Copyright: Intel® PROSet Help Version 1013
Citation: Copyright © Intel Corporation 2003. All rights reserved.


Testing the Cable
Teste kabelen

Knappen Test kabel vises i kategorien Generelt når det valgte kortet i nettverkskomponenttreet er enten:

•	82550-basert Intel® PRO/100 S Server- eller Desktop-kort uten kobling til nettverket

•	Intel® PRO/1000-kort

Slik kjører du kabeltesten på Intel PRO/100-kort:

I kategorien Generelt klikker du Test kabel. Testen kan bruke flere minutter på å fullføre.

Resultatene av testen vises i kategorien Feilsøking.

Slik kjører du kabeltesten på Intel PRO/1000-kort:

Før du bruker funksjonen for kabeltest, må du kontrollere at kortet kjører ved 1 000 Mbps. Selv om du kan bruke kabeltesten når kortet kjører ved 100 Mbps, kan deler av informasjon være unøyaktig eller utilgjengelig.

I kategorien Generelt klikker du Test kabel. Testen kan bruke flere minutter på å fullføre.

Resultatene av testen vises i dialogboksen Resultater av kabeltest. Følgende informasjon vises:

Kabellengde: Viser omtrentlig lengde på kabelen mellom kortet og koblingspartneren. Hvis den rapporterte kabellengden er ulik den faktiske kabellengden, kan dette tyde på brudd i kabelen. Nøyaktigheten kan variere med opptil 10 meter.

Polaritet: Identifiserer +/--egenskapene for de tvunnede trådparene som ble funnet i en Ethernet-kabel. Hvis disse egenskapene ikke er riktig satt opp, retter kortet automatisk opp og rapporterer feilen.

Status for lokal mottaker: Finner ut om kabelkontakten som er koblet til kortet, kan behandle trafikk. Hvis den lokale statustesten mislykkes, bør du kontrollere kontakten for brudd eller feilkobling.

Status for ekstern mottaker: Om kabelen som er koblet til koblingspartneren, består operabilitetstestene eller ikke. Hvis koblingen ikke består statustesten, må du kontrollere kontakten for brudd eller feilkoblinger.

Antall feil ved mottak: Feil ved mottak oppstår når kortet oppdager en ugjenkjennelig overføring på ledningen.
Antallet feil ved mottak øker når kortet etablerer kommunikasjon med nettverket, og kobler kabelen til kortet eller starter datamaskinen på nytt, eller når kortet starter på nytt etter automatisk forhandling. Hvis Antall inaktivitetsfeil kommer opp i rundt 65 000 innen fem minutter, er det problemer med koblingskvaliteten. Prøv å koble til kabelen på nytt eller bruke en annen kabel hvis du vil løse problemer med koblingskvalitet.

Antall inaktivitetsfeil: Feil ved mottak oppstår når kortet oppdager en ugjenkjennelig overføring på ledningen. Til forskjell fra feil ved mottak registreres feil ved inaktivitet når kortet ikke aktivt mottar pakker.
Feil ved inaktivitet oppstår når kortet etablerer kommunikasjon med nettverket, og kobler kabelen til kortet eller starter datamaskinen på nytt, eller når kortet starter på nytt etter automatisk forhandling. Hvis Antall feil ved inaktivitet kommer opp i 255 innen ett minutt, er det problemer med koblingskvaliteten. Prøv å koble til kabelen på nytt eller bruke en annen kabel hvis du vil løse problemer med koblingskvalitet.

MDI/MDI-X-status: Finner ut om kabelen som er koblet til kortet, har en vanlig (MDI) eller krysset (MDI-X) konfigurasjon. Bruk MDI når du kobler et system til en bryter eller hub, og MDI-X når du kobler to systemer sammen.

Obs!  Informasjonen i dialogboksen Resultater av kabeltest varierer med korttypene.


Juridisk

Copyright © 2002, Intel Corporation. Med enerett.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

Intel Corporation påtar seg ikke ansvar for feil eller utelatelser i dette dokumentet. Intel forplikter seg heller ikke til å oppdatere informasjonen i dokumentet.

* Andre navn og merker kan tilhøre andre.


Avanserte innstillinger for PRO/1000 Desktop-kort

Innstillingene som er oppført i kategorien Avansert, lar deg tilpasse hvordan kortet behandler QoS-pakkemerking, Jumbo-rammer, avlasting og andre funksjoner. Enkelte av følgende funksjoner er kanskje ikke tilgjengelige avhengig av operativsystemet du kjører, og de enkelte kortene som er installert.

Avanserte innstillinger

Adaptivt rammeintervall

Kompenserer for høyt antall Ethernet-pakkekollisjoner på nettverket.  Som standard er innstillingen satt til 0. Dette deaktiverer funksjonen.

Den anbefalte innstillingen (1) fungerer best for de fleste datamaskiner og nettverk ved at den tilpasses dynamisk til forholdene for nettverkstrafikk. Denne dynamiske modusen er bare aktiv når verdien er satt til 1. I sjeldne tilfeller kan du imidlertid oppnå bedre ytelse ved å angi avstandsverdien manuelt. Når du angir en verdi, tvinges det frem statisk avstand mellom pakkene.

Når verdien økes, øker mellomrommet mellom rammene som sendes.

Kort som støttes	Alle
Standard	0: deaktivert
Område	0-255

Svar på dynamisk kobling

Gjør systemoppstarten raskere ved å hoppe over oppstartsrutiner som krever nettvekstilkobling, når kabelen ikke er koblet til kortet. Dette reduserer tiden det tar å starte datamaskinen, betraktelig.

Når Svar på dynamisk kobling for Intel Ethernet-kontrollere aktiveres, og en nettverkskabel ikke er koblet til RJ-45-porten , vil nettverkskoblinen bli deaktivert. Et gult varslingsikon vil komme frem på Enhetsbehandlingen.

For å reaktivere nettverkskoblingen, skal du koble nettverkskabelen til RJ-45 porten, og deretter starte datamaskinen på nytt.

Kort som støttes	Ikke tilgjengelig på alle kortmodeller.
Standard	Av
Anbefalt	På
Område	På, Av
MERK: Adaptive Link Response (ALR) vil ikke virke når et trådløst kort er aktiv i systemet.

Oppsamlingsbuffere

Optimaliserer overføringsytelsen ved å tilpasse antall oppsamlingsbuffere. Dermed kan kortet koble sammen datasegmenter før pakkene overføres.

Oppsamlingsbuffere-innstillingen må konfigureres til å fungere med overføringsdeskriptorer-innstillingen. Oppsamlingsbuffere-innstillingen bør være 30 - 50 % av Overføringsdeskriptorer. Hvis Oppsamlingsbuffere ikke endres til å stemme overens med overføringsdeskriptorer, er det ikke sikkert overføringsytelsen forbedres.

Oppsamlingsbuffere-innstillingen øker overføringsytelsen betraktelig på Windows NT 4.0-datamaskiner. Den forbedrer også overføringsytelsen på Windows 98- og 2000-datamaskiner.

Kort som støttes	Alle
Standard	128
Område	16-768

Aktiver PME

Aktiverer eller deaktiverer oppvåkningsfunksjoner for kort på datamaskiner som har eldre APM-implementeringer (Advanced Power Management). Reaktivering gjør at kortet går ut av ventemodus eller avslåingstilstand når det mottar bestemte pakketyper, for eksempel ARP-pakker.

•	Hvis du deaktiverer funksjonen, deaktiveres alle reaktiveringsinnstillinger på datamaskiner som bruker eldre strømsparingsimplementeringer.

•	Hvis du aktiverer funksjonen, svarer kortet på reaktiveringssignaler. Hvis du vil konfigurere kortet til å svare på bestemte pakketyper, kan du se informasjonen om Innstillinger for oppvåkning senere i dette emnet.

•	Verdien Standard maskinvareinnstilling tvinger kortet til å konfigurere funksjoner for reaktivering basert på maskinvaren på systemet.

•	Verdien Ingen handling gjør at kortet bruker standarden for operativsystemet.

Hvis du vil deaktivere alle Innstillinger for oppvåkning, setter du denne funksjonen til deaktivert. Hvis ikke, setter du funksjonen til Ingen handling.

Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Deaktivert
Område	Aktivert, Deaktivert

Fullførelse av hurtig overføring

Frigjør overføringsdeskriptorer til gjenbruk før pakkene sendes ut på nettverket.

•	Når Rask overføring fullført er deaktivert, må kortet vente til pakker er sendt for å bruke overføringsdeskriptorer på nytt.

•	Når Rask overføring fullført er aktivert, bruker kortet overføringsbetegnelsene tidligere. Dermed kan kortet forbedre overføringsytelsen.

Kort som støttes	82543- og 82544-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	På
Område	På, Av
Flytkontroll

Gjør det mulig for kortet å sende eller motta flytkontrollrammer. Overføringsbanen stanses så lenge som det er angitt i den mottatte flytkontrollrammen. Denne innstillingen hjelper å finjustere nettverksytelsen ved å hindre at pakker leveres.

Kort som støttes	82542-basert, bare sende. 82543- og 82544-baserte kort, sende og motta.  Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Aktivert
Område	Av, Svar, Generer, Generer & Svar, Maskinvarefeil
Jumbo-rammer

MERK: Jumbo-rammer støttes bare ved 1000 Mbps. Bruk av Jumbo-rammer ved 10 eller 100 Mbps kan føre til dårlig ytelse eller tap av kobling.

Aktiverer eller deaktiverer funksjonen Jumbo-rammer. Jumbo-rammer kan øke gjennomstrømmingen og redusere CPU-utnyttelsen ved å ha flere data i hver ramme og på den måten sende færre rammer. Standard Ethernet-rammestørrelse er 1 514 byte, mens Jumbo-rammer kan inneholde 4 088, 9 014 eller 16 128 byte.

Du bør bare aktivere Jumbo-rammer hvis enhetene i nettverket støtter dem og er konfigurert til å bruke samme rammestørrelse. Når du setter opp Jumbo-rammer på andre nettverksenheter, skal du være klar over at nettverksenheter beregner Jumbo-rammestørrelser ulikt. Enkelte enheter inkluderer hodeinformasjon i rammestørrelsen, mens andre ikke gjør det. Intel-kort inkluderer ikke hodeinformasjon i rammestørrelsen.

Hvis du vil ha mer informasjon, ser du emnet Jumbo-rammer .

Kort som støttes	Alle
Standard	Deaktivert
Område	Deaktivert (1 514), 4 088, 9 014 og 16 128 byte. (Sett bryteren fire byte høyere for CRC, pluss fire byte ved bruk av VLAN.)  MERK: Verdiene i området (1514-16128) kan angis i Windows-registret ved hjelp av MaxFrameSize-parameteren.
Lokalt administrert adresse

Overstyrer MAC-adressen for kortet. Hvis du vil angi en ny nettverksadresse, skriver du inn et 12-sifret heksadesimalt tall i verdiboksen.

Kort som støttes	Alle
Standard	Ingen
Område	0000 0000 0001 - FFFF FFFF FFFD Unntak: • Ikke bruk en multicast-adresse (minst signifikante bit i høy byte = 1).  • Ikke bruk bare nuller eller bare F-er. Ingen verdi: Bruker den opprinnelig nettverksadresse for kortet.
Merk!  I en gruppe bruker Intel® PROSet:

•	Gruppens LAA hvis gruppen har en konfigurert LAA, eller

•	Det primære kortets permanente MAC-adresse hvis gruppen ikke har noen konfigurert LAA

Intel PROSet II bruker ikke et korts LAA hvis kortet er det primære kortet i en gruppe, og gruppen har en LAA.

Windows 98SE-brukere:

Dersom du vil bruke standardadressen etter å ha brukt en manuelt tildelt adresse, skal du foreta en av disse prosedyrene:

•	På dialogboksen Nettverkegenskapers kategori Avansert, velger du Lokalt administrert adresse, og endrer verdien til 0. Klikk OK for å bruke innstillingen.

•	I Intel PROSet II klikker du på kategorien Avansert, deretter klikker du på Gjenopprett standard eller fjerner alle verdiene fra Verdifeltet. Klikk OK for å bruke innstillingen.

Logg koblingsstatushendelser

Denne innstillingen brukes for å aktivere/deaktivere loggingen av koblingsstatusendringer. Dersom den stilles til på, genererer en kobling-opp-hendelse eller en kobling-ned-hendelse en beskjed som blir vist i hendelseslogg. Administratorer ser hendelsesbeskjeden fra systemet hendelseslogg.

De følgende hendelser logges.

KOBLING_OPP_ENDRING

KOBLING_NED_ENDRING

KOBLING_DUPLEX_FORSKYVNING

Kort som støttes	Alle
Standard	Aktiver
Område	Aktiver, deaktiver
Avlaste mottak av TCP-kontrollsum

Gjør det mulig for kortet å kontrollere TCP- eller UDP-sjekksum for innkommende pakker.

•	Når avlasting er av, kontrollerer operativsystemet TCP-sjekksummen.

•	Når avlasting er på, fullfører kortet kontrollen for operativsystemet.

Denne funksjonen forbedrer mottaksytelsen og reduserer CPU-utnyttelsen.

Operativsystemer som støttes	• Windows XP* • Windows 2000 • Windows 98 støtter ikke avlasting.
Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	• Windows* XP: På • Windows 2000 Av
Område	På, Av
Avlast TCP-segmentering

Gjør det mulig for kortmaskinvaren å segmentere data i gyldige Ethernet-rammer.

•	Når TCP-segmentering er av, segmenterer operativsystemet dataene før de sendes til kortet for overføring.

•	Når TCP-segmentering er på, segmenterer kortet dataene i rammer.

Ettersom kortmaskinvaren kan fullføre datasegmenteringen mye raskere enn operativsystemet, øker denne funksjonen overføringsytelsen betraktelig. I tillegg bruker kortet færre CPU-ressurser.

Operativsystemer som støttes	Windows XP
Kort som støttes	82544-basert. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	1
Område	0 = ikke annonser funksjonen; 1 = annonser funksjonen.
Avlaste mottak av TCP-kontrollsum

Gjør det mulig for kortet å beregne IP-sjekksummen for utgående pakker.

•	Når avlasting er av, kontrollerer operativsystemet TCP-sjekksummen.

•	Når avlasting er på, fullfører kortet kontrollen for operativsystemet.

Denne funksjonen forbedrer mottaksytelsen og reduserer CPU-utnyttelsen.

Operativsystemer som støttes	• Windows XP* • Windows 2000 • Windows 98 støtter ikke avlasting.
Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	På
Område	På, Av
Avlaste mottak av TCP-kontrollsum

Gjør det mulig for kortet å kontrollere TCP- eller UDP-sjekksum for innkommende pakker.

•	Når avlasting er av, kontrollerer operativsystemet TCP-sjekksummen.

•	Når avlasting er på, fullfører kortet kontrollen for operativsystemet.

Denne funksjonen forbedrer mottaksytelsen og reduserer CPU-utnyttelsen.

Operativsystemer som støttes	• Windows XP* • Windows 2000 • Windows 98 støtter ikke avlasting.
Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	På
Område	På, Av MERK: Sett denne funksjonen til Av når serveren støtter DOS-baserte klienter.
Merking av QoS-pakke

Gjør det mulig for kortet å sende og motta IEEE 802.3ac-merkede rammer, inkludert:

•	802.1p QoS-merker (Quality of Service) som kreves for prioritetsmerkede pakker, og

•	802.1Q-merker som kreves for VLAN

Intel PROSet aktiverer 802.1p-merking automatisk når du setter opp et VLAN.

Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Av
Område	På, Av
Mottaksdeskriptorer

Definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å tildele mottatte pakker til minne. Hver mottatte pakke krever én mottaksbetegnelse, og hver betegnelse bruker 2 kB minne.

Du kan velge å øke antallet mottaksdeskriptorer hvis du merker betydelig nedgang i ytelsen for mottatt trafikk. Hvis mottaksytelsen ikke er noe problem, bruker du standardinnstillingen som passer til kortet.

Kortkontroller	Standard	Område
82542-basert.	160	80 – 768
82543-basert.	160	80 – 256
82544-basert.	160	80 – 2048
Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.

Overføringsdeskriptorer

Definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du standardverdien 256.

Kortkontroller	Standard	Område
82542-basert.	256	80 – 768
82543-basert.	256	80 – 256
82544-basert.	256	80 – 2048
Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.

Reaktiver ved koblingsendring

Reaktiverer datamaskinen hvis nettverkstilkoblingen etablerer en kobling mens datamaskinen er i hvilemodus. Du kan aktivere funksjonen, deaktivere den eller la operativsystemet bruke standarden.

Operativsystemer som støttes	Windows 9x, Windows 2000, Windows XP
Område	Deaktivert, tvunget, operativsystemavhengig
Standard	Deaktivert

Innstillinger for oppvåkning

Disse innstillingene refererer til funksjoner som aktiveres av operativsystemet eller Intel PROSet. Funksjonene virker ulikt eller støttes ikke i det hele tatt, avhengig av hvilken versjon av Windows du bruker.

Disse Windows-versjonene støtter Innstillinger for oppvåkning: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional og Windows Server 2003. Denne egenskapen støttes ikke i Windows Server 2003 for 64-bit Itanium(R)-baserte System.

Aktiver oppvåkningsinnstillinger

Du kan bruke Intel PROSet til å konfigurere oppvåkningsinnstillingen kortet bruker. Før du velger Innstillinger for oppvåkning, må du aktivere operativsystemet for bruk av Innstillinger for oppvåkning. Hvis du vil gjøre dette, kan du se Instruksjoner.

Slik aktiverer du oppvåkningsinnstillinger

1.	I Intel PROSet, klikk kategorien Avansert.

2.	I listeboksen Innstilling velger du Innstillinger for oppvåkning.

3.	I listen Verdi velger du den aktuelle oppvåkningsinnstillingen.

4.	Klikk OK eller Bruk.

5.	Hvis kortet skal svare på disse typene reaktiveringspakker, må operativsystemet også aktiveres for å bruke Innstillinger for oppvåkning. Hvis du vil aktivere Innstillinger for oppvåkning, navigerer du til Enhetsbehandling og aktiverer alternativet.

Tilgjengelige innstillinger

Disse innstillingene for reaktivering er tilgjengelige i Intel PROSet:

Innstilling	Beskrivelse
Deaktivert	Kortet vil ikke bruke reaktiveringsinnstillinger.
Våkne ved magisk pakke	Reaktiverer kortet som svar på en mottatt magisk pakke. En magisk pakke er en pakke som inneholder 16 kontinuerlige kopier av Ethernet-adressen til kortet som mottar pakken. Når du konfigurerer denne funksjonen, overstyrer Intel PROSet operativsystemverdien for funksjonen.
Reaktiver ved adresserte pakker	Reaktiverer kortet når kortet mottar en adressert pakke. Dette er en unicast-pakke som sendes til kortets MAC-adresse.  Protokollen må aktivere denne reaktiveringsmetoden i driveren. Deaktivering av funksjonen angir at driveren skal ignorere protokollforespørsler om å aktivere denne reaktiveringsmetoden.
Reaktiver ved magiske og adresserte pakker	Aktiverer kortet for reaktivering når det mottar en magisk pakke eller en adressert pakke.
Styrt av OS	Gir operativsystemet full kontroll over oppvåkningsinnstillinger.

Merk! Hvis flere IP-adresser er konfigurert for ett kort, kan operativsystemet be om reaktivering ved ARP-mønstre til alle de konfigurerte adressene. Kortet vil bare reaktiveres hvis ARP-pakker forespør den første IP-adressen i listen.

Merk!  Reaktiveringsinnstillinger inkluderer ikke muligheten til å vekke en maskin fra avslått (S5) tilstand. Denne tilstanden kontrolleres av innstillingen Aktiver PME, som også er tilgjengelig i kategorien Avansert. Selv om reaktiveringsinnstillinger er deaktivert, bestemmes muligheten for vekking fra S5 av innstillingen Aktiver PME.

Så lenge kortdriveren er aktivert, vil PME-innstillinger fungere. Når driveren er deaktivert, går imidlertid enheten tilbake til standard maskinvareinnstilling, som enten lar eller ikke lar datamaskinen vekkes opp når den er slått av.

Knappen Bruk standardinnstillinger

Denne knappen tilbakestiller den valgte avanserte innstillingen til standardverdien for innstillingen.  Se innstillingene over for standardverdier.  (Dette alternativet er ikke tilgjengelig for alle innstillingene.)


Driverinformasjon
Nettverksdriver

Slik viser du detaljer om et kort:

1.	Klikk kortet du vil se detaljer om, i Nettverkskomponenttre

2.	Klikk kategorien Driver.

Følgende informasjon vises:

Driverinformasjon:

Navn	Filnavn på kortdriveren som er lastet inn
Versjon	Versjonsnummer for driveren. Dette er nyttig ved nedlasting av nyere versjoner fra Intels kundestøtteområde: http://support.intel.com
Beskrivelse	Drivernavn
Copyright	Juridisk informasjon
Driverstatistikk:

Merk! Statistikken nedenfor tilbakestilles når du laster inn eller oppdaterer kortdriveren.

Pakker sendt	Antall sendte pakker
Pakker mottatt	Antall mottatte pakker
Sendefeil	Antall sendte pakker med feil
Mottaksfeil	Antall sendte pakker med feil
Merk! Hvis du vil hente de siste driverne, klikker du Hjelp > Kundestøtte. På kundestøttesiden klikker du Få de seneste driverne.


Analyser
Diagnosetester

Med kortanalyser kan du analysere den generelle korttilstanden. Under analysen kontrollerer Intel PROSet om det finnes I/U-konflikter, minnefeil, EEPROM-operabilitet, sende- og mottaksfunksjonalitet og kobling.

Resultatet av diagnosetesten vises i diagnosekategorien, men de lagres også i en systemlogg.

MERK:  Dersom datamaskinen kjører Windows 98, kan det hende du må deaktivere kortet Strømstyring før du kjører diagnostiseringen. For å se detaljer skal du se på Deaktivere strømstyringsprosedyren.

Individuelle tester

Testnavn	Beskrivelse	Feilsøkingsinformasjon
Kontroller registre	Kontrollerer om det er konflikter i I/U-adressen, og tester tilgjengeligheten til registrene. Testen inkluderer alle generelle registre, mottaksregistre og overføringsregistre. Den tester ikke EEPROM-kontrolleren/dataregistret.	Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.
FIFO-registre	Tester FIFO-minnet på kortet ved å skrive og lese mønstre til og fra FIFO-minnet.	Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.
EEPROM	Kontrollerer integriteten for data som leses fra EEPROM. Testen skriver og leser fra EEPROM og sammenligner deretter for å se om resultatene er konsekvente.	Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.
Avbrudd	Bruker avbruddsregistrene til å bekrefte at alle kortavbrudd fungerer.	Hvis Avbrudd-testen mislykkes, prøver du å endre innstillinger for avbrudd i BIOS. Hvis dette ikke retter opp problemet, kan du prøve å flytte kortet til et annet spor.
Tilbakekobling	Tester kortets evne til å sende og motta pakker ved å sende pakker til seg selv. Denne testen bruker både modus for MAC-tilbakekobling og for Transceiver-tilbakekobling. (Ikke tilgjengelig på Intel® PRO/1000 T-kort.)	Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.
Kobling	Bekrefter at kortene er koblet til en gyldig partner.	Hvis koblingstesten mislykkes, kontroller du at ledningen er forsvarlig festet til kortet og koblingspartneren. Hvis ledningen sitter godt, prøver du å koble ledningen til en annen port på koblingspartneren, eller du prøver en annen ledning.
Merk! Hvis du klikker Stopp mens diagnosene utføres, oppstår det en kort forsinkelse før diagnosene stopper. Når de stopper, blir OK-knappen tilgjengelig.

Andre innstillinger

Avansert-knappen:  Klikk her for å sette opp en sender-mottaker nettverksttest..

