gaan met bijwerken.
Er verschijnt een dialoogvenster met de vraag of u een backup wilt maken van het huidige Flash ROM.

8.	Als u een back-up wilt maken van het huidige Flash ROM voordat u het Flash ROM bijwerkt, klikt u op Ja. Het dialoogvenster Bestaand Flash-ROM-image opslaan als verschijnt. Ga verder naar stap 10.

9.	Als u ervoor kiest om geen back-up te maken van het huidige Flash ROM, klikt u op Nee.
Er verschijnt een waarschuwingsvenster. Klik op Ja en ga verder met stap 11.

10.	Klik op Opslaan als u het standaardpad en de standaardnaam wilt gebruiken (voor de bestandsnaam wordt standaard het unieke MAC-adres van de adapter gebruikt). Anders wijzigt u deze parameters en klikt u dan op Opslaan.

11.	Klik in het dialoogvenster Bestand openen op de knop Openen als het pad en de naam van het gewenste Flash ROM-bestand worden weergegeven als de standaardwaarden. Als dat niet het geval is, wijzigt u het pad en de bestandsnaam en klikt u dan op Openen.
OPMERKING: Flash ROM-bestanden zijn beschikbaar voor downloaden op de website van Intel.

Het bijwerkproces kan vijf tot tien seconden duren en terwijl de bewerking bezig is, wordt een voortgangsindicator weergegeven.


Opstartprotocol netwerk

Als de Boot Agent geen ondersteuning biedt voor RPL, kunt u deze instelling niet wijzigen.

Mogelijke waarden:

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

Beschrijving:

Selecteer PXE voor gebruik in combinatie met netwerkbeheerprogramma’s die compatibel zijn met WfM, zoals LANDesk* Management Suite, Windows* 2000 RIS, Windows XP RIS en Linux*.

Selecteer RPL voor opstarten op afstand via oudere methoden én voor sommige oplossingen voor opstarten op afstand in Novell NetWare*.


Opstartvolgorde

Mogelijke waarden:

•	Opstartvolgorde uit BIOS gebruiken

•	Eerst netwerk, dan lokale stations

•	Eerst lokale stations, dan netwerk

•	Alleen netwerk

•	Alleen lokale stations

Beschrijving:

Met deze optie kunt u kiezen in welke volgorde opstartapparaten worden geselecteerd bij het opstarten van het systeem. Als uw computer een BIOS heeft dat ondersteuning biedt voor BIOS Boot Specification (BBS) of dat Plug en Play-selectie (PnP) van de opstartvolgorde in de BIOS-instellingen inschakelt, zal de waarde voor deze optie altijd Opstartvolgorde uit BIOS gebruiken zijn en kan deze waarde niet worden gewijzigd. Raadpleeg in dat geval de documentatie bij het BIOS van uw computer voor informatie over het instellen van opstartopties.

Als uw computer geen BBS- of PnP-compatibel BIOS heeft, kunt u een van de bovengenoemde waarden selecteren, behalve Opstartvolgorde uit BIOS gebruiken.


Setup-aanwijzing weergeven

Mogelijke waarden:

•	Ingeschakeld – Standaardwaarde

•	Uitgeschakeld

Beschrijving:

Als u Ingeschakeld selecteert, verschijnt na de POST de Ctrl+S-prompt, zodat u op Ctrl+S kunt drukken binnen het aantal seconden dat is opgegeven met de optie Wachttijd menu Instellingen, om het configuratiemenu weer te geven.

Als u Uitgeschakeld selecteert en/of Wachttijd menu Instellingen is ingesteld op nul, zal de Ctrl+S-prompt niet worden weergegeven tijdens het opstartproces. In dat geval kunt u het configuratiemenu weergeven door onmiddellijk na de POST herhaaldelijk op Ctrl+S te drukken totdat het menu verschijnt. Als het configuratiemenu niet verschijnt nadat u een aantal keren op Ctrl+S hebt gedrukt, start u het systeem opnieuw en probeert u het nogmaals.


Wachttijd menu Instellingen

Mogelijke waarden:

•	0 seconden

•	2 seconden

•	3 seconden

•	5 seconden

Beschrijving:

Het aantal seconden dat Boot Agent erop wacht dat u op Ctrl+S drukt om het configuratiemenu met instellingen weer te geven tijdens het opstarten van het systeem.

Als u voor Wachttijd menu Instellingen nul seconden opgeeft en/of Setup-aanwijzing weergeven is ingesteld op Uitgeschakeld, zal de Ctrl+S-prompt niet verschijnen tijdens het opstartproces. In dat geval kunt u het configuratiemenu weergeven door onmiddellijk na de POST herhaaldelijk op Ctrl+S te drukken totdat het menu verschijnt. Als het configuratiemenu niet verschijnt nadat u een aantal keren op Ctrl+S hebt gedrukt, start u het systeem opnieuw en probeert u het nogmaals.


Ondersteuning voor activering in oude besturingssystemen

Deze optie verschijnt niet in het configuratiemenu wanneer u opstart vanaf een gigabit-adapter.

Raadpleeg de instructies van het besturingssysteem om te bepalen of uw besturingssysteem activering op afstand ondersteunt en hoe deze mogelijkheid moet worden gebruikt.

Mogelijke waarden:

•	Ingeschakeld

•	Uitgeschakeld

Beschrijving:

Selecteer Ingeschakeld als u in andere besturingssystemen dan Windows* (zoals DOS en NetWare*) de mogelijkheid tot activering op afstand van de WfM-adapter wilt gebruiken.

Selecteer Uitgeschakeld als instelling als u Windows 2000, XP, Me of 98SE gebruikt.


Vermelding VLAN

Als u VLAN’s hebt geconfigureerd, zullen deze worden opgenomen in het overzicht van de netwerkcomponenten:

Als u met de rechtermuisknop op een VLAN klikt, worden de volgende opties weergegeven:

•	VLAN-eigenschappen wijzigen  - Hiermee kunt u de configuratie van het VLAN wijzigen.

•	Verwijderen - Hiermee kunt u het VLAN verwijderen.

Zie ook:

VLAN toevoegen


Teamvermelding

Als u adapterteams hebt geconfigureerd, zullen deze worden opgenomen in het Overzicht van de netwerkcomponenten:

Als u met de rechtermuisknop op een team klikt, worden de volgende opties weergegeven:

•	Team verwijderen

•	Teammodus wijzigen

•	VLAN toevoegen

•	IPSec inschakelen

•	GVRP inschakelen

Als u een team hebt geconfigureerd en dit niet wordt weergegeven in het overzicht van de netwerkcomponenten, moet u wellicht Intel(R) PROSet II sluiten om de teaminstellingen toe te passen.


Vermelding adapter in team

Als u met de rechtermuisknop op Vermelding adapter in een team klikt, worden de volgende opties weergegeven:

•	Primaire voorkeursadapter - Hiermee wordt de geselecteerde adapter aangewezen als de primaire verzendende adapter voor het team. Meestal zult u hiervoor de adapter met de grootste bandbreedte kiezen.

•	Secundaire voorkeursadapter - Hiermee wordt de geselecteerde adapter aangewezen als de backup-adapter voor de primaire voorkeursadapter.  Deze optie is pas beschikbaar als u een primaire voorkeursadapter hebt opgegeven.

•	Verwijderen uit team - Hiermee wordt de geselecteerde adapter verwijderd uit het team.

Zie ook:

•	Modus adapterteam wijzigen

•	Een adapter toevoegen aan een bestaand team

•	Nieuw team maken

•	Adapter verwijderen uit een team

•	Adapterteam verwijderen

•	Adapter opgeven als primair of secundair


Netwerkcomponenten
Overzicht van de netwerkcomponenten

In het overzicht van de netwerkcomponenten vindt u de netwerkcomponenten die actief zijn op uw systeem. Onder netwerkcomponenten worden netwerkadapters, teams en VLAN's verstaan.


Adapters in team

De keuzelijst Adapters in team bevat de adapters waaruit een team bestaat. Klik op een teamlid om informatie te zien die specifiek is voor die adapter.

Zie ook:

Adapter verwijderen uit een team


Virtuele LAN's

Onder Virtuele LAN's in het overzicht van de netwerkcomponenten vindt u de geconfigureerde VLAN's.

Zie ook:

VLAN toevoegen

VLAN-eigenschappen wijzigen

Definitie VLAN

VLAN verwijderen

Geavanceerde instellingen voor VLAN’s

GVRP instellen


Instantie van een adapter verwijderen
Een adapter verwijderen

U kunt een adapter pas verwijderen uit Intel(R) PROSet II of van een computer, als de adapter geen deel meer uitmaakt van een team. Als de adapter nog lid is van een team, moet u eerst de adapter uit het team verwijderen en dan de onderstaande instructies volgen.

Een adapter verwijderen uit Intel(R) PROSet II

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op de adapter die u wilt verwijderen.

2.	Klik op Verwijderen.
Er verschijnt een dialoogvenster waarin wordt bevestigd dat deze adapter GEEN deel uitmaakt van een team.

3.	Klik op Ja.

4.	Klik op OK om Intel PROSet II te sluiten en de wijzigingen toe te passen.

5.	Start de computer opnieuw, als u dat gevraagd wordt.

U kunt nu Intel PROSet II niet meer gebruiken voor het beheer van de adapter.


Nieuw team maken

Een team is een groep adapters die geconfigureerd is om extra netwerkfunctionaliteit te leveren, zoals overnames bij storingen of een vergrote doorvoercapaciteit bij transmissies.

Een team maken:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een adapter die geen deel uitmaakt van een team.

2.	Klik op Toevoegen aan team en vervolgens op Nieuw team maken.
De wizard Teaming wordt geopend.

3.	Selecteer het soort team dat u wilt maken en klik op Volgende. U kunt kiezen uit de volgende mogelijkheden:

•	Fouttolerantie van adapters

•	Fouttolerantie van switches

•	Adaptieve taakverdeling

•	Verbindingsaggregatie (Dynamic_3ad* / GEC / LA / 802.3ad statische modus)

4.	Als u een team voor adaptieve taakverdeling maakt, kunt u kiezen of de taakverdeling moet worden ingeschakeld of uitgeschakeld bij ontvangst.

•	Als u taakverdeling bij ontvangst inschakelt, zullen de teamleden met de hoogste snelheid al het binnenkomende IP-verkeer verwerken en zal de primaire adapter het andere binnenkomende verkeer verwerken.
OPMERKING: als taakverdeling bij ontvangst is ingeschakeld, selecteert Intel(R) PROSet II automatisch een primaire voorkeursadapter. Welke adapter door Intel PROSet II wordt gekozen als primaire voorkeursadapter, is niet afhankelijk van het adaptermodel of de snelheid.

•	Als u de taakverdeling bij ontvangst uitschakelt, wordt al het binnenkomende verkeer verwerkt door de primaire adapter.

5.	In de lijst staan alle adapters die op dit moment geen deel uitmaken van een team. Klik in de lijst op de adapters die u wilt opnemen in het team en klik op Volgende.

6.	Klik op Voltooien.

7.	Desgewenst kunt u een van de adapters in het team opgeven als de primaire adapter. Om een primaire adapter op te geven, klikt u met de rechtermuisknop op de gewenste adapter en klikt u vervolgens op Primaire voorkeursadapter.
Als u besluit om zelf geen primaire adapter te selecteren, selecteert Intel PROSet II de primaire adapter.

8.	Klik op Sluiten om Intel PROSet II te sluiten en de wijzigingen toe te passen.

Het team is nu geconfigureerd.

OPMERKING:  Wanneer u in Intel PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


Adapter toevoegen aan een bestaand team

U kunt op elk moment een adapter toevoegen aan een bestaand team.

