Copyright: Intel® PROSet Help Version 1013
Citation: Copyright © Intel Corporation 2003. All rights reserved.


Testa kabeln

Knappen Testa kabel visas på fliken Allmänt när adaptern som markerats i Nätverkskomponentträdet är antingen:

•	82550-baserad Intel(R) PRO/100 S Server- eller Desktop-adapter utan någon länk till nätverket

•	Intel(R) PRO/1000-adapter

Så här kör du kabeltestet för Intel PRO/100-adaptrar

På fliken Allmänt klickar du på Testa kabel. Testet kan ta flera minuter att utföra.

Testresultatet visas på fliken Felsökning.

Så här kör du kabeltestet för Intel PRO/1000-adaptrar

Innan du kör kabeltestet ska du verifiera att adaptern använder 1000 Mbps. Även om du kan använda kabeltestet när adaptern använder 100 MB/sek kan viss information vara otillförlitlig eller inte tillgänglig.

På fliken Allmänt klickar du på Testa kabel. Testet kan ta flera minuter att utföra.

Testresultatet visas i dialogrutan Resultat för kabeltest. Följande information visas:

Kabellängd: Visar den ungefärliga längden på kabeln mellan adaptern och dess länkpartner. Om den rapporterade kabellängden skiljer sig från den faktiska kabellängden kan detta indikera att det finns ett avbrott i kabeln. Felmarginalen är upp till 10 meter.

Polaritet: Identifierar +/- för skicka och ta emot i en TPE-nätverkskabel för Ethernet. Om dessa egenskaper inte är korrekt konfigurerade korrigeras adaptern automatiskt och rapporterar felet.

Lokal mottagarstatus: Identifierar huruvida den kabelkontakt som är ansluten till adaptern kan hantera trafik. Om det lokala testet ger fel ska du kontrollera kontakten för att se om den har brott eller felkopplingar.

Fjärrmottagarstatus: Den kabelkontakt som är ansluten till länkpartnern antingen klarar funktionstesterna eller ger fel. Om fjärrtestet ger fel ska du kontrollera kontakten för att se om den har brott eller felkopplingar.

Antal mottagningsfel: Mottagningsfel inträffar när adaptern noterar en oigenkännlig överföring på kabeln.
Antalet mottagningsfel ökar normalt när adaptern upprättar kommunikation med nätverket (när kabeln ansluts till adaptern eller när datorn startas om), eller när adaptern startar om efter automatisk förhandling. Om antalet fel vid inaktivitet når ungefär 65 000 inom fem minuter finns det ett problem med länkkvaliteten. Du kan försöka lösa länkkvalitetsproblem genom att ansluta kabeln på nytt eller använda en annan kabel.

Antal fel vid inaktivitet: Antalet fel vid inaktivitet ökar när adaptern tar emot en oigenkännlig överföring på kabeln. I motsats till mottagningsfel upptäcks fel vid inaktivitet när adaptern inte aktivt tar emot paket.
Antalet fel vid inaktivitet inträffar normalt när adaptern upprättar kommunikation med nätverket (när kabeln ansluts till adaptern eller när datorn startas om), eller när adaptern startar om efter automatisk förhandling. Om antalet fel vid inaktivitet når ungefär 255 inom en minut finns det ett problem med länkkvaliteten. Du kan försöka lösa länkkvalitetsproblem genom att ansluta kabeln på nytt eller använda en annan kabel.

MDI/MDI-X-status: Identifierar om den kabel som anslutits till adaptern har en rak (MDI-) eller överkorsad (MDI-X-) konfiguration. Använd MDI när du ansluter ett system till en växel eller en hub och MDI-X när du ansluter två system.

OBS! Den information som visas i dialogrutan Resultat för kabeltest varierar beroende på adaptertyp.


Juridisk information

Copyright © 2002, Intel Corporation. Med ensamrätt.

Intel Corporation, 5200 N.E. Elam Young Parkway, Hillsboro, OR   97124-6497  USA

Intel Corporation tar inget som helst ansvar för eventuella fel eller utelämnanden i detta dokument. Intel förbinder sig inte heller att göra några uppdateringar av informationen häri.

* Övriga namn och märken kan tillhöra andra.


Avancerade inställningar för PRO/1000 Server-adaptrar

De inställningar som finns på fliken Avancerat gör att du kan anpassa hur adaptern hanterar markering av QoS-paket, jumboramar, avlastningar och andra möjligheter. Några av följande funktioner kan vara otillgängliga beroende på vilket operativsystem du kör och vilka adaptrar som finns installerade.

Avancerade inställningar

Anpassningsbart avstånd mellan ramar

Kompenserar för alltför många Ethernet-paketkollisioner på nätverket.  Som standard är denna inställning 0, vilket avaktiverar funktionen.

Den rekommenderade inställningen (1) fungerar bäst för flertalet datorer och nätverk eftersom den dynamiskt anpassas till nätverkets trafikförhållanden. Detta dynamiska läge är endast aktivt när värdet är 1. I vissa sällsynta fall kan du kanske erhålla bättre prestanda genom att ange avståndsvärdet manuellt. Genom att ange ett värde framtvingar du ett statiskt mellanrum mellan paket.

Ett större värde ger längre fördröjning mellan de ramar som överförs.

Adaptrar som stöds	Alla
Standard	0: avaktiverad
Intervall	0-255

Anpassningsbart länksvar

Gör att datorn startar upp snabbare genom att hoppa över startrutiner som kräver nätverksanslutning när kabeln inte är ansluten till adaptern. Detta minskar betydligt datorns uppstartningstid.

När Anpassningsbart länksvar för Intel Ethernet-styrenheter är aktiverat, och det inte finns en nätverkskabel som är ansluten till RJ-45-porten, inaktiveras nätverksanslutningen. Då visas en gul varningsikon vid sidan om nätverksanslutningen i Enhetshanteraren.

Du kan aktivera nätverksanslutningen igen genom att ansluta nätverkskabeln till RJ-45-porten och sedan starta om datorn.

Adaptrar som stöds	Inte tillgängligt på varje adaptermodell.
Standard	Av
Rekommenderat	På
Intervall	På, Av
OBS! ALR (Adaptive Link Response) fungerar inte när det finns ett trådlöst kort som är aktivt i systemet.

Sammanslagningsbuffertar

Optimerar överföringsprestanda genom att anpassa antalet sammanslagningsbuffertar som gör att adaptern kan koppla datasegment före paketöverföringen.

Inställningen för Sammanslagningsbuffert måste vara konfigurerad så att den fungerar med överföringsbeskrivarens inställning. Inställningen för Sammanslagningsbuffert bör vara 30 - 50 % av värdet för överföringsbeskrivare. Om du inte ändrar inställningen för Sammanslagningsbuffertar så att den matchar överföringsbeskrivarinställningen förbättras kanske inte överföringsprestanda.

Sammanslagningsbuffertarna förbättrar överföringsprestanda betydligt på datorer som kör Windows NT 4.0. Överföringsprestanda förbättras också på datorer som kör Windows 98 och Windows 2000.

Adaptrar som stöds	Alla
Standard	128
Intervall	16-768

Aktivera PME

Aktiverar eller avaktiverar wake-funktionen för adaptern på datorer som har äldre versioner av Avancerade energisparfunktioner (APM). Wake gör det möjligt att starta adaptern från vänteläge eller från avstängt läge när den mottar vissa pakettyper t.ex. ARP-paket.

•	Om du avaktiverar denna funktion avaktiveras alla wake-funktioner på datorer som har äldre versioner av energisparfunktionen.

•	Om denna funktion aktiveras kan adaptern svara på wake-signaler. Om du vill konfigurera adaptern för att svara på specifika pakettyper ska du läsa informationen om wake vid-inställningar senare i detta avsnitt.

•	Maskinvarans standardvärde tvingar adaptern att konfigurera Wake vid-funktioner baserat på datorns maskinvara.

•	Värdet Ingen åtgärd låter adaptern använda operativsystemets standard.

Om du vill avaktivera alla Wake vid-inställningar avaktiverar du denna funktion. Annars anger du Ingen åtgärd.

Adaptrar som stöds	82559-baserade adaptrar. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Slutför snabb överföring

Frigör överföringsbeskrivare för återanvändning innan paketen skickas ut på nätverket.

•	Med Slutför snabb överföring avaktiverad måste adaptern vänta tills paketet har skickats för att kunna återanvända överföringsbeskrivare.

•	Med Slutför snabb överföring aktiverad kan adaptern återanvända överföringsbeskrivarna tidigare, vilket gör att adaptern kan förhöja överföringsprestandan.

Adaptrar som stöds	82543- och 82544-baserade adaptrar. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	På
Intervall	På, Av
Flödeskontroll

Möjliggör att adaptern kan skicka eller ta emot flödeskontrollramar. Överföringsvägen pausas under den tid som anges i den mottagna flödeskontrollramen. Dessa inställningar hjälper till att finjustera nätverksprestanda genom att förhindra att paket utelämnas.

Adaptrar som stöds	82542-baserade adaptrar, endast vid överföring. 82540-, 82543- och 82544-baserade adaptrar, överföring och mottagning.  Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Aktiverad
Intervall	Av, Svara, Generera, Generera och svara, Maskinvarans standardvärde
Jumboramar

OBS! Jumboramar stöds endast vid 1000 Mbps. Om du använder Jumboramar vid 10 eller 100 Mbps kan det leda till dåliga prestanda eller att anslutningen bryts.

Aktiverar eller avaktiverar funktionen Jumboramar. Jumboramar kan öka kapaciteten och minska processorbelastningen genom att placera mer data i varje ram och därigenom skicka färre ramar. Standardstorleken på Ethernet-ramar är 1514 byte, medan Jumboramar kan innehålla 4088, 9014 eller 16128 byte.

Aktivera Jumboramar men bara om enheterna i nätverket stöder dem och har konfigurerats att använda samma ramstorlek. Vid inställning av Jumboramar på andra nätverksenheter ska du vara uppmärksam på att nätverksenheter beräknar jumboramarnas storlekar på olika sätt. Vissa enheter inkluderar huvudinformation i ramstorleken medan andra inte gör det. Intels adaptrar inkluderar inte huvudinformation i ramstorleken.

Mer information finns i avsnittet Jumboramar.

Adaptrar som stöds	Alla
Standard	Avaktiverad
Intervall	Avaktiverad (1514), 4088, 9014 och 16128 byte. (Ange växeln 4 byte högre för CRC, plus 4 byte om du använder VLAN.)  OBS! Vilket värde som helst i intervallet 1514-16128 kan anges i Windows registret med parametern MaxFrameSize.
Lokalt administrerad adress

Åsidosätter adapterns MAC-adress. Skriv in en ny nätverksadress genom att skriva ett tolvsiffrigt hexadecimalt tal i värderutan.

Adaptrar som stöds	Alla
Standard	Ingen
Intervall	0000 0000 0001 - FFFF FFFF FFFD Undantag: • Använd inte en multicast-adress (Minst signifikanta bit av högsta byte = 1).  • Använd inte enbart nollor eller enbart F. Inte befintlig inställning: ändrar tillbaka till adapterns ursprungliga nätverksadress.
OBS! I ett team använder Intel(R) PROSet II antingen:

•	Teamets LAA om en LAA har konfigurerats eller

•	Den primära adapterns permanenta MAC-adress om teamet inte har någon konfigurerad LAA

Intel PROSet II använder inte en adapters LAA om adaptern är den primära adaptern i ett team och teamet har en LAA.

Windows 98SE-användare:

Om du vill använda standardadressen efter att ha använt en manuellt tilldelad adress utför du en av följande procedurer:

•	På fliken Avancerat i dialogrutan Nätverksegenskaper markerar du Lokalt administrerad adress och ändrar dess värde till 0. Klicka på OK för att verkställa inställningen.

•	I Intel PROSet II klickar du på fliken Avancerat, klicka sedan på Återställ standardvärden eller radera alla tecken i fältet Värde. Klicka på OK för att tillämpa inställningen.

Logga länklägeshändelsen

Denna inställning används för att aktivera/inaktivera loggningen av ändringar i länkläget. Om inställningen är på genererar en ändringshändelse av typ länk upp eller länk ner ett meddelande som visas i systemets händelselogg. Administratörer visar händelsemeddelandet i systemets händelselogg.

Följande händelser loggas.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Adaptrar som stöds	Alla
Standard	Aktivera
Intervall	Aktivera, Avaktivera
Avlastning av kontrollsumma för TCP, mottagning

Möjliggör att adaptern verifierar kontrollsumman för TCP eller UDP för inkommande paket.

•	Med avlastning avaktiverad verifierar operativsystemet kontrollsumman för TCP.

•	Med avlastning aktiverad utför adaptern verifieringen åt operativsystemet.

Denna funktion förbättrar mottagningsprestanda och minskar processorbelastning.

Operativsystem som stöds	• Windows XP* • Windows 2000 • Windows 98 stöder inte avlastning.
Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	• Windows* XP: På • Windows 2000: Av
Intervall	På, Av
Avlastning av TCP-segmentering

Möjliggör att adapterns maskinvara kan segmentera data till giltiga Ethernet-ramar.

•	Med TCP-segmentering avaktiverad segmenterar operativsystemets programvara data innan de skickas till adaptern för överföring.

•	Med TCP-segmentering aktiverad segmenterar adaptern data i ramar.

Eftersom adapterns maskinvara kan klara datasegmenteringen mycket snabbare än operativsystemets programvara förbättrar denna funktion i hög grad överföringsprestanda. Dessutom förbrukar adaptern mindre processorresurser.

Operativsystem som stöds	Windows XP
Adaptrar som stöds	82544-baserade. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	1
Intervall	0 = annonsera inte denna funktion; 1 = annonsera denna funktion.
Avlastning av kontrollsumma för IP, sändning

Möjliggör att adaptern beräknar kontrollsumman för IP för utgående paket.

•	Med avlastning avaktiverad verifierar operativsystemet kontrollsumman för IP.

•	Med avlastning aktiverad utför adaptern verifieringen åt operativsystemet.

Denna funktion förbättrar IP-sändningsprestanda och minskar processorbelastning.

Operativsystem som stöds	• Windows XP* • Windows 2000 • Windows 98 stöder inte avlastning.
Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	På
Intervall	På, Av
Avlastning av kontrollsumma för TCP, sändning

Möjliggör att adaptern beräknar kontrollsumman för TCP eller UDP för utgående paket.

•	Med avlastning avaktiverad verifierar operativsystemet kontrollsumman för TCP.

•	Med avlastning aktiverad utför adaptern verifieringen åt operativsystemet.

Denna funktion förbättrar sändningsprestanda för TCP och UDP och minskar processorbelastning.

Operativsystem som stöds	• Windows XP* • Windows 2000 • Windows 98 stöder inte avlastning.
Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	På
Intervall	På, Av OBS! Ange denna funktion som Av när servern stöder DOS-baserade klienter.
Markering av QoS-paket

Gör att adaptern kan skicka och ta emot IEEE 802.3ac-markerade ramar, vilket inkluderar:

•	802.1pIEEE_802.1p QoS-markeringar (Quality of Service eller tjänstekvalitet) krävs för prioritetsmarkerade paket och

•	802.1Q-markeringar krävs för VLAN.

Intel PROSet II aktiverar automatiskt 802.1p-markering vid konfigurering av ett VLAN.

Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Av
Intervall	På, Av
Mottagningsbeskrivare

Definierar antalet mottagningsbeskrivare som är datasegment som gör att adaptern kan allokera mottagna paket till minnet. Varje mottaget paket kräver en mottagningsbeskrivare och varje beskrivare använder 2 kb minne.

Du kan välja att öka antalet mottagningsbeskrivare om du märker en signifikant försämring av prestanda för mottagen trafik. Om mottagningsprestanda inte är ett problem använder du adapterns standardinställning.

Adapter Controller	Standard	Intervall
82542-baserad	160	80 – 768
82543-baserad	160	80 – 256
82544-baserad	160	80 – 2048
Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.

Överföringsbeskrivare

Anger antalet överföringsbeskrivare som är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket en eller flera överföringsbeskrivare.

Du kan välja att öka antalet överföringsbeskrivare om du märker ett möjligt problem med överföringsprestanda. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestandan upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem använder du standardinställningen 256.

Adapter Controller	Standard	Intervall
82542-baserad	256	80 – 768
82543-baserad	256	80 – 256
82544-baserad	256	80 – 2048
Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.

Wake vid länkändring

Väcker (använder wake på) datorn om nätverksanslutningen etablerar länk när datorn är i viloläge. Du kan aktivera funktionen, avaktivera den eller låta operativsystemet använda sitt standardvärde.

Operativsystem som stöds	Windows 9x, Windows 2000, Windows XP
Intervall	Avaktiverad, Tvingad, Operativsystemberoende
Standard	Avaktiverad

Wake vid-inställningar

Dessa inställningar avser funktioner som antingen aktiveras av operativsystemet eller av Intel PROSet. Dessa funktioner fungerar annorlunda eller stöds inte alls beroende på vilken version av Windows som du använder.

Dessa Windows-versioner stöder Wake vid-inställningar: Windows 2000, Windows XP64 bit Edition, Windows XP Professional och Windows Server 2003. Denna funktion stöds inte i Windows Server 2003 för 64-bitars Itanium(TM)-baserade system.

Aktivera Wake vid-inställningar

Du kan använda Intel PROSet när du konfigurerar den Wake vid-inställning som adaptern använder. Innan du väljer Wake vid-inställningar måste du aktivera operativsystemet så att det använder Wake vid-inställningar. Gör det genom att följa instruktionerna.

Aktivera Wake vid-inställningar

1.	I Intel PROSet klickar du på fliken Avancerat.

2.	I listrutan Inställning klickar du på Wake vid-inställningar.

3.	I listan Värde väljer du tillämplig Wake vid-inställning.

4.	Klicka på OK eller Verkställ.

5.	Innan adaptern kan reagera på dessa typer av Wake vid-paket måste du ha instruerat operativsystemet att använda Wake vid-inställningar. Du aktiverar Wake vid-inställningar genom att gå till Enhetshanteraren och aktivera alternativet Tillåt att den här enheten tvingar datorn ur vänteläge.

Tillgängliga inställningar

Dessa Wake vid-inställningar finns tillgängliga i Intel PROSet:

Inställning	Beskrivning
Avaktiverad	Adaptern använder inte Wake vid-inställningar.
Wake vid Magic Packet	Gör att adaptern kan starta som svar på mottagande av ett Magic Packet. Ett Magic Packet är ett paket som innehåller 16 sammanhängande kopior av den mottagande adapterns Ethernetadress. När du konfigurerar denna funktion åsidosätter Intel PROSet operativsystemets värde för denna funktion.
Wake vid dirigerat paket	Gör att adaptern kan starta när adaptern mottar ett dirigerat paket som är ett unicast-paket som skickas till adapterns MAC-adress.  Protokollet måste dessutom aktivera denna wake-metod i drivrutinen. Om denna funktion avaktiveras ignorerar drivrutinen alla protokollbegäran om att aktivera denna wake-metod.
Wake vid Magic- och dirigerade paket	Gör det möjligt för adaptern att vakna (wake up) när den mottar ett Magic- eller dirigerat paket.
Operativsystemstyrt	Ger operativsystemet fullständig kontroll över Wake vid-inställningarna.

OBS! Om flera IP-adresser konfigureras för en adapter kan operativsystemet begära att vakna (wake up) vid ARP-mönster till alla de konfigurerade adresserna. Adaptern vaknar bara som svar på ARP-paket som avfrågar den första IP-adressen i listan.

OBS!  Wake vid-inställningar inkluderar inte förmågan att väcka en maskin från avstängningsläge (S5). Detta läge styrs av inställningen Aktivera PME som även finns tillgänglig på fliken Avancerat. Även om Wake vid-inställningarna är avaktiverade avgörs förmågan att vakna från S5 av inställningen Aktivera PME.

PME-inställningarna fungerar under förutsättning att adapterns drivrutin är aktiverad. När drivrutinen avaktiverats återgår maskinvaran dock till sin maskinvarustandard, som, beroende på inställning, tillåter eller inte tillåter att datorn vaknar från avstängning.

Knappen Återställ standardvärden

Denna knapp återställer den för närvarande markerade avancerade inställningen med den inställningens standardvärde.  Se de inställningar som räknats upp ovan för varje standardvärde.  (Detta alternativ är inte tillgängligt för alla inställningar.)


Drivrutinsinformation
Nätverksdrivrutin

Om du vill se detaljer om en adapters drivrutin

1.	I Nätverkskomponentträdet klickar du på den adapter som du vill se information om.

2.	Klicka på fliken Drivrutiner.

Följande information visas.

Drivrutinsinformation:

Namn	Filnamn för den adapterdrivrutin som har laddats
Version	Versionsnummer för drivrutinen. Användbart när man ska ladda ner nya versioner från Intels webbplats: http://support.intel.com
Beskrivning	Drivrutinens namn
Copyright	Juridisk information
Drivrutinsstatistik:

OBS! Statistiken nedan återställs när du laddar eller uppdaterar adapterns drivrutin.

Paket skickade	Antal paket som skickats
Paket mottagna	Antal paket som tagits emot
Överföringsfel	Antal paket som skickats med fel
Mottagningsfel	Antal paket som mottagits med fel
OBS! Om du vill hämta de senaste drivrutinerna klickar du på Help > Support på menyn. På supportsidan klickar du på Get the latest drivers.


Diagnostik
Diagnostiktester

Genom adapterdiagnostik kan du analysera adapterns totala tillstånd. När diagnostiken körs kontrollerar Intel PROSet II I/O-konflikter, minnesfel, EEPROM-funktion, överförings- och mottagningsfunktion och länkning.

Resultatet för diagnostiktesterna visas på fliken Diagnostik men det sparas också i en systemlogg.

OBS!  Om datorn kör Windows 98 kanske du behöver avaktivera kortets energisparfunktioner innan du kör diagnostiken. För information, se Avaktivera proceduren för energisparfunktioner.

Enskilda tester

Namn på test	Beskrivning	Felsökningsinformation
Kontrollregister	Kontrollerar att det inte finns några konflikter i I/O-adressen och testar registrens tillgänglighet. Detta test inkluderar alla allmänna register, mottagningsregister och överföringsregister. Det testar inte EEPROM kontroll/data-register.	Om kontrollregistertestet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.
FIFO-register	Kontrollerar FIFO-minnet på adaptern genom att skriva och läsa mönster till och från adapterns FIFO-minne.	Om FIFO-registertestet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.
EEPROM	Verifierar integriteten för data som läses från EEPROM. Detta test skriver till och läser sedan från EEPROM och jämför resultatet för att se om det överensstämmer.	Om EEPROM-testet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.
Avbrott	Använder avbrottsregistret för att bekräfta att alla adapteravbrott fungerar.	Om avbrottstestet ger fel ska du försöka med att ändra avbrottsinställningarna i BIOS. Om det inte löser problemet att ändra inställningarna kan du försöka flytta adaptern till någon annan kortplats.
Loopback	Testar adapterns förmåga att skicka och ta emot paket genom att skicka paket till sig själv. Detta test använder både MAC loopback och Transceiver loopback. (Inte tillgänglig för Intel(R) PRO/1000 T-adaptern.)	Om Loopback-testet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.
Länk	Bekräftar att adaptern är länkad till en giltig partner.	Om adapterns länktest ger fel ska du kontrollera att adapterns kabel är ordentligt fäst vid adaptern och vid länkpartnern. Om kabeln sitter ordentligt ska du försöka med att ansluta kabeln till en annan port på länkpartnern eller försöka med en annan kabel.
OBS! Om diagnos körs och du klickar på Avbryt blir det en kort fördröjning innan diagnosen avbryts. När diagnostiken har avbrutits blir OK-knappen tillgänglig.