Advarsel! Sender/mottaker-testen er ikke ment til å kjøre mens systemet er i ventemodus, deaktiveringsmodus eller når ledningen ikke er plugget inn i datamaskinen.


Konfigurasjon og status for gruppe
Gruppekonfigurering

Slik viser du detaljer om et kort:

I NettverkskomponenttreTree klikker du gruppen du vil vise.

Kategorien Gruppekonfigurering vises.

Statusbokslisten for Kort i gruppe viser følgende:

Kort

Navnet på hvert kort som er inkludert i gruppen.

Prioritet

Viser prioritetsstatusen for kortene i gruppen (hvis du har angitt prioritet). Et kort kan ha prioritetsstatus som primært eller sekundært i gruppen.

Hvordan angi et kort som primært eller sekundært

Kolonnen Status viser følgende:

•	Aktiv: Kortet sender nettverkstrafikk.

•	I AFT-modus er bare ett kort aktivt; det foretrukne primære kortet.

•	I Dynamic 802.3ad-modus har kort som er del av den aktive samleren, status som aktive.

•	Ventemodus: AFT-, SFT- og Dynamic 802.3ad-grupper støtter ventemodus. Et kort i ventemodus har en kobling til nettverket, men sender ikke trafikk aktivt.

•	Deaktivert: Kortet er fjernet, deaktivert, eller driveren kunne ikke lastes inn. Kortet har også status som deaktivert hvis kabelen er skadet eller koblingen er brutt.

Delen Gruppeinformasjon viser følgende:

•	Ethernet-adresse: Viser den primære MAC-adressen for gruppen.

•	IP-adresse: Viser IP-adressen for gruppen.

•	Gruppetype: Viser gruppemodus.

Knappen Test svitsj-konfigurasjon

Du kan sikre at koblingspartnere støtter den valgte kortgrupperingsmodusen ved å kjøre svitsj-konfigurasjonstesten. Hvis kortet for eksempel er medlem av en koblingssamlingsgruppe, kan Intel ® PROSet II kontrollere at koblingspartnerne som er koblet til kortet, støtter koblingssamling.

Hvis du vil ha spesifikk informasjon om kravene for hver gruppemodus, kan du se Om gruppering.

Mens denne testen kjøres, mister gruppen nettverkstilkoblingen midlertidig.

Merk! Denne testen finner ikke feil når følgende situasjoner forekommer.

Kortkonfigurasjon	Svitsjkonfigurasjon
Gruppert i Koblingssamlingsmodus uten VLAN	Svitsjen enten: • hører ikke til noe VLAN • Er konfigurert med merkede, virtuelle lokalnettverk
Gruppert i Koblingssamlingsmodus med VLAN	Svitsjen: • hører ikke til VLAN-et som er konfigurert på kortet, og • Har ikke definert Koblingssamling
Slik kjører du svitsjkonfigurasjonstesten:

1.	I Nettverkskomponenttre, klikker du gruppen du vil teste.
Hvis du vil kjøre testen, må det være minst to kort i gruppen.

2.	I kategorien Gruppekonfigurasjon klikker du Teste svitsjkonfigurering.
Dialogboksen Teste svitsjkonfigurering vises.

3.	Hvis du vil fortsette med testen, klikker du Ja.
Hvis det oppstår noen konfigurasjonsfeil hos gruppen eller koblingspartneren, vises kategorien Feilsøking.

Merk!   På grunn av tiden det tar å teste spanningtreprotokollen (STP), kan det være at Intel PROSet ikke angir nøyaktig om spanningstreprotokollen er aktivert på nettverket. Sikre at svitsjene er konfigurert med STP:

•	Aktivert for SFT-grupper

•	Deaktivert (portfast) for alle andre gruppemodi


VLAN
Oversikt over virtuelle lokalnettverk (VLAN)

Et VLAN er en logisk nettverksgruppering som lar deg isolere nettverkstrafikk slik at medlemmene av VLAN-et bare mottar trafikk fra andre medlemmer. Med VLAN kan du gruppere PC-er i logiske arbeidsgrupper. Dette er et viktig hensyn å ta når klienter kobles til servere som er spredt geografisk på bygget, universitetsområdet eller firmanettverket.

Ved å bruke VLAN på nettverk kan du:

•	Begrense kringkastingsstormer

•	Forbedre tillegginger, flyttinger og endringer på nettverkstilkoblinger

•	Redusere sikkerhetsproblemer

•	Gjøre administrasjonsoppgaven enklere

VLAN-typer

Det finnes svitsjbaserte VLAN, også kalt implisitte VLAN, og merkingsbaserte VLAN, som også kalles eksplisitte VLAN.

•	Implisitte VLAN er basert på svitsjegenskaper, for eksempel portnummer, MAC-adresse og andre lag to-funksjoner. Standard VLAN på mange svitsjer, inkludert de fleste Cisco*-produkter, er et implisitt VLAN. Implisitte VLAN konfigureres bare på svitsjen. Svitsjen endrer ikke eller merker ikke pakkene for å fremtvinge et implisitt VLAN. Alle Intel-kort kan være med i implisitte VLAN.

•	Eksplisitte VLAN er basert på tillegget av et merke på fire byte (802.3ac) i hvert pakkehode. Hvert IEEE VLAN må settes opp på hele nettverket, inkludert på kortet og alle koblingspartnerne.

Krav

VLAN krever:

•	Svitsjer på nettverket som støtter 802.1Q-VLAN-er

•	Kort som støtter 802.1Q-VLAN, inkludert:

o	Intel® PRO/100+

o	Intel® PRO/100 S

o	Intel® PRO/1000

•	Intel® PRO/100B-kortene støtter ikke VLAN.

Hvis du vil ha oversiktsinformasjon om Intel-VLAN, kan du besøke webområdet Intel Networking:

  Besøk webområdet nå

Hvis du vil ha mer spesifikk informasjon, kan du lese de tekniske dokumentene om VLAN:

  Les hvitt papir fra webbområdet nå

Se også

Legge til en VLAN

Endre VLAN-egenskaper

Fjerne et VLAN

Avanserte innstillinger for VLAN


Kundestøtte

Hvis du har Internett-tilkobling og en webleser, kan du besøke en av Intels kundestøttesider.

Slik får du kundestøtte over Internett:

1.	Klikk Kundestøtte fra Hjelp-menyen.

2.	Klikk én av koblingene til webområder.


Feilsøking

Kategorien Feilsøking vises bare når Intel® PROSet II oppdager et problem med kortkonfigurasjonen, driverinstallasjonen eller andre feil. Intel PROSet II undersøker problemet og foreslår i de fleste tilfeller en mulig løsning på det.

Hvis du tror det er et problem med kortet, prøver du ett eller flere av følgende:

•	Kontroller informasjonen i kategorien Generelt for å se om koblingen til nettverket er aktiv.

•	Hvis du har konfigurert en gruppe, tester du konfiguasjonen for koblingspartnere for å være sikker på at de støtter gruppemodusen.

•	Kjør diagnose.

•	Kjør Kabeltesten hvis den støttes på kortet.


Sender Mottaker-test

Sender Mottaker-testen lar deg teste kortet på et nettverk.

Før du kjører testen, kontrollerer du at kortet er koblet til nettverket.

Sette opp testen

Sett opp en Sender- og en Mottaker-datamaskin. Senderen overfører pakker kontinuerlig til mottakeren som returnerer pakkene tilbake til senderen.

SenderSender pakker kontinuerlig til nettverket. Velg Start for å starte pakkesending.
Før du begynner å sende pakker, må du konfigurere en mottaker et annet sted på nettverket. Gå til en annen datamaskin med et Intel® PRO/10+-, PRO/100B-, PRO/100+-, PRO/100 S- eller PRO/1000-kort installert, og bruk Intel® PROSet II for det kortet til å sette det opp som en mottaker. Hvis det er mulig, bruker du samme kortmodell for senderen og mottakeren.

ResponderReturnerer pakkene tilbake til senderen (som sender pakkene). Velg Start for å bruke denne PC-en som mottaker.

Selv om den ikke er utformet for det, kan denne testen brukes til å teste koblingen for nettverkssegmenter og nettverkskonfigurasjon. Når du tester et nytt LAN-segment, setter du opp en mottaker i den ene enden og tester med en sender i den andre.

Denne testen kontrollerer koblingen mellom to kort. Den er ikke ment til å kontrollere hastighet. Hastigheten et kort sender og mottar trafikk på et nettverk ved, kan variere avhengig av nettverkstopologi og nettverksbelastning. Du kan se kortets konfigurerte hastighet ved å klikke på kategorien Generell.

Merk!   Hvis en Cisco*  6500-svitsj er konfigurert med spanningstre aktivert, gir ikke testen nøyaktige resultater. Hvis du vil kjøre Sender Mottaker-testen med en Cisco 6500-svitsj, sørger du for at spanningstre er deaktivert.

Advarsel! Sender/mottaker-testen er ikke ment til å kjøre mens systemet er i ventemodus, deaktiveringsmodus eller når ledningen ikke er plugget inn i datamaskinen.


Nytt VLAN

VLAN-ID: VLAN-nummeret som ble tilordnet av nettverksansvarlig. VLAN-ID-en på kortet må stemme overens med VLAN-ID-en på svitsjen. Gyldig område:  1 - 4094. (MERK: VLAN-numrene 0 og 1 er ofte reservert. Se i dokumentasjonen for svitsjen for detaljer.

VLAN-NAVN:  Navn på VLAN. Det kan for eksempel være Markedsføring eller Utvikling. VLAN-navn er en valgfri innstilling som gjør at du enkelt kan identifisere VLAN i nettverket. VLAN-navnet på kortet trenger ikke stemme overens med VLAN-navnet på svitsjen.


Identifisere kort

Med funksjonen Identifiser kort kan du identifisere det fysiske kortet på baksiden av datamaskinen.

Hvis du for eksempel har installert to kort, kan du velge et kort fra Nettverkskomponenttre og deretter klikke Identifiser kort. Lysindikatoren for det valget kortet blinker.

Slik kontrollerer du kortplasseringen

1	Klikk Identifiser kort.

2	Flytt glidebryteren for å velge hvor mange sekunder lysindikatoren skal blinke. Standardverdien er 10 sekunder.

3	Klikk Start.

 Lysindikatoren for det valgte kortet blinker så lenge det ble angitt.


Feiltoleranse for kort

Feiltoleranse for kort er en gruppe med to eller flere kort som er konfigurert til å inneholde en ekstra nettverkstilkobling. Hvis det skulle oppstå feil med port på hub- eller svitsj, kabelen eller kortet, bryter sørger datamaskinen for at nettverksytelsen opprettholdes.

Feiltoleranse for kort-grupper har et primært kort, og et reserve- eller sekundærkort. Under normal drift er det bare det primære kortet som sender trafikk. Hvis det primære kortet eller koblingen til det primære kortet mislykkes, tar det sekundære kortet automatisk over.

Spanningstre må være deaktivert hvis du bruker Feiltoleranse for kort.

Feiltoleranse for kort-grupper er kompatible med følgende:

Korttype	Krever at ett Intel-serverkort er medlem i gruppen.
Korthastighet	Kan være blandet, for eksempel ett kort som er koblet ved 100 Mbps, og ett som kjører ved 1 000 Mbps.
Nettverkskonfigurasjon	• Alle kortene må være koblet til samme bryter. • Spanningstre må være deaktivert.
Protokoller	Alle
Se også:

Om gruppering

Gruppe typer


Dynamisk belastningsfordeling

Dynamisk belastningsfordeling (ALB - Adaptive Load Balancing) er en type grupper som er konfigurert for å øke serverens gjennomstrømming ved overføring og mottak. ALB-grupper fordeler automatisk belastningen av overføringstrafikk, men belastningsfordelingen for mottakstrafikk kan aktiveres og deaktiveres.

ALB-grupper øker gjennomstrømmingen ved hjelp av:

•	Kortkonfigurasjon Hvis du legger til medlemmer i en gruppe, kan du øke gjennomstrømmingen.

•	Trafikkanalyse. ALB-programvaren analyserer kontinuerlig overførings- og mottaksbelastningen for hvert gruppemedlem, og fordeler deretter belastningen mellom kortene etter behov.

Overføringstrafikk

I ALB-grupper fordeler alle kortene belastningen av IP- (IPv4- og IPv6-) og NCP IPX-overføringstrafikk.

Mottakstrafikk

•	ALB-grupper som har deaktivert Belastningsfordeling ved mottak, mottar trafikk på det primære kortet.

•	For ALB-grupper som har aktivert belastningsfordeling ved mottak:

•	Det primære kortet mottar trafikk ved hjelp av en hvilken som helst protokoll.

•	Aktive kort med høyest hastighet mottar IPv4-trafikk.

Hvis det for eksempel er en ALB-gruppe med tre kort, ett Gigabit-kort som er angitt som det primære kortet, og to Intel® PRO/100-kort:

•	Gigabit-kortet mottar ikke-rutbar trafikk og IPv6-trafikk fordi det er det primære kortet.

•	Gigabit-kortet mottar IPv4 fordi det er kortet med høyest hastighet.

•	Intel PRO/100-kortene deltar ikke i belastningsfordelingen ved mottak.

Hvis du vil ha informasjon om hvordan du aktiverer og deaktiverer belastningsfordeling ved mottak, kan du se Konfigurere avanserte innstillinger.

I tillegg tilbyr ALB-grupper feiltoleranse. Hvis det primære kortet svikter, fortsetter gruppen driften og fordeler trafikken mellom de gjenværende operative gruppemedlemmene.

ALB-grupper er kompatible med følgende:

Korthastighet	Kan være blandet, for eksempel ett kort som er koblet ved 100 Mbps, og ett som kjører ved 1 000 Mbps.
Protokoller	IP, IPX (NCP)MERK: Microsoft kategoriserer sin IPv6-støtte i Windows* 2000 som Tekologiforhåndsvisning. Som sådan var IPv6-støtte i Windows 2000 ikke ment for produksjonsmiljøet. For å få mer informasjon om operativsystemstøtte for IPv6 skal du se på systemdokumentasjonen.
Nettverkskonfigurasjon	Alle kortene må være koblet til samme bryter.

Ytelsesmerknader for Intel® PRO/1000 Gigabit Server-kort

Ettersom Intel® PRO/1000-kortet allerede støtter såpass høy båndbredde, kan det redusere ytelsen på enkelte servere hvis du bruker ALB-funksjonen. Dette er fordi mange servere som er tilgjengelige i dag, ikke har CPU- eller busskapasitet til å effektivt behandle grupperte kort i Gigabit-klassen. Den beste ALB-ytelsen får du ved å bruke nyere servere som støtter flere PCI-busser, og flere Pentium II®-prosessorer som kjører på hastigheter på 400 MHz eller mer. På slike servere installerer du de grupperte Intel PRO/1000-kortene på ulike PCI-busser for å få best ALB-ytelse.

Se også:

Om Gruppering

Gruppetyper

Konfigurer avanserte innstillinger Gruppe typer


IEEE 802.3ad: Dynamisk

802.3ad er en standard for IEEE-koblingssamling. På samme måte som statiske koblingssamlingsgrupper, øker grupper som bruker dynamisk koblingssamling, gjennomstrømmingen med:

•	Kortkonfigurasjon Hvis du legger til medlemmer i en gruppe, kan du øke gjennomstrømmingen. Grupper kan bestå av opptil åtte kort. Hver server kan operere med opptil fire grupper.

•	Trafikkanalyse. ALB-programvaren analyserer kontinuerlig overførings- og mottaksbelastningen for hvert gruppemedlem, og fordeler deretter belastningen mellom kortene etter behov. Svitsjen fordeler belastningen av mottakstrafikken.

I tillegg inneholder 802.3ad-grupper feiltoleranse. I 802.3ad-grupper bruker serveren én IP/MAC-adresse til å kommunisere med nettverket. Etter tur behandler nettverksenheter og klienter en gruppe i koblingssamlingsmodus som én datamaskin. Når det oppstår feil på et kort i gruppen, ser nettverket gruppen som en datamaskin med reduserte funksjoner.

ALB-grupper er kompatible med følgende:

Korthastighet	Alle kortene må operere ved samme hastighet
Nettverkskonfigurasjon	• Kontroller at svitsjen som er koblet til kortene, har full støtte for EEE 802.3ad-standarden. • Se i dokumentasjonen for svitsjen for portavhengigheter. Enkelte svitsjer krever at parordningen starter på et primært kort.  • Kontroller innstillingene for hastighet og dupleks for å forsikre deg om at kortet og svitsjen kjører på full dupleks, enten tvunget eller satt til automatisk forhandling. Både kortet og svitsjen må ha samme konfigurasjon for hastighet og dupleks. Kravet om full dupleks er del av IEEE 802.3ad-spesifikasjonen: http://standards.ieee.org/.  Hvis det er nødvendig, endrer du innstillingen for hastighet og dupleks før du kobler kortet til svitsjen. Selv om du kan endre innstilling for hastighet og dupleks etter at gruppen er opprettet, anbefaler Intel at du kobler fra kablene til innstillingen er trådd i kraft. I enkelte tilfeller kan det være at svitsjer og servere ikke gjenkjenner endrede innstillinger for hastighet og dupleks riktig hvis innstillingene ble endret mens det var en aktiv kobling til nettverket.  • Hvis du konfigurerer et VLAN, bør du se i dokumentasjonen for svitsjen etter merknader om VLAN-kompatiblilitet. Ikke alle svitsjer støtter samtidige dynamiske 802.3ad-grupper og VLAN. Hvis du velger å sette opp VLAN, konfigurerer du innstillinger for gruppering og VLAN på kortet før du kobler kortet til svitsjen. Hvis du setter opp VLAN etter at svitsjen har opprettet en aktiv samler, påvirkes VLAN-funksjonaliteten. • Merk!  I enkelte brytere kan ikke kobber- og fiberkort høre til samme samling i en IEEE 802.3ad-konfigurasjon. Hvis det er kobber- og fiberkort installert på et system, kan bryteren konfigurere kobberkortene i én samling, og de fiberbaserte kortene i en annen. Hvis du opplever dette, får du best ytelse ved å bruke enten kobber- eller fiberbaserte kort på et system.
Protokoller	Alle

Se også:

Om gruppering

Gruppetyper


Informasjon om kortgruppering
Om gruppering

En gruppe er flere kort som er konfigurert til å gi økt gjennomstrømming og feiltoleranse. Grupperingen er kompatibel med Windows* 2000, Windows NT* 4.0 og Windows XP.

Hvilke gruppetyper finnes det?

Med Intel® PROSet II kan du konfigurere følgende gruppetyper:

•	Feiltoleranse for kort (AFT - Adapter Fault Tolerance)

•	Feiltoleranse for kort (AFT - Adapter Fault Tolerance)

•	Dynamisk belastningsfordeling (ALB - Adaptive Load Balancing)

•	FEC*/LA/802.3ad: Statisk

•	GEC/LA/802.3ad: Statisk

•	IEEE 802.3ad: Dynamisk

Hvor mange kort kan jeg legge til i en gruppe?

Med unntak av SFT-grupper, kan grupper inneholde to til åtte kort. SFT-grupper må inneholde nøyaktig to kort som er koblet til én koblingspartner.

Kan jeg bruke kort fra andre leverandører i en gruppe?

Du kan opprette en flerleverandørgruppe (MVT - Multi-Vendor Team) med kort for alle grupperingsmodiene. Hvis du vil opprette en flerleverandørgruppe, må du ha minst ett Intel-serverkort i gruppen.

MVT er kompatibel med:

Korttype	Se i Nettverkskomponenttre for å se hvilke kort i systemet som er kompatible.
Korthastighet	Kontroller kravene for grupperingsmodusen.
MERK: Hvis gruppemedlemmer er del av et VLAN, støtter ikke Intel PROSet II grupper med flere leverandører.

Hvor mange grupper kan jeg sette opp på en datamaskin?

Antall grupper som er konfigurert på datamaskiner, varierer avhengig av datamaskinensmaskin- og programvarekonfigurasjon.

Hvilke krav stilles?

Nettverkskonfigurasjonen og korttypene du har installert på datamaskinen, påvirker hvilke gruppetyper som kan settes opp på datamaskinen. Se gjennom informasjonen i emnet Gruppetyper for å få en oversikt over gruppekrav og -funksjoner.

Hvordan fjerner jeg grupper?

Når du fjerner grupper, må du sørge for å bruke Intel PROSet II-verktøyet. Hvis du fjerner eller deaktiverer grupper gjennom nettverkspanelet på operativsystemet, kan det påvirke systemstabiliteten og kortkonfigurasjonen.

Hvis du vil se en oversikt over kortgruppering, kan du besøke webområdet Intel® Networking:

  Besøk webområdet nå

Hvis du vil ha mer spesifikk informasjon om formålet med de ulike gruppetypene, kan du lese det tekniske dokumentet om løsing av flaskehalser for servere:

  Les hvitt papir nå

Se også:

Gruppetyper


Kortdetaljer

Slik viser du detaljer om et kort:

1.	Klikk kortet du vil se detaljer om, i Netverkskomponenttre.

2.	I kategorien Generelt klikker du Detaljer.

Detaljer-skjermen vises.

Merk! Ikke alle egenskapene er tilgjengelige for hver kortmodell.

IP-adresse:	IP-adressen som for øyeblikket brukes for dette kortet. Merk!  Intel® PROSet II viser ikke IPv6-adresser.
Busshastighet	Gjeldende hastighet (i megahertz) for PCI-bussen som kortet bruker.
Bussbredde	Gjeldende hastighet (i megahertz) for PCI-bussen som kortet bruker.
Kontroller	Delnummer eller komponentmodell på kortet.
Medietype	Koblingstype (fiber eller kobber)
Permanent Ethernet-adresse	Nodeadresse (MAC) for kortet i heksadesimale tegn. Det er leverandøren som tilordner MAC-adressen til kortet.
Permanent Ethernet-adresse	MAC-adressen som kortet bruker for øyeblikket.  Hvis kortet er medlem i en gruppe, eller hvis det er tilordnet en lokalt administrert adresse (LAA) til kortet, er gjeldende Ethernet-adresse ulik den permanente adressen for kortet.
PHY-enhet	Beskrivelse av kortet
Delnummer	Intel-delnummeret for kortet
Avbrudd	Avbruddet som PCI BIOS eller operativsystemet tilordnet kortet.
Minneadresse	Avbruddet som PCI BIOS eller operativsystemet tilordnet kortet.
I/U-adresse	I/U-adressen som PCI BIOS tilordnet kortet.
Busspor	Bussnummeret og spor-ID-en for kortet.
Kortspor på systemet	Kortspor på systemet er underinndelinger av bussporet. Hvis for eksempel bussporet er delt i to, finnes det to kortspor for systemet som identifiserer hver del av bussporet.
DHCP-serveradresse	IP-adressen for serveren som gav en IP-adresse til kortet.


Konfigurere avanserte funksjoner for gruppering

Det finnes ulike avanserte innstillinger tilgjengelig for hver gruppetype.

Slik viser eller endrer du avanserte gruppeinnstillinger:

1.	I Nettverkkomponenttre du en gruppe.

2.	Klikk kategorien Avansert.

3.	Gjør ønskede endringer i gruppekonfigurasjonen.

4.	Hvis du vil gjenopprette standardene, klikker du Bruk standardinnstillinger.

5.	Klikk OK for at endringene skal tre i kraft.

Beskrivelser av de avanserte innstillingene og tilhørende standarder er beskrevet nedenfor. I de fleste tilfeller er det best å beholde standarden.

Kontroller tidsforbruk (sekunder)

Hvor ofte programvaren kontrollerer statusen for gruppemedlemmene. Hvis Kontroller tidsforbruk for eksempel er ett sekund, kontrollerer programvaren gruppemedlemmene hvert sekund for å sikre at de er i stand til å sende og motta trafikk.

