Copyright: Intel® PROSet Help Version 1013
Citation: Copyright © Intel Corporation 2003. All rights reserved.


Teste do cabo

O botão 'Testar cabo' aparece na guia 'Geral' quando o adaptador selecionado na Árvore dos componentes de rede for:

•	O adaptador de servidor ou de desktop Intel(R) PRO/100 S baseado no controlador 82550 e sem link com a rede ou

•	O adaptador Intel(R) PRO/1000

Para executar o teste de cabo nos adaptadores Intel PRO/100:

Na guia 'Geral', clique em Testar cabo. O teste pode demorar vários minutos.

Os resultados são mostrados na guia 'Solução de problemas'.

Para executar o teste de cabo nos adaptadores Intel PRO/1000:

Antes de executar o teste de cabo, verifique se o adaptador está funcionando a 1000 Mbps. Embora o teste possa ser feito com o adaptador funcionando a 100 Mbps, algumas informações podem não ser precisas ou podem não estar disponíveis.

Na guia 'Geral', clique em Testar cabo. O teste pode demorar vários minutos.

Os resultados aparecem na caixa de diálogo Resultados dos testes de cabo. Serão mostradas as seguintes informações:

Comprimento do cabo: Mostra o comprimento aproximado do cabo entre o adaptador e seu parceiro de link. Se o comprimento mostrado for diferente do comprimento real, o cabo pode estar quebrado. A precisão pode variar em até 10 m.

Polaridade: Identifica as propriedades +/- dos fios de par trançado, de envio e de recepção, em cabos Ethernet. Se estas propriedades não estiverem corretamente configuradas, o adaptador as corrigirá automaticamente e informará o erro.

Status do receptor local: Indica se o cabo conectado ao adaptador tem capacidade de transportar dados. Se o teste local falhar, verifique se o conector está quebrado ou com fiação incorreta.

Status do receptor remoto: Teste de operabilidade do conector do parceiro de link. Se o resultado do teste remoto for 'falha', verifique se o conector está quebrado ou com fiação incorreta.

Total de erros de recepção: Quando o conector detecta uma transmissão não reconhecida na rede, ocorre um erro de recepção.
O número de erros de recepção aumenta naturalmente quando o adaptador estabelece a comunicação com a rede, quando o cabo é conectado ao adaptador, quando o computador é reinicializado ou quando o adaptador é reinicializado após uma negociação automática. Se o número de erros de inatividade atingir cerca de 65.000 em cinco minutos, há um problema de qualidade do link. Para resolver problemas desse tipo, experimente reconectar o cabo ou usar outro cabo.

Total de erros de inatividade: Quando o conector recebe uma transmissão não reconhecida da rede, ocorre um erro de inatividade. Ao contrário dos erros de recepção, os erros de inatividade são detectados quando o adaptador não está recebendo pacotes ativamente.
Os erros de inatividade ocorrem naturalmente quando o adaptador estabelece a comunicação com a rede, quando o cabo é conectado ao adaptador, quando o computador é reinicializado ou quando o adaptador é reinicializado após uma negociação automática. Se o número de erros de inatividade atingir cerca de 255 em um minuto, há um problema de qualidade do link. Para resolver problemas desse tipo, experimente reconectar o cabo ou usar outro cabo.

Status MDI/MDI-X: Indica se o cabo conectado ao adaptador tem configuração direta (MDI) ou crossover (MDI-X). Use MDI se o sistema for conectado a um comutador ou a um hub, e MDI-X se você estiver conectando dois sistemas diretamente.

NOTA: As informações da caixa de diálogo 'Resultados dos testes de cabo' variam com o tipo de adaptador.


Informações legais

Copyright © 2002 Intel Corporation. Todos os direitos reservados.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR 97124-6497

Intel Corporation não assume nenhuma responsabilidade por erros ou omissões neste documento. A Intel tampouco compromete-se a atualizar as informações aqui contidas.

*Outros nomes e marcas podem ser reivindicadas como propriedades de outros.


Configurações avançadas dos adaptadores de servidor PRO/1000

As configurações mostradas na guia 'Avançadas' permitem que você personalize o modo como o adaptador trabalha com a rotulação QoS (Quality of Service), com descargas, com frames grandes e com outras capacidades. Alguns dos recursos a seguir podem não estar disponíveis dependendo do sistema operacional que você está usando e dos adaptadores instalados.

Configurações avançadas

Espaçamento adaptativo entre frames

Faz a compensação de colisões excessivas de pacotes Ethernet na rede.  Por padrão, esta configuração é definida em 0, o que desabilita o recurso.

A configuração recomendada (1) funciona melhor para a maioria dos computadores e redes pois se adapta dinamicamente às condições de tráfego da rede. O modo dinâmico só estará ativo quando o valor for 1. Porém, em alguns casos raros, você pode obter um desempenho melhor definindo manualmente o valor do espaçamento. O espaçamento força um intervalo entre os pacotes.

Quanto mais alto for o valor, maior será o atraso entre frames transmitidos.

Adaptadores suportados	Todos
Padrão	0: desabilitado
Faixa	0-255

Resposta adaptável do link

Aumenta a velocidade de inicialização do sistema pois deixa de executar as rotinas que exigem conectividade de rede quando o cabo estiver desconectado do adaptador. O tempo de inicialização do sistema é consideravelmente reduzido.

Quando a Resposta adaptativa de link está ativada nos controladores Ethernet e não há um cabo de rede conectado à porta RJ-45, a conexão de rede é desativada. Uma marca amarela de atenção aparecerá ao lado da conexão de rede no Gerenciador de dispositivos.

Para reativar a conexão de rede, conecte o cabo à porta RJ-45 e reinicialize o computador.

Adaptadores suportados	Não está disponível em todos os modelos de adaptadores.
Padrão	Desligada
Recomendado	Aceso
Faixa	Ativado, desativado
NOTA: O Adaptive Link Response (ALR) não funcionará quando um adaptador sem fio estiver ativo no sistema.

Buffers de coalescência

Otimizam o desempenho de transmissão personalizando o número de buffers de coalescência que permitem que o adaptador agrupe segmentos de dados antes de criar o pacote de transmissão.

O parâmetro 'buffers de coalescência' precisa estar configurado para funcionar com o parâmetro 'Descritores de transmissão'. O valor de buffers de coalescência deve ser 30 a 50 % do valor de descritores de transmissão. Se o parâmetro buffers de coalescência não for mudado para combinar com os descritores de transmissão, o desempenho de transmissão pode não melhorar.

O parâmetro buffers de coalescência aumenta significativamente o desempenho de transmissão em computadores Windows NT 4.0. Ele também aumenta o desempenho de transmissão em computadores Windows 98 e 2000.

Adaptadores suportados	Todos
Padrão	128
Faixa	16-768

Habilitar PME

Habilita ou desabilita as capacidades de ativação remota do adaptador em computadores que têm apenas implementações APM (Advanced Power Management). A ativação remota habilita o computador a sair do estado de espera ou do estado de desligado quando recebe certos tipos de pacote, como os pacotes ARP.

•	A desativação deste recurso desabilita todas as configurações de ativação remota em computadores que usam implementações mais antigas do gerenciamento de energia.

•	A habilitação deste recurso permite que o adaptador responda aos sinais de ativação remota. Para configurar o computador a responder a tipos específicos de pacote, veja as informações sobre ativação remota mais adiante neste tópico.

•	O valor de 'Hardware padrão' força o adaptador a configurar as capacidades de ativação remota com base no hardware do sistema.

•	O valor Nehuma ação habilita o adaptador a usar o sistema operacional padrão.

Se você quiser desativar as configurações de ativação remota, defina este recurso como desabilitado. Senão, defina este recurso com 'Nenhuma ação'.

Adaptadores suportados	adaptadores baseados no 82559 Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Desativado
Faixa	Ativado, desativado

Témindo da transmissão rápida

Libera os descritores de transmissão para serem usados novamente antes que os pacotes sejam enviados para a rede.

•	Com a configuração 'Execução da transmissão rápida' desativada, o adaptador precisa esperar até que os pacotes sejam enviados para reutilizar os descritores de transmissão.

•	Com a 'Execução da transmissão rápida' ativada, o adaptador reutiliza os descritores de transmissão mais cedo, obtendo um melhor desempenho de transmissão.

Adaptadores suportados	adaptadores baseados no 82543 e no 82544. Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Aceso
Faixa	Ativado, desativado
Controle de Fluxo

Habilita o adaptador a enviar ou receber frames de controle de fluxo. O caminho de transmissão é pausado pelo tempo especificado no frame de controle de fluxo de recepção. Estas configurações ajudam a fazer a sintonia fina do desempenho, impedindo a perda de pacotes.

Adaptadores suportados	adaptadores baseados no 82542, apenas para transmissão. adaptadores baseados no 82540, no 82543 e no 82544, para transmissão e recepção.  Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Enabled (Ativado)
Faixa	Desligado, Responder, Gerar, Gerar e Responder, Padrão de Hardware
Jumbo Frames

NOTA: Os frames grandes são suportados a 1000 Mbps apenas. O uso de frames grandes a 10 ou 100 Mbps pode resultar em menor desempenho ou na perda do link.

Ativa ou desativa a capacidade de frames grandes. Os frames grandes podem aumentar a velocidade de transmissão de dados e diminuir o uso da CPU pois colocam mais dados em cada frame, criando menos frames para enviar. O tamanho padrão de frames Ethernet é 1514 bytes, enquanto os frames grandes podem conter 4.088, 9.014 ou 16.128 bytes

Ative os frames grandes apenas se os dispositivos da rede os suportarem e estiverem configurados para usá-los no mesmo tamanho. Ao configurar os Jumbo Frames em outros dispositivos de rede, esteja atento para o fato de que cada dispositivo calcula o tamanho dos Jumbo Frames de forma diferente. Alguns dispositivos incluem as informações do cabeçalho no tamanho, e outros dispositivos, não. Os adaptadores Intel não incluem as informações de cabeçalho no tamanho do frame.

Para obter mais informações, consulte o tópico Frames grandes.

Adaptadores suportados	Todos
Padrão	Desativado
Faixa	Desativado (1514), 4088, 9014 e 16128 bytes. (Configure o comutador com 4 bytes a mais para CRC, mais 4 bytes se estiver usando VLANs.)  NOTA: Qualquer valor da faixa 1.514 a 16.128 pode ser definido no registro do Windows usando o parâmetro MaxFrameSize.
LAA (Locally Administered Address)

Este endereço se sobrepõe ao endereço MAC do adaptador. Para inserir um novo endereço de rede, digite um número hexadecimal de 12 dígitos na caixa 'Valor'.

Adaptadores suportados	Todos
Padrão	Não
Faixa	0000 0000 0001 - FFFF FFFF FFFD Exceções: • Não use como endereço de multidifusão (bit menos significativo do byte alto = 1).  • Não use apenas zeros nem apenas Fs. Configuração não presente: volta ao endereço de rede original do adaptador.
NOTA: Em um grupo, o Intel(R) PROSet II usa:

•	O LAA se o grupo tiver um configurado, ou

•	O endereço MAC permanente do adaptador primário se o grupo não tiver um LAA configurado

O Intel PROSet II não usa o LAA do adaptador se ele for o adaptador primário do grupo e se o grupo tiver um LAA.

Usuários do Windows 98SE:

Se você quiser usar o endereço padrão depois de usar um endereço atribuído manualmente, execute um destes procedimentos:

•	Na guia Avançado da caixa de diálogo Propriedades da rede, selecione Endereço administrado localmente e altere o valor para 0. Clique em OK para aplicar a configuração.

•	Em Intel PROSet II, clique na guia Avançado, depois clique em Restaurar padrão ou apague todos os caracteres do campo Valor. Clique em OK para aplicar a configuração.

Registrar Evento de estado de link

Esta configuração é usada para habilitar/desabilitar o registro das alterações do estado do link. Se ela estivar habilitada, um evento de ativação ou de desativação do link gerará uma mensagem que será mostrada no registrador de eventos do sistema. Os administradores podem ver a mensagem de evento no registrador de eventos do sistema.

Os eventos registrados são os seguintes:

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Adaptadores suportados	Todos
Padrão	Ativar
Faixa	Ativar, desativar
Descarga da soma de verificação TCP de recepção

Permite que o adaptador cheque a soma de verificação TCP ou UDP dos pacotes que chegam.

•	Com a descarga desativada, o sistema operacional checa a soma de verificação TCP.

•	Com a descarga ativada, o adaptador executa a verificação.

Este recurso melhora o desempenho de recepção e reduz o uso da CPU.

Sistemas operacionais suportados	• Windows XP* • Windows 2000 • O Windows NT 98 não suporta descargas.
Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	• Windows* XP: Aceso • Windows 2000 Desligada
Faixa	Ativado, desativado
Segmentação de descarga TCP

Permite que o adaptador faça a segmentação dos dados em frames Ethernet válidos.

•	Com a segmentação TCP desativada, o sistema operacional faz a segmentação dos dados antes de enviá-los para o adaptador para serem transmitidos.

•	Com a segmentação TCP ativada, o adaptador segmenta os dados em frames.

Como o adaptador faz a segmentação muito mais rapidamente que o sistema operacional, este recurso aumenta significativamente o desempenho de transmissão. Além disso, o adaptador consome menos recursos da CPU.

Sistemas operacionais suportados	Windows XP
Adaptadores suportados	todos baseados no 82544 Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	1
Faixa	0 = não anunciar este recurso; 1 = anunciar este recurso.
Descarga da soma de verificação IP de transmissão

Permite que o adaptador calcule a soma de verificação IP dos pacotes que saem.

•	Com a descarga desativada, o sistema operacional checa a soma de verificação IP.

•	Com a descarga ativada, o adaptador executa a verificação.

Este recurso melhora o desempenho de transmissão IP e reduz o uso da CPU.

Sistemas operacionais suportados	• Windows XP* • Windows 2000 • O Windows NT 98 não suporta descargas.
Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Aceso
Faixa	Ativado, desativado
Descarga da soma de verificação TCP de transmissão

Permite que o adaptador calcule a soma de verificação TCP ou UDP dos pacotes que saem.

•	Com a descarga desativada, o sistema operacional checa a soma de verificação TCP.

•	Com a descarga ativada, o adaptador executa a verificação.

Este recurso melhora o desempenho de transmissão de TCP e UDP e reduz o uso da CPU.

Sistemas operacionais suportados	• Windows XP* • Windows 2000 • O Windows NT 98 não suporta descargas.
Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Aceso
Faixa	Ativado, desativado NOTA: Desative esta opção se o servidor estiver suportando clientes baseados em DOS.
Rotulação de pacotes QoS

Permite que o adaptador envie e receba frames rotulados IEEE 802.3ac, que são:

•	rótulos 802.1pIEEE_802.1p QoS (Quality of Service) necessários aos pacotes com rotulação de prioridade e

•	rótulos 802.1Q necessários para VLANs.

O Intel PROSet II ativa automaticamente a rotulação 802.1p quando você configura uma VLAN.

Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Desligada
Faixa	Ativado, desativado
Descritores de recepção

Define o número de descritores de recepção, que são segmentos de dados que habilitam o adaptador a alocar pacotes recebidos na memória. Cada pacote recebido precisa de um descritor de recepção e cada descritor usa 2 kB de memória.

Você pode aumentar o número de descritores de recepção se notar uma diminuição significativa no desempenho do tráfego de recepção. Se o desempenho de recepção não for problema, use o valor padrão adequado ao adaptador.

Controlador do adaptador	Padrão	Faixa
82542	160	80 – 768
82543	160	80 – 256
82544	160	80 – 2048
Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.

Descritores de transmissão

Define o número de descritores de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais descritores de transmissão.

Você pode aumentar o número de descritores de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de descritores de transmissão possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não for problema, use o valor padrão, 256.

Controlador do adaptador	Padrão	Faixa
82542	256	80 – 768
82543	256	80 – 256
82544	256	80 – 2048
Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.

Ativar com mudança de link

Desperta o computador se a conexão de rede estabelecer um link quando o computador estiver em modo de espera. Você pode habilitar o recurso, desativá-lo ou deixar o sistema operacional usar o padrão.

Sistemas operacionais suportados	Windows 9x, Windows 2000, Windows XP
Faixa	Desabilitado, forçado, dependente do SO
Padrão	Desativado

Configurações de ativação remota

Estas configurações correspondem aos recursos que são ativados pelo sistema operacional ou pelo Intel(R) PROSet II. Os recursos funcionam de forma diferente ou não são suportados, dependendo da sua versão do Windows.

Estas versões do Windows suportam configurações de ativação remota: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP Edição de 64 bits e Windows XP Professional.

Configurações de ativação remota

Estas configurações correspondem aos recursos que são ativados pelo sistema operacional ou pelo Intel PROSet. Os recursos funcionam de forma diferente ou não são suportados, dependendo da sua versão do Windows.

Estas versões do Windows suportam configurações de ativação remota: Windows 2000, Windows XP de 64 bits, Windows XP Professional e Windows Server 2003. Este recurso não é suportado no Windows Server 2003 para sistemas baseados no Itanium(R) de 64 bits.

Configurações de ativação remota

Você pode usar o Intel PROSet para configurar a ativação remota no adaptador. Antes de selecionar as configurações de ativação remota, você precisa habilitar o sistema operacional a usar estas configurações. Para fazer isso, siga estas instruções.

Para habilitar os parâmetros de ativação.

1.	No Intel PROSet, clique na guia Avançadas.

2.	Na caixa de listagem Configurações, selecione Configurações de ativação remota.

3.	Na lista Valor, selecione a configuração adequada.

4.	Clique em OK ou em Aplicar.

5.	Para que o adaptador responda a estes tipos de pacotes de ativação remota, o sistema operacional precisa estar habilitado a usar as configurações de ativação remota. Para habilitar as configurações de ativação remota, vá para o 'Gerenciador de dispositivos' e ative a opção Este dispositivo pode ativar novamente o computador.

Parâmetro disponíveis

Estas são as configurações de ativação remota disponíveis no PROSet:

Parâmetro	Descrição
Desativado	O adaptador não usará os parâmetros Wake On.
Ativar com Magic Packet	Habilita o adaptador a ser ativado ao receber um Magic Packet. Magic Packet é um pacote que contém 16 cópias consecutivas do endereço Ethernet do adaptador de destino. Quando você configura este recurso, o Intel PROSet sobregrava o valor atribuído pelo sistema operacional.
Ativar com pacote dirigido	Habilita o adaptador a ser ativado quando ele recebe um Pacote dirigido, que é um pacote unicast enviado ao endereço MAC do adaptador.  The protocol must enable this wake up method in the driver. Deselecting this feature tells the driver to ignore any protocol request to enable this wake up method.
Wake on Magic e Directed Packets	Habilita o adaptador para ativar quando ele recebe um Magic Packet ou um Directed Packet.
Controlado por SO	Dá ao sistema operacional controle completo dos Parâmetros de ativação.

NOTA: Se o adaptador tiver vários endereços IP, o sistema operacional pode solicitar a ativação remota com padrões ARP para todos os endereços IP configurados. O adaptador só ativará quando os pacotes ARP consultares o primeiro endereço IP na lista.

NOTA: As configurações de ativação remota não incluem a capacidade de ativar um computador que está desligado (estado S5). Esse estado é controlado pelo parâmetro Habilitar PME, que também está disponível na Guia Avançado. Mesmo se os parâmetros de ativação estiverem desabilitados, a capacidade de ativar do S5 é determinada pelo parâmetro Habilitar PME.

Os parâmetros PME funcionarão enquanto o driver do adaptador estiver habilitado. Se o driver for desabilitado, o dispositivo reverterá para o padrão do hardware que pode ou não permitir ao computador ser ativado ou desligado.

Botão Restaurar o padrão

Este botão volta a configuração avançada selecionada para o seu valor padrão.  Veja as configurações acima para saber quais são seus valores padrão.  (Esta opção não está disponível para todas as configurações.)


Informações do driver
Driver de rede

Para ver os detalhes sobre o driver de um adaptador

1.	Na Árvore dos componentes de rede , clique no adaptador cujos detalhes você quer ver.

2.	Clique na guia Driver.

Aparecerão as seguintes informações.

Informações do driver:

Nome	Nome do driver carregado no momento.
Versão	Número da versão do driver. Útil durante o download de novas versões a partir do site de suporte da Intel: http://support.intel.com
Descrição	Nome do driver
Copyright	Assuntos legais
Estatísticas do driver:

NOTA: As estatísticas mostradas abaixo são zeradas quando o driver do adaptador é carregado ou atualizado.

Pacotes enviados	Número de pacotes enviados.
Pacotes recebidos	Número de pacotes recebidos.
Erros de envio	Número de pacotes enviados com erros.
Erros de recepção	Número de pacotes recebidos com erros.
NOTA: Para obter os drivers mais recentes, clique em Ajuda > Suporte no menu. Na página de suporte, clique em Obter os drivers mais recentes.


Diagnóstico
Testes de diagnóstico

Os testes de diagnóstico permitem que você analise o funcionamento geral do adaptador. Durante os testes de diagnósticos, o Intel PROSet II procura conflitos de E/S, problemas de memória, verifica a operação da EEPROM, a funcionalidade de transmissão e recepção e o link.

Os resultados aparecem na guia 'Diagnósticos', mas eles são também salvos em um registro do sistema .

NOTA:  Se o seu computador tiver o Windows 98, talvez precise desativar o adaptador Gerenciamento de energia antes de rodar o diagnóstico. Para mais detalhes, consulte Desativar o procedimento de Gerenciamento de energia.

Testes individuais

Nome do teste	Descrição	Informações de resolução de problemas
Registros de controle	Procura conflitos no endereço de E/S e testa a acessibilidade dos registros. Este teste abrange os registros gerais, os registros de recepção e os registros de transmissão. Ele não testa o registro de controle/dados da EEPROM.	Se o adaptador não passar no teste de registros de controle, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.
Registros de FIFO	Testa a memória FIFO no adaptador gravando e lendo padrões nessa memória.	Se o adaptador não passar no teste dos registros FIFO, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.
EEPROM	Verifica a integridade dos dados lidos da EEPROM. Este teste grava e lê dados na EEPROM e compara os resultados para verificar a consistência.	Se o adaptador não passar no teste da EEPROM, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.
Interrupção	Usa os registros de Interrupção para confirmar que todas as interrupções do adaptador funcionam.	Se o adaptador não passar nesse teste, altere a configuração de interrupções no BIOS. Se essa alteração não solucionar o problema, experimente mover o adaptador para outro slot.
Loopback	Testa a capacidade do adaptador de transmitir e receber enviando pacotes a si mesmo. Este teste usa ambos os modos loopback de MAC e loopback de transceptor. (Não disponível no adaptador Intel(R) PRO/1000 T.)	Se o adaptador não passar no teste de loopback, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.
Link	Confirma que o adaptador tem um link com um parceiro válido.	Se o adaptador não passar no teste de Link, verifique se o cabo está firmemente conectado tanto ao adaptador como a seu parceiro de link. Se o cabo estiver firme, experimente conectá-lo a outra porta do parceiro de link ou usar outro cabo.
NOTA: Se você clicar em Parar durante a execução dos testes, ocorrerá um pequeno atraso antes que os testes parem. Quando os testes de diagnósticos pararem, o botão OK se tornará disponível.