Andra inställningar

Knappen Avancerat: Klicka om du vill definiera ett nätverkstest för sändning/svar.

Varning: Testen för sändning/svar är inte avsett att köras när systemet är i viloläge, uppehållsläge eller när kabeln inte är inkopplad i datorn.


Teamkonfiguration och status
Teamkonfiguration

Så här visar du information om ett teams konfiguration

I Nätverkskomponentträdet klickar du på det team som du vill se information om.

Fliken Teamkonfiguration visas.

Statusrutan Adaptrar i teamet visar följande:

Adapter

Namn för varje adapter som inkluderats i teamet.

Prioritet

Visar prioritetsstatus för adaptrarna i teamet (om någon prioritet har angivits). En adapter kan ha primär eller sekundär prioritetsstatus i ett team.

Hur man anger en adapter som primär eller sekundär

Kolumnen Status visar följande:

•	Aktiv: Adaptern hanterar nätverkstrafik.

•	I AFT-läge är bara en adapter aktiv: den förvalda primära adaptern.

•	I läget dynamisk 802.3ad har de adaptrar som ingår i den aktiva aggregationen aktiv status.

•	Viloläge: AFT-team, SFT-team och dynamiska 802.3ad-team har stöd för viloläge. En adapter i viloläge har en länk till nätverket men hanterar inte någon trafik.

•	Avaktiverad: Adaptern har varit tagits bort, avaktiverats eller dess drivrutin har inte laddats. Dessutom är adapterns status Avaktiverad om kabeln är defekt eller om länken är bruten.

Sektionen Teaminformation visar följande:

•	Ethernet-adress: Visar den primära MAC-adressen för teamet.

•	IP-adress: Visar IP-adressen för teamet.

•	Teamtyp: Visar teamets läge.

Knappen Testa växelkonfiguration

Med hjälp av växelkonfigurationstestet kan du försäkra att länkpartners stöder den adapterteamkonfiguration som valts. Om adaptern till exempel är medlem i ett länkaggregationsteam kan Intel (R) PROSet II verifiera att länkpartners som är anslutna till adaptern stöder funktionen för länkaggregation.

Specifik information om kraven för varje teaminställning ges i sektionen Om Teaming.

När detta test körs förlorar teamet temporärt nätverksanslutningen.

OBS! Detta test upptäcker inga fel när någon av följande situationer föreligger.

Adapterkonfiguration	Växelkonfiguration
Team med länkaggregation utan VLAN	Då är det antingen så att växeln: • Inte tillhör något VLAN • Har konfigurerats med märkta VLAN
Team med länkaggregation med VLAN	Växeln: • Tillhör inte det VLAN som konfigurerats på adaptern och • Har ingen länkaggregation definierad
Så här kör du växelkonfigurationstestet

1.	I Nätverkskomponentträdet klickar du på det team som du vill testa.
För att kunna köra testet måste det finnas minst två adapters i teamet.

2.	På fliken Teamkonfiguration klickar du på Testa växelkonfiguration.
Dialogrutan Testa växelkonfiguration visas.

3.	Om du vill köra testet klickar du på Ja.
Om några konfigurationsfel för teamet eller länkpartnern upptäcks visas fliken Felsökning.

OBS!  På grund av att det tar lång tid att testa Protokoll för sammanbindande träd (STP) kanske inte Intel PROSet II med säkerhet kan ange om Protokoll för sammanbindande träd (STP) har aktiverats på nätverket. Försäkra dig om att växlarna har konfigurerats med STP:

•	Aktiverad för SFT-team

•	Avaktiverad (portfast) för alla andra teamlägen


VLAN
Översikt över VLAN

Ett VLAN är en logisk nätverksgruppering som gör det möjligt att isolera nätverkstrafik så att VLAN-medlemmarna endast tar emot trafik från andra medlemmar. Med VLAN kan du gruppera datorer i logiska arbetsgrupper vilket är av kritisk betydelse när du ansluter klienter till servrar som är geografiskt utspridda i en byggnad, en anläggning eller ett företags nätverk.

Genom att använda VLAN på nätverket kan du:

•	Begränsa risken för broadcast storm

•	Förbättra hanteringen av tillägg, flyttningar och ändringar av nätverksanslutningar

•	Minska säkerhetsproblem

•	Underlätta administrationsarbetet

Typer av VLAN

Det finns växelbaserade VLAN, som även kallas implicita VLAN, och markeringsbaserade VLAN, som även kallas explicita VLAN.

•	Implicita VLAN baseras på växelfunktioner som till exempel portnummer, MAC-adress och andra funktioner i andra lagret. Standard-VLAN för många växlar, inklusive de flesta Cisco*-produkter, är ett implicit VLAN. Implicita VLAN konfigureras endast på växeln. Växeln ändrar inte och markerar inte heller paket i syfte att påtvinga ett implicit VLAN. Alla adaptrar från Intel kan ingå i implicita VLAN.

•	Explicita VLAN baseras på tillägget av en en markering på fyra byte (802.3ac) i varje pakethuvud. Varje IEEE VLAN måste konfigureras i hela nätverket inklusive på adaptern och alla länkpartners.

Krav

VLAN kräver:

•	Växlar på nätverket som stöder 802.1Q VLAN

•	Adaptrar som stöder 802.1Q VLAN som inkluderar:

o	Intel(R) PRO/100+

o	Intel(R) PRO/100 S

o	Intel(R)PRO/1000

•	Intel(R) PRO/100B-adaptrar stöder inte VLAN.

Om du vill få en översikt över Intels VLAN-produkter kan du gå till webbplatsen för Intel Networking:

  Besök webbplatsen nu

Om du vill ha mer specifik information kan du läsa vitboken om VLAN:

  Läs vitboken nu på webbplatsen

Se även

Lägga till VLAN

Ändra VLAN-egenskaper

Ta bort ett VLAN

Avancerade inställningar för VLAN


Support

Om du har en Internet-anslutning och en webbläsare kan du gå till en av Intels supportplatser.

Så här kommer du till support på Internet:

1.	Klicka på Support på Hjälp-menyn.

2.	Klicka på någon av webbplatslänkarna.


Felsökning

Fliken Felsökning visas bara när Intel(R) PROSet II upptäcker ett problem i adapterkonfigurationen, drivrutinens installation eller något annat fel. Intel PROSet II undersöker problemet och erbjuder i de flesta fall en möjlig lösning på problemet.

Om du misstänker att det finns något problem med adaptern ska du försöka med något av följande:

•	Kontrollera informationen på fliken Allmänt för att se om det finns en aktiv länk till nätverket.

•	Om du har konfigurerat ett team ska du testa konfigurationen för länkpartners för att försäkra dig om att de stöder teamläget.

•	Kör diagnostik.

•	Kör Kabeltest om din adapter stöder det.


Test för sändning/svar

Sändning/svar-testet gör att du kan testa adaptern över ett nätverk.

Innan du kör detta test ska du försäkra att adaptern har en länk till nätverket.

Förbereda för testet

Konfigurera en dator som Sändare och en dator som Svarare. Sändaren överför paket kontinuerligt till svararen, som returnerar paketen tillbaka till sändaren.

Sändaren
Sänder kontinuerligt paket till nätverket. Välj Starta för att börja sända paket.
Innan du startar sändningen måste du ha arrangerat en svarsdator någon annan stans på nätverket. Gå till någon annan dator med Intel(R) PRO/10+, PRO/100B, PRO/100+, PRO/100 S eller PRO/1000 installerad och använd Intel(R) PROSet II för den adaptern för att konfigurera den som svarare. Om möjligt ska du använda samma adaptermodell för sändare och svarare.

Svar
Returnerar paket tillbaka till sändaren (den som skickar paket). Välj Starta för att låta denna dator fungera som svarare.

Även om testet inte är avsett för det kan det användas för att testa nätverkssegmentens kablar och nätverkskonfigurationen. Om du vill testa ett nytt LAN-segment kan du konfigurera en svarsdator i ena änden och köra ett test med en sändardator i andra änden.

Detta test verifierar anslutbarhet mellan två adaptrar. Det är inte avsett att kontrollera överföringshastigheten. Vilken hastighet som en adapter skickar eller tar emot trafik med över ett nätverk kan variera beroende på nätverkets topologi och belastning. Du kan se vilken hastighet som adaptern konfigurerats för om du klickar på fliken Allmänt.

OBS!  Om en Cisco* 6500-växel har konfigurerats med funktionen Sammanbindande träd aktiverad kommer sändning/svar-testet inte att ge något korrekt resultat. Om du ska köra sändning/svar-testet med en Cisco 6500-växel ska du se till att funktionen Sammanbindande träd är avaktiverad.

Varning: Testen för sändning/svar är inte avsett att köras när systemet är i viloläge, uppehållsläge eller när kabeln inte är inkopplad i datorn.


Nytt VLAN

VLAN-ID: VLAN-nummer tilldelas av nätverksadministratören. Adapterns VLAN-ID måste matcha det VLAN-ID som konfigurerats på växeln. Giltigt intervall:  1 - 4094. (OBS! VLAN-numren 0 och 1 är ofta reserverade. Kontrollera växelns dokumentation för information.)

VLAN-NAMN: Namn på VLAN. Exempel: Marknadsföring eller Konstruktion. VLAN-namn är en valfri inställning som gör att du lättare kan identifiera VLAN på nätverket. VLAN-namnet behöver inte matcha något VLAN-namn som konfigurerats på växeln.


Identifiera adapter

Funktionen Identifiera adapter gör att du kan identifiera den fysiska adaptern på datorns baksida.

Om du t.ex. har två adaptrar installerade kan du välja en adapter i Nätverkskomponentträdet och sedan klicka på knappen Identifiera adapter. Den markerade adapterns lysdiod blinkar.

Så här verifierar du adapterns position

1.	Klicka på Identifiera adapter.

2.	Flytta skjutreglaget för att välja antalet sekunder som lysdioden ska blinka. Standardvärdet är 10 sekunder.

3.	Klicka på Starta.

 Lysdioden för den markerade adaptern blinkar under angiven tidsperiod.


Adapterfeltolerans

Adapterfeltolerans är ett team med två eller flera adaptrar som konfigurerats för att tillhandahålla en reservnätverksanslutning. I händelse av fel på en hub eller en växelport, kabel eller adapter håller datorn igång nätverksanslutningen utan avbrott.

Adapterfeltoleransteam består av en primär adapter och en reservadapter, eller sekundär adapter. Under normal drift sköter endast den primära adaptern trafiken. Om den primära adaptern eller länken till den primära adaptern slutar fungera tar den sekundära adaptern automatiskt över.

Sammanbindande träd måste vara frånkopplat om du använder adapterfeltolerans.

Adapterfeltoleransteam är kompatibla med följande:

Adaptertyp	Kräver att en av Intels serveradaptrar är medlem i teamet
Adapterhastighet	Kan vara blandad t.ex. att en adapter är länkad för 100 MB/sek och en annan använder 1000 MB/sek
Nätverkskonfiguration	• Alla adaptrar måste vara anslutna till samma växel • Sammanbindande träd måste vara frånkopplat
Protokoll	Alla
Se även:

Om Teaming

Teamtyper


Anpassningsbar belastningsutjämning

Anpassningsbar belastningsutjämning (ALB) är en typ av team som konfigurerats för att öka din servers överförings- och mottagningskapacitet. ALB-team utjämnar automatiskt utgående trafik men utjämning för mottagen trafik kan vara aktiverad eller frånkopplad.

ALB-team höjer kapaciteten genom:

•	Adapterkonfiguration. Du kan öka kapaciteten genom att lägga till medlemmar till ett team.

•	Trafikanalys. ALB-programvaran analyserar oavbrutet överförings- och mottagningsbelastningen för varje teammedlem och utjämnar vid behov belastningen mellan adaptrarna.

Utgående trafik

För ALB-team utjämnar alla adaptrar utgående trafik för IP (IPv4 och IPv6) och NCP IPX.

Mottagen trafik

•	För ALB-team med Inkommande belastningsutjämning frånkopplad mottar endast den primära adaptern trafik.

•	För ALB-team med Inkommande belastningsutjämning aktiverad:

•	Den primära adaptern mottar trafik med alla protokoll

•	Aktiva adaptrar med de högsta hastigheterna mottar IPv4-trafik

Om det t.ex. finns ett ALB-team bestående av tre adaptrar: en gigabitadapter som anges som den primära adaptern och två Intel(R) PRO/100-adaptrar:

•	Gigabitadaptern mottar icke-dirigerbar trafik och IPv6-trafik eftersom den är den primära adaptern.

•	Gigabitadaptern mottar IPv4 eftersom den är adaptern med högsta hastigheten.

•	Intel PRO/100-adaptrarna deltar inte i belastningsutjämningen för den inkommande trafiken.

För information om att aktivera eller frånkoppla Inkommande belastningsutjämning, se  Konfigurera avancerade inställningar.

Dessutom tillhandahåller ALB-team feltolerans. Om den primära adaptern slutar fungera fortsätter teamet att fungera och utjämnar trafiken mellan de återstående fungerande teammedlemmarna.

ALB-team är kompatibla med följande:

Adapterhastighet	Kan vara blandad t.ex. att en adapter använder 100 MB/sek och en annan använder 1000 MB/sek.
Protokoll	IP, IPX (NCP) OBS! Microsoft kategoriserar sitt IPv6-stöd i Windows* 2000 som en s k Technology Preview. Som sådan var stödet för IPv6 i Windows 2000 inte avsett för en produktionsmiljö. Se systemdokumentationen för information om operativsystemstöd för IPv6.
Nätverkskonfiguration	Alla adaptrar måste vara anslutna till samma växel

Intel(R) PRO/1000 Gigabit Server Adapter - prestandaanmärkning

Eftersom Intel(R) PRO/1000-adapterns bandbredd redan stöder sådan hög bandbredd kan en användning av ALB-funktionen kanske orsaka försämrade prestanda på en del servrar. Detta beror på att många servrar som finns idag inte har den processor- eller busskapacitet som krävs för att effektivt hantera grupperad adapterbandbredd i gigabitklassen. I syfte att uppnå bästa resultat med ALB ska du använda nyare servrar som har stöd för flera PCI-bussar och som har flera Pentium II(R)-processorer med en hastighet på 400 MHz eller mer. På en sådan server ska de grupperade Intel PRO/1000-adaptrarna installeras på separata PCI-bussar för att uppnå maximala ALB-prestanda.

Se även:

Om Teaming

Teamtyper

Konfigurera avancerade inställningar


IEEE 802.3ad: Dynamisk

802.3ad är en IEEE-standard för länkaggregation. Liksom för statiska länkaggregationsteam ökar team som använder dynamisk länkaggregation kapaciteten genom:

•	Adapterkonfiguration. Du kan öka kapaciteten genom att lägga till medlemmar till ett team. Ett team kan bestå av upp till åtta adaptrar. Varje server kan arbeta med upp till fyra team.

•	Trafikanalys. Programvaran analyserar oavbrutet överföringsbelastningen för varje teammedlem och utjämnar vid behov belastningen mellan adaptrarna. Växeln belastningsfördelar inkommande trafik.

Dessutom tillhandahåller 802.3ad-team feltolerans. I 802.3ad-team använder servern en IP/MAC-address för att kommunicera med nätverket. I sin tur behandlar nätverksenheter och klienter ett team i länkaggregation som en enda dator. När en adapter i teamet får fel ser nätverket teamet som en dator med reducerade möjligheter.

Länkaggregationsteam är kompatibla med följande:

Adapterhastighet	Alla adaptrar måste arbeta med samma hastighet
Nätverkskonfiguration	• Verifiera att den växel som är ansluten till adaptrarna fullt stöder standarden IEEE 802.3ad • Kontrollera växelns dokumentation för portberoenden. Vissa växlar kräver att parning börjar på en primär port.  • Kontrollera dina hastighets- och duplexinställningar för att försäkra att adaptern och växeln kör med full duplex, antingen tvingad eller inställd på automatisk förhandling. Både adaptern och växeln måste ha samma hastighet och duplexkonfiguration. Kravet på full duplex är en del av IEEE 802.3ad-specifikationen: http://standards.ieee.org/.  Om så behövs ska du ändra hastigheten eller duplexinställningen innan du länkar adaptern till växeln. Även om du kan ändra hastighets- och duplexinställningar efter det att teamet skapats rekommenderar Intel att du kopplar från kablarna tills inställningarna har aktiverats. I vissa fall kanske växlar eller servrar inte korrekt känner igen ändrade hastighets- eller duplexinställningar om inställningarna ändras när det finns en aktiv länk till nätverket. • Om du konfigurerar ett VLAN ska du kontrollera växelns dokumentation för VLAN-kompatibilitetsanmärkningar. Inte alla växlar stöder samtidigt dynamiska 802.3ad-team och VLAN. Om du väljer att installera VLAN konfigurerar du teaming- och VLAN-inställningar på adaptern innan du länkar adaptern till växeln. När du installerar VLAN när växeln har skapats påverkar en aktive aggregator VLAN-funktionen. OBS!  I vissa växlar kan koppar- och fiberadaptrar inte tillhöra samma aggregation med IEEE 802.3ad-konfiguration. Om det finns både kopparadaptrar och fiberadaptrar installerade i ett system kan växeln konfigurera kopparadaptrar i en aggregation och fiberadaptrar i en annan. Om du upplever detta beteende bör du använda antingen koppar- eller fiberbaserade adaptrar i ett system.
Protokoll	Alla

Se även:

Om Teaming

Teamtyper


Information om adapterteam
Om Teaming

Ett team är en grupp adaptrar som konfigurerats för att tillhandahålla ökad kapacitet och feltolerans. Teaming är kompatibelt med Windows* 2000, Windows NT* 4.0 och Windows XP.

Vilka olika typer av team finns det?

Med Intel(R) PROSet II kan du konfigurera följande typer av team:

•	Adapterfeltolerans (AFT)

•	Växelfeltolerans (SFT)

•	Anpassningsbar belastningsutjämning (ALB)

•	FEC*/LA/802.3ad: Statisk

•	GEC*/LA/802.3ad: Statisk

•	IEEE 802.3ad: Dynamisk

Hur många adaptrar kan du lägga till i ett team?

Förutom för SFT-team kan ett team innehålla två till åtta adaptrar. SFT-team måste innehålla exakt två adaptrar anslutna till samma länkpartner.

Kan man använda adaptrar från flera leverantörer i ett team?

Du kan skapa ett team med flera leverantörer (MVT eller multi-vendor team) med adaptrar i alla teamlägen. Om du vill skapa ett team med flera leverantörer måste du ha minst en serveradapter från Intel i teamet.

MVT är kompatibelt med:

Adaptertyp	Kontrollera i Nätverkskomponentträdet för att se vilka adaptrar i ditt system som är kompatibla.
Adapterhastighet	Se kravet för önskat teamingläge.
OBS! Om teammedlemmarna ingår i ett VLAN stöder inte Intel PROSet II teaming med flera leverantörer.

Hur många team kan man konfigurera på en dator?

Antalet team som konfigureras på en dator varierar beroende på datorns maskinvaru- och programvarukonfiguration.

Vilka krav finns?

Nätverkskonfigurationen och vilken typ av adaptrar som finns installerade på datorn påverkar vilka typer av team som kan konfigureras på datorn. Läs informationen i avsnittet Teamtyper för att få en översikt över krav och möjligheter för team.

Hur tar man bort team?

Se till att du använder Intel PROSet II när du ska ta bort ett team. Om du tar bort eller kopplar ifrån ett team med hjälp av nätverkspanelen i ditt operativsystem kan det påverka systemets stabilitet och adapterkonfiguration.

Om du vill få en översikt över adapterteam kan du gå till webbplatsen för Intel(R) Networking:

  Besök webbplatsen nu

Om du vill ha mer specifik information om syftet med de olika teamtyperna kan du läsa vitboken om hur man löser serverflaskhalsar:

  Läs vitboken nu

Se även:

Teamtyper


Adapterinformation

Om du vill se information om en adapter

1.	I Nätverkskomponentträdet klickar du på den adapter som du vill se information om.

2.	På fliken Allmänt klickar du på Information.

Skärmen Information visas.

OBS! Alla egenskaper finns inte tillgängliga för varje adaptermodell.

IP-adress	Den IP-adress som för närvarande används för denna adapter. OBS! Intel(R) PROSet II visar inte IPv6-adresser.
Busshastighet	Aktuell hastighet (i megahertz) för den PCI-buss som adaptern använder
Bussbredd	Bitbredd (32 eller 64) för den PCI-buss som adaptern använder
Controller	Artikelnummer eller modell för komponent på adaptern
Medietyp	Typ av koppling (fiber eller koppar)
Permanent Ethernet-adress	Nodadress (MAC) för adaptern i hexadecimaltal. Adapterns MAC-adress tilldelas av försäljaren.
Aktuell Ethernet-adress	Den MAC-adress som för närvarande används av adaptern.  Om adaptern är medlem i ett team eller om en lokalt administrerad adress (LAA) tilldelas adaptern skiljer sig adapterns aktuella Ethernet-address från adapterns permanenta address.
PHY-enhet	Beskrivning av adaptern
Artikelnummer	Intels artikelnummer för adaptern
Avbrott	Det avbrott som tilldelades adaptern av datorns PCI BIOS eller av operativsystemet
Minnesadress	Den minnesadress som tilldelades adaptern av datorns PCI BIOS eller av operativsystemet
I/O-adress	Den I/O-adress som tilldelades adaptern av datorns PCI BIOS
Bussplats	Bussnummer och plats-ID för adaptern
Systemplats	Systemplatser är uppdelningar av bussplatsen. Om bussplatsen t.ex. är uppdelad i två delar finns det två systemplatser som identifierar varje del av bussplatsen.
DHCP-serveradress	IP-adressen för den server som tillhandahåller en IP-adress för adaptern.


Konfigurera avancerade funktioner för team

Det finns olika avancerade inställningar för varje typ av team.

Så här visar eller ändrar du avancerade inställningar för team

1.	I Nätverkskomponentträdet klickar du på ett team.

2.	Klicka på fliken Avancerat.

3.	Utför önskade ändringar i teamkonfigurationen.

4.	Om du vill återställa standardinställningarna klickar du på Återställ standardvärden.

5.	Om du vill aktivera ändringarna klickar du på OK.

Nedan beskrivs de avancerade inställningarna och deras standardvärden. I de flesta fall är det bäst att behålla standardinställningen.

Kontrolltid (sekunder)

Hur ofta programvaran verifierar teammedlemmarnas status. Om kontrolltiden till exempel är en sekund kontrollerar programvaran teammedlemmarna varje sekund för att försäkra att de kan sända och ta emot trafik.

Standard: 1 sekund

Intervall: 1 - 3 sekunder

LinkAggrJoinMethod

Denna avancerade inställning finns tillgänglig för länkaggregationsteam. Baserat på standarden IEEE 802.3ad kan en länk uppdelas i flera länkar som kallas aggregatorer. Däremot är bara en av aggregatorerna aktiv. Parametern LinkAggrJoinMethod bestämmer hur systemet väljer den aktiva aggregatorn. Om du anger LinkAggrJoinMethod till Maximal bandbredd kommer systemet att välja den aggregator som skapar mer trafik. Om du anger Maximalt antal adaptrar kommer systemet att välja den aggregator som har flest adaptrar.