OPMERKING:  In dynamische 802.3ad-teams kan het wijzigen van de configuratie leiden tot een tijdelijke onderbreking van verkeersstroom omdat de verbindingsaggregatoren opnieuw berekend moeten worden door de switch.

Een adapter toevoegen aan een bestaand team met Intel® PROSet II

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een teamvermelding.

2.	Klik op Adapter toevoegen aan team en selecteer de adapter die u wilt toevoegen.

De adapter is nu deel van het team.

OPMERKING:  Wanneer u in Intel(R)  PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


VLAN toevoegen
Een VLAN maken

Een VLAN is een logische groepering van adapters die zo zijn geconfigureerd dat de netwerkbeveiliging beter is en de afmetingen van broadcast-domeinen verminderen.

Een VLAN maken:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een team of een adapter die geen deel uitmaakt van een team.

2.	Klik op VLAN toevoegen.
Het dialoogvenster Nieuw VLAN toevoegen verschijnt.

3.	Typ in het veld VLAN-ID het nummer van het VLAN toegewezen aan de adapter.  De VLAN-ID moet overeenkomen met de VLAN-ID geconfigureerd op de switch.
OPMERKING: VLAN-nummers 0 en 1 zijn vaak gereserveerd. Controleer de documentatie over de switch voor meer informatie.

4.	Typ in het veld VLAN-naam een label voor het VLAN. Bijvoorbeeld, Marketing of Engineering. Deze naam hoeft niet overeen te komen met de naam op andere netwerkapparaten. De naam is alleen bedoeld voor identificatiedoeleinden.

5.	Klik op OK.

De adapter is nu geconfigureerd als lid van een VLAN. Nadat u de adapter hebt ingesteld als lid van een VLAN, moet u de configuratie van het VLAN voltooien door ook voor andere netwerkapparaten VLAN-informatie in te stellen.

OPMERKING:  Wanneer u in Intel(R)  PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


VLAN verwijderen

Wanneer u een VLAN wilt verwijderen, moet u Intel(R) PROSet II gebruiken. Wanneer u een VLAN verwijdert of uitschakelt via het onderdeel Netwerk van het besturingssysteem, kan dit gevolgen hebben voor de systeemstabiliteit en de adapterconfiguratie.

Een VLAN verwijderen uit een team of van een adapter:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een VLAN.

2.	Klik op VLAN verwijderen.

Het VLAN is nu verwijderd uit het team of van de adapter.

OPMERKING:  Wanneer u in Intel PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


Adapterteam verwijderen

Als u een adapterteam wilt verwijderen, moet u Intel(R) PROSet II gebruiken. Wanneer u een team verwijdert of uitschakelt via het onderdeel Netwerk van het besturingssysteem, kan dit gevolgen hebben voor de systeemstabiliteit en de adapterconfiguratie.

Een adapterteam in zijn geheel verwijderen:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een teamvermelding.

2.	Klik op Verwijderen.

3.	Er verschijnt een bevestigingsbericht.  Klik op Ja.

Het team is nu verwijderd. De adapters functioneren nu als afzonderlijke apparaten.

OPMERKING: als u voor het team VLAN's of filters voor Prioriteitspakket hebt gemaakt, worden deze met het team verwijderd.  Als u voor een adapter VLAN's of filters voor prioriteitspakketten hebt gemaakt voordat de adapter lid werd van het team, worden deze ook met het team verwijderd.


Modus adapterteam wijzigen

De teammodus van een adapterteam wijzigen:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een teamvermelding.

2.	Klik op Teammodus wijzigen en klik dan op een van de volgende opties:

•	Fouttolerantie van adapters

•	Fouttolerantie van switches

•	Adaptieve taakverdeling
Wanneer u de teammodus wijzigt in Adaptieve taakverdeling, wordt standaard de taakverdeling bij ontvangst uitgeschakeld. Als u de taakverdeling bij ontvangst wilt inschakelen, wijzigt u de teammodus en schakelt u taakverdeling bij ontvangst in op het tabblad Geavanceerd van Teaming.

•	Verbindingsaggregatie (Dynamic_3ad* / GEC / LA / 802.3ad statische modus)

De teammodus is nu gewijzigd.

OPMERKING:  Wanneer u in Intel(R)  PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


Adapter verwijderen uit een team

U kunt op elk moment een adapter verwijderen uit een bestaand team.

OPMERKING:  In dynamische 802.3ad-teams kan het wijzigen van de configuratie leiden tot een tijdelijke onderbreking van verkeersstroom omdat de verbindingsaggregatoren opnieuw berekend moeten worden door de switch.

Een adapter verwijderen uit een team:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een team.

2.	Klik op Verwijderen uit team.

3.	Klik op OK om de instelling toe te passen.

De adapter maakt nu geen deel meer uit van het team.

OPMERKING:  Wanneer u in Intel(R)  PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


VLAN-eigenschappen wijzigen

U kunt de adapter opnieuw configureren als lid van een ander VLAN door de VLAN-ID te wijzigen. Als u de VLAN-ID die is gekoppeld aan de adapter, wijzigt, wordt de adapter verwijderd uit het bestaande VLAN en wordt de communicatie met de computers in het bestaande VLAN afgebroken.

Bijvoorbeeld: als u de VLAN-ID wijzigt van 7 in 9, communiceert de computer niet meer met de computers in VLAN 7. In plaats daarvan communiceert de computer met computers in VLAN 9.

VLAN-configuratie wijzigen:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een VLAN.

2.	Klik op VLAN-eigenschappen wijzigen.

3.	Typ in het veld VLAN-ID het nummer van het VLAN toegewezen aan de adapter.  De VLAN-ID moet overeenkomen met de VLAN-ID geconfigureerd op de switch.
OPMERKING: VLAN-nummers 0 en 1 zijn vaak gereserveerd. Controleer de documentatie over de switch voor meer informatie.

4.	Typ in het veld VLAN-naam een label voor het VLAN. Bijvoorbeeld, Marketing of Engineering. Deze naam hoeft niet overeen te komen met de naam op andere netwerkapparaten. De naam is alleen bedoeld ter informatie.

5.	Klik op OK om Intel(R) PROSet II te sluiten.

De VLAN-configuratie is nu bijgewerkt.

OPMERKING:  Wanneer u in Intel(R)  PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.

Zie ook:

GVRP inschakelen

Geavanceerde instellingen voor VLAN’s


Een adapter opgeven als primair of secundair

Binnen elk team is er één primaire adapter en één of meer secundaire adapters.

U kunt de primaire adapter van een team handmatig instellen of u kunt Intel(R) PROSet II de primaire adapter laten selecteren.

•	Als u een primaire adapter selecteert, wordt de geselecteerde adapter de primaire voorkeursadapter. Zolang de Primaire voorkeursadapter actief is, zal deze verkeer verzenden en ontvangen. Als zich een fout voordoet in de primaire voorkeursadapter en deze later weer actief wordt gemaakt, wordt de besturing automatisch teruggegeven aan de primaire voorkeursadapter.

Als u bijvoorbeeld een server hebt met een Intel(R) PRO/1000 Gigabit-adapter als de primaire adapter en een Intel(R) PRO/100+ of PRO/100 S-adapter als de secundaire adapter, wilt u waarschijnlijk de Intel PRO/1000 Gigabit-adapter opgeven als de primaire voorkeursadapter. Als in dit scenario een fout optreedt in de Intel PRO/1000-adapter, neemt de Intel PRO/100+ of PRO/100 S de taken over. Als de Intel PRO/1000-adapter wordt vervangen, neemt deze automatisch opnieuw de rol op zich van primaire adapter van het team.

Als u handmatig een primaire adapter selecteert, is er altijd een primaire voorkeursadapter in het team.

•	Als u geen adapter instelt als primaire adapter, selecteert Intel PROSet II de meest geschikte adapter, op basis van het adaptermodel en de snelheid. In dat geval is er dus wel een primaire adapter, maar geen primaire voorkeursadapter. Als er geen primaire voorkeursadapter is, selecteert Intel PROSet II een andere adapter als primaire adapter wanneer zich een fout voordoet in de oorspronkelijke primaire adapter.

Als zich bijvoorbeeld een fout voordoet in de primaire adapter, een Intel(R) PRO/1000 Gigabit-adapter, kan Intel PROSet II een andere adapter in het team aanwijzen als de primaire adapter.  Als de Intel(R) PRO/1000-adapter weer actief wordt, wordt deze lid van het team, maar niet als de primaire adapter.

Een adapter opgeven als een primaire of secundaire adapter:

1.	Klik in het overzicht van de netwerkcomponenten met de rechtermuisknop op een adapter die deel uitmaakt van een team.

2.	Klik op Voorkeur voor primair of Voorkeur voor secundair.

De adapter heeft nu de geconfigureerde status.

De status van een adapter wijzigen:

Als u de status van een adapter wilt wijzigen, kunt u de procedure gebruiken die hierboven is beschreven.

STP- en SFT-teams:  als u een andere adapter tot de primaire (actieve) adapter van een team maakt, wordt dat team opnieuw geladen en wordt daarbij het MAC-adres van de nieuwe primaire adapter gebruikt. En wanneer u het lokaal beheerde adres van een team wijzigt, zal het team ook opnieuw worden geladen en een nieuw MAC-adres krijgen. Als deze acties worden uitgevoerd op een team met fouttolerantie van switches terwijl de server actief is in het netwerk, zal het team niet meer in staat zijn om te communiceren, totdat de ARP-tabellen van alle netwerkapparaten zijn bijgewerkt met de adresgegevens van de nieuwe primaire adapter. Hoe lang het duurt voor de ARP-tabellen worden bijgewerkt, kan op sommige routers en in sommige besturingssystemen worden ingesteld met een parameter voor de time-outperiode van de ARP-cache. Het team kan tot tien minuten niet beschikbaar zijn, afhankelijk van de instelling van deze parameter.

OPMERKING: De optie Voorkeur voor secundair is pas beschikbaar als u een primaire voorkeursadapter hebt geselecteerd.


PROSet-pictogram op taakbalk
Intel(R) PROSet II-pictogram op de taakbalk

Wanneer u Intel(R) PROSet II installeert, verschijnt een Intel PROSet II-pictogram op de taakbalk, in de buurt van de klok.

Als u met de rechtermuisknop op het pictogram klikt, worden de volgende opties weergegeven:

Opdracht	Beschrijving
Intel(R) PROSet II starten	Hiermee wordt de Intel PROSet II-software weergegeven.
Status tonen voor	Hiermee wordt de naam van de geïnstalleerde draadloze adapters weergegeven.
Pictogram op taakbalk verbergen	Hiermee wordt het pictogram op de taakbalk verborgen.   Doe het volgende om het pictogram opnieuw in de taakbalk weer te geven: Klik op het tabblad Algemeen van Intel PROSet II op Pictogram op taakbalk.
Afsluiten	Hiermee sluit u Intel PROSet II en wordt het pictogram tijdelijk verwijderd van de taakbalk.  Hoewel het pictogram niet langer zichtbaar is, kunt u Intel PROSet II nog steeds starten door te dubbelklikken op het pictogram van Intel PROSet II in het Configuratiescherm. Wanneer de computer opnieuw wordt gestart, verschijnt het pictogram van Intel PROSet II weer op de taakbalk.
Afsluiten en niet starten bij opnieuw opstarten	Hiermee wordt het pictogram van Intel PROSet II verwijderd en wordt voorkomen dat het opnieuw wordt weergegeven wanneer de computer opnieuw wordt opgestart. Als u het pictogram op de taakbalk wilt herstellen nadat u deze optie hebt gekozen, gaat u als volgt te werk:  1. Klik op Start > Uitvoeren. 2. Typ PROMON in het vak Openen en klik op OK.   Het pictogram van Intel PROSet II blijft op de taakbalk staan totdat de computer opnieuw wordt gestart. Als u het pictogram altijd wilt weergeven op de taakbalk, selecteert u Pictogram bij opstarten weergeven op taakbalk.
Pictogram bij opstarten weergeven op taakbalk	Hiermee wordt het taakbalkpictogram van Intel PROSet II zo geconfigureerd, dat het in de taakbalk wordt weergegeven. Met deze optie zorgt u ervoor dat het taakbalkpictogram zichtbaar is nadat de computer opnieuw wordt opgestart. OPMERKING: Deze optie is alleen beschikbaar als u de optie Afsluiten en niet starten bij opnieuw opstarten hebt ingesteld.