Outras configurações

Botão 'Avançado': Clique aqui para configurar um teste de emissor-respondedor na rede.

Advertência: O teste do Emissor/Respondedor não deve ser executado quando o sistema estiver no modo de espera, no modo suspenso ou se o cabo não estiver conectado ao computador.


Status e configuração do grupo
Configuração de grupo

Para ver os detalhes da configuração do grupo:

Na Árvore dos componentes de rede , clique no grupo cujos detalhes você quer ver.

Aparece a guia Configuração do grupo.

A caixa de status Adaptadores no grupo mostra o seguinte:

Adaptador

O nome de cada um dos adaptadores do grupo.

Prioridade

Mostra a prioridade do adaptador (se ela tiver sido definida). O adaptador pode ter o status de primário ou secundário.

Como definir um adaptador como primário ou secundário

A coluna Status mostra o seguinte:

•	Ativo: O adaptador está processando tráfego de rede.

•	No modo AFT, apenas um adaptador é ativo, o primário preferencial.

•	No modo Dinâmico 802.3ad, os adaptadores que formam o agregador ativo têm o status de Ativo.

•	Espera: Os grupos AFT, SFT Dinâmico 802.3ad suportam o modo de espera. Um adaptador no modo de espera tem link com a rede mas não está ativamente passando dados.

•	Desativado: O adaptador foi removido, desativado ou o respectivo driver não foi carregado. Além disso, se o cabo estiver com defeito ou se o link estiver inativo, o adaptador terá o status de inativo.

A seção Informações sobre o grupo mostra o seguinte:

•	Endereço Ethernet: É o endereço MAC primário do grupo.

•	Endereço IP: É o endereço IP do grupo.

•	Tipos de grupos: Mostra o modo do grupo.

Botão Testar a configuração do comutador

Para verificar se os parceiros de link suportam o modo de agrupamento escolhido, execute o teste da configuração do comutador. Por exemplo, se o adaptador for membro de um grupo de agregação de link, o Intel(R) PROSet pode verificar se os parceiros de link do adaptador suportam agregação de link.

Para obter informações específicas sobre os requisitos de cada modo de agrupamento, consulte Agrupamento de adaptadores .

Durante a execução do teste, o grupo perde temporariamente a conexão com a rede.

NOTA: Este teste não detecta erros em nenhuma das seguintes situações:

Configuração do adaptador	Configuração do comutador
Agrupado no modo de agregação de link sem VLANs.	O comutador: • Não pertence a nenhuma VLAN ou • Está configurado com VLANs rotuladas
Agrupado no modo de agregação de link com VLANs.	O comutador: • Não pertence à VLAN configurada no adaptador e • Não tem a agregação de link configurada.
Para executar o teste de configuração do comutador:

1.	Na Árvore dos componentes de rede , clique no grupo que você quer testar.
Para executar o teste, deve haver pelos dois adaptadores no grupo.

2.	Na guia Configuração do grupo, clique em Testar a configuração do adaptador.
Aparece o quadro de diálogo Teste de configuração do comutador.

3.	Para prosseguir com o teste, clique em Sim.
Se for detectado erros de configuração de grupo ou de parceiro de link aparecerá a Guia solução de problema.

NOTA:  Por causa do tempo necessário para testar o STP (Spanning Tree Protocol), o Intel PROSet II pode não indicar precisamente se o STP está ativado na rede. Verifique se os comutadores estão configurados com o STP:

•	Ativado para grupos SFT.

•	Desativado (portfast) para todos os outros modos de grupos.


VLAN
Visão geral sobre VLANs (Virtual Local Area Networks)

VLAN é um agrupamento lógico de rede que permite que você isole o tráfego de forma que os seus membros só recebam tráfego de outros membros da mesma VLAN. Com as VLANs, você pode reunir PCs em grupos lógicos de trabalho, uma opção crítica quando você tem clientes conectados a servidores geograficamente dispersos pelo edifício, campus ou pela rede corporativa.

Com o uso de VLANs na sua rede, você pode:

•	Limitar tempestades de difusão

•	Melhorar os processos de adição, movimentação e alterações de conexões de rede

•	Reduzir os problemas de segurança

•	Facilitar o gerenciamento

Tipos de VLANs

Existem VLANs baseadas em comutador, também chamadas de VLANs implícitas, e VLANs baseadas em rotulação, também chamadas de VLANs explícitas.

•	As VLANs implícitas se baseiam nas capacidades do comutador, como número de porta, endereço MAC e outras funções da camada 2. A VLAN padrão de muitos comutadores, inclusive a maioria dos produtos Cisco*, é a VLAN implícita. As VLANs implícitas só são configuradas no comutador. O comutador não altera nem rotula os pacotes para forçar a VLAN a ser implícita. Todos os adaptadores Intel podem participar de VLANs implícitas.

•	As VLANs explícitas se baseiam na adição de um rótulo de quatro bytes (802.3ac) aos cabeçalhos dos pacotes. As VLANs IEEE precisam ser configuradas na rede toda, inclusive no adaptador e em todos os parceiros de link.

Requisitos

As VLANs precisam de:

•	Comutadores com suporte para VLANs 802.1Q

•	Adaptadores com suporte para VLANs 802.1Q, que são:

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R) PRO/1000

•	Os adaptadores Intel(R) PRO/100B não suportam VLANs.

Para obter informações gerais sobre VLANs Intel, visite o site de rede da Intel:

  Visit Web site now

Para obter informações específicas, leia a publicação sobre VLANs:

  Read white paper from Web site

Consulte também:

Adicionar uma VLAN

Mudar as propriedades da VLAN

Remover uma VLAN

Configurações avançadas para VLANs


Suporte

Se você tiver uma conexão Internet e um browser, você pode visitar um dos sites de suporte da Intel.

Para suporte pela Internet:

1.	Clique em Suporte no menu Ajuda.

2.	Clique em um dos links do site.


Solução de problemas

A guia Solução de problemas aparece apenas quando o Intel PROSet II detecta um problema na configuração do adaptador, na instalação do driver ou algum outro erro. O PROSet II examina o problema e, na maioria dos casos, oferece uma possível solução.

Se você desconfiar que o adaptador tem algum problema, experimente uma ou mais das seguintes ações:

•	Veja as informações na guia Geral  para saber se existe um link ativo com a rede.

•	Se houver um grupo configurado, teste a configuração dos parceiros de link para verificar se eles suportam esse modo de grupo.

•	Execute o teste de diagnóstico.

•	Execute o Teste de cabo , se ele for suportado em seu adaptador.


Teste do Emissor Respondedor

O Teste do Emissor Respondedor testa o adaptador na rede.

Antes de executar este teste, verifique se o adaptador tem um link ativo com a rede.

Configurar o teste

Defina um computador como Emissor e outro como Respondedor. O Emissor transmite pacotes continuamente para o Respondedor, que devolve os pacotes para o Emissor.

Emissor
Envia pacotes continuamente para a rede. Selecione Iniciar para iniciar o envio de pacotes.
Antes de começar a enviar pacotes é necessário configurar um respondedor em algum lugar da rede. Vá para outro computador que tenha um adaptador Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S ou PRO/1000 e use o Intel(R) PROSet II para configurar este adaptador como Respondedor. Se possível, use o mesmo modelo de adaptador no Emissor e no Respondedor.

Respondedor
Devolve os pacotes para o Emissor (que envia os pacotes). Selecione Iniciar para definir este PC como respondedor.

Embora não tenha sido criado com esse propósito, este teste pode ser usado para testar o cabeamento do segmento de rede e a configuração de rede. Ao testar um novo segmento de LAN, defina um Respondedor em uma das extremidades, com o Emissor na outra.

Este teste verifica a conectividade entre dois adaptadores; ele não foi projetado para testar a velocidade. A velocidade na qual um adaptador envia ou recebe o tráfego de rede pode variar com a topologia e com a carga da rede. Para ver a velocidade configurada do adaptador, clique na guia Geral.

NOTA:  Se o comutador for Cisco* 6500 com o STP (Spanning Tree Protocol) ativado, o teste não produzirá resultados precisos. Para executar o teste do Emissor Respondedor com um comutador Cisco 6500, desative o STP.

Advertência: O teste do Emissor/Respondedor não deve ser executado quando o sistema estiver no modo de espera, no modo suspenso ou se o cabo não estiver conectado ao computador.


Nova VLAN

ID da VLAN: É o número atribuído à VLAN pelo administrador da rede. O ID da VLAN no adaptador precisa coincidir com o ID da VLAN no comutador. Faixa válida:  1 - 4094. (NOTA: os números de VLAN 0 e 1 são normalmente reservados. Consulte a documentação do comutador para obter detalhes.)

Nome da VLAN: Nome da VLAN. Por exemplo, Marketing ou Engenharia. O nome da VLAN é uma configuração opcional que permite que você identifique mais rapidamente as VLANs da rede. O nome da VLAN no adaptador não precisa ser igual ao nome da VLAN no comutador.


Identificar adaptador

O recurso Identificar adaptador o habilita a identificar fiisicamente o adaptador por trás do computador.

Por exemplo, se tiver dois adaptadores instalados, você pode selecionar um deles na Árvore dos componentes de rede e depois clicar no botão 'Identificar adaptador'. O LED na braçadeira do adaptador selecionado piscará.

Para verificar a posição do adaptador

1.	Clique em Identificar adaptador.

2.	Mova o deslizador para selecionar o número de segundos que o LED deve piscar. O valor padrão é 10 segundos.

3.	Clique em Iniciar.

O LED para o adaptador selecionado pisca durante o tempo especificado.


Tolerância a falhas de adaptadores

A tolerância a falhas é um grupo de dois ou mais adaptadores configurados para oferecer uma conexão backup de rede. No caso de falha do hub, da porta do comutador, do cabo ou do adaptador, o computador mantém um desempenho ininterrupto de rede.

Os grupos de tolerância a falhas têm um adaptador primário e um adaptador de backup ou secundário. Durante a operação norma, apenas o adaptador primário transmite o tráfego. Se o adaptador primário ou o seu link se tornarem inoperantes, o adaptador secundário assume automaticamente o controle.

O STP (Spanning Tree Protocol) precisa estar desativado se você estiver usando a tolerância a falhas.

Os grupos de tolerância a falhas são compatíveis com:

Tipo de adaptador	Exige que o adaptador de servidor Intel seja membro de um grupo.
Velocidade do adaptador	Pode ser mista, como um adaptador conectado a 100 Mbps e um funcionando a 1000 Mbps.
Configuração de rede	• Todos os adaptadores precisam estar conectados ao mesmo comutador. • O STP (Spanning Tree Protocol) precisa estar desativado.
Protocolos	Todos
Consulte também:

Sobre o Agrupamento de adaptadores

Tipos de grupos


ALB (Adaptive Load Balancing)

O ALB (Adaptive Load Balancing) é um tipo de grupo configurado para melhorar a taxa de transmissão e de recepção do servidor. Os grupos ALB equilibram automaticamente o tráfego de transmissão, mas o equilíbrio de carga de recepção pode ser ativado ou desativado.

Os grupos ALB aumentam a taxa de comunicação de dados usando:

•	Configuração do adaptador. Com a adição de membro a um grupo, você pode aumentar a velocidade de transmissão de dados.

•	Análise de tráfego. O software ALB analisa continuamente a carga de transmissão e de recepção de cada membro do grupo e a distribui entre os adaptadores, conforme a necessidade.

Tráfego de transmissão.

Em grupos ALB, todos os adaptadores fazem o equilíbrio de tráfego IP (IPv4 e IPv6) e de NCP IPX.

Tráfego de recepção

•	Em grupos ALB com a configuração 'Equilíbrio de carga de recepção' desativada, o adaptador primário recebe todo o tráfego.

•	Em grupos ALB com Equilíbrio de carga de recepção habilitado:

•	O adaptador primário recebe o tráfego usando qualquer protocolo

•	Active adapters with the highest speeds receive IPv4 traffic

Por exemplo, se o grupo ALB tiver três adaptadores, um adaptador Gigabit como adaptador primário e dois adaptadores Intel(R) PRO/100:

•	O adaptador gigabit recebe o tráfego não roteável e o tráfego IPv6 porque ele é o adaptador primário.

•	O adaptador gigabit recebe o tráfego IPv4 porque ele é o adaptador mais veloz.

•	Os adaptadores Intel PRO/100 não participam do equilíbrio de cargas de recepção.

Para obter informações sobre a ativação ou desativação do equilíbrio de cargas de recepção, consulte Configurações avançadas.

Além disso, os grupos ALB têm tolerância a falhas. Se o adaptador primário falhar, o grupo continua a funcionar e a distribuir o tráfego entre os membros remanescentes.

Os grupos ALB são compatíveis com:

Velocidade do adaptador	Pode ser mista, como um adaptador funcionando a 100 Mbps e um funcionando a 1000 Mbps.
Protocolos	IP, IPX (NCP) NOTA: A Microsoft classifica o suporte de IPv6 no Windows* 2000 como uma previsualização de tecnologia. Dessa forma, o suporte a IPv6 no Windows 2000 não se destina ao ambiente de produção. Para obter detalhes sobre o suporte do sistema operacional para IPv6, consulte a documentação do sistema.
Configuração de rede	Todos os adaptadores precisam estar conectados ao mesmo comutador.

Notas de desempenho sobre o adaptador de servidor gigabit Intel(R) PRO/1000

Uma vez que o adaptador Intel(R) PRO/1000 já suporta esta ampla largura de banda, o uso do recurso ALB pode causar uma redução de desempenho em alguns servidores. A razão é que muitos dos servidores disponíveis hoje não têm capacidades de CPU ou de barramento para trabalhar efetivamente com adaptadores gigabit agrupados. Para obter um melhor desempenho de ALB, use os servidores mais novos que suportam múltiplos barramentos PCI e múltiplos processadores Pentium II(R) trabalhando a velocidades de 400 MHz ou mais. Nesses servidores, instale os adaptadores Intel PRO/1000 agrupados em barramentos PCI separados para obter desempenho máximo.

Consulte também:

Sobre o Agrupamento de adaptadores

Tipos de grupos

Configurar os recursos avançados


IEEE 802.3ad: Dinâmico

802.3ad é uma norma IEEE sobre agregação de link. Assim como em grupos com agregação de link estático, os grupos que usam agregação de link dinâmica aumentam velocidade de processamento com:

•	Configuração do adaptador. Com a adição de membros a um grupo, a velocidade de processamento de dados pode aumentar. Os grupos podem ter até oito adaptadores. Cada servidor pode operar com até quatro grupos.

•	Análise de tráfego. O software analisa continuamente a carga de transmissão de cada membro do grupo e a distribui entre os adaptadores, conforme a necessidade. A carga do comutador equilibra o tráfego de recepção.

Além disso, os grupos 802.3ad têm tolerância a falhas. Nos grupos 802.3ad, o servidor usa um único endereço IP/MAC para se comunicar com a rede. Os dispositivos e clientes da rede, por sua vez, tratam o grupo que está no modo de agregação de link como um único computador. Quando um adaptador do grupo pára de funcionar, a rede vê o grupo como um computador com capacidades reduzidas.

Os grupos de agregação de link são compatíveis com:

Velocidade do adaptador	Todos os adaptadores precisam trabalhar à mesma velocidade.
Configuração de rede	• Verifique se o comutador conectado aos adaptadores suporta totalmente o padrão IEEE 802.3ad. • Consulte a documentação do comutador para saber sobre as dependências de porta. Alguns comutadores precisam de emparelhamento para iniciar em uma porta primária.  • Verifique as configurações de velocidade e modo duplex para garantir que o adaptador e o comutador estão trabalhando em full duplex, forçado ou negociado. O adaptador e o comutador precisam ter as mesmas configurações de velocidade e modo duplex. Os requisitos de full duplex são parte da especificação IEEE 802.3ad: http://standards.ieee.org/.  Se necessário, mude a configuração de velocidade ou de modo duplex antes  de conectar o adaptador ao comutador. Embora você possa mudar as configurações de velocidade e duplex após o grupo ser criado, a Intel recomenda que desconecte os cabos até que as configurações entrem em efeito. Em alguns casos, os comutadores ou servidores podem não reconhecer corretamente as configurações modificadas de velocidade ou duplex se elas forem mudadas quando havia um link ativo na rede. • Se você estiver configurando uma VLAN, consulte a documentação do comutador para saber sobre as notas de compatibilidade com a VLAN. Nem todos os comutadores suportam grupos dinâmicos 802.3ad e VLANs ao mesmo tempo. Se você optar por instalar VLANs, configure os parâmetros de agrupamento e de VLAN no adaptador antes  de conectar o adaptador ao comutador. A funcionalidade da VLAN será afetada se ela for instalada depois que o comutador tiver criado um agregador ativo. NOTA:  Adaptadores de cobre e de fibra não podem estar no mesmo agregador na configuração IEEE 802.3ad para alguns comutadores. Se o sistema tiver adaptadores de cobre e de fibra, o comutador pode configurar os de cobre em um agregador e os de fibra em outro. Se você tiver este problema, use apenas adaptadores de cobre ou de fibra no sistema.
Protocolos	Todos

Consulte também:

Sobre o Agrupamento de adaptadores

Tipos de grupos


Informações sobre o agrupamento de adaptadores
Agrupamento de adaptadores

Grupo é um conjunto de adaptadores configurados para aumentar a velocidade de processamento e a tolerância a falhas. O agrupamento de adaptadores é compatível com Windows* 2000, Windows NT* 4.0 e Windows XP.

Quais são os tipos de grupos?

Com o Intel(R) PROSet II você pode configurar os seguintes tipos de grupos:

•	SFT (Switch Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	ALB (Adaptive Load Balancing).

•	FEC* /LA/802.3ad: Estático

•	GEC*/LA/802.3ad: Static

•	IEEE 802.3ad: Dinâmico

Quantos adaptadores podem ser adicionados a um grupo?

Com exceção dos grupos SFT, dois a oito adaptadores por grupo. Os grupos SFT precisam ter exatamente dois adaptadores conectados a um único parceiro de link.

O grupo pode ter adaptadores de mais de um fornecedor?

Você pode criar grupos de qualquer tipo com adaptadores de vários fornecedores. Para criar um grupo de vários fornecedores, este grupo precisa ter pelo menos um adaptador Intel.

Os grupos com adaptadores de vários fornecedores são compatíveis com:

Tipo de adaptador	Consulte a Árvore dos componentes de rede para saber quais adaptadores são compatíveis.
Velocidade do adaptador	Verifique os requisitos do modo de agrupamento.
NOTA: Se os membros do grupo forem parte de uma VLAN, o Intel PROSet II não irá suportar agrupamentos de vários fornecedores.

Quantos grupos podem ser configurados em um único computador?

O número máximo de grupos em um computador depende da configuração de hardware e software desse computador.

Quais são os requisitos?

A configuração de rede e o tipo dos adaptadores instalados determinam os tipos de grupos que podem ser configurados no computador. Consulte o tópico Tipos de grupos para ter uma visão geral dos requisitos e capacidades dos agrupamentos.

Como os grupos são removidos?

Use o utilitário Intel PROSet II para remover grupos de adaptadores. A remoção ou desativação de grupos pelo 'Painel de controle' do sistema operacional pode afetar a estabilidade do sistema e a configuração do adaptador.

Para obter uma visão geral do agrupamento de adaptadores, visite o site da Intel(R) Networking:

  Visit Web site now

Para obter informações mais específicas sobre os objetivos de cada tipo de grupo, leia a publicação sobre a resolução de problemas de congestionamentos de servidor:

  Read white paper now

Consulte também:

Tipos de grupos


Detalhes do adaptador

Para ver os detalhes sobre um adaptador

1.	Na Árvore dos componentes de rede , clique no adaptador cujos detalhes você quer ver.

2.	Na guia Geral, clique em Detalhes.

Aparece a tela Detalhes.

NOTA: Nem todas as propriedades estão disponíveis em todos os modelos de adaptadores.

Endereço IP	Endereço IP que está sendo usado por este adaptador. NOTA: O Intel(R) PROSet II não mostra endereços IPv6.
Velocidade do barramento	Velocidade atual do barramento PCI (em MHz) que o adaptador está usando.
Largura do barramento	Largura de bits do barramento PCI (32 ou 64) que o adaptador está usando.
Controlador	Número ou modelo do adaptador.
Tipo de mídia	Tipo do conector (fibra ou cobre).
Endereço Ethernet permanente	Endereço do nó (MAC) do adaptador em hexadecimal. O endereço MAC é atribuído ao adaptador pelo fornecedor.
Endereço Ethernet atual	Endereço MAC atualmente usado pelo adaptador.  Se o adaptador for membro de um grupo ou se ele tiver um LAA (Locally Administered Address), o endereço Ethernet atual é diferente do endereço permanente desse adaptador.
Dispositivo PHY	Descrição do adaptador
Número de peça	O número Intel do adaptador.
Interrupção	Número de interrupção que o BIOS da PCI ou o sistema operacional atribuíram ao adaptador.
Endereço de memória	Endereço de memória que o BIOS da PCI ou o sistema operacional atribuíram ao adaptador.
Endereço de E/S	Endereço de E/S que o BIOS da PCI atribuiu ao adaptador.
Bus Slot	Número do barramento e ID do slot do adaptador.
Slot do sistema	Slots do sistema são subdivisões do slot do barramento. Por exemplo, se o slot do barramento for dividido em dois, existirão dois slots de sistema identificando cada uma das partes do slot do barramento.
Endereço do servidor DHCP	Endereço IP do servidor que forneceu o endereço IP deste adaptador.


Configurar os recursos avançados de agrupamento

Há diferentes configurações avançadas para cada tipo de grupo.

Para ver ou alterar as configurações avançadas do grupo

1.	Na Árvore dos componentes de rede clique em um grupo.

2.	Clique na guia Avançadas.

3.	Faça as alterações desejadas na configuração do grupo.

4.	Para restaurar os padrões, clique em Restaurar o padrão.

5.	Para efetivar as alterações, clique em OK.

As descrições das configurações avançadas e seus respectivos valores padrão são mostrados abaixo. Na maioria dos casos, é melhor manter o padrão.

Verificar tempo (segundos)

Freqüência com que o software verifica o status dos membros do grupo. Por exemplo, se o tempo de verificação for um segundo, o software verifica os membros do grupo a cada segundo para garantir que eles podem enviar e receber tráfego.

Padrão: 1 segundo

Faixa: 1 a 3 segundos

LinkAggrJoinMethod

Esta configuração avançada está disponível para agrupamentos de agregação de link. Com base na IEEE 802.3ad, um link pode ser dividido em vários outros links chamados agregadores. Porém, apenas um dos agregadores estará ativo. O parâmetro LinkAggrJoinMethod especifica o modo como o sistema seleciona o agregador ativo. Se você configurar LinkAggrJoinMethod em 'máxima largura de banda', o sistema selecionará o agregador que gera o maior tráfego. Se você configurar LinkAggrJoinMethod em 'número máximo de adaptadores', o sistema selecionará o agregador que tiver mais adaptadores.