Standard: Maximal bandbredd

Intervall: Maximal bandbredd, Maximalt antal adaptrar

Belastningsutjämningens uppdateringsfrekvens

Hur lång tid det tar innan programvaran återställer eller uppdaterar den nuvarande belastningen för teammedlemmarna. För optimal prestanda ska denna inställning vara standardinställningen eller så låg som möjligt.

Standard: Var tionde kontrolltidsenhet

Intervall: 1-50 kontrolltidsenheter

Det antal sekunder som anges för kontrolltidsinställningen är måttenheten för uppdateringsfrekvensen.  Se kontrolltidsinställningen för ytterligare detaljer.

Lokalt administrerad adress (LAA)

Om du använder belastningsutjämningstjänsten i Windows NT (WLBS), NLB eller andra drivrutiner av denna klass kan du anpassa den MAC-adress som används av teamet.

Om du vill anpassa MAC-adressen för teamet skriver du in en ny MAC-adress i fältet LAA. Försäkra att den nya adressen finns inom intervallet:  0000 0000 0001 - FFFF FFFF FFFD.

Undantag:

o	Använd inte en multicast-adress (Minst signifikanta bit av högsta byte = 1). Exempel: I adressen 0Y123456789A kan "Y" inte vara ett udda nummer. (Y måste vara 0, 2, 4, 6, 8, A, C eller E.)

o	Använd inte enbart nollor eller enbart F.

Om du vill återställa standardinställningen för MAC-adressen tar du bort adressen i fältet för lokalt administrerad adress och klickar sedan på OK eller klickar på Återställ standardvärden.

OBS! Intel(R) PROSet II använder antingen:

•	Teamets LAA om en LAA har konfigurerats eller

•	Den primära adapterns permanenta MAC-adress om teamet inte har någon konfigurerad LAA

Eventuell befintlig inställning för LAA på den primära adaptern skrivs över av teamets LAA om teamet har en konfigurerad LAA.

STP- och SFT-team: Om du ändrar vilken adapter som är primär (aktiv) i teamet laddas teamet om med MAC-adressen för den nya primära adaptern. På liknande sätt kommer en ändring av den lokalt administrerade adressen (LAA) för teamet att orsaka att teamet laddas om och får en ny MAC-address. Om dessa båda åtgärder utförs på ett SFT-team medan servern är aktiv på nätverket, kan teamet inte längre kommunicera förrän alla nätverksenheter uppdaterat sina ARP-tabeller med adressinformationen för den nya primära adaptern. Hur lång tid det tar innan ARP-tabellerna uppdateras bestäms av parametern för timeout för ARP-cache. Denna parameter finns tillgänglig på vissa routrar och operativsystem. Beroende på vilken inställning som angivits för timeout för ARP-cache kan teamet vara otillgängligt i upp till 10 minuter.

NumRxPackets

Definierar antalet mottagningsbeskrivare som är datasegment som gör att adaptern kan allokera mottagna paket till minnet. Varje mottaget paket kräver en mottagningsbeskrivare och varje beskrivare använder 2 kb minne.

Du kan välja att öka antalet mottagningsbeskrivare om du märker en signifikant försämring av prestanda för mottagen trafik. Om mottagningsprestanda inte är ett problem använder du standardinställningen.

Standard: Standard. När standardvärdet används kommer Intel PROSet II automatiskt att beräkna det bästa värdet för denna inställning baserat på teamkonfigurationen och maskinvarans möjligheter.

Rekommenderat: 250

Intervall: 32 - 512, stegning 16

NumTxPackets

Anger antalet överföringsbeskrivare som är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket en eller flera överföringsbeskrivare.

Du kan välja att öka antalet överföringsbeskrivare om du märker ett möjligt problem med överföringsprestanda. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestandan upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem använder du standardinställningen.

Standard:  Standard. När standardvärdet används kommer Intel PROSet II automatiskt att beräkna det bästa värdet för denna inställning baserat på teamkonfigurationen och maskinvarans möjligheter.

Intervall: 16 - 512, stegning 16

Inkommande belastningsutjämning

Som standard utjämnar ALB-team all utgående trafik. Dessutom kan du aktivera eller avaktivera inkommande belastningsutjämning med denna inställning.

Om Inkommande belastningsutjämning är avaktiverad tar den primära adaptern emot all trafik.

Om Inkommande belastningsutjämning är aktiverad:

•	Tar den primära adaptern emot trafik som inte är IP-trafik

•	Aktiva adaptrar med de högsta hastigheterna mottar IPv4-trafik

Om det t.ex. finns ett ALB-team bestående av tre adaptrar: en gigabitadapter som anges som den primära adaptern och två Intel(R) PRO/100-adaptrar:

•	Tar gigabitadaptern emot trafik som inte är IP-trafik eftersom den är den primära adaptern.

•	Tar gigabitadaptern emot IP eftersom den är adaptern med högsta hastigheten.

•	Intel(R) PRO/100-adaptrarna deltar inte i belastningsutjämningen för den inkommande trafiken.

Standard: aktiverad efter ursprunglig inställning, avaktiverad om teamet först skapades i någon annan teaminställning som sedan ändrades till ALB

Intervall: Aktiverad/Avaktiverad

Knappen Återställ standardvärden

Denna knapp återställer den för närvarande markerade avancerade inställningen med den inställningens standardvärde.  Se de inställningar som räknats upp ovan för varje standardvärde.  (Detta alternativ är inte tillgängligt för alla inställningar.)

OBS!  När flera ändringar görs i team eller VLAN i Intel PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Diagnostik för PRO/100 och PRO/100+-adaptrar
Diagnostik för Intel(R) PRO/100-, PRO/100+- och PRO/100 S-adaptrar

OBS! Om diagnos körs och du klickar på Avbryt blir det en kort fördröjning innan diagnosen avbryts. När diagnostiken har avbrutits blir OK-knappen tillgänglig.

Grundläggande diagnostik

Med funktionen Adapterdiagnostik kan du testa en eller flera enheter.

OBS!  Om datorn kör Windows 98 kanske du behöver avaktivera kortets energisparfunktioner innan du kör diagnostiken. För information, se Avaktivera proceduren för energisparfunktioner.

Kontrollregister

Testar de register som programvaran använder för att konfigurera och skicka kommandon till 8255x-controllern.

Om kontrollregistertestet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.

Intel 8255x Controller

Kör inbyggda tester på 8255x-controllern för att bekräfta att den fungerar korrekt.

Om controllertestet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.

EEPROM

Läser EEPROM-innehållet och bekräftar att kontrollsumman är korrekt. Detta test använder EEPROM kontroll/data-registret, vilket därmed också testar registret.

Om EEPROM-testet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.

Loopback

Testar adapterns förmåga att skicka och ta emot paket.

Om Loopback-testet ger fel ska du byta ut adaptern och köra testet igen. Om testet ger fel igen med den nya adaptern betyder det att moderkortet eller någon annan enhet på bussen inte fungerar korrekt.

Länk

Testar nätverksanslutningen och adapterns förmåga att skicka och ta emot genom att skicka 1000 tillverkarspecifika paket på nätverket och hämta tillbaka samma paket.

Om adapterns länktest ger fel ska du kontrollera att adapterns kabel är ordentligt fäst vid adaptern och vid länkpartnern. Om kabeln sitter ordentligt ska du försöka med att ansluta kabeln till en annan port på länkpartnern eller försöka med en annan kabel.


Avancerade inställningar för PRO/100+-adaptrar
Avancerade inställningar för adapterfamiljen Intel(R) PRO/100

De inställningar som finns på fliken Avancerat gör att du kan anpassa hur adaptern hanterar markering av QoS-paket (Quality of Service), avlastningar och andra funktioner. Några av de avancerade funktionerna kan vara otillgängliga beroende på vilket operativsystem som körs och vilka adaptrar som finns installerade.

Avancerade inställningar

Anpassningsbart avstånd mellan ramar

Kompenserar för alltför många Ethernet-paketkollisioner på nätverket.  Som standard är denna inställning 0, vilket avaktiverar funktionen.

Den rekommenderade inställningen (1) fungerar bäst för flertalet datorer och nätverk eftersom den dynamiskt anpassas till nätverkets trafikförhållanden. Detta dynamiska läge är endast aktivt när värdet är 1. I vissa sällsynta fall kan du kanske erhålla bättre prestanda genom att ange avståndsvärdet manuellt. Genom att ange ett värde framtvingar du ett statiskt mellanrum mellan paket.

Ett större värde ger längre fördröjning mellan de ramar som överförs.

Adaptrar som stöds	Alla
Standard	0: avaktiverad
Intervall	0-255

Anpassningsbart länksvar

Gör att datorn startar upp snabbare genom att hoppa över startrutiner som kräver nätverksanslutning när kabeln inte är ansluten till adaptern. Detta minskar betydligt datorns uppstartningstid.

När Anpassningsbart länksvar för Intel Ethernet-styrenheter är aktiverat, och det inte finns en nätverkskabel som är ansluten till RJ-45-porten, inaktiveras nätverksanslutningen. Då visas en gul varningsikon vid sidan om nätverksanslutningen i Enhetshanteraren.

Du kan aktivera nätverksanslutningen igen genom att ansluta nätverkskabeln till RJ-45-porten och sedan starta om datorn.

Adaptrar som stöds	Endast för mobila produkter (cardbus). Inte tillgängligt på varje adaptermodell.
Standard	Av
Rekommenderat	På
Intervall	På, Av
OBS! ALR (Adaptive Link Response) fungerar inte när det finns ett trådlöst kort som är aktivt i systemet.

Anpassningsbar prestandajustering

Anger antalet ramar som adaptern tar emot innan den utlöser ett avbrott. Vid normal funktion skapar adaptern ett avbrott varje gång en ram tas emot. Om antalet avbrott minskas ger det också minskad processorbelastning.

Flytta skjutreglaget till Max adapterbandbredd om du vill skapa ett avbrott per ram. Detta ökar adapterbandbredden men kan öka processorbelastningen, vilket ger en långsammare dator. Flytta skjutreglaget mot Max processorbelastning om du vill öka antalet ramar som adaptern mottar innan den skapar ett avbrott. Detta minskar processorbelastningen men kan försämra adapterbandbredden. Standardinställningen fungerar bra för de flesta datorer.

Adaptrar som stöds	Alla

Anpassningsbar teknologi

Aktiverar eller avaktiverar mikrokoden i adapterns drivrutin. Mikrokoden optimerar prestanda baserat på operativsystemmiljön.

I syfte att försäkra bästa möjliga prestanda ska Anpassningsbar teknologi lämnas aktiverad.

Du kan välja att avaktivera Anpassningsbar teknologi vid felsökning av problem med adapterkompatibilitet.  Avaktivering av Anpassningsbar teknologi avaktiverar också Överföringskontrollblock och Anpassningsbar prestandajustering.

Adaptrar som stöds	Alla
Standard	På
Intervall	På, Av
Anpassningsbart tröskelvärde för överföring

Anger antalet byte som adaptern lagrar i sin överföringsbuffert innan den skickar. Om Anpassningsbart tröskelvärde för överföring exempelvis är 100 sparar adaptern 100 byte (800 bitar) i sin buffert innan data skickas.

•	Ett högre värde för Anpassningsbart tröskelvärde för överföring minskar överföringsprestanda men det kan ge färre underskridningar.

•	Ett lägre värde för Anpassningsbart tröskelvärde för överföring ökar överföringsprestanda men det kan ge fler underskridningar. En sänkning av detta värde gör att adaptern kan utföra tidigare överföringar.

Adaptern använder endast Anpassningsbart tröskelvärde för överföring som en utgångspunkt. Om adaptern kan uppnå bättre överföringsprestanda med ett lägre värde använder den automatiskt ett lägre värde.

Om du vill konfigurera adaptern till att först överföra hela Ethernet-ramar och därefter justera för bästa prestanda anger du detta värde till 190. Om prestandan sjunker betydligt med ett värde på 190 anger du värdet till 16 och ökar det sedan inkrementellt.

Adaptrar som stöds	Alla
Standard	200
Rekommenderat	• Om datorn har flera kort som stöder bus mastering eller hög fördröjning anger du detta värde till över 200. • Om datorn har ett enda kort som stöder bus mastering anger du detta värde till 12
Intervall	0-200

Grundläggande anslutning när inga resurser finns

Upprätthåller nätverksanslutning även om systemet inte har tillräckligt med resurser för att köra alla avancerade inställningar såsom IPSec-avlastning och Avlastning vid överföring med Large. De avancerade funktionerna återställs först när du startat om datorn.

Du kan identifiera resursproblem i systemloggen. I systemresurser visas fel som uppstår till följd av brist på systemresurser.

Adaptrar som stöds	Alla
Standard	Aktiverad
Rekommenderat värde	Aktiverad
Intervall	Aktiverad, Avaktiverad
Sammanslagningsbuffertar

Optimerar överföringsprestanda genom att anpassa antalet sammanslagningsbuffertar som gör att adaptern kan koppla datasegment före paketöverföringen.

Inställningen för Sammanslagningsbuffert måste vara konfigurerad så att den fungerar med överföringsbeskrivarens inställning. Inställningen för Sammanslagningsbuffert bör vara 30 - 50 % av värdet för överföringsbeskrivare. Om du inte ändrar inställningen för Sammanslagningsbuffertar så att den matchar överföringsbeskrivarinställningen förbättras kanske inte överföringsprestanda.

Sammanslagningsbuffertarna förbättrar överföringsprestanda betydligt på datorer som kör Windows NT 4.0. Överföringsprestanda förbättras också på datorer som kör Windows 98 och Windows 2000.

Adaptrar som stöds	Alla
Standard	8
Rekommenderat värde	8
Intervall	1-32

Aktivera PME

Aktiverar eller avaktiverar wake-funktionen för adaptern på datorer som har äldre versioner av Avancerade energisparfunktioner (APM). Wake gör det möjligt att starta adaptern från vänteläge eller från avstängt läge när den mottar vissa pakettyper t.ex. ARP-paket.

•	Om du avaktiverar denna funktion avaktiveras alla wake-funktioner på datorer som har äldre versioner av energisparfunktionen.

•	Om denna funktion aktiveras kan adaptern svara på wake-signaler. Om du vill konfigurera adaptern för att svara på specifika pakettyper ska du läsa informationen om wake vid-inställningar senare i detta avsnitt.

•	Maskinvarans standardvärde tvingar adaptern att konfigurera Wake vid-funktioner baserat på datorns maskinvara.

•	Värdet Ingen åtgärd låter adaptern använda operativsystemets standard.

Om du vill avaktivera alla Wake vid-inställningar avaktiverar du denna funktion. Annars anger du Ingen åtgärd.

Adaptrar som stöds	82559-baserade adaptrar. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Flödeskontroll

Möjliggör att adaptrarna reglerar trafik mer effektivt.

•	Adaptrar genererar flödeskontrollramar när deras mottagningsköer når en fördefinierad gräns. Genom att skapa flödeskontrollramar instrueras sändaren att sänka överföringshastigheten.

•	Adaptrar svarar på flödeskontrollramar genom att pausa paketöverföringen i den tidsperiod som flödeskontrollramen anger.

Genom att låta adaptrarna justera paketöverföringshastigheten hjälper flödeskontroll till att förhindra utelämnade paket.

OBS! För att adaptrarna ska kunna dra fördel av denna funktion måste länkpartners ha stöd för flödeskontrollramar.

Adaptrar som stöds	82540- och 82544-baserade, överföring och mottagning. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Generera och svara på flödeskontrollramar
Intervall	Av, Svara, Generera, Generera och svara, Maskinvarans standardvärde

Länkbaserad inloggning

Aktiverar funktionen Anpassningsbart länksvar (ALR eller Adaptive Link Response). Baserat på värdet för parametern LinkBasedLoad söker denna funktion PhyLink-status och returnerar värdet Lyckades eller Misslyckades.

Adaptrar som stöds	Alla
Standard	Avaktiverad (0)
Intervall	Aktiverad, Avaktiverad

Länkhastighet och duplex

Konfigurerar kommunikationsinställningar för adaptern.

Innan adaptern kan fungera med den konfigurerade inställningen måste länkpartnern kunna arbeta med den konfigurerade inställningen. Om adaptern t.ex. har konfigurerats för 100 Mbps/Full Duplex måste länkpartnern också kunna arbeta med 100 Mbps/Full Duplex. Samma gäller att om adaptern har konfigurerats för Automatisk identifiering måste länkpartnern ha stöd för automatisk förhandling.

Adaptrar som stöds	Alla Intel(R) PRO/100-adaptrar
Standard	Automatisk identifiering
Rekommenderat värde	Automatisk identifiering
Intervall	• Automatisk identifiering - Adaptern förhandlar med dess länkpartners för att identifiera kompatibla inställningar för hastighet och duplex. • 10 Mbps/Halv duplex - Adaptern tvingar en anslutning med 10 Mbps och utför överföring och mottagning separat. När adaptern tar emot paket kan den inte skicka paket. När adaptern skickar paket kan den inte ta emot paket. • 10 Mbps/Full duplex - Adaptern tvingar en anslutning med 10 Mbps och utför överföring och mottagning samtidigt. Detta förbättrar adapterns prestanda. Välj detta läge endast om du har en växel med full duplex. • 100 Mbps/Halv duplex - Adaptern tvingar en anslutning med 100 Mbps och utför överföring och mottagning separat. När adaptern tar emot paket kan den inte skicka paket. När adaptern skickar paket kan den inte ta emot paket. • 100 Mbps/Full duplex - Adaptern tvingar en anslutning med 100 Mbps och utför överföring och mottagning samtidigt. Detta förbättrar adapterns prestanda. Välj detta läge endast om du har en växel med full duplex.

Lokalt administrerad adress (LAA)

Åsidosätter adapterns MAC-adress. Skriv in en ny nätverksadress genom att skriva ett tolvsiffrigt hexadecimalt tal i värderutan.

Adaptrar som stöds	Alla
Standard	Ingen
Intervall	0000 0000 0001 - FFFF FFFF FFFD Undantag: • Använd inte en multicast-adress (Minst signifikanta bit av högsta byte = 1).  • Använd inte enbart nollor eller enbart F.
OBS! I ett team använder Intel(R) PROSet II antingen:

•	Teamets LAA om en LAA har konfigurerats eller

•	Den primära adapterns permanenta MAC-adress om teamet inte har någon konfigurerad LAA

Intel PROSet II använder inte en adapters LAA om adaptern är den primära adaptern i ett team och teamet har en LAA.

Windows 98SE-användare:

Om du vill använda standardadressen efter att ha använt en manuellt tilldelad adress utför du en av följande procedurer:

•	På fliken Avancerat i dialogrutan Nätverksegenskaper markerar du Lokalt administrerad adress och ändrar dess värde till 0. Klicka på OK för att verkställa inställningen.

•	I Intel PROSet II klickar du på fliken Avancerat, klicka sedan på Återställ standardvärden eller radera alla tecken i fältet Värde. Klicka på OK för att tillämpa inställningen.

Logga länklägeshändelsen

Denna inställning används för att aktivera/inaktivera loggningen av ändringar i länkläget. Om inställningen är på genererar en ändringshändelse av typ länk upp eller länk ner ett meddelande som visas i systemets händelselogg. Administratörer visar händelsemeddelandet i systemets händelselogg.

Följande händelser loggas.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Adaptrar som stöds	Alla
Standard	Aktivera
Intervall	Aktivera, Avaktivera
Avlastning

Sparar CPU-cykler om inställningen överensstämmer med den typ av adapter som du använder.

•	Om du använder säkerhetsavlastning med en Intel(R) PRO/100 S Adapter ska du använda IP-säkerhetsinställningen.

•	Om du inte använder säkerhetsavlastning med en Intel PRO/100 S Adapter ska du använda inställningen för kontrollsumma.

•	För alla andra adaptertyper ska du använda inställningen Ingen.

Adaptrar som stöds	Alla
Operativsystem som stöds	Windows 98SE, Windows Me, Windows NT, Windows 2000 och Windows XP
Standard	Intel PRO/100 S: IP-säkerhet Intel PRO/100 S utan säkerhet: Kontrollsumma
Intervall	Ingen, IP-säkerhet, Kontrollsumma (några alternativ kan vara otillgängliga beroende på adaptertypen)
Information om IP-säkerhet ges i sektionen Aktivera IPSec.

PCI-busseffektivitet

Möjliggör att adaptern antingen kan använda den bästa metoden för paketöverföring eller alltid använda paketsammanslagning.

•	När PCI-busseffektivitet är avaktiverad använder adaptern den överföringsmetod som ger bästa möjliga prestanda. Om paketsammanslagning ger bäst överföringsprestanda sammanslår adaptern automatiskt paket.

•	När PCI-busseffektivitet är aktiverad använder adaptern alltid paketsammanslagning.

Ställ in PCI-busseffektivitet till avaktiverad om det inte förekommer några problem med paketöverföringsprestandan. Om det finns ett stort antal underskridningar eller om PCI-bussen uppvisar prestandaproblem anger du detta värde till aktiverad.

Adaptrar som stöds	Alla
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Definition av prioritetsnivå

Konfigurerar prioritetsnivågränsvärde för QoS-markerade paket.

Om datorn har 802.1p/802.1Q-markering (QoS) aktiverad kan du definiera vilka prioritetsnivåer (0-7) som betjänas av prioritetsköerna. Intels adaptrar har två prioritetsköer: hög och låg. Som standard skickas paket med ett värde på 0-3 genom lågprioritetskön och paket med ett värde på 4-7 skickas genom högprioritetskön.

Det nummer du skriver in för Definition av prioritetsnivå anger gränsvärdet mellan hög och låg prioritetskö. Om du t.ex. skriver 6 skickas paket med en prioritetsnivå på 0-5 genom lågprioritetskön och paket med ett värde på 6-7 skickas genom högprioritetskön.

Adaptrar som stöds	Alla
Standard	4 • Paket med värden 0-3 skickas till lågprioritetskön.  • Paket med värden 4-7 skickas till högprioritetskön.
Intervall	0-7

Markering av QoS-paket (802.3ac)

Aktiverar eller avaktiverar IEEE 802.1p/802.1Q-markering för de prioritetsfilter som du har installerat via Windows* 2000, XP eller prioritetspaket . Du måste ange att detta ska vara Aktiverat innan prioritetspaketfiltren kan fungera rätt.

Om du har tilldelat filter med hjälp av 802.1p/Q-markering men denna inställning är Avaktiverad kommer motsvarande paket fortfarande att prioriteras genom Intels Högprioritetskö (HPQ).

Adaptrar som stöds	82550-, 82558- och 82559-baserade produkter. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad
Mottagningsbuffertar

Anger antalet buffertar som används av drivrutinen när data kopieras till minnet.

I situationer med hög nätverksbelastning kan en ökning av antalet mottagningsbuffertar öka prestandan. Nackdelen är att detta också ökar mängden systemminne som används av drivrutinen. Under andra omständigheter kan du försämra systemets prestanda om du ändrar detta värde.

Adaptrar som stöds	Alla
Standard	Standardinställningen varierar beroende på vilka funktioner som valts.
Rekommenderat värde	• Endast en adapter i Windows NT: 32 • Endast en adapter i Windows 98, Windows Me, Windows 2000 och Windows XP: 48 • Adapter i team: 250 • Med IPSec och/eller flera funktioner: 350
Intervall	8-1024

Avstånd mellan ramåterföringar

Ökar fördröjningen mellan ramåteröverföringar. Även om det finns en inbyggd Ethernet-algoritm som adaptrar använder för återöverföring av ramar efter kollisioner kan en ökning av fördröjningen förbättra nätverksprestanda om det finns ett onormalt stort antal kollisioner på nätverket.