Standard 1 sekund

Område 1 - 3 sekunder

LinkAggrJoinMethod

Denne avanserte innstillingen er tilgjengelig for Koblingssamling-grupper. Basert på IEEE 802.3ad-standarden kan en kobling deles i flere koblinger som kalles samlere. Bare én av samlerne er imidlertid aktiv. Parameteren LinkAggrJoinMethod angir hvordan systemet velger den aktive samleren. Hvis du setter LinkAggrJoinMethod til Maksimal båndbredde, velger systemet den samleren som genererer mest trafikk. Hvis du setter parameteren til Maksimalt antall kort, velger systemet den samleren som har flest kort.

Standard Maksimal båndbredde

Område: Maksimal båndbredde, Maksimalt antall kort

Oppdateringsfrekvens for belastningsfordeling

Hvor lenge det går før programvaren tilbakestiller eller oppdaterer gjeldende belastning hos gruppemedlemmene. Optimal ytelse får du ved å beholde innstillingen på standarden eller så lav som mulig.

Standard Hver 10. Kontroller tidsforbruk-enhet

Område: 1-50 Kontroller tidsforbruk-enheter

Antallet sekunder som angis for innstillingen Kontroller tidsforbruk, er målenheten for oppdateringsfrekvensen.  Se Kontroller tidsforbruk-innstillingen for flere detaljer.

Lokalt administrert adresse

Hvis du bruker Windows NT Load Balancing Service (WLBS), NLB, eller andre drivere i samme klasse, kan du tilpasse MAC-adressen som brukes av gruppen.

Hvis du vil tilpasse MAC-adressen, skriver du inn den nye MAC-adressen for gruppen i LAA-feltet. Sørg for at den nye adressen er innenfor området:  0000 0000 0001 - FFFF FFFF FFFD.

Unntak:

•	Ikke bruk en multicast-adresse (minst signifikante bit i høy byte = 1). I for eksempel adressen 0Y123456789A kan ikke Y være et oddetall. (Y må være 0, 2, 4, 6, 8, A, C eller E.)

•	Ikke bruk bare nuller eller bare F-er.

Når du vil gjenopprette standard MAC-adresse, sletter du adressen i feltet for lokalt administrert adresse, og deretter klikker du OK eller Bruk standardinnstillinger.

Merk!  Intel® PROSet II bruker enten:

•	Gruppens LAA hvis gruppen har en konfigurert LAA, eller

•	Det primære kortets permanente MAC-adresse hvis gruppen ikke har noen konfigurert LAA

LAA-innstillinger i det primære kortet overskrives av gruppens LAA hvis gruppen har en LAA konfigurert.

STP- og SFT-grupper: Hvis du endrer hvilket kort som er det primære (aktive) kortet i en gruppe, lastes gruppen inn på nytt ved hjelp av MAC-adressen for det nye primære kortet. På samme måte lastes gruppen inn på nytt og får ny MAC-adresse hvis den lokalt administrerte adressen (LAA) for gruppen endres. Begge disse handlingene, hvis de utføres på en SFT-gruppen mens serveren er aktiv på nettverket, gjør at gruppen ikke kan kommunisere før alle nettverksenhetene oppdaterer ARP-tabellene med adresseinformasjonen til det nye kortet. Tiden det tar å oppdatere ARP-tabellen, angis av tidsavbruddperioden for ARP-hurtigbufferen. Denne parameteren er tilgjengelig på enkelte rutere og operativsystemer. Avhengig av tidsavbruddperioden for ARP-hurtigbufferen kan gruppen være utilgjengelig i opptil ti minutter.

NumRxPackets

Definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å tildele mottatte pakker til minne. Hver mottatte pakke krever én mottaksbetegnelse, og hver betegnelse bruker 2 kB minne.

Du kan velge å øke antallet mottaksdeskriptorer hvis du merker betydelig nedgang i ytelsen for mottatt trafikk. Hvis mottaksytelsen ikke er noe problem, bruker du standardinnstillingen.

Standard Standard Når du bruker standardverdien, beregner Intel PROSet II automatisk den beste verdien for denne innstillingen basert på gruppekonfigurasjonen og maskinvarefunksjoner.

Anbefalt 250

Område: 32 - 512, trinn 16

NumTxPackets

Definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du standardinnstillingen.

Standard:  Standard Når du bruker standardverdien, beregner Intel PROSet II automatisk den beste verdien for denne innstillingen basert på gruppekonfigurasjonen og maskinvarefunksjoner.

Område: 16 - 512, trinn 16

Belastningsfordeling ved mottak

Som standard fordeler ALB-grupper belastningen for all overføringstrafikk. Du kan også aktivere eller deaktivere Belastningsfordeling ved mottak med denne innstillingen.

Hvis Belastningsfordeling ved mottak er deaktivert, mottar det primære kortet all trafikk.

Hvis Belastningsfordeling ved mottak er aktivert:

•	Primærkortet mottar trafikk som ikke er IP-trafikk

•	Aktive kort med høyest hastighet mottar IPv4-trafikk.

Hvis det for eksempel er en ALB-gruppe med tre kort, ett Gigabit-kort som er angitt som det primære kortet, og to Intel® PRO/100-kort:

•	Gigabit-kortet mottar ikke-rutbar trafikk og IPv6-trafikk fordi det er det primære kortet.

•	Gigabit-kortet mottar IPv4 fordi det er kortet med høyest hastighet.

•	Intel PRO/100-kortene deltar ikke i belastningsfordelingen ved mottak.

Standard: Aktivert etter første oppsett; Deaktivert hvis gruppen først opprettes i en annen gruppemodus og deretter endres til ALB

Område: Aktivert, Deaktivert

Knappen Bruk standardinnstillinger

Denne knappen tilbakestiller den valgte avanserte innstillingen til standardverdien for innstillingen.  Se innstillingene over for standardverdier.  (Dette alternativet er ikke tilgjengelig for alle innstillingene.)

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet II etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Diagnoser for PRO/100- og PRO/100+-kort
Diagnoser for Intel(R) PRO/100-, PRO/100+- og PRO/100 S-kort

Merk!  Hvis du klikker Stopp mens diagnosene utføres, oppstår det en kort forsinkelse før diagnosene stopper. Når de stopper, blir OK-knappen tilgjengelig.

Grunnleggende analyser

Kortdiagnoser gir deg fleksibilitet til å teste ett eller flere elementer.

MERK:  Dersom datamaskinen kjører Windows 98, kan det hende du må deaktivere kortet Strømstyring før du kjører diagnostiseringen. For å se detaljer skal du se på Deaktivere strømstyringsprosedyren.

Kontroller registre

Tester registrene som programvaren bruker til å konfigurere og sende kommandoer til 8255x-kontrolleren.

Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.

Intel 8255x Kontroller

Kjører innebygde tester på 8255x-kontrolleren for å bekrefte at den  fungerer riktig.

Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.

EEPROM

Leser EEPROM-innholdet og bekrefter at sjekksummen er korrekt. Da brukes EEPROM-kontrolleren/dataregistret som i realiteten tester registret.

Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.

Tilbakekobling

Tester kortets evne til å sende og motta pakker.

Hvis testen for registerkontroll mislykkes, erstatter du kortet og kjører testen på nytt. Hvis testen mislykkes med erstatningskortet, kan det tyde på at hovedkortet eller en annen enhet på bussen ikke fungerer riktig.

Kobling

Kontrollerer nettverkstilkoblingen og kortets sende- og mottaksfunksjonalitet ved å sende 1000 proprietære pakker ut på nettverket og hente tilbake de samme pakkene.

Hvis koblingstesten mislykkes, kontroller du at ledningen er forsvarlig festet til kortet og koblingspartneren. Hvis ledningen sitter godt, prøver du å koble ledningen til en annen port på koblingspartneren, eller du prøver en annen ledning.


Avanserte innstillinger for PRO/1000 Desktop-kort
Avanserte innstillinger for Intel® PRO/100-kortfamilien

Innstillingene som er oppført i kategorien Avansert, lar deg tilpasse hvordan kortet behandler QoS-pakkemerking, Jumbo-rammer, avlasting og andre funksjoner. Enkelte av følgende funksjoner er kanskje ikke tilgjengelige avhengig av operativsystemet du kjører, og de enkelte kortene som er installert.

Avanserte innstillinger

Adaptivt rammeintervall

Kompenserer for høyt antall Ethernet-pakkekollisjoner på nettverket.  Som standard er innstillingen satt til 0. Dette deaktiverer funksjonen.

Den anbefalte innstillingen (1) fungerer best for de fleste datamaskiner og nettverk ved at den tilpasses dynamisk til forholdene for nettverkstrafikk. Denne dynamiske modusen er bare aktiv når verdien er satt til 1. I sjeldne tilfeller kan du imidlertid oppnå bedre ytelse ved å angi avstandsverdien manuelt. Når du angir en verdi, tvinges det frem statisk avstand mellom pakkene.

Når verdien økes, øker mellomrommet mellom rammene som sendes.

Kort som støttes	Alle
Standard	0: deaktivert
Område	0-255

Svar på dynamisk kobling

Gjør systemoppstarten raskere ved å hoppe over oppstartsrutiner som krever nettverkstilkobling, når kabelen ikke er koblet til kortet. Dette reduserer tiden det tar å starte datamaskinen, betraktelig.

Når Svar på dynamisk kobling for Intel Ethernet-kontrollere aktiveres, og en nettverkskabel ikke er koblet til RJ-45-porten , vil nettverkskoblingen bli deaktivert. Et gult varslingsikon vil komme frem på Enhetsbehandlingen.

For å reaktivere nettverkskoblingen, skal du koble nettverkskabelen til RJ-45 porten, og deretter starte datamaskinen på nytt.

Kort som støttes	Bare flyttbare (CardBus) produkter. Ikke tilgjengelig på alle kortmodeller.
Standard	Av
Anbefalt	På
Område	På, Av
MERK: Adaptive Link Response (ALR) vil ikke virke når et trådløst kort er aktiv i systemet.

Justering av kortytelse

Angir antall rammer kortet mottar før det utløser et avbrudd. Ved normal drift genererer kortet avbrudd hver gang det mottar en ramme. Hvis antallet avbrudd reduseres, forbedres CPU-utnyttelsen.

Flytt glidebryteren til maksimal kortbåndbredde for å generere ett avbrudd per ramme. Dette øker båndbredden for kortet, men kan redusere CPU-utnyttelsen og gjøre datamaskinen tregere. Flytt glidebryteren mot maksimal CPU-utnyttelse for å øke antallet rammer som kortet mottar før det genererer et avbrudd. Dette forbedrer CPU-utnyttelsen, men det kan redusere båndbredden for kortet. Standardinnstillinger fungerer bra for de fleste datamaskiner.

Kort som støttes	Alle

Kortteknologi

Aktiverer eller deaktiverer mikrokoden i kortdriveren. Mikrokoden optimaliserer ytelsen basert på operativsystemmiljøet.

Den beste ytelsen får du ved å la Kortteknologi være aktivert.

Du vil kanskje deaktivere Kortteknologi mens du feilsøker problemer med kortkompatibilitet.  Når du deaktiverer Kortteknologi, deaktiverer du også Kontrollblokker for overføring og Justering av kortytelse.

Kort som støttes	Alle
Standard	På
Område	På, Av
Overføringsterskelverdi for kort

Angir antall byte som kortet lagrer i overføringsbufferen før sending. Hvis for eksempel overføringsterskelverdien for kortet er 100, lagrer kortet 100 byte (800 biter) i bufferen før dataene sendes.

•	Hvis du øker overføringsterskelverdien for kortet, reduseres overføringsytelsen, men det kan bli færre underkjøringer.

•	Hvis du øker overføringsterskelverdien for kortet, reduseres overføringsytelsen, men det kan bli færre underkjøringer. Senking av verdien gjør at kortet kan utføre tidlige overføringer.

Kortet bruker bare overføringsterskelverdien for kortet som et startpunkt. Hvis kortet kan oppnå bedre overføringsytelse ved å bruke en lavere verdi, bruker det automatisk en slik verdi.

Hvis du vil konfigurere kortet til først å sende fullstendige Ethernet-rammer og deretter justere til beste ytelse, setter du verdien til 190. Hvis overføringsytelsen faller betydelig med en verdi på 190, setter du terskelen til 16 og øker den trinnvis.

Kort som støttes	Alle
Standard	200
Anbefalt	• Hvis datamaskinen har flere bussmasteringkort eller lang ventetid, setter du verdien til over 200. • Hvis datamaskinen bare har ett bussmasteringkort, setter du verdien til 12.
Område	0-200

Grunnleggende tilkobling for ingen ressurser

Opprettholder nettverkstilkoblingen selv om systemet ikke har nok ressurser til å kjøre alle de avanserte innstillingene, for eksempel IPSec-avlasting og Stor sending-avlasting. Avanserte funksjoner gjenopptas ikke før du starter datamaskinen på nytt.

Kontroller systemloggen for å identifisere ressursproblemer. Systemloggen viser feil som oppstår som følge av for lite systemressurser.

Kort som støttes	Alle
Standard	Aktivert
Anbefalt verdi	Aktivert
Område	Aktivert, Deaktivert
Oppsamlingsbuffere

Optimaliserer overføringsytelsen ved å tilpasse antall oppsamlingsbuffere. Dermed kan kortet koble sammen datasegmenter før pakkene overføres.

Oppsamlingsbuffere-innstillingen må konfigureres til å fungere med overføringsdeskriptorer-innstillingen. Oppsamlingsbuffere-innstillingen bør være 30 - 50 % av Overføringsdeskriptorer. Hvis Oppsamlingsbuffere ikke endres til å stemme overens med overføringsdeskriptorer, er det ikke sikkert overføringsytelsen forbedres.

Oppsamlingsbuffere-innstillingen øker overføringsytelsen betraktelig på Windows NT 4.0-datamaskiner. Den forbedrer også overføringsytelsen på Windows 98- og 2000-datamaskiner.

Kort som støttes	Alle
Standard	8
Anbefalt verdi	8
Område	1-32

Aktiver PME

Aktiverer eller deaktiverer oppvåkningsfunksjoner for kort på datamaskiner som har eldre APM-implementeringer (Advanced Power Management). Reaktivering gjør at kortet går ut av ventemodus eller avslåingstilstand når det mottar bestemte pakketyper, for eksempel ARP-pakker.

•	Hvis du deaktiverer funksjonen, deaktiveres alle reaktiveringsinnstillinger på datamaskiner som bruker eldre strømsparingsimplementeringer.

•	Hvis du aktiverer funksjonen, svarer kortet på reaktiveringssignaler. Hvis du vil konfigurere kortet til å svare på bestemte pakketyper, kan du se informasjonen om Innstillinger for oppvåkning senere i dette emnet.

•	Verdien Standard maskinvareinnstilling tvinger kortet til å konfigurere funksjoner for reaktivering basert på maskinvaren på systemet.

•	Verdien Ingen handling gjør at kortet bruker standarden for operativsystemet.

Hvis du vil deaktivere alle Innstillinger for oppvåkning, setter du denne funksjonen til deaktivert. Hvis ikke, setter du funksjonen til Ingen handling.

Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Deaktivert
Område	Aktivert, Deaktivert

Flytkontroll

Gjør det mulig for kort å regulere trafikk mer effektivt.

•	Kortene genererer flytkontrollrammer når mottakskøene når en forhåndsdefinert grense. Når du genererer flytkontrollrammer, får senderen signaler om å senke overføringen.

•	Kortene svarer på flytkontrollrammer ved å stanse pakkeoverføringen midlertidig så lenge som det er angitt i flytkontrollrammen.

Når du lar kort justere hastigheten for pakkeoverføring, hjelper flytkontroll å forhindre tap av pakker.

Merk! Koblingspartnere må støtte flytkontrollrammer for at kort skal kunne dra nytte av denne funksjonen.

Kort som støttes	82540- og 82544-baserte kort, sende og motta. Se emnet Kortspesifikasjoner  hvis du trenger hjelp til å identifisere kortet.
Standard	Generere og svare på flytkontrollrammer
Område	Av, Svar, Generer, Generer & Svar, Maskinvarefeil

Koblingsbasert pålogging

Aktiverer funksjonen Svar på dynamisk kobling (ALR - Adaptive Link Response). Basert på verdien for parameteren LinkBasedLoad kontrollerer denne funksjonen PhyLink-statusen og returnerer verdien Vellykket eller Mislykket.

Kort som støttes	Alle
Standard	Deaktivert (0)
Område	Aktivert, Deaktivert

Koblingshastighet og dupleks

Konfigurerer kommunikasjonsinnstillinger for kortet.

Hvis kortet skal operere ved den konfigurerte innstillingen, må også koblingspartneren være i stand til å operere ved den konfigurerte innstillingen. Hvis kortet for eksempel er konfigurert til å bruke 100 Mbps/hel dupleks, må koblingspartneren også kunne operere ved 100 Mbps/hel dupleks. På samme måte må også koblingspartneren støtte automatisk forhandling hvis kortet er konfigurert til å bruke det.

Kort som støttes	Alle Intel® PRO/100-kort
Standard	Automatisk søk
Anbefalt verdi	Automatisk søk
Område	• Automatisk søk- Kortet forhandler med koblingspartneren for å identifisere kompatible innstillinger for hastighet og dupleks. • 10 Mbps/halv dupleks - Kortet fremtvinger en tilkobling ved 10 Mbps og fullfører overførings- og mottaksoperasjonene separat. Når kortet mottar pakker, kan det ikke sende pakker. Når kortet mottar pakker, kan det ikke sende pakker. • 10 Mbps/full dupleks - Kortet fremtvinger en tilkobling ved 10 Mbps og fullfører overførings- og mottaksoperasjonene samtidig. Slik forbedres ytelsen for kortet. Velg denne modusen bare hvis du har en svitsj som kan håndtere heldupleks. • 100 Mbps/halv dupleks - Kortet fremtvinger en tilkobling ved 100 Mbps og fullfører overførings- og mottaksoperasjonene separat. Når kortet mottar pakker, kan det ikke sende pakker. Når kortet mottar pakker, kan det ikke sende pakker. • 100 Mbps/full dupleks - Kortet fremtvinger en tilkobling ved 100 Mbps og fullfører overførings- og mottaksoperasjonene samtidig. Slik forbedres ytelsen for kortet. Velg denne modusen bare hvis du har en svitsj som kan håndtere heldupleks.

Lokalt administrert adresse (LAA)

Overstyrer MAC-adressen for kortet. Hvis du vil angi en ny nettverksadresse, skriver du inn et 12-sifret heksadesimalt tall i verdiboksen.

Kort som støttes	Alle
Standard	Ingen
Område	0000 0000 0001 - FFFF FFFF FFFD Unntak: • Ikke bruk en multicast-adresse (minst signifikante bit i høy byte = 1).  • Ikke bruk bare nuller eller bare F-er.
Merk!  I en gruppe bruker Intel® PROSet II enten:

•	Gruppens LAA hvis gruppen har en konfigurert LAA, eller

•	Det primære kortets permanente MAC-adresse hvis gruppen ikke har noen konfigurert LAA

Intel PROSet bruker ikke et korts LAA hvis kortet er det primære kortet i en gruppe, og gruppen har en LAA.

Windows 98SE-brukere:

Dersom du vil bruke standardadressen etter å ha brukt en manuelt tildelt adresse, skal du foreta en av disse prosedyrene:

•	På dialogboksen Nettverkegenskapers kategori Avansert, velger du Lokalt administrert adresse, og endrer verdien til 0. Klikk OK for å bruke innstillingen.

•	I Intel PROSet II klikker du på kategorien Avansert, deretter klikker du på Gjenopprett standard eller fjerner alle verdiene fra Verdifeltet. Klikk OK for å bruke innstillingen.

Logg koblingsstatushendelser

Denne innstillingen brukes for å aktivere/deaktivere loggingen av koblingsstatusendringer. Dersom den stilles til på, genererer en kobling-opp-hendelse eller en kobling-ned-hendelse en beskjed som blir vist i hendelseslogg. Administratorer ser hendelsesbeskjeden fra systemet hendelseslogg.

De følgende hendelser logges.

KOBLING_OPP_ENDRING

KOBLING_NED_ENDRING

KOBLING_DUPLEX_FORSKYVNING

Kort som støttes	Alle
Standard	Aktiver
Område	Aktiver, deaktiver
Avlasting

Sparer CPU-sykluser hvis innstillingene er satt til å samsvare med korttypen du bruker.

•	Hvis du bruker sikkerhetsavlasting med et Intel® PRO/100 S-kort, må du bruke innstillingen for IP-sikkerhet.

•	Hvis du ikke bruker sikkerhetsavlasting med et Intel® PRO/100 S-kort, må du bruke innstillingen for sjekksum.

•	For andre korttyper bruker du innstillingen Ingen.

Kort som støttes	Alle
Operativsystemer som støttes	Windows* 98SE, Windows Me, Windows NT*, Windows 2000 og Windows XP
Standard	Intel PRO/100 S: IP-sikkerhet Intel PRO/100 S uten sikkerhet: Sjekksum
Område	Ingen, IP-sikkerhet, Sjekksum (avhengig av korttype er noen alternativer kanskje ikke tilgjengelige)
Hvis du vil ha informasjon om IP-sikkerhet, kan du se emnet Aktiver IPSec.

PCI-busseffektivitet

Gjør det mulig for kortet å bruke den beste overføringsmetoden for pakker eller alltid tvinge pakkesamling.

•	Når PCI-busseffektivitet er deaktivert, bruker kortet overføringsmetoden som gir best mulig ytelse. Hvis pakkesamling gir den beste overføringsytelsen, samler kortet automatisk pakkene.

•	Når PCI-busseffektivitet er aktivert, tvinger kortet frem pakkesamling.

Deaktiver PCI-busseffektivitet hvis det ikke er problemer med ytelsen for pakkeoverføringen. Hvis det er et stort antall underkjøringer, eller PCI-bussen har ytelsesproblemer, setter du verdien til aktivert.

Kort som støttes	Alle
Standard	Deaktivert
Område	Aktivert, Deaktivert

Definisjon av prioritetsnivå

Konfigurerer skjæringspunktet for prioritetsnivået for QoS-merkede pakker.

Hvis datamaskinen har aktivert 802.1p/802.1Q-merking (QoS), kan du definere prioritetsnivåene (0-7) som behandles av prioritetskøene. Intel-kort har to prioritetskøer: Høy og lav. Som standard sendes pakker med en verdi på 0-3 gjennom lavprioritetskøen, og pakker med en verdi på 4-7 sendes gjennom høyprioritetskøen.

Tallet du angir for Definisjon av prioritetsnivå, er skjæringspunktet mellom høy- og lavprioritetskøer. Som standard sendes pakker med en verdi på 0-5 gjennom lavprioritetskøen, og pakker med en verdi på 6-7 sendes gjennom høyprioritetskøen.

Kort som støttes	Alle
Standard	4 • Pakker med verdier på 0-3 sendes til lavprioritetskøen.  • Pakker med verdier på 4-7 sendes til lavprioritetskøen.
Område	0-7

Merking av QoS-pakke

Aktiverer eller deaktiverer IEEE 802.1p/802.1Q-merking for prioritetsfiltrene du har innstilt via Windows* 2000, XP, erller Prioritetpakken   Du må sette dette alternativet til Aktivert for at Prioritetspakkefilteret skal virke ordentlig.

Hvis du har tilordnet filtre ved hjelp av 802.1p/Q-merking, men denne innstillingen er satt til Deaktivert, prioriteres de tilsvarende pakkene allikevel med Intel High Priority Queue (HPQ).

Kort som støttes	82550-, 82558- og 82559-baserte produkter. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Deaktivert
Område	Aktivert, Deaktivert
Mottaksbuffere

Angir antall buffere som brukes av driveren under kopiering av data til minnet.