Padrão: Máxima largura de banda

Faixa: Máxima largura de banda, Número máximo de adaptadores

Taxa de atualização do equilíbrio de carga

Período de tempo transcorrido antes que o software redefina ou atualize a carga atual entre os membros do grupo. Para obter máximo desempenho, mantenha esta configuração no valor padrão ou tão baixa quanto possível.

Padrão: A cada 10 períodos de verificação

Faixa: 1 a 50 períodos de verificação

O número de segundos especificado na configuração 'Tempo de verificação' é a unidade de medida da taxa de atualização.  Veja a configuração 'Tempo de verificação' para obter detalhes.

LAA (Locally Administered Addresses)

Se estiver usando WLBS (Windows NT Load Balancing Service), NLB ou outros drivers desta classe, você poderá personalizar o endereço MAC usado pelo grupo.

Para personalizar o endereço MAC, digite o novo endereço MAC para o grupo no campo LAA (Loacally Administered Address). O novo endereço precisa estar na faixa de:  0000 0000 0001 - FFFF FFFF FFFD.

Exceções:

o	Não use um endereço de multidifusão (bit menos significativo do byte alto = 1). Por exemplo, no endereço 0Y123456789A, "Y" não pode ser um número ímpar. (Y precisa ser 0, 2, 4, 6, 8, A, C ou E.)

o	Não use apenas zeros nem apenas Fs.

Para restaurar o endereço MAC padrão, apague o endereço do campo  LAA (Locally Administered Address) e clique em OK ou clique em Restaurar o padrão.

NOTA: O Intel(R) PROSet II usa:

•	O LAA se o grupo tiver um configurado, ou

•	O endereço MAC permanente do adaptador primário se o grupo não tiver um LAA configurado

Qualquer configuração LAA no adaptador primário é sobregravado pelo LAA do grupo se já houver um configurado.

Grupos STP e SFT: Se o adaptador primário (ativo) for mudado, o grupo será recarregado com o endereço MAC do novo adaptador primário. Da mesma forma, se o endereço LAA (Locally Administered Address) do grupo for alterado, o grupo será recarregado e terá um novo endereço MAC. Estas duas ações, se forem executadas em um grupo STF com o servidor ativo, provocarão a interrupção das comunicações do grupo até que todos os dispositivos da rede atualizem suas tabelas ARP com o endereço do novo adaptador primário. O tempo necessário para atualizar a tabela ARP é determinado pelo tempo de espera do cache ARP, que é um parâmetro disponível em alguns roteadores e sistemas operacionais. Dependendo deste parâmetro, o grupo poderá ficar indisponível por até 10 minutos.

NumRxPackets

Define o número de descritores de recepção, que são segmentos de dados que habilitam o adaptador a alocar pacotes recebidos na memória. Cada pacote recebido precisa de um descritor de recepção e cada descritor usa 2 kB de memória.

Você pode aumentar o número de descritores de recepção se notar uma diminuição significativa no desempenho do tráfego de recepção. Se o desempenho de recepção não  for problema, use o valor padrão.

Padrão: o padrão. Quando o valor padrão é usado, o Intel PROSet II calcula automaticamente o melhor valor para esta configuração com base na configuração do grupo e nas capacidades do hardware.

Recomendado: 250

Faixa: 16 a 512, em incrementos de 32

NumTxPackets

Define o número de descritores de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais descritores de transmissão.

Você pode aumentar o número de descritores de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de descritores de transmissão possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não  for problema, use o valor padrão.

Padrão:  o padrão. Quando o valor padrão é usado, o Intel PROSet II calcula automaticamente o melhor valor para esta configuração com base na configuração do grupo e nas capacidades do hardware.

Faixa: 16 a 512, em incrementos de 16

Equilíbrio de carga de recepção

Por padrão, grupos ALB (Adaptive Load Balancing) fazem o equilíbrio de todo o tráfego de transmissão. Além disso, você pode ativar ou desativar o equilíbrio de carga de recepção com esta configuração.

Se o equilíbrio de carga de recepção estiver desativado, o adaptador primário receberá todo o tráfego.

Se o equilíbrio de carga de recepção estiver ativado:

•	O adaptador primário recebe o tráfego não-IP

•	Os adaptadores ativos de velocidades mais altas recebem o tráfego IP

Por exemplo, se o grupo tiver três adaptadores, um adaptador Gigabit como adaptador primário e dois adaptadores Intel(R) PRO/100:

•	O adaptador gigabit recebe tráfego não-IP porque é o adaptador primário.

•	O adaptador gigabit recebe IP porque é o adaptador de maior velocidade.

•	Os adaptadores Intel(R) PRO/100 não participam do equilíbrio de cargas de recepção.

Padrão: Ativado após a configuração inicial; desativado se o grupo foi criado em um modo diferente e depois mudado para ALB (Adaptive Load Balancing).

Faixa: Ativado, Desativado

Botão 'Redefinir padrão'

Este botão volta a configuração avançada selecionada para o seu valor padrão.  Veja as configurações acima para saber quais são seus valores padrão.  (Esta opção não está disponível para todas as configurações.)

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Diagnóstico dos adaptadores PRO/100 e PRO/100+
Diagnósticos dos adaptadores Intel(R) PRO/100, PRO/100+ e PRO/100 S

NOTA: Se você clicar em Parar durante a execução dos testes, ocorrerá um pequeno atraso antes que os testes parem. Quando os testes de diagnósticos pararem, o botão OK se tornará disponível.

Diagnósticos básicos

Os testes de diagnósticos oferecem a flexibilidade de testar um ou vários itens.

NOTA:  Se o seu computador tiver o Windows 98, talvez precise desativar o adaptador Gerenciamento de energia antes de rodar o diagnóstico. Para mais detalhes, consulte Desativar o procedimento de Gerenciamento de energia.

Registros de controle

Testa os registros que o software usa para configurar e enviar comandos ao controlador 8255x.

Se o adaptador não passar no teste de registros de controle, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.

Controlador 8255X

Executa os testes integrados no controlador 8255x, confirmando que ele está funcionando corretamente.

Se o adaptador não passar no teste do controlador, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.

EEPROM

Lê o conteúdo da EEPROM e confirma que a soma de verificação está correta. Este teste usa o registro de controle/dados da EEPRM e, na verdade, testa o registro.

Se o adaptador não passar no teste da EEPROM, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.

Loopback

Testa a capacidade do adaptador de enviar e receber pacotes.

Se o adaptador não passar no teste de loopback, substitua-o e execute o teste novamente. Se o novo adaptador também não passar, isto pode indicar que a placa mãe ou outro dispositivo do barramento não está funcionando corretamente.

Link

Envia 1000 pacotes proprietários pela rede e depois recupera estes mesmos pacotes para testar a conexão de rede e a capacidade de envio e recebimento do adaptador.

Se o adaptador não passar no teste de Link, verifique se o cabo está firmemente conectado tanto ao adaptador como a seu parceiro de link. Se o cabo estiver firme, experimente conectá-lo a outra porta do parceiro de link ou usar outro cabo.


Configurações avançadas dos adaptadores PRO/100+
Configurações avançadas da família de adaptadores Intel(R) PRO/100

As configurações mostradas na guia Avançadas permitem que você personalize o modo como o adaptador trabalha com a rotulação QoS (Quality of Service), com descargas e outras capacidades. Alguns dos recursos avançados podem não estar disponíveis dependendo do sistema operacional que você está usando e dos adaptadores instalados.

Configurações avançadas

Espaçamento adaptativo entre frames

Faz a compensação de colisões excessivas de pacotes Ethernet na rede.  Por padrão, esta configuração é definida em 0, o que desabilita o recurso.

A configuração recomendada (1) funciona melhor para a maioria dos computadores e redes pois se adapta dinamicamente às condições de tráfego da rede. O modo dinâmico só estará ativo quando o valor for 1. Porém, em alguns casos raros, você pode obter um desempenho melhor definindo manualmente o valor do espaçamento. O espaçamento força um intervalo entre os pacotes.

Quanto mais alto for o valor, maior será o atraso entre frames transmitidos.

Adaptadores suportados	Todos
Padrão	0: desabilitado
Faixa	0-255

Resposta adaptável do link

Aumenta a velocidade de inicialização do sistema pois deixa de executar as rotinas que exigem conectividade de rede quando o cabo estiver desconectado do adaptador. O tempo de inicialização do sistema é consideravelmente reduzido.

Quando a Resposta adaptativa de link está ativada nos controladores Ethernet e não há um cabo de rede conectado à porta RJ-45, a conexão de rede é desativada. Uma marca amarela de atenção aparecerá ao lado da conexão de rede no Gerenciador de dispositivos.

Para reativar a conexão de rede, conecte o cabo à porta RJ-45 e reinicialize o computador.

Adaptadores suportados	Somente os produtos móveis (cardbus). Não está disponível em todos os modelos de adaptadores.
Padrão	Desligada
Recomendado	Aceso
Faixa	Ativado, desativado
NOTA: O Adaptive Link Response (ALR) não funcionará quando um adaptador sem fio estiver ativo no sistema.

Ajuste adaptativo de performance

Define o número de frames que o adaptador recebe antes de acionar uma interrupção. Sob operação normal, o adaptador gera uma interrupção sempre que um frame é recebido. A redução do número de interrupções melhora a utilização da CPU.

Mova a barra deslizante até a máxima largura de banda do adaptador para gerar uma interrupção por frame. Com isso, a largura de banda do adaptador aumenta mas a utilização da CPU também aumenta, o que pode tornar o computador mais lento. Mova a barra deslizante na direção da máxima utilização da CPU para aumentar o número de frames recebidos por interrupção gerada. A utilização da CPU melhora, mas a largura de banda do adaptador diminui. A configuração padrão funciona bem para a maioria dos computadores.

Adaptadores suportados	Todos

Tecnologia adaptativa

Habilita ou desabilita o micro código do driver do adaptador. O micro código otimiza o desempenho com base no ambiente do sistema operacional.

Para garantir o melhor desempenho possível, deixe a Tecnologia Adaptive habilitada.

Pode ser conveniente desabilitar a Tecnologia Adaptive quando você estiver resolvendo problemas de compatibilidade do adaptador.  Quando a Tecnologia Adaptive estiver desabilitada, os recursos 'Blocos de controle de transmissão' e 'Ajuste do desempenho da tecnologia Adaptive' também estarão.

Adaptadores suportados	Todos
Padrão	Aceso
Faixa	Ativado, desativado
Limiar adaptativo de transmissão

Especifica o número de bytes que o adaptador armazena no buffer de transmissão antes de enviar. Por exemplo, se o valor do limiar Adaptive de transmissão for 100, o adaptador armazena 100 bytes (800 bits) no buffer antes de enviar os dados.

•	Quando o valor do limiar Adaptive de transmissão é aumentado, o desempenho de transmissão diminui mas o número de déficits também pode diminuir.

•	Quando o limiar Adaptive de transmissão diminui, o desempenho de transmissão aumenta mas pode haver mais déficits. A diminuição deste valor habilita o adaptador a fazer transmissões precoces.

O adaptador usa o limiar de transmissão adaptável como um ponto de partida. Se o adaptador puder obter um desempenho melhor com um valor mais baixo, ele automaticamente usa um valor menor.

Para configurar o adaptador a transmitir em primeiro lugar frames Ethernet inteiros e depois fazer o ajuste para um desempenho melhor, defina este valor em 190. Se o desempenho de transmissão cair significativamente com esse valor, mude-o para 16 e aumente-o incrementalmente.

Adaptadores suportados	Todos
Padrão	200
Recomendado	• Se o computador tiver várias placas com masterização de barramento ou alta latência, defina este valor acima de 200. • Se o computador tiver uma única placa com masterização de barramento, defina o valor em 12.
Faixa	0-200

Conectividade básica: sem recursos

Mantem a conectividade de rede mesmo se o sistema não tiver recursos suficientes para executar todos os recursos avançados, como a Descarga do IPSec e Descarga de pacote grande. Os recursos avançados voltarão a funcionar somente quando o computador for reinicializado.

Para identificar problemas de recursos, consulte o registro do sistema. O registro do sistema mostra erros resultantes de recursos insuficientes.

Adaptadores suportados	Todos
Padrão	Enabled (Ativado)
Valor recomendado	Enabled (Ativado)
Faixa	Ativado, desativado
Buffers de coalescência

Otimizam o desempenho de transmissão personalizando o número de buffers de coalescência que permitem que o adaptador agrupe segmentos de dados antes de criar o pacote de transmissão.

O parâmetro 'buffers de coalescência' precisa estar configurado para funcionar com o parâmetro 'Descritores de transmissão'. O valor de buffers de coalescência deve ser 30 a 50 % do valor de descritores de transmissão. Se o parâmetro buffers de coalescência não for mudado para combinar com os descritores de transmissão, o desempenho de transmissão pode não melhorar.

O parâmetro buffers de coalescência aumenta significativamente o desempenho de transmissão em computadores Windows NT 4.0. Ele também aumenta o desempenho de transmissão em computadores Windows 98 e 2000.

Adaptadores suportados	Todos
Padrão	8
Valor recomendado	8
Faixa	1-32

Habilitar PME

Habilita ou desabilita as capacidades de ativação remota do adaptador em computadores que têm apenas implementações APM (Advanced Power Management). A ativação remota habilita o computador a sair do estado de espera ou do estado de desligado quando recebe certos tipos de pacote, como os pacotes ARP.

•	A desativação deste recurso desabilita todas as configurações de ativação remota em computadores que usam implementações mais antigas do gerenciamento de energia.

•	A habilitação deste recurso permite que o adaptador responda aos sinais de ativação remota. Para configurar o computador a responder a tipos específicos de pacote, veja as informações sobre ativação remota mais adiante neste tópico.

•	O valor de 'Hardware padrão' força o adaptador a configurar as capacidades de ativação remota com base no hardware do sistema.

•	O valor Nehuma ação habilita o adaptador a usar o sistema operacional padrão.

Se você quiser desativar as configurações de ativação remota, defina este recurso como desabilitado. Senão, defina este recurso com 'Nenhuma ação'.

Adaptadores suportados	adaptadores baseados no 82559 Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Desativado
Faixa	Ativado, desativado

Controle de Fluxo

Permite que os adaptadores controlem o tráfego com mais eficiência.

•	Os adaptadores geram frames de controle de fluxo quando a fila de recebimento atinge um limite predefinido. Os frames de controle de fluxo sinalizam o transmissor para diminuir a velocidade de transmissão.

•	Os adaptadores respondem aos frames de controle de fluxo pausando a transmissão de pacotes pelo tempo especificado no frame de controle de fluxo.

Com o ajuste da velocidade de transmissão dos adaptadores, o controle de fluxo ajuda a evitar a perda de pacotes.

NOTA: Para que os adaptadores possam usar os frames de controle de fluxo, os parceiros de link também precisam suportar este recurso.

Adaptadores suportados	adaptadores baseados no 82540 e no 82544, para transmissão e recepção. Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Gerar e responder a frames de controle de fluxo.
Faixa	Desligado, Responder, Gerar, Gerar e Responder, Padrão de Hardware

Link baseado em login

Habilita o recurso ALR (Adaptive Link Response). Com base no valor do parâmetro LinkBasedLoad, este recurso verifica o status do PhyLink e devolve o valor de Sucesso ou Falha.

Adaptadores suportados	Todos
Padrão	Desabilitado (0)
Faixa	Ativado, desativado

Velocidade de link e modo duplex

Configura os parâmetros de comunicação do adaptador.

Para funcionar com os parâmetros configurados, o parceiro de link precisa também suportar esses parâmetros. Por exemplo, se o adaptador estiver configurado para usar 100 Mbps/Full Duplex, o parceiro de link precisa também poder funcionar a 100 Mbps/Full Duplex. Da mesma forma, se o adaptador estiver configurado para usar detecção automática, o parceiro de link precisa suportar a negociação automática.

Adaptadores suportados	Todos os adaptadores Intel(R) PRO/100.
Padrão	Detecção automática
Valor recomendado	Detecção automática
Faixa	• Detecção automática - O adaptador negocia com seus parceiros de link para identificar configurações compatíveis de velocidade e modo duplex. • 10 Mbps/Half Duplex - O adaptador força a conexão a 10 Mbps e executa separadamente as operações de transmissão e recepção. Quando o adaptador está recebendo pacotes, ele não pode enviar pacotes. Quando estiver enviando pacotes, ele não pode recebê-los. • 10 Mbps/Full Duplex - O adaptador força a conexão a 10 Mbps e executa simultaneamente as operações de transmissão e recepção. Isto melhora o desempenho do adaptador. Selecione este modo apenas se você tiver um comutador full duplex. • 100 Mbps/Half Duplex - O adaptador força a conexão a 100 Mbps e executa separadamente as operações de transmissão e recepção. Quando o adaptador está recebendo pacotes, ele não pode enviar pacotes. Quando estiver enviando pacotes, ele não pode recebê-los. • 100 Mbps/Full Duplex - O adaptador força a conexão a 100 Mbps e executa simultaneamente as operações de transmissão e recepção. Isto melhora o desempenho do adaptador. Selecione este modo apenas se você tiver um comutador full duplex.

LAA (Locally Administered Addresses)

Este endereço se sobrepõe ao endereço MAC do adaptador. Para inserir um novo endereço de rede, digite um número hexadecimal de 12 dígitos na caixa 'Valor'.

Adaptadores suportados	Todos
Padrão	Não
Faixa	0000 0000 0001 - FFFF FFFF FFFD Exceções: • Não use como endereço de multidifusão (bit menos significativo do byte alto = 1).  • Não use apenas zeros nem apenas Fs.
NOTA: Em um grupo, o Intel(R) PROSet II usa:

•	O LAA se o grupo tiver um configurado, ou

•	O endereço MAC permanente do adaptador primário se o grupo não tiver um LAA configurado

O Intel PROSet II não usa o LAA do adaptador se ele for o adaptador primário do grupo e se o grupo tiver um LAA.

Usuários do Windows 98SE:

Se você quiser usar o endereço padrão depois de usar um endereço atribuído manualmente, execute um destes procedimentos:

•	Na guia Avançado da caixa de diálogo Propriedades da rede, selecione Endereço administrado localmente e altere o valor para 0. Clique em OK para aplicar a configuração.

•	Em Intel PROSet II, clique na guia Avançado, depois clique em Restaurar padrão ou apague todos os caracteres do campo Valor. Clique em OK para aplicar a configuração.

Registrar Evento de estado de link

Esta configuração é usada para habilitar/desabilitar o registro das alterações do estado do link. Se ela estivar habilitada, um evento de ativação ou de desativação do link gerará uma mensagem que será mostrada no registrador de eventos do sistema. Os administradores podem ver a mensagem de evento no registrador de eventos do sistema.

Os eventos registrados são os seguintes:

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Adaptadores suportados	Todos
Padrão	Ativar
Faixa	Ativar, desativar
Descarga

Grava os ciclos da CPU se estiver configurado para corresponder ao tipo de adaptador que você está usando

•	Se você estiver usando descarga de segurança com um adaptador Intel(R) PRO/100 S, use a configuração de Segurança IP.

•	Se não estiver usando descarga de segurança com um adaptador Intel(R) PRO/100 S, use a configuração de Checksum.

•	Para qualquer outro tipo de adaptador, use a configuração 'Nenhum'.

Adaptadores suportados	Todos
Sistemas operacionais suportados	Windows 98SE, Windows Me, Windows NT, Windows 2000, and Windows XP
Padrão	Intel PRO/100 S: Segurança IP Intel PRO/100 S sem segurança: Soma de verificação
Faixa	Nenhum, Segurança IP, Soma de verificação (dependendo do tipo de adaptador, algumas opções podem não estar disponíveis).
Para obter mais informações sobre a Segurança IP, veja o tópico Ativar o IPSec .

Eficiência de barramento PCI

Habilita o adaptador a usar o melhor método de transmissão de pacotes ou força a coalescência de pacotes o tempo todo.

•	Quando 'Eficiência do barramento PCI' estiver desabilitada, o adaptador usará o método de transmissão que garanta o melhor desempenho possível. Se a coalescência de pacotes oferecer o melhor desempenho de transmissão, o adaptador adota automaticamente esta configuração.

•	Quando 'Eficiência do barramento PCI' está habilitada, o adaptador força a coalescência de pacotes.

Defina 'Eficiência do barramento PCI' como desabilitada se houver problemas de desempenho de transmissão de pacotes. Se houver um número grande de déficits ou se o barramento PCI tiver problemas de desempenho, habilite esta configuração.

Adaptadores suportados	Todos
Padrão	Desativado
Faixa	Ativado, desativado

Definição do nível de prioridade

Configura o ponto de corte do nível de prioridade para pacotes rotulados QoS.

Se o computador tiver a rotulação de pacotes 802.1p/802.1Q (QoS) ativada, você poderá definir os níveis de prioridade (0-7) que as filas de prioridade usarão. Os adaptadores Intel têm duas filas de prioridade: alta e baixa. Por padrão, pacotes com valor de 0 a 3 são enviados pela fila de baixa prioridade e pacotes com valores de 4 a 7 são enviados pela fila de alta prioridade.

O número que você digita para a Definição do nível de prioridade é o ponto de corte entre as filas de alta e baixa prioridade. Por exemplo, se você digitar 6, os pacotes com prioridade de 0 a 5 são enviados pela fila de baixa prioridade e os pacotes com prioridade de 6 a 7 são enviados pela fila de alta prioridade.

Adaptadores suportados	Todos
Padrão	4 • Pacotes com prioridade de 0 a 3 são enviados pela fila de baixa prioridade.  • Pacotes com prioridade de 4 a 7 são enviados pela fila de alta prioridade.
Faixa	0-7

Rotulação de pacotes QoS (802.3ac)

Ativa ou desativa a rotulação IEEE 802.1p/802.1Q dos filtros de prioridade que você definiu com o Windows* 2000, XP ou com o Priority Packet . Você precisa definir esta opção em Ativado para que os filtros do Priority Packet funcionem corretamente.

Se você tiver atribuído filtros usando a rotulação 802.1p/Q mas esta configuração estiver desativada, os pacotes correspondentes ainda serão priorizados com o Intel HPQ (High Priority Queue) .

Adaptadores suportados	produtos baseados no 82550, 82558 e no 82559. Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Desativado
Faixa	Ativado, desativado
Buffers de recepção

Especifica o número de buffers usados pelo driver ao copiar dados na memória.

Em situações de cargas altas de rede, o aumento do número de buffers de recebimento pode melhorar o desempenho. A contrapartida é que a quantidade de memória do sistema usada pelo driver também aumenta. Em outros casos, a modificação deste valor pode degradar o desempenho do sistema.

Adaptadores suportados	Todos
Padrão	O padrão varia com os recursos selecionados.
Valor recomendado	• Adaptador único no Windows NT: 32 • Adaptador único no Windows 98, Windows Me, Windows 2000 e Windows XP: 48 • Adaptador de grupo: 250 • Com IPSec e/ou com múltiplos recursos: 350
Faixa	8-1024

Retransmitir espaçamento entre frames

Aumenta o atraso entre retransmissões de frames. Embora exista um algoritmo Ethernet incorporado que os adaptadores usam para retransmitir frames após colisões, o aumento do atraso pode melhorar o desempenho da rede se houver um número anormalmente grande de colisões.