Adaptrar som stöds	Vissa adaptrar stöder denna funktion
Standard	6
Intervall	6-15

Säkerhetsassociationer

Anger antalet samtidiga säkerhetsassociationer som kan avlastas till adapterns hjälpprocessor. En säkerhetsassociation är en kommunikationssession med en annan dator som kör Intel(R) Packet Protect eller annan IP-säkerhetsprogramvara.

Om datorn har stöd för fler säkerhetsassociationer än vad som anges som standardinställning ska du öka värdet. Observera att en ökning av antalet säkerhetsassociationer ökar adapterns minnesförbrukning.

Adaptrar som stöds	Intel(R) PRO/100 S
Standard	Klient: 64 Server: 1000
Intervall	1-5000

Smart avstängning

Gör att adaptern kan minska strömförbrukningen när LAN-kabeln inte är ansluten till adaptern. När adaptern återigen får en giltig länkning återupptas den normala strömförbrukningen (full strömförbrukning).

Adaptrar som stöds	82559-baserade mobila adaptrar och senare
Standard	Aktiverad
Rekommenderat värde	Aktiverad
Intervall	Aktiverad, Avaktiverad
Teknisk information

Överföringskontrollblock

Anger antalet överföringskontrollblock som är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket ett eller flera överföringskontrollblock.

Du kan välja att öka antalet överföringskontrollblock om du märker ett möjligt problem med överföringskontrollblocken. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestanda upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem använder du standardinställningen 16.

Adaptrar som stöds	Alla
Standard	16 eller 32, beroende på vad adaptern kräver
Intervall	8-64
Wake vid länkändring

Väcker (använder wake på) datorn om nätverksanslutningen etablerar länk när datorn är i viloläge. Du kan aktivera funktionen, avaktivera den eller låta operativsystemet använda sitt standardvärde.

Operativsystem som stöds	Windows 9x, Windows 2000, Windows XP
Intervall	Avaktiverad, Tvingad, Operativsystemberoende
Standard	Avaktiverad
Wake vid-inställningar

Dessa inställningar avser funktioner som aktiveras antingen av operativsystemet eller av Intel(R) PROSet II. Dessa funktioner fungerar annorlunda eller stöds inte alls beroende på vilken version av Windows som du använder.

•	Dessa Windows-versioner stöder Wake vid-inställningar: Windows 9x, Windows Millennium Edition, Windows 2000, Windows XP 64 bit Edition och Windows XP Professional.

•	Dessa Windows-versioner stöder inte Wake vid-inställningar:  Windows 98 retail och Windows NT 4.0.

OBS! Endast Intel(R) PRO/100+ Management- och Server-adaptrar och Intel(R) PRO/100 S-adaptrar stöder Wake vid-inställningar.

Aktivera Wake vid-inställningar i operativsystemet

Följande typer av Wake vid-paket kräver att operativsystemet har Wake vid-inställningar aktiverade:

•	Wake vid ARP

•	Wake vid dirigerat paket

•	Wake vid NBT-fråga

Innan adaptern kan reagera på dessa typer av Wake vid-paket måste operativsystemet ha aktiverat användning av Wake vid-inställningar. Du aktiverar Wake vid-inställningar genom att gå till Enhetshanteraren och aktivera alternativet Tillåt att den här enheten tvingar datorn ur vänteläge. Så här hittar du detta alternativ:

1.	Klicka på Start > Kontrollpanelen.
Kontrollpanelens fönster öppnas.

2.	Dubbelklicka på System.
Dialogrutan för System visas.

3.	Klicka på fliken Maskinvara och klicka sedan på knappen Enhetshanteraren.
Fönstret för Enhetshanteraren öppnas.

4.	Dubbelklicka på den adaptern som du vill aktivera för Wake vid-inställningar.
Dialogrutan för Egenskaper visas.

5.	Klicka på fliken Energisparfunktioner.

6.	Klicka på Tillåt att den här enheten tvingar datorn ur vänteläge för att aktivera Wake vid-inställningar för adaptern.

Aktivera Wake vid-inställningar

1.	I Intel PROSet II klickar du på fliken Avancerat.

2.	I listrutan Inställning klickar du på Wake vid-inställningar.

3.	I listan Värde väljer du tillämplig Wake vid-inställning.

4.	Klicka på OK eller Verkställ.

Tillgängliga inställningar

Dessa Wake vid-inställningar finns tillgängliga i Intel PROSet II:

Inställning	Beskrivning
Avaktiverad	Adaptern använder inte Wake vid-inställningar.
Wake vid Magic Packet	Gör att adaptern kan starta som svar på mottagande av ett Magic Packet. Ett Magic Packet är ett paket som innehåller 16 sammanhängande kopior av den mottagande adapterns Ethernetadress. När du konfigurerar denna funktion åsidosätter Intel PROSet II operativsystemets värde för denna funktion.
Wake vid dirigerat paket	Gör att adaptern kan starta när adaptern mottar ett dirigerat paket som är ett unicast-paket som skickas till adapterns MAC-adress.  Protokollet måste aktivera denna wake-metod i drivrutinen. Om denna funktion avaktiveras kommer drivrutinen att ignorera alla protokollbegäran om att aktivera denna wake-metod.
Wake vid Magic- och dirigerade paket	Gör det möjligt för adaptern att vakna (wake up) när den mottar ett Magic- eller dirigerat paket.
Operativsystemstyrt	Ger operativsystemet fullständig kontroll över Wake vid-inställningarna.

OBS! Om flera IP-adresser konfigureras för en adapter kan operativsystemet begära att vakna (wake up) vid ARP-mönster till alla de konfigurerade adresserna. Adaptern vaknar bara som svar på ARP-paket som avfrågar den första IP-adressen i listan.

OBS! Wake vid-inställningar inkluderar inte förmågan att väcka en maskin från avstängningsläge (S5). Detta läge styrs av inställningen Aktivera PME som även finns tillgänglig på fliken Avancerat. Även om Wake vid-inställningarna är avaktiverade avgörs förmågan att vakna från S5 av inställningen Aktivera PME.

PME-inställningarna fungerar under förutsättning att adapterns drivrutin är aktiverad. När drivrutinen avaktiverats återgår maskinvaran dock till sin maskinvarustandard, som, beroende på inställning, tillåter eller inte tillåter att datorn vaknar från avstängning.

Se även

Konfigurera avancerade inställningar för team


Översikt av Priority Packet
Översikt av Intel(R) Priority Packet

Intel(R) Priority Packet är ett trafikprioritiseringsverktyg som gör det möjligt för dig att installera filter som behandlar trafik med hög prioritet före normal trafik. Du kan använda Intel Priority Packet när du vill installera filter som ger prioritet åt viktiga användningsområden.

Intel Priority Packet är ett verktyg som är separat från Intel(R) PROSet II.

Krav

Operativsystem som stöds	• Windows* XP • Windows 2000 • Windows 98 • Windows NT SP5.0 eller högre
Adaptrar som stöds	Intel(R) PRO/100 och PRO/1000-familjen med adaptrar
Installera Intel Priority Packet så här:

1.	Mata in adapterns cd-skiva i datorns cd-rom-enhet.
Skärmen Autorun visas.

2.	Stäng Autorun-skärmen.

3.	Navigera till mappen WINDOWS/PRTPKT på Intels cd-skiva.

4.	Installera Intel Priority Packet genom att dubbelklicka på setup.exe:

5.	Följ anvisningarna på skärmen för att slutföra installationen av Priority Packet.

Efter installationen kan du öppna verktyget genom att klicka på Start > Program > Intel(R) Priority Packet II.

Prioritisera nätverkstrafik

Med Intel Priority Packet kan du installera filter för att skicka information från viktiga noder eller program med indikerad prioritet. Genom att prioritisera trafik på nätverkets värd- eller ingångspunkt  kan nätverksenheter basera vidarebefordingsbeslut på prioritetsinformation som definierats i paketet.

Intel Priority Packet prioritiserar trafik baserat på filter - parametarar som du allokerar som ska tillämpas på utgående (överförings-)paket. Genom att använda guiden för Priority Packet Filter kan du installera fördefinierade eller anpassade filter baserat på en nodadress (MAC), Ethernet-typ eller genom olika egenskaper för protokollet och porten. Priority Packet förser dig med två olika sätt att prioritisera trafik: IEEE 802.1p-markering och Intels högprioritetskö.

IEEE 802.1p-markering

IEEE 802.1p är en IEEE-standard för markering av paket i syfte att definiera prioritetsnivåer. Paket märks med fyra (4) ytterligare byte som ökar paketstorleken och indikerar prioritetsnivå. När dessa märkta paket skickas ut på nätverket överförs paketen med högre prioritet först. Med hjälp av prioritetspaketmarkering (även kallat Traffic Class Expediting) kan adaptern arbeta med andra element i nätverket (switchar, routrar) för att leverera prioritetspaket först. Med 802.1p-markering kan program allokera specifika prioritetsnivåer mellan 0 (låg) och 7 (hög).

När du har installerat filtret i Windows* 2000, XP eller i Intel Priority Packet måste du starta Intel PROSet II och aktivera QoS-markering på fliken Avancerade inställningar.

OBS! IEEE 802.1p-markering ökar storleken på de paket som den märker. Vissa nav och switchar kommer inte att känna igen de större paketen och kommer att släppa dem. Läs nav- eller switchdokumentationen för att se om de stödjer 802.1p. Om dessa enheter inte stödjer 802.1p, eller om du är osäker, använd högprioritetskön för att prioritisera nätverkstrafik.

Krav för att kunna använda IEEE 802.1p-markering på ett effektivt sätt:

•	Alla datorer som tar emot och styr 802.1p-markerade paket måste stödja 802.1p.

•	Adaptrar som är installerade på datorer som behandlar markerade paket måste stödja 802.1p-markering. Alla Intel(R) PRO/1000-, PRO/100+- och PRO/100 S-adaptrar stöder 802.1p. Intel(R) PRO/100B-adaptrar gör det inte.

•	Det går inte att allokera en eller flera adaptrar till ett adapterteam.

•	Om du installerar VLAN eller paketmarkering på samma adapter måste 802.1p/802.1Q-markering vara aktiverad på fliken Avancerade inställningar i Intel PROSet II.

•	VLAN (802.1Q) och prioritisering (802.1p) delar 802.3ac-markeringen. Intel-adaptrar använder 802.3ac-markeringen när VLAN och/eller QoS-markering konfigureras på adaptern.

•	Om en adapter är konfigurerad för VLAN måste växeln VLAN stödja samma typ av markering (802.3ac) som adaptern.

•	Om en adapter är konfigurerad för prioritisering kräver vissa växlar ett icke-standard VLAN på växeln för att aktivera markeringshantering.


Filter

En parameter som tillämpas på ett utgående paket för att fastställa om det ska markeras med IEEE 802.1p eller placeras i högprioritetskön.


IEEE 802.1p-specifikation

En IEEE-standard för markering av paket med olika prioritetsnivåer. När dessa paket skickas ut på nätverket överförs paketen med högre prioritet först. Markering av prioritetspaket gör att adaptern kan arbeta med andra nätverksenheter för att uppnå bättre prestanda totalt sett.

IEEE 802.1p-markering är endast effektiv när det stöds av nätverkets infrastruktur (växlar och andra routingenheter). Om din infrastruktur inte stöder IEEE 802.1p-markering eller om du inte är säker kan du prioritera trafik med hjälp av Intels högprioritetskö.


Högprioritetskö

En överföringskö som används med Intel(R) Priority Packet. Högprioritetskön (HPQ) bearbetar högprioritetspaketen.

HPQ finns tillgängligt på Intel(R) PRO/100-adaptrar som har 82558-baserad controller eller senare. För information om styrenhet, se tabellen Adapterspecifikationer.

För mer information om HPQ se direkthjälpen för Intel Priority Packet.


Markering

Lägger till ytterligare information till ett paket. När det gäller prioritetspaket med IEEE 802.1p-markering betyder detta att fyra ytterligare byte läggs till med information som anger paketets prioritet.


CardBus har identifierats

Installation med en adapter

Om du installerar en enda Cardbus-adapter klickar du på den modell du installerar.

OBS! Om du har en Intel(R) PRO/100 Cardbus II (endast LAN) installerad och ska installera Intel(R) PRO/100 LAN+Modem56 Cardbus II måste du:

1.	Ta bort drivrutinerna för LAN-adaptern.

2.	Starta om datorn.

3.	Installera om drivrutinerna för LAN+Modem56-adaptern.

Installation med två adaptrar

Om du installerar två Cardbus-adaptrar och en av dem eller båda är Intel PRO/100 LAN+Modem56 Cardbus II klickar du på Intel(R) PRO/100 LAN+Modem56 Cardbus II.

Om båda adaptrarna är Intel PRO/100 Cardbus II (endast LAN) klickar du på Intel(R) PRO/100 Cardbus II.

PCI-adaptrar

Om du installerar en PCI-adapter (till exempel på en dockningsstation) klickar du på Intel(R) PRO PCI Adapter.


CardBus-resurser
Definiera Cardbus-resurser

Välj några tillgängliga resurser för nätverksadaptrar och modem.

Så här verifierar du att de valda resurserna är kompatibla med din dator

Starta Intel(R) PROSet II genom att dubbelklicka på ikonen Intel PROSet II i Kontrollpanelen.
Intel PROSet II visas.

•	Om det inte finns några resurskonflikter visar fliken Allmänt information om adapterstatus.

•	Om det finns en resurskonflikt med någon annan enhet visar Intel PROSet II en felsökningsflik med instruktioner. Följ dessa instruktioner när du ska välja andra resurser.


Jumboramar

Jumboramar är större än normala Ethernet-ramar. Medan normala Ethernet-ramar innehåller ~ 1.5 kbyte innehåller jumboramar upp till ~16 kbyte.

I situationer där stora paket utgör huvuddelen av trafiken och ytterligare fördröjning kan tolereras kan jumboramar minska processorbelastningen och förbättra kabeleffektiviteten.

ANMÄRKNINGAR: Jumboramar stöds endast vid 1000 Mbps. Om du använder Jumboramar vid 10 eller 100 Mbps kan det leda till dåliga prestanda eller att anslutningen bryts. Jumboramar fungerar bara effektivt för TCP/IP-paket.

Innan du börjar

Verifiera att:

•	Du har en Intel(R) PRO/1000-adapter som körs med 1000 MB/sek. Intel(R) PRO/100-adaptrar stöder inte Jumboramar.

•	Systemet kör Windows* 2000, XP eller NT* 4.0.

•	Nätverksenheter stöder jumboramar. Vid inställning av Jumboramar på andra nätverksenheter ska du vara uppmärksam på att nätverksenheter beräknar jumboramarnas storlekar på olika sätt. Vissa enheter inkluderar huvudinformation i ramstorleken medan andra inte gör det.

Konfigurering av Jumboramar

•	Om du vill konfigurera en ofta förekommande paketstorlek kan du använda Intel(R) PROSet II.

•	Om du vill konfigurera någon annan paketstorlek kan du skriva in det värdet i registret.

Så här konfigurerar du Jumboramar i Intel(R) PROSet II

Konfigurering av Jumboramar på nätverket är en trestegsprocess.

Steg 1: Konfigurera adaptern så den stöder Jumboramar:

1.	Öppna Intel(R) PROSet II.

2.	I Nätverkskomponentträdet klickar du på den adapter som du vill konfigurera Jumboramar för.

3.	Klicka på fliken Avancerat.

4.	Från inställningslistan klickar du på Jumboramar.

5.	I värderutan klickar du på en paketstorlek.

Adaptern har nu konfigurerats för Jumboramar.

Steg 2: Konfigurera nätverksväxlarna så de stöder Jumboramar. Se efter i växelns dokumentation för detaljer.

Steg 3: Konfigurera servrarna så att de stöder Jumboramar. Se efter i serverns dokumentation för detaljer.

Så här konfigurerar du Jumboramar i registret

Konfigurering av Jumboramar på nätverket är en trestegsprocess.

Steg 1: Konfigurera adaptern så den stöder Jumboramar:

1.	Öppna Registereditorn. Klicka på Start > Kör. I rutan Öppna skriver du regedit.
Registereditorn öppnas.

2.	Gå till registernyckeln MaxFrameSize.

3.	Skriv in ett värde från 1415 till 16128 för ramstorlek.

Adaptern har nu konfigurerats för Jumboramar.

Steg 2: Konfigurera nätverksväxlarna så de stöder Jumboramar. Se efter i växelns dokumentation för detaljer.

Steg 3: Konfigurera servrarna så att de stöder Jumboramar. Se efter i serverns dokumentation för detaljer.


MiniPCI-adaptrar

MiniPCI-adaptrar fungerar med specifika mobila datorer som stöder anslutning med MiniPCI. Dessa adaptrar stöder samma funktioner som de klientadaptrar som beskrivs i den här hjälpfilen. Vissa MiniPCI-adaptrar har också integrerad modemmaskinvara som en del av produkten.

Om din produkt har ett modem ska du se efter i den medföljande dokumentationen för din dator för information om konfiguration av modemet.

Se även:

Avancerade inställningar för Intel(R) PRO/100+-adaptrar


Avancerade inställningar för PRO/10+-adaptrar
Avancerade inställningar för Intel(R) PRO/10 och PRO/10+-adaptrar

Med hjälp av de inställningar som finns på fliken Avancerat kan du anpassa hur adaptern hanterar länkändringar, buffertar, avlastningar och andra funktioner. Några av följande funktioner kan vara otillgängliga beroende på vilket operativsystem du kör och vilka adaptrar som finns installerade.

Avancerade inställningar

Anpassningsbart avstånd mellan ramar

Kompenserar för alltför många Ethernet-paketkollisioner på nätverket. Som standard är denna inställning 0, vilket avaktiverar funktionen. Den rekommenderade inställningen (1) fungerar bäst för flertalet datorer eftersom den dynamiskt anpassas till nätverkets trafikförhållanden. Detta dynamiska läge är endast aktivt när värdet är 1. I vissa sällsynta fall kan du kanske erhålla bättre prestanda genom att ange avståndsvärdet manuellt. Genom att ange ett värde framtvingar du ett statiskt mellanrum mellan paket.

Ett större värde ger längre fördröjning mellan de ramar som överförs.

Adaptrar som stöds	Alla
Standard	1
Intervall	0-255

Anpassningsbar teknologi

Aktiverar eller avaktiverar mikrokoden i adapterns drivrutin. Mikrokoden optimerar prestanda baserat på operativsystemmiljön.

I syfte att försäkra bästa möjliga prestanda ska Anpassningsbar teknologi lämnas aktiverad.

Du kan välja att avaktivera Anpassningsbar teknologi vid felsökning av problem med adapterkompatibilitet.  Avaktivering av Anpassningsbar teknologi avaktiverar också Överföringskontrollblock och Anpassningsbar prestandajustering.

Adaptrar som stöds	Alla
Standard	På
Intervall	På, Av
Anpassningsbart tröskelvärde för överföring

Anger antalet byte som adaptern lagrar i sin överföringsbuffert innan den skickar. Om Anpassningsbart tröskelvärde för överföring exempelvis är 100 sparar adaptern 100 byte (800 bitar) i sin buffert innan data skickas.

•	Ett högre värde för Anpassningsbart tröskelvärde för överföring minskar överföringsprestanda men det kan ge färre underskridningar.

•	Ett lägre värde för Anpassningsbart tröskelvärde för överföring ökar överföringsprestanda men det kan ge fler underskridningar. En sänkning av detta värde gör att adaptern kan utföra tidigare överföringar.

Adaptern använder endast Anpassningsbart tröskelvärde för överföring som en utgångspunkt. Om adaptern kan uppnå bättre överföringsprestanda med ett lägre värde använder den automatiskt ett lägre värde.

Om du vill konfigurera adaptern till att först överföra hela Ethernet-ramar och därefter justera för bästa prestanda anger du detta värde till 190. Om prestandan sjunker betydligt med ett värde på 190 anger du värdet till 16 och ökar det sedan inkrementellt.

Adaptrar som stöds	Alla
Standard	12
Rekommenderat	• Om datorn har flera kort som stöder bus mastering eller hög fördröjning anger du detta värde till över 200. • Om datorn har ett enda kort som stöder bus mastering anger du detta värde till 12
Intervall	0-200

Grundläggande anslutning när inga resurser finns

Upprätthåller nätverksanslutning även om systemet inte har tillräckligt med resurser för att köra alla avancerade inställningar. Funktioner som t.ex. IPSec-avlastning och Avlastning vid överföring med Large återupptas först när det finns tillräckligt med resurser. Fel som uppstår till följd av brist på systemresurser kan läsas i systemloggen.

Adaptrar som stöds	Alla
Standard	Av
Rekommenderat värde	På
Intervall	På, Av
Sammanslagningsbuffertar

Optimerar överföringsprestanda genom att anpassa antalet sammanslagningsbuffertar som gör att adaptern kan koppla datasegment före paketöverföringen.

Inställningen för Sammanslagningsbuffert måste vara konfigurerad så att den fungerar med överföringsbeskrivarens inställning. Inställningen för Sammanslagningsbuffert bör vara 30 - 50 % av värdet för överföringsbeskrivare. Om du inte ändrar inställningen för Sammanslagningsbuffertar så att den matchar överföringsbeskrivarinställningen förbättras kanske inte överföringsprestanda.

Sammanslagningsbuffertarna förbättrar överföringsprestanda betydligt på datorer som kör Windows NT 4.0. Överföringsprestanda förbättras också på datorer som kör Windows 98 och Windows 2000.

Adaptrar som stöds	Alla
Standard	8
Rekommenderat värde	8
Intervall	1-32
Flödeskontroll vid mottagning

Gör det möjligt för adaptern att ta emot flödeskontrollramar med full duplex genom att pausa överföringsvägen. Överföringsvägen pausas under den tid som anges i den mottagna flödeskontrollramen. Dessa inställningar hjälper till att finjustera nätverksprestanda genom att förhindra att paket utelämnas.

Adaptrar som stöds	Denna funktion kanske inte finns tillgänglig för varje adaptertyp.
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Länkbaserad inloggning

Aktiverar funktionen Anpassningsbart länksvar (ALR eller Adaptive Link Response). Baserat på värdet för parametern LinkBasedLoad söker denna funktion PhyLink-status och returnerar värdet Lyckades eller Misslyckades.

Adaptrar som stöds	Alla
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Länkhastighet och duplex

Konfigurerar länkinställningar för Intel(R) PRO/10+-adaptern.

Adaptrar som stöds	Alla
Standard	Automatisk identifiering
Rekommenderat värde	Automatisk identifiering
Intervall	• Automatisk identifiering - Adaptern förhandlar med växeln om hur den ska skicka/ta emot paket (antingen full duplex eller halv duplex).  OBS!  Du måste ha en växel med automatisk förhandling för att få fullt duplexstöd med alternativet Länkhastighet och duplex inställt till Automatisk identifiering. • 10Mbps/Halv duplex - Adaptern använder hastigheten 10 Mbps och utför en operation åt gången. Den antingen skickar eller mottar. • 10Mbps/Full Duplex - Adaptern använder hastigheten 10 Mbps och skickar och tar emot paket samtidigt. Detta förbättrar adapterns prestanda. Välj detta läge endast om du har en växel med full duplex.

Lokalt administrerad adress

Åsidosätter adapterns MAC-adress. Ange en ny nätverksadress genom att skriva ett tolvsiffrigt hexadecimalt tal i denna ruta.