Technische details Slim uitschakelen
Details Slim uitschakelen

Slim uitschakelen is een energiebesparende methode die wordt gebruikt voor op Intel 82558, 82559 en 82550 gebaseerde adapters, om het energieverbruik te verminderen als er geen geldige verbinding is. Met de optie Slim uitschakelen kunnen adapters overschakelen op een slaapstand die tot 150% meer energie kan besparen. Slim uitschakelen wordt geactiveerd wanneer:

•	De adapter geen geldige verbinding heeft

•	Het besturingssysteem de slaapstand heeft geactiveerd

In beide scenario's plaatst het besturingssysteem de adapter (als Slim uitschakelen is ingeschakeld) in een slaapstand en wordt het algehele energieverbruik verminderd. Normaal energieverbruik en activiteit van de adapter worden hervat wanneer de adapter weer een geldige verbinding heeft of wanneer het besturingssysteem de slaapstand verlaat.


Bericht Kan het apparaat niet verwijderen

Als u probeert de vermelding van een adapterteam of een VLAN te verwijderen met behulp van Apparaatbeheer, zal het volgende bericht verschijnen: "Kan het apparaat niet verwijderen. Het apparaat is mogelijk nodig voor het starten van de computer."

Dit bericht betekent dat u Apparaatbeheer niet kunt gebruiken voor het verwijderen van een virtuele adapter die is gemaakt met Intel(R) PROSet II.  Als u adapters wilt verwijderen uit Apparaatbeheer, moet u Intel PROSet II gebruiken.

Zie ook:

Adapterteam verwijderen

VLAN verwijderen

GVRP inschakelen


Geavanceerde instellingen voor VLAN's

Geavanceerde VLAN-instellingen aanpassen:

1.	Klik op de vermelding van een VLAN overzicht van de netwerkcomponenten.

2.	Klik op het tabblad Geavanceerd.

3.	Klik op NumTxPackets in de vervolgkeuzelijst en typ de nieuwe waarde.
Met NumRxPackets definieert u het aantal receive-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om ontvangen pakketten toe te wijzen aan geheugen. Voor elk ontvangen pakket is een receive-descriptor vereist en elke descriptor neemt 2KB geheugen in beslag.

U kunt ervoor kiezen om het aantal receive-descriptors te verhogen als u denkt dat de prestaties bij ontvangst van gegevens een duidelijke verslechtering vertonen. Als de ontvangstprestaties geen probleem vormen, gebruikt u de standaardwaarde.

Waarschuwing: wijzigen van deze waarde kan nadelige gevolgen hebben voor de systeemprestaties.

4.	Klik op NumTxPackets in de vervolgkeuzelijst en typ de nieuwe waarde.

Met  NumTxPackets definieert u het aantal verzend-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer verzend-descriptors, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal verzend-descriptors te verhogen. Het vergroten van het aantal verzend-descriptors kan leiden tot betere transmissieprestaties, maar de descriptors leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de standaardwaarde.

Waarschuwing: wijzigen van deze waarde kan nadelige gevolgen hebben voor de systeemprestaties.

5.	Klik op OK.

6.	Voor het VLAN zijn nu aangepaste instellingen opgegeven.

Het VLAN is nu aangepast.

OPMERKING:  Wanneer u in Intel(R)  PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


IPSec inschakelen

IPSec (IP Security) is een verzameling standaarden die is ontwikkeld door het IETF (Internet Engineering Task Force) waarmee IP-communicatie wordt beschermd doordat wordt gecontroleerd of gegevenspakketten zijn gewijzigd tijdens het verzenden. Raadpleeg de website voor ondersteuning van Intel: http://support.intel.com  voor gedetailleerde informatie over IPSec of raadpleeg de Packet Protect User Guide als u Intel(R) Pakketbescherming gebruikt.

Vereisten

U kunt IPSec in Intel(R) PROSet II in- of uitschakelen als aan de volgende voorwaarden wordt voldaan:

•	U gebruikt een van de volgende besturingssystemen:

•	Windows* 98

•	Windows NT* 4.0, SP5 of hoger

•	Windows Me

•	U gebruikt een Intel® PRO/100-adapter

Als u Windows 2000 of Windows XP gebruikt, is IPSec beschikbaar als module van Microsoft Management Console. Raadpleeg de documentatie bij het besturingssysteem voor meer informatie over de implementatie van IPSec in deze besturingssystemen.

IPSec inschakelen

1.	Klik met de rechtermuisknop op een team of een adapter die geen deel uitmaakt van een team in het overzicht van netwerkcomponenten en selecteer vervolgens IPSec inschakelen.

2.	Start de computer opnieuw.

3.	Installeer de software van Intel(R) Pakketbescherming.
OPMERKING:  Als u Pakketbescherming wilt installeren, moet u de optie IPSec inschakelen selecteren voor ten minste een adapter of adapterteam voordat u Pakketbescherming daadwerkelijk installeert.

IPSec is nu ingeschakeld.

IPSec uitschakelen

Klik met de rechtermuisknop op een team of een adapter die geen deel uitmaakt van een team in het overzicht van netwerkcomponenten en schakel vervolgens IPSec inschakelen uit.

Codering offloaden op Intel(R) PRO/100 S-adapters

De adapters van de Intel(R) PRO/100 S-familie kunnen het verwerken van de codering tijdens IPSec-transacties offloaden. Adapters die het verwerken van codering afhandelen, zorgen ervoor dat de CPU minder wordt belast. De mogelijkheden voor offloaden inschakelen:

1.	Schakel IPSec in met Intel Pakketbeveiliging of, als op de computer Windows 2000 of XP wordt uitgevoerd, met Microsoft Management Console.

2.	Selecteer in Intel PROSet II, in het overzicht van netwerkcomponenten, de Intel PRO/100 S-adapter die u de verwerking van IPSec-codering wilt laten afhandelen.

3.	Klik op het tabblad Geavanceerd.

4.	Klik in de keuzelijst Instelling op Offloading.

5.	Selecteer IPSec in het vak Waarde.

6.	Klik op OK.

De adapter is nu geconfigureerd voor het offloaden van het verwerken van de codering die normaal gesproken door de CPU wordt uitgevoerd.


GVRP-ondersteuning

Werkstations en switches maken gebruik van GVRP (GARP VLAN Registration Protocol) om dynamische VLAN's te maken, te wijzigen en te verwijderen. Switches waarop GVRP is ingeschakeld, kunnen de switchpoort van VLAN-leden identificeren en de status van het VLAN bijhouden.

Vereisten

Voor de ondersteuning van GVRP in het netwerk moet GRVP worden ingeschakeld op adapters en switches.

GVRP inschakelen op een adapter:

1.	Klik in het overzicht van netwerkcomponenten met de rechtermuisknop op een adapter in een team die ten minste één VLAN heeft.

2.	Klik op GVRP-ondersteuning.
Het dialoogvenster GVRP-ondersteuning verschijnt.

3.	Klik op Ingeschakeld.

4.	Typ in het vak GVRP Join Time het aantal milliseconden tussen de switchopdracht GVRP LEAVE en de PROSet II-opdracht GVRP Join. Standaard initieert Intel(R) PROSet II een opdracht Join 200 ms na een Leave-opdracht.

5.	Klik op OK.

GVRP is nu ingeschakeld voor de adapter.

Problemen oplossen

Aangezien er verschillende implementaties van GVRP zijn, betekent het inschakelen van GVRP op de adapter geen garantie op GVRP-compatibiliteit tussen netwerkapparaten. Als GVRP niet goed lijkt te functioneren, schakelt u GVRP uit op de adapter.

OPMERKING:  Wanneer u in Intel PROSet II meerdere wijzigingen wilt aanbrengen in teams of VLAN's, is het raadzaam om Intel PROSet II na elke wijziging af te sluiten, zodat de wijziging van kracht wordt.  Vervolgens kunt u Intel PROSet II opnieuw opstarten om de volgende wijziging aan te brengen.


Windows NT 4.0 Service Packs
Windows NT* 4.0 Service Packs

Als u Intel(R) PROSet II en de meest geavanceerde teaming-functies wilt gebruiken, moet u de installatie van Windows NT 4.0 bijwerken naar service pack 6a of hoger.

Ga naar http://www.microsoft.com/ntserver/ voor informatie over service pack van Microsoft, waar u service packs met bijbehorende instructies kunt downloaden.


Geavanceerde instellingen voor PRO/1000-desktopadapters

OPMERKING:  overleg altijd eerst met de netwerkbeheerder, voordat u wijzigingen aanbrengt in deze instellingen. Als geavanceerde instellingen worden geconfigureerd op een manier die niet compatibel is met andere netwerkapparaten, kan dat nadelige gevolgen hebben voor de adapter- of systeemprestaties.

Adaptieve afstand tussen frames

Biedt compensatie bij veel conflicten tussen Ethernet-pakketten in het netwerk.

Ondersteunde adapters	Alle
Standaardwaarde	ingeschakeld

Adaptief antwoord koppeling

Hiermee wordt het opstarten van het systeem versneld wanneer de kabel niet is aangesloten op de adapter, door het overslaan van opstartroutines waarvoor een verbinding met het netwerk vereist is. Het opstarten gaat hierdoor aanzienlijk sneller.

Als adaptief antwoord koppeling is ingeschakeld voor Intel Ethernet-controllers en er geen netwerkkabel is aangesloten op de RJ-45-poort, wordt de netwerkverbinding uitgeschakeld. Er verschijnt een geel waarschuwingspictogram naast de netwerkverbinding in Apparaatbeheer.

Als u de netwerkverbinding opnieuw wilt inschakelen, moet u de netwerkkabel aansluiten op de RJ-45-poort en de computer opnieuw opstarten.

Ondersteunde adapters	Niet beschikbaar op elk adaptermodel.
Standaardwaarde	Uit
Aanbevolen	Aan
Bereik	Aan, Uit
OPMERKING: Adaptieve verbindingsrespons (Adaptive Link Response - ALR) werkt niet als een draadloze adapter actief is in het systeem.

Coalesce-buffers

Hiermee worden de transmissieprestaties verbeterd door het aantal coalesce-buffers aan te passen. Deze buffers maken het voor de adapter mogelijk gegevenssegmenten samen te voegen voordat pakketten worden verzonden.

Als het aantal coalesce-buffers wordt gewijzigd, moet ook de instelling van Verzend-descriptors worden aangepast. Coalesce-buffers moet worden ingesteld op 30 - 50% van Verzend-descriptors. Als de instelling van het aantal coalesce-buffers niet wordt aangepast aan het aantal verzend-descriptors, is het mogelijk dat de transmissieprestaties niet verbeteren.

Met coalesce-buffers kunnen de transmissieprestaties aanzienlijk worden verbeterd voor computers met Windows NT 4.0. De transmissieprestaties kunnen ook worden verbeterd voor computers met Windows 98 en 2000.

Ondersteunde besturingssystemen	Windows NT 4.0, 98, 2000, XP
Ondersteunde adapters	Alle
Standaardwaarde	128
Bereik	16-768
PME inschakelen

Hiermee worden de Wake on-mogelijkheden van de adapter ingeschakeld of uitgeschakeld op computers die oudere implementaties van geavanceerd energiebeheer hebben. Met Wake on ingeschakeld kan de adapter uit stand-by of uitgeschakeld worden gehaald door bepaalde typen pakketten, zoals ARP-pakketten.