Adaptadores suportados	Apenas alguns tipos de adaptadores suportam este recurso.
Padrão	6
Faixa	6-15

Associações de segurança

Especifica o número de associações de segurança simultâneas que podem ser descarregadas no coprocessador do adaptador. A associação de segurança é uma sessão de comunicação com outro computador que roda o Intel(R) Packet Protect ou outro software de segurança IP.

Se o computador tiver capacidade para suportar mais associações de segurança do que o padrão, aumente este valor. Note que o aumento do número de associações de segurança aumenta o consumo de memória do adaptador.

Adaptadores suportados	Intel(R) PRO/100 S
Padrão	Cliente: 64 Servidor. 1000
Faixa	1-5000

Desligamento inteligente de energia

Permite que o adaptador reduza o consumo de potência quando o cabo de LAN estiver desconectado. Quando o adaptador tiver novamente um link ativo, o consumo de energia aumenta até o valor normal de uso.

Adaptadores suportados	adaptadores móveis baseados no 82559 e mais recentes
Padrão	Enabled (Ativado)
Valor recomendado	Enabled (Ativado)
Faixa	Ativado, desativado
Detalhes da desativação inteligente

Blocos de controle de transmissão

Define o número de blocos de controle de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais blocos de controle de transmissão.

Você pode aumentar o número de blocos de controle de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de blocos de controle possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não for problema, use o valor padrão, 16.

Adaptadores suportados	Todos
Padrão	16 ou 32, dependendo dos requisitos do adaptador.
Faixa	8-64
Ativar com mudança de link

Desperta o computador se a conexão de rede estabelecer um link quando o computador estiver em modo de espera. Você pode habilitar o recurso, desativá-lo ou deixar o sistema operacional usar o padrão.

Sistemas operacionais suportados	Windows 9x, Windows 2000, Windows XP
Faixa	Desabilitado, forçado, dependente do SO
Padrão	Desativado
Configurações de ativação remota

Estas configurações correspondem aos recursos que são ativados pelo sistema operacional ou pelo Intel(R) PROSet II. Os recursos funcionam de forma diferente ou não são suportados, dependendo da sua versão do Windows.

•	Estas versões do Windows suportam configurações de ativação remota: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP Edição de 64 bits e Windows XP Professional.

•	Estas versões do Windows não suportam configurações de ativação remota:  Windows 98 versão de varejo e Windows NT 4.0.

NOTA: Apenas os adaptadores de servidor e de gerenciamento Intel(R) PRO/100+ e Intel(R) PRO/100 S suportam configurações de ativação remota.

Enabling Wake on Settings in the Operating System

Os seguintes tipos de pacotes de ativação remota exigem que o sistema operacional tenha as configurações de ativação remota habilitadas:

•	Ativar com ARP

•	Ativar com pacote dirigido

•	Ativar com NBT

Para que o adaptador responda a estes tipos de pacotes de ativação remota, o sistema operacional precisa estar habilitado a usar as configurações de ativação remota. Para habilitar as configurações de ativação remota, vá para o 'Gerenciador de dispositivos' e ative a opção Este dispositivo pode ativar novamente o computador. Para encontrar esta opção:

1.	Clique em Iniciar > Painel de controle.
A janela 'Painel de controle' aparecerá.

2.	Clique duas vezes em Sistema.
O quadro de diálogo 'Sistema' aparecerá.

3.	Clique na guia Hardware e pressione o botão Gerenciador de dispositivos.
É aberta a janela do Gerenciador de dispositivo.

4.	Clique duas vezes no adaptador cujas configurações de ativação remota você quer habilitar.
Aparece o quadro de diálogo Propriedades.

5.	Clique na guia Gerenciamento de energia.

6.	Clique em Este dispositivo pode ativar novamente o computador para habilitar as configurações de ativação remota do adaptador.

Para configurar os parâmetros de ativação.

1.	No Intel PROSet II, clique na guia Avançadas.

2.	Na caixa de listagem Configurações, selecione Configurações de ativação remota.

3.	Na lista Valor, selecione a configuração adequada.

4.	Clique em OK ou em Aplicar.

Parâmetro disponíveis

Estes parâmetros Wake On estão disponíveis no Intel PROSet II:

Parâmetro	Descrição
Desativado	O adaptador não usará os parâmetros Wake On.
Ativar com Magic Packet	Habilita o adaptador a ser ativado ao receber um Magic Packet. Magic Packet é um pacote que contém 16 cópias consecutivas do endereço Ethernet do adaptador de destino. Quando você configura este recurso, o Intel PROSet II sobregrava o valor atribuído pelo sistema operacional.
Ativar com pacote dirigido	Habilita o adaptador a ser ativado quando ele recebe um Pacote dirigido, que é um pacote unicast enviado ao endereço MAC do adaptador.  O protocolo precisa habilitar este modo de ativação no driver. Se você desselecionar este recurso, o driver vai ignorar as solicitações do protocolo para habilitar este modo de ativação.
Wake on Magic e Directed Packets	Habilita o adaptador para ativar quando ele recebe um Magic Packet ou um Directed Packet.
Controlado por SO	Dá ao sistema operacional controle completo dos Parâmetros de ativação.

NOTA: Se o adaptador tiver vários endereços IP, o sistema operacional pode solicitar a ativação remota com padrões ARP para todos os endereços IP configurados. O adaptador só ativará quando os pacotes ARP consultares o primeiro endereço IP na lista.

NOTA: As configurações de ativação remota não incluem a capacidade de ativar um computador que está desligado (estado S5). Esse estado é controlado pelo parâmetro Habilitar PME, que também está disponível na Guia Avançado. Mesmo se os parâmetros de ativação estiverem desabilitados, a capacidade de ativar do S5 é determinada pelo parâmetro Habilitar PME.

Os parâmetros PME funcionarão enquanto o driver do adaptador estiver habilitado. Se o driver for desabilitado, o dispositivo reverterá para o padrão do hardware que pode ou não permitir ao computador ser ativado ou desligado.

Consulte também:

Configurações avançadas de agrupamento


Visão geral do Priority Packet
Visão geral do Intel(R) Priority Packet

O Priority Packet Intel é um utilitário que permite que você defina filtros de prioridades para processar tráfego com prioridade alta antes do tráfego normal. Você pode usar o Intel Priority Packet para definir filtros que dão prioridade aos aplicativos mais importantes.

O Intel Priority Packet é um utilitário separado do Intel(R) PROSet II.

Requisitos

Sistemas operacionais suportados	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 ou mais recente
Adaptadores suportados	Família de adaptadores Intel(R) PRO/100 e PRO/1000
Para instalar o Priority Packet

1.	Insira o CD do adaptador na unidade de CD-ROM.
A tela de execução automática aparecerá.

2.	Feche a tela de execução automática do CD.

3.	Vá até a pasta WINDOWS/PRTPKT do Intel CD.

4.	Para instalar o Intel Priority Packet, clique duas vezes em setup.exe.

5.	Siga as instruções da tela para executar a instalação do Priority Packet.

Depois da instalação, você poderá abrir o utilitário clicando em Iniciar > Programas > Intel(R) Priority Packet II.

Atribuir prioridade ao tráfego da rede

O Intel Priority Packet permite que você configure filtros para enviar informações de aplicações ou nós críticos com uma prioridade indicada. Uma vez atribuídas prioridades ao tráfego no host ou no  ponto de entrada da rede, os dispositivos de rede podem tomar decisões de re-encaminhamento de dados com base nas informações de prioridade definidas no pacote.

O Intel Priority Packet atribui prioridade ao tráfego com base em filtros — parâmetros que você atribui aos pacotes de saída (transmissão). Usando o Assistente de filtro do Priority Packet, você pode configurar filtros personalizados ou predefinidos com base nos endereços (MAC) de nós, no tipo de Ethernet ou nas várias propriedades do protocolo e da porta. O Priority Packet oferece dois métodos de atribuição de prioridade ao tráfego: IEEE 802.1p tagging and Intel High Priority Queue.

Rotulação IEEE 802.1p

IEEE 802.1p é um padrão IEEE usado para definir níveis de prioridade usando a rotulação de pacotes . Os pacotes são rotulados com quatro (4) bytes adicionais que aumentam o tamanho do pacote e indicam o nível de prioridade. Quando estes pacotes rotulados são enviados, os de prioridade mais alta são transferidos primeiro. A rotulação de pacotes de prioridade (também conhecida como Traffic Class Expedition) permite que o adaptador interaja com outros elementos da rede (comutadores, roteadores) para entregar os pacotes com base no seu nível de prioridade. A rotulação 802.1p permite que você atribua níveis de prioridade específicos de 0 (baixo) até 7 (alto).

Após configurar o filtro de prioridade com o Windows* 2000, XP ou com o Intel Priority Packet, você precisa abrir o Intel PROSet II e ativar a Rotulação QoS na guia Avançadas.

NOTA: A rotulação IEEE 802.1p aumenta o tamanho do pacote ao qual ela é aplicada. Alguns hubs e comutadores não reconhecerão os pacotes maiores e eles serão ignorados. Verifique a documentação do seu hub ou comutador para confirmar se eles suportam 802.1p. Se esses dispositivos não suportarem o 802.1p ou se você não tiver certeza, use a HPQ (High Priority Queue - Fila de alta prioridade) para atribuir prioridade ao tráfego da rede.

Os requisitos para o uso eficiente da rotulação IEEE 802.1p são:

•	Todos os computadores que estão recebendo e roteando pacotes rotulados com 802.1p precisam suportar a rotulação 802.1p.

•	Os adaptadores instalados nos computadores que processarão os pacotes rotulados precisam suportar o padrão 802.1p. Todos os adaptadores Intel(R) PRO/1000, PRO/100+ e PRO/100 S suportam 802.1p. Os adaptadores Intel(R) PRO/100B não suportam 802.1p.

•	O(s) adaptador(es) não pode(m) ser atribuído(s) a um grupo de adaptadores.

•	Se estiver configurando VLANs e rotulação de pacotes no mesmo adaptador, a rotulação 802.1p/802.1Q precisa ser Ativada na guia Avançadas do Intel PROSet II.

•	As VLANs (802.1Q) e a priorização (802.1p) compartilham o rótulo 802.3ac. Os adaptadores Intel usam o rótulo 802.3ac quando VLANs e/ou a rotulação QoS estão configuradas.

•	Se o adaptador estiver configurado para VLANs, o comutador da VLAN precisa suportar o mesmo tipo de rotulação (802.3ac) que o adaptador.

•	Se o adaptador estiver configurado para priorização, alguns comutadores precisarão de uma VLAN não padrão para ativar a transmissão de rótulos.


Filtro

Parâmetro aplicado a um pacote de saída (de transmissão) para determinar se ele deve ser rotulado com IEEE 802.1p ou colocado na Fila de alta prioridade (HPQ).


Especificação IEEE 802.1p

Padrão IEEE para rotular pacotes com níveis diferentes de prioridades. Quando esses pacotes são enviados na rede, aqueles de prioridade mais alta são transferidos primeiro. A rotulação de pacotes de prioridade habilita o adaptador a trabalhar com outros dispositivos de rede para produzir melhor desempenho geral.

A rotulação IEEE 802.1p só é efetiva quando a infraestrutura de rede (inclusive comutadores e outros dispositivos de roteamento) a suportar. Se a infraestrutura de rede não suportar a rotulação IEEE 802.1p ou se você não souber se ela suporta ou não, priorize o tráfego usando a Fila de alta prioridade (HPQ).


Fila de alta prioridade

Fila de transmissão usada com o Intel(R) Priority Packet. A HPQ (High Priority Queue) processa os pacotes de alta prioridade.

Ela está disponível para os adaptadores Intel(R) PRO/100 com controladores baseados no 82558 ou mais recentes. Para obter informações sobre controladores, consulte a tabela de especificações dos adaptadores.

Para mais informações sobre HPQ, consulte a ajuda online sobre o Intel Priority Packet.


Rotulação

Adição de informações a um pacote. No caso do Priority Packet, a rotulação IEEE 802.1p significa a colocação de quatro bytes de informação adicionais para indicar a prioridade do pacote.


CardBus detectado

Instalação de adaptador único.

Se você estiver instalando um único adaptador Cardbus, clique no modelo que está sendo instalado.

NOTA: Se você já tiver um adaptador Cardbus II Intel(R) PRO/100 (apenas para LAN) instalado e estiver instalando um adaptador Cardbus II Intel(R) PRO/100 LAN+Modem56, você terá que:

1.	Remover os drivers do adaptador que é somente para LAN.

2.	Reinicie o computador.

3.	Reinstalar os drivers do adaptador LAN+Modem56.

Instalação de dois adaptadores

Se você estiver instalando dois adaptadores Cardbus e um deles ou os dois forem adaptadores Cardbus II Intel PRO/100 LAN+Modem56, clique em Cardbus II Intel(R) PRO/100 LAN+Modem56.

Se os dois adaptadores forem Cardbus II Intel PRO/100 (apenas para LAN), clique em Cardbus II Intel(R) PRO/100.

Adaptadores PCI

Se você estiver instalando um adaptador PCI (em uma estação de acoplamento, por exemplo), clique em Adaptador PCI Intel(R) PRO.


Recursos do Cardbus
Definir os recursos do Cardbus

Selecionar um conjunto de recursos disponíveis para o adaptador de rede e para o modem.

Para verificar se os recursos selecionados são compatíveis com o computador:

Abra o Intel(R) PROSet II clicando duas vezes no Intel PROSet II do Painel de controle.
O Intel PROSet II aparecerá.

•	Se não houver conflitos de recursos, a guia 'Geral' mostrará o status do adaptador.

•	Se houver conflito de recursos com outro dispositivo, o Intel PROSet II mostrará uma guia de solução de problemas com instruções. Siga estas instruções para escolher diferentes recursos.


Jumbo Frames

Os Jumbo Frames são maiores do que os frames Ethernet padrão. Os frames Ethernet são ~ 1,5k bytes e os Jumbo Frames têm até ~16k bytes. Quando os pacotes grandes forem a maioria do tráfego e latência adicional puder ser tolerada, os Jumbo Frames reduzem a utilização da CPU e melhorar a eficiência do conector.

OBSERVAÇÕES: Os frames grandes são suportados a 1000 Mbps apenas. O uso de frames grandes a 10 ou 100 Mbps pode resultar em menor desempenho ou na perda do link. Os frames grandes só são efetivos em pacotes TCP/IP.

Antes de começar

Verifique se:

•	Você tem um adaptador Intel(R) PRO/1000 funcionando a 1000 Mbps. Os adaptadores Intel(R) PRO/100 não suportam frames grandes.

•	O sistema operacional é Windows* 2000, Windows NT* ou Windows XP.

•	Os dispositivos de rede suportam os Jumbo Frames. Ao configurar os Jumbo Frames em outros dispositivos de rede, esteja atento para o fato de que cada dispositivo calcula o tamanho dos Jumbo Frames de forma diferente. Alguns dispositivos incluem as informações do cabeçalho no tamanho, e outros dispositivos, não.

Configurar Jumbo Frames

•	Para configurar o tamanho de um pacote rotineiramente disponível, use o Intel(R) PROSet II.

•	Para configurar qualquer outro tamanho de pacote, digite o valor no registro.

Para configurar frames grandes no Intel(R) PROSet II

A configuração de frames grandes é um processo de três etapas.

Etapa 1: Configurar o adaptador para suportar frames grandes:

1.	Abra o Intel(R) PROSet II.

2.	Na Árvore dos componentes de rede, clique no adaptador para o qual você quer configurar frames grandes.

3.	Clique na guia Avançadas.

4.	Na lista Configuração, clique em Frames grandes.

5.	Na caixa Valor, clique num tamanho de pacote.

O adaptador está agora configurado para suportar Jumbo Frames.

Etapa 2: Configure os comutadores da rede para suportar Jumbo Frames. Consulte a documentação do comutador para obter detalhes.

Etapa 3: Configure os servidores para suportar Jumbo Frames. Consulte a documentação do servidor para obter detalhes.

Configurar os frames grandes usando o registro

A configuração de frames grandes é um processo de três etapas.

Etapa 1: Configurar o adaptador para suportar frames grandes:

1.	Abra o Editor de registro. Clique em Iniciar > Executar. Na caixa Abrir, digite regedit.
O Editor de registro abre.

2.	Vá até a chave MaxFrameSize.

3.	Digite um valor entre 1415 e 16128 para o tamanho do frame.

O adaptador está agora configurado para suportar Jumbo Frames.

Etapa 2: Configure os comutadores da rede para suportar Jumbo Frames. Consulte a documentação do comutador para obter detalhes.

Etapa 3: Configure os servidores para suportar Jumbo Frames. Consulte a documentação do servidor para obter detalhes.


Adaptadores MiniPCI

Os adaptadores MiniPC trabalham com computadores móveis específicos que suportam o fator de forma MiniPC. Esses adaptadores suportam o mesmo conjunto de recursos que os adaptadores clientes descritos neste arquivo de ajuda. Alguns adaptadores MiniPC têm também hardware de modem integrado.

Se o produto incluir um modem, consulte a documentação que acompanha o seu computador para ver as informações sobre a configuração do modem.

Consulte também:

Configurações avançadas dos adaptadores Intel(R) PRO/100+


Configurações avançadas dos adaptadores PRO/10+
Configurações avançadas dos adaptadores Intel(R) PRO/10 e PRO/10+

As configurações mostradas na guia Avançadas permitem que você personalize o modo como o adaptador trabalha com mudanças de link, com descargas e outras capacidades. Alguns dos recursos a seguir podem não estar disponíveis dependendo do sistema operacional que você está usando e dos adaptadores instalados.

Configurações avançadas

Espaçamento adaptativo entre frames

Faz a compensação de colisões excessivas de pacotes Ethernet na rede. Por padrão, esta configuração é definida em 0, o que desabilita o recurso. A configuração recomendada (1) funciona melhor para a maioria dos computadores pois se adapta dinamicamente às condições de tráfego da rede. O modo dinâmico só estará ativo quando o valor for 1. Porém, em alguns casos raros, você pode obter um desempenho melhor definindo manualmente o valor do espaçamento. O espaçamento força um intervalo entre os pacotes.

Quanto mais alto for o valor, maior será o atraso entre frames transmitidos.

Adaptadores suportados	Todos
Padrão	1
Faixa	0-255

Tecnologia adaptativa

Habilita ou desabilita o micro código do driver do adaptador. O micro código otimiza o desempenho com base no ambiente do sistema operacional.

Para garantir o melhor desempenho possível, deixe a Tecnologia Adaptive habilitada.

Pode ser conveniente desabilitar a Tecnologia Adaptive quando você estiver resolvendo problemas de compatibilidade do adaptador.  Quando a Tecnologia Adaptive estiver desabilitada, os recursos 'Blocos de controle de transmissão' e 'Ajuste do desempenho da tecnologia Adaptive' também estarão.

Adaptadores suportados	Todos
Padrão	Aceso
Faixa	Ativado, desativado
Limiar adaptativo de transmissão

Especifica o número de bytes que o adaptador armazena no buffer de transmissão antes de enviar. Por exemplo, se o valor do limiar Adaptive de transmissão for 100, o adaptador armazena 100 bytes (800 bits) no buffer antes de enviar os dados.

•	Quando o valor do limiar Adaptive de transmissão é aumentado, o desempenho de transmissão diminui mas o número de déficits também pode diminuir.

•	Quando o limiar Adaptive de transmissão diminui, o desempenho de transmissão aumenta mas pode haver mais déficits. A diminuição deste valor habilita o adaptador a fazer transmissões precoces.

O adaptador usa o limiar de transmissão adaptável como um ponto de partida. Se o adaptador puder obter um desempenho melhor com um valor mais baixo, ele automaticamente usa um valor menor.

Para configurar o adaptador a transmitir em primeiro lugar frames Ethernet inteiros e depois fazer o ajuste para um desempenho melhor, defina este valor em 190. Se o desempenho de transmissão cair significativamente com esse valor, mude-o para 16 e aumente-o incrementalmente.

Adaptadores suportados	Todos
Padrão	12
Recomendado	• Se o computador tiver várias placas com masterização de barramento ou alta latência, defina este valor acima de 200. • Se o computador tiver uma única placa com masterização de barramento, defina o valor em 12.
Faixa	0-200

Conectividade básica: sem recursos

Mantém a conectividade de rede, mesmo se o sistema não tiver recursos suficientes para executar todas as configurações avançadas. Configurações como 'Descarga do IPSec' e 'Descarga de pacote grande' só voltam a funcionar quando há recursos suficientes. Os erros resultantes de insuficiência de recursos são descritos no registro do sistema.

Adaptadores suportados	Todos
Padrão	Desligada
Valor recomendado	Aceso
Faixa	Ativado, desativado
Buffers de coalescência

Otimizam o desempenho de transmissão personalizando o número de buffers de coalescência que permitem que o adaptador agrupe segmentos de dados antes de criar o pacote de transmissão.

O parâmetro 'buffers de coalescência' precisa estar configurado para funcionar com o parâmetro 'Descritores de transmissão'. O valor de buffers de coalescência deve ser 30 a 50 % do valor de descritores de transmissão. Se o parâmetro buffers de coalescência não for mudado para combinar com os descritores de transmissão, o desempenho de transmissão pode não melhorar.

O parâmetro buffers de coalescência aumenta significativamente o desempenho de transmissão em computadores Windows NT 4.0. Ele também aumenta o desempenho de transmissão em computadores Windows 98 e 2000.

Adaptadores suportados	Todos
Padrão	8
Valor recomendado	8
Faixa	1-32
Recepção de controle de fluxo

Habilita o adaptador a receber frames de controle de fluxo full duplex interrompendo temporariamente o caminho de transmissão. O caminho de transmissão é pausado pelo tempo especificado no frame de controle de fluxo de recepção. Estas configurações ajudam a fazer a sintonia fina do desempenho, impedindo a perda de pacotes.

Adaptadores suportados	Este recurso pode não estar disponível para todos os adaptadores.
Padrão	Desativado
Faixa	Ativado, desativado

Link baseado em login

Habilita o recurso ALR (Adaptive Link Response). Com base no valor do parâmetro LinkBasedLoad, este recurso verifica o status do PhyLink e devolve o valor de Sucesso ou Falha.

Adaptadores suportados	Todos
Padrão	Desativado
Faixa	Ativado, desativado

Velocidade de link e modo duplex

Configura os parâmetros de link do adaptador Intel(R) PRO/10+.

Adaptadores suportados	Todos
Padrão	Detecção automática
Valor recomendado	Detecção automática
Faixa	• Detecção automática - O adaptador negocia com o comutador o modo como os pacotes são enviados/recebidos (tanto em full como em half duplex).  NOTA:  Você precisa ter um comutador com capacidade de negociação automática para obter suporte de full duplex com a opção 'Velocidade do link e modo duplex' definida em 'negociação automática'. • 10Mbps/Half Duplex - O adaptador funciona a 10 Mbps e executa uma operação por vez. Ele envia ou recebe. • 10Mbps/Full Duplex - O adaptador funciona a 10 Mbps e pode enviar e receber pacotes ao mesmo tempo. Isto melhora o desempenho do adaptador. Selecione este modo apenas se você tiver um comutador full duplex.