Adaptrar som stöds	Alla
Standard	Ingen
Intervall	0000 0000 0001 - FFFF FFFF FFFD Undantag: • Använd inte en multicast-adress (Minst signifikanta bit av högsta byte = 1).  • Använd inte enbart nollor eller enbart F.

PCI-busseffektivitet

Möjliggör att adaptern antingen kan använda den bästa metoden för paketöverföring eller alltid använda paketsammanslagning.

•	När PCI-busseffektivitet är avaktiverad använder adaptern den överföringsmetod som ger bästa möjliga prestanda. Om paketsammanslagning ger bäst överföringsprestanda sammanslår adaptern automatiskt paket.

•	När PCI-busseffektivitet är aktiverad använder adaptern alltid paketsammanslagning.

Ställ in PCI-busseffektivitet till avaktiverad om det inte förekommer några problem med paketöverföringsprestandan. Om det finns ett stort antal underskridningar eller om PCI-bussen uppvisar prestandaproblem anger du detta värde till aktiverad.

Adaptrar som stöds	Alla
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Definition av prioritetsnivå

Definierar prioritetsnivåns gränsvärde för QoS-markerade paket.

Om datorn har 802.1p/802.1Q-markering (QoS) aktiverad kan du definiera vilka prioritetsnivåer (0-7) som betjänas av prioritetsköerna. Intels adaptrar har två prioritetsköer: hög och låg. Som standard skickas paket med ett värde på 0-3 genom lågprioritetskön och paket med ett värde på 4-7 skickas genom högprioritetskön.

Det nummer du skriver in för Definition av prioritetsnivå anger gränsvärdet mellan hög och låg prioritetskö. Om du t.ex. skriver 6 skickas paket med en prioritetsnivå på 0-5 genom lågprioritetskön och paket med ett värde på 6-7 skickas genom högprioritetskön.

Adaptrar som stöds	Alla
Standard	4 • Paket med värden 0-3 skickas till lågprioritetskön.  • Paket med värden 4-7 skickas till högprioritetskön.
Intervall	0-7

Mottagningsbuffertar

Anger antalet buffertar som används av drivrutinen när data kopieras till protokollminnet.

I situationer med hög nätverksbelastning kan en ökning av antalet mottagningsbuffertar öka prestandan. Nackdelen är att detta också ökar mängden systemminne som används av drivrutinen. Under andra omständigheter kan du försämra systemets prestanda om du ändrar detta värde.

Adaptrar som stöds	Alla
Standard	48
Rekommenderat värde	• Endast en adapter i Windows 98, Windows Me, Windows 2000 och Windows XP: 48 • Endast en adapter i Windows NT: 32 • Adapter i team: 250
Intervall	8-1024

Avstånd mellan ramåterföringar

Ökar fördröjningen mellan ramåteröverföringar. Även om det finns en inbyggd Ethernet-algoritm som adaptrar använder för återöverföring av ramar efter kollisioner kan en ökning av fördröjningen förbättra nätverksprestanda om det finns ett onormalt stort antal kollisioner på nätverket.

Adaptrar som stöds	Alla
Standard	10
Intervall	6-15

Överföringskontrollblock

Anger antalet överföringskontrollblock som är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket ett eller flera överföringskontrollblock.

Du kan välja att öka antalet överföringskontrollblock om du märker ett möjligt problem med överföringskontrollblocken. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestanda upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem rekommenderas värdet 16.

Adaptrar som stöds	Alla
Standard	32
Rekommenderat värde	16
Intervall	8-64


Länkkonfiguration för PRO/1000
Länkkonfiguration för Intel(R) PRO/1000 (endast kopparmodeller)

VIKTIGT:  I nästan alla fall bör du låta automatisk förhandling vara aktiverad. Om du avaktiverar automatisk förhandling ska du försäkra att länkpartnerns inställningar matchar adapterns inställningar. Adaptern kommer inte att arbeta med 1000 Mbps med automatisk förhandling avaktiverad.

Så här anger du hastighet och duplexinställningar

1.	På länkkonfigurationsfliken klickar du på Aktiverad eller Avaktiverad om du vill ändra inställningen för automatisk förhandling.

•	Med automatisk förhandling aktiverad förhandlar adaptern hastighet och duplex med dess länkpartner.

•	Med automatisk förhandling avaktiverad tvingas adaptern använda angiven hastighet och duplexinställning.  Om du avaktiverar automatisk förhandling ska du först försäkra att länkpartnern kan arbeta med angiven hastighet och duplexinställning. Om länkpartnern inte kan arbeta med adapterns tvingade inställning kan ingen kommunikation etableras mellan adaptern och länkpartnern.

2.	Om automatisk förhandling är aktiverad väljer du de hastigheter och duplex inställningar som ska annonseras till länkpartnern under förhandling. Som standard kommer alla inställningar att annonseras. Möjliga inställningar är:

•	10 Mbps HALV

•	10 Mbps FULL

•	100 Mbps HALV

•	100 Mbps FULL

•	1000 Mbps FULL

OBS! Enligt IEEE-specifikationen kan användning av 1000-baserad T inte tvingas.  Däremot kan du konfigurera adaptern till att endast använda 1000 Mbps genom att välja automatisk förhandling och sedan endast markera 1000 Mbps Full i sektionen Annonserade inställningar.

3.	Om automatisk förhandling är avaktiverad tvingar du hastighet och duplex för adaptern genom att klicka på en av följande inställningar:

•	10 Mbps HALV

•	10 Mbps FULL

•	100 Mbps HALV

•	100 Mbps FULL

Försäkra dig om att kommunikationen kommer att fungera genom att verifiera att länkpartnern stöder den tvingade inställningen.

4.	Klicka på OK.

5.	Starta om datorn om du ombes att göra det.

Hastighets- och duplexinställningarna har nu konfigurerats för adaptern.


Länkpartner

En enhet som en adapter länkar till såsom en annan adapter, en hub, en växel osv.


Översikt över nätverkskomponentträdet
Nätverkskomponentträdet

Nätverkskomponentträdet finns på vänster sida av Intel(R) PROSet II-fönstret. Klicka på adaptrar, VLAN eller teams för att visa information om komponenten.


Boot Agent

Med denna flik kan du se de inställningar som styr hur Boot Agent-programvaran arbetar. Du kan ändra vissa inställningar i inställningsrutan. Denna flik kan också användas för att uppdatera en flash ROM-enhet med en programvaruavbildning från Boot Agent om din IT-administratör har aktiverat den funktionen.

Mer detaljerade beskrivningar om varje möjlig konfigurationsinställning finns i följande avsnitt:

•	Nätverksstartprotokoll

•	Startordning

•	Väntetid för inställningsmeny

•	Visa inställningsmeddelande

•	Återaktiveringsstöd för äldre OS

Mer information om hur du ändrar konfigurationsinställningar finns i Intel® Boot Agent Användarhandbok.

ANMÄRKNINGAR:

Om du inte kan ändra en konfigurationsinställning kanske din adapter eller ditt system inte stöder den inställningen.

Informationen som ges i den här hjälpfilen gäller endast för versionen 16-bitars PXE 2.0 av Boot Agent. De flesta konfigurationsalternativ som beskrivs här används inte i en EFI-miljö.

Knappen Uppdatera Boot Agent

Använd denna knapp för att installera eller uppdatera programvaran för Intel Boot Agent.

ANMÄRKNINGAR:

Uppdateringen av Boot Agent skriver en ny Boot Agent-avbildning till flash ROM, vilket kanske temporärt avaktiverar funktionen för Windows* nätverksdrivrutin. Du kan behöva starta om datorn efter uppdateringen.

Om DOS-installation krävs kan du läsa avsnittet Installation/uppdatering i DOS-miljöer i Intel® Boot Agent Användarhandbok.

Så här installerar eller uppdaterar du programvaran för Boot Agent

OBS! När du laddar ner en flash ROM-avbildningsfil från Intels webbplats ska du spara den i en temporär katalog eller på en plats där du enkelt kan hitta den för denna procedur.

1.	Från Start-menyn klickar du på Inställningar och sedan klickar du på Kontrollpanelen.
Då visas fönstret Kontrollpanelen.

2.	Dubbelklicka på ikonen Intel(R) PROSet II.
Då visas skärmen Intel PROSet II.

3.	Från Nätverkskomponentträdet väljer du den adapter som innehåller det flash ROM som du vill uppdatera.

4.	Klicka på fliken Boot Agent. Om fliken inte visas uppdaterar du nätverkets drivrutin eller ser till att du har Intel PROSet Version 4.0 eller senare.

OBS! Med Intel PROSet II kan du också ändra konfigurationsinställningar för PXE- och RPL-miljöer. Om du väljer en adapter som arbetar i PXE- eller RPL-miljöer från de uppräknade enheterna under Nätverkskomponenter på den vänstra sidan av Intel PROSet II-skärmen kan du visa eller ändra de konfigurationsinställningar som visas på skärmens högra sida. Mer information finns i avsnittet Konfigurera Boot Agent i Windows-miljö i Intel® Boot Agent Användarhandbok. Vissa flash ROM stöder inte alla konfigurationsinställningar.

5.	Redigera en inställning genom att trycka på Ctrl+S. När du har tryckt på Ctrl+S ändras utseendet på fliken Boot Agent för att inkludera en skuggad (avaktiverad) knapp om att verkställa inställningar.

6.	Klicka på Uppdatera Boot Agent.
En varningsdialogruta visas som säger att nätverksanslutningen temporärt förloras medan Boot-avbildningen uppdateras.

7.	Fortsätt uppdateringsprocessen genom att klicka på Ja.
Då visas en dialogruta som frågar om du vill skapa en säkerhetskopia av det nuvarande, befintliga flash ROM.

8.	Klicka på Ja om du vill skapa en säkerhetskopia av den befintliga flash ROM-avbildningen innan du uppdaterar flash. Dialogrutan Spara befintlig flashavbildning visas. Gå vidare till steg 10.

9.	Klicka på Nej om du inte vill skapa en säkerhetskopia av den befintliga flash ROM-avbildningen.En varningsdialogruta visas. Klicka på Ja och gå vidare till steg 11.

10.	Klicka på Spara om du vill acceptera standardsökväg och standardfilnamn (filnamnet är som standard adapterns unika MAC-adress). Ändra annars dessa parametrar och klicka på Spara.

11.	I dialogrutan Öppna klickar du på Öppna om önskad flash ROM-avbildningsfil som du sparade visas som skärmens standardsökväg och filnamn. Ändra annars sökvägen och filnamnet och klicka sedan på Öppna.
OBS! Flash ROM-avbildningar finns tillgängliga på Intels webbplats.

Uppdateringsprocessen tar mellan fem och tio sekunder och en förloppsindikator visas medan uppdateringen utförs.


Nätverksstartprotokoll

Om din Boot Agent inte stöder RPL kan du inte ändra denna inställning.

Möjliga värden:

•	PXE (Preboot eXecution Environment)

•	RPL (Remote Program Load)

Beskrivning:

Välj PXE för användning med WfM-kompatibla nätverkshanteringsprogram, som till exempel Intel LANDesk Management Suite, Windows* 2000 RIS, Windows XP RIS och Linux*.

Välj RPL för äldre typ av fjärrstart så väl som några fjärrstartlösningar från Novell NetWare*.


Startordning

Möjliga värden:

•	Använd startordning för BIOS-installation

•	Prova nätverket först, sedan lokala enheter

•	Prova lokala enheter först, sedan nätverket

•	Prova bara nätverket

•	Prova bara lokala enheter

Beskrivning:

Gör det möjligt för dig att välja i vilken ordning startenheterna väljs när systemet startas. Om datorn har BIOS som stöder BIOS Boot Specification (BBS) eller stöder Plug and Play-kompatibilitet (PnP) för val av startordning i BIOS-programmet kommer denna inställning alltid att vara Använd BIOS-inställningens startordning och kan inte ändras. I detta fall, se installationshandboken för BIOS som är specifik för din klientdator när du ska ställa in startalternativen.

Om klientdatorn inte har något BBS- eller Pnp-kompatibelt BIOS kan du välja något av de alternativ som visas ovan, utom Använd BIOS-inställningens startordning.


Visa inställningsmeddelande

Möjliga värden:

•	Aktiverad – standardinställning

•	Avaktiverad

Beskrivning:

Om du väljer Aktiverad kommer meddelandet om att trycka på Ctrl+S för inställningar att visas efter POST så att du kan tryck på Ctrl+S inom det antal sekunder som tillåts av inställningen Väntetid för inställningsmeny om du vill att konfigurationsinställningsmenyn ska visas.

Om du väljer Avaktiverad är Väntetid för inställningsmeny noll och meddelandet om att trycka på Ctrl+S för inställningar kommer inte att visas under uppstartningen. Däremot kan du fortfarande visa konfigurationsinställningsmenyn genom att upprepade gånger trycka på Ctrl+S omedelbart efter POST tills menyn visas. Om konfigurationsinställningsmenyn inte visas efter upprepade tryckningar på Ctrl+S ska du starta om datorn och försöka igen.


Väntetid för inställningsmeny

Möjliga värden:

•	0 sekunder

•	2 sekunder

•	3 sekunder

•	5 sekunder

Beskrivning:

Det antal sekunder som Boot Agent väntar på att du ska trycka på Ctrl+S för att visa konfigurationsinställningsmenyn under systemstartsprocessen.

Om du väljer att ange Väntetid för inställningsmeny som noll och/eller ange Visa inställningsmeddelande som Avaktiverad kommer meddelandet om att trycka på Ctrl+S för inställningar inte att visas under uppstartningen. Däremot kan du fortfarande visa konfigurationsinställningsmenyn genom att upprepade gånger trycka på Ctrl+S omedelbart efter POST tills menyn visas. Om konfigurationsinställningsmenyn inte visas efter upprepade tryckningar på Ctrl+S ska du starta om datorn och försöka igen.


Återaktiveringsstöd för äldre OS

Denna inställning visas inte i menyn Konfigurationsinställningar när uppstartningen sker från en gigabitadapter.

Konsultera instruktionerna för ditt operativsystem för att avgöra om ditt operativsystem stöder fjärråteraktivering och hur denna funktion används.

Möjliga värden:

•	Aktiverad

•	Avaktiverad

Beskrivning:

Välj Aktiverad om du vill möjliggöra att icke-Windows* operativsystem (som till exempel DOS eller NetWare*) använder WfM-adapterns fjärr-wakeupfunktion.

Välj Avaktiverad för denna inställning när du använder Windows 2000, XP, Me eller 98SE.


VLAN-lista

Om du har konfigurerat VLAN kommer de att visas i Nätverkskomponentträdet:

När du högerklickar på ett VLAN visas följande alternativ:

•	Ändra VLAN-egenskaper - Gör att du kan ändra VLAN-konfiguration.

•	Ta bort - Gör att du kan ta bort ett VLAN.

Se även

Lägga till VLAN


Teamlista

Om du har konfigurerat team med adaptrar kommer de att visas i Nätverkskomponentträdet:

När du högerklickar på ett team visas följande alternativ:

•	Ta bort team

•	Ändra teaminställning

•	Lägg till VLAN

•	Aktivera IPSec

•	Aktivera GVRP

Om du har konfigurerat ett team men det inte visas i Nätverkskomponentträdet kan du behöva stänga Intel(R) PROSet II för att tillämpa teamets inställningar.


Adapterteamlista

När du högerklickar på en Adapterteamlista visas följande alternativ:

•	Förvald primär - Anger den markerade adaptern som den primära överföringsadaptern för teamet. Vanligtvis är den adapter som du anger här den adapter som har störst bandbredd.

•	Förvald sekundär - Anger den markerade adaptern som reservadapter för den primära överföringsadaptern.  Detta alternativ finns inte tillgängligt förrän du har angivit en förvald primär adapter.

•	Ta bort från team - Tar bort den markerade adaptern från teamet.

Se även

•	Ändra adapterteaminginställning

•	Lägga till en adapter till ett befintligt team

•	Skapa ett nytt team

•	Ta bort en adapter från ett team

•	Ta bort ett adapterteam

•	Ange en adapter som primär eller sekundär


Nätverkskomponenter
Nätverkskomponentträdet

Nätverkskomponentträdet visar nätverkskomponenterna som är aktiva i systemet. Nätverkskomponenter kan omfatta adaptrar, team och VLAN.


Medlemsadaptrar

Listrutan Medlemsadaptrar innehåller de adaptrar som utgör ett team. Klicka på en adaptermedlem om du vill se information för just den adaptern.

Se även

Ta bort en adapter från ett team


Virtuella LAN

Fliken Virtuella LAN i Nätverkskomponentträdet visar konfigurerade VLAN.

Se även

Lägga till VLAN

Ändra VLAN-egenskaper

VLAN-definition

Ta bort ett VLAN

Avancerade inställningar för VLAN

Installera GVRP


Ta bort en adapterinstans
Ta bort en adapter

Innan du tar bort en adapter från Intel(R) PROSet II eller tar bort en adapter från en dator ska du försäkra att adaptern inte är medlem i ett team. Om adaptern är medlem i ett team ska du först ta bort adaptern från teamet och därefter följa anvisningarna nedan.

Så här tar du bort en adapter från Intel(R) PROSet II

1.	I Nätverkskomponentträdet högerklickar du på den adapter som du vill ta bort.

2.	Klicka på Ta bort.
En bekräftelsedialogruta visas som informerar dig om att denna adapter INTE är medlem av ett team.

3.	Klicka på Ja.

4.	Stäng Intel Proset II och verkställ ändringarna genom att klicka på OK.

5.	Starta om datorn om du ombes att göra det.

Intel PROSet II hanterar inte längre adaptern.


Skapa ett nytt team

Ett team är en gruppering av adaptrar som konfigurerats för att förhöja nätverkets funktion såsom reservfunktion eller för ökad överföringskapacitet.

Så här skapar du ett team

1.	I Nätverkskomponentträdet högerklickar du på en adapter utan team.

2.	Klicka på Lägg till i team och sedan på Skapa nytt team.
Guiden för teaming visas.

3.	Välj den typ av team du vill skapa och klicka på Nästa. Alternativen är:

•	Adapterfeltolerans

•	Växelfeltolerans

•	Anpassningsbar belastningsutjämning

•	Länkaggregation (Dynamic_3ad* / GEC / LA / 802.3ad static mode)

4.	Om du skapar ett team för anpassningsbar belastningsutjämning kan du välja att antingen aktivera eller avaktivera inkommande belastningsutjämning (RLB eller Receive Load Balancing).

•	Om du aktiverar RLB tar de teammedlemmar som klarar de högsta hastigheterna emot IP-trafik och den primära adaptern mottar övrig trafik.
OBS! Med RLB aktiverad väljer Intel(R) PROSet II automatiskt en förvald primär adapter. Intel PROSet II:s val av förvald primär adapter baseras inte på adaptermodell eller hastighet.

•	Om du avaktiverar RLB mottar endast den primära adaptern trafik.

5.	Listan visar alla adaptrar som för närvarande inte ingår i ett team. I listan klickar du på de adaptrar som du vill inkludera i detta team och klickar sedan på Nästa.

6.	Klicka på Slutför.

7.	Om du vill kan du ange en adapter i teamet som primär adapter. Du anger en primär adapter genom att högerklicka på den adapter som du vill använda som primär och därefter klicka på Förvald primär.
Om du väljer att inte ange någon primär adapter kommer Intel PROSet II att välja förvald primär adapter.

8.	Stäng Intel Proset II och verkställ ändringarna genom att klicka på Stäng.

Teamet har nu konfigurerats.

OBS!  När flera ändringar görs i team eller VLAN i Intel PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Lägga till en adapter till ett befintligt team

Du kan när som helst lägga till en adapter till ett befintligt team.

OBS!  I team med Dynamic 802.3ad kan en konfigurationsändring kanske temporärt avbryta trafikflödet medan växeln beräknar länkaggregationer.

Lägga till en adapter till ett befintligt team i Intel(R) PROSet II

1.	I Nätverkskomponentträdet högerklickar du på Teamlista.

2.	Klicka på Lägg till adapter till team och välj sedan den adapter du vill lägga till.

Adaptern är nu medlem i teamet.

OBS!  När flera ändringar görs i team eller VLAN i Intel(R) PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Lägg till VLAN
Skapa ett VLAN

Ett VLAN är en logisk gruppering av adaptrar som konfigurerats för att förhöja säkerheten för nätverket och minska storleken på sändningsdomänerna.

Så här skapar du ett VLAN

1.	I Nätverkskomponentträdet högerklickar du på Teamlista eller Adapterlista utan team.

2.	Klicka på Lägg till VLAN.
Då visas dialogrutan Lägg till nytt VLAN.

3.	I fältet VLAN-ID skriver du in numret för det VLAN som tilldelats adaptern.  VLAN-ID måste matcha det VLAN-ID som konfigurerats på växeln.
OBS! VLAN-numren 0 och 1 är ofta reserverade. Kontrollera växelns dokumentation för information.

4.	I fältet VLAN-namn skriver du in en etikett för detta VLAN. Exempel: Marknadsföring eller Konstruktion. Namnet behöver inte matcha namnet på andra nätverksenheter. Det används endast i identifieringssyfte.

5.	Klicka på OK.

Adaptern har nu konfigurerats som en VLAN-medlem. När du har ställt in adaptern som en VLAN-medlem ska du se till att fullborda VLAN-konfigurationen genom att ställa in de andra nätverksenheterna med tillämplig VLAN-information.

OBS!  När flera ändringar görs i team eller VLAN i Intel(R) PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Ta bort ett VLAN

Använd Intel(R) PROSet II när du ska ta bort ett VLAN. Om du tar bort eller kopplar från VLAN med hjälp av nätverkspanelen i ditt operativsystem kan det påverka systemets stabilitet och adapterkonfiguration.

Så här tar du bort ett VLAN från ett team eller en adapter

1.	I Nätverkskomponentträdet högerklickar du på en VLAN-lista.

2.	Klicka på Ta bort VLAN.

VLAN har tagits bort från teamet eller adaptern.

OBS!  När flera ändringar görs i team eller VLAN i Intel PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Ta bort ett adapterteam

Se till att du använder Intel(R) PROSet II när du ska ta bort ett team. Om du tar bort eller kopplar ifrån ett team med hjälp av nätverkspanelen i ditt operativsystem kan det påverka systemets stabilitet och adapterkonfiguration.

Så här tar du bort ett helt adapterteam

1.	I Nätverkskomponentträdet högerklickar du på Teamlista.

2.	Klicka på Ta bort.

3.	Ett bekräftelsemeddelande visas.  Klicka på Ja.

Teamet har nu tagits bort. Adaptrar fortsätter att fungera som separata enheter.

OBS! Om du har skapat VLAN eller prioritetspaketfilter för teamet kommer de att tas bort tillsammans med teamet.  Om du skapade VLAN eller prioritetspaketfilters för en adapter innan den lades till i teamet kommer de att förloras när teamet tas bort.


Ändra adapterteaminginställning
Ändra teaminginställning

Så här ändrar du teaminginställningen för ett team

1.	I Nätverkskomponentträdet högerklickar du på Teamlista.

2.	Klicka på Ändra teaminställning och klicka sedan på någon av följande:

•	Adapterfeltolerans

•	Växelfeltolerans

•	Anpassningsbar belastningsutjämning
När teaminställningen ändras till Anpassningsbar belastningsutjämning är inkommande belastningsutjämning som standard avaktiverad. Inkommande belastningsutjämning kan aktiveras genom att först ändra teaminställningen och sedan aktivera inkommande belastningsutjämning på fliken Avancerat under Teaming.