•	Wanneer u deze voorziening uitschakelt, worden alle Wake on-instellingen op computers met oudere implementaties van energiebeheer uitgeschakeld.

•	Wanneer u de voorziening inschakelt, kan de adapter reageren op Wake on-signalen. Als u de adapter zo wilt configureren dat deze reageert op specifieke pakketsoorten, raadpleegt u de informatie over de Wake on-instellingen verderop in dit bestand.

•	Met de waarde Hardwarestandaard wordt de adapter gedwongen om de Wake on-mogelijkheden te configureren op basis van de systeemhardware.

•	De waarde Geen actie schakelt u voor de adapter de standaardinstelling van het besturingssysteem in.

Als u alle Wake on-instellingen wilt uitschakelen, stelt u deze optie in op Uitgeschakeld. Is dat niet het geval, dan gebruikt u de waarde Geen actie.

Ondersteunde adapters	Adapters gebaseerd op 82559. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld
Voltooiing snel verzenden

Optimaliseert de transmissieprestaties door verzend-descriptors vrij te maken voor hergebruik, voordat pakketten worden verzonden over het netwerk.

•	Als Voltooiing snel verzenden is uitgeschakeld, moet de adapter wachten totdat pakketten verzonden zijn om verzend-descriptors opnieuw te kunnen gebruiken.

•	Als Voltooiing snel verzenden is ingeschakeld, kan de adapter de verzend-descriptors sneller opnieuw gebruiken, waardoor de transmissieprestaties van de adapter verbeteren.

Ondersteunde adapters	Adapters gebaseerd op 82544. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Aan
Bereik	Aan, Uit
Datatransportbesturing

Hiermee worden adapters in staat gesteld om het verkeer effectiever te regelen.

•	Wanneer wachtrijen van adapters een vooraf gedefinieerde limiet bereiken, genereren de adapters transportbesturingsframes. Het genereren van transportbesturingsframes laat de verzender weten dat de transmissie vertraagd moet worden.

•	Adapters reageren op transportbesturingsframes door de verzending van pakketten te pauzeren gedurende de tijd die is opgegeven in het transportbesturingsframe.

Door adapters in staat te stellen om de verzending van pakketten aan te passen op basis van transportbesturingsframes, wordt voorkomen dat pakketten verloren gaan.

OPMERKING: als adapters van deze voorziening gebruik willen maken, moeten verbindingspartners ondersteuning bieden voor transportbesturingsframes.

Ondersteunde adapters	Op 82540 en 82544 gebaseerde adapters, verzending en ontvangst. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Transportbesturingsframes genereren en erop reageren
Bereik	• Uit, Antwoorden, Genereren, Genereren en Antwoorden, Hardwarestandaard

Jumbo-frames

OPMERKING: Jumbo-frames worden alleen ondersteund met een snelheid van 1000 Mbps. Als u jumbo-frames gebruikt met een snelheid van 10 of 100 Mbps, kan dit een negatieve invloed hebben op de prestaties of kan de verbinding worden verbroken.

Hiermee schakelt u het gebruik van jumbo-frames in of uit. Jumbo-frames kunnen de doorvoercapaciteit vergroten en het CPU-gebruik verminderen door meer gegevens in elk frame te plaatsen, waardoor minder frames hoeven te worden verzonden. Standaard bevat een Ethernet-frame 1514 bytes, terwijl jumbo-frames 4088, 9014 of 16128 bytes kunnen bevatten.

U kunt jumbo-frames alleen inschakelen als alle apparaten in het netwerk jumbo-frames ondersteunen en zijn geconfigureerd voor het gebruik van frames van dezelfde grootte. Wanneer u het gebruik van jumbo-frames instelt voor andere netwerkapparaten, moet u er wel rekening mee houden dat apparaten de omvang van jumbo-frames op verschillende manieren kunnen berekenen. Sommige apparaten rekenen de header-informatie mee in de omvang van frames en andere niet. Intel-adapters rekenen header-informatie niet mee in de omvang van frames.

Zie Jumbo-frames voor meer informatie.

Ondersteunde adapters	Alle
Standaardwaarde	Uitgeschakeld
Bereik	Uitgeschakeld (1514), 4088, 9014 en 16128. (Stel de switch 4 bytes hoger in voor CRC, plus 4 bytes als u gebruik maakt van VLAN's of gecodeerde QoS-pakketten.)  OPMERKING: elke waarde in het bereik (1514-16128) kan worden ingesteld in de Windows-registersleutel MaxFrameSize.
Lokaal beheerd adres

Hiermee wordt het MAC-adres van de adapter uitgeschakeld. Als u een nieuw netwerkadres wilt opgeven, typt u een hexadecimaal getal van 12 cijfers in het vak Waarde.

Ondersteunde adapters	Alle
Standaardwaarde	Geen
Bereik	0000 0000 0001 - FFFF FFFF FFFD Uitzonderingen: • Gebruik geen multicast-adres (Minst significante bit van de hoge byte = 1).  • Gebruik niet alleen nullen of alleen de letter F. Geen instelling: hiermee wordt het oorspronkelijke netwerkadres van de adapter weer hersteld.
Gebruikers van Windows 98 SE:

Als u het standaardadres wilt gebruiken nadat u een handmatig toegewezen adres hebt gebruikt, moet u een van de volgende procedures uitvoeren:

•	Selecteer Lokaal beheerd adres op het tabblad Geavanceerd van het dialoogvenster Netwerkeigenschappen en wijzig vervolgens de waarde in 0. Klik op OK om deze instelling toe te passen.

•	Klik op het tabblad Geavanceerd in Intel PROSet II, klik vervolgens op Standaardinstellingen herstellen of wis alle tekens in het veld Waarde. Klik op OK om de instelling toe te passen.

Gebeurtenis verbindingsstatus vastleggen

Deze instelling wordt gebruikt om het vastleggen van wijzigingen in de verbindingsstatus in of uit te schakelen. Als deze instelling is ingeschakeld, wordt bij een gebeurtenis voor het tot stand brengen of het verbreken van de verbinding een bericht gegenereerd dat wordt weergegeven in het systeemgebeurtenislogboek. Beheerders kunnen het bericht over de gebeurtenis bekijken in het systeemgebeurtenislogboek.

De volgende gebeurtenissen worden vastgelegd.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Ondersteunde adapters	Alle
Standaardwaarde	Enable
Bereik	Inschakelen, Uitschakelen
Offload TCP-controlesom ontvangst

Hiermee wordt de adapter in staat gesteld om de TCP- of UDP-controlesom van binnenkomende pakketten te verifiëren.

•	Als offloading uitgeschakeld is, verifieert het besturingssysteem de TCP-controlesom.

•	Als offloading ingeschakeld is, voert de adapter de verificatie uit voor het besturingssysteem.

Met deze voorziening worden de ontvangstprestaties verbeterd en het CPU-gebruik verminderd.

Ondersteunde besturingssystemen	• Windows XP* • Windows 2000 • Offloading wordt niet door Windows 98 ondersteund.
Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	• Windows* XP: Aan • Windows 2000: Uit
Bereik	Aan, Uit
Offload IP-controlesom transmissie

Hiermee wordt de adapter in staat gesteld om de IP-controlesom van uitgaande pakketten te berekenen.

•	Als offloading uitgeschakeld is, verifieert het besturingssysteem de IP-controlesom.

•	Als offloading ingeschakeld is, voert de adapter de verificatie uit voor het besturingssysteem.

Met deze voorziening worden de IP-transmissieprestaties verbeterd en het CPU-gebruik verminderd.

Ondersteunde besturingssystemen	• Windows XP* • Windows 2000 • Offloading wordt niet door Windows 98 ondersteund.
Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Aan
Bereik	Aan, Uit
Offload TCP-controlesom transmissie

Hiermee wordt de adapter in staat gesteld om de TCP- of UDP-controlesom van uitgaande pakketten te berekenen.

•	Als offloading uitgeschakeld is, verifieert het besturingssysteem de TCP-controlesom.

•	Als offloading ingeschakeld is, voert de adapter de verificatie uit voor het besturingssysteem.

Met deze voorziening worden de TCP- en UDP-transmissieprestaties verbeterd en het CPU-gebruik verminderd.

Ondersteunde besturingssystemen	• Windows XP* • Windows 2000 • Offloading wordt niet door Windows 98 ondersteund.
Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Aan
Bereik	Aan, Uit OPMERKING: stel deze voorziening in op Uit als de server ondersteuning biedt voor op DOS gebaseerde clients.
Codering QoS-pakketten

Hiermee wordt de adapter in staat gesteld om gecodeerde IEEE 802.3ac-frames te verzenden en te ontvangen. Het gaat daarbij om:

•	802.1p QoS-codes (Quality of Service) die vereist zijn voor pakketten met gecodeerde prioriteit en

•	802.1Q-codes die vereist zijn voor VLAN's

Intel PROSet II schakelt automatisch de 802.1p-codering in wanneer u een VLAN instelt.

Ondersteunde adapters	Op 82559-gebaseerde adapters en latere. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld
Receive-descriptors

Hier definieert u het aantal receive-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om ontvangen pakketten toe te wijzen aan geheugen. Voor elk ontvangen pakket is een receive-descriptor vereist en elke descriptor neemt 2KB geheugen in beslag.

U kunt ervoor kiezen om het aantal receive-descriptors te verhogen als u denkt dat de prestaties bij ontvangst van gegevens een duidelijke verslechtering vertonen. Als de ontvangstprestaties geen probleem vormen, gebruikt u de standaardwaarde 256.

Ondersteunde adapters	Alle
Standaardwaarde	160
Bereik	80-2048
Offload TCP-segmentatie

Hiermee wordt de adapterhardware in staat gesteld om gegevens te segmenteren in geldige Ethernet-frames.

•	Als de TCP-segmentatie uitgeschakeld is, segmenteert het besturingssysteem de gegevens alvorens die naar de adapter te verzenden voor transmissie.

•	Als de TCP-segmentatie ingeschakeld is, segmenteert de adapter de gegevens in frames.

Omdat de adapterhardware de segmentatie van gegevens veel sneller kan uitvoeren dan het besturingssysteem, gaan met deze voorziening de transmissieprestaties aanzienlijk vooruit. Bovendien gebruikt de adapter minder CPU-bronnen.

Ondersteunde besturingssystemen	Windows XP
Ondersteunde adapters	Alleen op 82544 en 82540 gebaseerde adapters. Zie Adapterspecificaties voor hulp bij het identificeren van uw adapter.
Standaardwaarde	1
Bereik	0 = deze voorziening niet adverteren; 1 = deze voorziening adverteren.

Verzend-descriptors

Hier definieert u het aantal verzend-descriptors. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer verzend-descriptors, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal verzend-descriptors te verhogen. Het vergroten van het aantal verzend-descriptors kan leiden tot betere transmissieprestaties, maar de descriptors leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de standaardwaarde 256.

Ondersteunde adapters	Alle
Standaardwaarde	256
Bereik	80-2048
Wake on Link-instellingen

Haalt de computer uit stand-by als een netwerkverbinding wordt gemaakt. Deze voorziening kan in- of uitgeschakeld zijn, of de besturingssysteem kan de standaardwaarde gebruiken.

Ondersteunde besturingssystemen	Windows 9x, Windows 2000, Windows XP
Bereik	Uitgeschakeld, geforceerd, bepaald door besturingssysteem
Standaardwaarde	Uitgeschakeld

Wake on-instellingen

Deze instellingen hebben betrekking op voorzieningen die kunnen worden geactiveerd door het besturingssysteem of met Intel PROSet. De versie van Windows die u gebruikt, bepaalt hoe deze voorzieningen werken en of ze ondersteund worden.