I situasjoner med tung nettverksbelastning kan det øke ytelsen hvis du øker antall mottaksbuffere. Ulempen er at dette også fører til at driveren bruker mer systemminne. Det kan gi forringet ytelse på systemet hvis du endrer denne verdien.

Kort som støttes	Alle
Standard	Standarden varierer avhengig av funksjonene som er valgt.
Anbefalt verdi	• Enkelt kort i Windows NT: 32 • Single adapter in Windows 98, Windows Me, Windows 2000, and Windows XP: 48 • Gruppert kort: 250 • Med IPSec og/eller flere funksjoner: 350
Område	8-1024

Rammeintervall ved gjentatt overføring

Øker forsinkelsen mellom omsendingene av rammer. Selv om det er en innebygd Ethernet-algoritme som kort bruker til å sende rammer om igjen etter konflikter, kan nettverksytelsen forbedres ved å øke forsinkelsen hvis antall konflikter på nettverket er unormalt høyt.

Kort som støttes	De valgte kortene støtter denne funksjonen
Standard	6
Område	6-15

Sikkerhetstilordninger

Angir antall samtidige sikkerhetstilordninger som kan avlastes til kortets matematikkprosessor. En sikkerhetstilordning er en kommunikasjonsøkt med en annen datamaskin som kjører Intel® Packet Protect eller annen programvare for IP-sikkerhet.

Hvis datamaskinen kan støtte flere sikkerhetstilordninger enn det som er angitt som standard, øker du denne verdien. Vær klar over at et høyere antall sikkerhetstilordninger øker minneforbruket for kortet.

Kort som støttes	Intel PRO/100 S:
Standard	Klient: 64 Server: 1000
Område	1-5000

Smart strømsparingsmodus

Gjør at kortet kan redusere strømforbruket når LAN-kabelen ikke er koblet til kortet. Når kortet gjenvinner gyldig kobling, går strømforbruket tilbake til normal tilstand (fullt strømforbruk).

Kort som støttes	82559-baserte flyttbare kort og senere
Standard	Aktivert
Anbefalt verdi	Aktivert
Område	Aktivert, Deaktivert
Tekniske detaljer

Kontrollblokker for overføring

Definerer antall kontrollblokker for overføring. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du standardverdien 16.

Kort som støttes	Alle
Standard	16 eller 32, avhengig av kravene for kortet
Område	8-64
Reaktiver ved koblingsendring

Reaktiverer datamaskinen hvis nettverkstilkoblingen etablerer en kobling mens datamaskinen er i hvilemodus. Du kan aktivere funksjonen, deaktivere den eller la operativsystemet bruke standarden.

Operativsystemer som støttes	Windows 9x, Windows 2000, Windows XP
Område	Deaktivert, tvunget, operativsystemavhengig
Standard	Deaktivert
Innstillinger for oppvåkning

Disse innstillingene refererer til funksjoner som aktiveres av operativsystemet eller Intel® PROSet II. Funksjonene virker ulikt eller støttes ikke i det hele tatt, avhengig av hvilken versjon av Windows du bruker.

•	Disse Windows-versjonene støtter Innstillinger for oppvåkning: Windows 2000, Windows XP* 64 bit Edition, Windows XP Professional og Windows XP Home Edition

•	Disse Windows-versjonene støtter ikke Innstillinger for oppvåkning:  Windows 98 detaljsalg og Windows NT 4.0.

Merk! Bare Intel® PRO/100+ Management- og Server-kort og Intel® PRO/100 S-kort støtter innstillinger for oppvåkning.

Aktivere innstillinger for oppvåkning på operativsystemet

Følgende typer reaktiveringspakker krever at operativsystemet har aktivert innstillinger for oppvåkning:

•	Wake On ARP

•	Wake On Directed Packet

•	Wake On NBT

Hvis kortet skal svare på disse typene reaktiveringspakker, må operativsystemet ha aktivert bruk av innstillinger for oppvåkning. Hvis du vil aktivere Innstillinger for oppvåkning, navigerer du til Enhetsbehandling og aktiverer alternativet Tillat denne enheten å bringe datamaskinen ut av ventemodus. Slik finner du alternativet:

1.	Klikk Start > Kontrollpanel.
Kontrollpanel-vinduet vises.

2.	Dobbeltklikk System.
System-dialogboksen vises.

3.	Klikk kategorien Maskinvare, klikk deretter knappen Enhetsbehandling.
Vinduet Enhetsbehandling åpnes.

4.	Dobbeltklikk kortet du vil klargjøre for reaktiveringsinnstillinger.
Egenskaper-dialogboksen vises.

5.	Klikk kategorien Strømsparing.

6.	Klikk Tillat denne enheten å bringe datamaskinen ut av ventemodus for å aktivere Innstillinger for oppvåkning for kortet.

Slik aktiverer du oppvåkningsinnstillinger

1.	I Intel PROSet II, klikk kategorien Avansert.

2.	I listeboksen Innstilling velger du Innstillinger for oppvåkning.

3.	I listen Verdi velger du den aktuelle oppvåkningsinnstillingen.

4.	Klikk OK eller Bruk.

Tilgjengelige innstillinger

Disse innstillingene for reaktivering er tilgjengelige i Intel PROSet II:

Innstilling	Beskrivelse
Deaktivert	Kortet vil ikke bruke reaktiveringsinnstillinger.
Våkne ved magisk pakke	Reaktiverer kortet som svar på en mottatt magisk pakke. En magisk pakke er en pakke som inneholder 16 kontinuerlige kopier av Ethernet-adressen til kortet som mottar pakken. Når du konfigurerer denne funksjonen, overstyrer Intel PROSet operativsystemverdien for funksjonen.
Reaktiver ved adresserte pakker	Reaktiverer kortet når kortet mottar en adressert pakke. Dette er en unicast-pakke som sendes til kortets MAC-adresse.  Protokollen må aktivere denne oppvekkingsmetoden i driveren. Fravelging av denne egenskapen forteller driveren at den skal ignorerer enhver protokollanmodning om å aktivere denne oppvekkingsmetoden.
Reaktiver ved magiske og adresserte pakker	Aktiverer kortet for reaktivering når det mottar en magisk pakke eller en adressert pakke.
Styrt av OS	Gir operativsystemet full kontroll over oppvåkningsinnstillinger.

MERK: Hvis flere IP-adresser er konfigurert for ett kort, kan operativsystemet be om reaktivering ved ARP-mønstre til alle de konfigurerte adressene. Kortet vil bare reaktiveres hvis ARP-pakker forespør den første IP-adressen i listen.

MERK: Reaktiveringsinnstillinger inkluderer ikke muligheten til å vekke en maskin fra avslått (S5) tilstand. Denne tilstanden kontrolleres av innstillingen Aktiver PME, som også er tilgjengelig i kategorien Avansert. Selv om reaktiveringsinnstillinger er deaktivert, bestemmes muligheten for vekking fra S5 av innstillingen Aktiver PME.

Så lenge kortdriveren er aktivert, vil PME-innstillinger fungere. Når driveren er deaktivert, går imidlertid enheten tilbake til standard maskinvareinnstilling, som enten lar eller ikke lar datamaskinen vekkes opp når den er slått av.

Se også

Konfigurere avanserte funksjoner for gruppering


Oversikt Prioritetspakke
Oversikt over Intel® PROSet

Intel® Prioritypakke er et trafikkprioriteringsredskap som gjør det mulig å sette opp filtre for å håndtere høyprioritetstrafikk før normaltrafikk. Du kan bruke Intel Priority Packet for å sette opp filtre som gir prioritet til kritiske applikasjoner.

Intel Priority Packet er et separat redsakp fra Intel® PROSet II.

Krav

Operativsystemer som støttes	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 eller høyere
Kort som støttes	Intel® PRO/100- og PRO/1000-kortfamilien
For å installere Intel Priority Packet

1.	Sett inn kort-CD-en I datamaskinens CD-ROM-drive.
Autorun-skjermen vises.

2.	Lukk autorun-skjermen.

3.	Naviger til WINDOWS/PRTPKT-mappen på Intel CD-en.

4.	For å installere Intel Priority Packet, dobbeltklikker du på setup.exe.

5.	Følg veiledningene på skjermen for å fullføre installasjonen av Priority Packet.

Etter installasjonen kan du åpne redskapet ved å klikke på Start > Programmer > Intel® Priority Packet II.

Prioritere nettverkstrafikk

Intel Priority Packet lar deg sette opp filtre for å sende informasjon fra kritiske noder eller applikasjoner med angitt prioritet. Ved å prioritere trafikken hos verten eller ved tilgangspunktet for nettverket kan nettverksenheter basere videresendingsbeslutninger på prioritetsinformasjon definert på pakken.

Intel Priority Packet prioriterer trafikken basert på filtre – parametere du bestemmer skal brukes ved utgående (overførings) pakker. Ved hjelp av veiviseren i Priority Packet Filter kan du innstille forhåndsdefinerte eller individualiserte filtre basert på en node (MAC)-adresse, Ethernet-type eller ved forskjellige egenskaper for protokollen og porten. Priority Packet gir to forskjellige metoder for å prioritere trafikken: IEEE 802.1p-merking og Intel High Priority Queue.

IEEE 802.1p-merking

IEEE 802.1p er en IEEE-standard for merking av pakker for å definere prioritetsnivåer. Pakkene er merket med fire (4) tilleggs-bytres, noe som øker pakkestørrelsen og angir et prioritetsnivå. Når disse merkede pakkene sendes ut på nettverket, overføres høyprioritetspakker først. Prioritetspakkemerking (også kjent som Traffic Class Expediting) gjør kortet i stand til å virke sammen med andre elementer i nettverket (svitsjer, rutere) for å levere prioritetspakken først. 802.1p-merking gjør applikasjonene i stand til å tildele spesifikk prioritetsnivåer fra 0 (lavt) til 7 (høyt).

Etter at du innstiller filteret i Windows* 2000, XP eller i Intel Priority Packet, må du starte Intel PROSet II og aktivere QoS Tagging på kategorien Avanserte innstillinger.

Merk! IEEE 802.1p-merkingen øker størrelsen på de pakkene den merker. Enkelte hubber og svitjser vil ikke gjenkjenne de større pakken og vil slippe dem fra seg. Sjekk dokumentasjonen for din hub og svitsj for å se om de støtter 802.1p. Dersom disse enhetene ikke støtter 802.1p, eller om du ikke er sikker, skal du bruke High Priority Queue for å prioritere nettverkstrafikken.

Krav for å kunne bruke IEEE 802.1p-merking effektivt:

•	Alle datamaskiner som mottar og ruter 802.1-merkede pakker, må støtte 802.1p.

•	Kort installert på datamaskiner som behandler merkede pakker, må støtte 802.1p-merking. Alle ® PRO/1000-, PRO/100+- og PRO/100 S-kort støtter 802.1p. Intel® PRO/100B-kortene gjør det ikke.

•	Kortet/kortene kan ikke tildeles en kortgruppe.

•	Dersom du setter opp VLAN-er eller pakkemerking på det samme kortet, må  802.1p/802.1Q-merking være Aktivert på kategorien Intel PROSet II Avanserte innstillinger.

•	VLAN-er (802.1Q) og prioritering (802.1p) deler kategorien 802.3ac. Intel-kort bruker kategorien 802.3ac når VLAN-er og/eller QoS-merking er konfigurert på kortet.

•	Dersom et kort er konfigurert for VLAN-er, må svitsje-VLAN støtte samme type merking (802.3ac) som kortet.

•	Dersom et kort er konfigurert for prioritering, krever enkelte svitsjer en ikke-standard VLAN på svitsjen for å muliggjøre kategoripassering.


Filter

En parameter som brukes på en utgående pakke (overføring) til å bestemme om den skal merkes med IEEE 802.1p eller legges i høyprioritetskøen.


IEEE 802.1p-spesifikasjon

En IEEE-standard for å merke pakker med ulike prioritetsnivåer. Når disse pakkene sendes ut på nettverket, overføres høyprioritetspakker først. Merking av prioritetspakker gjør det mulig for kortet å arbeide med andre nettverksenheter for å levere bedre totalytelse.

IEEE 802.1p-merking er bare aktiv når nettverksinfrastrukturen, (svitsjer og andre rutingsenheter)  støtter denne. Dersom infrastrukturen ikke støtter IEEE 802.1p-merking, eller du ikke er sikker, kan du prioritere ved hjelp av Intels High Priority Queue.


High Priority Queue

En overføringskø som brukes med Intel® Priority Packet. High Priority Queue (HPQ) behandler høyprioritetspakkene.

HPQ er tilgjengelig på Intel® PRO/100-kort som har 82558-basert kontrollere og senere. Hvis du vil ha informasjon om kontrollere, kan du se Kortspesifikasjoner-tabell.

Hvis du vil ha mer informasjon om HPQ, kan du se i den elektroniske hjelpen om Intel Priority Packet.


Merking

Legge til ekstra informasjon i en pakke. Ved prioritetspakker som bruker IEEE 802.1p-merking, betyr dette at det legges til fire byte med informasjon som angir pakkens prioritet.


Fant CardBus

Installasjon av ett enkelt kort

Hvis du installerer ett enkelt Cardbus-kort, klikker du modellen du installerer.

Merk! Hvis du har installert et Intel® PRO/100 Cardbus II-kort (bare LAN), og du installerer et Intel® PRO/100 LAN+Modem56 Cardbus II-kort, må du:

1.	Fjerne driverne for kortet som bare kan brukes på LAN.

2.	Starte datamaskinen på nytt.

3.	Installere driverne for LAN+Modem56-kortet på nytt.

Installasjon av to kort

Hvis du installerer to Cardbus-kort, og ett av dem eller begge er Intel PRO/100 LAN+Modem56 Cardbus II-kort, klikker du Intel® PRO/100 LAN+Modem56 Cardbus II.

Hvis begge kortene er Intel PRO/100 Cardbus II-kort (bare LAN), klikker du Intel® PRO/100 Cardbus II.

PCI-kort

Hvis du installerer et PCI-kort (for eksempel på en forankringsenhet), klikker du Intel® PRO PCI-kort.


Cardbus-ressurser
Definere Cardbus-ressurser

Velg et sett med tilgjengelige ressurser for nettverkskortet og modemet.

Slik kontrollerer du om de valgte ressursene er kompatible med datamaskinen:

Start Intel® PROSet II ved å dobbeltklikke Intel PROSet-ikonet i kontrollpanelet.
Intel PROSet II vises.

•	Hvis det ikke er noen ressurskonflikter, viser kategorien Generelt informasjon om kortstatus.

•	Hvis det er en ressurskonflikt med en annen enhet, viser Intel PROSet II en feilsøkingskategori med instruksjoner. Følg disse instruksjonene for å velge andre ressurser.


Jumbo-rammer

Jumbo-rammer er større enn standard Ethernet-rammer. Mens standard Ethernet-rammer er  ~ 1,5k byte, inneholder Jumbo-rammer opptil ~16k byte.

I situasjoner der store pakker utgjør størstedelen av trafikken og ekstra ventetid kan tolereres, kan Jumbo-rammer redusere CPU-utnyttelsen og forbedre kabeleffektiviteten.

Merknader: Og Jumbo-rammer støttes bare ved 1000 Mbps. Bruk av Jumbo-rammer ved 10 eller 100 Mbps kan føre til dårlig ytelse eller tap av kobling. Obs!  Jumbo-rammer er bare effektive på TCP/IP-pakker.

Før du begynner

Kontroller at:

•	Du har et Intel® PRO/1000-kort kjørende på 1000 Mbps. Intel® PRO/100-kortene ikke støtter Jumbo-rammer.

•	Systemet kjører Windows* 2000, XP eller NT* 4.0.

•	Nettverksenhetene støtter Jumbo-rammer. Når du setter opp Jumbo-rammer på andre nettverksenheter, skal du være klar over at nettverksenheter beregner Jumbo-rammestørrelser ulikt. Enkelte enheter inkluderer hodeinformasjon i rammestørrelsen, mens andre ikke gjør det.

Konfigurere Jumbo-rammer

•	Bruk Intel® PROSet til å konfigurere tilgjengelig pakkestørrelse.

•	Skriv inn verdien i registret for å konfigurere andre pakkestørrelser.

Slik konfigurerer du Jumbo-rammer i Intel® PROSet II

Konfigureringen av Jumbo-rammer i nettverket er en tretrinns prosess.

Trinn 1: Konfigurer kortet for å støtte Jumbo-rammer:

1.	Åpne Intel® PROSet II.

2.	Klikk kortet du vil konfigurere med Jumbo-rammer, i Nettverkskomponenttre.

3.	Klikk kategorien Avansert.

4.	I listen med innstillinger klikker du Jumbo-rammer.

5.	I boksen med verdier klikker du en pakkestørrelse.

Kortet er nå konfigurert til å støtte Jumbo-rammer.

Trinn 2: Kortet er nå konfigurert til å støtte Jumbo-rammer. Se i dokumentasjonen for svitsjen for detaljer.

Trinn 3: Konfigurer kortet for å støtte Jumbo-rammer: Se i dokumentasjonen for serveren for detaljer.

Slik konfigurerer du Jumbo-rammer ved hjelp av registret

Konfigureringen av Jumbo-rammer i nettverket er en tretrinns prosess.

Trinn 1: Konfigurer kortet for å støtte Jumbo-rammer:

1.	Åpne Registerredigering. Klikk Start > Kjør. I Åpne-boksen skriver du regedit.
Registerredigering åpnes.

2.	Naviger frem til registernøkkelen MaxFrameSize.

3.	Skriv inn en verdi fra 1 415 til 16 128 for rammestørrelsen.

Kortet er nå konfigurert til å støtte Jumbo-rammer.

Trinn 2: Kortet er nå konfigurert til å støtte Jumbo-rammer. Se i dokumentasjonen for svitsjen for detaljer.

Trinn 3: Konfigurer kortet for å støtte Jumbo-rammer: Se i dokumentasjonen for serveren for detaljer.


MiniPCI-kort

MiniPCI-kortene fungerer med bestemte flyttbare datamaskiner som støtter MiniPCI-formfaktoren. Disse kortene støtter samme funksjonssett som klientkortene som beskrives i denne hjelpefilen. Enkelte MiniPCI-kort har også integrert modemmaskinvare inkludert i produktet.

Hvis ditt produkt har et modem, ser du i dokumentasjonen som fulgte med datamaskinen, for å få informasjon om modemkonfigurasjon.

Se også:

Avanserte innstillingern for Intel® PRO/100+-kort


Avanserte innstillinger for Intel(R) PRO/10- og PRO/10+-kort

Innstillingene som er oppført i kategorien Avansert, lar deg tilpasse hvordan kortet behandler QoS-pakkemerking, Jumbo-rammer, avlasting og andre funksjoner. Enkelte av følgende funksjoner er kanskje ikke tilgjengelige avhengig av operativsystemet du kjører, og de enkelte kortene som er installert.

Avanserte innstillinger

Adaptivt rammeintervall

Kompenserer for høyt antall Ethernet-pakkekollisjoner på nettverket. Som standard er innstillingen satt til 0. Dette deaktiverer funksjonen. Den anbefalte innstillingen (1) fungerer best for de fleste datamaskiner og nettverk ved at den tilpasses dynamisk til forholdene for nettverkstrafikk. Denne dynamiske modusen er bare aktiv når verdien er satt til 1. I sjeldne tilfeller kan du imidlertid oppnå bedre ytelse ved å angi avstandsverdien manuelt. Når du angir en verdi, tvinges det frem statisk avstand mellom pakkene.

Når verdien økes, øker mellomrommet mellom rammene som sendes.

Kort som støttes	Alle
Standard	1
Område	0-255

Kortteknologi

Aktiverer eller deaktiverer mikrokoden i kortdriveren. Mikrokoden optimaliserer ytelsen basert på operativsystemmiljøet.

Den beste ytelsen får du ved å la Kortteknologi være aktivert.

Du vil kanskje deaktivere Kortteknologi mens du feilsøker problemer med kortkompatibilitet.  Når du deaktiverer Kortteknologi, deaktiverer du også Kontrollblokker for overføring og Justering av kortytelse.

Kort som støttes	Alle
Standard	På
Område	På, Av
Overføringsterskelverdi for kort

Angir antall byte som kortet lagrer i overføringsbufferen før sending. Hvis for eksempel overføringsterskelverdien for kortet er 100, lagrer kortet 100 byte (800 biter) i bufferen før dataene sendes.

•	Hvis du øker overføringsterskelverdien for kortet, reduseres overføringsytelsen, men det kan bli færre underkjøringer.

•	Hvis du øker overføringsterskelverdien for kortet, reduseres overføringsytelsen, men det kan bli færre underkjøringer. Senking av verdien gjør at kortet kan utføre tidlige overføringer.

Kortet bruker bare overføringsterskelverdien for kortet som et startpunkt. Hvis kortet kan oppnå bedre overføringsytelse ved å bruke en lavere verdi, bruker det automatisk en slik verdi.

Hvis du vil konfigurere kortet til først å sende fullstendige Ethernet-rammer og deretter justere til beste ytelse, setter du verdien til 190. Hvis overføringsytelsen faller betydelig med en verdi på 190, setter du terskelen til 16 og øker den trinnvis.

Kort som støttes	Alle
Standard	12
Anbefalt	• Hvis datamaskinen har flere bussmasteringkort eller lang ventetid, setter du verdien til over 200. • Hvis datamaskinen bare har ett bussmasteringkort, setter du verdien til 12.
Område	0-200

Grunnleggende tilkobling for ingen ressurser

Opprettholder nettverkstilkoblingen selv om systemet ikke har nok ressurser til å kjøre alle de avanserte innstillingene. Funksjoner som IPSec-avlasting og Stor sending-avlasting gjenopptas ikke før det er nok ressurser. Feil som oppstår som følge av lite systemressurser, finner du i systemloggen.

Kort som støttes	Alle
Standard	Av
Anbefalt verdi	På
Område	På, Av
Oppsamlingsbuffere

Optimaliserer overføringsytelsen ved å tilpasse antall oppsamlingsbuffere. Dermed kan kortet koble sammen datasegmenter før pakkene overføres.

Oppsamlingsbuffere-innstillingen må konfigureres til å fungere med overføringsdeskriptorer-innstillingen. Oppsamlingsbuffere-innstillingen bør være 30 - 50 % av Overføringsdeskriptorer. Hvis Oppsamlingsbuffere ikke endres til å stemme overens med overføringsdeskriptorer, er det ikke sikkert overføringsytelsen forbedres.

Oppsamlingsbuffere-innstillingen øker overføringsytelsen betraktelig på Windows NT 4.0-datamaskiner. Den forbedrer også overføringsytelsen på Windows 98- og 2000-datamaskiner.

Kort som støttes	Alle
Standard	8
Anbefalt verdi	8
Område	1-32
Flytkontroll ved mottak

Gjør det mulig for kortet å motta helduplekse flytkontrollrammer ved å stanse overføringsbanen midlertidig. Overføringsbanen stanses så lenge som det er angitt i den mottatte flytkontrollrammen. Denne innstillingen hjelper å finjustere nettverksytelsen ved å hindre at pakker leveres.

Kort som støttes	Denne funksjonen er kanskje ikke tilgjengelig på alle korttyper.
Standard	Deaktivert
Område	Aktivert, Deaktivert

Koblingsbasert pålogging

Aktiverer funksjonen Svar på dynamisk kobling (ALR - Adaptive Link Response). Basert på verdien for parameteren LinkBasedLoad kontrollerer denne funksjonen PhyLink-statusen og returnerer verdien Vellykket eller Mislykket.

Kort som støttes	Alle
Standard	Deaktivert
Område	Aktivert, Deaktivert

Koblingshastighet og dupleks

Konfigurerer Intel® PRO/10+-kortet med koblingsinnstillinger.