•	Länkaggregation (Dynamic_3ad* / GEC / LA / 802.3ad static mode)

Teaminställningen har nu ändrats.

OBS!  När flera ändringar görs i team eller VLAN i Intel(R) PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Ta bort en adapter från ett team

Du kan när som helst ta bort en adapter ur ett befintligt team.

OBS!  I team med Dynamic 802.3ad kan en konfigurationsändring kanske temporärt avbryta trafikflödet medan växeln beräknar länkaggregationer.

Så här tar du bort en adapter från ett team

1.	I Nätverkskomponentträdet högerklickar du på Team.

2.	Klicka på Ta bort från team.

3.	Klicka på OK för att tillämpa ändringen.

Adaptern är nu inte längre medlem i teamet.

OBS!  När flera ändringar görs i team eller VLAN i Intel(R) PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Ändra VLAN-egenskaper

Du kan omkonfigurera adaptern så att den blir medlem i ett annat VLAN genom att ändra VLAN ID. När du ändrar det VLAN ID som är associerat med adaptern tar det bort adaptern från befintligt VLAN vilket bryter kommunikationen med datorer i befintligt VLAN.

Om du till exempel ändrar datorns VLAN-ID från 7 till 9 kommunicerar datorn inte längre med datorer i VLAN 7. Den kommunicerar istället med datorer i VLAN 9.

Så här ändrar du VLAN-konfiguration

1.	I Nätverkskomponentträdet högerklickar du på ett VLAN.

2.	Klicka på Ändra VLAN-egenskaper.

3.	I fältet VLAN-ID skriver du in numret för det VLAN som tilldelats adaptern.  VLAN-ID måste matcha det VLAN-ID som konfigurerats på växeln.
OBS! VLAN-numren 0 och 1 är ofta reserverade. Kontrollera växelns dokumentation för information.

4.	I fältet VLAN-namn skriver du in en etikett för detta VLAN. Exempel: Marknadsföring eller Konstruktion. Namnet används endast i informationssyfte och behöver inte matcha något VLAN-namn som konfigurerats på andra nätverksenheter.

5.	Stäng Intel(R) Proset II genom att klicka på OK.

VLAN-konfigurationen har nu uppdaterats.

OBS!  När flera ändringar görs i team eller VLAN i Intel(R) PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.

Se även

Aktivera GVRP

Avancerade inställningar för VLAN


Ange en adapter som primär eller sekundär

Inom varje team finns det en primär adapter och en eller flera sekundära adaptrar.

Du kan välja att antingen manuellt ange den primära adaptern i ett team eller låta Intel(R) PROSet II ange den primära adaptern.

•	Om du väljer att ange en primär adapter blir den adaptern den förvalda primära adaptern. Den förvalda primära adaptern överför och tar emot trafik så länge som den har aktiv status. Om den förvalda primära adaptern får fel, men senare återställs till aktiv status, återförs kontrollen automatiskt till den förvalda primära adaptern.

Om du till exempel har en server med en Intel(R) PRO/1000 Gigabit-adapter som primär adapter och en Intel(R) PRO/100+ eller PRO/100 S som sekundär adapter skulle du vilja ha Intel PRO/1000 Gigabit-adaptern som förvald primär. I detta fall gäller att om Intel PRO/1000-adaptern får fel tar Intel PRO/100+ eller PRO/100 S över. När Intel PRO/1000-adaptern har bytts ut återtar den automatiskt rollen som primär adapter i teamet.

Om du väljer en primär adapter manuellt finns det alltid en förvald primär adapter i teamet.

•	Om du inte anger någon primär adapter väljer Intel PROSet II den bästa adaptern baserat på adaptermodell och hastighet. Detta betyder att även om det finns en primär adapter finns det ingen förvald primär adapter. När det inte finns någon förvald primär adapter kan Intel PROSet II välja en annan primär adapter om den primära adaptern får fel.

Om till exempel en Intel(R) PRO/1000 Gigabit-adapter är primär adapter och den får fel kan Intel PROSet II utse en annan adapter i teamet som fungerar som primär adapter.  Om Intel(R) PRO/1000-adaptern återfår aktiv status är den inte längre primär adapter utan blir en medlem i teamet.

Så här anger du en adapter som primär eller sekundär

1.	I Nätverkskomponenträdet högerklickar du på en adapterteamlista.

2.	Klicka på Förvald primär eller Förvald sekundär.

Adaptern har nu angiven status.

Så här ändrar du en adapters prioritetsstatus

Du kan också använda samma procedur som ovan om du vill ändra prioriteten för en adapter.

STP- och SFT-team:  Om du ändrar vilken adapter som är primär (aktiv) i teamet laddas teamet om med MAC-adressen för den nya primära adaptern. På liknande sätt kommer en ändring av den lokalt administrerade adressen (LAA) för teamet att orsaka att teamet laddas om och får en ny MAC-address. Om dessa båda åtgärder utförs på ett SFT-team medan servern är aktiv på nätverket, kan teamet inte längre kommunicera förrän alla nätverksenheter uppdaterat sina ARP-tabeller med adressinformationen för den nya primära adaptern. Hur lång tid det tar innan ARP-tabellerna uppdateras bestäms av parametern för timeout för ARP-cache. Denna parameter finns tillgänglig på vissa routrar och operativsystem. Beroende på vilken inställning som angivits för timeout för ARP-cache kan teamet vara otillgängligt i upp till 10 minuter.

OBS! Alternativet Förvald sekundär finns inte tillgängligt förrän du har angivit en förvald primär adapter.


PROSets systemfältsikon
Intel(R) PROSet II:s systemfältsikon

När du har installerat Intel(R) PROSet II kan du se en systemfältsikon för Intel PROSet i aktivitetsfältet nära klockan.

När du högerklickar på ikonen visas följande alternativ:

Kommando	Beskrivning
Starta Intel(R) PROSet II	Visar verktyget Intel PROSet II.
Visa status för	Visar namnet på de installerade trådlösa adaptrarna.
Dölj systemfältsikon	Döljer systemfältsikonen i systemfältet.   Gör så här om du vill visa ikonen igen i systemfältet: På fliken Allmänt i Intel PROSet II klickar du på Visa systemfältsikonen.
Avsluta	Stänger Intel PROSet II och tar temporärt bort systemfältsikonen från aktivitetsfältet.  Även om ikonen inte syns i aktivitetsfältet kan du starta Intel PROSet genom att dubbelklicka på Intel PROSet II-ikonen i Kontrollpanelen. När datorn startat om visas systemfältsikonen för Intel PROSet II i aktivitetsfältetet.
Avsluta och starta inte igen vid omstart	Tar bort systemfältsikonen för Intel PROSet II och förhindrar att den visas igen när datorn startas om. Gör så här om du vill återställa systemfältsikonen efter att ha markerat detta alternativ:  1. Klicka på Start > Kör. 2. I fältet Öppna skriver du PROMON och klickar sedan på OK.   Intel PROSet II-ikonen visas i aktivitetsfältet tills datorn startas om. Om du vill visa systemfältsikonen permanent kan du läsa Starta systemfältsikonen när datorn startas nedan.
Starta systemfältsikonen när datorn startas	Konfigurerar systemfältsikonen för Intel PROSet II att visas i aktivitetsfältetet. Detta alternativ tillser att systemfältsikonen är synlig när datorn startats om. OBS! Detta alternativ finns bara tillgänglgit om du har använt alternativet Avsluta och starta inte igen vid omstart.


Teknisk information om smart avstängning

Smart avstängning (SPD eller Smart Power Down) är en energisparmetod som används med Intel 82558-, 82559-, och 82550-baserade adaptrar för att minimera strömförbrukningen när det inte finns någon giltig länk. SPD möjliggör att adaptern kan gå in i viloläge, vilket sparar upp till 150 % energi. SPD aktiveras när:

•	Adaptern inte har någon giltig länk

•	Operativsystemet gör uppehåll

Om Smart avstängning är aktiverad försätter operativsystemet adaptern i viloläge i båda fallen. Detta minskar den totala strömförbrukningen. Normal strömförbrukning och adapterfunktion återupptas när adaptern har en giltig länk eller när operativsystemet aktiveras igen efter uppehåll.


Meddelande om att det inte gick att avinstallera enheten

Om du försöker att ta bort en adapterteamlista eller VLAN-lista med hjälp av Enhetshanteraren får du få följande meddelande: "Det gick inte att avinstallera enheten. Enheten kan vara nödvändig för att kunna starta datorn."

Detta meddelande betyder att du inte kan använda Enhetshanteraren för att ta bort en virtuell adapter som skapats med Intel(R) PROSet II.  Om du vill avlägsna adaptrar från Enhetshanteraren ska du använda Intel PROSet II.

Se även

Ta bort ett adapterteam

Ta bort ett VLAN

Aktivera GVRP


Avancerade inställningar för VLAN

Så här anpassar du de avancerade VLAN-inställningarna

1.	I Nätverkskomponentträdet klickar du på VLAN-lista.

2.	Klicka på fliken Avancerat.

3.	I den nedrullningsbara listrutan klickar du på NumTxPackets och skriver sedan in det nya värdet.
NumRxPackets definierar antalet mottagningsbeskrivare som är datasegment som gör att adaptern kan allokera mottagna paket till minnet. Varje mottaget paket kräver en mottagningsbeskrivare och varje beskrivare använder 2 kb minne.

Du kan välja att öka antalet mottagningsbeskrivare om du märker en signifikant försämring av prestanda för mottagen trafik. Om mottagningsprestanda inte är ett problem använder du standardinställningen.

Viktigt:  Du kan försämra prestandan för ditt system om du ändrar detta värde.

4.	I den nedrullningsbara listrutan klickar du på NumTxPackets och skriver sedan in det nya värdet.

NumTxPackets anger antalet överföringsbeskrivare, vilket är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket en eller flera överföringsbeskrivare.

Du kan välja att öka antalet överföringsbeskrivare om du märker ett möjligt problem med överföringsprestanda. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestandan upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem använder du standardinställningen.

Viktigt:  Du kan försämra prestandan för ditt system om du ändrar detta värde.

5.	Klicka på OK.

6.	VLAN har nu anpassade inställningar.

VLAN har nu anpassats.

OBS!  När flera ändringar görs i team eller VLAN i Intel(R) PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Aktivera IPSec

IP Security (IPSec) är en uppsättning med standarder som utvecklats av Internet Engineering Task Force (IETF) som skyddar IP-kommunikationer genom att verifiera att datapaket inte ändras under överföringen. För detaljerad information om IP-säkerhet går du till Intels supportplats: http://support.intel.com eller, om du har Intel(R) Packet Protect, se användarhandboken för Packet Protect.

Krav

Du kan aktivera eller avaktivera IP-säkerhet i Intel(R) PROSet II om:

•	Du använder ett av följande operativsystem:

•	Windows* 98

•	Windows NT* 4.0, SP5 eller senare

•	Windows Me

•	Du använder en Intel® PRO/100-adapter

Om du använder Windows 2000 eller Windows XP finns IP-säkerhet tillgänglig som snap-in i Microsoft Management Console. Se operativsystemets dokumentation för mer information om IPSec-implementering i dessa operativsystem.

Aktivera IPSec så här

1.	Högerklicka på Teamlista eller Adapterlista utan team i Nätverkskomponentträdet och markera sedan Aktivera IPSec.

2.	Starta om datorn.

3.	Installera programvaran för Intel(R) Packet Protect.
OBS!  Innan du kan installera Packet Protect måste du markera alternativet Aktivera IPSec på minst en adapter eller ett team med adaptrar innan du installerar Packet Protect.

IPSec är nu aktiverat.

Avaktivera IPSec så här

Högerklicka på Teamlista eller Adapterlista utan team i Nätverkskomponentträdet och avmarkera sedan Aktivera IPSec.

Avlasta kryptering på Intel(R) PRO/100 S-adaptrar

Intel(R) PRO/100 S-familjen med adaptrar kan avlasta krypteringsbehandling för IP-säkerhetstransaktioner. Genom att hantera krypteringsbehandlingen reducerar du processoranvändningen. Aktivera denna avlastningsfunktion så här:

1.	Aktivera IP-säkerhet genom att använda antingen Intel Packet Protect eller, om datorn kör Windows 2000 eller XP, genom att använda Microsoft Management Console.

2.	I Intel PROSet II markerar du Intel PRO/100 S-adaptern i det Nätverkskomponentträd som du vill ska hantera IP-säkerhetskrypteringen.

3.	Klicka på fliken Avancerat.

4.	Från inställningslistan klickar du på Avlastning.

5.	I rutan Värde markerar du IP-säkerhet.

6.	Klicka på OK.

Adaptern är nu konfigured att avlasta krypteringsbehandling från processorn.


Stöd för GVRP

Arbetsstationer och växlar använder GVRP (GARP VLAN Registration Protocol) för att dynamiskt skapa, ändra och avlägsna VLAN. GVRP-aktiverade växlar kan identifiera växelporten för VLAN-medlemmar och spåra VLAN-status.

Krav

Innan det kan finnas stöd för GVRP på nätverket måste adaptrar och växlar ha GVRP aktiverat.

Så här aktiverar du GVRP på en adapter

1.	I Nätverkskomponentträdet högerklickar du på en Adapterteamlista som har minst ett VLAN.

2.	Klicka på GVRP-stöd.
Dialogrutan för GVRP-stöd visas.

3.	Klicka på Aktiverad.

4.	I den nedrullningsbara listrutan Anslutningstid för GVRP skriver du in antalet millisekunder mellan växelns GVRP-lämnakommando (LEAVE) och PROSet II:s GVRP-anslutningskommando (Join). Som standard initierar Intel(R) PROSet II ett anslutningskommando 200 ms efter ett lämnakommando.

5.	Klicka på OK.

Adaptern har nu GVRP aktiverad.

Felsökning

Eftersom det finns olika genomföranden av GVRP garanterar inte en aktivering av GVRP på adaptern GVRP-kompatibilitet mellan nätverksenheter. Om GVRP inte verkar fungera avaktiverar du GVRP på adaptern.

OBS!  När flera ändringar görs i team eller VLAN i Intel PROSet II rekommenderas att Intel PROSet II stängs efter varje ändring för att aktivera ändringen.  Därefter kan Intel PROSet II öppnas igen för att göra nästa ändring.


Windows NT 4.0 Service Pack
Windows NT* 4.0 Service Pack

Om du vill använda Intel(R) PROSet II och flertalet avancerade teamingfunktioner måste din installation av Windows NT 4.0 uppdateras till Service Pack 6a eller nyare.

För information om Microsoft Service Pack information, gå till http://www.microsoft.com/ntserver/ för att hämta ett Service Pack och instruktioner.


Avancerade inställningar för PRO/1000 Desktop-adaptrar

OBS!  Kontrollera med nätverksadministratören innan du gör några ändringar på dessa inställningar. Om de avancerade inställningarna konfigureras på ett sätt som inte är kompatibelt med andra nätverksenheter kan det försämra adapterns eller systemets prestanda.

Anpassningsbart avstånd mellan ramar

Kompenserar för alltför många Ethernet-paketkollisioner på nätverket.

Adaptrar som stöds	Alla
Standard	aktiverad

Anpassningsbart länksvar

Gör att datorn startar upp snabbare genom att hoppa över startrutiner som kräver nätverksanslutning när kabeln inte är ansluten till adaptern. Detta minskar betydligt datorns uppstartningstid.

När Anpassningsbart länksvar för Intel Ethernet-styrenheter är aktiverat, och det inte finns en nätverkskabel som är ansluten till RJ-45-porten, inaktiveras nätverksanslutningen. Då visas en gul varningsikon vid sidan om nätverksanslutningen i Enhetshanteraren.

Du kan aktivera nätverksanslutningen igen genom att ansluta nätverkskabeln till RJ-45-porten och sedan starta om datorn.

Adaptrar som stöds	Inte tillgängligt på varje adaptermodell.
Standard	Av
Rekommenderat	På
Intervall	På, Av
OBS! ALR (Adaptive Link Response) fungerar inte när det finns ett trådlöst kort som är aktivt i systemet.

Sammanslagningsbuffertar

Optimerar överföringsprestanda genom att anpassa antalet sammanslagningsbuffertar som gör att adaptern kan koppla datasegment före paketöverföringen.

Inställningen för Sammanslagningsbuffert måste vara konfigurerad så att den fungerar med överföringsbeskrivarens inställning. Inställningen för Sammanslagningsbuffert bör vara 30 - 50 % av värdet för överföringsbeskrivare. Om du inte ändrar inställningen för Sammanslagningsbuffertar så att den matchar överföringsbeskrivarinställningen förbättras kanske inte överföringsprestanda.

Sammanslagningsbuffertarna förbättrar överföringsprestanda betydligt på datorer som kör Windows NT 4.0. Överföringsprestanda förbättras också på datorer som kör Windows 98 och Windows 2000.

Operativsystem som stöds	Windows NT 4.0, 98, 2000, XP
Adaptrar som stöds	Alla
Standard	128
Intervall	16-768
Aktivera PME

Aktiverar eller avaktiverar wake-funktionen för adaptern på datorer som har äldre versioner av Avancerade energisparfunktioner (APM). Wake gör det möjligt att starta adaptern från vänteläge eller från avstängt läge när den mottar vissa pakettyper t.ex. ARP-paket.

•	Om du avaktiverar denna funktion avaktiveras alla wake-funktioner på datorer som har äldre versioner av energisparfunktionen.

•	Om denna funktion aktiveras kan adaptern svara på wake-signaler. Om du vill konfigurera adaptern för att svara på specifika pakettyper ska du läsa informationen om wake vid-inställningar senare i detta avsnitt.

•	Maskinvarans standardvärde tvingar adaptern att konfigurera Wake vid-funktioner baserat på datorns maskinvara.

•	Värdet Ingen åtgärd låter adaptern använda operativsystemets standard.

Om du vill avaktivera alla Wake vid-inställningar avaktiverar du denna funktion. Annars anger du Ingen åtgärd.

Adaptrar som stöds	82559-baserade adaptrar. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad
Slutför snabb överföring

Optimerar överföringsprestanda genom att fria upp överföringsbeskrivare för återanvändning innan paketet skickas ut på nätverket.

•	Med Slutför snabb överföring avaktiverad måste adaptern vänta tills paketet har skickats för att kunna återanvända överföringsbeskrivare.

•	Med Slutför snabb överföring aktiverad kan adaptern återanvända överföringsbeskrivarna tidigare, vilket gör att adaptern kan förhöja överföringsprestandan.

Adaptrar som stöds	82544-baserade. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	På
Intervall	På, Av
Flödeskontroll

Möjliggör att adaptrarna reglerar trafik mer effektivt.

•	Adaptrar genererar flödeskontrollramar när deras mottagningsköer når en fördefinierad gräns. Genom att skapa flödeskontrollramar instrueras sändaren att sänka överföringshastigheten.

•	Adaptrar svarar på flödeskontrollramar genom att pausa paketöverföringen i den tidsperiod som flödeskontrollramen anger.

Att låta adaptrarna justera paketöverföringen med flödeskontroll hjälper till att förhindra utelämnade paket.

OBS! För att adaptrarna ska kunna dra fördel av denna funktion måste länkpartners ha stöd för flödeskontrollramar.

Adaptrar som stöds	82540- och 82544-baserade, överföring och mottagning. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Generera och svara på flödeskontrollramar
Intervall	• Av, Svara, Generera, Generera och svara, Maskinvarans standardvärde

Jumboramar

OBS! Jumboramar stöds endast vid 1000 Mbps. Om du använder Jumboramar vid 10 eller 100 Mbps kan det leda till dåliga prestanda eller att anslutningen bryts.

Aktiverar eller avaktiverar funktionen Jumboramar. Jumboramar kan öka kapaciteten och minska processorbelastningen genom att placera mer data i varje ram och därigenom skicka färre ramar. Standardstorleken på Ethernet-ramar är 1514 byte, medan Jumboramar kan innehålla 4088, 9014 eller 16128 byte.

Aktivera Jumboramar men bara om enheterna i nätverket stöder dem och har konfigurerats att använda samma ramstorlek. Vid inställning av Jumboramar på andra nätverksenheter ska du vara uppmärksam på att nätverksenheter beräknar jumboramarnas storlekar på olika sätt. Vissa enheter inkluderar huvudinformation i ramstorleken medan andra inte gör det. Intels adaptrar inkluderar inte huvudinformation i ramstorleken.

Mer information finns i avsnittet Jumboramar.

Adaptrar som stöds	Alla
Standard	Avaktiverad
Intervall	Avaktiverad (1514), 4088, 9014 och 16128. (Ange växeln 4 byte högre för CRC, plus 4 byte om du använder VLAN eller Markering av QoS-paket.)  OBS! Vilket värde som helst i intervallet (1514-16128) kan anges i Windows registernyckel MaxFrameSize.
Lokalt administrerad adress

Åsidosätter adapterns MAC-adress. Skriv in en ny nätverksadress genom att skriva ett tolvsiffrigt hexadecimalt tal i värderutan.

Adaptrar som stöds	Alla
Standard	Ingen
Intervall	0000 0000 0001 - FFFF FFFF FFFD Undantag: • Använd inte en multicast-adress (Minst signifikanta bit av högsta byte = 1).  • Använd inte enbart nollor eller enbart F. Inte befintlig inställning: ändrar tillbaka till adapterns ursprungliga nätverksadress.
Windows 98SE-användare:

Om du vill använda standardadressen efter att ha använt en manuellt tilldelad adress utför du en av följande procedurer:

•	På fliken Avancerat i dialogrutan Nätverksegenskaper markerar du Lokalt administrerad adress och ändrar dess värde till 0. Klicka på OK för att verkställa inställningen.

•	I Intel PROSet II klickar du på fliken Avancerat, klicka sedan på Återställ standardvärden eller radera alla tecken i fältet Värde. Klicka på OK för att tillämpa inställningen.

Logga länklägeshändelsen

Denna inställning används för att aktivera/inaktivera loggningen av ändringar i länkläget. Om inställningen är på genererar en ändringshändelse av typ länk upp eller länk ner ett meddelande som visas i systemets händelselogg. Administratörer visar händelsemeddelandet i systemets händelselogg.

Följande händelser loggas.

LINK_UP_CHANGE

LINK_DOWN_CHANGE

LINK_DUPLEX_MISMATCH

Adaptrar som stöds	Alla
Standard	Aktivera
Intervall	Aktivera, Avaktivera
Avlastning av kontrollsumma för TCP, mottagning

Möjliggör att adaptern verifierar kontrollsumman för TCP eller UDP för inkommande paket.

•	Med avlastning avaktiverad verifierar operativsystemet kontrollsumman för TCP.

•	Med avlastning aktiverad utför adaptern verifieringen åt operativsystemet.

Denna funktion förbättrar mottagningsprestanda och minskar processorbelastning.

Operativsystem som stöds	• Windows XP* • Windows 2000 • Windows 98 stöder inte avlastning.
Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	• Windows* XP: På • Windows 2000: Av
Intervall	På, Av
Avlastning av kontrollsumma för IP, sändning

Möjliggör att adaptern beräknar kontrollsumman för IP för utgående paket.

•	Med avlastning avaktiverad verifierar operativsystemet kontrollsumman för IP.

•	Med avlastning aktiverad utför adaptern verifieringen åt operativsystemet.

Denna funktion förbättrar IP-sändningsprestanda och minskar processorbelastning.

Operativsystem som stöds	• Windows XP* • Windows 2000 • Windows 98 stöder inte avlastning.
Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	På
Intervall	På, Av
Avlastning av kontrollsumma för TCP, sändning

Möjliggör att adaptern beräknar kontrollsumman för TCP eller UDP för utgående paket.