In de volgende versies van Windows worden wel Wake on-instellingen ondersteund: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional en Windows Server 2003. Deze voorziening wordt niet ondersteund onder Windows Server 2003 voor systemen met 64-bits Itanium(R)-processoren.

Wake On-instellingen inschakelen

U kunt Intel PROSet gebruiken om de Wake on-instellingen voor de adapter te configureren. Voordat u de Wake On-instellingen selecteert, moet u het gebruik van de Wake On-instellingen inschakelen in het besturingssysteem. Raadpleeg hiervoor de instructies.

Ga als volgt te werk om Wake On-instellingen in te schakelen:

6.	Klik in Intel PROSet op het tabblad Geavanceerd.

7.	Selecteer Wake on-instellingen in de keuzelijst Instelling.

8.	Klik op de relevante Wake On-instelling in de keuzelijst Waarde.

9.	Klik op OK of Toepassen.

10.	Als u wilt dat de adapter reageert op deze typen Wake on-pakketten, moet het gebruik van Wake on-instellingen worden ingeschakeld in het besturingssysteem. Als u Wake on-instellingen wilt inschakelen, gaat u naar Apparaatbeheer en schakelt u de optie Dit apparaat mag de computer uit stand-by halen in.

Beschikbare instellingen

De volgende Wake on-instellingen zijn beschikbaar in Intel PROSet:

Instelling	Beschrijving
Uitgeschakeld	Adapter gebruikt geen Wake on-instellingen.
Wake on Magic Packet	Hiermee kan de adapter uit stand-by komen wanneer een Magic Packet wordt ontvangen. Een Magic Packet is een pakket dat 16 aaneengesloten exemplaren bevat van het Ethernet-adres van de ontvangende adapter. Wanneer u deze voorziening configureert, zal Intel PROSet de waarde van het besturingssysteem voor deze voorziening uitschakelen.
Wake on Gericht pakket	Hiermee kan de adapter uit stand-by komen wanneer de adapter een Gericht pakket ontvangt. Dit is een unicast-pakket dat is verzonden naar het MAC-adres van de adapter.  Het protocol moet deze Wake-methode inschakelen in het stuurprogramma. Als u de deze voorziening uitschakelt, zal het stuurprogramma verzoeken om deze Wake-methode in te schakelen, negeren.
Wake on Magic en Gericht pakketten	Hiermee kan de adapter opstarten wanneer een Magic pakket of een Gericht pakket wordt ontvangen.
Gecontroleerd door besturingssysteem	Geeft het besturingssysteem de volledige controle over Wake on-instellingen.

OPMERKING: als meerdere IP adressen geconfigureerd zijn voor één adapter, kan het besturingssysteem Wake up on ARP-patronen aanvragen voor alle geconfigureerde adressen. De adapter wil alleen opstarten in respons tot ARP-pakketten die een query versturen naar het eerste IP-adres in de lijst.

OPMERKING: Wake on-instellingen kunnen de computer niet opstarten als die uitgeschakeld staat (S5). Dit staat is geconfigureerd door de PME-inschakelen instelling op de tab Geavanceerd. Zelfs als de Wake on-instellingen uitgeschakeld zijn, wordt opstarten van S5 bepaald door de PME-inschakelen instelling.

Als het adapter stuurprogramma ingeschakeld is, blijven de PME-instellingen van kracht. Als het stuurprogramma uitgeschakeld is, echter, gaat het apparaat terug naar de standaardwaarde, die de computer wel of niet opstart als die uitgeschakeld staat.

Standaardinstellingen herstellen

Met deze knop worden de standaardwaarden hersteld voor de geselecteerde geavanceerde instelling.  De standaardwaarden voor de instellingen worden hierboven genoemd.  (Deze optie is niet beschikbaar voor alle instellingen.)


Configuratie opslaan of herstellen
Intel(R) PROSet II-configuratie herstellen vanuit een opgeslagen bestand

Als u de de geavanceerde instellingen van een adapter hebt opgeslagen in een bestand, kunt u dat bestand gebruiken om de aangepaste VLAN- en teaminstellingen te herstellen. Wanneer u de Intel PROSet II-configuratie herstelt, worden netwerkinstellingen die specifiek zijn voor het besturingssysteem, zoals IP-adressen en protocolbindingen, niet hersteld.

Voordat u begint

Wanneer u instellingen herstelt, moet u die herstellen op dezelfde computer als waarop ze zijn opgeslagen. Bovendien moeten hetzelfde netwerk en dezelfde hardware zijn geïnstalleerd als bij het opslaan van de oorspronkelijke configuratie. Bijvoorbeeld: als de computer was aangesloten op een Intel gigabyte-switch op het moment dat het configuratiebestand werd opgeslagen, moet de computer op dezelfde switch worden aangesloten wanneer de configuratie wordt hersteld.

De functie voor opslaan/herstellen is compatibel met Windows NT* 4.0, 2000, 98SE, Me en XP.

Voorzichtig: bewerk het configuratiebestand niet. Wanneer het configuratiebestand wordt gewijzigd, wordt het onbruikbaar.

Adapterinstellingen herstellen vanuit een opgeslagen bestand:

1.	Klik in het menu Bestand op Configuratie opslaan/herstellen.
Het dialoogvenster Opslaan/herstellen verschijnt.

2.	Klik op Herstellen.
Het dialoogvenster Openen verschijnt.

3.	Blader naar de map waarin u het configuratiebestand hebt opgeslagen en selecteer het bestand.

4.	Klik op Openen.
Intel PROSet II geeft de herstelde instellingen weer. Deze instellingen worden pas toegepast wanneer u op OK klikt.

5.	Desgewenst kunt u wijzigingen aanbrengen in de adapterconfiguratie.

6.	Klik op OK om Intel(R) PROSet II te sluiten en de herstelde configuratie toe te passen.

Zie ook:

Configuratie opslaan


Waarschuwing bij het toevoegen van een adapter aan een team
Een adapter toevoegen aan een team

Wanneer u een team maakt, moet u ervoor zorgen dat elke adapter lid is van niet meer dan één team. Dit geldt voor teams die worden gemaakt in Intel® PROSet en teams die worden gemaakt met andere configuratieprogramma's. Als één adapter wordt toegevoegd aan meerdere teams, kan dit nadelige gevolgen hebben voor teamfunctionaliteit en team prestaties.

•	Als u Intel PROSet hebt gebruikt om teams te maken, controleert u het overzicht van de netwerkcomponenten om te zien welke adapters al deel uitmaken van een team.

•	Als u andere configuratieprogramma's hebt gebruikt om teams te maken, controleert u de teams en de teamleden in die programma's om er zeker van te zijn dat de adapter nog geen lid is van een team.

Zie ook:

Adapter verwijderen uit een team

Nieuw team maken


In PROSet II navigeren
In Intel(R) PROSet II navigeren

In Intel(R) PROSet II hebt u de beschikking over drie navigatiegebieden:

•	Menu

•	Overzicht van de netwerkcomponenten

•	Tabbladen

Vanuit de menu's kunt u het volgende doen:

•	Teams instellen of IPSec inschakelen met de optie Actie.

•	Configuratie-informatie van een adapter, VLAN of teams opslaan of herstellen met de optie Extra.

•	Het on line Help-systeem gebruiken of toegang krijgen tot de Intel website voor ondersteuning.

Vanuit het overzicht van de netwerkcomponenten kunt u het volgende doen:

•	Eén keer op een adapter klikken om details en configuratie-instellingen van de adapter te bekijken.

•	Met de rechtermuisknop op een adapter klikken om IPSec in te stellen.

•	Met de rechtermuisknop op een team klikken om teaminstellingen te wijzigen of VLAN's in te stellen.

•	Met de rechtermuisknop op een teamlid klikken om de instellingen van een adapter in het team te wijzigen.

Met de tabbladen kunt u controletaken en configuratietaken voor de adapter uitvoeren.

Pictogram op taakbalk

Met het selectievakje Pictogram op taakbalk kunt u het pictogram van Intel PROSet II op de taakbalk (bij de klok) weergeven of verbergen. Als u het pictogram wilt verbergen, schakelt u het selectievakje uit.

Meer over het pictogram van Intel(R) PROSet II op de taakbalk


Algemene informatie

Klik op een adapter in het overzicht van netwerkcomponenten als u algemene informatie wilt weergeven over een adapter.

Op het tabblad Algemeen kunt u:

•	Basisinformatie over de adapter bekijken

•	De werking van de kabel controleren
OPMERKING: De kabeltest is alleen beschikbaar voor bepaalde adapters.

•	De positie van het adapterslot vaststellen

•	Extra gegevens weergeven


Basisinformatie over de adapter bekijken

Het tabblad Algemeen bevat de volgende informatie over de adapter die is geselecteerd in het overzicht van de netwerkcomponenten.

Ethernet-adres	Het 12-cijferige hexadecimale adres van deze adapter, ook wel MAC-adres genoemd.
Artikelnummer	Het Intel-artikelnummer van deze adapter.
IP-adres	Als u gebruik maakt van het IPv4-protocol, is dit het TCP/IP-adres van deze adapter.   Intel PROSet II geeft nog geen IPv6-adressen weer.
Status netwerk-stuurprogramma	Geeft aan of het Intel netwerk-stuurprogramma is geladen voor de geselecteerde adapter.
Netwerkstatus	Geeft de verbinding, snelheid en duplexmodus van de geselecteerde adapter aan. Welke velden worden weergegeven in het groepsvak Netwerkstatus, is afhankelijk van de adapter.  • Verbindingslampje: Aan betekent dat de adapterkabel is aangesloten op een geldige hub of switchpoort. Uit betekent dat er geen verbinding is. • Snelheid: de snelheid die hier wordt genoemd (1000, 100 of 10) geeft de verbindingssnelheid van de adapter aan. • Activiteitslampje: knippert wanneer de adapter is aangesloten op een netwerk en er activiteit is. Uit betekent dat er geen activiteit is of dat de kabel niet is aangesloten. • Duplex: Full duplex geeft aan dat de adapter tegelijkertijd verkeer verzendt en ontvangt. Half duplex geeft aan dat de adapter gegevens verzendt of ontvangt (geen gelijktijdige verzending en ontvangst).


Snelheid en duplex-modus instellen

Standaard zullen Intel-adapters automatisch onderhandelen over instellingen voor de snelheid en de duplexmodus. Als de adapter er niet in slaagt om een verbinding tot stand te brengen middels automatisch onderhandelen, moet u wellicht de snelheid en duplexmodus handmatig instellen op de adapter en de verbindingspartner. Bijvoorbeeld: als een switch geen ondersteuning biedt voor automatisch onderhandelen of is geconfigureerd met een bepaalde snelheid en duplexmodus, moet u de snelheid en duplexmodus van de adapter handmatig instellen op dezelfde waarden als de switch.

Voorzichtig: als de snelheid en duplexmodus van de adapter niet precies worden ingesteld op de instellingen van de verbindingspartner, kan de netwerkverbinding verloren gaan.

Wanneer automatisch onderhandelen uitgeschakeld is, zijn de volgende instellingen mogelijk voor de snelheid en de duplexmodus:

•	10 Mbps of 100 Mbps Full duplex (hiervoor moet een full duplex-verbindingspartner zijn ingesteld op full duplex). De adapter kan in dit geval tegelijkertijd pakketten verzenden en ontvangen.

•	10 Mbps of 100 Mbps Half duplex (hiervoor moet een verbindingspartner zijn ingesteld op half duplex). De adapter voert maar één bewerking tegelijk uit: verzenden of ontvangen.

Voor meer informatie over het configureren van de snelheid en de duplexmodus, klikt u hieronder op een adapterfamilie:

•	Intel(R) PRO/1000 (koper)
OPMERKING: Intel(R) PRO/1000-adapters met glasvezel werken met een snelheid van 1000 Mbps en gebruiken full duplex.