LAA (Locally Administered Address)

Este endereço se sobrepõe ao endereço MAC do adaptador. Para inserir um novo endereço de rede, digite um número hexadecimal de 12 dígitos nesta caixa.

Adaptadores suportados	Todos
Padrão	Não
Faixa	0000 0000 0001 - FFFF FFFF FFFD Exceções: • Não use como endereço de multidifusão (bit menos significativo do byte alto = 1).  • Não use apenas zeros nem apenas Fs.

Eficiência de barramento PCI

Habilita o adaptador a usar o melhor método de transmissão de pacotes ou força a coalescência de pacotes o tempo todo.

•	Quando 'Eficiência do barramento PCI' estiver desabilitada, o adaptador usará o método de transmissão que garanta o melhor desempenho possível. Se a coalescência de pacotes oferecer o melhor desempenho de transmissão, o adaptador adota automaticamente esta configuração.

•	Quando 'Eficiência do barramento PCI' está habilitada, o adaptador força a coalescência de pacotes.

Defina 'Eficiência do barramento PCI' como desabilitada se houver problemas de desempenho de transmissão de pacotes. Se houver um número grande de déficits ou se o barramento PCI tiver problemas de desempenho, habilite esta configuração.

Adaptadores suportados	Todos
Padrão	Desativado
Faixa	Ativado, desativado

Definição do nível de prioridade

Define o ponto de corte do nível de prioridade para pacotes rotulados QoS.

Se o computador tiver a rotulação de pacotes 802.1p/802.1Q (QoS) ativada, você poderá definir os níveis de prioridade (0-7) que as filas de prioridade usarão. Os adaptadores Intel têm duas filas de prioridade: alta e baixa. Por padrão, pacotes com valor de 0 a 3 são enviados pela fila de baixa prioridade e pacotes com valores de 4 a 7 são enviados pela fila de alta prioridade.

O número que você digita para a Definição do nível de prioridade é o ponto de corte entre as filas de alta e baixa prioridade. Por exemplo, se você digitar 6, os pacotes com prioridade de 0 a 5 são enviados pela fila de baixa prioridade e os pacotes com prioridade de 6 a 7 são enviados pela fila de alta prioridade.

Adaptadores suportados	Todos
Padrão	4 • Pacotes com prioridade de 0 a 3 são enviados pela fila de baixa prioridade.  • Pacotes com prioridade de 4 a 7 são enviados pela fila de alta prioridade.
Faixa	0-7

Buffers de recepção

Especifica o número de buffers usados pelo driver ao copiar dados na memória do protocolo.

Em situações de cargas altas de rede, o aumento do número de buffers de recebimento pode melhorar o desempenho. A contrapartida é que a quantidade de memória do sistema usada pelo driver também aumenta. Em outros casos, a modificação deste valor pode degradar o desempenho do sistema.

Adaptadores suportados	Todos
Padrão	48
Valor recomendado	• Adaptador único no Windows 98, Windows Me, Windows 2000 e Windows XP: 48 • Adaptador único no Windows NT: 32 • Adaptador de grupo: 250
Faixa	8-1024

Retransmitir espaçamento entre frames

Aumenta o atraso entre retransmissões de frames. Embora exista um algoritmo Ethernet incorporado que os adaptadores usam para retransmitir frames após colisões, o aumento do atraso pode melhorar o desempenho da rede se houver um número anormalmente grande de colisões.

Adaptadores suportados	Todos
Padrão	10
Faixa	6-15

Blocos de controle de transmissão

Define o número de blocos de controle de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais blocos de controle de transmissão.

Você pode aumentar o número de blocos de controle de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de blocos de controle possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não  for problema, use o valor recomendado de 16.

Adaptadores suportados	Todos
Padrão	32
Valor recomendado	16
Faixa	8-64


Configuração de link PRO/1000
Configuração de link do Intel(R) PRO/1000 (apenas para modelos de cobre)

AVISO:  Em quase todos os casos, você deve deixar a negociação automática ativada. Se a negociação automática for destivada, verifique se os parâmetros de parceiro de link correspondem aos parâmetros do adaptador. O adaptador não funcionará a 1000 Mbps com a negociação automática desativada.

Para definir velocidade e duplex

1.	Na guia 'Configuração do link', clique em Ativado ou em Desativado para modificar a configuração de negociação automática.

•	Com a negociação automática ativada, o adaptador negocia a velocidade e o duplex com o parceiro de link.

•	Com a negociação automática desativada, o adaptador é forçado a usar o parâmetro de velocidade e duplex especificados.  Ao desativar a negociação automática, verifique se o parceiro de link pode operar na velocidade e duplex especificados. Se o parceiro de link não puder funcionar na configuração forçada do adaptador, a comunicação não poderá ser estabelecida entre o adaptador e o parceiro.

2.	Se a negociação automática for ativada, selecione os parâmetros de velocidade e duplex divulgado para o parceiro de link durante a negociação. Como padrão, todos os parâmetros são divulgados. Os parâmetros possíveis incluem:

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

•	1000 Mbps FULL

NOTA: De acordo com as especificações IEEE, a operação em 1000-base T não pode ser forçada.  Entretanto, você pode configurar o adaptador para operar apenas em 1000 Mbps selecionando a negociação automática e, em seguida, selecionando apenas 1000 Mbps Full na seção de parâmetros divulgados.

3.	Se a negociação automática estiver desativada, force a velocidade e modo duplex clicando em uma das seguintes configurações:

•	10 Mbps HALF

•	10 Mbps FULL

•	100 Mbps HALF

•	100 Mbps FULL

Para garantir a comunicação, verifique se o parceiro do link suporta a configuração forçada.

4.	Clique em OK.

5.	Se for solicitado, reinicialize o computador.

A velocidade e modo duplex estão, agora, configurados para o adaptador.


Parceiro de link

Dispositivo ao qual o adaptador se conecta, por exemplo, outro adaptador, um hub, um comutador, etc.


Tela da Árvore de componentes de rede
Árvore de componentes de rede

A Árvore dos componentes de rede aparece no painel esquerdo do Intel(R) PROSet II. Clique nos adaptadores, nas VLANs ou nos grupos para ver os detalhes sobre o componente.


Boot Agent

Esta guia permite que você veja as configurações que controlam o comportamento do software Boot Agent. Algumas configurações são passíveis de serem alteradas na caixa de seleção 'Configuração'. Você pode também usar esta guia para atualizar a ROM flash com uma imagem do Boot Agent se o administrador da rede tiver habilitado este recurso.

Para obter descrições detalhadas sobre cada uma das configurações, consulte:

•	Network Boot Protocol

•	Boot Order

•	Setup Menu Wait Time

•	Show Setup Prompt

•	Legacy OS Wakeup Support

Para obter instruções sobre a alteração dessas configurações, consulte o Guia do usuário do Intel Boot Agent.

OBSERVAÇÕES:

Se você não conseguir alterar a configuração, seu adaptador ou sistema podem não ativar esta configuração.

As informações mostradas neste arquivo de ajuda só são válidas para a versão PXE 2.0 de 16 bits do Boot Agent. A maioria das opções de configuração descritas aqui não são usadas em ambientes EFI.

Botão 'Atualizar o Boot Agent'

Use este botão para instalar ou atualizar o software Intel Boot Agent software.

OBSERVAÇÕES:

A operação de atualização do Boot Agent grava uma nova imagem do Boot Agent na memória flash, que poderá desativar temporariamente a operação do driver do dispositivo de rede no Windows*. Você pode precisar reinicializar o computador após esta operação.

Se for necessária a instalação em DOS, consulte 'Instalação e atualização em ambientes DOS' no Guia do usuário do Intel®  Boot Agent.

Para instalar ou atualizar o software Boot Agent

NOTA: Ao fazer o download do arquivo de imagens da memória flash a partir do site da Intel na web, salve-o em um diretório temporário ou em um local onde ele possa ser facilmente localizado para executar este procedimento.

1.	No menu Iniciar do Windows, clique em Configurações e depois em Painel de controle.
Aparece a janela do Painel de controle.

2.	Clique duas vezes no ícone do Intel(R) PROSet II.
A tela do Intel(R) PROSet II aparecerá.

3.	Na 'Árvore dos componentes de rede', selecione o adaptador que contém a ROM flash que você quer atualizar.

4.	Clique na guia Boot Agent. Se a guia não aparecer, atualize o driver de rede ou verifique se você tem o Intel PROSet II Versão 4.0 ou superior.

NOTA: O Intel PROSet II também permite modificar os parâmetros de configuração para ambientes PXE e RPL. Se selecionar um adaptador que trabalha em ambientes PXE ou RPL na lista de dispositivos 'Componentes de rede' à esquerda da tela Intel PROSet II, você poderá ver ou modificar os parâmetros de configuração, à direita na tela. Para obter mais informações, consulte 'Configuração do Boot Agent em ambientes Windows' no Guia do usuário do Intel® Boot Agent. Algumas ROM flash não suportam todas as configurações.

5.	Para editar uma configuração, pressione Ctrl+S. A guia Boot Agent conterá agora um botão acinzentado (desativado) Aplicar configurações.

6.	Clique em Atualizar o Boot Agent
Aparece uma caixa de diálogo de aviso indicando que a conectividade de rede é perdida temporariamente enquanto a imagem de inicialização é atualizada.

7.	Clique em Sim para continuar com o processo de atualização.
Aparece uma caixa de diálogo perguntando se quer criar um backup do Flash ROM existente.

8.	Para criar um backup da imagem atual da memória flash antes que essa memória seja atualizada, clique em Yes (sim). A caixa de diálogo Salvar a imagem da ROM flash existente como aparecerá. Vá para a etapa 10.

9.	Se você não quiser salvar um backup da imagem da ROM flash atual em um arquivo, clique em Não. Aparecerá uma caixa de diálogo de aviso. Clique em 'Sim' e vá para a etapa 11.

10.	Clique em Salvar para aceitar o caminho padrão e o nome de arquivo (o nome de arquivo padrão é o endereço MAC exclusivo do adaptador). Ou modifique estes parâmetros e depois clique em Salvar.

11.	Na caixa de diálogo Abrir arquivo, clique em Abrir se o arquivo de imagem da ROM flash desejada aparecer no caminho e nome de arquivo padrões da tela. Senão, modifique o caminho e o nome de arquivo e depois clique em Abrir.
NOTA: O site da Intel contém várias imagens de ROM flashes.

O processo de atualização da ROM flash demora de cinco a dez segundos e um indicador de andamento é mostrado durante a operação.


Protocolo de inicialização de rede

Se o seu Boot Agent não suportar RPL, este parâmetro não poderá ser mudado.

Valores possíveis:

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

Descrição:

Selecione PXE para uso com programas de gerenciamento de rede compatíveis com WfM (Wired for Management), como o LANDesk* Management Suite, o Windows* 2000 RIS, o Windows XP RIS e o Linux*.

Selecione RPL para inicialização remota no modo pré-existente e para algumas soluções Novell* NetWare* de inicialização remota.


Ordem de inicialização

Valores possíveis:

•	Usar a ordem de inicialização de configuração BIOS

•	Tentar a rede primeiro, depois as unidades locais

•	Tentar as unidades locais primeiro, depois a rede

•	Tentar apenas a rede

•	Tentar apenas as unidades locais

Descrição:

Permite que você selecione a ordem na qual os dispositivos de inicialização são acessados quando o sistema é inicializado. Se o BIOS de seu computador suporta BBS (BIOS Boot Specification) ou permite uma seleção compatível com Plug and Play da ordem de inicialização no programa de configuração do BIOS, então esse parâmetro será sempre Usar a ordem de inicialização do BIOS e não poderá ser mudado. Nesse caso, consulte o manual de configuração do BIOS específico ao seu computador cliente a fim de configurar as opções de inicialização.

Se o computador cliente não tiver um BIOS compatível com BBS ou PnP, você poderá selecionar qualquer dos valores mostrados acima para este parâmetro exceto Usar a ordem de inicialização do BIOS.


Mostrar aviso da configuração

Valores possíveis:

•	Ativado – valor padrão

•	Desativado

Descrição:

Se você selecionar Ativado, o prompt Ctrl+S aparecerá após o POST e você terá o número de segundos definido em "Tempo de espera do menu de instalação" para pressionar Ctrl+S e abrir o menu de configuração.

Se você selecionar Desativado, o parâmetro Tempo de espera do menu de instalação será zero e o prompt Ctrl+S não aparecerá durante a inicialização. Entretanto, você ainda poderá abrir o menu de configuração se pressionar repetidamente Ctrl+S imediatamente após o POST. Se o menu de configuração não aparecer após pressionar as teclas Ctrl+S repetidas vezes, reinicialize o computador e tente outra vez.


Tempo de espera do menu de configuração

Valores possíveis:

•	0 segundos

•	2 segundos

•	3 segundos

•	5 segundos

Descrição:

O número de segundos que o Boot Agent espera para você pressionar Ctrl+S e abrir menu de configuração durante a inicialização do sistema.

Se você selecionar o valor zero para o parâmetro "Tempo de espera do menu de instalação" e/ou o valor Desativado para Mostrar o prompt de configuração , o aviso para pressionar Ctrl+S não aparecerá durante o processo de inicialização. Entretanto, você ainda poderá abrir o menu de configuração se pressionar repetidamente Ctrl+S imediatamente após o POST. Se o menu de configuração não aparecer após pressionar as teclas Ctrl+S repetidas vezes, reinicialize o computador e tente outra vez.


Suporte a ativação de SO pré-existente

Este parâmetro não aparece no Menu definir configuração ao incializar um adaptador gigabit.

Consulte as instruções do sistema operacional para determinar se ele suporta ativação remota, assim como a forma de uso desse recurso.

Valores possíveis:

•	Enabled (Ativado)

•	Desativado

Descrição:

Selecione Ativado para permitir que sistemas operacionais não-Windows* (como DOS ou NetWare*) usem o recurso de ativação remota dos adaptadores compatíveis com WfM.

Selecione Desativado para esta configuração se estiver usando o Windows 2000, XP, Me ou 98SE.


Lista de VLANs

Se você tiver configurado VLANs, elas aparecerão na Árvore dos componentes de rede:

Quando você clica em uma VLAN com o botão direito, as seguintes opções aparecem:

•	Mudar as propriedades da VLAN - Permite que você altere a configuração da VLAN.

•	Remover- Permite que você remova a VLAN.

Consulte também:

Adicionar uma VLAN


Lista de grupos

Se você tiver configurado grupos de adaptadores, eles aparecerão na Árvore dos componentes de rede:

Quando você clica em um grupo com o botão direito, as seguintes opções aparecem:

•	Remover grupo

•	Alterar o modo do grupo

•	Adicionar VLAN

•	Ativar o IPSec

•	Ativar o GVRP

Se você tiver configurado o grupo mas ele não aparece na Árvore dos componentes de rede, feche o Intel(R) PROSet II para efetivar a criação do grupo.


Lista de adaptador agrupado

Quando você clica no ícone Adaptador agrupado com o botão direito, as seguintes opções aparecem:

•	Primário preferencial - Define o adaptador selecionado como o adaptador primário para transmissão no grupo. Normalmente, o adaptador especificado aqui é o de maior largura de banda.

•	Secundário preferencial - Define o adaptador selecionado como o adaptador de backup para o primário preferencial.  Esta opção não estará disponível até que o primário preferencial seja especificado.

•	Remover do grupo - Remove o adaptador selecionado do grupo.

Consulte também:

•	Alterar o modo de agrupamento do adaptador

•	Adicionar um adaptador a um grupo existente

•	Criar novo grupo

•	Remover um adaptador do grupo

•	Remover um grupo de adaptadores

•	Especificar um adaptador como primário ou secundário


Componentes de rede
Árvore de componentes de rede

A Árvore dos componentes de rede mostra a lista dos componentes ativos da rede. Os componentes de rede podem incluir adaptadores, grupos de adaptadores e VLANs.


Adaptadores membros

A caixa de lista de Adaptadores membros contém os adaptadores que contituem um grupo. Clique num adaptador membro para ver a informação específica do adaptador.

Consulte também:

•	Remover um adaptador do grupo


LANs virtuais

A guia LANs virtuais na Árvore de componentes de rede mostra a lista das VLANs configuradas.

Consulte também:

Adicionar uma VLAN

Mudar as propriedades da VLAN

Definição de VLAN

Remover uma VLAN

Configurações avançadas para VLANs

Configuração do GVRP


Remover uma instância de adaptador
Remover um adaptador

Antes de remover o adaptador do Intel(R) PROSet II ou do computador, verifique se este adaptador não é membro de um grupo. Se for, primeiro remova o adaptador do grupo e depois siga as instruções abaixo.

Para remover um adaptador do Intel(R) PROSet II

1.	Na Árvore dos componentes de rede, clique com o botão direito no adaptador que você quer remover.

2.	Clique em Remover.
Aparece uma caixa de confirmação, informando que o adaptador NÃO é membro de um grupo.

3.	Clique em Sim.

4.	Clique em OK para fechar o Intel PROSet II e aplicar as alterações.

5.	Se for solicitado, reinicialize o computador.

O Intel PROSet II não estará mais gerenciando o adaptador.


Criar novo grupo

Grupo é um conjunto de adaptadores configurados para melhorar a funcionalidade da rede, com recursos como transferência em caso de falha ou aumento da velocidade de processamento de dados.

Para criar um grupo

1.	Na Árvore dos componentes de rede clique com o botão direito em um adaptador não agrupado.

2.	Clique em Adicionar ao grupo e depois em Criar novo grupo.
O Assistente de agrupamento aparecerá.

3.	Selecione o tipo de grupo que você quer criar e clique em Avançar. As opções são:

•	AFT (Adapter Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	ALB (Adaptive Load Balancing)

•	Agregação de link (Dynamic_3ad* / GEC / LA / 802.3ad - modo estático)

4.	Se estiver criando um grupo ALB (Adaptive Load Balancing), você pode optar por ativar ou desativar o RLB (Receive Load Balancing).

•	Se você ativar o RLB, os membros com maior velocidade receberão o tráfego IP e o adaptador primário receberá o tráfego não-IP.
NOTA: Com o RLB (Receive Load Balancing) ativado, o Intel(R) PROSet II seleciona automaticamente o adaptador primário preferencial Esta seleção não é baseada no modelo ou na velocidade do adaptador.

•	Se você desativar o RLB, apenas o adaptador primário receberá tráfego.

5.	A lista mostra todos os adaptadores que não estão em nenhum grupo. Nesta lista, clique nos adaptadores que você quer colocar no grupo e clique em Avançar.

6.	Clique em Finish.

7.	Se quiser, você pode especificar o adaptador primário do grupo. Para especificar o adaptador primário, clique com o botão direito no adaptador que você quer usar como primário e depois clique em Primário preferencial.
Se você optar por não selecionar o adaptador primário, o Intel PROSet II selecionará o adaptador primário.

8.	Clique em Fechar para fechar o Intel PROSet II e aplicar as alterações.

O grupo está configurado.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Adicionar um adaptador a um grupo existente

Você pode adicionar um adaptador a um grupo existente a qualquer momento.

NOTA:  Em grupos Dynamic 802.3ad, alterações de configuração podem interromper temporariamente o tráfego enquanto o comutador recalcula os agregadores de link.

Para adicionar um adaptador a um grupo existente no Intel(R) PROSet II:

1.	Na Árvore dos componentes de rede clique com o botão direito em Lista de grupos.

2.	Clique em Adicionar adaptador ao grupo e selecione o adaptador que você quer adicionar.

O adaptador é, agora, parte do grupo.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel(R) PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Adicionar uma VLAN
Criar uma VLAN

VLAN é um agrupamento lógico de adaptadores configurados para aumentar a segurança da rede e reduzir o tamanho dos domínios de difusão.

Para criar uma VLAN

1.	Na Árvore dos componentes de rede, clique com o botão direito em Lista de grupos ou em Adaptadores que não estão em grupos.

2.	Clique em Adicionar VLAN.
Aparece o quadro de diálolgo Adicionar nova VLAN.

3.	No campo ID da VLAN, digite o número da VLAN atribuída ao adaptador.  O ID da VLAN precisa coincidir com o ID da VLAN configurado no comutador.
NOTA: os números de VLAN 0 e 1 são normalmente reservados. Consulte a documentação do comutador para maiores detalhes.

4.	No campo Nome da VLAN, digite um nome para a nova VLAN. Por exemplo, Marketing ou Engenharia. O nome não precisa ser igual ao de outros dispositivos de rede; ele é usado para fins de identificação apenas.

5.	Clique em OK.

O adaptador está agora configurado como membro da VLAN. Depois de configurar o adaptador como membro da VLAN, configure outros dispositivos de rede com as informações apropriadas da VLAN para concluir a configuração desta VLAN.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel(R) PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Remover uma VLAN

Use o Intel(R) PROSet II para remover VLANs. A remoção ou desativação de VLANs pelo 'Painel de controle' do sistema operacional pode afetar a estabilidade do sistema e a configuração do adaptador.

Para remover uma VLAN de um adaptador ou de um grupo

1.	Na Árvore dos componentes de rede clique com o botão direito em Lista de VLANs.

2.	Clique em Remover VLAN.

A VLAN está, agora, fora do adaptador ou grupo.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Remover um grupo de adaptadores

Use o utilitário Intel(R) PROSet II para remover grupos de adaptadores. A remoção ou desativação de grupos pelo 'Painel de controle' do sistema operacional pode afetar a estabilidade do sistema e a configuração do adaptador.

Para remover o grupo inteiro

1.	Na Árvore dos componentes de rede clique com o botão direito em Lista de grupos.

2.	Clique em Remover.

3.	Aparece uma mensagem de confirmação.  Clique em Sim.

O grupo estará removido. Os adaptadores continuarão a funcionar como dispositivos separados.

NOTA: Se você tiver criado VLANs ou filtros do Priority Packet para o grupo, eles são removidos com o grupo.  Se você tiver criado VLANs ou filtros do Priority Packet para o adaptador antes dele ser adicionado ao grupo, essas VLANs e filtros serão perdidos quando o grupo for removido.


Alterar o modo de agrupamento do adaptador
Alterar o modo de agrupamento

Para alterar o modo de agrupamento de um grupo:

1.	Na Árvore dos componentes de rede clique com o botão direito em Lista de grupos.

2.	Clique em Alterar o modo do grupo e depois clique em uma das seguintes opções:

•	AFT (Adapter Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	ALB (Adaptive Load Balancing)
Quando o modo do grupo é alterado para ALB, o equilíbrio de cargas de recepção é desativado por padrão. Para ativar o equilíbrio de cargas de recepção, altere o modo do grupo e depois ative o equilíbrio de cargas de recepção na guia Avançadas

•	Agregação de link (Dynamic_3ad* / GEC / LA / 802.3ad - modo estático)

O modo do grupo está modificado.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel(R) PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Remoção do adaptador do grupo

Você pode remover um adaptador de um grupo existente a qualquer momento.