Kort som støttes	Alle
Standard	Automatisk søk
Anbefalt verdi	Automatisk søk
Område	• Automatisk søk - Kortet forhandler med svitsjen om hvordan pakkene skal sendes/mottas (hel eller halv dupleks).  MERK:  Du må ha en svitsj med automatisk forhandling for å få støtte for full dupleks med alterntivet Koblingshastighet og dupleks satt til Automatisk søk. • 10Mbps / halv dupleks - Kortet bruker en hastighet på 10 Mbps og utfører én operasjon om gangen. Det sender eller mottar. • 10Mbps / hel dupleks - Kortet bruker en hastighet på 10 Mbps og sender og mottar pakker samtidig. Slik forbedres ytelsen for kortet. Velg denne modusen bare hvis du har en svitsj som kan håndtere heldupleks.

Lokalt administrert adresse

Overstyrer MAC-adressen for kortet. Hvis du vil angi en ny nettverksadresse, skriver du inn et 12-sifret heksadesimalt tall i verdiboksen.

Kort som støttes	Alle
Standard	Ingen
Område	0000 0000 0001 - FFFF FFFF FFFD Unntak: • Ikke bruk en multicast-adresse (minst signifikante bit i høy byte = 1).  • Ikke bruk bare nuller eller bare F-er.

PCI-busseffektivitet

Gjør det mulig for kortet å bruke den beste overføringsmetoden for pakker eller alltid tvinge pakkesamling.

•	Når PCI-busseffektivitet er deaktivert, bruker kortet overføringsmetoden som gir best mulig ytelse. Hvis pakkesamling gir den beste overføringsytelsen, samler kortet automatisk pakkene.

•	Når PCI-busseffektivitet er aktivert, tvinger kortet frem pakkesamling.

Deaktiver PCI-busseffektivitet hvis det ikke er problemer med ytelsen for pakkeoverføringen. Hvis det er et stort antall underkjøringer, eller PCI-bussen har ytelsesproblemer, setter du verdien til aktivert.

Kort som støttes	Alle
Standard	Deaktivert
Område	Aktivert, Deaktivert

Definisjon av prioritetsnivå

Konfigurerer skjæringspunktet for prioritetsnivået for QoS-merkede pakker.

Hvis datamaskinen har aktivert 802.1p/802.1Q-merking (QoS), kan du definere prioritetsnivåene (0-7) som behandles av prioritetskøene. Intel-kort har to prioritetskøer: Høy og lav. Som standard sendes pakker med en verdi på 0-3 gjennom lavprioritetskøen, og pakker med en verdi på 4-7 sendes gjennom høyprioritetskøen.

Tallet du angir for Definisjon av prioritetsnivå, er skjæringspunktet mellom høy- og lavprioritetskøer. Som standard sendes pakker med en verdi på 0-5 gjennom lavprioritetskøen, og pakker med en verdi på 6-7 sendes gjennom høyprioritetskøen.

Kort som støttes	Alle
Standard	4 • Pakker med verdier på 0-3 sendes til lavprioritetskøen.  • Pakker med verdier på 4-7 sendes til lavprioritetskøen.
Område	0-7

Mottaksbuffere

Angir antall buffere som brukes av driveren under kopiering av data til minnet.

I situasjoner med tung nettverksbelastning kan det øke ytelsen hvis du øker antall mottaksbuffere. Ulempen er at dette også fører til at driveren bruker mer systemminne. Det kan gi forringet ytelse på systemet hvis du endrer denne verdien.

Kort som støttes	Alle
Standard	48
Anbefalt verdi	• Singelkort  i Windows 98, Windows Me, Windows 2000 og Windows XP: 48 • Enkelt kort i Windows NT: 32 • Gruppert kort: 250
Område	8-1024

Rammeintervall ved gjentatt overføring

Øker forsinkelsen mellom omsendingene av rammer. Selv om det er en innebygd Ethernet-algoritme som kort bruker til å sende rammer om igjen etter konflikter, kan nettverksytelsen forbedres ved å øke forsinkelsen hvis antall konflikter på nettverket er unormalt høyt.

Kort som støttes	Alle
Standard	10
Område	6-15

Kontrollblokker for overføring

Definerer antall kontrollblokker for overføring. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du den anbefalte verdien 16.

Kort som støttes	Alle
Standard	32
Anbefalt verdi	16
Område	8-64


PRO/1000-koblingskonfigurasjon
Intel® PRO/1000-koblingskonfigurasjon (bare for kobbermodeller)

ADVARSEL!    I nesten alle tilfeller bør du aktivere automatisk forhandling. Hvis du deaktiverer automatisk forhandling, må du sørge for at innstillingene for koblingspartneren stemmer overens med kortinnstillingene. Kortet opererer ikke ved 1 000 Mbps hvis automatisk forhandling er deaktivert.

Slik angir du hastighet og dupleks:

1.	I kategorien Koblingskonfigurasjon klikker du Aktivert eller Deaktivert for å endre innstillingen for automatisk forhandling.

•	Når automatisk forhandling er aktivert, forhandler kortet hastighet og dupleks med koblingspartneren.

•	Når automatisk forhandling er deaktivert, tvinges kortet til den angitte innstillingen for hastighet og dupleks.  Når du deaktiverer automatisk forhandling, må du sørge for at koblingspartneren kan operere ved angitt hastighet og dupleks. Hvis koblingspartneren ikke kan operere ved den tvungne innstillingen for kortet, kan det ikke etableres kommunikasjon mellom kortet og koblingspartneren.

2.	Hvis automatisk forhandling er aktivert, velger du innstillingene for hastighet og dupleks som annonseres til koblingspartneren under forhandlingen. Som standard annonseres alle innstillingene. Noen mulige innstillinger er:

•	10 Mbps halv dupleks

•	10 Mbps halv dupleks

•	100 Mbps halv dupleks

•	100 Mbps halv dupleks

•	1 000 Mbps halv dupleks

Merk! I henhold til IEEE-spesifikasjoner kan ikke 1 000-basert T-operasjon tvinges frem.  Du kan imidlertid konfigurere kortet til å bare operere ved 1 000 Mbps ved å velge automatisk forhandling og deretter velge bare 1 000 Mbps hel dupleks i delen med avanserte innstillinger.

3.	Hvis automatisk forhandling er deaktivert, tvinger du hastighet og dupleks for kortet ved å klikke én av følgende innstillinger:

•	10 Mbps halv dupleks

•	10 Mbps halv dupleks

•	100 Mbps halv dupleks

•	100 Mbps halv dupleks

Kontroller at koblingspartneren støtter den tvungne innstillingen hvis du vil sikre kommunikasjon.

4.	Klikk OK.

5.	Hvis du blir bedt om det, starter du systemet på nytt.

Innstillingen for hastighet og dupleks er nå konfigurert for kortet.


Koblingspartner

En enhet som kortet kobles til, for eksempel et annet kort, en hub, en svitsj e.l.


Visning for nettverkskomponenttre
Nettverkskomponenttre

Nettverkskomponenttreet finner du på venstre side av Intel® PROSet II. Klikk på kort, VLAN-er, eller grupper for å se på detaljer om komponenten.


Boot Agent

I denne kategorien kan du vise innstillinger som kontrollerer virkemåten for Boot Agent-programvaren. Du vil kanskje kunne endre innstillinger i Innstilling-boksen. Du kan kanskje også bruke kategorien til å oppdatere en Flash ROM-enhet med en Boot Agent-programvareavbildning hvis IT-ansvarlig har aktivert denne funksjonen.

Hvis du vil ha mer detaljerte beskrivelser av de mulige konfigurasjonsinnstillingene, kan du se:

•	Nettverksoppstartsprotokoll

•	OppstartsrekkefølgeBoot_Order

•	Ventetid Setup-meny.

•	Vis Setup-standardShow_Setup_Prompt

•	Legacy OS Wakeup SupportLegacy_OS_Wakeup_Support

for å få instruksjoner om konfigureringsinnstillinger, må du se på Intel® Boot Agent User´s Guide.

Merknader:

Hvis du ikke kan endre en konfigurasjonsinnstilling, kan det være kortet eller systemet ikke tillater den innstillingen.

Informasjonen som gis i denne hjelpefilen, er bare gyldig for den 16-biters PXE 2.0-versjonen av Boot Agent. De fleste alternativene for konfigurasjonsoppsett som beskrives her, brukes ikke i et EFI-miljø.

Knappen Oppdater Boot Agent

Bruk denne knappen for å installere eller oppdatere Intel Boot Agent-programvaren.

Merknader:

Oppdateringen av Boot Agent lagrer en ny Boot Agent-avbildning på Flash-ROM. Dette kan deaktivere driften av Windows-driveren* for nettverksenheten midlertidig. Det kan være du må starte datamaskinen på nytt etter denne operasjonen.

Hvis det er nødvendig å installere DOS, ser du avnittet om installering og oppdatering i DOS-miljøer i Brukerhåndbok for Intel ® Boot Agent.

Slik installerer eller oppdaterer du Boot Agent-programvaren:

Merk! Når du laster ned en flash-ROM-avbildningsfil fra Intels webområde, bør du sørge for å lagre den i en midlertidig mappe eller på et sted som er enkelt å finne for denne prosedyren.

1.	På Start-menyen klikker du Innstillinger og deretter Kontrollpanel.
Kontrollpanelvinduet vises.

2.	Dobbeltklikk Intel® PROSet II-ikonet.
Intel PROSet II-skjermen vises.

3.	Fra nettverkskomponenttreet velger du et kort som inneholder Flash ROM-en du vil oppdatere.

4.	Klikk kategorien Boot Agent. Hvis kategorien ikke vises, oppdaterer du nettverksdriveren eller sørger for at du har Intel PROSet II versjon 4.0 eller senere.

Merk! Med Intel PROSet  II kan du også endre konfigurasjonsinnstilling for PXE- og RPL-miljøer. Hvis du velger et kort som kjører i PXE- eller RPL-miljøer fra listen over enheter under Nettverkskomponenter til venstre i Intel PROSet II-skjermen, kan det være du kan vise eller endre konfigurasjonsinnstillingen som vises til høyre på skjermen. Hvis du vil ha mer informasjon, kan du se avsnittet om konfigurering av Boot Agent i et Windows-miljø i Brukerhåndbok for Intel®  Boot Agent. Enkelte Flash ROM-er støtter ikke alle konfigurasjonsinnstillinger.

5.	For å redigere en innstilling, trykker du på Ctrl+S. Straks du trykker på Ctrl+S, endres kategorien Boot Agent slik at den omfatter en nedtonet (deaktivert) Bruk innstillinger-knapp.

6.	Klikk Oppdater Boot Agent.
En dialogboks med en advarsel om at nettverkstilkoblingen er midlertidig brutt mens oppstartsavbildningen oppdateres, vises.

7.	Klikk Ja hvis du vil fortsette med oppdateringsprosessen.
En dialogboks vises med spørsmål om du vil opprette en sikkerhetskopi av gjeldende, eksisterende flash-ROM.

8.	Hvis du vil opprette en sikkerhetskopi av gjeldende Flash ROM-avbildning før du oppdaterer Flash, klikker du Ja. Dialogboksen Lagre eksisterende Flash ROM-bilde som vises. Gå til trinn 10.

9.	Hvis du ikke lagrer en sikkerhetskopi av gjeldende Flash ROM-avbildning til en fil, klikker du Nei. Det vises en dialogboks med en advarsel. Klikk Ja, og gå deretter til trinn 11.

10.	Klikk Lagre hvis du vil godta standard bane og filnavn (standard filnavn er kortets unike MAC-adresse). Hvis ikke, endrer du parametrene og klikker Lagre.

11.	I dialogboksen for åpning av fil klikker du Åpne hvis den ønskede Flash ROM-avbildningen du lagret, vises som standard bane og filnavn for skjermen. Hvis ikke, endrer du banen og filnavnet og klikker Åpne.
Merk! Flash ROM-avbildninger er tilgjengelige på Intels webområde.

Oppdateringen tar mellom fem og ti sekunder, og det vises en fremdriftsindikator mens oppdateringen pågår.


Protokoll for nettverksoppstart

Hvis Boot Agent ikke støtter RPL, kan du ikke endre denne innstillingen.

Mulige verdier:

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

Beskrivelse:

Velg PXE til bruk med WfM-kompatible nettverksadministrasjonsprogrammer, for eksempel Intelâ LANDeskâ Management Suite, Windows* 2000 RIS, Windows XP RIS og Linux*.

Velg RPL hvis du vil starte opp på den gamle måten samt for enkelte løsninger for oppstart over nettverk for Novell NetWare*.


Oppstartsrekkefølge

Mulige verdier:

•	Bruk oppstartsrekkefølgen i BIOS-oppsettet

•	Prøv nettverket først og deretter lokale stasjoner.

•	Prøv nettverket først og deretter lokale stasjoner.

•	Prøv bare nettverket

•	Prøv bare lokale stasjoner

Beskrivelse:

Med dette kan du velge rekkefølgen oppstartsenhetene velges i når systemet starter opp. Hvis datamaskinens BIOS støtter BIOS Boot Specification (BBS) eller aktiverer PnP-kompatibelt (Plug and Play) valg av oppstartsrekkefølgen i BIOS-konfigureringssprogrammet, er denne innstillingen alltid Bruk oppstartsrekkefølgen i BIOS-oppsettet og kan ikke endres. I dette tilfellet ser du i BIOS-installasjonshåndboken for klientdatamaskinen du har, for å angi oppstartsalternativer.

Hvis klientdatamaskinen ikke har BBS- eller PnP-kompatibel BIOS, kan du velge én av verdiene over unntatt Bruk oppstartsrekkefølgen i BIOS-oppsettet.


Vis installasjonsledetekst

Mulige verdier:

•	Aktivert – Standardverdi

•	Deaktivert

Beskrivelse:

Hvis du velger Aktivert, vises Ctrl+S-installasjonsledeteksten etter POST slik at du kan trykke Ctrl+S innen det antall sekunder som tillates av innstillingen Ventetid for installasjonsmeny for å vise menyen for konfigurasjonsoppsett.

Hvis du velger Deaktivert, er innstillingen Ventetid for konfigurasjonsmeny null, og Ctrl+S-ledeteksten vises ikke under oppstartsprosessen. Du kan imidlertid likevel vise menyen for konfigurasjonsoppsett ved å trykke Ctrl+S gjentatte ganger umiddelbart etter POST til menyen vises. Hvis menyen ikke vises etter gjentatte trykk på Ctrl+S, starter du på nytt og prøver en gang til.


Ventetid for installasjonsmeny

Mulige verdier:

•	0 sekunder

•	2 sekunder

•	3 sekunder

•	5 sekunder

Beskrivelse:

Antall sekunder Boot Agent venter på at du skal trykke Ctrl+S slik at menyen for konfigurasjonsoppsett vises under oppstartsprosessen for systemet.

Hvis du velger en ventetid for oppsettsmenyen på null og/eller setter innstillingen for Vis ledetekst for konfigurering til Deaktivert, vises ikke Ctrl+S-ledeteksten under oppstartsprosessen. Du kan imidlertid likevel vise menyen for konfigurasjonsoppsett ved å trykke Ctrl+S gjentatte ganger umiddelbart etter POST til menyen vises. Hvis menyen ikke vises etter gjentatte trykk på Ctrl+S, starter du på nytt og prøver en gang til.


Støtte for reaktivering av eldre OS

Denne innstillingen vises ikke på konfigurasjonsoppsettmenyen når du starter fra et Gigabit-kort.

Se i instruksjonene for operativsystemet for å finne ut om det støtter ekstern reaktivering samt hvordan funksjonen brukes.

Mulige verdier:

•	Aktivert

•	Deaktivert

Beskrivelse:

Velg Aktivert for å tillate at andre operativsystemer enn Windows* (for eksempel DOS eller NetWare*) bruker den eksterne rekativeringsfunksjonen for WfM-kortet.

Velg Deaktivert for denne innstillingen ved hjelp av Windows 2000, XP, Me eller 98SE.


VLAN-liste

Hvis du har konfigurert VLANs, vises disse i Nettverkskomponenttre:

Når du høyreklikker et VLAN, vises følgende alternativer:

•	Endre VLAN-egenskaper  - Lar deg endre VLAN-konfigurasjon.

•	Fjerne- Lar deg fjerne VLAN-et.

Se også

Legge til en VLAN


Gruppeliste

Hvis du har konfigurert kortgrupper, , vises disse i Nettverkskomponenttre:

Når du høyreklikker et VLAN, vises følgende alternativer:

•	Fjern gruppe

•	Endre gruppemodus

•	Tilføy VLAN

•	Aktiver IPSec

•	Aktiver GVRP

Hvis du har konfigurert en gruppe, men den ikke vises i nettverkskomponenttreet, kan det være du må lukke Intel® PROSet for at gruppeoppsettet skal tre i kraft.


Liste over grupperte kort

Når du høyreklikker en liste over grupperte kort, vises følgende alternativer:

•	Foretrukket primært - Angir det valgte kortet som det primære kortet som overfører trafikk for gruppen. Vanligvis er kortet du angir her, det kortet som har størst båndbredde.

•	Foretrukket sekundært - Angir det valgte kortet som reservekort for det foretrukne primære kortet.  Dette alternativet er ikke tilgjengelig før du angir er foretrukket primært kort.

•	Fjern fra gruppe - Fjerner det valgte kortet fra gruppen.

Se også

•	Endre grupperingsmodus for kort

•	Legge til et kort i en eksisterende gruppe

•	Opprette en ny gruppe

•	Fjerne et kort fra en gruppe

•	Fjerne en kortgruppe

•	Angi et kort som primært eller sekundært


Nettverkkomponenter
Nettverkskomponenttre

Nettverkskomponenttreet lister opp nettverkskomponenter som er aktive i systemet ditt. Nettverkskomponenter inkluderer nettverkskort, grupper og VLAN.


Medlemskort

Listen Medlemskort inneholder kortene som utgjør en gruppe. Klikk et medlemskort for å vise informasjon som er spesifikk for det kortet.

Se også

Fjerne et kort fra en gruppe


Virtuelle lokalnettverk

Kategorioppføringen Virtuelle lokalnettverk i nettverkskomponenttreet viser konfigurerte virtuelle nettverk (VLAN).

Se også

Legg til en VLAN

Endre VLAN-egenskaper

VLAN definisjon

Fjerne en VLAN

Avanserte innstillinger for VLANs

Innstille GVRP


Fjerne en kortforekomst
Fjerne et kort

Før du fjerner et kort fra Intel® PROSet eller fjerner et kort fra en datamaskin, må du kontrollere at kortet ikke er medlem av en gruppe. Hvis kortet er medlem av en gruppe, må du først fjerne kortet fra gruppen og deretter følge fremgangsmåten nedenfor.

Slik fjerner du et kort fra Intel® PROSet II:

1.	I Nettverkskomponenttre høyreklikker du kortet du vil fjerne.

2.	Klikk Fjern.
En bekreftelsesdialogboks som informerer om at kortet IKKE er medlem i en gruppe, vises.

3.	Klikk Ja.

4.	Klikk OK for å lukke Intel PROSet II og bruke endringene.

5.	Hvis du blir bedt om det, starter du systemet på nytt.

Intel PROSet II administrerer ikke lenger kortet.


Opprette en ny gruppe

En gruppe er flere kort som er konfigurert til å forbedre nettverksfunksjonaliteten, for eksempel failover eller økt overføringsgjennomstrøm.

Slik oppretter du en gruppe:

1.	I Nettverkskomponenttre høyreklikker du et kort som ikke er gruppert.

2.	Klikk Legg til i gruppe og deretter Opprett ny gruppe.
Veiviseren for gruppering vises.

3.	Velg gruppetypen du vil opprette, og klikk Neste. Du kan velge mellom:

•	Feiltoleranse for kort

•	Feiltoleranse for bryter

•	Dynamisk belastningsfordeling

•	Koblingssamling (Dynamic_3ad* / GEC / LA / 802.3ad statisk modus)

4.	Hvis du oppretter en gruppe for dynamisk belastningsfordeling, kan du velge å aktivere eller deaktivere Belastningsfordeling ved mottak (RLB).

•	Hvis du aktiverer RLB, mottar gruppemedlemmene som støtter høyest hastighet, IP-trafikk, og det primære kortet mottar annen trafikk.
MERK: Når RLB er aktivert, velger Intel® PROSet automatisk et foretrukket primærkort. Intel PROSets II valg av foretrukket primært kort er ikke basert på kortmodell eller hastighet.

•	Hvis du deaktiverer RLB, mottar bare det primære kortet trafikk.

5.	Listen viser alle kortene som ikke er med i noen gruppe. Klikk kortene du vil ha med i gruppen, i listen, og klikk deretter Neste.

6.	Klikk Fullfør.

7.	Hvis du vil, kan du angi et kort i gruppen som det primære kortet. Hvis du vil angi et primærkort, høyreklikker du kortet du vil bruke som primært og klikker deretter Foretrukket primært.
Hvis du velger å ikke velge et primærkort, velger Intel PROSet et foretrukket primærkort.

8.	Klikk Lukk for å lukke Intel PROSet II og bruke endringene.

Gruppen er nå konfigurert.

Merk!   Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Legge til et kort i en eksisterende gruppe

Du kan når som helst legge til et kort i en eksisterende gruppe.

Merk!  I Dynamic 802.3ad-grupper kan endring av konfigurasjonen medføre midlertidig avbrudd på trafikkflyten mens svitsjen omberegner koblingssamlere.

Slik legger du til et kort i en eksisterende gruppe i Intel® PROSet II:

1.	I Nettverkskomponenttre høyreklikker du på en gruppeliste.

2.	Klikk Legg til kort i gruppe, og velg deretter kortet du vil legge til.

Kortet er nå del av gruppen.

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Legg til VLAN
Opprette et virtuelt lokalnettverk (VLAN)

Et VLAN er en logisk gruppering av kort som er konfigurert til å forbedre nettverkssikkerheten og redusere størrelsen på kringkastingsdomener.

Slik oppretter du et VLAN:

1.	I Nettverkskomponenttre høreklikker du en gruppeliste eller en liste over kort som ikke er gruppert.

2.	Klikk Legg til VLAN.
Dialogboksen Legg til VLAN vises.

3.	I VLAN-ID-feltet skriver du inn nummeret på VLAN-et som er tilordnet kortet.  VLAN-ID-en på kortet må stemme overens med VLAN-ID-en på svitsjen.
Merk! VLAN-numrene 0 og 1 er ofte reservert. Se i dokumentasjonen for svitsjen for portavhengigheter.

4.	I feltet VLAN-navn skriver du inn en etikett for VLAN-et. Det kan for eksempel være Markedsføring eller Utvikling. Navnet trenger ikke å stemme overens med navn på andre nettverksenheter. Det brukes bare til identifisering.

5.	Klikk OK.

Kortet er nå konfigurert til å bli et VLAN-medlem. Når du har satt opp kortet til å bli et VLAN-medlem, må du sørge for å fullføre VLAN-konfigurasjonen ved å sette opp andre nettverksenheter med riktig VLAN-informasjon.

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet II etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Fjerne et VLAN

Bruk Intel® PROSet II når du fjerner VLAN. Hvis du fjerner eller deaktiverer grupper gjennom nettverkspanelet på operativsystemet, kan det påvirke systemstabiliteten og kortkonfigurasjonen.

Slik fjerner du et VLAN fra en gruppe eller et kort:

1.	I Nettverkskomponenttre høyreklikker du på en gruppeliste.

2.	Klikk Fjern VLAN.

VLAN-et er fjernet fra gruppen eller kortet.

Obs!   Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Fjerne en kortgruppe

Når du fjerner grupper, må du sørge for å bruke Intel® PROSet II-verktøyet. Hvis du fjerner eller deaktiverer grupper gjennom nettverkspanelet på operativsystemet, kan det påvirke systemstabiliteten og kortkonfigurasjonen.