•	Intel(R) PRO/10 or PRO/100


PRO 10/100-verbindingsconfiguratie
Snelheid en duplexmodus configureren: Intel(R) PRO/10- en PRO/100-adapters

Klik in het overzicht van de netwerkcomponenten op de Intel(R) PRO/10- of PRO/100-adapter die u wilt configureren.

1.	Klik op het tabblad Geavanceerd.

2.	Klik in de lijst Instelling op Verbindingssnelheid en duplexmodus.

3.	Klik in het vak Verbindingssnelheid en duplexmodus op de snelheid en duplexmodus die geschikt zijn voor uw adapter en de verbindingspartner.  Raadpleeg de documentatie bij de verbindingspartner voor informatie over het vaststellen van de snelheid en duplexmodus van de verbindingspartner.

4.	Klik op OK.

5.	Start de computer opnieuw, als u dat gevraagd wordt.

De adapter is nu geconfigureerd met de opgegeven instellingen voor snelheid en duplexmodus.

Voorzichtig: als de snelheid en duplexmodus van de adapter niet precies worden ingesteld op de instellingen van het aangesloten apparaat, kan de netwerkverbinding verloren gaan of kunnen de adapterprestaties achteruit gaan.


Geavanceerde voorzieningen van adapters configureren

Om de geavanceerde voorzieningen van een adapter te bekijken, kiest u een adaptertype:

•	Intel(R) PRO/1000 Desktop

•	Intel(R) PRO/1000 Server

•	Intel(R) PRO/100

•	Intel(R) PRO/100 VE en VM

•	Intel(R)PRO/10


Fouttolerantie van switches

Fouttolerantie van switches (Switch Fault Tolerance, SFT) stelt u in staat om een team van twee adapters aan te sluiten op twee switches. Elke adapter wordt aangesloten op een afzonderlijke switch:

Met fouttolerantie van switches kunnen de volgende storingen worden gedetecteerd:

•	Een storing in een van de adapters

•	Een storing in een kabel waarmee een adapter op de switch is aangesloten

•	Een storing in de switchpoorten die zijn verbonden met de adapters

•	Een storing in een switch die is verbonden met een adapter

In SFT-teams is één adapter de primaire adapter en de andere de secundaire adapter. Bij normale werking staat de secundaire adapter in de standbystand. De adapter verzendt en ontvangt geen verkeer. Als de primaire adapter de verbinding met het netwerk verliest, neemt de secundaire adapter de taken automatisch over.

Adaptersnelheid	Kan gemengd zijn, bijvoorbeeld één adapter met een snelheid van 100 Mbps en een andere met een snelheid van 1000 Mbps.
Protocollen	Alle
Netwerkconfiguratie	• Elke adapter wordt aangesloten op een afzonderlijke switch. • Het Spanning Tree Protocol moet ingeschakeld zijn.
Zie ook:

Info over teaming

Soorten teams


Configuratie opslaan in een extern bestand
Configuratie opslaan in een bestand

U kunt de VLAN- en teamconfiguraties van Intel(R) PROSet II opslaan in een bestand en die configuraties op een later tijdstip herstellen in Intel PROSet. Wanneer u de Intel PROSet II-configuratie opslaat, worden netwerkinstellingen die specifiek zijn voor het besturingssysteem, zoals IP-adressen en protocolbindingen, niet opgeslagen.

De functie voor opslaan/herstellen is compatibel met Windows NT* 4.0, 2000, 98SE, Me en XP.

OPMERKING: wanneer u een configuratie eenmaal met een bepaalde bestandsnaam hebt opgeslagen, kunt u die bestandsnaam daarna niet meer gebruiken. U moet telkens wanneer u de Intel PROSet II-configuratie opslaat, een andere naam gebruiken.

Intel(R) PROSet II-configuratie opslaan

1.	Klik in het menu Bestand op Configuratie opslaan/herstellen.
Het dialoogvenster Opslaan/herstellen verschijnt.

2.	Klik op Opslaan.
Het dialoogvenster Opslaan als verschijnt.

3.	Blader naar de map waarin u het configuratiebestand wilt opslaan en typ een bestandsnaam.

4.	Klik op Opslaan.

5.	Klik op OK.

De Intel PROSet II-configuratie is nu opgeslagen.

Wanneer u de configuratie hebt opgeslagen, mag u het bestand niet bewerken of wijzigen. Wanneer het configuratiebestand wordt gewijzigd, wordt het onbruikbaar.

Zie ook:

Configuratie herstellen


Test Switchconfiguratie

U kunt controleren of verbindingspartners de geconfigureerde teammodus voor adapters ondersteunen, door de test Switchconfiguratie uit te voeren. Als de adapter, bijvoorbeeld, lid is van een Fast EtherChannel*-team, kan Intel (R) PROSet II verifiëren of de verbindingspartners die zijn aangesloten op de adapter, verbindingsaggregatie ondersteunen.

Zie Info over teaming voor specifieke informatie over de vereisten voor elke teammodus.

Waarschuwing: Wanneer deze test wordt uitgevoerd, wordt de verbinding van het team met het netwerk tijdelijk verbroken.

OPMERKING: met deze test worden geen fouten gevonden, wanneer een van de volgende scenario's van kracht is.

Adapterconfiguratie	Switchconfiguratie
Dynamisch 802.3ad	Elke
Adapterteam in modus verbindingsaggregatie zonder VLAN's	Voor de switch geldt de volgende: • De switch behoort niet bij een VLAN • De switch is geconfigureerd met gecodeerde VLAN's
Adapterteam in modus verbindingsaggregatie met VLAN's	Voor de switch geldt: • De switch behoort niet bij het VLAN dat is geconfigureerd op de adapter, en • Voor de switch is verbindingsaggregatie niet gedefinieerd
De test Switchconfiguratie uitvoeren:

1.	Klik in het Overzicht van de netwerkcomponenten op het team dat u wilt testen.
Om de test uit te voeren, moeten er tenminste twee adapters lid zijn van het team.

2.	Klik op het tabblad Teamconfiguratie op Test switchconfiguratie.
Het dialoogvenster Test switchconfiguratie verschijnt.

3.	Klik op Ja om door te gaan met de test.
Als team of verbindingspartner configuratie fouten gedetecteerd zijn, het tabblad Probleemoplossing verschijnt.

OPMERKING:  gezien de tijd die nodig is om Spanning Tree Protocol (STP) te testen, is het mogelijk dat Intel® PROSet II niet nauwkeurig aangeeft of STP ingeschakeld is in het netwerk. Zorg ervoor dat switches zijn geconfigureerd met STP:

•	Ingeschakeld voor SFT-teams

•	Uitgeschakeld voor alle andere teammodi


Vrijwaring tegen aanspraken van derden
* Andere product- en bedrijfsnamen kunnen handelsmerken van andere bedrijven zijn en worden slechts ter toelichting en ten behoeve van de eigenaar gebruikt, zonder de bedoeling om inbreuk te maken.


Energiebeheer configureren
Energieverbruik configureren

Met de tab Energiebesparing kunt u het energieverbruik van de adapter configureren.  Wanneer de adapter energie bespaart, werkt deze met een snelheid van 10Mbps.

Om deze voorziening te ondersteunen, moet voor de adapter het volgende gelden:

•	De adapter moet zijn geconfigureerd voor het automatisch onderhandelen over de snelheid en

•	De adapter moet zijn aangesloten op een verbindingspartner die automatisch kan onderhandelen over snelheid.

Als de adapter moet werken met een snelheid van 100Mbps of als de verbindingspartner niet kan werken met een snelheid van 10Mbps, kan de energiebesparing niet worden ingeschakeld op de adapter.

De opties voor energiebesparing worden niet op alle computers opgeslagen wanneer deze opnieuw worden gestart. Als de instellingen niet zijn opgeslagen, wordt bovenaan op het tabblad Energiebesparing de tekst Tijdelijke energiebesparing weergegeven. Deze instellingen worden niet opgeslagen op systemen onder Windows XP of Windows Server 2003.

Als de instellingen niet worden gewijzigd nadat de computer opnieuw is opgestart, verschijnt bovenaan de tekst Instellingen voor energiebesparing.

OPMERKING: als de energiebesparing is ingeschakeld, vertragen de Intel(R) PRO/100 M-adapters de verwerkingscycli. Met deze voorziening kan het energieverbruik van Intel PRO/100 M-adapters nog verder teruggebracht worden. Andere Intel PRO/100-adapters vertragen de verwerkingscycli niet om energie te besparen.

Met het tabblad Energiebesparing kunt u het volgende aanpassen:

•	Globaal energieverbruik van de adapter. Wanneer u het globale energieverbruik van de adapter aanpast, zal deze instelling gehandhaafd blijven zolang de adapter ingeschakeld blijft. Als de adapter uit wordt geschakeld, wordt deze instelling niet opgeslagen.

•	Energieverbruik in stand-by-stand. Wanneer de computer overschakelt op de standbystand, gaat de adapter automatisch energie besparen en onderhandelen over een snelheid van 10 Mbps. Intel PROSet II handhaaft deze instelling wanneer de computer opnieuw wordt opgestart.

•	Energieverbruik bij werking op batterijen onder Windows* XP. Wanneer de computer de batterij gebruikt, gaat de adapter automatisch energie besparen en onderhandelen over een snelheid van 10 Mbps. Intel PROSet II handhaaft deze instelling wanneer de computer opnieuw wordt opgestart.

Ondersteunde adapters	Intel(R) PRO/100-adapters
Ondersteunde besturingssystemen	• Windows* 98, 2000, XP, Me en NT* voor het definiëren van het globale energieverbruik of het energieverbruik bij stand-by • Windows XP voor het definiëren van het energieverbruik als de accu voor de computer wordt gebruikt
Standaardwaarde	Standaard verbruiken adapters de hoeveelheid energie die nodig is voor de gekozen instellingen voor snelheid en duplexmodus.  Bij energiebesparing gaat de adapter terug naar 10Mbps en vermindert de hoeveelheid verkeer die door de adapter wordt afgehandeld.
Het energieverbruik van de adapter configureren:

1.	Klik in het overzicht van de netwerkcomponenten op de adapter waarvoor u energiebesparing wilt configureren.
Als de adapter energiebeheer ondersteunt, verschijnt de tab Energiebesparing.

2.	Als u het globale energieverbruik wilt verminderen, klikt u op Laag energieverbruik en over snelheid onderhandelen tot 10Mbps en klikt u op Toepassen. De adapter gebruikt deze instelling zolang deze blijft ingeschakeld.
Als u de adapter wilt configureren voor het normale energieverbruik en de standaardinstelling voor snelheid, klikt u op Normaal energieverbruik en oorspronkelijke snelheidsconfiguratie. Klik vervolgens op Toepassen.

3.	Als u het energieverbruik van de adapter in de stand-by-stand van de computer wilt verminderen, klikt u op Laag energieverbruik bij stand-by.

4.	Als de adapter is geïnstalleerd in een computer met Windows XP, kunt u ook instellingen voor het energieverbruik bij werking op de batterij definiëren. Als u het energieverbruik van de adapter bij werking op de batterij van de computer wilt verminderen, klikt u op Laag energieverbruik bij werking op batterij.

5.	Klik op OK om de energieconfiguratie toe te passen.


Taakverdeling bij ontvangst

Als u een team voor adaptieve taakverdeling hebt gemaakt, kunt u kiezen of de taakverdeling moet worden ingeschakeld of uitgeschakeld bij ontvangst. De optie voor taakverdeling bij ontvangst is altijd beschikbaar:

•	In het tabblad Geavanceerde instellingen voor een team met taakverdeling.