NOTA:  Em grupos Dynamic 802.3ad, alterações de configuração podem interromper temporariamente o tráfego enquanto o comutador recalcula os agregadores de link.

Para remover um adaptador do grupo

1.	Na Árvore dos componentes de rede clique com o botão direito em um grupo.

2.	Clique em Remover do grupo.

3.	Clique em OK para aplicar a mudança.

O adaptador não é mais parte do grupo.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel(R) PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Mudar as propriedades da VLAN

Você pode reconfigurar o adaptador para se tornar membro de outra VLAN alterando o ID de VLAN. Esta alteração remove o adaptador da VLAN atual, interrompendo as comunicações com os computadores dessa VLAN.

Por exemplo, se você mudar o ID de VLAN de 7 para 9, o computador não vai mais se comunicar com os computadores da VLAN 7. Ele se comunicará apenas com os computadores da VLAN 9.

Para alterar a configuração de VLAN

1.	Na Árvore dos componentes de rede clique com o botão direito em uma VLAN.

2.	Clique em Mudar as propriedades da VLAN.

3.	No campo ID da VLAN, digite o número da VLAN atribuída ao adaptador.  O ID da VLAN precisa coincidir com o ID da VLAN configurado no comutador.
NOTA: os números de VLAN 0 e 1 são normalmente reservados. Consulte a documentação do comutador para maiores detalhes.

4.	No campo Nome da VLAN, digite um nome para a nova VLAN. Por exemplo, Marketing ou Engenharia. O nome da VLAN serve apenas para informação e não precisa ser igual ao nome de VLAN configurado em outros dispositivos da rede.

5.	Para fechar o Intel(R) PROSet II, clique em OK.

A configuração VLAN está atualizada.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel(R) PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.

Consulte também:

Ativar o GVRP

Configurações avançadas para VLANs


Especificar um adaptador como primário ou secundário

Em todo grupo, há um adaptador primário e um adaptador secundário.

Você pode selecionar manualmente o adaptador primário do grupo ou deixar o Intel(R) PROSet II selecioná-lo.

•	Se você fizer a seleção manual, o adaptador selecionado se tornará o adaptador preferencial primário. O adaptador preferencial primário transmitirá e receberá dados enquanto tiver uma conexão ativa. Se o adaptador preferencial primário deixar de funcionar, mas voltar a funcionar mais tarde, o controle volta automaticamente para ele.

Por exemplo, se você tiver um servidor com o adaptador Intel(R) PRO/1000 Gigabit como o adaptador primário e um PRO/100+ ou PRO/100 S  como o secundário, é aconselhável fazer com que o PRO/1000 Gigabit seja o primário preferencial. Nesse caso, se o adaptador Intel PRO/1000 falhar, o PRO/100+ ou PRO/100 S assumirá o trabalho. Quando o PRO/1000 tiver sido substituído, ele voltará automaticamente a ser o adaptador primário no grupo.

Se você selecionar manualmente o adaptador primário, haverá sempre um adaptador preferencial primário no grupo.

•	Se você não definir nenhum adaptador como primário, o Intel PROSet II selecionará o melhor adaptador, com base no modelo e velocidade. Isto significa que, embora haja um adaptador primário, não haverá nenhum adaptador primário preferencial. Quando o adaptador primário preferencial não existe, o Intel PROSet II pode selecionar um adaptador primário opcional no evento de falha do primário original.

Por exemplo, se o adaptador primário, Intel(R) PRO/1000 Gigabit, falhar, o Intel PROSet II pode designar outro adaptador do grupo para atuar como adaptador primário.  Se o Intel(R) PRO/1000 voltar ao estado ativo, ele volta ao grupo como um membro e não como o adaptador primário.

Para definir um adaptador como primário ou secundário

1.	Na Árvore dos componentes de rede clique com o botão direito em um Adaptador agrupado.

2.	Clique em Primário preferencial ou em Secundário preferencial.

O adaptador estará, agora, com o status configurado.

Para alterar o status de prioridade do adaptador

Usando o procedimento apresentado acima, você pode também alterar a prioridade do adaptador.

Grupos STP e SFT:  Se o adaptador primário (ativo) for mudado, o grupo será recarregado com o endereço MAC do novo adaptador primário. Da mesma forma, se o endereço LAA (Locally Administered Address) do grupo for alterado, o grupo será recarregado e terá um novo endereço MAC. Estas duas ações, se forem executadas em um grupo STF com o servidor ativo, provocarão a interrupção das comunicações do grupo até que todos os dispositivos da rede atualizem suas tabelas ARP com o endereço do novo adaptador primário. O tempo necessário para atualizar a tabela ARP é determinado pelo tempo de espera do cache ARP, que é um parâmetro disponível em alguns roteadores e sistemas operacionais. Dependendo deste parâmetro, o grupo poderá ficar indisponível por até 10 minutos.

NOTA: A opção Secundário preferencial não estará disponível até que o preferencial primário tenha sido especificado.


Ícone de bandeja do PROSet
Ícone do Intel(R) PROSet II

Quando o Intel(R) PROSet II é instalado, um ícone do Intel PROSet II aparece na bandeja do sistema, próximo ao relógio.

Quando você clica neste ícone com o botão direito, aparecem as seguintes opções:

Comando	Descrição
Abrir Intel(R) PROSet II	Mostra o utilitário Intel PROSet II.
Mostrar o status de	Mostra os nomes dos adaptadores sem fio instalados.
Ocultar ícone da bandeja	Oculta o ícone na bandeja da barra de tarefas.   Para fazer o ícone reaparecer na barra de tarefas. Na guia Geral do PROSet II, clique em Mostrar o ícone da bandeja.
Sair	Fecha o Intel PROSet II e remove temporariamente o ícone da barra de tarefas.  Embora o ícone não esteja mais visível, você pode abrir o Intel PROSet II clicando duas vezes no ícone do Intel PROSet II no Painel de controle. Quando o computador é reinicializado, o ícone do PROSet II volta a aparecer na barra de tarefas.
Sair e não abrir na inicialização	Remove o ícone do Intel PROSet II e impede que ele reapareça quando o computador é reinicializado. Para restaurar o ícone da bandeja depois de selecionar esta opção:  1. Clique em Iniciar > Executar. 2. No campo Abrir, digite PROMON e clique em OK.   O ícone do Intel PROSet II permanecerá na barra de tarefas até que o computador seja reinicializado. Para mostrar o ícone permanentemente, veja Adicionar o ícone na inicialização, abaixo.
Iniciar o ícone da bandeja na inicialização	Configura o ícone do Intel PROSet II para aparecer na barra de tarefas. Esta opção garante que o ícone estará visível quando o computador for reinicializado. NOTA: Esta opção só estará disponível se você estiver usando o recurso Sair e não abrir na inicialização e não tiver restaurado o ícone da bandeja.


Detalhes técnicos da desativação inteligente
Detalhes da desativação inteligente

A desativação inteligente é um método de economia de energia usado nos adaptadores baseados nos controladores Intel 82558, 82559 e 82550 para minimizar o consumo quando não houver um link ativo. A desativação inteligente habilita os adaptadores a entrar em um modo sleep profundo, economizado até 150% a mais de energia. O recurso é ativado quando:

•	O adaptador não tem um link ativo

•	O sistema operacional está no modo Suspenso

Em ambos os casos, se a desativação inteligente estiver ativada, o sistema operacional coloca o adaptador no modo sleep, reduzindo o consumo geral de energia. Quando o link do adaptador se torna ativo ou quando o sistema operacional sai do modo Suspenso, a atividade e o consumo do adaptador voltam aos níveis normais.


Mensagem de falha de desinstalação de dispositivo

Se tentar remover a lista de grupos ou a lista de VLANs do adaptador usando o Gerenciador de dispositivos, você receberá a seguinte mensagem: "Falha ao desinstalar o dispositivo. Este dispositivo pode ser necessário para inicializar o computador."

Esta mensagem significa que você não pode usar o 'Gerenciador de dispositivos' para remover um adaptador virtual criado pelo Intel(R) PROSet II.  Para remover adaptadores do gerenciador de dispositivos, use o Intel PROSet II.

Consulte também:

Remover um grupo de adaptadores

Remover uma VLAN

Ativar o GVRP


Configurações avançadas para VLANs

Para personalizar as configurações avançadas de VLANs:

1.	Clique em Lista de VLANs na Árvore dos componentes de rede.

2.	Clique na guia Avançadas.

3.	Na lista suspensa, clique em NumRxPackets e digite o novo valor.
NumRxPackets define o número de Descritores de recepção, que são segmentos de dados que habilitam o adaptador a alocar pacotes recebidos na memória. Cada pacote recebido precisa de um descritor de recepção e cada descritor usa 2 kB de memória.

Você pode aumentar o número de descritores de recepção se notar uma diminuição significativa no desempenho do tráfego de recepção. Se o desempenho de recepção não  for problema, use o valor padrão.

Importante: Modificar este valor pode diminuir o desempenho no seu sistema.

4.	Na lista suspensa, clique em NumTxPackets e digite o novo valor.

O parâmetro NumTxPackets define o número de descritores de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais descritores de transmissão.

Você pode aumentar o número de descritores de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de descritores de transmissão possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não  for problema, use o valor padrão.

Importante: Modificar este valor pode diminuir o desempenho no seu sistema.

5.	Clique em OK.

6.	A VLAN tem agora configurações personalizadas.

A VLAN está personalizada.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel(R) PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Ativar IPSec

O IPSec (IP Security) é um conjunto de padrões desenvolvidos pela IETF (Internet Engineering Task Force) que protege as comunicações IP verificando os pacotes de dados que não são alterados durante a transmissão. Para obter informações detalhadas sobre o IPSec, visite o site de suporte da Intel: http://support.intel.com ou, se você tiver o Intel(R) Packet Protect, consulte o guia do usuário do Packet Protect.

Requisitos

Você pode ativar ou desativar a segurança IP no Intel(R) PROSet se:

•	Você estiver usando um dos seguintes sistemas operacionais:

•	Windows* 98

•	Windows NT* 4.0, SP5 ou mais recente

•	Windows Me

•	Ou se você estiver usando um adaptador Intel® PRO/100

Se você estiver usando o Windows 2000 ou Windows XP, a segurança IP estará disponível como um snap-in do Console de gerenciamento Microsoft. Consulte a documentação do Windows 2000 ou XP para obter mais informações sobre a implementação da segurança IP.

Para ativar o IPSec

1.	Na Árvore dos componentes de rede, clique com o botão direito em Lista de grupos ou em Adaptadores que não estão em grupos e depois selecione Ativar IPSec.

2.	Reinicialize o computador.

3.	Instale o software Intel(R) Packet Protect.
NOTA:  Para instalar o Packet Protect, você precisa a opção Ativar IPSec em pelo menos um adaptador ou grupo de adaptadores antes de instalar o Packet Protect.

O IPSec estará, então, ativado.

Para desativar o IPSec

Na Árvore dos componentes de rede, clique com o botão direito em Lista de grupos ou em Adaptadores que não estão em grupos e depois desmarque Ativar IPSec.

Descarga de criptografia em adaptadores Intel(R) PRO/100 S

A família de adaptadores Intel(R) PRO/100 S pode descarregar as transações do processamento de criptografia de segurança IP. Manipulando o processamento de criptografia, os processadores reduzem o uso da CPU. Para ativar a capacidade de descarregamento:

1.	Ative a segurança IP usando o Intel Packet Protect ou, se o sistema operacional for Windows 2000 ou XP, usando o Console de gerenciamento Microsoft.

2.	No Intel PROSet II, selecione, na Árvore dos componentes de rede, o adaptador Intel PRO/100 S que processará a criptografia de segurança IP.

3.	Clique na guia Avançadas.

4.	Na lista de configurações, clique em Descarregar.

5.	Na caixa Valor, selecione Segurança IP.

6.	Clique em OK.

O adaptador está,agora, configurado para retirar o processamento de criptografia da CPU.


Suporte a GVRP

Estações de trabalho e comutadores usam GVRP (GARP VLAN Registration Protocol) para criar, mudar e remover VLANs dinamicamente. Os comutadores habilitados com GVRP podem identificar a porta de comutador dos membros da VLAN e controlar o status da VLAN.

Requisitos

Para haver suporte a GVRP na rede inteira, os adaptadores e comutadores devem ter o GVRP habilitado.

Para habilitar o GVRP num adaptador

1.	Na Árvore dos componentes de rede, clique com o botão direito em uma Lista de adaptadores agrupados que tenha pelo menos uma VLAN.

2.	Clique em Suporte de GVRP.
Aparece a caixa de diálogo Suporte a GVRP.

3.	Clique em Ativado.

4.	Na caixa suspensa Tempo de adesão ao GVRP, digite o número de milisegundos entre o comando GVRP LEAVE do comutador e o comando Join do PROSet II GVRP. Por padrão, o Intel(R) PROSet II inicia um comando de adesão 200 ms após o comando LEAVE.

5.	Clique em OK.

O adaptador está agora habilitado para GVRP.

Solução de problemas

Por haver implementações diferentes de GVRP, sua habilitação no adaptador não garante a compatibilidade de GVRP entre os dispositivos de rede. Se o GVRP parece não funcionar, desative-o no adaptdor.

NOTA:  Ao fazer múltiplas alterações em grupos ou em VLANs usando o Intel PROSet II, recomenda-se que você feche o Intel PROSet II ao final de cada alteração para implementá-la.  Depois, reabra o Intel PROSet II para fazer a próxima alteração.


Service Packs do Windows NT* 4.0

Para usar o Intel(R) PROSet II e os recursos mais avançados de agrupamento, o Windows NT 4.0 precisa estar atualizado com o Service Pack 6a ou mais recente.

Para obter informações sobre os service packs da Microsoft, visite o site http://www.microsoft.com/ntserver/, onde você pode fazer download dos service packs e das instruções.


Configurações avançadas dos adaptadores de desktop PRO/1000

NOTA:  Consulte o administrador de rede antes de mudar estas configurações. Se as mudanças das configurações avançadas não forem compatíveis com outros dispositivos de rede, o desempenho do adaptador ou do sistema podem ficar comprometidos.

Espaçamento adaptativo entre frames

Faz a compensação de colisões excessivas de pacotes Ethernet na rede.

Adaptadores suportados	Todos
Padrão	ativado

Resposta adaptável do link

Aumenta a velocidade de inicialização do sistema pois deixa de executar as rotinas que exigem conectividade de rede quando o cabo estiver desconectado do adaptador. O tempo de inicialização do sistema é consideravelmente reduzido.

Quando a Resposta adaptativa de link está ativada nos controladores Ethernet e não há um cabo de rede conectado à porta RJ-45, a conexão de rede é desativada. Uma marca amarela de atenção aparecerá ao lado da conexão de rede no Gerenciador de dispositivos.

Para reativar a conexão de rede, conecte o cabo à porta RJ-45 e reinicialize o computador.

Adaptadores suportados	Não está disponível em todos os modelos de adaptadores.
Padrão	Desligada
Recomendado	Aceso
Faixa	Ativado, desativado
NOTA: O Adaptive Link Response (ALR) não funcionará quando um adaptador sem fio estiver ativo no sistema.

Buffers de coalescência

Otimizam o desempenho de transmissão personalizando o número de buffers de coalescência que permitem que o adaptador agrupe segmentos de dados antes de criar o pacote de transmissão.

O parâmetro 'buffers de coalescência' precisa estar configurado para funcionar com o parâmetro 'Descritores de transmissão'. O valor de buffers de coalescência deve ser 30 a 50 % do valor de descritores de transmissão. Se o parâmetro buffers de coalescência não for mudado para combinar com os descritores de transmissão, o desempenho de transmissão pode não melhorar.

O parâmetro buffers de coalescência aumenta significativamente o desempenho de transmissão em computadores Windows NT 4.0. Ele também aumenta o desempenho de transmissão em computadores Windows 98 e 2000.

Sistemas operacionais suportados	Windows NT 4.0, 98, 2000, XP
Adaptadores suportados	Todos
Padrão	128
Faixa	16-768
Habilitar PME

Habilita ou desabilita as capacidades de ativação remota do adaptador em computadores que têm apenas implementações APM (Advanced Power Management). A ativação remota habilita o computador a sair do estado de espera ou do estado de desligado quando recebe certos tipos de pacote, como os pacotes ARP.

•	A desativação deste recurso desabilita todas as configurações de ativação remota em computadores que usam implementações mais antigas do gerenciamento de energia.

•	A habilitação deste recurso permite que o adaptador responda aos sinais de ativação remota. Para configurar o computador a responder a tipos específicos de pacote, veja as informações sobre ativação remota mais adiante neste tópico.

•	O valor de 'Hardware padrão' força o adaptador a configurar as capacidades de ativação remota com base no hardware do sistema.

•	O valor Nehuma ação habilita o adaptador a usar o sistema operacional padrão.

Se você quiser desativar as configurações de ativação remota, defina este recurso como desabilitado. Senão, defina este recurso com 'Nenhuma ação'.

Adaptadores suportados	adaptadores baseados no 82559 Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Desativado
Faixa	Ativado, desativado
Témindo da transmissão rápida

Otimiza o desempenho de transmissão liberando descritores de transmissão para serem usados novamente antes do envio de pacotes.

•	Com a configuração 'Execução da transmissão rápida' desativada, o adaptador precisa esperar até que os pacotes sejam enviados para reutilizar os descritores de transmissão.

•	Com a 'Execução da transmissão rápida' ativada, o adaptador reutiliza os descritores de transmissão mais cedo, obtendo um melhor desempenho de transmissão.

Adaptadores suportados	todos baseados no 82544 Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Aceso
Faixa	Ativado, desativado
Controle de Fluxo

Permite que os adaptadores controlem o tráfego com mais eficiência.

•	Os adaptadores geram frames de controle de fluxo quando a fila de recebimento atinge um limite predefinido. Os frames de controle de fluxo sinalizam o transmissor para diminuir a velocidade de transmissão.

•	Os adaptadores respondem aos frames de controle de fluxo pausando a transmissão de pacotes pelo tempo especificado no frame de controle de fluxo.

Com o ajuste da velocidade de transmissão dos adaptadores, o controle de fluxo ajuda a evitar a perda de pacotes.

NOTA: Para que os adaptadores possam usar os frames de controle de fluxo, os parceiros de link também precisam suportar este recurso.

Adaptadores suportados	adaptadores baseados no 82540 e no 82544, para transmissão e recepção. Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Gerar e responder a frames de controle de fluxo.
Faixa	• Desligado, Responder, Gerar, Gerar e Responder, Padrão de Hardware

Jumbo Frames

NOTA: Os frames grandes são suportados a 1000 Mbps apenas. O uso de frames grandes a 10 ou 100 Mbps pode resultar em menor desempenho ou na perda do link.

Ativa ou desativa a capacidade de frames grandes. Os frames grandes podem aumentar a velocidade de transmissão de dados e diminuir o uso da CPU pois colocam mais dados em cada frame, criando menos frames para enviar. O tamanho padrão de frames Ethernet é 1514 bytes, enquanto os frames grandes podem conter 4.088, 9.014 ou 16.128 bytes

Ative os frames grandes apenas se os dispositivos da rede os suportarem e estiverem configurados para usá-los no mesmo tamanho. Ao configurar os Jumbo Frames em outros dispositivos de rede, esteja atento para o fato de que cada dispositivo calcula o tamanho dos Jumbo Frames de forma diferente. Alguns dispositivos incluem as informações do cabeçalho no tamanho, e outros dispositivos, não. Os adaptadores Intel não incluem as informações de cabeçalho no tamanho do frame.

Para obter mais informações, consulte o tópico Frames grandes.

Adaptadores suportados	Todos
Padrão	Desativado
Faixa	Desativado (1.514), 4.088, 9.014 e 16.128. (Defina o comutador com 4 bytes a mais para CRC, mais quatro bytes se estiver usando VLANs ou rotulação de pacotes QoS.)  NOTA: Qualquer valor da faixa 1.514 a 16.128 pode ser definido na chave de registro MaxFrameSize do Windows.
LAA (Locally Administered Address)

Este endereço se sobrepõe ao endereço MAC do adaptador. Para inserir um novo endereço de rede, digite um número hexadecimal de 12 dígitos na caixa 'Valor'.

Adaptadores suportados	Todos
Padrão	Não
Faixa	0000 0000 0001 - FFFF FFFF FFFD Exceções: • Não use como endereço de multidifusão (bit menos significativo do byte alto = 1).  • Não use apenas zeros nem apenas Fs. Configuração não presente: volta ao endereço de rede original do adaptador.
Usuários do Windows 98SE:

Se você quiser usar o endereço padrão depois de usar um endereço atribuído manualmente, execute um destes procedimentos:

•	Na guia Avançado da caixa de diálogo Propriedades da rede, selecione Endereço administrado localmente e altere o valor para 0. Clique em OK para aplicar a configuração.

•	Em Intel PROSet II, clique na guia Avançado, depois clique em Restaurar padrão ou apague todos os caracteres do campo Valor. Clique em OK para aplicar a configuração.

Registrar Evento de estado de link

Esta configuração é usada para habilitar/desabilitar o registro das alterações do estado do link. Se ela estivar habilitada, um evento de ativação ou de desativação do link gerará uma mensagem que será mostrada no registrador de eventos do sistema. Os administradores podem ver a mensagem de evento no registrador de eventos do sistema.

Os eventos registrados são os seguintes:

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Adaptadores suportados	Todos
Padrão	Ativar
Faixa	Ativar, desativar
Descarga da soma de verificação TCP de recepção

Permite que o adaptador cheque a soma de verificação TCP ou UDP dos pacotes que chegam.

•	Com a descarga desativada, o sistema operacional checa a soma de verificação TCP.

•	Com a descarga ativada, o adaptador executa a verificação.

Este recurso melhora o desempenho de recepção e reduz o uso da CPU.

Sistemas operacionais suportados	• Windows XP* • Windows 2000 • O Windows NT 98 não suporta descargas.
Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	• Windows* XP: Aceso • Windows 2000 Desligada
Faixa	Ativado, desativado
Descarga da soma de verificação IP de transmissão

Permite que o adaptador calcule a soma de verificação IP dos pacotes que saem.

•	Com a descarga desativada, o sistema operacional checa a soma de verificação IP.

•	Com a descarga ativada, o adaptador executa a verificação.

Este recurso melhora o desempenho de transmissão IP e reduz o uso da CPU.

Sistemas operacionais suportados	• Windows XP* • Windows 2000 • O Windows NT 98 não suporta descargas.
Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Aceso
Faixa	Ativado, desativado
Descarga da soma de verificação TCP de transmissão

Permite que o adaptador calcule a soma de verificação TCP ou UDP dos pacotes que saem.

•	Com a descarga desativada, o sistema operacional checa a soma de verificação TCP.

•	Com a descarga ativada, o adaptador executa a verificação.

Este recurso melhora o desempenho de transmissão de TCP e UDP e reduz o uso da CPU.