Slik fjerner du en hel kortgruppe:

1.	I Nettverkskomponenttre høyreklikker du på en gruppeliste.

2.	Klikk Fjern.

3.	En bekreftelsesbeskjed kommer frem.  Klikk Ja.

Gruppen er nå fjernet. Kortene fortsetter å fungere som atskilte enheter.

Merk!  Hvis du har opprettet VLAN eller prioritetspakkefiltre for gruppen, fjernes disse sammen med gruppen.  Hvis du opprettet VLAN eller prioritetspakkefiltre for et kort før det ble gruppert, går disse tapt når gruppen fjernes.


Endre grupperingsmodus for kort
Endre grupperingsmodus

Slik endrer du grupperingsmodus for en gruppe:

1.	I Nettverkskomponenttre høyreklikker du på en gruppeliste.

2.	Klikk Endre grupperingsmodus, og klikk deretter ett av følgende:

•	Feiltoleranse for kort

•	Feiltoleranse for bryter

•	Dynamisk belastningsfordeling Når du endrer gruppemodusen til Dynamisk belastningsfordeling, er det standard at belastningsfordeling ved mottak deaktiveres. Hvis du vil aktivere belastningsfordeling ved mottak, endrer du gruppemodus og aktiverer belastningsfordeling ved mottak i Avansert-kategorien for gruppering.

•	Koblingssamling (Dynamic_3ad* / GEC / LA / 802.3ad statisk modus FECIEEE_802_3ad

Gruppemodusen er nå endret.

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet II etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Fjerne et kort fra en gruppe

Du kan når som helst legge til et kort i en eksisterende gruppe.

Merk!  I Dynamic 802.3ad-grupper kan endring av konfigurasjonen medføre midlertidig avbrudd på trafikkflyten mens svitsjen omberegner koblingssamlere.

Fjerne et kort fra en gruppe:

1.	I Nettverkskomponenttre høyreklikker du på en gruppe.

2.	Klikk Fjern fra gruppe.

3.	Klikk OK for å bruke endringen.

Kortet er nå del av gruppen.

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet II etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Endre VLAN-egenskaper

Du kan rekonfigurere kortet til å bli medlem av et annet VLAN ved å endre VLAN-ID-en. Når VLAN-ID-en som er tilknyttet kortet, endres, fjernes kortet fra det eksisterende VLAN-et, og kommunikasjonen med datamaskinene i det eksisterende VLAN-et brytes.

Hvis du for eksempel endrer VLAN-ID-en fra 7 til 9, kommuniserer ikke datamaskinen med datamaskiner i VLAN 7. I stedet kommuniserer de med datamaskiner i VLAN 9.

Slik endrer du VLAN-konfigurasjon:

1.	I Nettverkskomponenttre høyreklikker du på en VLAN.

2.	Klikk Endre VLAN-egenskaper.

3.	I VLAN-ID-feltet skriver du inn nummeret på VLAN-et som er tilordnet kortet.  VLAN-ID-en på kortet må stemme overens med VLAN-ID-en på svitsjen.
MERK: VLAN-numrene 0 og 1 er ofte reservert. Se i dokumentasjonen for svitsjen for detaljer.

4.	I feltet VLAN-navn skriver du inn en etikett for VLAN-et. Det kan for eksempel være Markedsføring eller Utvikling. VLAN-navnet er bare til informasjonsformål og trenger ikke stemme overens med VLAN-navn som er konfigurert på andre nettverksenheter.

5.	For å lukke Intel® PROSet II klikker du på OK.

VLAN-konfigurasjonen er nå oppdatert.

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet II etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.

Se også

Aktiver GVRP

Avanserte innstillinger for VLANs


Angi et kort som primært eller sekundært

I hver gruppe finnes det et primært kort og ett eller flere sekundære kort.

•	Du kan velge om du vil velge det primære kortet i gruppen manuelt, eller om Intel® PROSet II skal velge det for deg.

•	Hvis du velger et primært kort, blir det valgte kortet det foretrukne primære kortet. Det foretrukne primære kortet overfører og mottar trafikk så lenge det har en aktiv status. Hvis det oppstår feil på det foretrukne primære kortet, men det senere blir satt til en aktiv status, går kontrollen automatisk tilbake til det foretrukne primære kortet.

Hvis du for eksempel har en server med et Intel® PRO/1000 Gigabit-kort som det primære kortet, og et Intel® PRO/100+- eller PRO/100 S-kort som det sekundære, vil du bruke Intel PRO/1000 Gigabit-kortet som det foretrukne primære kortet. I dette tilfellet tar Intel PRO/100+- eller PRO/100 S- over hvis det oppstår feil på Intel PRO/1000-kortet. Når Intel PRO/1000-kortet skiftes ut, fortsetter det automatisk med sin primære kortrolle i gruppen.

Dersom du manuelt velger et primærkort, er det alltid et Foretrukket primærkort i gruppen.

•	Hvis du ikke angir noe primært kort, velger Intel PROSet II det beste kortet basert på kortmodell og hastighet. Dette betyr at selv om det finnes et primært kort, finnes det ikke noe foretrukket primært kort. Når det ikke finnes noe foretrukket primært kort, kan Intel PROSet II velge et alternativt kort i tilfelle oppstår feil på det primærkortet.

Hvis for eksempel det for eksempel oppstår feil på primærkortet, et Intel® PRO/1000 Gigabit-kort, kan Intel PROSet II angi at et annet kort i gruppen skal opptre som det primære kortet.  Hvis Intel® PRO/1000-kortet gjenvinner en aktiv status, blir det med i gruppen på nytt som et medlem, men ikke som det primære kortet.

Slik angir du et kort som det primære eller sekundære kortet:

1.	I Nettverkskomponenttre høyreklikker du på en liste over grupperte kort.

2.	Klikk Foretrukket primært eller Foretrukket sekundært.

Kortet har nå den konfigurerte statusen.

Slik endrer du prioritetsstatus for kortet:

Ved hjelp av samme fremgangsmåte som ovenfor, kan du også endre prioriteten for et kort.

STP- og SFT-grupper:  Hvis du endrer hvilket kort som er det primære (aktive) kortet i en gruppe, lastes gruppen inn på nytt ved hjelp av MAC-adressen for det nye primære kortet. På samme måte lastes gruppen inn på nytt og får ny MAC-adresse hvis den lokalt administrerte adressen (LAA) for gruppen endres. Begge disse handlingene, hvis de utføres på en SFT-gruppen mens serveren er aktiv på nettverket, gjør at gruppen ikke kan kommunisere før alle nettverksenhetene oppdaterer ARP-tabellene med adresseinformasjonen til det nye kortet. Tiden det tar å oppdatere ARP-tabellen, angis av tidsavbruddperioden for ARP-hurtigbufferen. Denne parameteren er tilgjengelig på enkelte rutere og operativsystemer. Avhengig av tidsavbruddperioden for ARP-hurtigbufferen kan gruppen være utilgjengelig i opptil ti minutter.

Merk! Det foretrukne sekundærkortet er ikke tilgjengelig før du har angitt et foretrukket primærkort.


PROSet-systemfeltikon
Intel® PROSet II-systemfeltikon

Når du installerer Intel® PROSet II, kan du se et Intel PROSet II-systemfeltikon på oppgavelinjen nær klokken.

Når du høyreklikker et VLAN, vises følgende alternativer:

Kommando	Beskrivelse
Lanser Intel® PROSet II	Viser Intel PROSet II-verktøyet.
Vis status for	Viser navnene på installerte trådløse kort.
Skjul systemfeltikon	Skjuler systemfeltikonet i oppgavelinjen.   For å få ikonet til igjen å synes på oppgavelinjen: I kategorien Gernerell i Intel PROSet II, klikker du Vis siystemfeltikonet.
Avslutt	Lukker Intel PROSet II og fjerner ikonet midlertidig fra oppgavelinjen.  Selv om ikonet ikke er synlig på oppgavelinjen, kan du starte Intel PROSet II ved å dobbeltklikke Intel PROSet-ikonet i Kontrollpanel. Neste gang datamaskinen starter, vises Intel PROSet II-systemfeltikonet på oppgavelinjen.
Avslutt og ikke start ved oppstart	Fjerner Intel PROSet II-systemfeltikonet og hindrer at det vises når datamaskinen starter på nytt. Slik gjenoppretter du systemfeltikonet når dette alternativet er valgt:  1. Klikk Start > Kjør. 2. I Åpne-feltet skriver du inn PROMON og klikker deretter OK.   Intel PROSet II-ikonet forblir på oppgavelinjen til datamaskinen startes på nytt. Hvis du vil vise systemfeltikonet permanent, ser du Start systemfeltikon ved oppstart nedenfor.
Start systemfeltikonet ved oppstart	Konfigurerer PROSet II-systemfeltikonet på oppgavelinjen. Dette alternativet sikrer at systemfeltikonet er synlig etter at datamaskinen startes opp igjen. Obs! Dette alternativet er bare tilgjengelig dersom du har brukt Exit og ikke lanser ved oppstart- alternativet.


Tekniske detaljer om smart strømsparingsmodus
Detaljer om smart strømsparingsmodus

Smart strømsparingsmodus (SPD - Smart Power Down) er en strømsparingsmetode som brukes på Intel 82558-, 82559- og 82550-baserte kort for å minimalisere strømforbruket når det ikke er noen gyldig kobling. SPD gjør at kort kan gå inn i deaktiveringsmodus og spare opptil 150 % mer strøm. SPD er aktivert når:

•	Kortet ikke har noen gyldig kobling

•	Operativsystemet er i hvilemodus

I begge tilfellene setter operativsystemet kortet i deaktiveringsmodus hvis SPD er aktivert, og reduserer det totale strømforbruket. Normalt strømforbruk og kortaktivitet gjenopptas når kortet har en gyldig kobling eller når operativsystemet kommer ut av hvilemodus.


Meldingen Kan ikke avinstallere enheten

Hvis du prøver å fjerne en kortgruppeoppføring eller VLAN-oppføring fra Enhetsbehandling, får du følgende melding: Kan ikke avinstallere enheten Enheten kan være nødvendig for å starte datamaskinen."

Denne meldingen betyr at du ikke kan bruke Enhetsbehandling til å fjerne virtuelle kort som er opprettet av Intel® PROSet II.  Hvis du vil fjerne kort fra Enhetsbehandling, bruker du Intel PROSet II.

Se også

Fjerne en kortgruppe

Fjerne et VLAN

Aktiver GVRP


Avanserte innstillinger for VLAN

Slik tilpasser du avanserte VLAN-innstillinger:

1.	Klikk en VLAN-liste i Nettverkskomponenttre.

2.	Klikk kategorien Avansert.

3.	I rullegardinlisten klikker du NumTxPackets og skriver inn den nye verdien.
NumRxPackets definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å tildele mottatte pakker til minnet. Hver mottatte pakke krever én mottaksbetegnelse, og hver betegnelse bruker 2 kB minne.

Du kan velge å øke antallet mottaksdeskriptorer hvis du merker betydelig nedgang i ytelsen for mottatt trafikk. Hvis mottaksytelsen ikke er noe problem, bruker du standardinnstillingen.

ADVARSEL: Det kan gi forringet ytelse på systemet hvis du endrer denne verdien.

4.	I rullegardinlisten klikker du NumTxPackets og skriver inn den nye verdien.

NumTxPackets definerer antall overføringsdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du standardinnstillingen.

Advarsel: Det kan gi forringet ytelse på systemet hvis du endrer denne verdien.

5.	Klikk OK.

6.	VLAN-et har nå tilpassede innstillinger.

VLAN-konfigurasjonen er nå egendefinert.

Merk!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet II etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Aktivere IPSec

IP Security (IPSec) er et sett standarder utviklet av Internet Engineering Task Force (IETF) som beskytter IP-kommunikasjon ved å verifisere at datapakker ikke er endret under overføringen. For å få detaljert informasjon om IP-sikkerhet skal du gå til Intels kundestøtteområde:  eller om du har Intel® Packet Protect, skal du se brukerveiledningen for Packet Protect.

Krav

Du kan aktivere eller deaktivere IP Security i Intel® PROSet II dersom:

•	Du bruker et av de følgende operativsystemene:

•	Windows* 98

•	Windows NT* 4.0, SP5 eller senere

•	Windows Me

•	Du bruker et Intel® PRO/100-kort

Dersom du bruker Windows 2000 eller Windows XP, er IP Security tilgjengelig som en snap-in i Microsoft Management Console. Se dokumentasjonen for operativsystemet hvis du vil ha mer informasjon om IPSec-implementering i Windows 2000 eller XP.

For å aktivere IPSec

1.	Høyreklikk på en Gruppeliste eller liste over kort som ikke er gruppert i Nettverkskomponenttreet og deretter velge Aktiver IPSec.

2.	Starte datamaskinen på nytt.

3.	Installer programvaren Intel® Packet Protect.
Obs!  For å installere Packet Protect må du velge Aktiver IPSec-alternativet på minst ett kort eller en gruppe av kort før installasjonen av Packet Protect.

IPSec er nå aktivert.

For å deaktivere IPSec

Høyreklikk på en Gruppeliste eller liste over kort som ikke er gruppert i Nettverkskomponenttreet og deretter tøm Aktiver IPSec.

Avlasting kryptering på Intel® PRO/100 S-kort

Intel® PRO/100 S-kortfamile kan avlaste krypteringsprosessen for IP Security-transaksjoner. Ved å håndtere krypteringsprosessen reduserer kortene CPU-bruken. For å aktivere denne avlastingskapasiteten:

1.	Aktiver IP Security ved hjelp avb enten Intel Packet Protect eller, dersom datamaskinen kjører Windows 2000 or XP, ved hjelp av Microsoft Management Console.

2.	I Intel PROSet II velger du Intel PRO/100 S-kortet i Nettverkskomponenttreet som ønsker skal behandle IP Security-krypteringen.

3.	Klikk kategorien Avansert.

4.	På Innstillingslisten klikker du på Avlasting.

5.	I Verdiboksen velger du IP Security.

6.	Klikk OK.

Kortet er nå konfigurert til å avlaste krypteringsprosessen fra CPU-en.


GVRP-støtte

Arbeidsstasjoner og svitsjer bruker GVRP (GARP VLAN Registration Protocol) til å opprette, endre og fjerne VLAN dynamisk. GVRP-aktiverte svitsjer kan identifisere hvilke porter VLAN-medlemmer er koblet til og spore VLAN-status.

Krav

Kort og svitsjer må ha aktivert GVRP for at GVRP skal støttes i nettverket.

Slik aktiverer du GVRP på et kort:

1.	I Nettverkskomponenttre høyreklikker du på en Liste over grupperte kort som inneholder minst ett VLAN.

2.	Klikk GVRP-støtte.
Dialogboksen GVRP-støtte vises.

3.	Klikk Aktivert.

4.	I rullegardinboksen for GVRP Join-tid angir du antall millisekunder mellom GVRP LEAVE-kommandoen for svitsjen og PROSet II GVRP Join-kommandoen. Som standard starter Intel® PROSet II en Join-kommando 200 ms etter en Leave-kommando.

5.	Klikk OK.

Kortet er nå GVRP-aktivert.

Feilsøking

Ettersom det finnes ulike implementeringer av GVRP, er du ikke garantert GVRP-kompatibilitet mellom nettverksenheter selv om du har aktivert GVRP på kortet. Hvis det ikke ser ut til at GVRP fungerer, deaktiverer du GVRP på kortet.

Obs!  Når du gjør flere endringer i grupper eller virtuelle nettverk (VLAN) i Intel PROSet II, anbefales det at du lukker Intel PROSet etter hver endring slik at endringen trer i kraft.  Deretter kan du åpne Intel PROSet II på nytt og gjøre neste endring.


Windows NT 4.0 Service Packs

Fore å bruke Intel® PROSet II og de fleste avanserte gruppeegenskapene må din installasjon av Windows NT 4.0 oppdateres til service pack 6a eller nyere.

For informasjon om Microsoft service pack skal du gå til http://www.microsoft.com/ntserver/ for å downloade en servicepakke og veiledninger.


Avanserte innstillinger for PRO/1000 Desktop-kort

Merk!  Hør med nettverksansvarlig før du endrer disse innstillingene. Hvis du konfigurerer avanserte innstillinger på en måte som ikke er kompatibel med andre nettverksenheter, kan det påvirke kortet eller systemytelsen negativt.

Adaptivt rammeintervall

Kompenserer for høyt antall Ethernet-pakkekollisjoner på nettverket.

Kort som støttes	Alle
Standard	aktivert

Svar på dynamisk kobling

Gjør systemoppstarten raskere ved å hoppe over oppstartsrutiner som krever nettverkstilkobling, når kabelen ikke er koblet til kortet. Dette reduserer tiden det tar å starte datamaskinen, betraktelig.

Når Svar på dynamisk kobling for Intel Ethernet-kontrollere aktiveres, og en nettverkskabel ikke er koblet til RJ-45-porten , vil nettverkskoblingen bli deaktivert. Et gult varslingsikon vil komme frem på Enhetsbehandlingen.

For å reaktivere nettverkskoblingen skal du koble nettverkskabelen til RJ-45 porten, og så starte datamaskinen på nytt.

Kort som støttes	Ikke tilgjengelig på alle kortmodeller.
Standard	Av
Anbefalt	På
Område	På, Av
MERK: Adaptive Link Response (ALR) vil ikke virke når et trådløst kort er aktiv i systemet.

Oppsamlingsbuffere

Optimaliserer overføringsytelsen ved å tilpasse antall oppsamlingsbuffere. Dermed kan kortet koble sammen datasegmenter før pakkene overføres.

Oppsamlingsbuffere-innstillingen må konfigureres til å fungere med overføringsdeskriptorer-innstillingen. Oppsamlingsbuffere-innstillingen bør være 30 - 50 % av Overføringsdeskriptorer. Hvis Oppsamlingsbuffere ikke endres til å stemme overens med overføringsdeskriptorer, er det ikke sikkert overføringsytelsen forbedres.

Oppsamlingsbuffere-innstillingen øker overføringsytelsen betraktelig på Windows NT 4.0-datamaskiner. Den forbedrer også overføringsytelsen på Windows 98- og 2000-datamaskiner.

Operativsystemer som støttes	Windows NT 4.0, 98, 2000, XP
Kort som støttes	Alle
Standard	128
Område	16-768
Aktiver PME

Aktiverer eller deaktiverer oppvåkningsfunksjoner for kort på datamaskiner som har eldre APM-implementeringer (Advanced Power Management). Reaktivering gjør at kortet går ut av ventemodus eller avslåingstilstand når det mottar bestemte pakketyper, for eksempel ARP-pakker.

•	Hvis du deaktiverer funksjonen, deaktiveres alle reaktiveringsinnstillinger på datamaskiner som bruker eldre strømsparingsimplementeringer.

•	Hvis du aktiverer funksjonen, svarer kortet på reaktiveringssignaler. Hvis du vil konfigurere kortet til å svare på bestemte pakketyper, kan du se informasjonen om Innstillinger for oppvåkning senere i dette emnet.

•	Verdien Standard maskinvareinnstilling tvinger kortet til å konfigurere funksjoner for reaktivering basert på maskinvaren på systemet.

•	Verdien Ingen handling gjør at kortet bruker standarden for operativsystemet.

Hvis du vil deaktivere alle Innstillinger for oppvåkning, setter du denne funksjonen til deaktivert. Hvis ikke, setter du funksjonen til Ingen handling.

Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Deaktivert
Område	Aktivert, Deaktivert
Fullførelse av hurtig overføring

Optimaliserer overføringsytelsen ved å frigjøre overføringsdeskriptorer for gjenbruk før pakker sendes ut på nettverket.

•	Når Rask overføring fullført er deaktivert, må kortet vente til pakker er sendt for å bruke overføringsdeskriptorer på nytt.

•	Når Rask overføring fullført er aktivert, bruker kortet overføringsbetegnelsene tidligere. Dermed kan kortet forbedre overføringsytelsen.

Kort som støttes	82544-basert. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	På
Område	På, Av
Flytkontroll

Gjør det mulig for kort å regulere trafikk mer effektivt.

•	Kortene genererer flytkontrollrammer når mottakskøene når en forhåndsdefinert grense. Når du genererer flytkontrollrammer, får senderen signaler om å senke overføringen.

•	Kortene svarer på flytkontrollrammer ved å stanse pakkeoverføringen midlertidig så lenge som det er angitt i flytkontrollrammen.

Når du gjør slik at kortene kan justere pakkeoverføring, hjelper flytkontroll med å forhindre at pakker blir mistet.

Merk! Koblingspartnere må støtte flytkontrollrammer for at kort skal kunne dra nytte av denne funksjonen.

Kort som støttes	82540- og 82544-baserte kort, sende og motta. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Generere og svare på flytkontrollrammer
Område	• Av, Svar, Generer, Generer & Svar, Maskinvarefeil

Jumbo-rammer

MERK: Og Jumbo-rammer støttes bare ved 1000 Mbps. Bruk av Jumbo-rammer ved 10 eller 100 Mbps kan føre til dårlig ytelse eller tap av kobling.

Aktiverer eller deaktiverer funksjonen Jumbo-rammer. Jumbo-rammer kan øke gjennomstrømmingen og redusere CPU-utnyttelsen ved å ha flere data i hver ramme og på den måten sende færre rammer. Standard Ethernet-rammestørrelse er 1 514 byte, mens Jumbo-rammer kan inneholde 4 088, 9 014 eller 16 128 byte.

Du bør bare aktivere Jumbo-rammer hvis enhetene i nettverket støtter dem og er konfigurert til å bruke samme rammestørrelse. Når du setter opp Jumbo-rammer på andre nettverksenheter, skal du være klar over at nettverksenheter beregner Jumbo-rammestørrelser ulikt. Enkelte enheter inkluderer hodeinformasjon i rammestørrelsen, mens andre ikke gjør det. Intel-kort inkluderer ikke hodeinformasjon i rammestørrelsen.

Hvis du vil ha mer informasjon, ser du emnet Jumbo-rammer.

Kort som støttes	Alle
Standard	Deaktivert
Område	Deaktivert (1 514), 4 088, 9 014 og 16 128. (Sett bryteren 4 byte høyere for CRC, pluss 4 byte hvis du bruker VLAN eller QoS-pakkemerking.)  MERK: Verdiene i området (1 514-16 128) kan angis i Windows-registernøkkelen MaxFrameSize.
Lokalt administrert adresse

Overstyrer MAC-adressen for kortet. Hvis du vil angi en ny nettverksadresse, skriver du inn et 12-sifret heksadesimalt tall i verdiboksen.

Kort som støttes	Alle
Standard	Ingen
Område	0000 0000 0001 - FFFF FFFF FFFD Unntak: • Ikke bruk en multicast-adresse (minst signifikante bit i høy byte = 1).  • Ikke bruk bare nuller eller bare F-er. Ingen verdi: Bruker den opprinnelig nettverksadresse for kortet.
Windows 98SE-brukere:

Dersom du vil bruke standardadressen etter å ha brukt en manuelt tildelt adresse, skal du foreta en av disse prosedyrene:

•	På dialogboksen Nettverkegenskapers kategori Avansert, velger du Lokalt administrert adresse, og endrer verdien til 0. Klikk OK for å bruke innstillingen.

•	I Intel PROSet II klikker du på kategorien Avansert, deretter klikker du på Gjenopprett standard eller fjerner alle verdiene fra Verdifeltet. Klikk OK for å bruke innstillingen.

Logg koblingsstatushendelser

Denne innstillingen brukes for å aktivere/deaktivere loggingen av koblingsstatusendringer. Dersom den stilles til på, genererer en kobling-opp-hendelse eller en kobling-ned-hendelse en beskjed som blir vist i hendelseslogg. Administratorer ser hendelsesbeskjeden fra systemet hendelseslogg.