•	Wanneer u een team met taakverdeling maakt met behulp van de wizard Teaming

Als u de taakverdeling bij ontvangst uitschakelt, wordt al het binnenkomende verkeer verwerkt door de primaire adapter. Bij het uitgaande verkeer worden de taken verdeeld over alle adapters.

Als u de taakverdeling bij ontvangst inschakelt, is de manier waarop de taken worden verdeeld over de teamleden afhankelijk van de verschillen in snelheid tussen de leden.

•	In een team met leden met dezelfde snelheid verzenden en ontvangen alle adapters IP-verkeer. De primaire adapter geeft al het niet-gerouteerde verkeer (layer 2) door.

•	In een team met adapters met verschillende snelheden wordt het binnenkomende IP-verkeer verdeeld over de teamleden met de snelste verbinding. Voor het uitgaande IP-verkeer worden de taken verdeeld over alle adapters. De primaire adapter geeft al het niet-gerouteerde verkeer (layer 2) door.
OPMERKING: Als taakverdeling bij ontvangst is ingeschakeld, selecteert Intel(R) PROSet II automatisch een primaire voorkeursadapter. U kunt de standaardselectie overschrijven door een adapter op te geven als primaire of secundaire adapter.

Zie ook:

Info over teaming

Nieuw team maken


Geavanceerde instellingen voor PRO/100 VE- en VM-adapters
Geavanceerde instellingen voor Intel(R) PRO/100 VE- en VM-adapters

Met de instellingen op het tabblad Geavanceerd kunt u wijzigingen aanbrengen in de manier waarop de adapter omgaat met buffers, energiebeheer en andere mogelijkheden. De beschikbaarheid van de hieronder genoemde voorzieningen, is afhankelijk van het besturingssysteem dat u gebruikt en de soort adapters die geïnstalleerd zijn.

Geavanceerde instellingen

Adaptieve afstand tussen frames

Biedt compensatie bij veel conflicten tussen Ethernet-pakketten in het netwerk.  De standaardinstelling is 0, waarmee deze voorziening wordt uitgeschakeld.

De aanbevolen instelling (1) werkt het best voor de meeste computers en netwerken. Met deze instelling wordt de afstand dynamisch aangepast aan het netwerkverkeer. Deze dynamische modus is alleen actief als de waarde 1 ingesteld is. In sommige gevallen is het mogelijk dat u een beter prestatieniveau kunt krijgen door de afstand handmatig in te stellen. Wanneer u een waarde instelt, forceert u daarmee een statische afstand tussen pakketten.

Een hogere waarde betekent een langere tijd tussen de frames die worden verzonden.

Ondersteunde adapters	Alle
Standaardwaarde	0: uitgeschakeld
Bereik	0-255

Adaptief antwoord koppeling

Hiermee wordt het opstarten van het systeem versneld wanneer de kabel niet is aangesloten op de adapter, door het overslaan van opstartroutines waarvoor een verbinding met het netwerk vereist is. Het opstarten gaat hierdoor aanzienlijk sneller.

Als adaptief antwoord koppeling is ingeschakeld voor Intel Ethernet-controllers en er geen netwerkkabel is aangesloten op de RJ-45-poort, wordt de netwerkverbinding uitgeschakeld. Er verschijnt een geel waarschuwingspictogram naast de netwerkverbinding in Apparaatbeheer.

Als u de netwerkverbinding opnieuw wilt inschakelen, moet u de netwerkkabel aansluiten op de RJ-45-poort en de computer opnieuw opstarten.

Ondersteunde adapters	Alleen mobiele producten. Niet beschikbaar op elk adaptermodel.
Standaardwaarde	Uit
Aanbevolen	Aan
Bereik	Aan, Uit
OPMERKING: Adaptieve verbindingsrespons (Adaptive Link Response - ALR) werkt niet als een draadloze adapter actief is in het systeem.

Coalesce-buffers

Hiermee worden de transmissieprestaties verbeterd door het aantal coalesce-buffers aan te passen. Deze buffers maken het voor de adapter mogelijk gegevenssegmenten samen te voegen voordat pakketten worden verzonden.

Als het aantal coalesce-buffers wordt gewijzigd, moet ook de instelling van Verzend-descriptors worden aangepast. Coalesce-buffers moet worden ingesteld op 30 - 50% van Verzend-descriptors. Als de instelling van het aantal coalesce-buffers niet wordt aangepast aan het aantal verzend-descriptors, is het mogelijk dat de transmissieprestaties niet verbeteren.

Met coalesce-buffers kunnen de transmissieprestaties aanzienlijk worden verbeterd voor computers met Windows NT 4.0. De transmissieprestaties kunnen ook worden verbeterd voor computers met Windows 98 en 2000.

Standaardwaarde	8
Aanbevolen waarde	8
Bereik	1-32
Lokaal beheerd adres

Hiermee wordt het MAC-adres van de adapter uitgeschakeld. Als u een nieuw netwerkadres wilt opgeven, typt u een hexadecimaal getal van 12 cijfers in het vak Waarde.

Standaardwaarde	Geen
Bereik	0000 0000 0001 - FFFF FFFF FFFD Uitzonderingen: • Gebruik geen multicast-adres (Minst significante bit van de hoge byte = 1).  • Gebruik niet alleen nullen of alleen de letter F.
Gebruikers van Windows 98 SE:

Als u het standaardadres wilt gebruiken nadat u een handmatig toegewezen adres hebt gebruikt, moet u een van de volgende procedures uitvoeren:

•	Selecteer Lokaal beheerd adres op het tabblad Geavanceerd van het dialoogvenster Netwerkeigenschappen en wijzig vervolgens de waarde in 0. Klik op OK om deze instelling toe te passen.

•	Klik op het tabblad Geavanceerd in Intel PROSet II, klik vervolgens op Standaardinstellingen herstellen of wis alle tekens in het veld Waarde. Klik op OK om de instelling toe te passen.

Efficiëntie PCI-bus

Stelt de adapter in staat om de beste methode voor het verzenden van pakketten te gebruiken of dwingt te allen tijde samenvoeging van pakketten af.

•	Als Efficiëntie PCI-bus is uitgeschakeld, gebruikt de adapter de verzendmethode die de beste prestaties levert. Als samenvoeging van pakketten leidt tot de beste prestaties, zal de adapter automatisch pakketten samenvoegen.

•	Als Efficiëntie PCI-bus is ingeschakeld, forceert de adapter het samenvoegen van pakketten.

U kunt Efficiëntie PCI-bus uitschakelen als zich geen problemen voordoen met de prestaties bij het verzenden van pakketten. Als er een groot aantal underruns optreedt of als de PCI-bus prestatieproblemen vertoont, schakelt u deze optie in.

Standaardwaarde	Uitgeschakeld
Bereik	Ingeschakeld, Uitgeschakeld

Ontvangstbuffers

Hier geeft u het aantal buffers op dat door het stuurprogramma wordt gebruikt bij het kopiëren van gegevens naar het protocolgeheugen.

In situaties met een hoge netwerkbelasting kan het vergroten van het aantal ontvangstbuffers de prestaties ten goede komen. Het nadeel is dat het stuurprogramma dan een groter beslag op het systeemgeheugen legt. Als u deze waarde in andere situaties wijzigt, kan dit leiden tot verminderde systeemprestaties.  Het gebruik is voor uw eigen risico.

Standaardwaarde	48
Aanbevolen waarde	• Enkele adapter in Windows 98, Windows Me, Windows 2000 en Windows XP: 48 • Enkele adapter in Windows NT 4.0: 32 • Adapter in een team: 250
Bereik	8-1024
Afstand tussen frames bij opnieuw verzenden

Hiermee vergroot u het interval tussen frames bij opnieuw verzenden. Ofschoon er een ingebouwd Ethernet-algoritme is dat adapters gebruiken voor het opnieuw verzenden van frames na conflicten, kan het vergroten van deze waarde leiden tot betere netwerkprestaties als er een abnormaal groot aantal conflicten is in het netwerk.

Ondersteunde adapters	Alle
Standaardwaarde	6
Bereik	6-15

Transmit Control-blocks

Hier definieert u het aantal Transmit Control-blocks. Dit zijn gegevenssegmenten die de adapter in staat stellen om te verzenden pakketten te volgen in het systeemgeheugen. Elk te verzenden pakket vereist één of meer Transmit Control-blocks, afhankelijk van de omvang van het pakket.

Als u denkt dat er problemen zijn met de transmissieprestaties, kunt u ervoor kiezen om het aantal Transmit Control-blocks te verhogen. Het vergroten van het aantal Transmit Control-blocks kan leiden tot betere transmissieprestaties, maar de Control-blocks leggen wel beslag op systeemgeheugen. Als de transmissieprestaties geen probleem vormen, gebruikt u de aanbevolen waarde 32.

Standaardwaarde	16
Aanbevolen waarde	32
Bereik	8-64
Wake on Verbindingswijziging

Haalt de computer uit stand-by als een netwerkverbinding wordt gemaakt. Deze voorziening kan in- of uitgeschakeld zijn, of de besturingssysteem kan de standaardwaarde gebruiken.

Ondersteunde besturingssystemen	Windows 9x, Windows 2000, Windows XP
Bereik	Uitgeschakeld, geforceerd, OS afhankelijk
Standaardwaarde	Uitgeschakeld
Wake on-instellingen

Deze instellingen hebben betrekking op voorzieningen die kunnen worden geactiveerd door het besturingssysteem of met Intel(R) PROSet II. Het is afhankelijk van de versie van Windows die u gebruikt, hoe deze voorzieningen werken en of ze ondersteund worden.

•	De volgende versies van Windows ondersteunen Wake on-instellingen: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	De volgende versie van Windows ondersteunen geen Wake On-instellingen:  Windows 98 handelsversie en Windows NT 4.0.

OPMERKING: Wake on-instellingen worden alleen ondersteund door Intel(R) PRO/100+ Management- en serveradapters en Intel(R) PRO/100 S-adapters.

Wake on-instellingen inschakelen in het besturingssysteem

Voor de volgende typen Wake on-pakketten moeten Wake on-instellingen zijn ingeschakeld in het besturingssysteem:

•	Wake on ARP

•	Wake on Gericht pakket

•	Wake On NBT

Als u wilt dat de adapter reageert op deze typen Wake on-pakketten, moet het gebruik van Wake on-instellingen worden ingeschakeld in het besturingssysteem. Als u Wake on-instellingen wilt inschakelen, gaat u naar Apparaatbeheer en schakelt u de optie Dit apparaat mag de computer uit stand-by halen in. Ga als volgt te werk om deze optie te vinden:

1.	Klik op Start > Configuratiescherm.
Het Configuratiescherm wordt geopend.

2.	Dubbelklik op Systeem.
Het dialoogvenster Systeemeigenschappen verschijnt.

3.	Klik op de tab Hardware en klik op de knop Apparaatbeheer.
Het venster Apparaatbeheer wordt geopend.

4.	Dubbelklik op de adapter waarvoor u de Wake on-instellingen wilt inschakelen.
Het dialoogvenster Eigenschappen verschijnt.

5.	Klik op de tab Energiebeheer.

6.	Klik op Dit apparaat mag de computer uit stand-by halen om Wake on-instellingen in te schakelen voor de adapter.

Beschikbare instellingen

De volgende Wake on-instellingen zijn beschikbaar in Intel PROSet II:

Instelling	Beschrijving
Uitgeschakeld	Adapter gebruikt geen Wake on-instellingen.
Wake on Magic Packet	Hiermee kan de adapter uit stand-by komen wanneer een Magic Packet wordt ontvangen. Een Magic Packet is een pakket dat 16 aaneengesloten exemplaren bevat van het Ethernet-adres van de ontvangende adapter. Wanneer u deze voorziening configureert, zal Intel PROSet II de waarde van het besturingssysteem voor deze voorziening uitschakelen.
Wake on Gericht pakket	Hiermee kan de adapter uit stand-by komen wanneer de adapter een Gericht pakket ontvangt. Dit is een unicast-pakket dat is verzonden naar het MAC-adres van de adapter.  Het protocol moet deze Wake-methode inschakelen in het stuurprogramma. Als deze functie wordt uitgeschakeld, negeert het stuurprogramma alle verzoeken van het protocol om deze Wake-methode in te schakelen.
Wake on Magic en Gericht pakketten	Hiermee kan de adapter opstarten wanneer een Magic pakket of een Gericht pakket wordt ontvangen.
Gecontroleerd door besturingssysteem	Geeft het besturingssysteem de volledige controle over Wake on-instellingen.