Sistemas operacionais suportados	• Windows XP* • Windows 2000 • O Windows NT 98 não suporta descargas.
Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Aceso
Faixa	Ativado, desativado NOTA: Desative esta opção se o servidor estiver suportando clientes baseados em DOS.
Rotulação de pacotes QoS

Permite que o adaptador envie e receba frames rotulados IEEE 802.3ac, que são:

•	rótulos 802.1p QoS (Quality of Service) necessários aos pacotes com rotulação de prioridade e

•	rótulos 802.1Q necessários para VLANs

O Intel PROSet ativa automaticamente a rotulação 802.1p quando você configura uma VLAN .

Adaptadores suportados	adaptadores baseados no 82559 e mais recentes Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	Desativado
Faixa	Ativado, desativado
Descritores de recepção

Define o número de descritores de recepção, que são segmentos de dados que habilitam o adaptador a alocar pacotes recebidos na memória. Cada pacote recebido precisa de um descritor de recepção e cada descritor usa 2 kB de memória.

Você pode aumentar o número de descritores de recepção se notar uma diminuição significativa no desempenho do tráfego de recepção. Se o desempenho de recepção não for problema, use o valor padrão, 256.

Adaptadores suportados	Todos
Padrão	160
Faixa	80-2048
Descarga de segmentação TCP

Permite que o adaptador faça a segmentação dos dados em frames Ethernet válidos.

•	Com a segmentação TCP desativada, o sistema operacional faz a segmentação dos dados antes de enviá-los para o adaptador para serem transmitidos.

•	Com a segmentação TCP ativada, o adaptador segmenta os dados em frames.

Como o adaptador faz a segmentação muito mais rapidamente que o sistema operacional, este recurso aumenta significativamente o desempenho de transmissão. Além disso, o adaptador consome menos recursos da CPU.

Sistemas operacionais suportados	Windows XP
Adaptadores suportados	apenas os adaptadores baseados no 82544 e no 82540. Veja o tópico Especificações dos adaptadores para obter ajuda na identificação do seu adaptador.
Padrão	1
Faixa	0 = não anunciar este recurso; 1 = anunciar este recurso.

Descritores de transmissão

Define o número de descritores de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais descritores de transmissão.

Você pode aumentar o número de descritores de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de descritores de transmissão possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não for problema, use o valor padrão, 256.

Adaptadores suportados	Todos
Padrão	256
Faixa	80-2048
Configurações de ativação com link

Desperta o computador se a conexão de rede estabelecer um link quando o computador estiver em modo de espera. Você pode habilitar o recurso, desativá-lo ou deixar o sistema operacional usar o padrão.

Sistemas operacionais suportados	Windows 9x, Windows 2000, Windows XP
Faixa	Desabilitado, forçado, controlado pelo SO
Padrão	Desativado

Configurações de ativação remota

Estas configurações correspondem aos recursos que são ativados pelo sistema operacional ou pelo Intel PROSet. Os recursos funcionam de forma diferente ou não são suportados, dependendo da sua versão do Windows.

Estas versões do Windows suportam configurações de ativação remota: Windows 2000, Windows XP de 64 bits, Windows XP Professional e Windows Server 2003. Este recurso não é suportado no Windows Server 2003 para sistemas baseados no Itanium(R) de 64 bits.

Configurações de ativação remota

Você pode usar o Intel PROSet para configurar a ativação remota no adaptador. Antes de selecionar as configurações de ativação remota, você precisa habilitar o sistema operacional a usar estas configurações. Para fazer isso, siga estas instruções.

Para habilitar os parâmetros de ativação.

6.	No Intel PROSet, clique na guia Avançadas.

7.	Na caixa de listagem Configurações, selecione Configurações de ativação remota.

8.	Na lista Valor, selecione a configuração adequada.

9.	Clique em OK ou em Aplicar.

10.	Para que o adaptador responda a estes tipos de pacotes de ativação remota, o sistema operacional precisa estar habilitado a usar as configurações de ativação remota. Para habilitar as configurações de ativação remota, vá para o 'Gerenciador de dispositivos' e ative a opção Este dispositivo pode ativar novamente o computador.

Parâmetro disponíveis

Estas são as configurações de ativação remota disponíveis no PROSet:

Parâmetro	Descrição
Desativado	O adaptador não usará os parâmetros Wake On.
Ativar com Magic Packet	Habilita o adaptador a ser ativado ao receber um Magic Packet. Magic Packet é um pacote que contém 16 cópias consecutivas do endereço Ethernet do adaptador de destino. Quando você configura este recurso, o Intel PROSet sobregrava o valor atribuído pelo sistema operacional.
Ativar com pacote dirigido	Habilita o adaptador a ser ativado quando ele recebe um Pacote dirigido, que é um pacote unicast enviado ao endereço MAC do adaptador.  The protocol must enable this wake up method in the driver. Deselecting this feature tells the driver to ignore any protocol request to enable this wake up method.
Wake on Magic e Directed Packets	Habilita o adaptador para ativar quando ele recebe um Magic Packet ou um Directed Packet.
Controlado por SO	Dá ao sistema operacional controle completo dos Parâmetros de ativação.

NOTA: Se o adaptador tiver vários endereços IP, o sistema operacional pode solicitar a ativação remota com padrões ARP para todos os endereços IP configurados. O adaptador só ativará quando os pacotes ARP consultares o primeiro endereço IP na lista.

NOTA: As configurações de ativação remota não incluem a capacidade de ativar um computador que está desligado (estado S5). Esse estado é controlado pelo parâmetro Habilitar PME, que também está disponível na Guia Avançado. Mesmo se os parâmetros de ativação estiverem desabilitados, a capacidade de ativar do S5 é determinada pelo parâmetro Habilitar PME.

Os parâmetros PME funcionarão enquanto o driver do adaptador estiver habilitado. Se o driver for desabilitado, o dispositivo reverterá para o padrão do hardware que pode ou não permitir ao computador ser ativado ou desligado.

Botão Restaurar o padrão

Este botão volta a configuração avançada selecionada para o seu valor padrão.  Veja as configurações acima para saber quais são seus valores padrão.  (Esta opção não está disponível para todas as configurações.)


Salvar ou restaurar a configuração
Restaurar as configurações do Intel(R) PROSet II a partir de um arquivo salvo.

Se as configurações avançadas de um adaptador tiverem sido salvas em um arquivo, você poderá usar este arquivo para restaurar as configurações personalizadas de VLAN e de agrupamento. Note que a restauração da configuração do Intel PROSet II não restaura as configurações de rede específicas do sistema operacional, como endereços IP e vínculos de protocolo.

Antes de começar

As configurações precisam ser restauradas no mesmo computador em que foram criadas. Além disso, o computador precisa ter a mesma rede e o mesmo hardware de quando a configuração original foi salva. Por exemplo, se o computador estava conectado a um comutador gigabit Intel quando o arquivo de configuração foi salvo, ele precisa estar conectado ao mesmo comutador quando a configuração for restaurada.

O recurso Salvar/restaurar é compatível com o Windows Windows NT* 4.0, 2000, 98SE, Me e XP.

AVISO: Não edite o arquivo de configuração. Qualquer modificação pode inutilizá-lo.

Para restaurar as configurações do adaptador a partir de um arquivo salvo

1.	No menu Ferramentas, clique em Salvar/restaurar configuração.
Aparece o quadro de diálogo Salvar/Restaurar.

2.	Clique em Restaurar.
O quadro de diálogo Abrir aparecerá.

3.	Vá até a pasta em que você salvou o arquivo de configuração e selecione este arquivo.

4.	Clique em Abrir.
O Intel PROSet II mostra os parâmetros restaurados. Estas configurações não serão aplicadas até que você clique em OK.

5.	Se necessário, faça alterações na configuração do adaptador.

6.	Clique em OK para fechar o Intel PROSet II e aplicar as configurações restauradas.

Consulte também:

Gravar configuração


Aviso de adição de adaptador ao grupo
Adição de um adaptador ao grupo

Ao criar grupos, adicione cada adaptador a apenas um grupo. Esta diretriz se aplica a grupos criados no Intel(R) PROSet e grupos criados com outras ferramentas de configuração. Se um adaptador for adicionado a mais de um grupo, a funcionalidade e desempenho do grupo podem ficar comprometidos.

•	Se você usar o Intel PROSet para criar grupos, consulte o Modo de exibição de árvore para identificar os membros dos grupos.

•	Se você usar outra ferramenta de configuração, analise os grupos e os seus membros usando esta ferramenta para garantir que o adaptador não está em nenhum outro grupo.

Consulte também:

Remover um adaptador do grupo

Criar novo grupo


Navegar pelo PROSet II?
Navegar pelo Intel(R) PROSet II

O Intel(R) PROSet II tem três áreas de navegação:

•	Menu

•	Árvore de componentes de rede

•	Guias

No menu você pode:

•	Configurar grupos ou habilitar a segurança de IP em Ação.

•	Salvar o restaurar a VLAN do adaptador e a configuração de agrupamento em Ferramentas.

•	Usar o sistema de ajuda online ou acessar o site de suporte da Intel.

Na 'Árvore dos componentes de rede' você pode:

•	Clicar uma vez num adaptador para ver seus detalhes e parâmetros de configuração.

•	Clicar com o botão direito em um adaptador para criar grupos e ativar a segurança IP (IPSec).

•	Clicar com o botão direito para mudar parâmetros de grupo ou configurar VLANs.

•	Clicar com o botão direito num membro de grupo para mudar os parâmetros de adaptador do grupo.

Nas guias você pode monitorar o adaptador e configurar tarefas.

Ícone de bandeja

A caixa de seleção 'Mostrar o ícone da bandeja' permite que você mostre ou oculte o ícone da bandeja do Intel PROSet II na barra de tarefas (próximo ao relógio). Para ocultar o ícone de bandeja, desselecione a caixa de verificação.

Mais informações sobre o ícone da bandeja do Intel(R) PROSet II


Informações gerais

Para ver informações gerais sobre o adaptador, clique nesse adaptador na Árvore dos componentes de rede.

A guia Geral permite:

•	Rever as informações básicas sobre o adaptador

•	Testar a funcionalidade do cabo
NOTA: O teste de cabo só está disponível para alguns adaptadores.

•	Identificar a posição do slot do adaptador

•	Ver detalhes adicionais


Rever as informações básicas sobre o adaptador

A guia 'Geral' contém as seguintes informações sobre o adaptador selecionado na Árvore dos componentes de rede :

Endereço Ethernet	É o endereço de 12 dígitos hexadecimais do nó deste adaptador, também chamado de endereço MAC.
Número de peça	O número Intel deste adaptador.
Endereço IP	Se o protocolo IPv4 estiver sendo usado, este é o endereço TCP/IP do adaptador.  O Intel PROSet II não mostra endereços IPv6 no momento.
Status do driver de rede	Indica se o driver de rede Intel do adaptador selecionado está ou não carregado.
Status de rede	Indica o status do link, a velocidade e modo duplex do adaptador selecionado. Os campos do grupo 'status de rede' variam com o adaptador.  • LED do Link: Aceso indica que o cabo do adaptador está conectado a um hub ou porta de comutador válida; apagado indica que não há link. • Velocidade: Os valores mostrados aqui (1000, 100, ou 10) indicam a velocidade do link do adaptador. • LED de atividade: Pisca quando o adaptador está conectado a uma rede ativa; apagado, indica que não há atividade ou que o cabo está desconectado. • Modo duplex: Full Duplex indica que o adaptador está enviando e recebendo dados simultaneamente; Half Duplex indica que o adaptador só pode, em um dado momento, enviar ou receber dados (e não enviar e receber ao mesmo tempo).


Definir a velocidade e o modo duplex

Por padrão, os adaptadores Intel negociam automaticamente a velocidade e o modo duplex. Se o adaptador não puder estabelecer a conectividade usando a negociação automática, você terá que configurar manualmente a velocidade e o modo duplex, tanto no adaptador como no parceiro de link. Por exemplo, se o comutador não suportar a negociação automática ou se ele estiver configurado com uma velocidade e modo duplex específicos, você terá que configurar manualmente o adaptador com a mesma velocidade e modo duplex.

AVISO: Se a velocidade e modo duplex do adaptador não forem os mesmos do parceiro de link, a conectividade de rede pode ser perdida.

Quando a negociação automática está desativada, as configurações possíveis para velocidade do link e modo duplex são:

•	10 Mbps ou 100 Mbps Full duplex (exige um parceiro de link configurado para full duplex). O adaptador pode enviar e receber pacotes ao mesmo tempo.

•	10 Mbps ou 100 Mbps Half duplex (exige um parceiro de link configurado para half duplex). O adaptador executa uma operação por vez; ele envia ou recebe.

Para obter informações sobre a configuração de velocidade e modo duplex, clique na família de adaptadores apropriada:

•	Intel(R) PRO/1000 (cobre)
NOTA: Os adaptadores Intel(R) PRO/1000 de fibra funcionam a 1000 Mbps, full-duplex.

•	Intel(R) PRO/10 ou PRO/100


Configuração do link PRO 10/100
Configuração de velocidade e modo duplex: Adaptadores Intel(R) PRO/10 e PRO/100

Na Árvore dos componentes de rede, clique no adaptador Intel(R) PRO/10 ou PRO/100 que você quer configurar.

1.	Clique na guia Avançadas.

2.	Na lista de configurações, clique em Velocidade do link e modo duplex.

3.	Na caixa de listagem 'Velocidade do link e modo duplex', clique na velocidade e no modo duplex corretos para o adaptador e seu parceiro de link.  Para obter informações sobre como identificar a velocidade e modo duplex do parceiro de link, consulte a documentação deste parceiro de link.

4.	Clique em OK.

5.	Se for solicitado, reinicialize o computador.

O adaptador está, agora, configurado com a velocidade e modo duplex especificados.

AVISO: Se a velocidade e modo duplex não forem iguais aos do dispositivo conectado, a conectividade de rede ou o desempenho do adaptador podem ficar comprometidos.


Configurar os recursos avançados do adaptador

Para ver os recursos avançados, escolha o tipo de adaptador:

•	Desktop Intel(R) PRO/1000

•	Servidor Intel(R) PRO/1000

•	Intel(R)PRO/100

•	Intel(R) PRO/100 VE e VM

•	Intel(R)PRO/10


SFT (Switch Fault Tolerance)

A SFT (Switch Fault Tolerance) permite que você conecte dois adaptadores agrupados a dois comutadores. Cada adaptador é conectado a um comutador separado:

A SFT pode detectar falhas quando elas ocorrem:

•	Em qualquer dos adaptadores agrupados

•	Nos cabos que conectam o adaptador a seu comutador

•	Nas portas dos comutadores conectados aos adaptadores

•	Nos próprios comutadores conectados aos adaptadores

Em grupos STF, um adaptador é primário e um adaptador é secundário. Durante o funcionamento normal, o adaptador secundário fica no modo de espera. Ele não recebe nem transmite tráfego de rede. Se o adaptador primário perder a conectividade, o adaptador secundário assume as funções automaticamente.

Velocidade do adaptador	Pode ser mista, com um adaptador funcionando, por exemplo, a 100 Mbps e um funcionando a 1000 Mbps.
Protocolos	Todos
Configuração de rede	• Cada adaptador é conectado a um comutador diferente: • O STP (Spanning Tree Protocol) precisa estar ativado.
Consulte também:

Sobre o Agrupamento de adaptadores

Tipos de grupos


Salvar a configuração em um arquivo externo.
Salvar a configuração em um arquivo

You can save your Intel(R) PROSet II teaming and VLAN configuration to a file and restore it back to Intel PROSet at a later time. Note que o salvamento da configuração do Intel PROSet II não salva as configurações de rede específicas do sistema operacional, como endereços IP e vínculos de protocolo.

O recurso Salvar/restaurar é compatível com o Windows Windows NT* 4.0, 2000, 98SE, Me e XP.

NOTA: Depois de salvar a configuração em um arquivo específico, você não pode usar este nome de arquivo novamente. Você precisa usar um nome diferente a cada vez que salvar a configuração do Intel PROSet II.

Para salvar a configuração do Intel(R) PROSet II:

1.	No menu Ferramentas, clique em Salvar/restaurar configuração.
Aparece o quadro de diálogo Salvar/Restaurar.

2.	Clique em Salvar.
O quadro de diálogo Salvar como aparecerá.

3.	Vá até a pasta onde você quer salvar o arquivo de configuração e digite um nome para o arquivo.

4.	Clique em Salvar.

5.	Clique em OK.

A configuração do Intel PROSet II está, agora, salva.

Depois de salvar a configuração, não edite nem modifique o arquivo. Qualquer modificação pode inutilizá-lo.

Consulte também:

Restaurar a configuração


Testar a configuração do comutador

Para verificar se os parceiros de link suportam o modo de agrupamento configurado, execute o teste da configuração do comutador. Por exemplo, se o adaptador for membro de um grupo Fast EtherChannel, o Intel(R) PROSet II pode verificar se os parceiros de link do adaptador suportam agregação de link.

Para obter informações específicas sobre os requisitos de cada modo de agrupamento, consulte Agrupamento de adaptadores .

Importante: Durante a execução do teste, o grupo perde temporariamente a conexão com a rede.

NOTA: Este teste não detecta erros em nenhuma das seguintes situações:

Configuração do adaptador	Configuração do comutador
802.3ad Dinâmico	Qualquer um
Agrupado no modo de agregação de link sem VLANs.	O comutador: • Não pertence a nenhuma VLAN ou • Está configurado com VLANs rotuladas
Agrupado no modo de agregação de link com VLANs.	O comutador: • Não pertence à VLAN configurada no adaptador e • Não tem a agregação de link configurada.
Para executar o teste de configuração do comutador:

1.	Na Árvore dos componentes de rede , clique no grupo que você quer testar.
Para executar o teste, deve haver pelos dois adaptadores no grupo.

2.	Na guia Configuração do grupo, clique em Testar a configuração do adaptador.
Aparece o quadro de diálogo Teste de configuração do comutador.

3.	Para prosseguir com o teste, clique em Sim.
Se for detectado erros de configuração de grupo ou de parceiro de link aparecerá a Guia solução de problema.

NOTA:  Por causa do tempo necessário para testar o STP (Spanning Tree Protocol), o Intel(R) PROSet II pode não indicar precisamente se o STP está ativado na rede. Verifique se os comutadores estão configurados com o STP:

•	Ativado para grupos SFT.

•	Desativado (portfast) para todos os outros modos de grupos.


Isenção de responsabilidade sobre produtos de terceiros
* Outros nomes de produtos e de empresas podem ser marcas de outras companhias e são usadas somente para explicações e para o benefício do proprietário, sem intenção de infringimento dos direitos de copyright.


Configurar o gerenciamento de energia
Configurar o uso de energia

Usando a guia 'Economizador de energia' você pode configurar o uso de energia do adaptador.  Quando está no modo de economia de energia, o adaptador funciona a 10 Mbps.

Para suportar este recurso, o adaptador precisa:

•	Estar configurado para velocidade negociada automaticamente e

•	Estar conectado a um parceiro de link com capacidade de negociação automática de velocidade

Se o adaptador for forçado a funcionar a 100 Mbps ou se o parceiro de link não puder funcionar a 10 Mbps, o recurso de economia de energia não poderá ser usado.

Em alguns computadores, as configurações de economia de energia não são salvas depois da reinicialização. Se as configurações não forem salvas, a parte superior da guia Economizador de energia mostrará o texto Economizador temporário de energia. Nos sistemas Windows XP ou Windows Server 2003 as configurações não são salvas.

Se as configurações não mudarem depois da reinicialização do computador, a parte superior mostrará o texto Configurações do economizador de energia.

NOTA: Quando a economia de energia está ativada, os adaptadores Intel(R) PRO/100 M trabalham com ciclos de processamento mais lentos. O recurso permite que os adaptadores Intel PRO/100 M diminuam ainda mais o consumo de energia. Outros adapatadores Intel PRO/100 não reduzem os ciclos de processamento para economizar energia.

Na guia 'Economizador de energia' você pode personalizar:

•	Uso total de energia do adaptador. Quando esta configuração é definida, ela permanece efetiva até ser mudada. Se o adaptador for desativado, esta configuração não é salva.

•	Uso de energia no modo de espera. Quando o computador entra no modo de espera, o adaptador começa automaticamente a economizar energia e a negociar a 10 Mbps. O Intel PROSet II conserva esta configuração entre reinicializações do computador.

•	Uso de energia na operação por bateria no Windows* XP. Quando o computador está no modo de bateria, o adaptador começa automaticamente a economizar energia e a negociar a 10 Mbps. O Intel PROSet II conserva esta configuração entre reinicializações do computador.

Adaptadores suportados	adaptadores Intel(R) PRO/100
Sistemas operacionais suportados	• Windows* 98, 2000, XP, Me e NT* para definir o consumo geral de energia ou o consumo de energia no modo de espera (standby). • Windows XP para definir o consumo de energia no modo de operação por bateria.
Padrão	Por padrão, o adaptador continua a consumir a energia necessária para manter as configurações de velocidade e modo duplex.  No modo de economia de energia, o adaptador negocia a velocidade de 10 Mbps, reduzindo a quantidade total de tráfego manipulada.
Para configurar o uso de energia do adaptador

1.	Na Árvore dos componentes de rede, clique no adaptador para o qual você quer configurar o consumo de energia.
Se o adaptador suportar gerenciamento de energia, a guia Economizador de energia aparecerá.

2.	Para reduzir o consumo geral de energia, clique em Usar baixo consumo e negociar a velocidade de 10Mbps e depois clique em Aplicar. O adaptador mantém esta configuração enquanto ela permanecer ativada.
Para definir o uso normal de energia e a velocidade padrão, clique em Usar o consumo normal e a velocidade original e clique em Aplicar.

3.	Para reduzir a energia consumida pelo adaptador quando o computador está no modo standby, clique em Baixo consumo durante o modo de espera.

4.	Se o adaptador estiver em um computador Windows XP,  você pode também definir as configurações do economizador de energia quando o computador está sendo alimentado por bateria. Para reduzir a energia consumida pelo adaptador quando o computador está no modo de alimentação por bateria, clique em Baixo consumo durante a operação por bateria.

5.	Clique em OK para aplicar a configuração de energia.


Equilíbrio de carga de recepção

Com os grupos ALB (Adaptive Load Balancing), você pode optar por ativar ou desativar o RLB (Receive Load Balancing). A opção RLB está sempre disponível:

•	Na guia 'Configurações avançadas' de um grupo ALB (Adaptive Load Balancing).

•	Ao criar um grupo ALB usando o Assistente de agrupamento

Se você desativar o RLB, apenas o adaptador primário receberá tráfego. Todos os adaptadores fazem o equilíbrio do tráfego de saída (transmissão).

Se você ativar o RLB, a distribuição de tráfego dependerá das diferenças de velocidade entre os membros do grupo.

•	Em um grupo de velocidade uniforme, todos os adaptadores transmitirão e receberão o tráfego IP. O adaptador primário passa tráfego não-roteado (camada 2).