De følgende hendelser logges.

KOBLING_OPP_ENDRING

KOBLING_NED_ENDRING

KOBLING_DUPLEX_FORSKYVNING

Kort som støttes	Alle
Standard	Aktiver
Område	Aktiver, deaktiver
Avlaste mottak av TCP-kontrollsum

Gjør det mulig for kortet å kontrollere TCP- eller UDP-sjekksum for innkommende pakker.

•	Når avlasting er av, kontrollerer operativsystemet TCP-sjekksummen.

•	Når avlasting er på, fullfører kortet kontrollen for operativsystemet.

Denne funksjonen forbedrer mottaksytelsen og reduserer CPU-utnyttelsen.

Operativsystemer som støttes	• Windows XP* • Windows 2000 • Windows 98 støtter ikke avlasting.
Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	• Windows* XP: På • Windows 2000 Av
Område	På, Av
Avlaste mottak av TCP-kontrollsum

Gjør det mulig for kortet å beregne IP-sjekksummen for utgående pakker.

•	Når avlasting er av, kontrollerer operativsystemet TCP-sjekksummen.

•	Når avlasting er på, fullfører kortet kontrollen for operativsystemet.

Denne funksjonen forbedrer mottaksytelsen og reduserer CPU-utnyttelsen.

Operativsystemer som støttes	• Windows XP* • Windows 2000 • Windows 98 støtter ikke avlasting.
Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	På
Område	På, Av
Avlaste mottak av TCP-kontrollsum

Gjør det mulig for kortet å kontrollere TCP- eller UDP-sjekksum for innkommende pakker.

•	Når avlasting er av, kontrollerer operativsystemet TCP-sjekksummen.

•	Når avlasting er på, fullfører kortet kontrollen for operativsystemet.

Denne funksjonen forbedrer mottaksytelsen og reduserer CPU-utnyttelsen.

Operativsystemer som støttes	• Windows XP* • Windows 2000 • Windows 98 støtter ikke avlasting.
Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	På
Område	På, Av MERK: Sett denne funksjonen til Av når serveren støtter DOS-baserte klienter.
Merking av QoS-pakke

Gjør det mulig for kortet å sende og motta IEEE 802.3ac-merkede rammer, inkludert:

•	802.1p QoS-merker (Quality of Service) som kreves for prioritetsmerkede pakker, og

•	802.1Q-merker som kreves for VLAN

Intel PROSet aktiverer 802.1p-merking automatisk når du setter opp et VLAN.

Kort som støttes	82559-baserte kort. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	Deaktivert
Område	Aktivert, Deaktivert
Mottaksdeskriptorer

Definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å tildele mottatte pakker til minne. Hver mottatte pakke krever én mottaksbetegnelse, og hver betegnelse bruker 2 kB minne.

Du kan velge å øke antallet mottaksdeskriptorer hvis du merker betydelig nedgang i ytelsen for mottatt trafikk. Hvis mottaksytelsen ikke er noe problem, bruker du standardverdien 256.

Kort som støttes	Alle
Standard	160
Område	80-2048
Avlast TCP-segmentering

Gjør det mulig for kortmaskinvaren å segmentere data i gyldige Ethernet-rammer.

•	Når TCP-segmentering er av, segmenterer operativsystemet dataene før de sendes til kortet for overføring.

•	Når TCP-segmentering er på, segmenterer kortet dataene i rammer.

Ettersom kortmaskinvaren kan fullføre datasegmenteringen mye raskere enn operativsystemet, øker denne funksjonen overføringsytelsen betraktelig. I tillegg bruker kortet færre CPU-ressurser.

Operativsystemer som støttes	Windows XP
Kort som støttes	Bare 82544- og 82540-baserte. Se emnet Kortspesifikasjoner hvis du trenger hjelp til å identifisere kortet.
Standard	1
Område	0 = ikke annonser funksjonen; 1 = annonser funksjonen.

Overføringsdeskriptorer

Definerer antall mottaksdeskriptorer. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du standardverdien 256.

Kort som støttes	Alle
Standard	256
Område	80-2048
Innstillinger for oppvåkning ved kobling

Reaktiverer datamaskinen hvis nettverkstilkoblingen etablerer en kobling mens datamaskinen er i hvilemodus. Du kan aktivere funksjonen, deaktivere den eller la operativsystemet bruke standarden.

Operativsystemer som støttes	Windows 9x, Windows 2000, Windows XP
Område	Deaktivert, tvunget, OS-kontrollert
Standard	Deaktivert

Innstillinger for oppvåkning

Disse innstillingene refererer til funksjoner som aktiveres av operativsystemet eller Intel PROSet. Funksjonene virker ulikt eller støttes ikke i det hele tatt, avhengig av hvilken versjon av Windows du bruker.

Disse Windows-versjonene støtter Innstillinger for oppvåkning: Windows 2000, Windows XP 64 bit Edition, Windows XP Professional og Windows Server 2003. Denne egenskapen støttes ikke i Windows Server 2003 for 64-bit Itanium(R)-baserte System.

Aktiver oppvåkningsinnstillinger

Du kan bruke Intel PROSet til å konfigurere oppvåkningsinnstillingen kortet bruker. Før du velger Innstillinger for oppvåkning, må du aktivere operativsystemet for bruk av Innstillinger for oppvåkning. Hvis du vil gjøre dette, kan du se Instruksjoner.

Slik aktiverer du oppvåkningsinnstillinger

6.	I Intel PROSet, klikk kategorien Avansert.

7.	I listeboksen Innstilling velger du Innstillinger for oppvåkning.

8.	I listen Verdi velger du den aktuelle oppvåkningsinnstillingen.

9.	Klikk OK eller Bruk.

10.	Hvis kortet skal svare på disse typene reaktiveringspakker, må operativsystemet også aktiveres for å bruke Innstillinger for oppvåkning. Hvis du vil aktivere Innstillinger for oppvåkning, navigerer du til Enhetsbehandling og aktiverer alternativet.

Tilgjengelige innstillinger

Disse innstillingene for reaktivering er tilgjengelige i Intel PROSet:

Innstilling	Beskrivelse
Deaktivert	Kortet vil ikke bruke reaktiveringsinnstillinger.
Våkne ved magisk pakke	Reaktiverer kortet som svar på en mottatt magisk pakke. En magisk pakke er en pakke som inneholder 16 kontinuerlige kopier av Ethernet-adressen til kortet som mottar pakken. Når du konfigurerer denne funksjonen, overstyrer Intel PROSet operativsystemverdien for funksjonen.
Reaktiver ved adresserte pakker	Reaktiverer kortet når kortet mottar en adressert pakke. Dette er en unicast-pakke som sendes til kortets MAC-adresse.  Protokollen må aktivere denne reaktiveringsmetoden i driveren. Deaktivering av funksjonen angir at driveren skal ignorere protokollforespørsler om å aktivere denne reaktiveringsmetoden.
Reaktiver ved magiske og adresserte pakker	Aktiverer kortet for reaktivering når det mottar en magisk pakke eller en adressert pakke.
Styrt av OS	Gir operativsystemet full kontroll over oppvåkningsinnstillinger.

Merk! Hvis flere IP-adresser er konfigurert for ett kort, kan operativsystemet be om reaktivering ved ARP-mønstre til alle de konfigurerte adressene. Kortet vil bare reaktiveres hvis ARP-pakker forespør den første IP-adressen i listen.

Merk! Reaktiveringsinnstillinger inkluderer ikke muligheten til å vekke en maskin fra avslått (S5) tilstand. Denne tilstanden kontrolleres av innstillingen Aktiver PME, som også er tilgjengelig i kategorien Avansert. Selv om reaktiveringsinnstillinger er deaktivert, bestemmes muligheten for vekking fra S5 av innstillingen Aktiver PME.

Så lenge kortdriveren er aktivert, vil PME-innstillinger fungere. Når driveren er deaktivert, går imidlertid enheten tilbake til standard maskinvareinnstilling, som enten lar eller ikke lar datamaskinen vekkes opp når den er slått av.

Knappen Bruk standardinnstillinger

Denne knappen tilbakestiller den valgte avanserte innstillingen til standardverdien for innstillingen.  Se innstillingene over for standardverdier.  (Dette alternativet er ikke tilgjengelig for alle innstillingene.)


Lagre eller gjenopprette konfigurasjon
Gjenopprette Intel® PROSet II-konfigurasjon fra en lagret fil

Hvis du har lagret de avanserte innstillingene for et kort i en fil , kan du bruke filen til å gjenopprette egendefinerte innstillinger for VLAN og gruppering. Vær klar over at gjenoppretting av Intel PROSet II-konfigurasjon ikke gjenoppretter nettverksinnstillinger som er spesifikke for operativsystemet, for eksempel IP-adresse eller protokollbindinger.

Før du begynner

Når du gjenoppretter innstillinger, må de gjenopprettes på samme datamaskin som de ble opprettet på. Datamaskinen må også ha samme nettverk og maskinvare installert som den opprinnelige, lagrede konfigurasjonen. Hvis datamaskinen for eksempel var koblet til en Intel Gigabit-svitsj da konfigurasjonsfilen ble lagret, må datamaskinen være koblet til samme svitsj når konfigurasjonen gjenopprettes.

Egenskapen Lagre/Gjenopprette er kompatibel med Windows NT* 4.0, 2000, 98SE, Me og XP.

ADVARSEL!  Ikke rediger konfigurasjonsfilen. Hvis du endrer konfigurasjonsfilen, blir den ubrukelig.

Slik gjenoppretter du kortinnstillinger fra en lagret fil:

1.	På Verktøy-menyen, velg Lagre/Gjenopprett konfigurasjon.
Dialogboksen Lagre/Gjenopprett vises.

2.	Klikk Gjenopprett.
Dialogboksen Åpne vises.

3.	Bla frem til mappen du lagret konfigurasjonsfilen i, og velg filen.

4.	Klikk Åpne.
Intel PROSet II viser de gjenopprettede innstillingene. Innstillingene trer ikke i kraft før du klikker OK.

5.	Hvis det er nødvendig, kan du endre kortkonfigurasjonen.

6.	Klikk OK for å lukke Intel ®PROSet II og bruke de gjenopprettede endringene.

Se også:

Lagre konfigurasjon


Advarsel om tillegging av kort i gruppe
Legge til et kort i en eksisterende gruppe

Når du oppretter en gruppe, bør du sørge for at hvert kort er medlem av bare én gruppe. Dette gjelder grupper som er opprettet i Intel® PROSet, og grupper som er opprettet med andre konfigurasjonsverktøy. Hvis du legger til samme kort i flere grupper, kan det påvirke funksjonaliteten og ytelsen for gruppen negativt.

•	Hvis du brukte Intel PROSet til å opprette grupper, kan du se i trevisningen for å identifisere eksisterende gruppemedlemmer.

•	Hvis du brukte andre konfigurasjonsverktøy til å opprette grupper, ser du gjennom gruppene og gruppemedlemmene i disse verktøyene for å forsikre deg om at kortet ikke allerede er gruppert.

Se også

Fjerne et kort fra en gruppe

Opprette en ny gruppe


Navigate PROSet II
Navigere i Intel® PROSet II

Intel® PROSet har tre navigeringsområder:

•	Meny

•	Nettverkskomponenttre

•	Kategorier

Fra menyen kan du:

•	Sette opp grupper eller aktivere IP-sikkerhet fra Handling.

•	Lagre eller gjenopprette konfigurasjon for kort-VLAN og gruppering fra Verktøy.

•	Bruke det elektroniske hjelpesystemet eller få tilgang til Intels webområde for kundestøtte.

Fra nettverkskomponenttreet kan du :

•	Klikke et kort én gang for å vise kortdetaljer og konfigurasjonsinnstillinger.

•	Høyreklikke et kort for å sette opp grupper og aktivere IPSec.

•	Høyreklikke en gruppe for å endre gruppeinnstillinger eller sette opp VLAN.

•	Høyreklikke et gruppemedlem for å endre kortinnstillinger for gruppen.

Fra kategoriene kan du utføre kortovervåking og konfigurasjonsoppgaver.

Systemfeltikonet

Med avmerkingsboksen Vis systemfeltikonet kan du vise eller skjule Intel PROSet II-systemfeltikonet på oppgavelinjen (nær klokken). Fjern merket i boksen for å skjule systemfeltikonet.

Mer om Intel® PROSet II-systemfeltikonet


Generell informasjon

For å få generell informasjon om et kort skal du klikke på kortet I Nettverkskomponenttre.

Kategorien Generell lar deg:

•	Se gjennom grunnleggende kortinformasjon

•	Teste kabelfunksjonalitet
MERK: Kabeltesten er tilgjengelig bare for utvalgte kort.

•	Identifisere kortsporposisjon

•	Se på tilleggsdetaljer


Se gjennom grunnleggende kortinformasjon

Kategorien Generelt inneholder følgende informasjon om kortet som er valgt i Nettverkskomponenttre.

Ethernet-adresse:	Den 12-sifrede heksadesimale nodeadressen for kortet, også kalt en MAC-adresse.
Delnummer	Intel-delnummeret for kortet
IP-adresse:	Ved bruk av IPv4-protokoll, er dette TCP/IP-adressen for kortet.  Intel PROSet II viser ikke IPv6-adresser for øyeblikket.
Status for nettverksdriver	Angir om Intel-nettverksdriveren er lastet inn eller ikke for kortet som er valgt.
Nettverksstatus	Angir kobling, hastighet og dupleks for kortet som er valgt. Feltene i Nettverksstatus-gruppeboksen varierer med kortene.  • Lysindikator for kobling: På angir at kortkabelen er koblet til en gyldig port på hub eller svitsj. Av angir at det ikke er noen kobling. • Hastighet: Hastigheten som er oppført her (1 000, 100 eller 10), angir hastigheten kortet er koblet ved. • Lysindikator for kobling: Blinker når kortet er koblet til et nettverk med aktivitet. Av angir at det ikke er noen aktivitet eller at kabelen er frakoblet. • Dupleks: Hel dupleks angir at kortet sender og mottar trafikk samtidig. Halv dupleks angir at kortet alltid sender eller mottar (trafikken sendes og mottas ikke samtidig).


Angi hastighet og dupleks

Som standard forhandler Intel-kort innstillinger for hastighet og dupleks automatisk. Hvis kortet ikke kan opprette tilkobling ved hjelp av automatisk forhandling, må du kanskje konfigurere innstillinger for hastighet og dupleks manuelt på kortet og koblingspartneren. Hvis en svitsj for eksempel ikke støtter automatisk forhandling, eller er konfigurert med en bestemt hastighet og dupleks, må du konfigurere hastighet og dupleks for kortet manuelt for at de skal stemme overens med svitsjinnstillingene.

ADVARSEL! Hvis hastighet og dupleks for kortet ikke stemmer nøyaktig overens med innstillingene på koblingspartneren, kan nettverkstilkoblingen brytes.

Når automatisk forhandling er deaktivert, er disse innstillingene mulige for koblingshastighet og dupleks:

•	10 Mbps eller 100 Mbps hel dupleks (krever at en heldupleks koblingspartner er satt til hel dupleks). Kortet kan sende og motta pakker samtidig.

•	10 Mbps eller 100 Mbps hel dupleks (krever at en heldupleks koblingspartner er satt til hel dupleks). Kortet utfører én operasjon om gangen. Det sender eller mottar.

Hvis du vil ha informasjon om hvordan du konfigurerer hastighet og dupleks, klikker du den aktuelle kortserien:

•	Intel® PRO/1000 (kobber)
MERK: Fiberbaserte Intel® PRO/1000-kort opererer ved 1000 Mbps, hel dupleks.

•	Intel® PRO/10 eller PRO/100


PRO 10/100-koblingskonfigurasjon
Angi hastighet og dupleks: Intel® PRO/10 eller PRO/100-kort

I Nettverkskomponenttre klikker du på Intel® PRO/10- eller PRO/100-kortet du vil konfigurere.

1.	Klikk kategorien Avansert.

2.	I listen med innstillinger klikker du Koblingshastighet og dupleks.

3.	I boksen Koblingshastighet og dupleks klikker du hastigheten og dupleksmodusen som passer til kortet og koblingspartneren.  Hvis du vil ha informasjon om hvordan du identifiserer hastighet og dupleksmodus for koblingspartneren, kan du se i dokumentasjonen for koblingspartneren.

4.	Klikk OK.

5.	Hvis du blir bedt om det, starter du systemet på nytt.

Kortet er nå konfigurert med angitte innstillinger for hastighet og dupleks.

ADVARSEL! Hvis konfigurasjonen av hastighet og dupleks ikke stemmer helt overens med innstillingene på den tilkoblede enheten, kan det føre til at nettverksforbindelsen blir brutt, eller at ytelsen blir dårligere.


Konfigurere avanserte funksjoner for gruppering

Hvis du vil vise avanserte funksjoner for et kort, velger du en korttype:

•	Intel® PRO/1000 Desktop

•	Intel® PRO/1000 Server

•	Intel® PRO/100

•	Intel® PRO/100 VE og VM

•	Intel® PRO/10


Feiltoleranse for bryter

Feiltoleranse for svitsj (SFT - Switch Fault Tolerance) lar deg koble to grupperte kort til to svitsjer. Hvert kort kobler til en separat bryter:

Feiltoleranse for svitsj kan oppdage feil når de oppstår:

•	på hvert av kortene

•	på hver av kablene som kobler det grupperte kortet til svitsjen

•	på porter på svitsjen som er koblet til kortene

•	på porter på svitsjen som er koblet til kortene

I SFT-grupper er ett kort det primære kortet og ett kort det sekundære. Ved normal drift er det sekundære kortet i ventemodus. Det verken overfører eller mottar trafikk. Hvis det primære kortet mister tilkoblingen, tar det sekundære kortet automatisk over.

Korthastighet	Kan være blandet, for eksempel ett kort som er koblet ved 100 Mbps, og ett som kjører ved 1 000 Mbps.
Protokoller	Alle
Nettverkskonfigurasjon	• Hvert kort kobler til en separat bryter: • Spanningstre må være deaktivert.
Se også:

Om grupper

Gruppetyper


Lagre konfigurasjonen til en ekstern fil
Lagre konfigurasjon i en fil

Du kan lagre konfigurasjonen for Intel® PROSet-gruppering og VLAN i en fil og gjenopprette den tilbake til Intel PROSet senere. Vær klar over at lagring av Intel PROSet II-konfigurasjon ikke lagrer nettverksinnstillinger som er spesifikke for operativsystemet, for eksempel IP-adresse eller bundne protokoller.

Egenskapen Lagre/Gjenopprette er kompatibel med Windows NT* 4.0, 2000, 98SE, Me og XP.

Merk! Når du har lagret en konfigurasjon med et bestemt filnavn, kan du ikke bruke det filnavnet på nytt. Du må bruke forskjellige navn hver gang du lagrer Intel PROSet II-konfigurasjonen.

Slik lagrer du Intel® PROSet II-konfigurasjon:

1.	På Verktøy-menyen, velg Lagre/Gjenopprett konfigurasjon.
Dialogboksen Lagre/Gjenopprett vises.

2.	Klikk Lagre.
Dialogboksen Lagre som vises.

3.	Bla frem til mappen du vil lagre konfigurasjonsfilen i, og skriv deretter inn et filnavn.

4.	Klikk Lagre.

5.	Klikk OK.

Intel PROSet II-konfigurasjonen er lagret.

Når konfigurasjonen er lagret, må du ikke redigere eller endre filen. Hvis du endrer konfigurasjonsfilen, blir den ubrukelig.

Se også

Gjenopprette konfigurasjon


Teste svitsjkonfigurasjon

Du kan sikre at koblingspartnere støtter den konfigurerte grupperingsmodusen ved å kjøre svitsjkonfigurasjonstesten. Hvis kortet for eksempel er medlem av en Fast EtherChannel*-gruppe, kan Intel ® PROSet IIkontrollere at koblingspartnerne som er koblet til kortet, støtter koblingssamling.

Hvis du vil ha spesifikk informasjon om kravene for hver gruppemodus, kan du se Om gruppering.

ADVARSEL: Mens denne testen kjøres, mister gruppen nettverkstilkoblingen midlertidig.

Merk!  Denne testen finner ikke feil når følgende situasjoner forekommer.

Kortkonfigurasjon	Svitsjkonfigurasjon
Dynamic 802.3ad	Alle
Gruppert i Koblingssamlingsmodus uten VLAN	Svitsjen enten: • hører ikke til noe VLAN • Er konfigurert med merkede, virtuelle lokalnettverk
Gruppert i Koblingssamlingsmodus med VLAN	Svitsjen: • hører ikke til VLAN-et som er konfigurert på kortet, og • Har ikke definert Koblingssamling
Slik kjører du svitsjkonfigurasjonstesten:

1.	I nettverkskomponenttreet klikker du gruppen du vil teste.
Hvis du vil kjøre testen, må det være minst to kort i gruppen.

2.	I kategorien Gruppekonfigurasjon klikker du Teste svitsjkonfigurering.
Dialogboksen Teste svitsjkonfigurering vises.

3.	Hvis du vil fortsette med testen, klikker du Ja.
Hvis det oppstår noen konfigurasjonsfeil hos gruppen eller koblingspartneren, vises kategorien Feilsøking.

Obs!  På grunn av tiden det tar å teste spanningtreprotokollen (STP), kan det være at Intel® PROSet II ikke angir nøyaktig om spanningstreprotokollen er aktivert på nettverket. Sikre at svitsjene er konfigurert med STP:

•	Aktivert for SFT-grupper

•	Deaktivert (portfast) for alle andre gruppemodi


Ansvarsfraskrivelse for tredjepart
* Andre produktnavn og firmanavn kan være varemerker for andre firmaer. Disse er her brukt bare til forklaringsformål for brukerens vegne og uten uærlige hensikter.


Konfigurere strømsparing
Konfigurere strømforbruk

Ved hjelp av kategorien for strømsparing kan du konfigurere strømforbruk for kortet.  Når kortet sparer strøm, opererer det ved 10 Mbps.

Hvis kortet skal støtte denne funksjonen, må det:

•	Være konfigurert for automatisk hastighetsforhandling og

•	Være tilkoblet en koblingspartner som kan forhandle hastighet automatisk

Hvis kortet er tvunget til å operere ved en hastighet på 100 Mbps, eller hvis koblingspartneren ikke kan operere ved 10 Mbps, kan ikke strømsparing aktiveres for kortet.

På enkelte datamaskiner lagres ikke strømsparingsalternativene etter at datamaskinen startes på nytt. Dersom innstillingene ikke lagres, viser den øverste delen av Kategorien for strømsparing teksten  Midlertidig strømsparing. For alle systemer som kjører Windows XP eller Windows Server 2003, lagres ikke innstillingene.

Dersom innstillingene ikke endres etter ny oppstart av datamaskinen, viser den øverste delen av displayet teksten Strømsparingsinnstillinger.

OBS:  Når strømsparing er aktivert, gjør Intel® PRO/100 M-kort behandlingssyklusene for kortet tregere. Denne funksjonen gjør det mulig for Intel PRO/100 M-kort å redusere strømforbruket ytterligere. Andre Intel PRO/100-kort reduserer ikke behandlingssyklusene for å spare strøm.

I strømsparingskategorien kan du tilpasse:

•	Totalt strømforbruk for kort. Når du konfigurerer totalt strømforbruk, beholder kortet denne innstillingen så lenge det er aktivert. Hvis kortet er deaktivert, lagres ikke innstillingen.

•	Strømforbruk i ventemodus. Når datamaskinen går inn i ventemodus, sparer kortet automatisk strøm og forhandler til 10 Mbps. Intel PROSet bevarer innstillingen mellom oppstarter av datamaskinen.