OPMERKING: Als meerdere IP-adressen zijn geconfigureerd voor één adapter, kan het besturingssysteem Wake up on ARP-patronen aanvragen voor alle geconfigureerde adressen. De adapter wil alleen opstarten als reactie op ARP-pakketten die een query versturen naar het eerste IP-adres in de lijst.

OPMERKING: Wake on-instellingen kunnen de computer niet opstarten als die uitgeschakeld staat (S5). Deze staat is geconfigureerd door de instelling PME-inschakelen op het tabblad Geavanceerd. Zelfs als de Wake on-instellingen zijn uitgeschakeld, wordt het opstarten van S5 bepaald door de instelling PME-inschakelen.

Zolang het adapterstuurprogramma is ingeschakeld, blijven de PME-instellingen van kracht. Als het stuurprogramma echter wordt uitgeschakeld, wordt de standaardwaarde van het apparaat hersteld en wordt de computer wel of niet opgestart als deze is uitgeschakeld.


Soorten teams

In Intel(R) PROSet II kunt u de volgende soorten teams configureren:

•	Fouttolerantie van adapters (AFT)

•	Fouttolerantie van switches (SFT)

•	Adaptieve taakverdeling (ALB). Taakverdeling bij ontvangst inbegrepen (RLB).

•	FEC* / LA / 802.3ad: Statisch

GEC* / LA / 802.3ad: Statisch

•	IEEE 802.3ad: Dynamisch

Adapter Fault Tolerance

Voorzieningen	• Failover Levert automatische redundantie voor de adapter. Als zich een fout voordoet in de primaire adapter, neemt de secundaire adapter de taken over.
Netwerkconfiguratie	• Alle adapters moeten aangesloten zijn op dezelfde switch. • Het Spanning Tree Protocol moet uitgeschakeld zijn. • Alle typen switches worden ondersteund

Switch Fault Tolerance

Voorzieningen	• Failover Brengt een relatie tot stand tussen twee adapters wanneer elke adapter aangesloten is op een afzonderlijke switch.
Netwerkconfiguratie	• Elke adapter wordt aangesloten op een afzonderlijke switch. • Het Spanning Tree Protocol moet ingeschakeld zijn.

Adaptieve taakverdeling  (ALB)

Voorzieningen	• Failover • Taakverdeling bij verzending • Taakverdeling bij ontvangst van IP-verkeer (optioneel)
Netwerkconfiguratie	• Alle adapters moeten aangesloten zijn op dezelfde switch. • Alle typen switches worden ondersteund

FEC/LA/802.3ad: Statisch

Voorzieningen	• Failover • Taakverdeling bij verzending • Taakverdeling bij ontvangst
Netwerkconfiguratie	• Alle adapters moeten werken op 100 MBs. • Alle adapters moeten aangesloten zijn op dezelfde switch. • Moet worden gebruikt met een switch die om kan gaan met verbindingsaggregatie: • FEC-switches van Cisco die gebruik maken van het PAgP-protocol • Intel Express(R)-switches die kunnen omgaan met verbindingsaggregatie • Andere switches die compatibel zijn met statisch 802.3ad

GEC/LA/802.3ad: Statisch

Voorzieningen	• Failover • Taakverdeling bij verzending • Taakverdeling bij ontvangst
Netwerkconfiguratie	• Alle adapters moeten werken op 1000 Mbps. • Alle adapters moeten aangesloten zijn op dezelfde switch. • Moet worden gebruikt met een switch die om kan gaan met verbindingsaggregatie: • GEC-switches van Cisco die gebruik maken van het PAgP-protocol • Intel Express-switches die kunnen omgaan met verbindingsaggregatie • Andere switches die compatibel zijn met statisch 802.3ad

IEEE 802.3ad: Dynamisch

Voorzieningen	• Failover • Taakverdeling bij verzending • Taakverdeling bij ontvangst
Netwerkconfiguratie	• Teamleden kunnen op verschillende snelheden werken. • Alle adapters moeten aangesloten zijn op dezelfde switch. • De switch die is aangesloten op de adapters, moet volledige ondersteuning bieden voor de IEEE 802.3ad-standaard.
Zie ook:

Info over teaming


Logboek voor diagnoses
Logboek voor diagnoses instellen

Intel PROSet II slaat de informatie afkomstig van diagnostische tests en de test Zender/Responder op in een logboek voor diagnoses.

Het logboek configureren:

1.	Open de Register-editor. Klik op Start > Uitvoeren. Typ in het vak Openen regedit.
De Register-editor wordt gestart.

2.	Ga naar de registersleutel HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Wijzig de registerparameters.

Taak	Naam	Standaardwaarde	Mogelijke waarden
Diagnostisch logboek in- of uitschakelen	Enable	1: Enable	1: Enable 0: Uitschakelen
Locatie van het logboekbestand opgeven	FilePath	System32	Elk geldig pad op het systeem
Opgeven of Intel PROSet II bestaande informatie in het logboek moet behouden of verwijderen	FileAppend	1: Enable	1: Informatie toevoegen aan het bestaande logboek 0: Bestaande informatie verwijderen telkens wanneer de gebruiker een diagnostische test of de test Zender/Responder uitvoert
De maximale omvang van het logboek (in bytes) opgeven	MaxFileSize	36 kb	Het aantal bytes aan informatie dat in het logboek kan worden opgeslagen.
4.	Sluit de register-editor wanneer u klaar bent met het aanbrengen van wijzigingen in de configuratie van het logboek.


Diagnose: een overzicht
Overzicht van diagnoses

In Intel(R) PROSet II hebt u de beschikking over drie typen diagnoses.

•	Diagnostische tests leveren een fundamentele analyse van de conditie van de adapter.  Bij het uitvoeren van fundamentele diagnostische tests controleert Intel PROSet II op I/O-conflicten, geheugenfouten, EEPROM-werking, verzend- en ontvangstfunctionaliteit en verbindingen.

•	De Kabeltest verschaft informatie over de kabellengte, de polariteit en andere kabeleigenschappen.

•	Met de test Zender/Responder test kunt u de functionaliteit van de adapter binnen het netwerk testen. Dit is een meer geavanceerde test waarvoor twee computers nodig zijn.

De testresultaten worden weergegeven in Intel PROSet II. Bovendien worden de resultaten van de diagnostische tests en de test Zender/Responder door Intel PROSet II opgeslagen in een logbestand. Zie Logboek voor diagnoses instellen voor meer informatie.


Adapterspecificaties

Controller	ID-nummer kaart	Productnaam (Connectoren)	Intel- artikelnummer
82545EM	A92165-xxx	PRO/1000 MT Server Adapter	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT Dual Port Server Adapter	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MF Server Adapter	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF Server Adapter (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF Dual Port Server Adapter	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Desktop Adapter	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF Server Adapter	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI Server Adapter	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT Server Adapter	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T Server Adapter	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit Server Adapter	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 Gigabit Server Adapter	PWLA8490
82562	A19716-xxx	PRO/100 VE Desktop Adapter	CNLA6000
82550	A78921-xxx	PRO/100 M Desktop Adapter	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S Server (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port Server adapter	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100 adapter	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI adapter(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC-kaart (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC-kaart (TP)	MBLA1656
82559	748568-xxx	PRO/100 S Server (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S Server (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management Adapter	PILA8900
82558	701738-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port Server adapter	PILA8472
82559	729757-xxx	PRO/100+ Server Adapter (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI Server Adapter (TP)	PILA8470


FEC
FEC* /LA/802.3ad: Statisch

In teams met Fast EtherChannel-adapters met verbindingsaggregatie wordt de doorvoercapaciteit vergroot middels:

•	Adapterconfiguratie. Door leden toe te voegen aan een team, kunt u de doorvoercapaciteit vergroten. Teams kunnen bestaan uit maximaal acht adapters. Elke server kan werken met maximaal vier teams.

•	Analyse van het gegevensverkeer. De software analyseert continu de belasting in transmissie voor elk teamlid en verdeelt, waar nodig, de taken over de adapters. De switch draagt zorg voor de taakverdeling van het binnenkomende verkeer.

Daarnaast bieden FEC-teams ook fouttolerantie. Wanneer zich een storing voordoet in één adapter in het team, neemt een secundaire adapter de taken over.

Adapterteams met verbindingsaggregatie zijn compatibel met het volgende:

Adaptersnelheid	Alle adapters moeten op dezelfde snelheid werken.
Netwerkconfiguratie	• Alle adapters moeten werken op 100 MBs. • Alle adapters moeten aangesloten zijn op dezelfde switch. • Moet worden gebruikt met een switch die om kan gaan met verbindingsaggregatie: • FEC-switches van Cisco die gebruik maken van het PAgP-protocol • Intel Express(R)-switches die kunnen omgaan met verbindingsaggregatie • Andere switches die compatibel zijn met statisch 802.3ad
Protocollen	Alle

Zie ook:

Info over teaming

Soorten teams


GEC
GEC* /LA/802.3ad: Statisch

In teams met Gigabit EtherChannel-adapters met verbindingsaggregatie wordt de doorvoercapaciteit vergroot middels:

•	Adapterconfiguratie. Door leden toe te voegen aan een team, kunt u de doorvoercapaciteit vergroten. Teams kunnen bestaan uit maximaal acht adapters. Elke server kan werken met maximaal vier teams.

•	Analyse van het gegevensverkeer. De software analyseert continu de belasting in transmissie voor elk teamlid en verdeelt, waar nodig, de taken over de adapters. De switch draagt zorg voor de taakverdeling van het binnenkomende verkeer.

Daarnaast bieden GEC-teams ook fouttolerantie. Wanneer zich een storing voordoet in één adapter in het team, neemt een secundaire adapter de taken over.

Adapterteams met verbindingsaggregatie zijn compatibel met het volgende:

Adaptersnelheid	Alle adapters moeten op dezelfde snelheid werken.
Netwerkconfiguratie	• Alle adapters moeten werken op 100 MBs. • Alle adapters moeten aangesloten zijn op dezelfde switch. • Moet worden gebruikt met een switch die om kan gaan met verbindingsaggregatie: • GEC-switches van Cisco die gebruik maken van het PAgP-protocol • Intel Express(R)-switches die kunnen omgaan met verbindingsaggregatie • Andere switches die compatibel zijn met statisch 802.3ad
Protocollen	Alle

Zie ook:

Info over teaming

Soorten teams


Power Management voor netwerkadapter uitschakelen

1. Ga naar het bureaublad van Windows en klik met de rechtermuisknop op Deze computer.

2. Klik op Eigenschappen.

3. Selecteer het tabblad Apparaatbeheer.

4. Dubbelklik op het pictogram Netwerkadapters.

5. Dubbelklik op de Intel-netwerkadapter.

6. Als het tabblad Power Management zichtbaar is, klikt u hierop en schakelt u het selectievakje De computer mag dit apparaat uitschakelen om energie te besparen uit.

7. Klik op OK. U kunt nu het diagnoseprogramma uitvoeren.

Nadat u het diagnoseprogramma hebt uitgevoerd, wilt u de functie Power Management mogelijk opnieuw inschakelen. Dit kunt u doen door het selectievakje in de bovenstaande stap 6 in te schakelen.