•	Num grupo de velocidades mistas, os membros do grupo com a conexão mais rápida carregam o tráfego de entrada (Rx) IP. Todos os adaptadores fazem o equilíbrio do tráfego IP de saída (transmissão).  O adaptador primário passa tráfego não-roteado (camada 2). OBSERVAÇÕES: Com o RLB ativado, o Intel(R) PROSet II seleciona automaticamente o Adaptador preferencial primário. Você pode mudar a seleção padrão Especificando um adaptador como o adaptador primário ou o adaptador secundário.

Consulte também:

Sobre o Agrupamento de adaptadores

Criar novo grupo


Parâmetros avançados dos adaptadores PRO/100 VE e VM
Parâmetros avançados dos adaptadores Intel(R) PRO/100 VE e VM

As configurações mostradas na guia Avançado permitem personalizar o modo como o adaptador trabalha com mudanças de link, com offloads e outros recursos. Alguns dos recursos a seguir podem não estar disponíveis dependendo do sistema operacional que você está usando e dos adaptadores instalados.

Configurações avançadas

Espaçamento adaptativo entre frames

Faz a compensação de colisões excessivas de pacotes Ethernet na rede.  Por padrão, esta configuração é definida em 0, o que desabilita o recurso.

A configuração recomendada (1) funciona melhor para a maioria dos computadores e redes pois se adapta dinamicamente às condições de tráfego da rede. O modo dinâmico só estará ativo quando o valor for 1. Porém, em alguns casos raros, você pode obter um desempenho melhor definindo manualmente o valor do espaçamento. O espaçamento força um intervalo entre os pacotes.

Quanto mais alto for o valor, maior será o atraso entre frames transmitidos.

Adaptadores suportados	Todos
Padrão	0: desabilitado
Faixa	0-255

Resposta adaptável do link

Aumenta a velocidade de inicialização do sistema pois deixa de executar as rotinas que exigem conectividade de rede quando o cabo estiver desconectado do adaptador. O tempo de inicialização do sistema é consideravelmente reduzido.

Quando a Resposta adaptativa de link está ativada nos controladores Ethernet e não há um cabo de rede conectado à porta RJ-45, a conexão de rede é desativada. Uma marca amarela de atenção aparecerá ao lado da conexão de rede no Gerenciador de dispositivos.

Para reativar a conexão de rede, conecte o cabo à porta RJ-45 e reinicialize o computador.

Adaptadores suportados	Apenas adaptadores móveis. Não está disponível em todos os modelos de adaptadores.
Padrão	Desligada
Recomendado	Aceso
Faixa	Ativado, desativado
NOTA: O Adaptive Link Response (ALR) não funcionará quando um adaptador sem fio estiver ativo no sistema.

Buffers de coalescência

Otimizam o desempenho de transmissão personalizando o número de buffers de coalescência que permitem que o adaptador agrupe segmentos de dados antes de criar o pacote de transmissão.

O parâmetro 'buffers de coalescência' precisa estar configurado para funcionar com o parâmetro 'Descritores de transmissão'. O valor de buffers de coalescência deve ser 30 a 50 % do valor de descritores de transmissão. Se o parâmetro buffers de coalescência não for mudado para combinar com os descritores de transmissão, o desempenho de transmissão pode não melhorar.

O parâmetro buffers de coalescência aumenta significativamente o desempenho de transmissão em computadores Windows NT 4.0. Ele também aumenta o desempenho de transmissão em computadores Windows 98 e 2000.

Padrão	8
Valor recomendado	8
Faixa	1-32
LAA (Locally Administered Address)

Este endereço se sobrepõe ao endereço MAC do adaptador. Para inserir um novo endereço de rede, digite um número hexadecimal de 12 dígitos na caixa 'Valor'.

Padrão	Não
Faixa	0000 0000 0001 - FFFF FFFF FFFD Exceções: • Não use como endereço de multidifusão (bit menos significativo do byte alto = 1).  • Do not use all zeros or all F’s.
Usuários do Windows 98SE:

Se você quiser usar o endereço padrão depois de usar um endereço atribuído manualmente, execute um destes procedimentos:

•	Na guia Avançado da caixa de diálogo Propriedades da rede, selecione Endereço administrado localmente e altere o valor para 0. Clique em OK para aplicar a configuração.

•	Em Intel PROSet II, clique na guia Avançado, depois clique em Restaurar padrão ou apague todos os caracteres do campo Valor. Clique em OK para aplicar a configuração.

Eficiência de barramento PCI

Habilita o adaptador a usar o melhor método de transmissão de pacotes ou força a coalescência de pacotes o tempo todo.

•	Quando 'Eficiência do barramento PCI' estiver desabilitada, o adaptador usará o método de transmissão que garanta o melhor desempenho possível. Se a coalescência de pacotes oferecer o melhor desempenho de transmissão, o adaptador adota automaticamente esta configuração.

•	Quando 'Eficiência do barramento PCI' está habilitada, o adaptador força a coalescência de pacotes.

Defina 'Eficiência do barramento PCI' como desabilitada se houver problemas de desempenho de transmissão de pacotes. Se houver um número grande de déficits ou se o barramento PCI tiver problemas de desempenho, habilite esta configuração.

Padrão	Desativado
Faixa	Ativado, desativado

Buffers de recepção

Especifica o número de buffers usados pelo driver ao copiar dados na memória do protocolo.

Em situações de cargas altas de rede, o aumento do número de buffers de recebimento pode melhorar o desempenho. A contrapartida é que a quantidade de memória do sistema usada pelo driver também aumenta. Em outros casos, a modificação deste valor pode degradar o desempenho do sistema.  Use-a sob seu próprio risco.

Padrão	48
Valor recomendado	• Adaptador único no Windows 98, Windows Me, Windows 2000 e Windows XP: 48 • Adaptador único no Windows NT 4.0: 32 • Adaptador de grupo: 250
Faixa	8-1024
Retransmitir espaçamento entre frames

Aumenta o atraso entre retransmissões de frames. Embora exista um algoritmo Ethernet incorporado que os adaptadores usam para retransmitir frames após colisões, o aumento do atraso pode melhorar o desempenho da rede se houver um número anormalmente grande de colisões.

Adaptadores suportados	Todos
Padrão	6
Faixa	6-15

Blocos de controle de transmissão

Define o número de blocos de controle de transmissão, que são segmentos de dados que habilitam o adaptador a rastrear pacotes de transmissão na memória do sistema. Dependendo do tamanho do pacote, ele pode exigir um ou mais blocos de controle de transmissão.

Você pode aumentar o número de blocos de controle de transmissão se notar um possível problema de desempenho de transmissão. Embora o aumento do número de blocos de controle possa melhorar o desempenho de transmissão, eles consomem memória do sistema. Se o desempenho de transmissão não  for problema, use o valor recomendado de 32.

Padrão	16
Valor recomendado	32
Faixa	8-64
Ativar com mudança de link

Desperta o computador se a conexão de rede estabelecer um link quando o computador estiver em modo de espera. Você pode habilitar o recurso, desativá-lo ou deixar o sistema operacional usar o padrão.

Sistemas operacionais suportados	Windows 9x, Windows 2000, Windows XP
Faixa	Desabilitado, forçado, dependente do SO
Padrão	Desativado
Configurações de ativação remota

Estas configurações correspondem aos recursos que são ativados pelo sistema operacional ou pelo Intel(R) PROSet II. Os recursos funcionam de forma diferente ou não são suportados, dependendo da sua versão do Windows.

•	Estas versões do Windows suportam configurações de ativação remota: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	Estas versões do Windows não suportam configurações de ativação remota:  Windows 98 versão de varejo e Windows NT 4.0.

NOTA: Apenas os adaptadores de servidor e de gerenciamento Intel(R) PRO/100+ e Intel(R) PRO/100 S suportam configurações de ativação remota.

Habilitação das configurações de ativação remota no sistema operacional

Os seguintes tipos de pacotes de ativação remota exigem que o sistema operacional tenha as configurações de ativação remota habilitadas:

•	Ativar com ARP

•	Ativar com pacote dirigido

•	Ativar com NBT

Para que o adaptador responda a estes tipos de pacotes de ativação remota, o sistema operacional precisa estar habilitado a usar as configurações de ativação remota. Para habilitar as configurações de ativação remota, vá para o 'Gerenciador de dispositivos' e ative a opção Este dispositivo pode ativar novamente o computador. Para encontrar esta opção:

1.	Clique em Iniciar > Painel de controle.
A janela 'Painel de controle' aparecerá.

2.	Clique duas vezes em Sistema.
O quadro de diálogo 'Sistema' aparecerá.

3.	Clique na guia Hardware e pressione o botão Gerenciador de dispositivos.
É aberta a janela do Gerenciador de dispositivo.

4.	Clique duas vezes no adaptador cujas configurações de ativação remota você quer habilitar.
Aparece o quadro de diálogo Propriedades.

5.	Clique na guia Gerenciamento de energia.

6.	Clique em Este dispositivo pode ativar novamente o computador para habilitar as configurações de ativação remota do adaptador.

Parâmetro disponíveis

Estes parâmetros Wake On estão disponíveis no Intel PROSet II:

Parâmetro	Descrição
Desativado	O adaptador não usará os parâmetros Wake On.
Ativar com Magic Packet	Habilita o adaptador a ser ativado ao receber um Magic Packet. Magic Packet é um pacote que contém 16 cópias consecutivas do endereço Ethernet do adaptador de destino. Quando você configura este recurso, o Intel PROSet II sobregrava o valor atribuído pelo sistema operacional.
Ativar com pacote dirigido	Habilita o adaptador a ser ativado quando ele recebe um Pacote dirigido, que é um pacote unicast enviado ao endereço MAC do adaptador.  O protocolo precisa habilitar este modo de ativação no driver. Se você desselecionar este recurso, o driver vai ignorar as solicitações do protocolo para habilitar este modo de ativação.
Wake on Magic e Directed Packets	Habilita o adaptador para ativar quando ele recebe um Magic Packet ou um Directed Packet.
Controlado por SO	Dá ao sistema operacional controle completo dos Parâmetros de ativação.

NOTA: Se o adaptador tiver vários endereços IP, o sistema operacional pode solicitar a ativação remota com padrões ARP para todos os endereços IP configurados. O adaptador só ativará quando os pacotes ARP consultares o primeiro endereço IP na lista.

NOTA: As configurações de ativação remota não incluem a capacidade de ativar um computador que está desligado (estado S5). Esse estado é controlado pelo parâmetro Habilitar PME, que também está disponível na Guia Avançado. Mesmo se os parâmetros de ativação estiverem desabilitados, a capacidade de ativar do S5 é determinada pelo parâmetro Habilitar PME.

Os parâmetros PME funcionarão enquanto o driver do adaptador estiver habilitado. Se o driver for desabilitado, o dispositivo reverterá para o padrão do hardware que pode ou não permitir ao computador ser ativado ou desligado.


Tipos de grupos

Com o Intel(R) PROSet II você pode configurar os seguintes grupos:

•	SFT (Switch Fault Tolerance)

•	SFT (Switch Fault Tolerance)

•	ALB (Adaptive Load Balancing). Inclui RLB (Receive Load Balancing).

•	FEC* / LA / 802.3ad: Estático

GEC* / LA / 802.3ad: Estático

•	IEEE 802.3ad: Dynamic

AFT (Adapter Fault Tolerance)

Recursos	• Transferência em caso de falha Fornece redundância automática para o adaptador. Se o adaptador primário falhar, o segundo assume automaticamente.
Configuração de rede	• Todos os adaptadores precisam estar conectados ao mesmo comutador. • O STP (Spanning Tree Protocol) precisa estar desativado. • Todos os tipos de comutadores são suportados

Switch Fault Tolerance

Recursos	• Transferência em caso de falha Cria um relacionamento de transferência (em caso de falha) entre dois adaptadores conectados a comutadores diferentes.
Configuração de rede	• Cada adaptador é conectado a um comutador diferente: • O STP (Spanning Tree Protocol) precisa estar ativado.

Adaptive Load Balancing  (ALB)

Recursos	• Capacidade de voltar à configuração anterior em caso de falha • Equilíbrio de carga de transmissão • RLB de trágefo IP (opcional)
Configuração de rede	• Todos os adaptadores precisam estar conectados ao mesmo comutador. • Todos os tipos de comutadores são suportados

FEC/LA/802.3ad: Static

Recursos	• Capacidade de voltar à configuração anterior em caso de falha • Equilíbrio de carga de transmissão • Equilíbrio de carga de recepção
Configuração de rede	• Todos os adaptadores precisam trabalhar a 100 MBs. • Todos os adaptadores precisam estar conectados ao mesmo comutador. • Precisam ser usados com comutadores que suportem agregação de link: • Comutadores Cisco com capacidades FEC usando o protocolo PAgP • Comutadores Intel Express(R) com capacidade de agregação de link • Outros comutadores compatíveis com 802.3ad estático

GEC/LA/802.3ad: Static

Recursos	• Capacidade de voltar à configuração anterior em caso de falha • Equilíbrio de carga de transmissão • Equilíbrio de carga de recepção
Configuração de rede	• Todos os adaptadores precisam trabalhar com 1000 MBs. • Todos os adaptadores precisam estar conectados ao mesmo comutador. • Precisam ser usados com comutadores que suportem agregação de link: • Comutadores Cisco com capacidade GEC usando o protocolo PAgP • Comutadores Intel Express com capacidade de agregação de link • Outros comutadores compatíveis com 802.3ad estático

IEEE 802.3ad: Dynamic

Recursos	• Capacidade de voltar à configuração anterior em caso de falha • Equilíbrio de carga de transmissão • Equilíbrio de carga de recepção
Configuração de rede	• O membros do grupo podem operar com velocidades diferentes • Todos os adaptadores precisam estar conectados ao mesmo comutador. • O comutador conectado aos adaptadores devem suportar plenamente o padrão IEEE 802.3ad
Consulte também:

Sobre o Agrupamento de adaptadores


Registro de diagnóstico
Configurar o registro de diagnósticos

O Intel PROSet II salva as informações dos testes de diagnósticos e do teste do Emissor/Respondedor em um registro de diagnósticos.

Para configurar o registro de diagnósticos:

1.	Abra o Editor de registro. Clique em Iniciar > Executar. Na caixa Abrir, digite regedit.
O Editor de registro abre.

2.	Vá para a chave de registro HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Modifique os parâmetros do registro.

Tarefa	Nome	Valor padrão	Valores possíveis
Ativar ou desativar o registro de diagnósticos	Ativar	1: Ativar	1: Ativar 0: Desativar
Local do arquivo de registro	FilePath	System32	Qualquer caminho válido do sistema
Define se o Intel PROSet II mantém ou apaga as informações existentes no registro.	FileAppend	1: Ativar	1: Adiciona informações ao registro existente. 0: Apaga as informações sempre que o usuário executar os teste de diagnósticos ou o teste do Emissor/Respondedor.
Define o tamanho máximo do arquivo de registro, em bytes.	MaxFileSize	36 kb	Número de bytes de informação que o registro pode conter.
4.	Feche o editor do registro quando terminar de fazer as alterações das configurações.


Diagnóstico: visão geral
Visão geral dos diagnósticos

O Intel(R) PROSet II tem três tipos de testes de diagnósticos:

•	Testes de diagnósticos que fazem uma análise básica do funcionamento do adaptador.  Durante os testes de diagnósticos básicos, o Intel PROSet II procura conflitos de E/S, problemas de memória, verifica a operação da EEPROM, a funcionalidade de transmissão e recepção e o link.

•	O teste do cabo fornece informações sobre o comprimento, a polaridade e outras propriedades do cabo.

•	O teste de Emissor / Respondedor analisa a funcionalidade do adaptador na rede. Este é um teste mais avançado que precisa de dois computadores.

Os resultados aparecem no Intel PROSet II. Além disso, o Intel PROSet II salva os resultados dos testes de diagnósticos e do teste de emissor/respondedor em um arquivo de registro. Consulte Configurar o registro de diagnósticos para obter mais informações.


Especificações dos adaptadores

Controlador	ID da placa	Nome do produto (conectores)	Part number Intel
82545EM	A92165-xxx	Adaptador de servidor PRO/1000 MT	PWLA8490MT
82546EB	A92111-xxx	Adaptador de servidor PRO/1000 MT de porta dupla	PWLA8492MT
82545EM	A91622-xxx	Adaptador de servidor PRO/1000 MF	PWLA8490MF
82545EM	A91624-xxx	Adaptador de servidor PRO/1000 MF (LX)	PWLA8490LX
82546EB	A91620-xxx	Adaptador de servidor PRO/1000 MF de porta dupla	PWLA8492MF
82540	A78408-xxx	Adaptador de desktop PRO/1000 MT	PWLA8390MT
82544 GC	A62947-xxx	Desktop PRO/1000 T	PWLA8390T
82544 EI	A50484-xxx	Adaptador de servidor PRO/1000 XF	PWLA8490XF
82544 EI	A73668-xxx	Adaptador de servidor PRO/1000 XT para PCI de baixo perfil	PWLA8490XTL
82544 EI	A51580-xxx	Adaptador de servidor PRO/1000 XT	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	Adaptador de servidor PRO/1000 T	PWLA8490T
82543 GC	738640-xxx A38888-xxx	Adaptador de servidor Gigabit PRO/1000 F	PWLA8490SX
82542	700262-xxx 717037-xxx	Adaptador de servidor Gigabit PRO/1000	PWLA8490
82562	A19716-xxx	Adaptador de desktop PRO/100 VE	CNLA6000
82550	A78921-xxx	Adaptador de desktop PRO/100 M	A69928-01
82550	751767-xxx	Desktop PRO/100 S (par trançado)	PILA 8460C3
82550	752438-xxx	Servidor PRO/100 S (par trançado)	PILA8470C3
82550	A56831-xxx	Adaptador de servidor PRO/100 S de porta dupla	PILA8472C3
82559	741462-xxx	PCI PRO/100+ (par trançado)	PILA8460BN
82559	721383-xxx	Adaptador de gerenciamento de PCI PRO/100+ (par trançado)	PILA8460B
82559	748566-xxx	Gerenciamento PRO/100 S (par trançado)	PILA8464BUS
82559	748564-xxx	Gerenciamento PRO/100 S (par trançado)	PILA8464B
82559	742252-xxx	Adaptador InBusiness™ 10/100	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	Adaptador de PCI EtherExpress™ PRO/100B (par trançado)	PILA8465B
82559	352433-xxx	PCI T4 PRO/100B (par trançado)	PILA8475B
82559	351360	EISA PRO/100 (par trançado)	EILA8265
82559	351361-xxx	PCI PRO/100 (par trançado)	PILA8465
82559	651538-xxx	ISA PRO/100 (par trançado)	PCLA8560
82559	670666-xxx	Placa de PC móvel PRO/100 (par trançado)	MBLA1600
82559	670667-xxx	CardBus móvel PRO/100 (par trançado)	MBLA3200
82559	687755-xxx	Placa de PC móvel LAN+Modem56 PRO/100 (par trançado)	MBLA1656
82559	748568-xxx	Servidor PRO/100 S (par trançado)	PILA8474BUS
82559	748565-xxx	Servidor PRO/100 S (par trançado)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PCI PRO/100+ (par trançado)	PILA8460
82558	691334-xxx	Adaptador de gerenciamento de PCI PRO/100+	PILA8900
82558	701738-xxx	Adaptador de gerenciamento de PCI PRO/100+ (par trançado)	PILA8461
82558	714303-xxx 711269-xxx	Adaptador de servidor PRO/100+ de porta dupla	PILA8472
82559	729757-xxx	Adaptador de servidor PRO/100+ (par trançado)	PILA8470B
82558	710550-xxx	Adaptador de servidor de PCI PRO/100+ (par trançado)	PILA8470


FEC
FEC* /LA/802.3ad: Estático

Os grupos Fast EtherChannel (FEC) e de agregação de link (LA - Link Aggregation) aumentam a velocidade de processamento de dados através da:

•	Configuração do adaptador. Com a adição de membros a um grupo, a velocidade de processamento de dados pode aumentar. Os grupos podem ter até oito adaptadores. Cada servidor pode operar com até quatro grupos.

•	Análise de tráfego. O software analisa continuamente a carga de transmissão de cada membro do grupo e a distribui entre os adaptadores, conforme a necessidade. A carga do comutador equilibra o tráfego de recepção.

Além disso, os grupos FEC têm tolerância a falhas. Se um adaptador do grupo deixa de funcionar, um adaptador secundário assume as suas funções.

Os grupos de agregação de link são compatíveis com:

Velocidade do adaptador	Todos os adaptadores precisam trabalhar à mesma velocidade.
Configuração de rede	• Todos os adaptadores precisam trabalhar a 100 MBs. • Todos os adaptadores precisam estar conectados ao mesmo comutador. • Precisam ser usados com comutadores que suportem agregação de link: • Comutadores Cisco com capacidades FEC usando o protocolo PAgP • Comutadores Intel Express(R) com capacidade de agregação de link • Outros comutadores compatíveis com 802.3ad estático
Protocolos	Todos

Consulte também:

Sobre o Agrupamento de adaptadores

Tipos de grupos


GEC
GEC* /LA/802.3ad: Estático

Os grupos de Gigabit EtherChannel (GEC) e de agregação de link (LA) aumentam a taxa de rendimento através de:

•	Configuração do adaptador. Com a adição de membros a um grupo, a velocidade de processamento de dados pode aumentar. Os grupos podem ter até oito adaptadores. Cada servidor pode operar com até quatro grupos.

•	Análise de tráfego. O software analisa continuamente a carga de transmissão de cada membro do grupo e a distribui entre os adaptadores, conforme a necessidade. A carga do comutador equilibra o tráfego de recepção.

Além disso, os grupos GEC têm tolerância a falhas. Se um adaptador do grupo deixa de funcionar, um adaptador secundário assume as suas funções.

Os grupos de agregação de link são compatíveis com:

Velocidade do adaptador	Todos os adaptadores precisam trabalhar à mesma velocidade.
Configuração de rede	• Todos os adaptadores precisam trabalhar a 100 MBs. • Todos os adaptadores precisam estar conectados ao mesmo comutador. • Precisam ser usados com comutadores que suportem agregação de link: • Comutadores Cisco com capacidade GEC usando o protocolo PAgP • Comutadores Intel Express(R) com capacidade de agregação de link • Outros comutadores compatíveis com 802.3ad estático
Protocolos	Todos

Consulte também:

Sobre o Agrupamento de adaptadores

Tipos de grupos


Desativar Gerenciamento de energia do adaptador da rede

1. No desktop do Windows, clique o botão direito em Meu Computador

2. Clique em Propriedades.

3. Clique na guia Gerenciador de dispositivos.

4. Clique duas vezes no ícone Adaptadores de rede.

5. Clique duas vezes no Adaptador de rede Intel.

6. Se a guia Gerenciamento de energia estiver visível, clique na mesma e certifique-se que o quadro de checagem
Permitir que o computador desligue este dispositivo para economizar energia
não está selecionado.

7. Clique em OK. Agora você pode rodar o diagnóstico.

Após rodar o diagnóstico, talvez queira restaurar o recurso Gerenciamento de energia ao selecionar o quadro de checagem na etapa 6, acima.