•	Med avlastning avaktiverad verifierar operativsystemet kontrollsumman för TCP.

•	Med avlastning aktiverad utför adaptern verifieringen åt operativsystemet.

Denna funktion förbättrar sändningsprestanda för TCP och UDP och minskar processorbelastning.

Operativsystem som stöds	• Windows XP* • Windows 2000 • Windows 98 stöder inte avlastning.
Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	På
Intervall	På, Av OBS! Ange denna funktion som Av när servern stöder DOS-baserade klienter.
Markering av QoS-paket

Gör att adaptern kan skicka och ta emot IEEE 802.3ac-markerade ramar, vilket inkluderar:

•	802.1p QoS-markeringar (Quality of Service eller tjänstekvalitet) krävs för prioritetsmarkerade paket och

•	802.1Q-markeringar krävs för VLAN

Intel PROSet II aktiverar automatiskt 802.1p-markering vid konfigurering av ett VLAN.

Adaptrar som stöds	82559-baserade adaptrar och senare. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad
Mottagningsbeskrivare

Definierar antalet mottagningsbeskrivare som är datasegment som gör att adaptern kan allokera mottagna paket till minnet. Varje mottaget paket kräver en mottagningsbeskrivare och varje beskrivare använder 2 kb minne.

Du kan välja att öka antalet mottagningsbeskrivare om du märker en signifikant försämring av prestanda för mottagen trafik. Om mottagningsprestandan inte är ett problem använder du standardinställningen 256.

Adaptrar som stöds	Alla
Standard	160
Intervall	80-2048
Avlastning av TCP-segmentering

Möjliggör att adapterns maskinvara kan segmentera data till giltiga Ethernet-ramar.

•	Med TCP-segmentering avaktiverad segmenterar operativsystemets programvara data innan de skickas till adaptern för överföring.

•	Med TCP-segmentering aktiverad segmenterar adaptern data i ramar.

Eftersom adapterns maskinvara kan klara datasegmenteringen mycket snabbare än operativsystemets programvara förbättrar denna funktion i hög grad överföringsprestanda. Dessutom förbrukar adaptern mindre processorresurser.

Operativsystem som stöds	Windows XP
Adaptrar som stöds	Endast 82544-baserade och 82540-baserade adaptrar. Se avsnittet Adapterspecifikationer för hjälp med att identifiera din adapter.
Standard	1
Intervall	0 = annonsera inte denna funktion; 1 = annonsera denna funktion.

Överföringsbeskrivare

Anger antalet överföringsbeskrivare som är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket en eller flera överföringsbeskrivare.

Du kan välja att öka antalet överföringsbeskrivare om du märker ett möjligt problem med överföringsprestanda. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestandan upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem använder du standardinställningen 256.

Adaptrar som stöds	Alla
Standard	256
Intervall	80-2048
Wake vid länk-inställningar

Väcker (använder wake på) datorn om nätverksanslutningen etablerar länk när datorn är i viloläge. Du kan aktivera funktionen, avaktivera den eller låta operativsystemet använda sitt standardvärde.

Operativsystem som stöds	Windows 9x, Windows 2000, Windows XP
Intervall	Avaktiverad, Tvingad, Operativsystemstyrt
Standard	Avaktiverad

Wake vid-inställningar

Dessa inställningar avser funktioner som antingen aktiveras av operativsystemet eller av Intel PROSet. Dessa funktioner fungerar annorlunda eller stöds inte alls beroende på vilken version av Windows som du använder.

Dessa Windows-versioner stöder Wake vid-inställningar: Windows 2000, Windows XP64 bit Edition, Windows XP Professional och Windows Server 2003. Denna funktion stöds inte i Windows Server 2003 för 64-bitars Itanium(TM)-baserade system.

Aktivera Wake vid-inställningar

Du kan använda Intel PROSet när du konfigurerar den Wake vid-inställning som adaptern använder. Innan du väljer Wake vid-inställningar måste du aktivera operativsystemet så att det använder Wake vid-inställningar. Gör det genom att följa instruktionerna.

Aktivera Wake vid-inställningar

6.	I Intel PROSet klickar du på fliken Avancerat.

7.	I listrutan Inställning klickar du på Wake vid-inställningar.

8.	I listan Värde väljer du tillämplig Wake vid-inställning.

9.	Klicka på OK eller Verkställ.

10.	Innan adaptern kan reagera på dessa typer av Wake vid-paket måste du ha instruerat operativsystemet att använda Wake vid-inställningar. Du aktiverar Wake vid-inställningar genom att gå till Enhetshanteraren och aktivera alternativet Tillåt att den här enheten tvingar datorn ur vänteläge.

Tillgängliga inställningar

Dessa Wake vid-inställningar finns tillgängliga i Intel PROSet:

Inställning	Beskrivning
Avaktiverad	Adaptern använder inte Wake vid-inställningar.
Wake vid Magic Packet	Gör att adaptern kan starta som svar på mottagande av ett Magic Packet. Ett Magic Packet är ett paket som innehåller 16 sammanhängande kopior av den mottagande adapterns Ethernetadress. När du konfigurerar denna funktion åsidosätter Intel PROSet operativsystemets värde för denna funktion.
Wake vid dirigerat paket	Gör att adaptern kan starta när adaptern mottar ett dirigerat paket som är ett unicast-paket som skickas till adapterns MAC-adress.  Protokollet måste dessutom aktivera denna wake-metod i drivrutinen. Om denna funktion avaktiveras ignorerar drivrutinen alla protokollbegäran om att aktivera denna wake-metod.
Wake vid Magic- och dirigerade paket	Gör det möjligt för adaptern att vakna (wake up) när den mottar ett Magic- eller dirigerat paket.
Operativsystemstyrt	Ger operativsystemet fullständig kontroll över Wake vid-inställningarna.

OBS! Om flera IP-adresser konfigureras för en adapter kan operativsystemet begära att vakna (wake up) vid ARP-mönster till alla de konfigurerade adresserna. Adaptern vaknar bara som svar på ARP-paket som avfrågar den första IP-adressen i listan.

OBS!  Wake vid-inställningar inkluderar inte förmågan att väcka en maskin från avstängningsläge (S5). Detta läge styrs av inställningen Aktivera PME som även finns tillgänglig på fliken Avancerat. Även om Wake vid-inställningarna är avaktiverade avgörs förmågan att vakna från S5 av inställningen Aktivera PME.

PME-inställningarna fungerar under förutsättning att adapterns drivrutin är aktiverad. När drivrutinen avaktiverats återgår maskinvaran dock till sin maskinvarustandard, som, beroende på inställning, tillåter eller inte tillåter att datorn vaknar från avstängning.

Knappen Återställ standardvärden

Denna knapp återställer den för närvarande markerade avancerade inställningen med den inställningens standardvärde.  Se de inställningar som räknats upp ovan för varje standardvärde.  (Detta alternativ är inte tillgängligt för alla inställningar.)


Spara eller återställa konfigurationen
Återställa Intel(R) PROSet II-konfiguration från sparad fil

Om du har sparat en adapters avancerade inställningar till en fil kan du använda den filen för att återställa anpassade VLAN-inställningar och teaminställningar. Observera att återställande av Intel PROSet II-konfigurationen inte återställer operativsystemsspecifika nätverksinställningar såsom IP-adress eller protokollbindningar.

Innan du börjar

När du återställer inställningar måste inställningarna återställas på samma dator som de skapades från. Dessutom måste datorn ha samma nätverk och maskinvara installerad som när den ursprungliga konfigurationen sparades. Om datorn exempelvis var ansluten till en Intel-gigabitväxel när konfigurationsfilen sparades måste datorn vara ansluten till samma växel när konfigurationen återställs.

Funktionen Spara/återställ är kompatibel med Windows NT* 4.0,  2000, 98SE, Me och XP.

VIKTIGT: Redigera inte konfigurationsfilen. Om du ändrar något i konfigurationsfilen blir den oanvändbar.

Så här återställer du adapterinställningarna från en sparad fil

1.	På Verktygsmenyn klickar du på Spara/återställ konfiguration.
Dialogrutan för Spara/återställ visas.

2.	Klicka på Återställ.
Dialogrutan Öppna visas.

3.	Bläddra till den mapp där du sparade konfigurationsfilen och markera den.

4.	Klicka på Öppna.
Intel PROSet II visar de återställda inställningarna. Dessa inställningar tillämpas inte förrän du klickar på OK.

5.	Om så behövs kan du ändra adapterkonfigurationen.

6.	Stäng Intel Proset II och verkställ den återställda konfigurationen genom att klicka på OK.

Se även:

Spara konfiguration


Lägga till adapter till ett team - varning
Lägga till en adapter till ett team

När ett team skapas, se till att varje adapter är medlem av endast ett team. Detta inkluderar team som skapats med Intel(R) PROSet och team som skapats med hjälp av andra konfigurationsverktyg. Att lägga till samma adapter till flera team kan ha negativ inverkan på teamfunktioner och -prestanda.

•	Om du använde Intel PROSet när du skapade teamen ska du markera Trädvy för att identifiera befintliga teammedlemmar.

•	Om du använde något annat konfigurationsverktyg för att skapa teamen ska du gå igenom teamen och deras medlemmar i detta verktyg för att försäkra dig om att adaptern inte redan finns i ett team.

Se även

Ta bort en adapter från ett team

Skapa ett nytt team


Navigera i PROSet II
Navigera i Intel(R) PROSet II

Intel(R) PROSet II har tre navigeringsområden:

•	Meny

•	Nätverkskomponentträdet

•	Flikar

Från menyn kan du:

•	Konfigurera team eller aktivera IP-säkerhet från Åtgärd.

•	Spara eller återställa adapter-VLAN och teamingkonfiguration från Verktyg.

•	Använda direkthjälpen eller gå till Intels supportwebbplats.

Från Nätverkskomponentträdet kan du:

•	Enkelklicka på en adapter för att se detaljer och konfigurationsinställningar för adaptern.

•	Högerklicka på en adapter för att konfigurera team och aktivera IPSec.

•	Högerklicka på ett team för att ändra teaminställningar eller konfigurera VLAN.

•	Högerklicka på en teammedlem för att ändra adapterinställningarna.

Från flikarna kan du utföra adapterövervakning och konfigurationsändringar.

Systemfältsikonen

Kryssrutan Visa systemfältsikonen gör att du kan visa eller dölja systemfältsikonen för Intel PROSet II som finns på aktivitetsfältet (nära klockan). Om du vill dölja systemfältsikonen avmarkerar du kryssrutan.

Mer information om Intel(R) PROSet II systemfältsikon


Allmän information

Visa allmän information om en adapter klickar du på adaptern i Nätverkskomponentträdet.

Med fliken Allmänt kan du:

•	Visa grundläggande information om adaptern

•	Testa kabelfunktion
NOTE: Kabeltestet finns bara tillgängligt för vissa adaptrar.

•	Identifiera adapteröppningens placering

•	Visa ytterligare information


Visa grundläggande information om adaptern

Fliken Allmänt innehåller följande information om den adapter som markerats i Nätverkskomponentträdet.

Ethernet-adress	Den tolvsiffriga hexadecimala nodadressen för adaptern, även kallad MAC-adress.
Artikelnummer	Intels artikelnummer för adaptern.
IP-adress	Om du använder IPv4-protokoll visas adapterns TCP/IP-adress.  Intel(R) PROSet II visar ännu inte IPv6-adresser.
Status för nätverksdrivrutin	Anger om Intels nätverksdrivrutin har laddats eller inte för den markerade adaptern.
Status för nätverket	Anger länk, hastighet och duplexstatus för den markerade adaptern. Fälten i grupprutan Nätverksstatus varierar beroende på adaptertyp.  • Länklampa: På anger att adapterns kabel är ansluten till en giltig hub eller en giltig växelport, Av anger att ingen länk finns. • Hastighet: Den hastighet som anges här (1000, 100 eller 10) anger den hastighet som adaptern har länkats med. • Aktivitetslampa: Blinkar när adaptern är ansluten till ett nätverk med aktivitet. Släckt anger att ingen aktivitet finns eller att kabeln inte är ansluten. • Duplex: Full Duplex anger att adaptern skickar och tar emot trafik samtidigt. Halv Duplex anger att adaptern vid en viss tidpunkt antingen skickar eller tar emot (trafik skickas inte och tas emot samtidigt).


Ange hastighet och duplexinställningar

Som standard använder Intels adaptrar automatisk förhandling av hastighet och duplexinställningar. Om adaptern inte kan upprätta en anslutning med hjälp av automatisk förhandling kan du behöva konfigurera hastighet och duplexinställningar manuellt på adaptern och länkpartnern. Om en växel till exempel inte stöder automatisk förhandling eller har konfigurerats med en specifik hastighet och duplexinställning måste du manuellt konfigurera adapterns hastighet och duplexinställning så att de matchar växelns inställningar.

VIKTIGT: Om adapterhastighet och duplexkonfiguration inte exakt matchar inställningarna på länkpartnern kan nätverksanslutningen förloras.

När automatisk förhandling är avaktiverad är möjliga inställningar för länkhastighet och duplexinställningar:

•	10 Mbps eller 100 Mbps Full duplex (kräver att länkpartnern klarar och är inställd på full duplex). Adaptern kan skicka och ta emot paket samtidigt.

•	10 Mbps eller 100 Mbps Halv duplex (kräver att länkpartnern är inställd på halv duplex). Adaptern utför en operation åt gången. Den antingen skickar eller tar emot.

Om du vill få information om hur man konfigurerar hastighet och duplex klickar du på motsvarande adapterfamilj:

•	Intel(R) PRO/1000 (koppar)
OBS! Fiberbaserade Intel(R) PRO/1000-adaptrar arbetar på 1000 Mbps, full duplex.

•	Intel(R) PRO/10 eller PRO/100


Länkkonfiguration för PRO 10/100
Konfigurera hastighet och duplex: Intel(R) PRO/10 och PRO/100-adaptrar

I Nätverkskomponentträdet klickar du på den Intel(R) PRO/10- eller PRO/100-adapter som du vill konfigurera.

1.	Klicka på fliken Avancerat.

2.	I inställningslistan klickar du på Länkhastighet och duplexinställningar.

3.	I rutan Länkhastighet och duplexinställningar klickar du på den hastighet och det duplexläge som är lämpligt för din adapter och dess länkpartner.  Se efter i länkpartnerns dokumentation för information om hur du identifierar länkpartnerns hastighet och duplexläge.

4.	Klicka på OK.

5.	Starta om datorn om du ombes att göra det.

Adaptern har nu konfigurerats med de angivna hastighets- och duplexinställningarna.

VIKTIGT: Om adapterhastighet och duplexkonfiguration inte exakt matchar inställningarna på den anslutna enheten kan nätverksanslutningen vara förlorad eller adapterns prestanda vara försämrad.


Konfigurera avancerade funktioner för adapter

Välj en adaptertyp om du vill se dess avancerade funktioner

•	Intel(R) PRO/1000 Desktop

•	Intel(R) PRO/1000 Server

•	Intel(R) PRO/100

•	Intel(R) PRO/100 VE och VM

•	Intel(R) PRO/10


Växelfeltolerans

Växelfeltolerans (SFT) gör att du kan ansluta två adaptrar i ett team till två växlar. Varje adapter ansluter till en separat växel:

Växelfeltolerans kan upptäcka fel när de inträffar:

•	På någon av adaptrarna i teamet

•	På någon av de kablar som ansluter adaptrarna till respektive växel

•	På de växelportar som adaptrarna anslutits till

•	På någon växel som anslutits till respektive adapter

I varje SFT-team är en adapter primär adapter och en adapter sekundär adapter. Vid normal funktion är den sekundära adaptern i viloläge. Den varken överför eller tar emot trafik. Om den primära adaptern tappar anslutningen tar den sekundära adaptern automatiskt över.

Adapterhastighet	Kan vara blandad t.ex. att en adapter använder 100 Mbps och en använder 1000 Mbps
Protokoll	Alla
Nätverkskonfiguration	• Varje adapter ansluter till en separat växel • Sammanbindande träd måste vara aktiverat
Se även:

Om Teaming

Teamtyper


Spara konfiguration till en extern fil
Spara konfiguration till en fil

Du kan spara team- och VLAN-konfigurationen från Intel(R) PROSet till en fil och vid ett senare tillfälle återställa den konfigurationen till Intel PROSet. Observera att när du sparar Intel PROSet II-konfigurationen sparas inte operativsystemsspecifika nätverksinställningar som till exempel IP-adress eller protokollbindningar.

Funktionen Spara/återställ är kompatibel med Windows NT* 4.0,  2000, 98SE, Me och XP.

OBS! När du har sparat en konfiguration med ett visst filnamn kan du inte använda det filnamnet igen. Du måste använda ett nytt namn varje gång du sparar en konfiguration från Intel PROSet II.

Så här sparar du en Intel(R) PROSet II-konfiguration

1.	På Verktygsmenyn klickar du på Spara/återställ konfiguration.
Dialogrutan för Spara/återställ visas.

2.	Klicka på Spara.
Dialogrutan Spara som visas.

3.	Bläddra till den mapp där du vill spara konfigurationsfilen och skriv sedan in ett filnamn.

4.	Klicka på Spara.

5.	Klicka på OK.

Intel PROSet iI-konfigurationen har sparats.

När du har sparat konfigurationen ska du inte redigera eller ändra något i filen. Om du ändrar något i konfigurationsfilen blir den oanvändbar.

Se även

Återställa konfiguration


Testa växelkonfiguration

Med hjälp av växelkonfigurationstestet kan du försäkra dig om att länkpartners länkpartners stöder den adapterteamkonfiguration som valts. Om adaptern till exempel är medlem i ett Fast EtherChannel*-team kan Intel (R) PROSet verifiera att länkpartners som anslutits till adaptern stöder funktionen länkaggregation.

Specifik information om kraven för varje teaminställning ges i sektionen Om Teaming.

Viktigt:  När detta test körs förlorar teamet temporärt nätverksanslutningen.

OBS! Detta test upptäcker inga fel när någon av följande situationer föreligger.

Adapterkonfiguration	Växelkonfiguration
Dynamisk 802.3ad	Vilken som helst
Team med länkaggregation utan VLAN	Då är det antingen så att växeln: • Inte tillhör något VLAN • Har konfigurerats med märkta VLAN
Team med länkaggregation med VLAN	Växeln: • Tillhör inte det VLAN som konfigurerats på adaptern och • Har ingen länkaggregation definierad
Så här kör du växelkonfigurationstestet

1.	I Nätverkskomponentträdet klickar du på det team som du vill testa.
För att kunna köra testet måste det finnas minst två adapters i teamet.

2.	På fliken Teamkonfiguration klickar du på Testa växelkonfiguration.
Dialogrutan Testa växelkonfiguration visas.

3.	Om du vill köra testet klickar du på Ja.
Om några konfigurationsfel för teamet eller länkpartnern upptäcks visas fliken Felsökning.

OBS!  På grund av att det tar lång tid att testa Protokoll för sammanbindande träd (STP) kanske inte Intel(R) PROSet II med säkerhet kan ange om Protokoll för sammanbindande träd (STP) har aktiverats på nätverket. Försäkra dig om att växlarna har konfigurerats med STP:

•	Aktiverad för SFT-team

•	Avaktiverad (portfast) för alla andra teamlägen


Ansvarsfriskrivning för delar från annan leverantör
* Övriga produkt- och företagsnamn kan vara varumärken som tillhör andra företag och används endast i förklaringssyfte och till ägarens fördel, utan avsikt att göra intrång i rättigheter.


Konfigurera energisparfunktioner
Konfigurera strömförbrukning

Med hjälp av fliken Energisparare kan du konfigurera adapterns strömförbrukning.  När adaptern är i energisparläge arbetar den med 10 Mbps.

I syfte att kunna använda denna funktion måste adaptern:

•	Vara konfigurerad för automatisk förhandling av hastighet och

•	Vara ansluten till en länkpartner som stöder automatisk förhandling av hastighet

Om adaptern tvingas arbeta med 100 Mbps eller om länkpartnern inte kan arbeta med 10 Mbps kan inte energisparfunktionen aktiveras för adaptern.

På vissa datorer sparas inte inställningarna för energisparläge efter att datorn startas om. Om inställningarna inte sparas visas texten Tillfällig energisparare i övre halvan av fliken Energisparläge. Inställningarna sparas inte på system som kör Windows XP eller Windows Server 2003.

Om inställningarna inte ändras efter att datorn har startats om visas texten Energispararinställningar i övre delen.

OBS! När energisparfunktionen är aktiverad saktar Intel(R) PRO/100 M-adaptrarna ner adapterns behandlingscykler. Genom denna funktion kan Intel PRO/100 M-adaptrar ytterligare minska strömförbrukningen. Andra Intel PRO/100-adaptrar bromsar inte behandlingscyklerna för att spara på ström.

På fliken Energisparare kan du anpassa följande:

•	Adapterns totala strömförbrukning. När du konfigurerar total strömförbrukning behåller adaptern denna inställning så länge som den förblir aktiverad. Om adaptern avaktiveras sparas inte denna strömförbrukningsinställning.

•	Strömförbrukning i viloläge. När datorn ställs i viloläge sparar adaptern automatiskt energi och förhandlar till 10 Mbps. Intel PROSet II bevarar denna inställning även om datorn startar om.

•	Strömförbrukning under batteridrift för Windows* XP. När datorn använder batteri sparar adaptern automatiskt energi och förhandlar till 10 Mbps. Intel PROSet II bevarar denna inställning även om datorn startar om.

Adaptrar som stöds	Intel(R) PRO/100-adaptrar
Operativsystem som stöds	• Windows* 98, 2000, XP, Me och NT* för angivande av total strömförbrukning eller strömförbrukning i viloläge • Windows XP vid angivande av strömförbrukning när datorn använder batteri.
Standard	Standard är att adaptrarna förbrukar den mängd energi som krävs för att upprätthålla hastighets- och duplexinställningarna.  När adaptern sparar energi förhandlar den till 10 Mbps, vilket minskar den totala mängden trafik som hanteras av adaptern.
Så här konfigurerar du adapterns strömförbrukning

1.	I Nätverkskomponentträdet klickar du på den adapter som du vill konfigurera strömförbrukningen för.
Om adaptern stöder energisparfunktioner visas fliken Energisparare.

2.	Om du vill minska den totala strömförbrukningen klickar du på Använd låg strömförbrukning och förhandla till 10 Mbps och klickar sedan på Tillämpa. Adaptern behåller denna inställning så länge som den förblir aktiverad.
Om du vill konfigurera adaptern så den använder dess normala strömförbrukning och dess standardhastighet klickar du på Använd normal strömförbrukning och återuppta ursprunglig hastighet och klickar sedan på Tillämpa.

3.	Om du vill minska mängden ström som adaptern förbrukar när datorn är i viloläge klickar du på Låg strömförbrukning i viloläge.

4.	Om adaptern används på en dator med Windows XP kan du också definiera energisparinställningar för när datorn körs på batteri. Om du vill minska mängden ström som adaptern förbrukar när datorn körs på batteri klickar du på Låg strömförbrukning under batteridrift.

5.	Klicka på OK för att tillämpa konfigurationen.


Inkommande belastningsutjämning

För team med anpassningsbar belastningsutjämning (ALB eller Adaptive Load Balancing) kan du välja att antingen aktivera eller avaktivera inkommande belastningsutjämning (RLB). RLB-alternativet är alltid tillgängligt:

•	På fliken Avancerade inställningar för ett team med anpassningsbar belastningsutjämning (ALB)

•	När du skapar ett team för anpassningsbar belastningsutjämning (ALB) med Guiden för teaming

Om du avaktiverar RLB mottar endast den primära adaptern trafik. Alla adaptrar belastningsfördelar utgående trafik (Tx).