•	Strømforbruk når batterier brukes for Windows* XP. Når datamaskinen går inn i ventemodus, sparer kortet automatisk strøm og forhandler til 10 Mbps. Intel PROSet bevarer innstillingen mellom oppstarter av datamaskinen.

Kort som støttes	Alle Intel® PRO/100-kort
Operativsystemer som støttes	• Windows 2000, Windows XP 98 bit Edition og Windows XP Professional for definering av totalt strømforbruk eller strømforbruk i ventemodus • Windows XP when defining power usage when the computer operates from the battery
Standard	Som standard bruker kortene den normale mengden strøm som er nødvendig for å beholde innstillingene for hastighet og dupleks.  Når kortet sparer strøm, opererer det ved 10 Mbps. Dette reduserer den totale mengden trafikk som behandles av kortet.
Slik konfigurerer du strømforbruk for kort:

1.	Klikk kortet du vil konfigurere for strømbruk, i Nettverkskomponenttre.
Hvis kortet støtter Strømsparing, vises kategorien Strømsparing.

2.	Hvis du vil redusere det totale strømforbruket, klikker du Lavt strømforbruk og hastighetsforhandling til 10 Mbps og deretter Bruk. Kortet beholder innstillingen så lenge det forblir aktivert.
Hvis du vil konfigurere kortet for vanlig strømforbruk og kortets standardhastighet, klikker du Bruk normalstrømsmodus i området Midlertidig strømsparing og deretter Bruk.

3.	Hvis du vil redusere strømmengden kortet bruker når datamaskinen er i ventemodus, klikker du Lavt strømforbruk i ventemodus.

4.	Hvis kortet kjører på en datamaskin med Windows XP, kan du også definere strømsparingsinnstillinger når datamaskinen bruker batteriet. Hvis du vil redusere strømmengden kortet bruker når datamaskinen bruker batteriet, klikker du Lavt strømforbruk når batterier brukes.

5.	Klikk OK for å bruke endringen.


Belastningsfordeling ved mottak

Med grupper for dynamisk belastningsfordeling (ALB - Adaptive Load Balancing), kan du velge å aktivere eller deaktivere Belastningsfordeling ved mottak (RLB - Receive Load Balancing). RLB-alternativet er alltid tilgjengelig:

•	I kategorien Avanserte innstillinger i en ALB-gruppe

•	Under oppretting av ALB-gruppe ved hjelp av Veiviser for gruppering

Hvis du deaktiverer RLB, mottar bare det primære kortet trafikk. Alle kort fordeler belastningen ved utgående (Tx) trafikk.

Hvis du aktiverer RLB, avhenger trafikkfordelingen av forskjellene i hastighet mellom gruppemedlemmene.

•	I en gruppe med samme hastighet overfører og mottar alle kortene IP-trafikk. Det primære kortet sender trafikk som ikke er rutet (lag 2).

•	I en gruppe med blandet hastighet, fordeler gruppemedlemmene med raskest hastighet belastningen på innkommende (Rx) IP-trafikk. Alle kort fordeler belastningen ved utgående (Tx) trafikk. Det primære kortet sender trafikk som ikke er rutet (lag 2).
MERK: Med RLB aktivert velger Intel® PROSet II automatisk et foretrukket primærkort. Du kan overstyre standardvalget ved  Å angi et kort som primær- eller sekundær-kort.

Se også:

Om grupper

Opprette en ny gruppe


Avanserte innstillinger for PRO/100 VE- og VM-kort

Innstillingene som er oppført i kategorien Avansert, lar deg tilpasse hvordan kortet behandler QoS-pakkemerking, Jumbo-rammer, avlasting og andre funksjoner. Enkelte av følgende funksjoner er kanskje ikke tilgjengelige avhengig av operativsystemet du kjører, og de enkelte kortene som er installert.

Avanserte innstillinger

Adaptivt rammeintervall

Kompenserer for høyt antall Ethernet-pakkekollisjoner på nettverket.  Som standard er innstillingen satt til 0. Dette deaktiverer funksjonen.

Den anbefalte innstillingen (1) fungerer best for de fleste datamaskiner og nettverk ved at den tilpasses dynamisk til forholdene for nettverkstrafikk. Denne dynamiske modusen er bare aktiv når verdien er satt til 1. I sjeldne tilfeller kan du imidlertid oppnå bedre ytelse ved å angi avstandsverdien manuelt. Når du angir en verdi, tvinges det frem statisk avstand mellom pakkene.

Når verdien økes, øker mellomrommet mellom rammene som sendes.

Kort som støttes	Alle
Standard	0: deaktivert
Område	0-255

Svar på dynamisk kobling

Gjør systemoppstarten raskere ved å hoppe over oppstartsrutiner som krever nettverkstilkobling, når kabelen ikke er koblet til kortet. Dette reduserer tiden det tar å starte datamaskinen, betraktelig.

Når Svar på dynamisk kobling for Intel Ethernet-kontrollere aktiveres, og en nettverkskabel ikke er koblet til RJ-45-porten , vil nettverkskoblingen bli deaktivert. Et gult varslingsikon vil komme frem på Enhetsbehandlingen.

For å reaktivere nettverkskoblingen skal du koble nettverkskabeln til RJ-45 porten, og så starte datamaskinen på nytt.

Kort som støttes	Bare flyttbare produkter. Ikke tilgjengelig på alle kortmodeller.
Standard	Av
Anbefalt	På
Område	På, Av
MERK: Adaptive Link Response (ALR) vil ikke virke når et trådløst kort er aktiv i systemet.

Oppsamlingsbuffere

Optimaliserer overføringsytelsen ved å tilpasse antall oppsamlingsbuffere. Dermed kan kortet koble sammen datasegmenter før pakkene overføres.

Oppsamlingsbuffere-innstillingen må konfigureres til å fungere med overføringsdeskriptorer-innstillingen. Oppsamlingsbuffere-innstillingen bør være 30 - 50 % av Overføringsdeskriptorer. Hvis Oppsamlingsbuffere ikke endres til å stemme overens med overføringsdeskriptorer, er det ikke sikkert overføringsytelsen forbedres.

Oppsamlingsbuffere-innstillingen øker overføringsytelsen betraktelig på Windows NT 4.0-datamaskiner. Den forbedrer også overføringsytelsen på Windows 98- og 2000-datamaskiner.

Standard	8
Anbefalt verdi	8
Område	1-32
Lokalt administrert adresse

Overstyrer MAC-adressen for kortet. Hvis du vil angi en ny nettverksadresse, skriver du inn et 12-sifret heksadesimalt tall i verdiboksen.

Standard	Ingen
Område	0000 0000 0001 - FFFF FFFF FFFD Unntak: • Ikke bruk en multicast-adresse (minst signifikante bit i høy byte = 1).  • Ikke bruk bare nuller eller bare F-er.
Windows 98SE-brukere:

Dersom du vil bruke standardadressen etter å ha brukt en manuelt tildelt adresse, skal du foreta en av disse prosedyrene:

•	På dialogboksen Nettverkegenskapers kategori Avansert, velger du Lokalt administrert adresse, og endrer verdien til 0. Klikk OK for å bruke innstillingen.

•	I Intel PROSet II klikker du på kategorien Avansert, deretter klikker du på Gjenopprett standard eller fjerner alle verdiene fra Verdifeltet. Klikk OK for å bruke innstillingen.

PCI-busseffektivitet

Gjør det mulig for kortet å bruke den beste overføringsmetoden for pakker eller alltid tvinge pakkesamling.

•	Når PCI-busseffektivitet er deaktivert, bruker kortet overføringsmetoden som gir best mulig ytelse. Hvis pakkesamling gir den beste overføringsytelsen, samler kortet automatisk pakkene.

•	Når PCI-busseffektivitet er aktivert, tvinger kortet frem pakkesamling.

Deaktiver PCI-busseffektivitet hvis det ikke er problemer med ytelsen for pakkeoverføringen. Hvis det er et stort antall underkjøringer, eller PCI-bussen har ytelsesproblemer, setter du verdien til aktivert.

Standard	Deaktivert
Område	Aktivert, Deaktivert

Mottaksbuffere

Angir antall buffere som brukes av driveren under kopiering av data til minnet.

I situasjoner med tung nettverksbelastning kan det øke ytelsen hvis du øker antall mottaksbuffere. Ulempen er at dette også fører til at driveren bruker mer systemminne. Det kan gi forringet ytelse på systemet hvis du endrer denne verdien.  Brukes på egen risiko.

Standard	48
Anbefalt verdi	• Singelkort  i Windows 98, Windows Me, Windows 2000 og Windows XP: 48 • Enkelt kort i Windows NT: 32 • Gruppert kort: 250
Område	8-1024
Rammeintervall ved gjentatt overføring

Øker forsinkelsen mellom omsendingene av rammer. Selv om det er en innebygd Ethernet-algoritme som kort bruker til å sende rammer om igjen etter konflikter, kan nettverksytelsen forbedres ved å øke forsinkelsen hvis antall konflikter på nettverket er unormalt høyt.

Kort som støttes	Alle
Standard	6
Område	6-15

Kontrollblokker for overføring

Definerer antall kontrollblokker for overføring. Disse er datasegmenter som gjør det mulig for kortet å spore pakker i systemminnet som overføres. Avhengig av størrelsen på pakken krever hver pakke én eller flere overføringsdeskriptorer.

Du vil kanskje øke antall overføringsdeskriptorer hvis du tror det kan være et problem med overføringsytelsen. Selv om overføringsytelsen kan forbedres ved å øke antallet overføringsdeskriptorer, bruker overføringsdeskriptorer av systemminnet. Hvis overføringsytelsen ikke er noe problem, bruker du den anbefalte verdien 32.

Standard	16
Anbefalt verdi	32
Område	8-64
Reaktiver ved koblingsendring

Reaktiverer datamaskinen hvis nettverkstilkoblingen etablerer en kobling mens datamaskinen er i hvilemodus. Du kan aktivere funksjonen, deaktivere den eller la operativsystemet bruke standarden.

Operativsystemer som støttes	Windows 9x, Windows 2000, Windows XP
Område	Deaktivert, tvunget, operativsystemavhengig
Standard	Deaktivert
Innstillinger for oppvåkning

Disse innstillingene refererer til funksjoner som aktiveres av operativsystemet eller Intel® PROSet II. Funksjonene virker ulikt eller støttes ikke i det hele tatt, avhengig av hvilken versjon av Windows du bruker.

•	Disse Windows-versjonene støtter Innstillinger for oppvåkning: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	Disse Windows-versjonene støtter ikke Innstillinger for oppvåkning:  Windows 98 detaljsalg og Windows NT 4.0.

Obs! Bare Intel® PRO/100+ Management- og Server-kort og Intel® PRO/100 S-kort støtter innstillinger for oppvåkning.

Aktivere innstillinger for oppvåkning på operativsystemet

Følgende typer reaktiveringspakker krever at operativsystemet har aktivert innstillinger for oppvåkning:

•	Wake On ARP

•	Wake On Directed Packet

•	Wake On NBT

Hvis kortet skal svare på disse typene reaktiveringspakker, må operativsystemet ha aktivert bruk av innstillinger for oppvåkning. Hvis du vil aktivere Innstillinger for oppvåkning, navigerer du til Enhetsbehandling og aktiverer alternativet Tillat denne enheten å bringe datamaskinen ut av ventemodus. Slik finner du alternativet:

1.	Klikk Start > Kontrollpanel.
Kontrollpanel-vinduet vises.

2.	Dobbeltklikk System.
System-dialogboksen vises.

3.	Klikk kategorien Maskinvare, klikk deretter knappen Enhetsbehandling.
Vinduet Enhetsbehandling åpnes.

4.	Dobbeltklikk kortet du vil klargjøre for reaktiveringsinnstillinger.
Egenskaper-dialogboksen vises.

5.	Klikk kategorien Strømsparing.

6.	Klikk Tillat denne enheten å bringe datamaskinen ut av ventemodus for å aktivere Innstillinger for oppvåkning for kortet.

Tilgjengelige innstillinger

Disse innstillingene for reaktivering er tilgjengelige i Intel PROSet II:

Innstilling	Beskrivelse
Deaktivert	Kortet vil ikke bruke reaktiveringsinnstillinger.
Våkne ved magisk pakke	Reaktiverer kortet som svar på en mottatt magisk pakke. En magisk pakke er en pakke som inneholder 16 kontinuerlige kopier av Ethernet-adressen til kortet som mottar pakken. Når du konfigurerer denne funksjonen, overstyrer Intel PROSet operativsystemverdien for funksjonen.
Reaktiver ved adresserte pakker	Reaktiverer kortet når kortet mottar en adressert pakke. Dette er en unicast-pakke som sendes til kortets MAC-adresse.  Protokollen må aktivere denne oppvekkingsmetoden i driveren. Fravelging av denne egenskapen forteller driveren at den skal ignorerer enhver protokollanmodning om å aktivere denne oppvekkingsmetoden.
Reaktiver ved magiske og adresserte pakker	Aktiverer kortet for reaktivering når det mottar en magisk pakke eller en adressert pakke.
Styrt av OS	Gir operativsystemet full kontroll over oppvåkningsinnstillinger.

MERK: Hvis flere IP-adresser er konfigurert for ett kort, kan operativsystemet be om reaktivering ved ARP-mønstre til alle de konfigurerte adressene. Kortet vil bare reaktiveres hvis ARP-pakker forespør den første IP-adressen i listen.

MERK: Reaktiveringsinnstillinger inkluderer ikke muligheten til å vekke en maskin fra avslått (S5) tilstand. Denne tilstanden kontrolleres av innstillingen Aktiver PME, som også er tilgjengelig i kategorien Avansert. Selv om reaktiveringsinnstillinger er deaktivert, bestemmes muligheten for vekking fra S5 av innstillingen Aktiver PME.

Så lenge kortdriveren er aktivert, vil PME-innstillinger fungere. Når driveren er deaktivert, går imidlertid enheten tilbake til standard maskinvareinnstilling, som enten lar eller ikke lar datamaskinen vekkes opp når den er slått av.


Gruppetyper

Med Intel(R) PROSet II kan du konfigurere følgende grupper:

•	Feiltoleranse for kort (AFT - Adapter Fault Tolerance)

•	Feiltoleranse for kort (AFT - Adapter Fault Tolerance)

•	Dynamisk belastningsfordeling (ALB - Adaptive Load Balancing) Inkluderer Belastningsfordeling ved mottak (RLB - Receive Load Balancing).

•	FEC*/LA/802.3ad: Statisk

•	 /LA/802.3ad: Statisk

•	IEEE 802.3ad: Dynamic%Third_party_disclaimerIEIEI

Feiltoleranse for kort

Funksjoner	• FailoverGir automatisk overflødighet for kortet. Hvis det primære kortet mislykkes, tar det sekundære over.
Nettverkskonfigurasjon	• Alle kortene må være koblet til samme bryter. • Spanningstre må være deaktivert. • Alle typer svitsjer støttes.

Feiltoleranse for bryter

Funksjoner	• FailoverOppretter et failover-forhold mellom to kort når kortene er koblet til forskjellige svitsjer.
Nettverkskonfigurasjon	• Hvert kort kobler til en separat bryter: • Spanningstre må være deaktivert.

Dynamisk belastningsfordeling (ALB)

Funksjoner	• Failover • Belastningsfordeling ved overføring • Belastningsfordeling ved mottak (RLB) for IP-trafikk (valgfritt)
Nettverkskonfigurasjon	• Alle kortene må være koblet til samme bryter. • Alle typer svitsjer støttes.

FEC/LA/802.3ad: Statisk

Funksjoner	• Failover • Belastningsfordeling ved overføring • Belastningsfordeling ved mottak
Nettverkskonfigurasjon	• Alle kort må kjøre ved 100 MB. • Alle kortene må være koblet til samme bryter. • Disse må brukes med en svitsj som kan behandle koblingssamling: • FEC-kompatible Cisco-svitsjer som bruker PAgP-protokollen • Intel Express®-svitsjer som støtter koblingssamling • Andre svitsjer som støtter statisk 802.3ad

GEC/LA/802.3ad: Statisk

Funksjoner	• Failover • Belastningsfordeling ved overføring • Belastningsfordeling ved mottak
Nettverkskonfigurasjon	• Alle kort må kjøre ved 1 000 MB. • Alle kortene må være koblet til samme bryter. • Disse må brukes med en svitsj som kan behandle koblingssamling: • GEC-kompatible Cisco-svitsjer som bruker PAgP-protokollen • Intel Express®-svitsjer som støtter koblingssamling • Andre svitsjer som støtter statisk 802.3ad

IEEE 802.3ad: Dynamisk

Funksjoner	• Failover • Belastningsfordeling ved overføring • Belastningsfordeling ved mottak
Nettverkskonfigurasjon	• Gruppemedlemmer kan operere ved ulike hastigheter • Alle kortene må være koblet til samme bryter. • Kontroller at svitsjen som er koblet til kortene, har full støtte for EEE 802.3ad-standarden.
Se også:

Om grupper


Diagnoseloggen
Konfigurere diagnoseloggen

Intel PROSet lagrer informasjon fra diagnosetestene og Sender/mottaker-testen i en diagnoselogg.

Slik konfigurerer du loggen:

1.	Åpne Registerredigering. Klikk Start > Kjør. I Åpne-boksen skriver du regedit.
Registerredigering åpnes.

2.	Naviger frem til registernøkkelen HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Endre registerparametrene.

Oppgave	Navn	Standardverdi	Mulige verdier
Aktivere eller deaktivere diagnoselogging	Aktiver	1: Aktiver	1: Aktiver 0: Deaktiver
Plassering for loggfil	FilePath	System32	Enhver gyldig bane på systemet
Angi om Intel PROSet skal beholde eller slette eksisterende informasjon i loggen	FileAppend	1: Aktiver	1: Legg til informasjon i eksisterende logg 0: Slett eksisterende informasjon hver gang brukere kjører analyser eller Sender/Mottaker-testen
Angir største filstørrelse for loggen i byte	MaxFileSize	36 kB	Antall byte med informasjon loggen kan inneholde.
4.	Lukk Registerredigering når du er ferdig å gjøre endringer i loggkonfigurasjonen.


Analyser Oversikt
Oversikt over analyser

Intel(R) PROSet II inneholder tre typer diagnosetester.

•	Diagnosetester  gir grunnleggende analyser av korttilstanden.  Under utføringen av grunnleggende diagnosetester, kontrollerer Intel PROSet om det finnes I/U-konflikter, minnefeil, EEPROM-operabilitet, sende- og mottaksfunksjonalitet og kobling.

•	Kabeltesten  gir informasjon om lengde, polaritet og andre egenskaper for kabelen.

•	Med Sender Mottaker-testen kan du analysere kortfunksjonaliteten på et nettverk. Denne testen er mer avansert og krever at to datamaskiner kjører.

Testresultatene vises i Intel PROSet. I tillegg lagrer Intel PROSet resultatene av analysetestene og Sender Mottaker-testen i en analyseloggfil. Se Innstille diagnoseloggen hvis du vil ha mer informasjon.


Kortspesifikasjoner

Kontroller	ID-nummer for kort	Produktnavn(Koblinger)	IntelDelnummer
82545EM	A92165-xxx	PRO/1000 MT Server-kort	PWLA8490MT
82546EB	A92165-xxx	PRO/1000 MT Dual Port Server-kort	PWLA8492MT
82545EM	A92165-xxx	PRO/1000 MT Server-kort	PWLA8490MF
82545EM	A92165-xxx	PRO/1000 MF Server-kort (LX)	PWLA8490LX
82546EB	A92165-xxx	PRO/1000 MT Dual Port Server-kort	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Server-kort	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 MT Server-kort	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI Server-kort	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 MT Server-kort	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 MT Server-kort	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit Server-kort	PWLA8490SX
82542	700262-xxx A38888-xxx	PRO/1000 MT Server-kort	PWLA8490
82562	A19716-xxx	PRO/100 MT Server-kort	CNLA6000
82550	A78921-xxx	PRO/100 MT Server-kort	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S Server (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port Server-kort	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management-kort (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100-kort	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI-kort (TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC Card (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC Card (TP)	MBLA1656
82559	748568-xxx	PRO/100 S Server (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S Server (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx 678400-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management-kort	PILA8900
82558	701738-xxx	PRO/100+ PCI Management-kort (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port Server-kort	PILA8472
82559	729757-xxx	PRO/100+ Server-kort (TP)	PILA8470B
82558	710550-xxx	PRO/100+ Server-kort (TP)	PILA8470


FEC
FEC* /LA/802.3ad: Statisk

Fast EtherChannel/koblingssamling-grupper øker gjennomstrømmingen ved hjelp av:

•	Kortkonfigurasjon Hvis du legger til medlemmer i en gruppe, kan du øke gjennomstrømmingen. Grupper kan bestå av opptil åtte kort. Hver server kan operere med opptil fire grupper.

•	Trafikkanalyse. ALB-programvaren analyserer kontinuerlig overførings- og mottaksbelastningen for hvert gruppemedlem, og fordeler deretter belastningen mellom kortene etter behov. Svitsjen fordeler belastningen av mottakstrafikken.

I tillegg tilbyr FEC-grupper feiltoleranse. Når det oppstår feil på et kort i gruppen, tar et sekundært kort automatisk over.

Koblingssamling-grupper er kompatible med følgende:

Korthastighet	Alle kortene må operere ved samme hastighet
Nettverkskonfigurasjon	• Alle kort må kjøre ved 100 MB. • Alle kortene må være koblet til samme bryter. • Disse må brukes med en svitsj som kan behandle koblingssamling: • FEC-kompatible Cisco-svitsjer som bruker PAgP-protokollen • Intel Express®-svitsjer som støtter koblingssamling • Andre svitsjer som støtter statisk 802.3ad
Protokoller	Alle

Se også:

Om gruppering

Gruppetyper


GEC
GEC* /LA/802.3ad: Statisk

Gigabit EtherChannel/koblingssamling-grupper øker gjennomstrømmingen med:

•	Kortkonfigurasjon Hvis du legger til medlemmer i en gruppe, kan du øke gjennomstrømmingen. Grupper kan bestå av opptil åtte kort. Hver server kan operere med opptil fire grupper.

•	Trafikkanalyse. ALB-programvaren analyserer kontinuerlig overførings- og mottaksbelastningen for hvert gruppemedlem, og fordeler deretter belastningen mellom kortene etter behov. Svitsjen fordeler belastningen av mottakstrafikken.

I tillegg tilbyr GEC-grupper feiltoleranse. Når det oppstår feil på et kort i gruppen, tar et sekundært kort automatisk over.

Koblingssamling-grupper er kompatible med følgende:

Korthastighet	Alle kortene må operere ved samme hastighet
Nettverkskonfigurasjon	• Alle kort må kjøre ved 100 MB. • Alle kortene må være koblet til samme bryter. • Disse må brukes med en svitsj som kan behandle koblingssamling: • GEC-kompatible Cisco-svitsjer som bruker PAgP-protokollen • Intel Express®-svitsjer som støtter koblingssamling • Andre svitsjer som støtter statisk 802.3ad
Protokoller	Alle

Se også:

Om gruppering

Gruppetyper


Deaktiver nettverkskortstrømstyringen

1. På Windows-skrivebordet høyreklikker du Min datamaskin

2. Klikk Egenskaper.

3. Klikk på kategorien Enhetsbehandling.

4. Dobbeltklikk på ikonet Nettverkskort.

5. Dobbeltklikk lntelnettverkskortet.

6. Dersom kategorien Strømstyring er synlig, skal du klikke på den og påse at avmerkingsboksen
La datamaskinen slå av denne enheten for å spare strøm
ikke er valgt.

7. Klikk OK. Nå kan du kjøre diagnostiseringen.

Etter å ha kjørt diagnostiseringen, kan det hende du vil gjenopprette Strømstyringsegenskapen ved å velge avmerkingsboksen i trinn 6 foran.