Om du aktiverar RLB beror trafikfördelningen på skillnaden i hastighet mellan teammedlemmarna.

•	Alla adaptrar överför och tar emot IP-trafik i ett team där alla medlemmar har samma hastighet. Den primära adaptern sköter icke-routad trafik (lager 2).

•	I ett team där medlemmarna har olika hastighet utjämnar medlemmarna med den snabbaste anslutningen belastningen för den inkommande IP-trafiken (Rx). Alla adaptrar belastningsfördelar utgående IP-trafik (Tx). Den primära adaptern sköter icke-routad trafik (lager 2).
OBS! Med RLB aktiverat väljer Intel(R) PROSet II automatiskt förvald primär adapter. Du kan åsidosätta standardvalet genom att ange en adapter som primär eller sekundär adapter.

Se även:

Om Teaming

Skapa ett nytt team


Avancerade inställningar för PRO/100 VE- och VM-adaptrar
Avancerade inställningar för Intel(R) PRO/100 VE- och VM-adaptrar

De inställningar som finns på fliken Avancerat gör att du kan anpassa hur adaptern hanterar buffertar, energisparfunktioner och andra funktioner. Några av följande funktioner kan vara otillgängliga beroende på vilket operativsystem du kör och vilka adaptrar som finns installerade.

Avancerade inställningar

Anpassningsbart avstånd mellan ramar

Kompenserar för alltför många Ethernet-paketkollisioner på nätverket.  Som standard är denna inställning 0, vilket avaktiverar funktionen.

Den rekommenderade inställningen (1) fungerar bäst för flertalet datorer och nätverk eftersom den dynamiskt anpassas till nätverkets trafikförhållanden. Detta dynamiska läge är endast aktivt när värdet är 1. I vissa sällsynta fall kan du kanske erhålla bättre prestanda genom att ange avståndsvärdet manuellt. Genom att ange ett värde framtvingar du ett statiskt mellanrum mellan paket.

Ett större värde ger längre fördröjning mellan de ramar som överförs.

Adaptrar som stöds	Alla
Standard	0: avaktiverad
Intervall	0-255

Anpassningsbart länksvar

Gör att datorn startar upp snabbare genom att hoppa över startrutiner som kräver nätverksanslutning när kabeln inte är ansluten till adaptern. Detta minskar betydligt datorns uppstartningstid.

När Anpassningsbart länksvar för Intel Ethernet-styrenheter är aktiverat, och det inte finns en nätverkskabel som är ansluten till RJ-45-porten, inaktiveras nätverksanslutningen. Då visas en gul varningsikon vid sidan om nätverksanslutningen i Enhetshanteraren.

Du kan aktivera nätverksanslutningen igen genom att ansluta nätverkskabeln till RJ-45-porten och sedan starta om datorn.

Adaptrar som stöds	Endast för mobila produkter. Inte tillgängligt på varje adaptermodell.
Standard	Av
Rekommenderat	På
Intervall	På, Av
OBS! ALR (Adaptive Link Response) fungerar inte när det finns ett trådlöst kort som är aktivt i systemet.

Sammanslagningsbuffertar

Optimerar överföringsprestanda genom att anpassa antalet sammanslagningsbuffertar som gör att adaptern kan koppla datasegment före paketöverföringen.

Inställningen för Sammanslagningsbuffert måste vara konfigurerad så att den fungerar med överföringsbeskrivarens inställning. Inställningen för Sammanslagningsbuffert bör vara 30 - 50 % av värdet för överföringsbeskrivare. Om du inte ändrar inställningen för Sammanslagningsbuffertar så att den matchar överföringsbeskrivarinställningen förbättras kanske inte överföringsprestanda.

Sammanslagningsbuffertarna förbättrar överföringsprestanda betydligt på datorer som kör Windows NT 4.0. Överföringsprestanda förbättras också på datorer som kör Windows 98 och Windows 2000.

Standard	8
Rekommenderat värde	8
Intervall	1-32
Lokalt administrerad adress

Åsidosätter adapterns MAC-adress. Skriv in en ny nätverksadress genom att skriva ett tolvsiffrigt hexadecimalt tal i värderutan.

Standard	Ingen
Intervall	0000 0000 0001 - FFFF FFFF FFFD Undantag: • Använd inte en multicast-adress (Minst signifikanta bit av högsta byte = 1).  • Använd inte enbart nollor eller enbart F.
Windows 98SE-användare:

Om du vill använda standardadressen efter att ha använt en manuellt tilldelad adress utför du en av följande procedurer:

•	På fliken Avancerat i dialogrutan Nätverksegenskaper markerar du Lokalt administrerad adress och ändrar dess värde till 0. Klicka på OK för att verkställa inställningen.

•	I Intel PROSet II klickar du på fliken Avancerat, klicka sedan på Återställ standardvärden eller radera alla tecken i fältet Värde. Klicka på OK för att tillämpa inställningen.

PCI-busseffektivitet

Möjliggör att adaptern antingen kan använda den bästa metoden för paketöverföring eller alltid använda paketsammanslagning.

•	När PCI-busseffektivitet är avaktiverad använder adaptern den överföringsmetod som ger bästa möjliga prestanda. Om paketsammanslagning ger bäst överföringsprestanda sammanslår adaptern automatiskt paket.

•	När PCI-busseffektivitet är aktiverad använder adaptern alltid paketsammanslagning.

Ställ in PCI-busseffektivitet till avaktiverad om det inte förekommer några problem med paketöverföringsprestandan. Om det finns ett stort antal underskridningar eller om PCI-bussen uppvisar prestandaproblem anger du detta värde till aktiverad.

Standard	Avaktiverad
Intervall	Aktiverad, Avaktiverad

Mottagningsbuffertar

Anger antalet buffertar som används av drivrutinen när data kopieras till protokollminnet.

I situationer med hög nätverksbelastning kan en ökning av antalet mottagningsbuffertar öka prestandan. Nackdelen är att detta också ökar mängden systemminne som används av drivrutinen. Under andra omständigheter kan du försämra systemets prestanda om du ändrar detta värde.  Använd på egen risk.

Standard	48
Rekommenderat värde	• Endast en adapter i Windows 98, Windows Me, Windows 2000 och Windows XP: 48 • Endast en adapter i Windows NT 4.0: 32 • Adapter i team: 250
Intervall	8-1024
Avstånd mellan ramåterföringar

Ökar fördröjningen mellan ramåteröverföringar. Även om det finns en inbyggd Ethernet-algoritm som adaptrar använder för återöverföring av ramar efter kollisioner kan en ökning av fördröjningen förbättra nätverksprestanda om det finns ett onormalt stort antal kollisioner på nätverket.

Adaptrar som stöds	Alla
Standard	6
Intervall	6-15

Överföringskontrollblock

Anger antalet överföringskontrollblock som är datasegment som möjliggör att adaptern spårar överföringspaket i systemminnet. Beroende på paketets storlek kräver varje överföringspaket ett eller flera överföringskontrollblock.

Du kan välja att öka antalet överföringskontrollblock om du märker ett möjligt problem med överföringskontrollblocken. Även om en ökning av antalet överföringskontrollblock kan förhöja överföringsprestanda upptar kontrollblocken en viss mängd systemminne. Om överföringsprestandan inte är ett problem rekommenderas värdet 32.

Standard	16
Rekommenderat värde	32
Intervall	8-64
Wake vid länkändring

Väcker (använder wake på) datorn om nätverksanslutningen etablerar länk när datorn är i viloläge. Du kan aktivera funktionen, avaktivera den eller låta operativsystemet använda sitt standardvärde.

Operativsystem som stöds	Windows 9x, Windows 2000, Windows XP
Intervall	Avaktiverad, Tvingad, Operativsystemberoende
Standard	Avaktiverad
Wake vid-inställningar

Dessa inställningar avser funktioner som aktiveras antingen av operativsystemet eller av Intel(R) PROSet II. Dessa funktioner fungerar annorlunda eller stöds inte alls beroende på vilken version av Windows som du använder.

•	Dessa Windows-versioner stöder Wake vid-inställningar: Windows 98SE, Windows Me, Windows 2000, Windows XP.

•	Dessa Windows-versioner stöder inte Wake vid-inställningar:  Windows 98 retail och Windows NT 4.0.

OBS! Endast Intel(R) PRO/100+ Management- och Server-adaptrar och Intel(R) PRO/100 S-adaptrar stöder Wake vid-inställningar.

Aktivera Wake vid-inställningar i operativsystemet

Följande typer av Wake vid-paket kräver att operativsystemet har Wake vid-inställningar aktiverade:

•	Wake vid ARP

•	Wake vid dirigerat paket

•	Wake vid NBT-fråga

Innan adaptern kan reagera på dessa typer av Wake vid-paket måste operativsystemet ha aktiverat användning av Wake vid-inställningar. Du aktiverar Wake vid-inställningar genom att gå till Enhetshanteraren och aktivera alternativet Tillåt att den här enheten tvingar datorn ur vänteläge. Så här hittar du detta alternativ:

1.	Klicka på Start > Kontrollpanelen.
Kontrollpanelens fönster öppnas.

2.	Dubbelklicka på System.
Dialogrutan för System visas.

3.	Klicka på fliken Maskinvara och klicka sedan på knappen Enhetshanteraren.
Fönstret för Enhetshanteraren öppnas.

4.	Dubbelklicka på den adaptern som du vill aktivera för Wake vid-inställningar.
Dialogrutan för Egenskaper visas.

5.	Klicka på fliken Energisparfunktioner.

6.	Klicka på Tillåt att den här enheten tvingar datorn ur vänteläge för att aktivera Wake vid-inställningar för adaptern.

Tillgängliga inställningar

Dessa Wake vid-inställningar finns tillgängliga i Intel PROSet II:

Inställning	Beskrivning
Avaktiverad	Adaptern använder inte Wake vid-inställningar.
Wake vid Magic Packet	Gör att adaptern kan starta som svar på mottagande av ett Magic Packet. Ett Magic Packet är ett paket som innehåller 16 sammanhängande kopior av den mottagande adapterns Ethernetadress. När du konfigurerar denna funktion åsidosätter Intel PROSet II operativsystemets värde för denna funktion.
Wake vid dirigerat paket	Gör att adaptern kan starta när adaptern mottar ett dirigerat paket som är ett unicast-paket som skickas till adapterns MAC-adress.  Protokollet måste aktivera denna wake-metod i drivrutinen. Om denna funktion avaktiveras kommer drivrutinen att ignorera alla protokollbegäran om att aktivera denna wake-metod.
Wake vid Magic- och dirigerade paket	Gör det möjligt för adaptern att vakna (wake up) när den mottar ett Magic- eller dirigerat paket.
Operativsystemstyrt	Ger operativsystemet fullständig kontroll över Wake vid-inställningarna.

OBS! Om flera IP-adresser konfigureras för en adapter kan operativsystemet begära att vakna (wake up) vid ARP-mönster till alla de konfigurerade adresserna. Adaptern vaknar bara som svar på ARP-paket som avfrågar den första IP-adressen i listan.

OBS! Wake vid-inställningar inkluderar inte förmågan att väcka en maskin från avstängningsläge (S5). Detta läge styrs av inställningen Aktivera PME som även finns tillgänglig på fliken Avancerat. Även om Wake vid-inställningarna är avaktiverade avgörs förmågan att vakna från S5 av inställningen Aktivera PME.

PME-inställningarna fungerar under förutsättning att adapterns drivrutin är aktiverad. När drivrutinen avaktiverats återgår maskinvaran dock till sin maskinvarustandard, som, beroende på inställning, tillåter eller inte tillåter att datorn vaknar från avstängning.


Teamtyper

Med Intel(R) PROSet II kan du konfigurera följande teamtyper:

•	Adapterfeltolerans (AFT)

•	Växelfeltolerans (SFT)

•	Anpassningsbar belastningsutjämning (ALB). Inkluderar Inkommande belastningsutjämning (RLB).

•	FEC* / LA / 802.3ad: Statisk

GEC* / LA / 802.3ad: Statisk

•	IEEE 802.3ad: Dynamiskt

Adapterfeltolerans

Funktioner	• Reserv Tillhandahåller automatisk redundans för din adapter. Om den primära adaptern slutar fungera tar den sekundära adaptern över.
Nätverkskonfiguration	• Alla adaptrar måste vara anslutna till samma växel • Sammanbindande träd måste vara frånkopplat • Alla typer av växlar stöds

Växelfeltolerans

Funktioner	• Reserv Skapar ett reservförhållande mellan två adaptrar när båda adaptrarna är anslutna till separata växlar.
Nätverkskonfiguration	• Varje adapter ansluter till en separat växel • Sammanbindande träd måste vara aktiverat

Anpassningsbar belastningsutjämning (ALB)

Funktioner	• Reserv • Utgående belastningsutjämning • Inkommande belastningsutjämning (RLB) för IP-trafik (valfritt)
Nätverkskonfiguration	• Alla adaptrar måste vara anslutna till samma växel • Alla typer av växlar stöds

FEC/ LA/ 802.3ad: Statisk

Funktioner	• Reserv • Utgående belastningsutjämning • Inkommande belastningsutjämning
Nätverkskonfiguration	• Alla adaptrar måste arbeta med 100 Mbps • Alla adaptrar måste vara anslutna till samma växel • Måste användas med en växel som kan hantera länkaggregation: • Cisco FEC-kapabla växlar som använder PAgP-protokoll • Intel Express(R)-växlar som kan hantera länkaggregation • Andra växlar som kan hantera statisk 802.3ad

GEC/ LA/ 802.3ad: Statisk

Funktioner	• Reserv • Utgående belastningsutjämning • Inkommande belastningsutjämning
Nätverkskonfiguration	• Alla adaptrar måste arbeta med 1000 Mbps • Alla adaptrar måste vara anslutna till samma växel • Måste användas med en växel som kan hantera länkaggregation: • Cisco GEC-kapabla växlar som använder PAgP-protokoll • Intel Express-växlar som kan hantera länkaggregation • Andra växlar som kan hantera statisk 802.3ad

IEEE 802.3ad: Dynamiskt

Funktioner	• Reserv • Utgående belastningsutjämning • Inkommande belastningsutjämning
Nätverkskonfiguration	• Teammedlemmarna kan arbeta med olika hastighet • Alla adaptrar måste vara anslutna till samma växel • Den växel som är ansluten till adaptrarna måste ha fullt stöd för IEEE 802.3ad-standarden
Se även:

Om Teaming


Diagnostisk logg
Konfigurera diagnostikloggen

Intel PROSet II sparar information från diagnostiska tester och sändning/svar-testet i en diagnostisk logg.

Så här konfigurerar du loggen

1.	Öppna Registereditorn. Klicka på Start > Kör. I rutan Öppna skriver du regedit.
Registereditorn öppnas.

2.	Navigera till registernyckeln HKLM\\SOFTWARE\\Intel\\NETWORK_SERVICES\\NMS\\DiagnosticsLogInformation.

3.	Ändra registerparametrarna.

Uppgift	Namn	Standardvärde	Möjliga värden
Aktivera eller avaktivera diagnostisk loggning	Aktivera	1: Aktivera	1: Aktivera 0: Avaktivera
Plats för loggfil	FilePath	System32	Någon giltig sökväg på datorn
Ange om Intel PROSet II ska behålla eller radera befintlig information i loggen	FileAppend	1: Aktivera	1: Lägg till information efter befintlig information i loggen 0: Radera befintlig information varje gång användaren kör diagnostik eller sändning/svar-testet
Anger loggens maximala filstorlek i byte	MaxFileSize	36 kb	Mängden information i byte som loggen kan innehålla.
4.	Stäng Registereditorn när du har gjort alla konfigurationsändringar för loggen.


Diagnostik: en översikt
Diagnostiköversikt

I Intel(R) PROSet II finns tre typer av diagnostiktester.

•	Diagnostiktester ger en grundläggande analys av adapterns tillstånd.  När grundläggande diagnostester körs kontrollerar Intel PROSet II I/O-konflikter, minnesfel, EEPROM-funktion, överförings- och mottagningsfunktion och länkning.

•	Kabeltestet ger information om kabellängd, polaritet och andra kabelegenskaper.

•	Sändning/svar-testet ger dig möjlighet att analysera adapterfunktion över ett nätverk. Detta är ett mer avancerat test och kräver två datorer för att kunna köras.

Testresultaten visas i Intel PROSet II. Dessutom sparar Intel PROSet II resultat från diagnostiska tester och sändning/svar-testet i en diagnostisk loggfil. Se Konfigurera diagnostikloggen för mer information.


Adapterspecifikationer

Controller	Kortets ID-nummer	Produktnamn  (kontakt)	Intel  artikelnummer
82545EM	A92165-xxx	PRO/1000 MT Server Adapter	PWLA8490MT
82546EB	A92111-xxx	PRO/1000 MT Dual Port Server Adapter	PWLA8492MT
82545EM	A91622-xxx	PRO/1000 MT Server Adapter	PWLA8490MF
82545EM	A91624-xxx	PRO/1000 MF Server Adapter (LX)	PWLA8490LX
82546EB	A91620-xxx	PRO/1000 MF Dual Port Server Adapter	PWLA8492MF
82540	A78408-xxx	PRO/1000 MT Desktop Adapter	PWLA8390MT
82544 GC	A62947-xxx	PRO/1000 T Desktop	PWLA8390T
82544 EI	A50484-xxx	PRO/1000 XF Server Adapter	PWLA8490XF
82544 EI	A73668-xxx	PRO/1000 XT Lo Profile PCI Server Adapter	PWLA8490XTL
82544 EI	A51580-xxx	PRO/1000 XT Server Adapter	PWLA8490XT
82543 GC	A19845-xxx A33948-xxx	PRO/1000 T Server Adapter	PWLA8490T
82543 GC	738640-xxx A38888-xxx	PRO/1000 F Gigabit Server Adapter	PWLA8490SX
82542	700262-xxx 717037-xxx	PRO/1000 Gigabit Server Adapter	PWLA8490
82562	A19716-xxx	PRO/100 VE Desktop Adapter	CNLA6000
82550	A78921-xxx	PRO/100 M Desktop Adapter	A69928-01
82550	751767-xxx	PRO/100 S Desktop (TP)	PILA 8460C3
82550	752438-xxx	PRO/100 S Server (TP)	PILA8470C3
82550	A56831-xxx	PRO/100 S Dual Port Server adapter	PILA8472C3
82559	741462-xxx	PRO/100+ PCI (TP)	PILA8460BN
82559	721383-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8460B
82559	748566-xxx	PRO/100 S Management (TP)	PILA8464BUS
82559	748564-xxx	PRO/100 S Management (TP)	PILA8464B
82559	742252-xxx	InBusiness™ 10/100 adapter	SA101TX
82559	352509-xxx 661949-xxx 667280-xxx 678400-xxx	EtherExpress™ PRO/100B PCI adapter(TP)	PILA8465B
82559	352433-xxx	PRO/100B PCI T4 (TP)	PILA8475B
82559	351360	PRO/100 EISA (TP)	EILA8265
82559	351361-xxx	PRO/100 PCI (TP)	PILA8465
82559	651538-xxx	PRO/100 ISA (TP)	PCLA8560
82559	670666-xxx	PRO/100 Mobile PC Card (TP)	MBLA1600
82559	670667-xxx	PRO/100 Mobile CardBus (TP)	MBLA3200
82559	687755-xxx	PRO/100 Mobile LAN+Modem56 PC Card (TP)	MBLA1656
82559	748568-xxx	PRO/100 S Server (TP)	PILA8474BUS
82559	748565-xxx	PRO/100 S Server (TP)	PILA8474B
82558	668081-xxx 689661-xxx 722762-xxx	PRO/100+ PCI (TP)	PILA8460
82558	691334-xxx	PRO/100+ PCI Management Adapter	PILA8900
82558	701738-xxx	PRO/100+ PCI Management Adapter (TP)	PILA8461
82558	714303-xxx 711269-xxx	PRO/100+ Dual Port Server adapter	PILA8472
82559	729757-xxx	PRO/100+ Server Adapter (TP)	PILA8470B
82558	710550-xxx	PRO/100+ PCI Server Adapter (TP)	PILA8470


FEC
FEC* /LA/802.3ad: Statisk

Fast EtherChannel/Link Aggregation-team höjer kapaciteten genom:

•	Adapterkonfiguration. Du kan öka kapaciteten genom att lägga till medlemmar till ett team. Ett team kan bestå av upp till åtta adaptrar. Varje server kan arbeta med upp till fyra team.

•	Trafikanalys. Programvaran analyserar oavbrutet överföringsbelastningen för varje teammedlem och utjämnar vid behov belastningen mellan adaptrarna. Växeln belastningsfördelar inkommande trafik.

Dessutom tillhandahåller FEC-team feltolerans. När en adapter i teamet får fel tar en sekundär adapter över.

Länkaggregationsteam är kompatibla med följande:

Adapterhastighet	Alla adaptrar måste arbeta med samma hastighet
Nätverkskonfiguration	• Alla adaptrar måste arbeta med 100 Mbps • Alla adaptrar måste vara anslutna till samma växel • Måste användas med en växel som kan hantera länkaggregation: • Cisco FEC-kapabla växlar som använder PAgP-protokoll • Intel Express(R)-växlar som kan hantera länkaggregation • Andra växlar som kan hantera statisk 802.3ad
Protokoll	Alla

Se även:

Om Teaming

Teamtyper


GEC
GEC* /LA/802.3ad: Statisk

Gigabit EtherChannel/Link Aggregation-team höjer kapaciteten genom:

•	Adapterkonfiguration. Du kan öka kapaciteten genom att lägga till medlemmar till ett team. Ett team kan bestå av upp till åtta adaptrar. Varje server kan arbeta med upp till fyra team.

•	Trafikanalys. Programvaran analyserar oavbrutet överföringsbelastningen för varje teammedlem och utjämnar vid behov belastningen mellan adaptrarna. Växeln belastningsfördelar inkommande trafik.

Dessutom tillhandahåller GEC-team feltolerans. När en adapter i teamet får fel tar en sekundär adapter över.

Länkaggregationsteam är kompatibla med följande:

Adapterhastighet	Alla adaptrar måste arbeta med samma hastighet
Nätverkskonfiguration	• Alla adaptrar måste arbeta med 100 Mbps • Alla adaptrar måste vara anslutna till samma växel • Måste användas med en växel som kan hantera länkaggregation: • Cisco GEC-kapabla växlar som använder PAgP-protokoll • Intel Express(R)-växlar som kan hantera länkaggregation • Andra växlar som kan hantera statisk 802.3ad
Protokoll	Alla

Se även:

Om Teaming

Teamtyper


Avaktivera adapterns energisparfunktioner

1. På skrivbordet i Windows högerklickar du på Den här datorn.

2. Klicka på Egenskaper.

3. Klicka på fliken Enhetshanteraren.

4. Dubbelklicka på ikonen Nätverkskort.

5. Dubbelklicka på Intel-nätverkskortet.

6. Om fliken Energisparfunktioner visas klickar du på den och ser till att kryssrutan
Tillåt att datorn stänger av den här enheten för att spara ström
är avmarkerad.

7. Klicka på OK. Nu kan du köra diagnostiken.

När du har kört diagnostiken kan du återställa funktionen Energisparfunktioner genom att markera kryssrutan i steg 6 ovan.